-------------- readme -----------------

Astron. Astrophys. (in press, 1994)

Atomic Data from the Iron Project: VI. Collision Strengths and

Rate Coefficients for Fe II,

Hong Lin Zhang and Anil K. Pradhan,

Dept. of Astronomy, Ohio State University

This file contains one data tables and one short program for reading this

data file. The first line of the data table is the title and the second

line gives the nuclear charge number Z, the number of the electrons per

ion, N, and the number of the fine structure levels, followed by the level

identifications, which include the configuration with or without

one set of the intermediate spin and orbital (e.g., 5D in the first level

means the intermediate spin and orbital are S=2 and L=2, and none in the

6th level), the term, the total angular momentum J, and the observed energy.

The second part of the file give the keys for the 10011 transitions between

these 142 levels. This is follwed by the third part, the effective collision

strengths for 20 temperatures. The temperature is given in K.

-------------- end of readme -----------------

-------------- beginning of the data file -----------------

Fine structure Upsilon for Fe+, log(temp(K))=3.-5.

26 25 142 (Z, Nelec, Nlevels)

1 3d6 5D 4s a6De 9 0.00000

2 7 0.00351

3 5 0.00608

4 3 0.00786

5 1 0.00890

6 3d7 a4Fe 9 0.01706

7 7 0.02214

8 5 0.02586

9 3 0.02841

10 3d6 5D 4s a4De 7 0.07249

11 5 0.07647

12 3 0.07910

13 1 0.08062

14 3d7 a4Pe 5 0.12279

15 3 0.12460

16 1 0.12671

17 3d6 3P2 4s b4Pe 5 0.18982

18 3 0.19877

19 1 0.20421

20 3d6 3H 4s a4He 13 0.19366

21 11 0.19529

22 9 0.19667

23 7 0.19785

24 3d6 3F2 4s b4Fe 9 0.20629

25 7 0.20786

26 5 0.20904

27 3 0.20988

28 3d6 3G 4s a4Ge 11 0.23172

29 9 0.23516

30 7 0.23676

31 5 0.23743

32 3d6 3D 4s b4De 7 0.28690

33 5 0.28603

34 3 0.28581

35 1 0.28585

36 3d6 5D 4p z6Do 9 0.35046

37 7 0.35230

38 5 0.35411

39 3 0.35551

40 1 0.35639

41 3d6 5D 4p z6Fo 11 0.38244

42 9 0.38378

43 7 0.38489

44 5 0.38578

45 3 0.38639

46 1 0.38674

47 3d6 5D 4p z6Po 7 0.38873

48 5 0.39402

49 3 0.39750

50 3d6 5D 4p z4Do 7 0.40503

51 5 0.40811

52 3 0.41047

53 1 0.41195

54 3d6 5D 4p z4Fo 9 0.40308

55 7 0.40783

56 5 0.41080

57 3 0.41271

58 3d6 5D 4p z4Po 5 0.42800

59 3 0.43185

60 1 0.43400

61 3d6 3F1 4s c4Fe 9 0.45707

62 7 0.45735

63 5 0.45693

64 3 0.45633

65 3d6 3P1 4s c4Pe 5 0.45757

66 3 0.45114

67 1 0.44744

68 3d6 3P2 4p z4So 3 0.54369

69 3d6 3P2 4p y4Po 5 0.55043

70 3 0.55891

71 1 0.55619

72 3d6 3H 4p z4Go 11 0.55246

73 9 0.55412

74 7 0.55548

75 5 0.55625

76 3d6 3H 4p z4Ho 13 0.55439

77 11 0.55485

78 9 0.55578

79 7 0.55730

80 3d6 3H 4p z4Io 15 0.55904

81 13 0.56068

82 11 0.56122

83 9 0.56054

84 3d6 3P2 4p y4Do 7 0.56249

85 5 0.57127

86 3 0.57375

87 1 0.57254

88 3d6 3F2 4p x4Do 7 0.57360

89 5 0.57659

90 3 0.57834

91 1 0.57920

92 3d6 3F2 4p y4Fo 9 0.56643

93 7 0.56558

94 5 0.56637

95 3 0.56721

96 3d6 3F2 4p y4Go 11 0.58208

97 9 0.58274

98 7 0.58358

99 5 0.58401

100 3d6 3G 4p x4Fo 9 0.60155

101 7 0.60487

102 5 0.60620

103 3 0.60702

104 3d6 3G 4p x4Go 11 0.59761

105 9 0.59867

106 7 0.60081

107 5 0.60215

108 3d6 3G 4p y4Ho 13 0.60519

109 11 0.60566

110 9 0.60680

111 7 0.60756

112 3d6 3D 4p w4Po 5 0.65579

113 3 0.65650

114 1 0.65805

115 3d6 3D 4p w4Do 7 0.66205

116 5 0.66176

117 3 0.66089

118 1 0.66003

119 3d6 3D 4p w4Fo 9 0.66204

120 7 0.65932

121 5 0.65829

122 3 0.65765

123 3d6 3P1 4p v4Do 7 0.79216

124 5 0.79068

125 3 0.78865

126 1 0.78723

127 3d6 3F1 4p w4Go 11 0.82207

128 9 0.82053

129 7 0.81914

130 5 0.81766

131 3d6 3P1 4p y4So 3 0.82588

132 3d6 3P1 4p u4Po 5 0.84086

133 3 0.82833

134 1 0.82779

135 3d6 3F1 4p t4Do 7 0.84866

136 5 0.84656

137 3 0.84427

138 1 0.84250

139 3d6 3F1 4p t4Fo 9 0.85189

140 7 0.85192

141 5 0.85108

142 3 0.85047

10011 transitions

1 2 1 3 1 4 1 5 1 6 1 7 1 8

1 9 1 10 1 11 1 12 1 13 1 14 1 15

1 16 1 17 1 18 1 19 1 20 1 21 1 22

1 23 1 24 1 25 1 26 1 27 1 28 1 29

1 30 1 31 1 32 1 33 1 34 1 35 1 36

1 37 1 38 1 39 1 40 1 41 1 42 1 43

1 44 1 45 1 46 1 47 1 48 1 49 1 50

1 51 1 52 1 53 1 54 1 55 1 56 1 57

1 58 1 59 1 60 1 61 1 62 1 63 1 64

1 65 1 66 1 67 1 68 1 69 1 70 1 71

1 72 1 73 1 74 1 75 1 76 1 77 1 78

1 79 1 80 1 81 1 82 1 83 1 84 1 85

1 86 1 87 1 88 1 89 1 90 1 91 1 92

1 93 1 94 1 95 1 96 1 97 1 98 1 99

1 100 1 101 1 102 1 103 1 104 1 105 1 106

1 107 1 108 1 109 1 110 1 111 1 112 1 113

1 114 1 115 1 116 1 117 1 118 1 119 1 120

1 121 1 122 1 123 1 124 1 125 1 126 1 127

1 128 1 129 1 130 1 131 1 132 1 133 1 134

1 135 1 136 1 137 1 138 1 139 1 140 1 141

1 142 2 3 2 4 2 5 2 6 2 7 2 8

2 9 2 10 2 11 2 12 2 13 2 14 2 15

2 16 2 17 2 18 2 19 2 20 2 21 2 22

2 23 2 24 2 25 2 26 2 27 2 28 2 29

2 30 2 31 2 32 2 33 2 34 2 35 2 36

2 37 2 38 2 39 2 40 2 41 2 42 2 43

2 44 2 45 2 46 2 47 2 48 2 49 2 50

2 51 2 52 2 53 2 54 2 55 2 56 2 57

2 58 2 59 2 60 2 61 2 62 2 63 2 64

2 65 2 66 2 67 2 68 2 69 2 70 2 71

2 72 2 73 2 74 2 75 2 76 2 77 2 78

2 79 2 80 2 81 2 82 2 83 2 84 2 85

2 86 2 87 2 88 2 89 2 90 2 91 2 92

2 93 2 94 2 95 2 96 2 97 2 98 2 99

2 100 2 101 2 102 2 103 2 104 2 105 2 106

2 107 2 108 2 109 2 110 2 111 2 112 2 113

2 114 2 115 2 116 2 117 2 118 2 119 2 120

2 121 2 122 2 123 2 124 2 125 2 126 2 127

2 128 2 129 2 130 2 131 2 132 2 133 2 134

2 135 2 136 2 137 2 138 2 139 2 140 2 141

2 142 3 4 3 5 3 6 3 7 3 8 3 9

3 10 3 11 3 12 3 13 3 14 3 15 3 16

3 17 3 18 3 19 3 20 3 21 3 22 3 23

3 24 3 25 3 26 3 27 3 28 3 29 3 30

3 31 3 32 3 33 3 34 3 35 3 36 3 37

3 38 3 39 3 40 3 41 3 42 3 43 3 44

3 45 3 46 3 47 3 48 3 49 3 50 3 51

3 52 3 53 3 54 3 55 3 56 3 57 3 58

3 59 3 60 3 61 3 62 3 63 3 64 3 65

3 66 3 67 3 68 3 69 3 70 3 71 3 72

3 73 3 74 3 75 3 76 3 77 3 78 3 79

3 80 3 81 3 82 3 83 3 84 3 85 3 86

3 87 3 88 3 89 3 90 3 91 3 92 3 93

3 94 3 95 3 96 3 97 3 98 3 99 3 100

3 101 3 102 3 103 3 104 3 105 3 106 3 107

3 108 3 109 3 110 3 111 3 112 3 113 3 114

3 115 3 116 3 117 3 118 3 119 3 120 3 121

3 122 3 123 3 124 3 125 3 126 3 127 3 128

3 129 3 130 3 131 3 132 3 133 3 134 3 135

3 136 3 137 3 138 3 139 3 140 3 141 3 142

4 5 4 6 4 7 4 8 4 9 4 10 4 11

4 12 4 13 4 14 4 15 4 16 4 17 4 18

4 19 4 20 4 21 4 22 4 23 4 24 4 25

4 26 4 27 4 28 4 29 4 30 4 31 4 32

4 33 4 34 4 35 4 36 4 37 4 38 4 39

4 40 4 41 4 42 4 43 4 44 4 45 4 46

4 47 4 48 4 49 4 50 4 51 4 52 4 53

4 54 4 55 4 56 4 57 4 58 4 59 4 60

4 61 4 62 4 63 4 64 4 65 4 66 4 67

4 68 4 69 4 70 4 71 4 72 4 73 4 74

4 75 4 76 4 77 4 78 4 79 4 80 4 81

4 82 4 83 4 84 4 85 4 86 4 87 4 88

4 89 4 90 4 91 4 92 4 93 4 94 4 95

4 96 4 97 4 98 4 99 4 100 4 101 4 102

4 103 4 104 4 105 4 106 4 107 4 108 4 109

4 110 4 111 4 112 4 113 4 114 4 115 4 116

4 117 4 118 4 119 4 120 4 121 4 122 4 123

4 124 4 125 4 126 4 127 4 128 4 129 4 130

4 131 4 132 4 133 4 134 4 135 4 136 4 137

4 138 4 139 4 140 4 141 4 142 5 6 5 7

5 8 5 9 5 10 5 11 5 12 5 13 5 14

5 15 5 16 5 17 5 18 5 19 5 20 5 21

5 22 5 23 5 24 5 25 5 26 5 27 5 28

5 29 5 30 5 31 5 32 5 33 5 34 5 35

5 36 5 37 5 38 5 39 5 40 5 41 5 42

5 43 5 44 5 45 5 46 5 47 5 48 5 49

5 50 5 51 5 52 5 53 5 54 5 55 5 56

5 57 5 58 5 59 5 60 5 61 5 62 5 63

5 64 5 65 5 66 5 67 5 68 5 69 5 70

5 71 5 72 5 73 5 74 5 75 5 76 5 77

5 78 5 79 5 80 5 81 5 82 5 83 5 84

5 85 5 86 5 87 5 88 5 89 5 90 5 91

5 92 5 93 5 94 5 95 5 96 5 97 5 98

5 99 5 100 5 101 5 102 5 103 5 104 5 105

5 106 5 107 5 108 5 109 5 110 5 111 5 112

5 113 5 114 5 115 5 116 5 117 5 118 5 119

5 120 5 121 5 122 5 123 5 124 5 125 5 126

5 127 5 128 5 129 5 130 5 131 5 132 5 133

5 134 5 135 5 136 5 137 5 138 5 139 5 140

5 141 5 142 6 7 6 8 6 9 6 10 6 11

6 12 6 13 6 14 6 15 6 16 6 17 6 18

6 19 6 20 6 21 6 22 6 23 6 24 6 25

6 26 6 27 6 28 6 29 6 30 6 31 6 32

6 33 6 34 6 35 6 36 6 37 6 38 6 39

6 40 6 41 6 42 6 43 6 44 6 45 6 46

6 47 6 48 6 49 6 50 6 51 6 52 6 53

6 54 6 55 6 56 6 57 6 58 6 59 6 60

6 61 6 62 6 63 6 64 6 65 6 66 6 67

6 68 6 69 6 70 6 71 6 72 6 73 6 74

6 75 6 76 6 77 6 78 6 79 6 80 6 81

6 82 6 83 6 84 6 85 6 86 6 87 6 88

6 89 6 90 6 91 6 92 6 93 6 94 6 95

6 96 6 97 6 98 6 99 6 100 6 101 6 102

6 103 6 104 6 105 6 106 6 107 6 108 6 109

6 110 6 111 6 112 6 113 6 114 6 115 6 116

6 117 6 118 6 119 6 120 6 121 6 122 6 123

6 124 6 125 6 126 6 127 6 128 6 129 6 130

6 131 6 132 6 133 6 134 6 135 6 136 6 137

6 138 6 139 6 140 6 141 6 142 7 8 7 9

7 10 7 11 7 12 7 13 7 14 7 15 7 16

7 17 7 18 7 19 7 20 7 21 7 22 7 23

7 24 7 25 7 26 7 27 7 28 7 29 7 30

7 31 7 32 7 33 7 34 7 35 7 36 7 37

7 38 7 39 7 40 7 41 7 42 7 43 7 44

7 45 7 46 7 47 7 48 7 49 7 50 7 51

7 52 7 53 7 54 7 55 7 56 7 57 7 58

7 59 7 60 7 61 7 62 7 63 7 64 7 65

7 66 7 67 7 68 7 69 7 70 7 71 7 72

7 73 7 74 7 75 7 76 7 77 7 78 7 79

7 80 7 81 7 82 7 83 7 84 7 85 7 86

7 87 7 88 7 89 7 90 7 91 7 92 7 93

7 94 7 95 7 96 7 97 7 98 7 99 7 100

7 101 7 102 7 103 7 104 7 105 7 106 7 107

7 108 7 109 7 110 7 111 7 112 7 113 7 114

7 115 7 116 7 117 7 118 7 119 7 120 7 121

7 122 7 123 7 124 7 125 7 126 7 127 7 128

7 129 7 130 7 131 7 132 7 133 7 134 7 135

7 136 7 137 7 138 7 139 7 140 7 141 7 142

8 9 8 10 8 11 8 12 8 13 8 14 8 15

8 16 8 17 8 18 8 19 8 20 8 21 8 22

8 23 8 24 8 25 8 26 8 27 8 28 8 29

8 30 8 31 8 32 8 33 8 34 8 35 8 36

8 37 8 38 8 39 8 40 8 41 8 42 8 43

8 44 8 45 8 46 8 47 8 48 8 49 8 50

8 51 8 52 8 53 8 54 8 55 8 56 8 57

8 58 8 59 8 60 8 61 8 62 8 63 8 64

8 65 8 66 8 67 8 68 8 69 8 70 8 71

8 72 8 73 8 74 8 75 8 76 8 77 8 78

8 79 8 80 8 81 8 82 8 83 8 84 8 85

8 86 8 87 8 88 8 89 8 90 8 91 8 92

8 93 8 94 8 95 8 96 8 97 8 98 8 99

8 100 8 101 8 102 8 103 8 104 8 105 8 106

8 107 8 108 8 109 8 110 8 111 8 112 8 113

8 114 8 115 8 116 8 117 8 118 8 119 8 120

8 121 8 122 8 123 8 124 8 125 8 126 8 127

8 128 8 129 8 130 8 131 8 132 8 133 8 134

8 135 8 136 8 137 8 138 8 139 8 140 8 141

8 142 9 10 9 11 9 12 9 13 9 14 9 15

9 16 9 17 9 18 9 19 9 20 9 21 9 22

9 23 9 24 9 25 9 26 9 27 9 28 9 29

9 30 9 31 9 32 9 33 9 34 9 35 9 36

9 37 9 38 9 39 9 40 9 41 9 42 9 43

9 44 9 45 9 46 9 47 9 48 9 49 9 50

9 51 9 52 9 53 9 54 9 55 9 56 9 57

9 58 9 59 9 60 9 61 9 62 9 63 9 64

9 65 9 66 9 67 9 68 9 69 9 70 9 71

9 72 9 73 9 74 9 75 9 76 9 77 9 78

9 79 9 80 9 81 9 82 9 83 9 84 9 85

9 86 9 87 9 88 9 89 9 90 9 91 9 92

9 93 9 94 9 95 9 96 9 97 9 98 9 99

9 100 9 101 9 102 9 103 9 104 9 105 9 106

9 107 9 108 9 109 9 110 9 111 9 112 9 113

9 114 9 115 9 116 9 117 9 118 9 119 9 120

9 121 9 122 9 123 9 124 9 125 9 126 9 127

9 128 9 129 9 130 9 131 9 132 9 133 9 134

9 135 9 136 9 137 9 138 9 139 9 140 9 141

9 142 10 11 10 12 10 13 10 14 10 15 10 16

10 17 10 18 10 19 10 20 10 21 10 22 10 23

10 24 10 25 10 26 10 27 10 28 10 29 10 30

10 31 10 32 10 33 10 34 10 35 10 36 10 37

10 38 10 39 10 40 10 41 10 42 10 43 10 44

10 45 10 46 10 47 10 48 10 49 10 50 10 51

10 52 10 53 10 54 10 55 10 56 10 57 10 58

10 59 10 60 10 61 10 62 10 63 10 64 10 65

10 66 10 67 10 68 10 69 10 70 10 71 10 72

10 73 10 74 10 75 10 76 10 77 10 78 10 79

10 80 10 81 10 82 10 83 10 84 10 85 10 86

10 87 10 88 10 89 10 90 10 91 10 92 10 93

10 94 10 95 10 96 10 97 10 98 10 99 10 100

10 101 10 102 10 103 10 104 10 105 10 106 10 107

10 108 10 109 10 110 10 111 10 112 10 113 10 114

10 115 10 116 10 117 10 118 10 119 10 120 10 121

10 122 10 123 10 124 10 125 10 126 10 127 10 128

10 129 10 130 10 131 10 132 10 133 10 134 10 135

10 136 10 137 10 138 10 139 10 140 10 141 10 142

11 12 11 13 11 14 11 15 11 16 11 17 11 18

11 19 11 20 11 21 11 22 11 23 11 24 11 25

11 26 11 27 11 28 11 29 11 30 11 31 11 32

11 33 11 34 11 35 11 36 11 37 11 38 11 39

11 40 11 41 11 42 11 43 11 44 11 45 11 46

11 47 11 48 11 49 11 50 11 51 11 52 11 53

11 54 11 55 11 56 11 57 11 58 11 59 11 60

11 61 11 62 11 63 11 64 11 65 11 66 11 67

11 68 11 69 11 70 11 71 11 72 11 73 11 74

11 75 11 76 11 77 11 78 11 79 11 80 11 81

11 82 11 83 11 84 11 85 11 86 11 87 11 88

11 89 11 90 11 91 11 92 11 93 11 94 11 95

11 96 11 97 11 98 11 99 11 100 11 101 11 102

11 103 11 104 11 105 11 106 11 107 11 108 11 109

11 110 11 111 11 112 11 113 11 114 11 115 11 116

11 117 11 118 11 119 11 120 11 121 11 122 11 123

11 124 11 125 11 126 11 127 11 128 11 129 11 130

11 131 11 132 11 133 11 134 11 135 11 136 11 137

11 138 11 139 11 140 11 141 11 142 12 13 12 14

12 15 12 16 12 17 12 18 12 19 12 20 12 21

12 22 12 23 12 24 12 25 12 26 12 27 12 28

12 29 12 30 12 31 12 32 12 33 12 34 12 35

12 36 12 37 12 38 12 39 12 40 12 41 12 42

12 43 12 44 12 45 12 46 12 47 12 48 12 49

12 50 12 51 12 52 12 53 12 54 12 55 12 56

12 57 12 58 12 59 12 60 12 61 12 62 12 63

12 64 12 65 12 66 12 67 12 68 12 69 12 70

12 71 12 72 12 73 12 74 12 75 12 76 12 77

12 78 12 79 12 80 12 81 12 82 12 83 12 84

12 85 12 86 12 87 12 88 12 89 12 90 12 91

12 92 12 93 12 94 12 95 12 96 12 97 12 98

12 99 12 100 12 101 12 102 12 103 12 104 12 105

12 106 12 107 12 108 12 109 12 110 12 111 12 112

12 113 12 114 12 115 12 116 12 117 12 118 12 119

12 120 12 121 12 122 12 123 12 124 12 125 12 126

12 127 12 128 12 129 12 130 12 131 12 132 12 133

12 134 12 135 12 136 12 137 12 138 12 139 12 140

12 141 12 142 13 14 13 15 13 16 13 17 13 18

13 19 13 20 13 21 13 22 13 23 13 24 13 25

13 26 13 27 13 28 13 29 13 30 13 31 13 32

13 33 13 34 13 35 13 36 13 37 13 38 13 39

13 40 13 41 13 42 13 43 13 44 13 45 13 46

13 47 13 48 13 49 13 50 13 51 13 52 13 53

13 54 13 55 13 56 13 57 13 58 13 59 13 60

13 61 13 62 13 63 13 64 13 65 13 66 13 67

13 68 13 69 13 70 13 71 13 72 13 73 13 74

13 75 13 76 13 77 13 78 13 79 13 80 13 81

13 82 13 83 13 84 13 85 13 86 13 87 13 88

13 89 13 90 13 91 13 92 13 93 13 94 13 95

13 96 13 97 13 98 13 99 13 100 13 101 13 102

13 103 13 104 13 105 13 106 13 107 13 108 13 109

13 110 13 111 13 112 13 113 13 114 13 115 13 116

13 117 13 118 13 119 13 120 13 121 13 122 13 123

13 124 13 125 13 126 13 127 13 128 13 129 13 130

13 131 13 132 13 133 13 134 13 135 13 136 13 137

13 138 13 139 13 140 13 141 13 142 14 15 14 16

14 17 14 18 14 19 14 20 14 21 14 22 14 23

14 24 14 25 14 26 14 27 14 28 14 29 14 30

14 31 14 32 14 33 14 34 14 35 14 36 14 37

14 38 14 39 14 40 14 41 14 42 14 43 14 44

14 45 14 46 14 47 14 48 14 49 14 50 14 51

14 52 14 53 14 54 14 55 14 56 14 57 14 58

14 59 14 60 14 61 14 62 14 63 14 64 14 65

14 66 14 67 14 68 14 69 14 70 14 71 14 72

14 73 14 74 14 75 14 76 14 77 14 78 14 79

14 80 14 81 14 82 14 83 14 84 14 85 14 86

14 87 14 88 14 89 14 90 14 91 14 92 14 93

14 94 14 95 14 96 14 97 14 98 14 99 14 100

14 101 14 102 14 103 14 104 14 105 14 106 14 107

14 108 14 109 14 110 14 111 14 112 14 113 14 114

14 115 14 116 14 117 14 118 14 119 14 120 14 121

14 122 14 123 14 124 14 125 14 126 14 127 14 128

14 129 14 130 14 131 14 132 14 133 14 134 14 135

14 136 14 137 14 138 14 139 14 140 14 141 14 142

15 16 15 17 15 18 15 19 15 20 15 21 15 22

15 23 15 24 15 25 15 26 15 27 15 28 15 29

15 30 15 31 15 32 15 33 15 34 15 35 15 36

15 37 15 38 15 39 15 40 15 41 15 42 15 43

15 44 15 45 15 46 15 47 15 48 15 49 15 50

15 51 15 52 15 53 15 54 15 55 15 56 15 57

15 58 15 59 15 60 15 61 15 62 15 63 15 64

15 65 15 66 15 67 15 68 15 69 15 70 15 71

15 72 15 73 15 74 15 75 15 76 15 77 15 78

15 79 15 80 15 81 15 82 15 83 15 84 15 85

15 86 15 87 15 88 15 89 15 90 15 91 15 92

15 93 15 94 15 95 15 96 15 97 15 98 15 99

15 100 15 101 15 102 15 103 15 104 15 105 15 106

15 107 15 108 15 109 15 110 15 111 15 112 15 113

15 114 15 115 15 116 15 117 15 118 15 119 15 120

15 121 15 122 15 123 15 124 15 125 15 126 15 127

15 128 15 129 15 130 15 131 15 132 15 133 15 134

15 135 15 136 15 137 15 138 15 139 15 140 15 141

15 142 16 17 16 18 16 19 16 20 16 21 16 22

16 23 16 24 16 25 16 26 16 27 16 28 16 29

16 30 16 31 16 32 16 33 16 34 16 35 16 36

16 37 16 38 16 39 16 40 16 41 16 42 16 43

16 44 16 45 16 46 16 47 16 48 16 49 16 50

16 51 16 52 16 53 16 54 16 55 16 56 16 57

16 58 16 59 16 60 16 61 16 62 16 63 16 64

16 65 16 66 16 67 16 68 16 69 16 70 16 71

16 72 16 73 16 74 16 75 16 76 16 77 16 78

16 79 16 80 16 81 16 82 16 83 16 84 16 85

16 86 16 87 16 88 16 89 16 90 16 91 16 92

16 93 16 94 16 95 16 96 16 97 16 98 16 99

16 100 16 101 16 102 16 103 16 104 16 105 16 106

16 107 16 108 16 109 16 110 16 111 16 112 16 113

16 114 16 115 16 116 16 117 16 118 16 119 16 120

16 121 16 122 16 123 16 124 16 125 16 126 16 127

16 128 16 129 16 130 16 131 16 132 16 133 16 134

16 135 16 136 16 137 16 138 16 139 16 140 16 141

16 142 17 18 17 19 17 20 17 21 17 22 17 23

17 24 17 25 17 26 17 27 17 28 17 29 17 30

17 31 17 32 17 33 17 34 17 35 17 36 17 37

17 38 17 39 17 40 17 41 17 42 17 43 17 44

17 45 17 46 17 47 17 48 17 49 17 50 17 51

17 52 17 53 17 54 17 55 17 56 17 57 17 58

17 59 17 60 17 61 17 62 17 63 17 64 17 65

17 66 17 67 17 68 17 69 17 70 17 71 17 72

17 73 17 74 17 75 17 76 17 77 17 78 17 79

17 80 17 81 17 82 17 83 17 84 17 85 17 86

17 87 17 88 17 89 17 90 17 91 17 92 17 93

17 94 17 95 17 96 17 97 17 98 17 99 17 100

17 101 17 102 17 103 17 104 17 105 17 106 17 107

17 108 17 109 17 110 17 111 17 112 17 113 17 114

17 115 17 116 17 117 17 118 17 119 17 120 17 121

17 122 17 123 17 124 17 125 17 126 17 127 17 128

17 129 17 130 17 131 17 132 17 133 17 134 17 135

17 136 17 137 17 138 17 139 17 140 17 141 17 142

18 19 18 20 18 21 18 22 18 23 18 24 18 25

18 26 18 27 18 28 18 29 18 30 18 31 18 32

18 33 18 34 18 35 18 36 18 37 18 38 18 39

18 40 18 41 18 42 18 43 18 44 18 45 18 46

18 47 18 48 18 49 18 50 18 51 18 52 18 53

18 54 18 55 18 56 18 57 18 58 18 59 18 60

18 61 18 62 18 63 18 64 18 65 18 66 18 67

18 68 18 69 18 70 18 71 18 72 18 73 18 74

18 75 18 76 18 77 18 78 18 79 18 80 18 81

18 82 18 83 18 84 18 85 18 86 18 87 18 88

18 89 18 90 18 91 18 92 18 93 18 94 18 95

18 96 18 97 18 98 18 99 18 100 18 101 18 102

18 103 18 104 18 105 18 106 18 107 18 108 18 109

18 110 18 111 18 112 18 113 18 114 18 115 18 116

18 117 18 118 18 119 18 120 18 121 18 122 18 123

18 124 18 125 18 126 18 127 18 128 18 129 18 130

18 131 18 132 18 133 18 134 18 135 18 136 18 137

18 138 18 139 18 140 18 141 18 142 19 20 19 21

19 22 19 23 19 24 19 25 19 26 19 27 19 28

19 29 19 30 19 31 19 32 19 33 19 34 19 35

19 36 19 37 19 38 19 39 19 40 19 41 19 42

19 43 19 44 19 45 19 46 19 47 19 48 19 49

19 50 19 51 19 52 19 53 19 54 19 55 19 56

19 57 19 58 19 59 19 60 19 61 19 62 19 63

19 64 19 65 19 66 19 67 19 68 19 69 19 70

19 71 19 72 19 73 19 74 19 75 19 76 19 77

19 78 19 79 19 80 19 81 19 82 19 83 19 84

19 85 19 86 19 87 19 88 19 89 19 90 19 91

19 92 19 93 19 94 19 95 19 96 19 97 19 98

19 99 19 100 19 101 19 102 19 103 19 104 19 105

19 106 19 107 19 108 19 109 19 110 19 111 19 112

19 113 19 114 19 115 19 116 19 117 19 118 19 119

19 120 19 121 19 122 19 123 19 124 19 125 19 126

19 127 19 128 19 129 19 130 19 131 19 132 19 133

19 134 19 135 19 136 19 137 19 138 19 139 19 140

19 141 19 142 20 21 20 22 20 23 20 24 20 25

20 26 20 27 20 28 20 29 20 30 20 31 20 32

20 33 20 34 20 35 20 36 20 37 20 38 20 39

20 40 20 41 20 42 20 43 20 44 20 45 20 46

20 47 20 48 20 49 20 50 20 51 20 52 20 53

20 54 20 55 20 56 20 57 20 58 20 59 20 60

20 61 20 62 20 63 20 64 20 65 20 66 20 67

20 68 20 69 20 70 20 71 20 72 20 73 20 74

20 75 20 76 20 77 20 78 20 79 20 80 20 81

20 82 20 83 20 84 20 85 20 86 20 87 20 88

20 89 20 90 20 91 20 92 20 93 20 94 20 95

20 96 20 97 20 98 20 99 20 100 20 101 20 102

20 103 20 104 20 105 20 106 20 107 20 108 20 109

20 110 20 111 20 112 20 113 20 114 20 115 20 116

20 117 20 118 20 119 20 120 20 121 20 122 20 123

20 124 20 125 20 126 20 127 20 128 20 129 20 130

20 131 20 132 20 133 20 134 20 135 20 136 20 137

20 138 20 139 20 140 20 141 20 142 21 22 21 23

21 24 21 25 21 26 21 27 21 28 21 29 21 30

21 31 21 32 21 33 21 34 21 35 21 36 21 37

21 38 21 39 21 40 21 41 21 42 21 43 21 44

21 45 21 46 21 47 21 48 21 49 21 50 21 51

21 52 21 53 21 54 21 55 21 56 21 57 21 58

21 59 21 60 21 61 21 62 21 63 21 64 21 65

21 66 21 67 21 68 21 69 21 70 21 71 21 72

21 73 21 74 21 75 21 76 21 77 21 78 21 79

21 80 21 81 21 82 21 83 21 84 21 85 21 86

21 87 21 88 21 89 21 90 21 91 21 92 21 93

21 94 21 95 21 96 21 97 21 98 21 99 21 100

21 101 21 102 21 103 21 104 21 105 21 106 21 107

21 108 21 109 21 110 21 111 21 112 21 113 21 114

21 115 21 116 21 117 21 118 21 119 21 120 21 121

21 122 21 123 21 124 21 125 21 126 21 127 21 128

21 129 21 130 21 131 21 132 21 133 21 134 21 135

21 136 21 137 21 138 21 139 21 140 21 141 21 142

22 23 22 24 22 25 22 26 22 27 22 28 22 29

22 30 22 31 22 32 22 33 22 34 22 35 22 36

22 37 22 38 22 39 22 40 22 41 22 42 22 43

22 44 22 45 22 46 22 47 22 48 22 49 22 50

22 51 22 52 22 53 22 54 22 55 22 56 22 57

22 58 22 59 22 60 22 61 22 62 22 63 22 64

22 65 22 66 22 67 22 68 22 69 22 70 22 71

22 72 22 73 22 74 22 75 22 76 22 77 22 78

22 79 22 80 22 81 22 82 22 83 22 84 22 85

22 86 22 87 22 88 22 89 22 90 22 91 22 92

22 93 22 94 22 95 22 96 22 97 22 98 22 99

22 100 22 101 22 102 22 103 22 104 22 105 22 106

22 107 22 108 22 109 22 110 22 111 22 112 22 113

22 114 22 115 22 116 22 117 22 118 22 119 22 120

22 121 22 122 22 123 22 124 22 125 22 126 22 127

22 128 22 129 22 130 22 131 22 132 22 133 22 134

22 135 22 136 22 137 22 138 22 139 22 140 22 141

22 142 23 24 23 25 23 26 23 27 23 28 23 29

23 30 23 31 23 32 23 33 23 34 23 35 23 36

23 37 23 38 23 39 23 40 23 41 23 42 23 43

23 44 23 45 23 46 23 47 23 48 23 49 23 50

23 51 23 52 23 53 23 54 23 55 23 56 23 57

23 58 23 59 23 60 23 61 23 62 23 63 23 64

23 65 23 66 23 67 23 68 23 69 23 70 23 71

23 72 23 73 23 74 23 75 23 76 23 77 23 78

23 79 23 80 23 81 23 82 23 83 23 84 23 85

23 86 23 87 23 88 23 89 23 90 23 91 23 92

23 93 23 94 23 95 23 96 23 97 23 98 23 99

23 100 23 101 23 102 23 103 23 104 23 105 23 106

23 107 23 108 23 109 23 110 23 111 23 112 23 113

23 114 23 115 23 116 23 117 23 118 23 119 23 120

23 121 23 122 23 123 23 124 23 125 23 126 23 127

23 128 23 129 23 130 23 131 23 132 23 133 23 134

23 135 23 136 23 137 23 138 23 139 23 140 23 141

23 142 24 25 24 26 24 27 24 28 24 29 24 30

24 31 24 32 24 33 24 34 24 35 24 36 24 37

24 38 24 39 24 40 24 41 24 42 24 43 24 44

24 45 24 46 24 47 24 48 24 49 24 50 24 51

24 52 24 53 24 54 24 55 24 56 24 57 24 58

24 59 24 60 24 61 24 62 24 63 24 64 24 65

24 66 24 67 24 68 24 69 24 70 24 71 24 72

24 73 24 74 24 75 24 76 24 77 24 78 24 79

24 80 24 81 24 82 24 83 24 84 24 85 24 86

24 87 24 88 24 89 24 90 24 91 24 92 24 93

24 94 24 95 24 96 24 97 24 98 24 99 24 100

24 101 24 102 24 103 24 104 24 105 24 106 24 107

24 108 24 109 24 110 24 111 24 112 24 113 24 114

24 115 24 116 24 117 24 118 24 119 24 120 24 121

24 122 24 123 24 124 24 125 24 126 24 127 24 128

24 129 24 130 24 131 24 132 24 133 24 134 24 135

24 136 24 137 24 138 24 139 24 140 24 141 24 142

25 26 25 27 25 28 25 29 25 30 25 31 25 32

25 33 25 34 25 35 25 36 25 37 25 38 25 39

25 40 25 41 25 42 25 43 25 44 25 45 25 46

25 47 25 48 25 49 25 50 25 51 25 52 25 53

25 54 25 55 25 56 25 57 25 58 25 59 25 60

25 61 25 62 25 63 25 64 25 65 25 66 25 67

25 68 25 69 25 70 25 71 25 72 25 73 25 74

25 75 25 76 25 77 25 78 25 79 25 80 25 81

25 82 25 83 25 84 25 85 25 86 25 87 25 88

25 89 25 90 25 91 25 92 25 93 25 94 25 95

25 96 25 97 25 98 25 99 25 100 25 101 25 102

25 103 25 104 25 105 25 106 25 107 25 108 25 109

25 110 25 111 25 112 25 113 25 114 25 115 25 116

25 117 25 118 25 119 25 120 25 121 25 122 25 123

25 124 25 125 25 126 25 127 25 128 25 129 25 130

25 131 25 132 25 133 25 134 25 135 25 136 25 137

25 138 25 139 25 140 25 141 25 142 26 27 26 28

26 29 26 30 26 31 26 32 26 33 26 34 26 35

26 36 26 37 26 38 26 39 26 40 26 41 26 42

26 43 26 44 26 45 26 46 26 47 26 48 26 49

26 50 26 51 26 52 26 53 26 54 26 55 26 56

26 57 26 58 26 59 26 60 26 61 26 62 26 63

26 64 26 65 26 66 26 67 26 68 26 69 26 70

26 71 26 72 26 73 26 74 26 75 26 76 26 77

26 78 26 79 26 80 26 81 26 82 26 83 26 84

26 85 26 86 26 87 26 88 26 89 26 90 26 91

26 92 26 93 26 94 26 95 26 96 26 97 26 98

26 99 26 100 26 101 26 102 26 103 26 104 26 105

26 106 26 107 26 108 26 109 26 110 26 111 26 112

26 113 26 114 26 115 26 116 26 117 26 118 26 119

26 120 26 121 26 122 26 123 26 124 26 125 26 126

26 127 26 128 26 129 26 130 26 131 26 132 26 133

26 134 26 135 26 136 26 137 26 138 26 139 26 140

26 141 26 142 27 28 27 29 27 30 27 31 27 32

27 33 27 34 27 35 27 36 27 37 27 38 27 39

27 40 27 41 27 42 27 43 27 44 27 45 27 46

27 47 27 48 27 49 27 50 27 51 27 52 27 53

27 54 27 55 27 56 27 57 27 58 27 59 27 60

27 61 27 62 27 63 27 64 27 65 27 66 27 67

27 68 27 69 27 70 27 71 27 72 27 73 27 74

27 75 27 76 27 77 27 78 27 79 27 80 27 81

27 82 27 83 27 84 27 85 27 86 27 87 27 88

27 89 27 90 27 91 27 92 27 93 27 94 27 95

27 96 27 97 27 98 27 99 27 100 27 101 27 102

27 103 27 104 27 105 27 106 27 107 27 108 27 109

27 110 27 111 27 112 27 113 27 114 27 115 27 116

27 117 27 118 27 119 27 120 27 121 27 122 27 123

27 124 27 125 27 126 27 127 27 128 27 129 27 130

27 131 27 132 27 133 27 134 27 135 27 136 27 137

27 138 27 139 27 140 27 141 27 142 28 29 28 30

28 31 28 32 28 33 28 34 28 35 28 36 28 37

28 38 28 39 28 40 28 41 28 42 28 43 28 44

28 45 28 46 28 47 28 48 28 49 28 50 28 51

28 52 28 53 28 54 28 55 28 56 28 57 28 58

28 59 28 60 28 61 28 62 28 63 28 64 28 65

28 66 28 67 28 68 28 69 28 70 28 71 28 72

28 73 28 74 28 75 28 76 28 77 28 78 28 79

28 80 28 81 28 82 28 83 28 84 28 85 28 86

28 87 28 88 28 89 28 90 28 91 28 92 28 93

28 94 28 95 28 96 28 97 28 98 28 99 28 100

28 101 28 102 28 103 28 104 28 105 28 106 28 107

28 108 28 109 28 110 28 111 28 112 28 113 28 114

28 115 28 116 28 117 28 118 28 119 28 120 28 121

28 122 28 123 28 124 28 125 28 126 28 127 28 128

28 129 28 130 28 131 28 132 28 133 28 134 28 135

28 136 28 137 28 138 28 139 28 140 28 141 28 142

29 30 29 31 29 32 29 33 29 34 29 35 29 36

29 37 29 38 29 39 29 40 29 41 29 42 29 43

29 44 29 45 29 46 29 47 29 48 29 49 29 50

29 51 29 52 29 53 29 54 29 55 29 56 29 57

29 58 29 59 29 60 29 61 29 62 29 63 29 64

29 65 29 66 29 67 29 68 29 69 29 70 29 71

29 72 29 73 29 74 29 75 29 76 29 77 29 78

29 79 29 80 29 81 29 82 29 83 29 84 29 85

29 86 29 87 29 88 29 89 29 90 29 91 29 92

29 93 29 94 29 95 29 96 29 97 29 98 29 99

29 100 29 101 29 102 29 103 29 104 29 105 29 106

29 107 29 108 29 109 29 110 29 111 29 112 29 113

29 114 29 115 29 116 29 117 29 118 29 119 29 120

29 121 29 122 29 123 29 124 29 125 29 126 29 127

29 128 29 129 29 130 29 131 29 132 29 133 29 134

29 135 29 136 29 137 29 138 29 139 29 140 29 141

29 142 30 31 30 32 30 33 30 34 30 35 30 36

30 37 30 38 30 39 30 40 30 41 30 42 30 43

30 44 30 45 30 46 30 47 30 48 30 49 30 50

30 51 30 52 30 53 30 54 30 55 30 56 30 57

30 58 30 59 30 60 30 61 30 62 30 63 30 64

30 65 30 66 30 67 30 68 30 69 30 70 30 71

30 72 30 73 30 74 30 75 30 76 30 77 30 78

30 79 30 80 30 81 30 82 30 83 30 84 30 85

30 86 30 87 30 88 30 89 30 90 30 91 30 92

30 93 30 94 30 95 30 96 30 97 30 98 30 99

30 100 30 101 30 102 30 103 30 104 30 105 30 106

30 107 30 108 30 109 30 110 30 111 30 112 30 113

30 114 30 115 30 116 30 117 30 118 30 119 30 120

30 121 30 122 30 123 30 124 30 125 30 126 30 127

30 128 30 129 30 130 30 131 30 132 30 133 30 134

30 135 30 136 30 137 30 138 30 139 30 140 30 141

30 142 31 32 31 33 31 34 31 35 31 36 31 37

31 38 31 39 31 40 31 41 31 42 31 43 31 44

31 45 31 46 31 47 31 48 31 49 31 50 31 51

31 52 31 53 31 54 31 55 31 56 31 57 31 58

31 59 31 60 31 61 31 62 31 63 31 64 31 65

31 66 31 67 31 68 31 69 31 70 31 71 31 72

31 73 31 74 31 75 31 76 31 77 31 78 31 79

31 80 31 81 31 82 31 83 31 84 31 85 31 86

31 87 31 88 31 89 31 90 31 91 31 92 31 93

31 94 31 95 31 96 31 97 31 98 31 99 31 100

31 101 31 102 31 103 31 104 31 105 31 106 31 107

31 108 31 109 31 110 31 111 31 112 31 113 31 114

31 115 31 116 31 117 31 118 31 119 31 120 31 121

31 122 31 123 31 124 31 125 31 126 31 127 31 128

31 129 31 130 31 131 31 132 31 133 31 134 31 135

31 136 31 137 31 138 31 139 31 140 31 141 31 142

32 33 32 34 32 35 32 36 32 37 32 38 32 39

32 40 32 41 32 42 32 43 32 44 32 45 32 46

32 47 32 48 32 49 32 50 32 51 32 52 32 53

32 54 32 55 32 56 32 57 32 58 32 59 32 60

32 61 32 62 32 63 32 64 32 65 32 66 32 67

32 68 32 69 32 70 32 71 32 72 32 73 32 74

32 75 32 76 32 77 32 78 32 79 32 80 32 81

32 82 32 83 32 84 32 85 32 86 32 87 32 88

32 89 32 90 32 91 32 92 32 93 32 94 32 95

32 96 32 97 32 98 32 99 32 100 32 101 32 102

32 103 32 104 32 105 32 106 32 107 32 108 32 109

32 110 32 111 32 112 32 113 32 114 32 115 32 116

32 117 32 118 32 119 32 120 32 121 32 122 32 123

32 124 32 125 32 126 32 127 32 128 32 129 32 130

32 131 32 132 32 133 32 134 32 135 32 136 32 137

32 138 32 139 32 140 32 141 32 142 33 34 33 35

33 36 33 37 33 38 33 39 33 40 33 41 33 42

33 43 33 44 33 45 33 46 33 47 33 48 33 49

33 50 33 51 33 52 33 53 33 54 33 55 33 56

33 57 33 58 33 59 33 60 33 61 33 62 33 63

33 64 33 65 33 66 33 67 33 68 33 69 33 70

33 71 33 72 33 73 33 74 33 75 33 76 33 77

33 78 33 79 33 80 33 81 33 82 33 83 33 84

33 85 33 86 33 87 33 88 33 89 33 90 33 91

33 92 33 93 33 94 33 95 33 96 33 97 33 98

33 99 33 100 33 101 33 102 33 103 33 104 33 105

33 106 33 107 33 108 33 109 33 110 33 111 33 112

33 113 33 114 33 115 33 116 33 117 33 118 33 119

33 120 33 121 33 122 33 123 33 124 33 125 33 126

33 127 33 128 33 129 33 130 33 131 33 132 33 133

33 134 33 135 33 136 33 137 33 138 33 139 33 140

33 141 33 142 34 35 34 36 34 37 34 38 34 39

34 40 34 41 34 42 34 43 34 44 34 45 34 46

34 47 34 48 34 49 34 50 34 51 34 52 34 53

34 54 34 55 34 56 34 57 34 58 34 59 34 60

34 61 34 62 34 63 34 64 34 65 34 66 34 67

34 68 34 69 34 70 34 71 34 72 34 73 34 74

34 75 34 76 34 77 34 78 34 79 34 80 34 81

34 82 34 83 34 84 34 85 34 86 34 87 34 88

34 89 34 90 34 91 34 92 34 93 34 94 34 95

34 96 34 97 34 98 34 99 34 100 34 101 34 102

34 103 34 104 34 105 34 106 34 107 34 108 34 109

34 110 34 111 34 112 34 113 34 114 34 115 34 116

34 117 34 118 34 119 34 120 34 121 34 122 34 123

34 124 34 125 34 126 34 127 34 128 34 129 34 130

34 131 34 132 34 133 34 134 34 135 34 136 34 137

34 138 34 139 34 140 34 141 34 142 35 36 35 37

35 38 35 39 35 40 35 41 35 42 35 43 35 44

35 45 35 46 35 47 35 48 35 49 35 50 35 51

35 52 35 53 35 54 35 55 35 56 35 57 35 58

35 59 35 60 35 61 35 62 35 63 35 64 35 65

35 66 35 67 35 68 35 69 35 70 35 71 35 72

35 73 35 74 35 75 35 76 35 77 35 78 35 79

35 80 35 81 35 82 35 83 35 84 35 85 35 86

35 87 35 88 35 89 35 90 35 91 35 92 35 93

35 94 35 95 35 96 35 97 35 98 35 99 35 100

35 101 35 102 35 103 35 104 35 105 35 106 35 107

35 108 35 109 35 110 35 111 35 112 35 113 35 114

35 115 35 116 35 117 35 118 35 119 35 120 35 121

35 122 35 123 35 124 35 125 35 126 35 127 35 128

35 129 35 130 35 131 35 132 35 133 35 134 35 135

35 136 35 137 35 138 35 139 35 140 35 141 35 142

36 37 36 38 36 39 36 40 36 41 36 42 36 43

36 44 36 45 36 46 36 47 36 48 36 49 36 50

36 51 36 52 36 53 36 54 36 55 36 56 36 57

36 58 36 59 36 60 36 61 36 62 36 63 36 64

36 65 36 66 36 67 36 68 36 69 36 70 36 71

36 72 36 73 36 74 36 75 36 76 36 77 36 78

36 79 36 80 36 81 36 82 36 83 36 84 36 85

36 86 36 87 36 88 36 89 36 90 36 91 36 92

36 93 36 94 36 95 36 96 36 97 36 98 36 99

36 100 36 101 36 102 36 103 36 104 36 105 36 106

36 107 36 108 36 109 36 110 36 111 36 112 36 113

36 114 36 115 36 116 36 117 36 118 36 119 36 120

36 121 36 122 36 123 36 124 36 125 36 126 36 127

36 128 36 129 36 130 36 131 36 132 36 133 36 134

36 135 36 136 36 137 36 138 36 139 36 140 36 141

36 142 37 38 37 39 37 40 37 41 37 42 37 43

37 44 37 45 37 46 37 47 37 48 37 49 37 50

37 51 37 52 37 53 37 54 37 55 37 56 37 57

37 58 37 59 37 60 37 61 37 62 37 63 37 64

37 65 37 66 37 67 37 68 37 69 37 70 37 71

37 72 37 73 37 74 37 75 37 76 37 77 37 78

37 79 37 80 37 81 37 82 37 83 37 84 37 85

37 86 37 87 37 88 37 89 37 90 37 91 37 92

37 93 37 94 37 95 37 96 37 97 37 98 37 99

37 100 37 101 37 102 37 103 37 104 37 105 37 106

37 107 37 108 37 109 37 110 37 111 37 112 37 113

37 114 37 115 37 116 37 117 37 118 37 119 37 120

37 121 37 122 37 123 37 124 37 125 37 126 37 127

37 128 37 129 37 130 37 131 37 132 37 133 37 134

37 135 37 136 37 137 37 138 37 139 37 140 37 141

37 142 38 39 38 40 38 41 38 42 38 43 38 44

38 45 38 46 38 47 38 48 38 49 38 50 38 51

38 52 38 53 38 54 38 55 38 56 38 57 38 58

38 59 38 60 38 61 38 62 38 63 38 64 38 65

38 66 38 67 38 68 38 69 38 70 38 71 38 72

38 73 38 74 38 75 38 76 38 77 38 78 38 79

38 80 38 81 38 82 38 83 38 84 38 85 38 86

38 87 38 88 38 89 38 90 38 91 38 92 38 93

38 94 38 95 38 96 38 97 38 98 38 99 38 100

38 101 38 102 38 103 38 104 38 105 38 106 38 107

38 108 38 109 38 110 38 111 38 112 38 113 38 114

38 115 38 116 38 117 38 118 38 119 38 120 38 121

38 122 38 123 38 124 38 125 38 126 38 127 38 128

38 129 38 130 38 131 38 132 38 133 38 134 38 135

38 136 38 137 38 138 38 139 38 140 38 141 38 142

39 40 39 41 39 42 39 43 39 44 39 45 39 46

39 47 39 48 39 49 39 50 39 51 39 52 39 53

39 54 39 55 39 56 39 57 39 58 39 59 39 60

39 61 39 62 39 63 39 64 39 65 39 66 39 67

39 68 39 69 39 70 39 71 39 72 39 73 39 74

39 75 39 76 39 77 39 78 39 79 39 80 39 81

39 82 39 83 39 84 39 85 39 86 39 87 39 88

39 89 39 90 39 91 39 92 39 93 39 94 39 95

39 96 39 97 39 98 39 99 39 100 39 101 39 102

39 103 39 104 39 105 39 106 39 107 39 108 39 109

39 110 39 111 39 112 39 113 39 114 39 115 39 116

39 117 39 118 39 119 39 120 39 121 39 122 39 123

39 124 39 125 39 126 39 127 39 128 39 129 39 130

39 131 39 132 39 133 39 134 39 135 39 136 39 137

39 138 39 139 39 140 39 141 39 142 40 41 40 42

40 43 40 44 40 45 40 46 40 47 40 48 40 49

40 50 40 51 40 52 40 53 40 54 40 55 40 56

40 57 40 58 40 59 40 60 40 61 40 62 40 63

40 64 40 65 40 66 40 67 40 68 40 69 40 70

40 71 40 72 40 73 40 74 40 75 40 76 40 77

40 78 40 79 40 80 40 81 40 82 40 83 40 84

40 85 40 86 40 87 40 88 40 89 40 90 40 91

40 92 40 93 40 94 40 95 40 96 40 97 40 98

40 99 40 100 40 101 40 102 40 103 40 104 40 105

40 106 40 107 40 108 40 109 40 110 40 111 40 112

40 113 40 114 40 115 40 116 40 117 40 118 40 119

40 120 40 121 40 122 40 123 40 124 40 125 40 126

40 127 40 128 40 129 40 130 40 131 40 132 40 133

40 134 40 135 40 136 40 137 40 138 40 139 40 140

40 141 40 142 41 42 41 43 41 44 41 45 41 46

41 47 41 48 41 49 41 50 41 51 41 52 41 53

41 54 41 55 41 56 41 57 41 58 41 59 41 60

41 61 41 62 41 63 41 64 41 65 41 66 41 67

41 68 41 69 41 70 41 71 41 72 41 73 41 74

41 75 41 76 41 77 41 78 41 79 41 80 41 81

41 82 41 83 41 84 41 85 41 86 41 87 41 88

41 89 41 90 41 91 41 92 41 93 41 94 41 95

41 96 41 97 41 98 41 99 41 100 41 101 41 102

41 103 41 104 41 105 41 106 41 107 41 108 41 109

41 110 41 111 41 112 41 113 41 114 41 115 41 116

41 117 41 118 41 119 41 120 41 121 41 122 41 123

41 124 41 125 41 126 41 127 41 128 41 129 41 130

41 131 41 132 41 133 41 134 41 135 41 136 41 137

41 138 41 139 41 140 41 141 41 142 42 43 42 44

42 45 42 46 42 47 42 48 42 49 42 50 42 51

42 52 42 53 42 54 42 55 42 56 42 57 42 58

42 59 42 60 42 61 42 62 42 63 42 64 42 65

42 66 42 67 42 68 42 69 42 70 42 71 42 72

42 73 42 74 42 75 42 76 42 77 42 78 42 79

42 80 42 81 42 82 42 83 42 84 42 85 42 86

42 87 42 88 42 89 42 90 42 91 42 92 42 93

42 94 42 95 42 96 42 97 42 98 42 99 42 100

42 101 42 102 42 103 42 104 42 105 42 106 42 107

42 108 42 109 42 110 42 111 42 112 42 113 42 114

42 115 42 116 42 117 42 118 42 119 42 120 42 121

42 122 42 123 42 124 42 125 42 126 42 127 42 128

42 129 42 130 42 131 42 132 42 133 42 134 42 135

42 136 42 137 42 138 42 139 42 140 42 141 42 142

43 44 43 45 43 46 43 47 43 48 43 49 43 50

43 51 43 52 43 53 43 54 43 55 43 56 43 57

43 58 43 59 43 60 43 61 43 62 43 63 43 64

43 65 43 66 43 67 43 68 43 69 43 70 43 71

43 72 43 73 43 74 43 75 43 76 43 77 43 78

43 79 43 80 43 81 43 82 43 83 43 84 43 85

43 86 43 87 43 88 43 89 43 90 43 91 43 92

43 93 43 94 43 95 43 96 43 97 43 98 43 99

43 100 43 101 43 102 43 103 43 104 43 105 43 106

43 107 43 108 43 109 43 110 43 111 43 112 43 113

43 114 43 115 43 116 43 117 43 118 43 119 43 120

43 121 43 122 43 123 43 124 43 125 43 126 43 127

43 128 43 129 43 130 43 131 43 132 43 133 43 134

43 135 43 136 43 137 43 138 43 139 43 140 43 141

43 142 44 45 44 46 44 47 44 48 44 49 44 50

44 51 44 52 44 53 44 54 44 55 44 56 44 57

44 58 44 59 44 60 44 61 44 62 44 63 44 64

44 65 44 66 44 67 44 68 44 69 44 70 44 71

44 72 44 73 44 74 44 75 44 76 44 77 44 78

44 79 44 80 44 81 44 82 44 83 44 84 44 85

44 86 44 87 44 88 44 89 44 90 44 91 44 92

44 93 44 94 44 95 44 96 44 97 44 98 44 99

44 100 44 101 44 102 44 103 44 104 44 105 44 106

44 107 44 108 44 109 44 110 44 111 44 112 44 113

44 114 44 115 44 116 44 117 44 118 44 119 44 120

44 121 44 122 44 123 44 124 44 125 44 126 44 127

44 128 44 129 44 130 44 131 44 132 44 133 44 134

44 135 44 136 44 137 44 138 44 139 44 140 44 141

44 142 45 46 45 47 45 48 45 49 45 50 45 51

45 52 45 53 45 54 45 55 45 56 45 57 45 58

45 59 45 60 45 61 45 62 45 63 45 64 45 65

45 66 45 67 45 68 45 69 45 70 45 71 45 72

45 73 45 74 45 75 45 76 45 77 45 78 45 79

45 80 45 81 45 82 45 83 45 84 45 85 45 86

45 87 45 88 45 89 45 90 45 91 45 92 45 93

45 94 45 95 45 96 45 97 45 98 45 99 45 100

45 101 45 102 45 103 45 104 45 105 45 106 45 107

45 108 45 109 45 110 45 111 45 112 45 113 45 114

45 115 45 116 45 117 45 118 45 119 45 120 45 121

45 122 45 123 45 124 45 125 45 126 45 127 45 128

45 129 45 130 45 131 45 132 45 133 45 134 45 135

45 136 45 137 45 138 45 139 45 140 45 141 45 142

46 47 46 48 46 49 46 50 46 51 46 52 46 53

46 54 46 55 46 56 46 57 46 58 46 59 46 60

46 61 46 62 46 63 46 64 46 65 46 66 46 67

46 68 46 69 46 70 46 71 46 72 46 73 46 74

46 75 46 76 46 77 46 78 46 79 46 80 46 81

46 82 46 83 46 84 46 85 46 86 46 87 46 88

46 89 46 90 46 91 46 92 46 93 46 94 46 95

46 96 46 97 46 98 46 99 46 100 46 101 46 102

46 103 46 104 46 105 46 106 46 107 46 108 46 109

46 110 46 111 46 112 46 113 46 114 46 115 46 116

46 117 46 118 46 119 46 120 46 121 46 122 46 123

46 124 46 125 46 126 46 127 46 128 46 129 46 130

46 131 46 132 46 133 46 134 46 135 46 136 46 137

46 138 46 139 46 140 46 141 46 142 47 48 47 49

47 50 47 51 47 52 47 53 47 54 47 55 47 56

47 57 47 58 47 59 47 60 47 61 47 62 47 63

47 64 47 65 47 66 47 67 47 68 47 69 47 70

47 71 47 72 47 73 47 74 47 75 47 76 47 77

47 78 47 79 47 80 47 81 47 82 47 83 47 84

47 85 47 86 47 87 47 88 47 89 47 90 47 91

47 92 47 93 47 94 47 95 47 96 47 97 47 98

47 99 47 100 47 101 47 102 47 103 47 104 47 105

47 106 47 107 47 108 47 109 47 110 47 111 47 112

47 113 47 114 47 115 47 116 47 117 47 118 47 119

47 120 47 121 47 122 47 123 47 124 47 125 47 126

47 127 47 128 47 129 47 130 47 131 47 132 47 133

47 134 47 135 47 136 47 137 47 138 47 139 47 140

47 141 47 142 48 49 48 50 48 51 48 52 48 53

48 54 48 55 48 56 48 57 48 58 48 59 48 60

48 61 48 62 48 63 48 64 48 65 48 66 48 67

48 68 48 69 48 70 48 71 48 72 48 73 48 74

48 75 48 76 48 77 48 78 48 79 48 80 48 81

48 82 48 83 48 84 48 85 48 86 48 87 48 88

48 89 48 90 48 91 48 92 48 93 48 94 48 95

48 96 48 97 48 98 48 99 48 100 48 101 48 102

48 103 48 104 48 105 48 106 48 107 48 108 48 109

48 110 48 111 48 112 48 113 48 114 48 115 48 116

48 117 48 118 48 119 48 120 48 121 48 122 48 123

48 124 48 125 48 126 48 127 48 128 48 129 48 130

48 131 48 132 48 133 48 134 48 135 48 136 48 137

48 138 48 139 48 140 48 141 48 142 49 50 49 51

49 52 49 53 49 54 49 55 49 56 49 57 49 58

49 59 49 60 49 61 49 62 49 63 49 64 49 65

49 66 49 67 49 68 49 69 49 70 49 71 49 72

49 73 49 74 49 75 49 76 49 77 49 78 49 79

49 80 49 81 49 82 49 83 49 84 49 85 49 86

49 87 49 88 49 89 49 90 49 91 49 92 49 93

49 94 49 95 49 96 49 97 49 98 49 99 49 100

49 101 49 102 49 103 49 104 49 105 49 106 49 107

49 108 49 109 49 110 49 111 49 112 49 113 49 114

49 115 49 116 49 117 49 118 49 119 49 120 49 121

49 122 49 123 49 124 49 125 49 126 49 127 49 128

49 129 49 130 49 131 49 132 49 133 49 134 49 135

49 136 49 137 49 138 49 139 49 140 49 141 49 142

50 51 50 52 50 53 50 54 50 55 50 56 50 57

50 58 50 59 50 60 50 61 50 62 50 63 50 64

50 65 50 66 50 67 50 68 50 69 50 70 50 71

50 72 50 73 50 74 50 75 50 76 50 77 50 78

50 79 50 80 50 81 50 82 50 83 50 84 50 85

50 86 50 87 50 88 50 89 50 90 50 91 50 92

50 93 50 94 50 95 50 96 50 97 50 98 50 99

50 100 50 101 50 102 50 103 50 104 50 105 50 106

50 107 50 108 50 109 50 110 50 111 50 112 50 113

50 114 50 115 50 116 50 117 50 118 50 119 50 120

50 121 50 122 50 123 50 124 50 125 50 126 50 127

50 128 50 129 50 130 50 131 50 132 50 133 50 134

50 135 50 136 50 137 50 138 50 139 50 140 50 141

50 142 51 52 51 53 51 54 51 55 51 56 51 57

51 58 51 59 51 60 51 61 51 62 51 63 51 64

51 65 51 66 51 67 51 68 51 69 51 70 51 71

51 72 51 73 51 74 51 75 51 76 51 77 51 78

51 79 51 80 51 81 51 82 51 83 51 84 51 85

51 86 51 87 51 88 51 89 51 90 51 91 51 92

51 93 51 94 51 95 51 96 51 97 51 98 51 99

51 100 51 101 51 102 51 103 51 104 51 105 51 106

51 107 51 108 51 109 51 110 51 111 51 112 51 113

51 114 51 115 51 116 51 117 51 118 51 119 51 120

51 121 51 122 51 123 51 124 51 125 51 126 51 127

51 128 51 129 51 130 51 131 51 132 51 133 51 134

51 135 51 136 51 137 51 138 51 139 51 140 51 141

51 142 52 53 52 54 52 55 52 56 52 57 52 58

52 59 52 60 52 61 52 62 52 63 52 64 52 65

52 66 52 67 52 68 52 69 52 70 52 71 52 72

52 73 52 74 52 75 52 76 52 77 52 78 52 79

52 80 52 81 52 82 52 83 52 84 52 85 52 86

52 87 52 88 52 89 52 90 52 91 52 92 52 93

52 94 52 95 52 96 52 97 52 98 52 99 52 100

52 101 52 102 52 103 52 104 52 105 52 106 52 107

52 108 52 109 52 110 52 111 52 112 52 113 52 114

52 115 52 116 52 117 52 118 52 119 52 120 52 121

52 122 52 123 52 124 52 125 52 126 52 127 52 128

52 129 52 130 52 131 52 132 52 133 52 134 52 135

52 136 52 137 52 138 52 139 52 140 52 141 52 142

53 54 53 55 53 56 53 57 53 58 53 59 53 60

53 61 53 62 53 63 53 64 53 65 53 66 53 67

53 68 53 69 53 70 53 71 53 72 53 73 53 74

53 75 53 76 53 77 53 78 53 79 53 80 53 81

53 82 53 83 53 84 53 85 53 86 53 87 53 88

53 89 53 90 53 91 53 92 53 93 53 94 53 95

53 96 53 97 53 98 53 99 53 100 53 101 53 102

53 103 53 104 53 105 53 106 53 107 53 108 53 109

53 110 53 111 53 112 53 113 53 114 53 115 53 116

53 117 53 118 53 119 53 120 53 121 53 122 53 123

53 124 53 125 53 126 53 127 53 128 53 129 53 130

53 131 53 132 53 133 53 134 53 135 53 136 53 137

53 138 53 139 53 140 53 141 53 142 54 55 54 56

54 57 54 58 54 59 54 60 54 61 54 62 54 63

54 64 54 65 54 66 54 67 54 68 54 69 54 70

54 71 54 72 54 73 54 74 54 75 54 76 54 77

54 78 54 79 54 80 54 81 54 82 54 83 54 84

54 85 54 86 54 87 54 88 54 89 54 90 54 91

54 92 54 93 54 94 54 95 54 96 54 97 54 98

54 99 54 100 54 101 54 102 54 103 54 104 54 105

54 106 54 107 54 108 54 109 54 110 54 111 54 112

54 113 54 114 54 115 54 116 54 117 54 118 54 119

54 120 54 121 54 122 54 123 54 124 54 125 54 126

54 127 54 128 54 129 54 130 54 131 54 132 54 133

54 134 54 135 54 136 54 137 54 138 54 139 54 140

54 141 54 142 55 56 55 57 55 58 55 59 55 60

55 61 55 62 55 63 55 64 55 65 55 66 55 67

55 68 55 69 55 70 55 71 55 72 55 73 55 74

55 75 55 76 55 77 55 78 55 79 55 80 55 81

55 82 55 83 55 84 55 85 55 86 55 87 55 88

55 89 55 90 55 91 55 92 55 93 55 94 55 95

55 96 55 97 55 98 55 99 55 100 55 101 55 102

55 103 55 104 55 105 55 106 55 107 55 108 55 109

55 110 55 111 55 112 55 113 55 114 55 115 55 116

55 117 55 118 55 119 55 120 55 121 55 122 55 123

55 124 55 125 55 126 55 127 55 128 55 129 55 130

55 131 55 132 55 133 55 134 55 135 55 136 55 137

55 138 55 139 55 140 55 141 55 142 56 57 56 58

56 59 56 60 56 61 56 62 56 63 56 64 56 65

56 66 56 67 56 68 56 69 56 70 56 71 56 72

56 73 56 74 56 75 56 76 56 77 56 78 56 79

56 80 56 81 56 82 56 83 56 84 56 85 56 86

56 87 56 88 56 89 56 90 56 91 56 92 56 93

56 94 56 95 56 96 56 97 56 98 56 99 56 100

56 101 56 102 56 103 56 104 56 105 56 106 56 107

56 108 56 109 56 110 56 111 56 112 56 113 56 114

56 115 56 116 56 117 56 118 56 119 56 120 56 121

56 122 56 123 56 124 56 125 56 126 56 127 56 128

56 129 56 130 56 131 56 132 56 133 56 134 56 135

56 136 56 137 56 138 56 139 56 140 56 141 56 142

57 58 57 59 57 60 57 61 57 62 57 63 57 64

57 65 57 66 57 67 57 68 57 69 57 70 57 71

57 72 57 73 57 74 57 75 57 76 57 77 57 78

57 79 57 80 57 81 57 82 57 83 57 84 57 85

57 86 57 87 57 88 57 89 57 90 57 91 57 92

57 93 57 94 57 95 57 96 57 97 57 98 57 99

57 100 57 101 57 102 57 103 57 104 57 105 57 106

57 107 57 108 57 109 57 110 57 111 57 112 57 113

57 114 57 115 57 116 57 117 57 118 57 119 57 120

57 121 57 122 57 123 57 124 57 125 57 126 57 127

57 128 57 129 57 130 57 131 57 132 57 133 57 134

57 135 57 136 57 137 57 138 57 139 57 140 57 141

57 142 58 59 58 60 58 61 58 62 58 63 58 64

58 65 58 66 58 67 58 68 58 69 58 70 58 71

58 72 58 73 58 74 58 75 58 76 58 77 58 78

58 79 58 80 58 81 58 82 58 83 58 84 58 85

58 86 58 87 58 88 58 89 58 90 58 91 58 92

58 93 58 94 58 95 58 96 58 97 58 98 58 99

58 100 58 101 58 102 58 103 58 104 58 105 58 106

58 107 58 108 58 109 58 110 58 111 58 112 58 113

58 114 58 115 58 116 58 117 58 118 58 119 58 120

58 121 58 122 58 123 58 124 58 125 58 126 58 127

58 128 58 129 58 130 58 131 58 132 58 133 58 134

58 135 58 136 58 137 58 138 58 139 58 140 58 141

58 142 59 60 59 61 59 62 59 63 59 64 59 65

59 66 59 67 59 68 59 69 59 70 59 71 59 72

59 73 59 74 59 75 59 76 59 77 59 78 59 79

59 80 59 81 59 82 59 83 59 84 59 85 59 86

59 87 59 88 59 89 59 90 59 91 59 92 59 93

59 94 59 95 59 96 59 97 59 98 59 99 59 100

59 101 59 102 59 103 59 104 59 105 59 106 59 107

59 108 59 109 59 110 59 111 59 112 59 113 59 114

59 115 59 116 59 117 59 118 59 119 59 120 59 121

59 122 59 123 59 124 59 125 59 126 59 127 59 128

59 129 59 130 59 131 59 132 59 133 59 134 59 135

59 136 59 137 59 138 59 139 59 140 59 141 59 142

60 61 60 62 60 63 60 64 60 65 60 66 60 67

60 68 60 69 60 70 60 71 60 72 60 73 60 74

60 75 60 76 60 77 60 78 60 79 60 80 60 81

60 82 60 83 60 84 60 85 60 86 60 87 60 88

60 89 60 90 60 91 60 92 60 93 60 94 60 95

60 96 60 97 60 98 60 99 60 100 60 101 60 102

60 103 60 104 60 105 60 106 60 107 60 108 60 109

60 110 60 111 60 112 60 113 60 114 60 115 60 116

60 117 60 118 60 119 60 120 60 121 60 122 60 123

60 124 60 125 60 126 60 127 60 128 60 129 60 130

60 131 60 132 60 133 60 134 60 135 60 136 60 137

60 138 60 139 60 140 60 141 60 142 61 62 61 63

61 64 61 65 61 66 61 67 61 68 61 69 61 70

61 71 61 72 61 73 61 74 61 75 61 76 61 77

61 78 61 79 61 80 61 81 61 82 61 83 61 84

61 85 61 86 61 87 61 88 61 89 61 90 61 91

61 92 61 93 61 94 61 95 61 96 61 97 61 98

61 99 61 100 61 101 61 102 61 103 61 104 61 105

61 106 61 107 61 108 61 109 61 110 61 111 61 112

61 113 61 114 61 115 61 116 61 117 61 118 61 119

61 120 61 121 61 122 61 123 61 124 61 125 61 126

61 127 61 128 61 129 61 130 61 131 61 132 61 133

61 134 61 135 61 136 61 137 61 138 61 139 61 140

61 141 61 142 62 63 62 64 62 65 62 66 62 67

62 68 62 69 62 70 62 71 62 72 62 73 62 74

62 75 62 76 62 77 62 78 62 79 62 80 62 81

62 82 62 83 62 84 62 85 62 86 62 87 62 88

62 89 62 90 62 91 62 92 62 93 62 94 62 95

62 96 62 97 62 98 62 99 62 100 62 101 62 102

62 103 62 104 62 105 62 106 62 107 62 108 62 109

62 110 62 111 62 112 62 113 62 114 62 115 62 116

62 117 62 118 62 119 62 120 62 121 62 122 62 123

62 124 62 125 62 126 62 127 62 128 62 129 62 130

62 131 62 132 62 133 62 134 62 135 62 136 62 137

62 138 62 139 62 140 62 141 62 142 63 64 63 65

63 66 63 67 63 68 63 69 63 70 63 71 63 72

63 73 63 74 63 75 63 76 63 77 63 78 63 79

63 80 63 81 63 82 63 83 63 84 63 85 63 86

63 87 63 88 63 89 63 90 63 91 63 92 63 93

63 94 63 95 63 96 63 97 63 98 63 99 63 100

63 101 63 102 63 103 63 104 63 105 63 106 63 107

63 108 63 109 63 110 63 111 63 112 63 113 63 114

63 115 63 116 63 117 63 118 63 119 63 120 63 121

63 122 63 123 63 124 63 125 63 126 63 127 63 128

63 129 63 130 63 131 63 132 63 133 63 134 63 135

63 136 63 137 63 138 63 139 63 140 63 141 63 142

64 65 64 66 64 67 64 68 64 69 64 70 64 71

64 72 64 73 64 74 64 75 64 76 64 77 64 78

64 79 64 80 64 81 64 82 64 83 64 84 64 85

64 86 64 87 64 88 64 89 64 90 64 91 64 92

64 93 64 94 64 95 64 96 64 97 64 98 64 99

64 100 64 101 64 102 64 103 64 104 64 105 64 106

64 107 64 108 64 109 64 110 64 111 64 112 64 113

64 114 64 115 64 116 64 117 64 118 64 119 64 120

64 121 64 122 64 123 64 124 64 125 64 126 64 127

64 128 64 129 64 130 64 131 64 132 64 133 64 134

64 135 64 136 64 137 64 138 64 139 64 140 64 141

64 142 65 66 65 67 65 68 65 69 65 70 65 71

65 72 65 73 65 74 65 75 65 76 65 77 65 78

65 79 65 80 65 81 65 82 65 83 65 84 65 85

65 86 65 87 65 88 65 89 65 90 65 91 65 92

65 93 65 94 65 95 65 96 65 97 65 98 65 99

65 100 65 101 65 102 65 103 65 104 65 105 65 106

65 107 65 108 65 109 65 110 65 111 65 112 65 113

65 114 65 115 65 116 65 117 65 118 65 119 65 120

65 121 65 122 65 123 65 124 65 125 65 126 65 127

65 128 65 129 65 130 65 131 65 132 65 133 65 134

65 135 65 136 65 137 65 138 65 139 65 140 65 141

65 142 66 67 66 68 66 69 66 70 66 71 66 72

66 73 66 74 66 75 66 76 66 77 66 78 66 79

66 80 66 81 66 82 66 83 66 84 66 85 66 86

66 87 66 88 66 89 66 90 66 91 66 92 66 93

66 94 66 95 66 96 66 97 66 98 66 99 66 100

66 101 66 102 66 103 66 104 66 105 66 106 66 107

66 108 66 109 66 110 66 111 66 112 66 113 66 114

66 115 66 116 66 117 66 118 66 119 66 120 66 121

66 122 66 123 66 124 66 125 66 126 66 127 66 128

66 129 66 130 66 131 66 132 66 133 66 134 66 135

66 136 66 137 66 138 66 139 66 140 66 141 66 142

67 68 67 69 67 70 67 71 67 72 67 73 67 74

67 75 67 76 67 77 67 78 67 79 67 80 67 81

67 82 67 83 67 84 67 85 67 86 67 87 67 88

67 89 67 90 67 91 67 92 67 93 67 94 67 95

67 96 67 97 67 98 67 99 67 100 67 101 67 102

67 103 67 104 67 105 67 106 67 107 67 108 67 109

67 110 67 111 67 112 67 113 67 114 67 115 67 116

67 117 67 118 67 119 67 120 67 121 67 122 67 123

67 124 67 125 67 126 67 127 67 128 67 129 67 130

67 131 67 132 67 133 67 134 67 135 67 136 67 137

67 138 67 139 67 140 67 141 67 142 68 69 68 70

68 71 68 72 68 73 68 74 68 75 68 76 68 77

68 78 68 79 68 80 68 81 68 82 68 83 68 84

68 85 68 86 68 87 68 88 68 89 68 90 68 91

68 92 68 93 68 94 68 95 68 96 68 97 68 98

68 99 68 100 68 101 68 102 68 103 68 104 68 105

68 106 68 107 68 108 68 109 68 110 68 111 68 112

68 113 68 114 68 115 68 116 68 117 68 118 68 119

68 120 68 121 68 122 68 123 68 124 68 125 68 126

68 127 68 128 68 129 68 130 68 131 68 132 68 133

68 134 68 135 68 136 68 137 68 138 68 139 68 140

68 141 68 142 69 70 69 71 69 72 69 73 69 74

69 75 69 76 69 77 69 78 69 79 69 80 69 81

69 82 69 83 69 84 69 85 69 86 69 87 69 88

69 89 69 90 69 91 69 92 69 93 69 94 69 95

69 96 69 97 69 98 69 99 69 100 69 101 69 102

69 103 69 104 69 105 69 106 69 107 69 108 69 109

69 110 69 111 69 112 69 113 69 114 69 115 69 116

69 117 69 118 69 119 69 120 69 121 69 122 69 123

69 124 69 125 69 126 69 127 69 128 69 129 69 130

69 131 69 132 69 133 69 134 69 135 69 136 69 137

69 138 69 139 69 140 69 141 69 142 70 71 70 72

70 73 70 74 70 75 70 76 70 77 70 78 70 79

70 80 70 81 70 82 70 83 70 84 70 85 70 86

70 87 70 88 70 89 70 90 70 91 70 92 70 93

70 94 70 95 70 96 70 97 70 98 70 99 70 100

70 101 70 102 70 103 70 104 70 105 70 106 70 107

70 108 70 109 70 110 70 111 70 112 70 113 70 114

70 115 70 116 70 117 70 118 70 119 70 120 70 121

70 122 70 123 70 124 70 125 70 126 70 127 70 128

70 129 70 130 70 131 70 132 70 133 70 134 70 135

70 136 70 137 70 138 70 139 70 140 70 141 70 142

71 72 71 73 71 74 71 75 71 76 71 77 71 78

71 79 71 80 71 81 71 82 71 83 71 84 71 85

71 86 71 87 71 88 71 89 71 90 71 91 71 92

71 93 71 94 71 95 71 96 71 97 71 98 71 99

71 100 71 101 71 102 71 103 71 104 71 105 71 106

71 107 71 108 71 109 71 110 71 111 71 112 71 113

71 114 71 115 71 116 71 117 71 118 71 119 71 120

71 121 71 122 71 123 71 124 71 125 71 126 71 127

71 128 71 129 71 130 71 131 71 132 71 133 71 134

71 135 71 136 71 137 71 138 71 139 71 140 71 141

71 142 72 73 72 74 72 75 72 76 72 77 72 78

72 79 72 80 72 81 72 82 72 83 72 84 72 85

72 86 72 87 72 88 72 89 72 90 72 91 72 92

72 93 72 94 72 95 72 96 72 97 72 98 72 99

72 100 72 101 72 102 72 103 72 104 72 105 72 106

72 107 72 108 72 109 72 110 72 111 72 112 72 113

72 114 72 115 72 116 72 117 72 118 72 119 72 120

72 121 72 122 72 123 72 124 72 125 72 126 72 127

72 128 72 129 72 130 72 131 72 132 72 133 72 134

72 135 72 136 72 137 72 138 72 139 72 140 72 141

72 142 73 74 73 75 73 76 73 77 73 78 73 79

73 80 73 81 73 82 73 83 73 84 73 85 73 86

73 87 73 88 73 89 73 90 73 91 73 92 73 93

73 94 73 95 73 96 73 97 73 98 73 99 73 100

73 101 73 102 73 103 73 104 73 105 73 106 73 107

73 108 73 109 73 110 73 111 73 112 73 113 73 114

73 115 73 116 73 117 73 118 73 119 73 120 73 121

73 122 73 123 73 124 73 125 73 126 73 127 73 128

73 129 73 130 73 131 73 132 73 133 73 134 73 135

73 136 73 137 73 138 73 139 73 140 73 141 73 142

74 75 74 76 74 77 74 78 74 79 74 80 74 81

74 82 74 83 74 84 74 85 74 86 74 87 74 88

74 89 74 90 74 91 74 92 74 93 74 94 74 95

74 96 74 97 74 98 74 99 74 100 74 101 74 102

74 103 74 104 74 105 74 106 74 107 74 108 74 109

74 110 74 111 74 112 74 113 74 114 74 115 74 116

74 117 74 118 74 119 74 120 74 121 74 122 74 123

74 124 74 125 74 126 74 127 74 128 74 129 74 130

74 131 74 132 74 133 74 134 74 135 74 136 74 137

74 138 74 139 74 140 74 141 74 142 75 76 75 77

75 78 75 79 75 80 75 81 75 82 75 83 75 84

75 85 75 86 75 87 75 88 75 89 75 90 75 91

75 92 75 93 75 94 75 95 75 96 75 97 75 98

75 99 75 100 75 101 75 102 75 103 75 104 75 105

75 106 75 107 75 108 75 109 75 110 75 111 75 112

75 113 75 114 75 115 75 116 75 117 75 118 75 119

75 120 75 121 75 122 75 123 75 124 75 125 75 126

75 127 75 128 75 129 75 130 75 131 75 132 75 133

75 134 75 135 75 136 75 137 75 138 75 139 75 140

75 141 75 142 76 77 76 78 76 79 76 80 76 81

76 82 76 83 76 84 76 85 76 86 76 87 76 88

76 89 76 90 76 91 76 92 76 93 76 94 76 95

76 96 76 97 76 98 76 99 76 100 76 101 76 102

76 103 76 104 76 105 76 106 76 107 76 108 76 109

76 110 76 111 76 112 76 113 76 114 76 115 76 116

76 117 76 118 76 119 76 120 76 121 76 122 76 123

76 124 76 125 76 126 76 127 76 128 76 129 76 130

76 131 76 132 76 133 76 134 76 135 76 136 76 137

76 138 76 139 76 140 76 141 76 142 77 78 77 79

77 80 77 81 77 82 77 83 77 84 77 85 77 86

77 87 77 88 77 89 77 90 77 91 77 92 77 93

77 94 77 95 77 96 77 97 77 98 77 99 77 100

77 101 77 102 77 103 77 104 77 105 77 106 77 107

77 108 77 109 77 110 77 111 77 112 77 113 77 114

77 115 77 116 77 117 77 118 77 119 77 120 77 121

77 122 77 123 77 124 77 125 77 126 77 127 77 128

77 129 77 130 77 131 77 132 77 133 77 134 77 135

77 136 77 137 77 138 77 139 77 140 77 141 77 142

78 79 78 80 78 81 78 82 78 83 78 84 78 85

78 86 78 87 78 88 78 89 78 90 78 91 78 92

78 93 78 94 78 95 78 96 78 97 78 98 78 99

78 100 78 101 78 102 78 103 78 104 78 105 78 106

78 107 78 108 78 109 78 110 78 111 78 112 78 113

78 114 78 115 78 116 78 117 78 118 78 119 78 120

78 121 78 122 78 123 78 124 78 125 78 126 78 127

78 128 78 129 78 130 78 131 78 132 78 133 78 134

78 135 78 136 78 137 78 138 78 139 78 140 78 141

78 142 79 80 79 81 79 82 79 83 79 84 79 85

79 86 79 87 79 88 79 89 79 90 79 91 79 92

79 93 79 94 79 95 79 96 79 97 79 98 79 99

79 100 79 101 79 102 79 103 79 104 79 105 79 106

79 107 79 108 79 109 79 110 79 111 79 112 79 113

79 114 79 115 79 116 79 117 79 118 79 119 79 120

79 121 79 122 79 123 79 124 79 125 79 126 79 127

79 128 79 129 79 130 79 131 79 132 79 133 79 134

79 135 79 136 79 137 79 138 79 139 79 140 79 141

79 142 80 81 80 82 80 83 80 84 80 85 80 86

80 87 80 88 80 89 80 90 80 91 80 92 80 93

80 94 80 95 80 96 80 97 80 98 80 99 80 100

80 101 80 102 80 103 80 104 80 105 80 106 80 107

80 108 80 109 80 110 80 111 80 112 80 113 80 114

80 115 80 116 80 117 80 118 80 119 80 120 80 121

80 122 80 123 80 124 80 125 80 126 80 127 80 128

80 129 80 130 80 131 80 132 80 133 80 134 80 135

80 136 80 137 80 138 80 139 80 140 80 141 80 142

81 82 81 83 81 84 81 85 81 86 81 87 81 88

81 89 81 90 81 91 81 92 81 93 81 94 81 95

81 96 81 97 81 98 81 99 81 100 81 101 81 102

81 103 81 104 81 105 81 106 81 107 81 108 81 109

81 110 81 111 81 112 81 113 81 114 81 115 81 116

81 117 81 118 81 119 81 120 81 121 81 122 81 123

81 124 81 125 81 126 81 127 81 128 81 129 81 130

81 131 81 132 81 133 81 134 81 135 81 136 81 137

81 138 81 139 81 140 81 141 81 142 82 83 82 84

82 85 82 86 82 87 82 88 82 89 82 90 82 91

82 92 82 93 82 94 82 95 82 96 82 97 82 98

82 99 82 100 82 101 82 102 82 103 82 104 82 105

82 106 82 107 82 108 82 109 82 110 82 111 82 112

82 113 82 114 82 115 82 116 82 117 82 118 82 119

82 120 82 121 82 122 82 123 82 124 82 125 82 126

82 127 82 128 82 129 82 130 82 131 82 132 82 133

82 134 82 135 82 136 82 137 82 138 82 139 82 140

82 141 82 142 83 84 83 85 83 86 83 87 83 88

83 89 83 90 83 91 83 92 83 93 83 94 83 95

83 96 83 97 83 98 83 99 83 100 83 101 83 102

83 103 83 104 83 105 83 106 83 107 83 108 83 109

83 110 83 111 83 112 83 113 83 114 83 115 83 116

83 117 83 118 83 119 83 120 83 121 83 122 83 123

83 124 83 125 83 126 83 127 83 128 83 129 83 130

83 131 83 132 83 133 83 134 83 135 83 136 83 137

83 138 83 139 83 140 83 141 83 142 84 85 84 86

84 87 84 88 84 89 84 90 84 91 84 92 84 93

84 94 84 95 84 96 84 97 84 98 84 99 84 100

84 101 84 102 84 103 84 104 84 105 84 106 84 107

84 108 84 109 84 110 84 111 84 112 84 113 84 114

84 115 84 116 84 117 84 118 84 119 84 120 84 121

84 122 84 123 84 124 84 125 84 126 84 127 84 128

84 129 84 130 84 131 84 132 84 133 84 134 84 135

84 136 84 137 84 138 84 139 84 140 84 141 84 142

85 86 85 87 85 88 85 89 85 90 85 91 85 92

85 93 85 94 85 95 85 96 85 97 85 98 85 99

85 100 85 101 85 102 85 103 85 104 85 105 85 106

85 107 85 108 85 109 85 110 85 111 85 112 85 113

85 114 85 115 85 116 85 117 85 118 85 119 85 120

85 121 85 122 85 123 85 124 85 125 85 126 85 127

85 128 85 129 85 130 85 131 85 132 85 133 85 134

85 135 85 136 85 137 85 138 85 139 85 140 85 141

85 142 86 87 86 88 86 89 86 90 86 91 86 92

86 93 86 94 86 95 86 96 86 97 86 98 86 99

86 100 86 101 86 102 86 103 86 104 86 105 86 106

86 107 86 108 86 109 86 110 86 111 86 112 86 113

86 114 86 115 86 116 86 117 86 118 86 119 86 120

86 121 86 122 86 123 86 124 86 125 86 126 86 127

86 128 86 129 86 130 86 131 86 132 86 133 86 134

86 135 86 136 86 137 86 138 86 139 86 140 86 141

86 142 87 88 87 89 87 90 87 91 87 92 87 93

87 94 87 95 87 96 87 97 87 98 87 99 87 100

87 101 87 102 87 103 87 104 87 105 87 106 87 107

87 108 87 109 87 110 87 111 87 112 87 113 87 114

87 115 87 116 87 117 87 118 87 119 87 120 87 121

87 122 87 123 87 124 87 125 87 126 87 127 87 128

87 129 87 130 87 131 87 132 87 133 87 134 87 135

87 136 87 137 87 138 87 139 87 140 87 141 87 142

88 89 88 90 88 91 88 92 88 93 88 94 88 95

88 96 88 97 88 98 88 99 88 100 88 101 88 102

88 103 88 104 88 105 88 106 88 107 88 108 88 109

88 110 88 111 88 112 88 113 88 114 88 115 88 116

88 117 88 118 88 119 88 120 88 121 88 122 88 123

88 124 88 125 88 126 88 127 88 128 88 129 88 130

88 131 88 132 88 133 88 134 88 135 88 136 88 137

88 138 88 139 88 140 88 141 88 142 89 90 89 91

89 92 89 93 89 94 89 95 89 96 89 97 89 98

89 99 89 100 89 101 89 102 89 103 89 104 89 105

89 106 89 107 89 108 89 109 89 110 89 111 89 112

89 113 89 114 89 115 89 116 89 117 89 118 89 119

89 120 89 121 89 122 89 123 89 124 89 125 89 126

89 127 89 128 89 129 89 130 89 131 89 132 89 133

89 134 89 135 89 136 89 137 89 138 89 139 89 140

89 141 89 142 90 91 90 92 90 93 90 94 90 95

90 96 90 97 90 98 90 99 90 100 90 101 90 102

90 103 90 104 90 105 90 106 90 107 90 108 90 109

90 110 90 111 90 112 90 113 90 114 90 115 90 116

90 117 90 118 90 119 90 120 90 121 90 122 90 123

90 124 90 125 90 126 90 127 90 128 90 129 90 130

90 131 90 132 90 133 90 134 90 135 90 136 90 137

90 138 90 139 90 140 90 141 90 142 91 92 91 93

91 94 91 95 91 96 91 97 91 98 91 99 91 100

91 101 91 102 91 103 91 104 91 105 91 106 91 107

91 108 91 109 91 110 91 111 91 112 91 113 91 114

91 115 91 116 91 117 91 118 91 119 91 120 91 121

91 122 91 123 91 124 91 125 91 126 91 127 91 128

91 129 91 130 91 131 91 132 91 133 91 134 91 135

91 136 91 137 91 138 91 139 91 140 91 141 91 142

92 93 92 94 92 95 92 96 92 97 92 98 92 99

92 100 92 101 92 102 92 103 92 104 92 105 92 106

92 107 92 108 92 109 92 110 92 111 92 112 92 113

92 114 92 115 92 116 92 117 92 118 92 119 92 120

92 121 92 122 92 123 92 124 92 125 92 126 92 127

92 128 92 129 92 130 92 131 92 132 92 133 92 134

92 135 92 136 92 137 92 138 92 139 92 140 92 141

92 142 93 94 93 95 93 96 93 97 93 98 93 99

93 100 93 101 93 102 93 103 93 104 93 105 93 106

93 107 93 108 93 109 93 110 93 111 93 112 93 113

93 114 93 115 93 116 93 117 93 118 93 119 93 120

93 121 93 122 93 123 93 124 93 125 93 126 93 127

93 128 93 129 93 130 93 131 93 132 93 133 93 134

93 135 93 136 93 137 93 138 93 139 93 140 93 141

93 142 94 95 94 96 94 97 94 98 94 99 94 100

94 101 94 102 94 103 94 104 94 105 94 106 94 107

94 108 94 109 94 110 94 111 94 112 94 113 94 114

94 115 94 116 94 117 94 118 94 119 94 120 94 121

94 122 94 123 94 124 94 125 94 126 94 127 94 128

94 129 94 130 94 131 94 132 94 133 94 134 94 135

94 136 94 137 94 138 94 139 94 140 94 141 94 142

95 96 95 97 95 98 95 99 95 100 95 101 95 102

95 103 95 104 95 105 95 106 95 107 95 108 95 109

95 110 95 111 95 112 95 113 95 114 95 115 95 116

95 117 95 118 95 119 95 120 95 121 95 122 95 123

95 124 95 125 95 126 95 127 95 128 95 129 95 130

95 131 95 132 95 133 95 134 95 135 95 136 95 137

95 138 95 139 95 140 95 141 95 142 96 97 96 98

96 99 96 100 96 101 96 102 96 103 96 104 96 105

96 106 96 107 96 108 96 109 96 110 96 111 96 112

96 113 96 114 96 115 96 116 96 117 96 118 96 119

96 120 96 121 96 122 96 123 96 124 96 125 96 126

96 127 96 128 96 129 96 130 96 131 96 132 96 133

96 134 96 135 96 136 96 137 96 138 96 139 96 140

96 141 96 142 97 98 97 99 97 100 97 101 97 102

97 103 97 104 97 105 97 106 97 107 97 108 97 109

97 110 97 111 97 112 97 113 97 114 97 115 97 116

97 117 97 118 97 119 97 120 97 121 97 122 97 123

97 124 97 125 97 126 97 127 97 128 97 129 97 130

97 131 97 132 97 133 97 134 97 135 97 136 97 137

97 138 97 139 97 140 97 141 97 142 98 99 98 100

98 101 98 102 98 103 98 104 98 105 98 106 98 107

98 108 98 109 98 110 98 111 98 112 98 113 98 114

98 115 98 116 98 117 98 118 98 119 98 120 98 121

98 122 98 123 98 124 98 125 98 126 98 127 98 128

98 129 98 130 98 131 98 132 98 133 98 134 98 135

98 136 98 137 98 138 98 139 98 140 98 141 98 142

99 100 99 101 99 102 99 103 99 104 99 105 99 106

99 107 99 108 99 109 99 110 99 111 99 112 99 113

99 114 99 115 99 116 99 117 99 118 99 119 99 120

99 121 99 122 99 123 99 124 99 125 99 126 99 127

99 128 99 129 99 130 99 131 99 132 99 133 99 134

99 135 99 136 99 137 99 138 99 139 99 140 99 141

99 142 100 101 100 102 100 103 100 104 100 105 100 106

100 107 100 108 100 109 100 110 100 111 100 112 100 113

100 114 100 115 100 116 100 117 100 118 100 119 100 120

100 121 100 122 100 123 100 124 100 125 100 126 100 127

100 128 100 129 100 130 100 131 100 132 100 133 100 134

100 135 100 136 100 137 100 138 100 139 100 140 100 141

100 142 101 102 101 103 101 104 101 105 101 106 101 107

101 108 101 109 101 110 101 111 101 112 101 113 101 114

101 115 101 116 101 117 101 118 101 119 101 120 101 121

101 122 101 123 101 124 101 125 101 126 101 127 101 128

101 129 101 130 101 131 101 132 101 133 101 134 101 135

101 136 101 137 101 138 101 139 101 140 101 141 101 142

102 103 102 104 102 105 102 106 102 107 102 108 102 109

102 110 102 111 102 112 102 113 102 114 102 115 102 116

102 117 102 118 102 119 102 120 102 121 102 122 102 123

102 124 102 125 102 126 102 127 102 128 102 129 102 130

102 131 102 132 102 133 102 134 102 135 102 136 102 137

102 138 102 139 102 140 102 141 102 142 103 104 103 105

103 106 103 107 103 108 103 109 103 110 103 111 103 112

103 113 103 114 103 115 103 116 103 117 103 118 103 119

103 120 103 121 103 122 103 123 103 124 103 125 103 126

103 127 103 128 103 129 103 130 103 131 103 132 103 133

103 134 103 135 103 136 103 137 103 138 103 139 103 140

103 141 103 142 104 105 104 106 104 107 104 108 104 109

104 110 104 111 104 112 104 113 104 114 104 115 104 116

104 117 104 118 104 119 104 120 104 121 104 122 104 123

104 124 104 125 104 126 104 127 104 128 104 129 104 130

104 131 104 132 104 133 104 134 104 135 104 136 104 137

104 138 104 139 104 140 104 141 104 142 105 106 105 107

105 108 105 109 105 110 105 111 105 112 105 113 105 114

105 115 105 116 105 117 105 118 105 119 105 120 105 121

105 122 105 123 105 124 105 125 105 126 105 127 105 128

105 129 105 130 105 131 105 132 105 133 105 134 105 135

105 136 105 137 105 138 105 139 105 140 105 141 105 142

106 107 106 108 106 109 106 110 106 111 106 112 106 113

106 114 106 115 106 116 106 117 106 118 106 119 106 120

106 121 106 122 106 123 106 124 106 125 106 126 106 127

106 128 106 129 106 130 106 131 106 132 106 133 106 134

106 135 106 136 106 137 106 138 106 139 106 140 106 141

106 142 107 108 107 109 107 110 107 111 107 112 107 113

107 114 107 115 107 116 107 117 107 118 107 119 107 120

107 121 107 122 107 123 107 124 107 125 107 126 107 127

107 128 107 129 107 130 107 131 107 132 107 133 107 134

107 135 107 136 107 137 107 138 107 139 107 140 107 141

107 142 108 109 108 110 108 111 108 112 108 113 108 114

108 115 108 116 108 117 108 118 108 119 108 120 108 121

108 122 108 123 108 124 108 125 108 126 108 127 108 128

108 129 108 130 108 131 108 132 108 133 108 134 108 135

108 136 108 137 108 138 108 139 108 140 108 141 108 142

109 110 109 111 109 112 109 113 109 114 109 115 109 116

109 117 109 118 109 119 109 120 109 121 109 122 109 123

109 124 109 125 109 126 109 127 109 128 109 129 109 130

109 131 109 132 109 133 109 134 109 135 109 136 109 137

109 138 109 139 109 140 109 141 109 142 110 111 110 112

110 113 110 114 110 115 110 116 110 117 110 118 110 119

110 120 110 121 110 122 110 123 110 124 110 125 110 126

110 127 110 128 110 129 110 130 110 131 110 132 110 133

110 134 110 135 110 136 110 137 110 138 110 139 110 140

110 141 110 142 111 112 111 113 111 114 111 115 111 116

111 117 111 118 111 119 111 120 111 121 111 122 111 123

111 124 111 125 111 126 111 127 111 128 111 129 111 130

111 131 111 132 111 133 111 134 111 135 111 136 111 137

111 138 111 139 111 140 111 141 111 142 112 113 112 114

112 115 112 116 112 117 112 118 112 119 112 120 112 121

112 122 112 123 112 124 112 125 112 126 112 127 112 128

112 129 112 130 112 131 112 132 112 133 112 134 112 135

112 136 112 137 112 138 112 139 112 140 112 141 112 142

113 114 113 115 113 116 113 117 113 118 113 119 113 120

113 121 113 122 113 123 113 124 113 125 113 126 113 127

113 128 113 129 113 130 113 131 113 132 113 133 113 134

113 135 113 136 113 137 113 138 113 139 113 140 113 141

113 142 114 115 114 116 114 117 114 118 114 119 114 120

114 121 114 122 114 123 114 124 114 125 114 126 114 127

114 128 114 129 114 130 114 131 114 132 114 133 114 134

114 135 114 136 114 137 114 138 114 139 114 140 114 141

114 142 115 116 115 117 115 118 115 119 115 120 115 121

115 122 115 123 115 124 115 125 115 126 115 127 115 128

115 129 115 130 115 131 115 132 115 133 115 134 115 135

115 136 115 137 115 138 115 139 115 140 115 141 115 142

116 117 116 118 116 119 116 120 116 121 116 122 116 123

116 124 116 125 116 126 116 127 116 128 116 129 116 130

116 131 116 132 116 133 116 134 116 135 116 136 116 137

116 138 116 139 116 140 116 141 116 142 117 118 117 119

117 120 117 121 117 122 117 123 117 124 117 125 117 126

117 127 117 128 117 129 117 130 117 131 117 132 117 133

117 134 117 135 117 136 117 137 117 138 117 139 117 140

117 141 117 142 118 119 118 120 118 121 118 122 118 123

118 124 118 125 118 126 118 127 118 128 118 129 118 130

118 131 118 132 118 133 118 134 118 135 118 136 118 137

118 138 118 139 118 140 118 141 118 142 119 120 119 121

119 122 119 123 119 124 119 125 119 126 119 127 119 128

119 129 119 130 119 131 119 132 119 133 119 134 119 135

119 136 119 137 119 138 119 139 119 140 119 141 119 142

120 121 120 122 120 123 120 124 120 125 120 126 120 127

120 128 120 129 120 130 120 131 120 132 120 133 120 134

120 135 120 136 120 137 120 138 120 139 120 140 120 141

120 142 121 122 121 123 121 124 121 125 121 126 121 127

121 128 121 129 121 130 121 131 121 132 121 133 121 134

121 135 121 136 121 137 121 138 121 139 121 140 121 141

121 142 122 123 122 124 122 125 122 126 122 127 122 128

122 129 122 130 122 131 122 132 122 133 122 134 122 135

122 136 122 137 122 138 122 139 122 140 122 141 122 142

123 124 123 125 123 126 123 127 123 128 123 129 123 130

123 131 123 132 123 133 123 134 123 135 123 136 123 137

123 138 123 139 123 140 123 141 123 142 124 125 124 126

124 127 124 128 124 129 124 130 124 131 124 132 124 133

124 134 124 135 124 136 124 137 124 138 124 139 124 140

124 141 124 142 125 126 125 127 125 128 125 129 125 130

125 131 125 132 125 133 125 134 125 135 125 136 125 137

125 138 125 139 125 140 125 141 125 142 126 127 126 128

126 129 126 130 126 131 126 132 126 133 126 134 126 135

126 136 126 137 126 138 126 139 126 140 126 141 126 142

127 128 127 129 127 130 127 131 127 132 127 133 127 134

127 135 127 136 127 137 127 138 127 139 127 140 127 141

127 142 128 129 128 130 128 131 128 132 128 133 128 134

128 135 128 136 128 137 128 138 128 139 128 140 128 141

128 142 129 130 129 131 129 132 129 133 129 134 129 135

129 136 129 137 129 138 129 139 129 140 129 141 129 142

130 131 130 132 130 133 130 134 130 135 130 136 130 137

130 138 130 139 130 140 130 141 130 142 131 132 131 133

131 134 131 135 131 136 131 137 131 138 131 139 131 140

131 141 131 142 132 133 132 134 132 135 132 136 132 137

132 138 132 139 132 140 132 141 132 142 133 134 133 135

133 136 133 137 133 138 133 139 133 140 133 141 133 142

134 135 134 136 134 137 134 138 134 139 134 140 134 141

134 142 135 136 135 137 135 138 135 139 135 140 135 141

135 142 136 137 136 138 136 139 136 140 136 141 136 142

137 138 137 139 137 140 137 141 137 142 138 139 138 140

138 141 138 142 139 140 139 141 139 142 140 141 140 142

141 142

20 temperatures (K)

1000.00

6.9700E+00 2.0210E+00 8.6460E-01 3.3690E-01 3.8100E+00 1.6580E+00 5.9770E-01

1.6340E-01 1.7440E+01 7.8620E-01 2.3990E-01 6.2440E-02 7.8910E-01 4.0570E-01

7.0330E-03 3.6630E-01 1.1400E-01 5.0220E-03 6.6430E-01 3.2200E-01 9.5880E-02

1.5230E-02 2.5450E-01 1.9570E-01 9.8920E-02 3.2130E-02 9.8090E-02 1.6980E-01

6.5570E-02 1.6930E-02 2.7100E-01 1.4620E-01 6.6640E-02 3.4210E-02 1.6740E+01

1.0810E+01 4.1060E+00 2.3050E+00 9.9060E-01 3.2100E+01 5.9300E+00 8.8120E-01

1.7360E-01 6.9540E-02 2.9820E-02 1.1290E+01 2.5300E-01 6.2080E-02 1.4860E+00

2.7910E-01 1.7880E-02 3.1900E-03 2.5470E+00 3.3950E-01 3.9330E-02 1.1830E-02

8.6890E-01 1.5590E-02 8.7040E-03 1.1250E-01 7.9510E-02 3.4670E-02 9.0500E-03

6.6390E-02 4.2050E-02 1.5840E-02 5.7700E-03 2.2590E-02 7.6640E-03 2.2740E-03

5.3000E-02 2.5820E-02 1.2190E-02 4.5150E-03 1.5980E-02 9.7960E-03 4.2900E-03

1.1030E-03 4.5420E-02 2.5530E-02 8.7100E-03 1.5850E-03 5.2800E-02 2.1350E-02

4.8740E-03 5.3980E-04 3.9600E-02 1.5730E-02 6.1260E-03 1.7900E-03 3.5310E-02

1.1630E-02 3.5310E-03 1.1100E-03 5.8810E-02 2.6780E-02 1.1560E-02 3.9840E-03

7.7430E-02 2.8840E-02 7.6100E-03 1.1440E-03 4.9820E-02 1.5540E-02 3.9310E-03

7.1300E-04 5.0680E-02 2.3830E-02 8.7070E-03 1.9290E-03 3.8760E-02 1.3680E-02

6.5000E-03 3.3020E-02 2.1090E-02 7.4960E-03 1.6400E-03 2.9950E-02 1.6820E-02

1.0300E-02 7.2120E-03 1.3760E-02 1.0180E-02 3.9590E-03 9.3600E-04 1.1310E-02

8.7460E-03 4.6700E-03 1.5140E-03 3.2140E-02 9.9790E-03 7.8960E-03 4.5590E-03

1.5840E-02 1.0710E-02 5.6720E-03 2.5720E-03 2.0170E-02 1.3880E-02 6.3430E-03

1.8690E-03 6.3130E+00 1.6220E+00 5.8940E-01 1.7950E+00 1.5830E+00 1.0660E+00

5.3700E-01 3.8360E+00 1.0320E+01 4.9740E-01 1.7420E-01 5.5330E-01 1.6860E-01

2.4020E-01 2.0870E-01 1.1440E-01 6.6470E-02 2.8810E-01 2.4510E-01 2.5430E-01

1.0050E-01 1.4930E-01 2.1020E-01 9.4790E-02 8.4040E-02 6.7030E-02 1.5610E-01

1.1110E-01 6.3290E-02 1.6020E-01 1.4450E-01 1.0190E-01 2.5450E-02 6.2590E+00

1.1520E+01 9.5090E+00 2.8400E+00 1.3420E+00 1.1410E+00 2.0810E+01 7.6980E+00

1.4610E+00 2.1250E-01 4.6480E-02 3.3930E+00 5.7140E+00 1.5610E-01 5.0140E-01

6.5630E-01 2.5620E-01 1.4980E-02 5.0940E-01 1.4680E+00 3.3920E-01 3.4140E-02

3.2990E-01 3.7880E-01 5.8770E-03 8.0560E-02 3.4520E-02 4.1950E-02 3.1540E-02

5.1680E-02 2.8850E-02 1.8890E-02 4.6180E-03 1.3280E-02 9.0520E-03 3.6880E-03

2.5110E-02 2.4910E-02 1.5650E-02 1.0750E-02 8.9990E-03 5.7070E-03 5.9900E-03

4.2360E-03 2.2300E-02 1.4390E-02 1.9240E-02 9.0670E-03 2.7230E-02 1.7950E-02

1.3950E-02 4.5290E-03 2.0180E-02 1.7490E-02 8.7430E-03 4.1820E-03 1.3300E-02

1.6240E-02 8.6910E-03 3.0380E-03 2.6100E-02 2.7190E-02 1.7210E-02 1.0420E-02

3.2150E-02 3.1240E-02 2.0920E-02 7.7050E-03 1.5370E-02 2.3840E-02 1.2780E-02

4.0200E-03 2.1540E-02 2.0990E-02 1.6800E-02 8.7960E-03 2.3120E-02 1.8410E-02

5.6080E-03 2.3390E-02 9.9670E-03 1.1370E-02 5.8650E-03 1.7530E-02 1.6320E-02

1.2400E-02 5.1790E-03 1.0890E-02 3.9760E-03 5.1930E-03 3.0030E-03 8.4080E-03

4.0640E-03 4.2510E-03 4.2790E-03 2.5720E-02 8.7880E-03 6.2440E-03 2.9140E-03

1.1710E-02 7.3050E-03 6.1930E-03 2.6280E-03 1.4110E-02 6.8510E-03 7.2780E-03

5.5730E-03 4.9380E+00 1.0170E+00 7.4170E-01 1.1550E+00 1.0560E+00 7.8440E-01

7.1900E-01 4.4530E+00 5.6610E+00 2.8470E-01 3.0280E-01 2.1340E-01 2.0550E-01

1.0210E-01 1.1310E-01 7.7750E-02 7.9480E-02 2.2050E-01 1.6550E-01 2.0300E-01

1.0120E-01 1.1360E-01 1.5140E-01 7.5060E-02 5.1120E-02 1.0730E-01 1.0980E-01

9.1060E-02 9.3640E-02 1.2280E-01 6.8360E-02 4.7780E-02 1.8750E+00 8.7090E+00

5.0840E+00 7.5990E+00 1.4500E+00 2.2700E-01 1.0140E+00 1.3000E+01 7.3970E+00

1.6880E+00 2.0200E-01 6.8210E-01 4.1000E+00 2.1640E+00 1.2930E-01 4.5340E-01

3.3890E-01 1.4580E-01 7.1930E-02 5.9680E-01 8.7620E-01 2.1800E-01 1.0570E-01

3.0740E-01 1.2280E-01 4.0780E-02 3.8110E-02 2.9090E-02 3.3440E-02 3.6020E-02

2.3910E-02 1.4630E-02 3.4630E-03 7.4390E-03 7.7540E-03 4.3190E-03 1.1520E-02

1.5390E-02 1.7660E-02 1.2740E-02 3.6410E-03 5.2040E-03 4.4430E-03 5.4330E-03

6.4140E-03 1.5940E-02 1.0200E-02 1.6180E-02 1.1200E-02 1.6650E-02 1.1420E-02

8.4620E-03 9.9730E-03 1.2340E-02 1.0800E-02 4.8440E-03 4.6220E-03 1.0290E-02

1.0020E-02 6.0120E-03 1.1020E-02 1.6950E-02 1.8910E-02 1.3790E-02 1.0700E-02

2.3070E-02 1.9970E-02 1.5280E-02 3.9130E-03 1.3190E-02 1.5380E-02 9.5180E-03

7.2130E-03 1.4890E-02 1.4880E-02 1.4120E-02 1.4140E-02 1.4460E-02 6.7580E-03

1.2550E-02 1.0970E-02 7.7810E-03 6.6490E-03 1.0790E-02 1.2810E-02 8.5220E-03

6.4490E-03 6.2500E-03 4.6700E-03 3.3880E-03 2.9960E-03 4.4570E-03 3.7940E-03

3.5440E-03 3.9570E-03 1.9290E-02 7.1610E-03 4.3750E-03 1.9240E-03 7.6090E-03

6.5320E-03 3.9110E-03 2.8250E-03 7.3320E-03 6.7780E-03 5.5390E-03 5.7100E-03

2.9710E+00 2.5690E-01 6.6510E-01 8.2740E-01 7.4190E-01 1.8020E-01 9.5110E-01

3.8590E+00 2.4210E+00 1.2460E-01 2.4720E-01 1.0930E-01 4.0040E-02 9.3500E-02

6.1840E-02 1.0740E-02 1.0550E-01 1.4250E-01 1.8730E-01 4.7300E-02 7.4570E-02

1.0170E-01 7.5870E-02 1.9260E-02 5.9110E-02 8.3030E-02 8.6650E-02 5.5420E-02

6.8750E-02 5.9060E-02 4.1010E-02 8.2520E-01 2.5750E+00 7.0900E+00 1.8170E+00

4.3410E+00 7.7090E-02 2.2040E-01 6.8360E-01 7.3640E+00 5.8940E+00 1.4420E+00

7.5010E-02 1.4300E+00 3.1260E+00 2.3190E-02 1.7820E-01 2.8510E-01 2.0930E-01

1.3480E-02 1.0560E-01 5.1680E-01 5.1160E-01 2.8530E-02 1.4800E-01 1.8070E-01

1.5060E-02 3.2530E-02 2.6760E-02 1.9920E-02 2.2040E-02 1.8830E-02 8.8480E-03

2.3090E-03 3.8610E-03 5.3640E-03 3.7850E-03 4.5660E-03 8.9830E-03 1.2530E-02

1.2130E-02 9.9820E-04 3.3860E-03 3.9140E-03 4.1620E-03 8.4630E-04 8.3380E-03

9.8930E-03 1.3420E-02 3.5100E-03 1.0940E-02 1.0400E-02 6.9660E-03 4.5020E-03

7.6260E-03 8.2630E-03 4.9090E-03 1.5500E-03 4.5940E-03 7.3670E-03 7.1210E-03

4.0700E-03 9.2010E-03 1.3490E-02 1.3690E-02 2.5940E-03 1.1670E-02 1.6090E-02

1.5660E-02 7.8130E-04 4.7080E-03 1.0320E-02 1.2190E-02 1.6740E-03 7.5140E-03

1.1320E-02 1.3550E-02 8.3950E-03 8.6300E-03 6.5470E-03 5.2890E-03 9.5890E-03

6.6800E-03 3.7410E-03 6.9590E-03 6.8550E-03 6.2810E-03 5.6190E-03 2.7870E-03

4.4840E-03 2.8210E-03 1.4430E-03 1.6790E-03 3.3350E-03 3.0880E-03 2.3990E-03

1.2860E-02 5.0810E-03 2.6740E-03 1.2180E-03 4.4960E-03 4.5860E-03 3.0670E-03

1.7690E-03 2.8830E-03 5.6450E-03 4.8240E-03 3.5550E-03 6.8320E-02 2.7920E-01

4.5660E-01 4.4200E-01 5.9150E-02 1.7070E-01 8.6000E-01 2.6160E+00 3.4330E-02

1.6780E-01 3.8420E-02 1.1280E-02 5.2980E-02 3.3400E-02 3.1890E-04 1.7780E-02

1.0260E-01 1.0230E-01 1.3900E-02 4.7540E-02 3.4570E-02 5.3700E-02 3.6810E-03

2.4290E-02 4.3920E-02 5.2150E-02 2.7210E-02 2.3640E-02 4.1360E-02 2.0190E-02

2.1080E-01 1.3400E+00 1.4500E+00 4.3300E+00 1.3430E+00 3.5230E-02 3.6680E-02

1.4550E-01 4.0620E-01 3.3380E+00 3.8790E+00 2.4840E-02 8.0700E-02 2.2100E+00

3.4730E-03 3.4900E-02 1.6090E-01 1.4820E-01 5.6780E-03 8.5000E-03 1.0260E-01

4.5400E-01 6.7780E-03 4.3340E-02 1.2850E-01 3.6660E-03 1.7360E-02 1.9050E-02

7.0580E-03 1.0290E-02 1.0640E-02 3.9250E-03 1.1550E-03 1.6210E-03 2.6880E-03

2.1970E-03 1.3320E-03 4.5010E-03 5.6540E-03 7.6180E-03 1.2690E-04 1.3990E-03

2.6270E-03 2.0490E-03 1.0500E-05 1.4140E-03 8.2040E-03 6.6200E-03 7.3530E-04

4.7160E-03 7.0900E-03 3.3700E-03 1.6360E-03 3.7390E-03 4.0240E-03 3.2500E-03

4.9180E-04 1.4500E-03 3.5490E-03 4.8260E-03 1.1330E-03 4.1580E-03 6.2580E-03

8.6780E-03 3.6490E-04 3.7710E-03 9.3550E-03 9.5150E-03 1.1920E-04 1.0670E-03

4.2540E-03 8.5620E-03 1.7260E-04 2.4510E-03 6.3660E-03 8.0420E-03 3.9880E-03

3.7470E-03 4.0520E-03 1.6490E-03 5.3010E-03 4.6200E-03 1.0790E-03 3.6420E-03

2.3080E-03 3.8160E-03 3.0910E-03 9.1580E-04 2.6380E-03 1.9420E-03 2.7290E-04

3.8620E-04 1.9390E-03 1.9490E-03 9.7710E-04 6.4280E-03 2.6400E-03 1.2450E-03

6.0140E-04 2.1000E-03 2.1790E-03 2.0360E-03 6.4500E-04 7.8930E-04 3.0680E-03

3.1880E-03 1.4090E-03 6.1680E+00 1.8060E+00 4.0360E-01 2.9170E+00 1.0400E+00

2.0020E-01 1.8720E-02 9.4000E-01 2.3600E-01 8.6300E-02 7.3160E-01 1.2900E-01

2.9450E-02 1.1100E+00 4.4810E-01 9.1140E-02 1.1780E-02 8.2150E-01 3.0710E-01

9.1260E-02 9.7250E-03 6.2860E-01 3.1000E-01 8.4140E-02 9.2460E-03 4.0300E-01

3.2580E-01 1.2340E-01 3.4940E-02 5.9530E-01 3.8270E-01 1.3440E-01 4.2130E-02

1.0160E-02 1.0030E+00 5.1360E-01 2.2690E-01 8.4490E-02 2.5820E-02 6.1870E-03

4.7670E-01 2.0550E-01 4.5460E-02 6.6850E+00 2.5550E-01 6.6080E-02 1.0190E-02

3.5310E+00 5.7550E-01 8.8200E-02 1.4900E-02 3.5990E-01 1.3560E-01 1.7930E-02

4.1130E-01 1.4640E-01 4.5550E-02 1.0840E-02 6.4350E-02 2.7790E-02 1.2520E-02

1.9150E-01 2.5450E-01 1.5720E-01 2.5350E-02 1.8900E+00 2.3310E-01 3.3120E-02

4.9410E-03 1.1520E-01 6.2150E-02 1.5260E-02 2.2660E-03 2.1030E-01 1.3370E-01

2.6130E-02 2.9280E-03 1.7020E+00 4.1160E-02 8.1220E-03 1.0890E-03 7.7240E-01

2.7310E-02 6.2630E-03 1.5300E-03 8.7700E-01 1.2460E-01 1.6140E-02 2.4550E-03

1.3750E+00 1.6530E-01 2.3640E-02 3.4270E-03 2.8330E+00 3.1590E-01 1.7910E-02

2.4300E-03 6.6550E-01 1.1390E-01 2.5050E-02 3.5100E-03 2.8200E-01 1.0290E-01

2.6250E-02 3.1550E-03 3.1550E-02 1.3040E-02 2.7200E-03 2.5340E-01 3.4160E-02

1.1810E-02 2.4180E-03 5.6630E-02 2.1480E-02 7.4870E-03 1.7060E-03 9.8390E-02

1.8280E-02 4.4280E-03 7.9150E-04 8.3940E-02 2.9660E-02 8.5990E-03 1.3680E-03

3.1880E-02 8.9620E-03 5.0640E-03 8.7860E-04 6.7000E-02 8.8540E-03 2.1540E-03

3.6780E-04 1.6710E-01 3.0570E-02 5.6300E-03 9.4230E-04 5.0380E+00 1.8570E+00

1.2680E+00 1.1890E+00 7.5370E-01 2.3100E-01 4.6990E-01 4.2950E-01 1.1130E-01

3.2710E-01 3.1530E-01 7.0350E-02 3.1970E-01 5.8460E-01 4.8530E-01 1.1000E-01

2.6320E-01 5.5920E-01 3.0160E-01 1.0540E-01 2.3390E-01 3.6020E-01 2.7910E-01

9.9970E-02 2.3580E-01 3.3710E-01 1.9230E-01 9.2220E-02 2.3210E-01 4.9390E-01

2.9220E-01 1.3150E-01 4.8890E-02 3.8050E-01 3.8330E-01 3.3770E-01 2.2930E-01

1.1650E-01 4.0800E-02 2.6550E-01 1.7770E-01 1.3880E-01 9.9750E-01 4.3790E+00

1.7320E-01 6.2990E-02 5.7550E-01 2.1120E+00 5.7490E-01 9.6200E-02 2.1280E-01

1.1710E-01 8.0810E-02 1.4640E-01 1.8960E-01 1.0910E-01 4.6160E-02 4.0610E-02

3.1280E-02 1.1850E-02 1.5320E-01 1.9460E-01 6.3770E-02 9.1240E-02 1.0500E-01

1.3230E+00 2.5480E-01 3.8070E-02 4.2820E-02 1.0130E-01 5.8470E-02 1.7710E-02

7.3810E-02 2.4750E-01 1.4180E-01 3.1120E-02 2.3220E-01 1.1290E+00 3.1830E-02

8.0040E-03 1.1320E-01 5.0650E-01 2.1230E-02 5.0670E-03 1.2460E-01 5.4410E-01

1.2960E-01 1.7910E-02 7.2860E-02 9.7620E-01 1.8020E-01 2.7270E-02 3.1590E-01

1.8280E+00 3.7160E-01 2.0200E-02 7.0860E-02 4.4000E-01 1.0690E-01 2.9000E-02

7.6100E-02 1.3060E-01 9.3780E-02 3.1080E-02 1.9480E-02 1.1130E-02 7.2420E-03

6.0180E-02 1.5150E-01 1.9470E-02 1.0310E-02 2.1480E-02 2.6230E-02 1.4460E-02

7.6720E-03 2.7960E-02 5.2350E-02 1.3170E-02 4.0480E-03 2.4950E-02 4.0050E-02

2.4040E-02 9.8030E-03 2.5510E-02 6.5130E-03 2.5020E-03 2.9070E-03 1.5750E-02

3.8640E-02 6.3190E-03 1.9960E-03 3.0570E-02 9.7910E-02 2.8760E-02 6.1510E-03

3.9680E+00 4.4850E-01 9.3440E-01 7.2230E-01 4.8950E-01 2.3650E-01 3.3350E-01

1.8860E-01 1.3530E-01 2.5150E-01 1.4800E-01 2.1070E-02 3.7130E-01 3.5960E-01

4.0410E-01 7.0410E-02 2.6490E-01 4.4910E-01 2.4340E-01 4.8800E-02 2.2640E-01

2.5370E-01 2.3520E-01 1.4430E-01 2.3900E-01 2.2550E-01 1.1220E-01 8.5290E-02

2.3700E-01 3.1670E-01 2.2580E-01 9.7200E-02 8.9520E-02 2.6510E-01 2.5240E-01

2.2230E-01 1.8100E-01 1.0560E-01 1.2210E-01 1.6380E-01 1.5050E-01 1.4720E-01

1.0920E+00 2.8590E+00 1.1230E-01 8.8210E-02 5.7500E-01 1.4160E+00 4.4290E-01

1.0540E-01 1.2060E-01 8.2080E-02 4.5550E-02 1.0910E-01 1.2760E-01 8.6240E-02

2.5870E-02 2.4010E-02 1.2830E-02 1.1490E-01 1.1300E-01 8.5570E-02 6.3670E-02

1.8210E-02 9.6370E-02 9.9390E-01 2.0150E-01 6.3400E-03 3.9730E-02 6.9520E-02

4.9680E-02 3.1210E-03 8.1120E-02 1.6870E-01 1.1770E-01 2.5030E-02 2.7040E-01

7.3440E-01 2.1230E-02 1.5350E-02 1.2770E-01 3.2770E-01 1.3810E-02 1.6140E-02

1.2960E-01 3.6700E-01 9.9460E-02 1.3220E-02 6.5610E-02 7.2090E-01 1.4270E-01

1.7910E-02 3.7160E-01 1.2320E+00 2.8060E-01 1.6410E-02 5.6150E-02 3.2420E-01

8.8210E-02 1.0900E-02 7.0090E-02 8.6760E-02 8.0980E-02 1.0470E-02 1.0840E-02

7.0810E-03 1.8700E-02 4.9420E-02 1.0110E-01 1.1810E-02 7.4870E-03 1.4460E-02

1.8790E-02 1.1640E-02 8.0960E-03 2.3230E-02 3.3240E-02 8.5790E-03 5.8570E-03

1.9810E-02 2.7790E-02 2.0670E-02 1.9130E-02 3.7300E-03 3.0340E-03 2.1790E-03

4.0390E-03 1.4030E-02 2.4840E-02 4.1190E-03 5.6300E-03 2.8750E-02 6.5810E-02

2.2340E-02 7.8500E-02 4.6310E-01 6.9700E-01 4.4830E-01 1.1960E-01 1.8190E-01

2.0440E-01 5.2260E-02 1.3590E-01 1.6830E-01 2.8440E-03 2.2860E-02 2.8730E-01

4.6470E-01 8.0550E-03 9.9860E-02 2.4240E-01 3.6540E-01 2.1080E-03 6.2280E-02

1.9080E-01 2.4760E-01 6.6500E-02 1.5480E-01 1.6460E-01 1.1400E-01 2.3210E-02

9.6590E-02 1.7060E-01 2.0960E-01 1.4780E-01 1.4850E-02 7.8120E-02 1.7520E-01

2.0770E-01 1.7260E-01 9.5250E-02 4.1250E-02 1.3190E-01 1.1770E-01 2.8940E-02

1.6710E-01 8.3140E-01 1.7270E+00 1.4900E-02 9.6200E-02 4.4290E-01 1.1250E+00

4.0710E-02 1.0590E-01 5.8770E-02 1.0840E-02 4.6140E-02 8.6240E-02 1.0240E-01

1.5700E-02 1.4570E-02 1.1440E-02 7.6590E-02 4.9710E-02 1.0140E-01 2.3680E-02

2.3480E-03 1.9910E-02 7.6700E-02 7.7460E-01 4.4710E-04 7.1270E-03 3.2050E-02

7.0520E-02 2.2080E-04 3.4480E-03 6.2500E-02 1.8090E-01 3.4770E-03 3.0340E-02

2.0680E-01 4.6030E-01 3.4070E-03 1.6890E-02 9.7010E-02 2.0570E-01 2.4550E-03

1.7900E-02 9.9450E-02 2.8840E-01 1.5660E-03 1.4590E-02 5.2510E-02 5.5960E-01

2.4300E-03 2.0200E-02 2.8070E-01 9.6450E-01 1.3060E-03 1.8750E-02 4.6780E-02

2.5660E-01 9.0120E-05 1.2870E-02 5.7020E-02 9.5840E-02 4.7280E-03 9.1600E-03

5.0390E-03 5.7200E-03 1.8470E-02 3.6580E-02 5.9940E-02 1.7060E-03 7.6720E-03

1.1630E-02 1.3900E-02 2.0730E-03 8.5360E-03 1.7440E-02 2.0720E-02 5.7390E-04

6.5830E-03 1.6440E-02 2.5820E-02 1.2750E-02 1.6600E-03 3.3100E-03 9.9090E-04

9.8880E-04 4.3210E-03 1.0580E-02 1.5460E-02 9.4230E-04 6.1510E-03 2.2350E-02

5.2250E-02 3.0730E+00 1.0180E+00 4.5250E-01 8.1030E-01 4.0390E-01 5.9000E-02

2.8140E-01 1.2560E-01 2.7360E-02 4.0820E-01 2.2410E-01 1.0530E-01 2.9510E-02

2.4090E-01 1.3310E-01 6.4800E-02 3.0590E-02 3.5530E-01 2.0730E-01 9.4070E-02

3.3740E-02 4.0790E-01 4.3070E-01 2.4130E-01 7.7480E-02 1.8540E+00 1.3640E+00

4.8610E-01 1.5130E-01 4.3370E-02 6.5510E+00 2.3290E+00 7.5920E-01 2.4330E-01

8.6360E-02 3.1410E-02 2.8310E+00 4.9230E-01 8.9860E-02 1.6360E+01 3.2340E+00

2.7480E-01 5.7400E-02 2.5090E+01 3.9510E+00 7.4580E-01 3.2340E-01 9.4600E+00

1.1200E-01 3.2290E-02 8.1010E-02 4.7060E-02 2.4950E-02 1.1140E-02 4.5650E-02

2.6130E-02 8.6820E-03 6.6010E-03 1.3130E-02 5.3290E-03 2.4240E-03 1.0430E-01

5.2290E-02 2.2510E-02 6.5160E-03 7.9230E-03 4.9030E-03 2.4000E-03 8.5070E-04

2.3050E-02 1.3060E-02 6.1570E-03 1.7910E-03 1.7320E-01 3.9230E-02 5.4730E-03

1.1240E-03 1.9070E-01 4.8340E-02 1.0510E-02 3.3930E-03 3.0820E-02 1.3070E-02

5.1190E-03 1.4680E-03 5.9680E-02 3.0130E-02 1.3070E-02 4.0710E-03 1.8800E-01

4.8330E-02 1.3930E-02 3.2650E-03 3.1130E-02 1.4040E-02 5.4110E-03 1.3500E-03

2.4860E-02 1.1170E-02 4.7110E-03 1.5650E-03 1.0230E-01 2.1960E-02 1.1850E-02

3.3420E-02 1.9160E-02 8.1420E-03 2.3140E-03 1.3160E-02 8.0930E-03 5.0510E-03

3.0220E-03 4.2940E-02 2.9860E-02 1.4540E-02 4.8280E-03 4.7700E-03 3.2760E-03

1.9620E-03 9.4860E-04 2.5190E-02 7.9410E-03 2.5700E-03 1.3360E-03 4.4230E-03

3.3400E-03 1.8920E-03 7.7980E-04 4.5100E-03 2.2490E-03 1.0910E-03 4.5290E-04

2.5110E+00 4.8840E-01 4.8930E-01 2.2370E-01 2.4670E-01 1.6240E-01 9.1400E-02

7.2540E-02 1.4990E-01 1.8360E-01 1.3540E-01 1.1800E-01 1.1120E-01 1.0840E-01

8.8690E-02 4.9410E-02 1.3700E-01 1.8440E-01 1.3650E-01 9.4370E-02 3.0610E-01

3.8620E-01 2.1810E-01 1.2780E-01 5.7220E-01 1.4170E+00 1.0830E+00 5.3820E-01

1.6470E-01 4.3080E-01 3.2780E+00 2.2980E+00 1.0470E+00 3.5450E-01 9.2130E-02

7.6410E-01 1.4370E+00 3.5920E-01 3.2340E+00 8.0320E+00 3.4300E+00 2.5300E-01

1.1810E+00 1.6440E+01 4.3490E+00 6.0740E-01 2.2440E+00 4.9090E+00 5.8810E-02

4.1340E-02 3.5320E-02 2.6560E-02 1.9900E-02 3.0850E-02 1.6590E-02 1.2910E-02

4.9510E-03 7.1480E-03 6.3460E-03 2.1670E-03 3.8530E-02 4.2750E-02 3.3550E-02

2.4330E-02 3.7180E-03 2.7640E-03 3.0660E-03 2.5090E-03 8.7540E-03 8.9930E-03

8.3710E-03 6.9190E-03 3.9230E-02 8.2070E-02 3.7880E-02 5.0750E-03 4.8330E-02

9.1100E-02 4.2870E-02 7.4440E-03 1.0440E-02 1.3690E-02 8.5330E-03 5.1850E-03

2.2300E-02 2.4400E-02 1.9700E-02 1.3790E-02 2.9360E-02 1.0600E-01 3.9650E-02

1.5100E-02 9.7180E-03 1.3270E-02 9.8820E-03 6.0900E-03 6.7030E-03 1.1770E-02

8.2360E-03 5.0300E-03 4.0290E-02 5.4120E-02 7.6230E-03 1.9150E-02 1.1770E-02

1.0000E-02 6.3460E-03 7.2060E-03 6.8290E-03 4.9720E-03 2.9920E-03 2.9860E-02

1.4880E-02 1.4350E-02 1.0030E-02 2.7760E-03 2.0250E-03 1.7230E-03 1.6920E-03

1.8890E-02 3.8110E-03 4.1470E-03 9.2730E-04 3.3400E-03 1.8690E-03 1.5950E-03

1.0230E-03 1.8960E-03 2.0560E-03 1.3590E-03 9.1630E-04 1.5030E+00 2.1820E-01

2.5880E-01 1.6330E-01 7.4380E-02 8.7570E-02 5.5250E-02 4.4130E-02 7.9440E-02

1.4810E-01 1.2160E-01 4.5700E-02 7.4200E-02 6.2330E-02 5.8440E-02 4.8260E-02

9.1220E-02 1.3000E-01 1.0870E-01 1.7970E-01 2.1810E-01 2.3540E-01 8.9330E-02

1.6740E-01 7.2870E-01 7.7200E-01 6.7060E-01 4.0680E-01 1.2190E-01 2.7320E-01

1.5620E+00 1.6680E+00 1.0060E+00 3.6870E-01 1.6150E-01 7.4790E-01 7.9560E-01

2.7480E-01 3.4300E+00 3.8860E+00 2.3680E+00 4.1430E-01 9.2600E-01 1.0490E+01

3.2210E+00 3.2050E-01 2.5200E+00 1.9490E+00 1.8330E-02 2.2300E-02 2.4410E-02

1.7040E-02 1.7020E-02 1.4780E-02 8.4240E-03 3.3000E-03 3.9740E-03 4.0340E-03

2.4320E-03 1.0740E-02 2.3140E-02 3.1250E-02 2.7650E-02 9.9690E-04 2.3900E-03

2.0140E-03 2.6380E-03 2.0670E-03 5.3540E-03 6.9100E-03 7.6970E-03 5.4730E-03

3.7870E-02 4.0670E-02 2.5490E-02 1.0520E-02 4.2870E-02 4.5500E-02 2.7620E-02

3.2450E-03 6.2950E-03 9.4440E-03 6.2550E-03 6.2740E-03 1.3810E-02 1.7340E-02

1.6040E-02 7.9560E-03 1.8850E-02 7.0040E-02 2.9900E-02 2.2800E-03 6.3660E-03

9.1550E-03 8.1730E-03 1.8260E-03 4.2370E-03 8.1580E-03 6.9370E-03 1.8740E-02

2.9460E-02 1.9830E-02 8.1420E-03 1.0000E-02 8.5540E-03 4.8170E-03 3.9850E-03

4.1790E-03 3.7420E-03 2.7580E-03 1.4540E-02 1.4350E-02 1.1090E-02 6.0970E-03

1.2350E-03 1.4000E-03 1.5880E-03 1.2540E-03 1.2590E-02 2.0610E-03 2.3750E-03

1.4870E-03 1.8930E-03 1.5950E-03 1.1320E-03 5.9860E-04 7.7630E-04 1.0640E-03

1.3990E-03 9.1280E-04 6.7030E-02 1.9090E-01 6.2990E-02 2.4910E-02 5.7510E-02

2.6230E-02 3.7120E-04 4.8580E-02 5.8540E-02 8.8800E-02 1.7070E-02 2.7560E-02

4.2190E-02 3.3580E-02 9.2980E-03 4.1780E-02 5.9640E-02 7.8430E-02 7.6950E-02

1.2780E-01 8.9320E-02 7.5970E-02 4.4730E-02 1.3510E-01 4.2300E-01 4.7670E-01

2.9840E-01 3.8850E-02 7.2910E-02 1.4260E-01 6.1380E-01 9.3370E-01 6.9760E-01

3.5960E-02 1.6740E-01 6.4780E-01 5.7400E-02 2.5300E-01 2.3680E+00 2.2940E+00

1.9450E-01 1.8630E-01 5.4500E-01 6.5960E+00 2.7180E-02 4.2920E-01 1.9210E+00

5.8860E-03 1.2580E-02 1.2020E-02 1.0550E-02 7.0600E-03 9.5430E-03 3.5130E-03

1.6500E-03 1.8480E-03 1.6950E-03 1.6770E-03 1.0950E-03 1.0710E-02 1.5770E-02

1.8820E-02 1.5020E-04 9.0460E-04 1.6540E-03 1.3100E-03 1.4770E-05 2.2410E-03

3.9830E-03 4.7730E-03 1.1240E-03 5.0750E-03 2.5490E-02 2.3070E-02 3.3930E-03

7.4440E-03 2.7610E-02 2.4790E-02 5.6240E-04 2.9940E-03 3.9450E-03 5.1190E-03

8.6660E-04 5.9240E-03 9.2990E-03 1.0640E-02 1.0440E-03 7.8770E-03 1.2180E-02

4.2280E-02 1.4990E-04 2.3950E-03 4.4110E-03 6.0310E-03 2.6300E-04 1.6750E-03

2.9390E-03 5.7020E-03 8.7730E-03 7.8380E-03 1.7400E-02 2.3140E-03 6.3460E-03

4.8170E-03 2.2790E-03 1.8330E-03 1.8500E-03 1.9470E-03 1.7040E-03 4.8280E-03

1.0030E-02 6.0970E-03 2.0830E-03 3.4860E-04 9.0720E-04 8.1230E-04 6.7040E-04

6.2960E-03 9.9590E-04 7.8060E-04 1.1850E-03 7.7980E-04 1.0230E-03 5.9860E-04

2.0830E-04 2.3110E-04 5.6190E-04 5.9940E-04 6.8360E-04 1.4230E+00 5.2270E-01

3.6500E+00 3.8370E-01 1.9080E-01 4.9450E-02 2.7970E-02 1.5080E-02 7.8650E-03

4.2500E-01 1.9740E-01 8.2910E-02 3.2480E-02 8.4210E-02 5.2870E-02 2.4810E-02

9.6270E-03 7.2900E-01 6.2940E-01 3.5970E-01 1.2580E-01 6.4100E-01 5.1760E-01

3.0210E-01 1.5100E-01 5.8560E-02 6.1660E-01 4.7760E-01 3.1590E-01 1.7840E-01

8.3940E-02 3.0040E-02 4.2100E-01 2.6400E-01 9.3910E-02 2.7730E+00 9.9160E-01

3.7410E-01 1.4570E-01 2.0110E+00 1.5050E+00 8.3620E-01 3.3570E-01 4.8060E+00

2.1060E+00 5.3400E-02 3.7170E-01 1.6000E-01 6.0160E-02 1.8860E-02 2.1770E-01

1.6420E-01 1.0210E-01 2.5000E-01 2.6630E-01 1.4650E-01 4.0430E-02 3.1950E-01

1.3790E-01 5.1060E-02 1.5290E-02 5.6630E-02 3.0740E-02 1.4930E-02 5.9500E-03

5.9420E-02 2.8120E-02 1.1210E-02 3.1510E-03 6.4150E-01 1.6830E-01 3.1760E-02

5.4940E-03 1.4340E+00 3.4190E-01 4.9840E-02 5.7400E-03 7.0520E-02 3.1760E-02

1.2560E-02 4.1290E-03 1.2010E-01 5.6710E-02 2.3810E-02 8.4800E-03 3.6350E-02

2.3450E-02 1.3180E-02 6.2860E-03 1.0580E-02 6.5940E-03 4.4220E-03 3.1000E-03

9.0300E-03 4.5740E-03 2.0540E-03 7.5260E-04 1.3450E+00 5.8580E-01 1.4800E-02

7.1760E-01 1.8970E-01 3.9800E-02 9.7390E-03 1.2820E-01 1.0230E-01 6.0320E-02

2.6610E-02 8.6860E-01 2.3480E-01 6.0400E-02 2.1800E-02 2.1790E-01 9.2840E-02

3.4890E-02 1.1870E-02 2.5640E-01 1.6120E-01 8.3670E-02 1.5860E-02 2.5300E-01

9.5330E-02 4.5030E-02 2.2240E-02 6.7420E-02 3.0240E-02 1.1570E-02 3.3900E-03

7.0120E-01 3.8380E-01 2.3030E+00 1.2950E-01 1.0950E-02 2.1620E-02 2.0480E-02

1.4570E-02 7.5730E-02 1.9140E-01 1.5490E-01 8.2810E-02 2.2100E-02 3.8380E-02

3.6740E-02 2.7810E-02 5.2330E-01 3.8930E-01 3.1150E-01 1.8460E-01 3.0520E-01

2.6040E-01 2.4850E-01 2.1480E-01 1.2620E-01 3.4530E-01 1.5930E-01 1.5690E-01

1.8780E-01 1.7750E-01 1.0820E-01 2.2590E-01 1.0310E-01 1.9010E-01 4.6370E-01

1.3730E+00 7.8620E-01 2.3090E-01 1.1960E+00 4.5240E-01 6.6180E-01 8.1520E-01

2.1060E+00 6.5090E-01 1.8860E+00 5.6990E-02 1.5500E-01 1.2590E-01 6.9220E-02

1.6420E-01 1.2750E-01 3.1030E-02 1.6660E-01 1.4650E-01 6.7970E-02 9.0730E-02

2.6240E-02 1.3790E-01 1.2010E-01 6.4940E-02 1.1140E-02 2.1820E-02 2.1900E-02

1.7280E-02 3.2720E-03 2.4750E-02 2.4660E-02 1.5230E-02 3.0150E-02 3.2250E-01

1.7450E-01 3.8280E-02 2.4460E-02 7.4400E-01 3.8490E-01 6.7780E-02 1.2770E-02

2.8610E-02 2.3860E-02 1.4080E-02 1.6980E-02 4.9670E-02 4.4760E-02 2.7990E-02

1.6420E-02 1.2950E-02 1.2600E-02 1.0860E-02 3.8180E-03 5.6050E-03 4.4610E-03

2.5810E-03 1.2830E-03 3.6330E-03 3.5450E-03 2.4810E-03 5.8580E-01 1.8670E-01

5.2480E-01 3.5910E-02 3.6670E-01 1.9490E-01 4.0360E-02 8.5080E-02 2.9570E-02

4.3000E-02 5.4020E-02 5.0040E-02 4.6120E-01 2.3670E-01 4.2530E-02 1.6210E-02

9.7280E-02 8.2880E-02 4.1910E-02 1.7100E-01 8.3670E-02 3.1520E-02 5.8690E-02

4.8760E-02 1.4030E-01 7.2360E-02 1.5730E-02 1.2030E-02 2.6610E-02 2.2640E-02

1.3780E-02 1.9060E-01 1.2930E-01 1.0880E+00 3.1350E-03 5.6170E-03 1.0570E-02

1.4490E-02 1.8290E-02 4.1820E-02 9.0350E-02 1.0510E-01 2.5710E-03 1.2990E-02

2.1870E-02 2.5130E-02 1.2750E-01 2.4140E-01 1.7670E-01 8.5610E-02 6.7440E-02

1.8650E-01 1.7320E-01 1.1670E-01 5.5740E-02 1.0340E-02 1.7380E-01 1.7580E-01

1.2020E-01 6.2800E-02 2.3820E-02 4.5470E-02 1.5220E-01 6.1970E-02 1.8680E-01

2.0580E-01 5.5410E-01 4.7910E-01 1.4140E-01 7.2170E-01 5.1090E-01 1.8840E-01

5.3400E-02 1.8870E+00 3.8170E-01 7.4990E-03 3.3990E-02 7.5670E-02 8.6420E-02

1.0210E-01 3.1030E-02 2.8190E-02 8.3340E-02 4.0430E-02 9.0240E-02 2.2930E-02

3.3810E-03 1.5220E-02 6.1590E-02 9.4360E-02 1.1190E-03 6.4710E-03 1.2350E-02

1.6120E-02 3.5270E-05 1.9760E-03 1.1150E-02 2.0790E-02 5.7690E-03 1.7920E-02

1.3320E-01 1.2600E-01 6.7380E-03 1.3060E-02 2.9790E-01 2.9270E-01 1.6910E-03

7.6130E-03 1.4560E-02 1.5780E-02 2.3240E-03 9.7870E-03 2.4370E-02 3.3240E-02

3.8530E-03 8.8910E-03 8.1780E-03 5.5000E-03 2.0640E-03 1.5230E-03 2.0940E-03

2.5520E-03 1.2910E-04 7.4530E-04 1.8620E-03 2.7340E-03 1.4800E-02 5.2470E-01

1.0900E-01 1.2000E-02 1.7700E-02 1.4800E-01 1.4130E-01 1.3440E-02 4.9550E-02

3.2760E-02 1.0090E-02 2.9880E-02 1.5320E-02 1.7720E-01 1.7270E-01 4.2240E-03

8.4570E-03 4.1090E-02 6.5330E-02 8.5490E-02 1.5850E-02 5.8690E-02 1.2400E-02

3.0710E-02 1.3790E-02 4.8870E-02 4.5160E-02 9.8650E-04 7.4940E-03 1.4060E-02

1.5000E-02 1.9900E+00 2.3090E-01 2.0170E-01 1.0960E-01 5.7740E-02 3.0550E-02

5.9930E-01 4.7470E-01 3.8490E-01 2.8360E-01 2.5840E-01 2.0280E-01 1.2450E-01

5.5500E-02 1.4600E+00 1.2940E+00 1.0980E+00 3.7070E-01 3.9550E-02 4.5310E-02

2.2390E-02 9.4680E-03 3.1140E-03 8.0490E-02 4.8770E-02 2.7380E-02 1.3910E-02

6.1710E-03 2.1660E-03 3.3360E-02 2.5900E-02 1.4320E-02 3.2250E-01 1.3220E-01

5.5170E-02 2.1550E-02 1.8400E-01 1.3980E-01 9.4240E-02 5.5600E-02 2.3050E-01

1.1920E-01 2.5600E-02 3.4430E-01 2.1110E-01 1.2220E-01 6.4880E-02 2.4960E-01

2.0280E-01 1.2310E-01 3.1050E+00 5.8190E+00 2.5870E+00 1.8540E-01 8.0540E-02

4.0180E-02 1.9360E-02 9.3210E-03 3.8110E-02 1.9910E-02 9.1170E-03 3.2250E-03

5.4260E-02 2.7510E-02 1.2020E-02 3.8580E-03 2.0090E+01 4.8300E+00 6.6140E-01

2.7320E-02 5.3060E-02 3.6240E-02 2.6680E-02 1.4930E-02 3.1490E-02 1.9370E-02

1.2310E-02 7.5820E-03 2.7130E-02 2.1030E-02 1.7290E-02 1.3950E-02 2.7560E-02

1.7320E-02 9.0880E-03 3.7880E-03 9.3930E-03 5.9240E-03 3.7060E-03 2.2760E-03

1.2840E-02 8.5920E-03 4.9440E-03 2.2270E-03 2.6280E-01 1.1600E-01 4.5690E-03

2.9290E-02 1.6510E-02 1.0440E-02 5.4590E-03 2.3210E-02 1.8540E-02 1.3430E-02

8.5590E-03 8.7830E-02 2.8450E-02 1.0310E-02 4.4020E-03 2.0700E-02 1.0030E-02

4.5600E-03 1.9780E-03 5.0880E-02 2.6740E-02 1.5260E-02 4.0290E-03 2.2580E-02

1.1390E-02 6.6700E-03 3.4070E-03 9.1470E-03 5.2730E-03 2.5390E-03 9.3940E-04

1.5690E+00 3.9200E-02 8.9570E-02 8.3090E-02 5.4910E-02 3.8740E-01 4.0510E-01

2.6010E-01 1.1700E-01 1.2760E-01 9.9310E-02 1.0820E-01 1.2720E-01 1.1850E+00

9.1460E-01 5.8770E-01 2.7720E-01 2.0200E-02 2.8440E-02 2.6430E-02 1.9770E-02

1.0440E-02 2.0370E-02 2.6290E-02 2.6210E-02 2.2240E-02 1.5900E-02 8.2400E-03

2.3170E-02 1.1750E-02 1.4100E-02 7.5730E-02 1.5050E-01 9.3560E-02 3.4480E-02

1.1230E-01 7.8380E-02 6.8650E-02 5.6380E-02 1.1920E-01 5.0920E-02 8.0040E-02

1.4010E-01 1.4430E-01 1.2300E-01 8.7580E-02 2.0280E-01 1.3890E-01 4.1930E-02

2.0700E+00 2.5870E+00 9.6530E-01 2.1760E+00 1.4520E-02 3.5560E-02 3.0910E-02

1.8600E-02 6.3390E-03 1.4670E-02 1.4710E-02 1.1200E-02 5.7320E-03 2.1620E-02

2.2110E-02 1.5640E-02 3.8930E-01 1.0260E+01 5.4000E+00 1.0290E+00 3.0840E-02

3.4600E-02 1.7260E-02 4.6260E-03 1.2910E-02 1.5730E-02 1.1810E-02 6.7330E-03

1.5780E-02 1.7450E-02 1.2740E-02 6.9640E-03 1.1820E-02 8.8020E-03 9.2990E-03

8.5830E-03 3.4940E-03 4.2640E-03 3.7280E-03 2.7150E-03 4.9460E-03 4.1080E-03

4.6920E-03 5.3260E-03 1.1600E-01 3.7520E-02 1.0200E-01 1.2590E-02 1.6630E-02

9.0760E-03 2.8450E-03 1.5440E-02 1.1250E-02 9.0400E-03 6.7560E-03 1.1020E-02

4.6320E-02 2.4520E-02 5.4610E-03 3.3100E-03 8.9340E-03 7.8560E-03 4.7510E-03

3.3890E-02 1.5260E-02 6.0640E-03 9.3560E-03 7.9970E-03 1.2510E-02 6.8220E-03

2.0330E-03 3.2580E-03 2.9850E-03 3.0540E-03 2.6350E-03 1.3040E-02 1.9180E-02

4.1200E-02 6.0150E-02 2.5420E-01 1.2280E-01 1.0710E-01 1.0070E-01 1.8250E-02

7.3510E-02 7.5840E-02 5.6290E-02 4.2210E-01 4.1370E-01 2.9710E-01 1.6130E-01

2.7950E-03 1.2750E-02 1.6100E-02 1.4020E-02 8.0300E-03 1.3510E-03 1.0120E-02

1.4560E-02 1.4960E-02 1.1990E-02 6.5980E-03 8.8690E-03 1.1400E-02 4.3190E-03

2.6910E-02 3.6160E-02 6.3820E-02 5.0240E-02 4.1970E-02 5.2500E-02 4.0060E-02

2.3340E-02 2.5600E-02 8.0040E-02 1.9450E-02 4.5940E-02 6.8920E-02 7.2970E-02

5.9690E-02 1.2310E-01 4.1940E-02 2.6820E-02 1.0350E+00 1.8540E-01 2.1800E+00

5.0300E-01 4.5440E-03 7.2480E-03 1.6120E-02 2.1880E-02 3.3380E-04 3.7970E-03

8.1590E-03 1.1170E-02 9.1770E-05 3.4530E-03 1.0940E-02 1.8060E-02 4.7480E-03

2.8060E-01 4.1880E+00 4.0680E+00 2.0820E-02 7.7440E-03 8.4670E-03 6.6370E-03

6.1440E-03 5.3270E-03 6.2130E-03 5.9030E-03 1.0020E-02 5.6380E-03 5.2570E-03

5.5550E-03 1.8830E-03 6.8740E-03 6.3630E-03 4.1300E-03 1.3130E-03 1.6460E-03

2.0320E-03 2.1070E-03 4.1410E-04 2.9040E-03 3.3680E-03 2.8500E-03 4.5680E-03

1.0200E-01 2.1200E-02 7.4750E-03 3.8850E-03 5.1720E-03 4.0410E-03 6.8800E-03

6.6240E-03 4.8470E-03 2.8950E-03 5.9410E-03 3.8320E-03 1.7550E-02 1.6340E-02

8.4050E-04 1.7380E-03 4.1500E-03 5.6960E-03 1.6950E-02 4.0280E-03 9.3560E-03

1.9570E-03 4.6520E-03 2.5370E-03 4.1240E-03 3.3690E-03 3.7960E-04 1.9700E-03

2.0780E-03 1.5390E-03 4.4340E+00 3.3520E-01 3.1790E-02 6.3530E-01 3.4930E-01

9.5920E-02 9.5270E-03 1.8280E+00 6.8920E-01 3.0490E-01 3.3100E-02 9.5820E-02

7.7160E-01 1.1660E-01 1.3950E-04 3.5850E-02 5.0770E-02 1.5470E-02 4.0720E-03

5.5870E-04 1.3070E-01 6.6000E-02 2.8040E-02 9.4420E-03 2.2590E-03 2.7770E-04

1.3900E-01 3.2990E-02 5.4310E-03 2.0110E-01 5.5800E-02 1.3090E-02 2.6070E-03

2.5560E-01 8.7510E-02 2.5610E-02 6.4420E-03 9.8940E-02 4.6250E-02 5.4520E-03

1.2340E+00 2.9020E-01 5.6650E-02 8.9900E-03 1.4300E-01 2.0530E-02 4.6050E-03

1.2210E-02 2.6300E-02 1.5510E-02 1.4020E-03 8.4310E+00 5.8890E-01 1.5820E-02

1.8930E-03 1.4570E+01 1.2880E+00 5.2170E-02 8.5330E-04 1.8760E+01 1.7310E+00

7.9470E-02 2.4830E-03 1.9330E-02 4.8450E-03 9.7370E-04 1.2340E-04 4.0950E-02

9.8270E-03 7.6800E-04 8.3180E-05 4.9960E-02 1.6990E-02 3.5700E-03 1.8390E-04

6.3200E+00 2.6100E-01 6.0750E-03 5.7420E-04 1.3680E-01 4.3640E-02 9.9160E-03

1.2370E-03 6.8990E-01 8.4090E-02 1.7570E-02 2.9690E-03 2.1150E+00 2.0680E-01

2.3860E-02 3.3860E-03 9.4410E-03 8.3040E-04 4.2700E-05 2.0750E-02 5.7310E-03

8.0300E-04 5.7170E-05 2.8790E-02 7.2240E-03 1.3060E-03 1.5560E-04 4.6420E-02

8.2990E-03 8.7140E-04 2.1380E-04 1.1760E-01 1.9330E-02 2.3960E-03 2.6870E-04

7.0670E-03 4.7520E-03 2.2660E-03 4.9630E-04 2.3460E-02 3.9530E-03 1.0310E-03

2.2540E-05 4.5640E-02 1.0200E-02 1.6350E-03 1.6910E-04 8.9490E+00 5.0680E-01

3.3970E-01 4.5750E-01 3.0290E-01 1.0500E-01 6.6440E-01 1.3830E+00 1.1080E+00

3.4000E-01 3.3140E-01 9.9070E-01 5.9120E-01 1.2960E-01 3.5970E-02 8.0760E-02

3.9910E-02 1.5070E-02 5.5990E-03 5.9850E-02 5.2770E-02 4.3740E-02 2.8570E-02

1.3850E-02 4.4560E-03 6.8720E-02 6.1510E-02 2.1860E-02 9.1700E-02 9.1240E-02

3.9770E-02 1.0950E-02 1.1050E-01 1.2000E-01 6.6690E-02 2.4470E-02 7.1900E-02

3.0970E-02 2.6550E-02 4.1080E-01 6.9880E-01 2.6970E-01 5.9010E-02 7.2530E-02

6.0620E-02 1.0940E-02 1.0460E-02 2.1190E-02 6.7800E-03 9.0680E-03 9.8370E-01

6.0130E+00 7.2110E-01 1.7490E-02 1.2790E+00 1.1010E+01 1.5940E+00 6.1480E-02

2.0830E-01 1.5680E+01 2.1900E+00 9.2520E-02 8.3740E-03 8.8290E-03 3.5440E-03

9.1570E-04 1.7370E-02 1.7120E-02 9.0090E-03 7.4170E-04 2.1480E-02 2.1290E-02

1.3740E-02 4.0730E-03 5.4820E-01 4.7740E+00 3.2110E-01 6.8380E-03 5.6160E-02

6.2220E-02 3.5240E-02 1.0640E-02 1.1390E-01 4.7070E-01 7.7820E-02 1.8790E-02

2.0500E-01 1.5620E+00 2.3190E-01 2.6230E-02 4.4400E-03 3.9030E-03 4.9780E-04

9.4380E-03 8.5460E-03 4.6290E-03 8.1640E-04 9.9990E-03 1.4330E-02 6.3900E-03

1.4080E-03 1.7270E-02 2.2350E-02 7.5230E-03 6.7780E-04 2.4280E-02 7.2300E-02

2.0390E-02 2.6630E-03 6.0580E-03 3.4700E-03 1.7570E-03 1.2140E-03 8.5260E-03

1.2470E-02 2.2890E-03 1.1180E-03 1.4680E-02 2.3600E-02 9.3280E-03 1.7860E-03

8.8760E+00 1.4530E-01 3.7690E-01 3.5950E-01 2.5890E-01 1.8410E-01 9.2010E-01

1.4390E+00 9.7640E-01 2.1600E-01 9.2110E-01 6.3790E-01 4.2390E-01 1.6980E-02

4.3160E-02 5.5700E-02 3.5180E-02 1.2160E-02 1.8790E-02 4.1530E-02 3.8230E-02

3.1980E-02 2.4690E-02 1.3940E-02 2.9840E-02 5.5220E-02 4.1670E-02 3.7420E-02

7.0640E-02 5.9620E-02 2.6620E-02 4.2010E-02 8.6410E-02 8.4800E-02 5.4930E-02

4.4190E-02 3.6090E-02 2.7340E-02 1.1620E-01 3.9740E-01 5.0410E-01 2.1800E-01

3.4000E-02 5.7380E-02 2.8700E-02 8.7160E-03 1.3690E-02 9.0870E-03 8.0860E-03

6.6540E-02 1.2070E+00 4.6220E+00 5.5220E-01 2.7880E-02 1.5920E+00 8.5310E+00

1.2320E+00 6.6390E-03 6.7340E-01 1.3010E+01 1.6890E+00 3.1610E-03 6.6360E-03

5.7720E-03 2.4830E-03 5.4590E-03 1.5200E-02 9.8640E-03 6.3490E-03 6.8190E-03

1.7360E-02 1.4710E-02 1.1610E-02 3.0620E-02 6.8400E-01 3.7500E+00 2.4540E-01

1.8280E-02 4.5880E-02 4.3300E-02 2.9420E-02 2.3980E-02 1.1290E-01 3.6510E-01

6.5810E-02 2.3860E-02 2.3140E-01 1.2480E+00 1.8640E-01 1.7870E-03 3.7340E-03

1.8460E-03 3.3740E-03 7.5780E-03 5.2930E-03 3.2790E-03 2.7600E-03 8.9820E-03

9.8310E-03 5.1980E-03 5.1990E-03 1.5940E-02 1.3490E-02 5.2270E-03 3.8720E-03

2.5800E-02 5.3530E-02 1.6480E-02 5.0490E-03 2.2740E-03 1.8460E-03 1.2480E-03

3.0390E-03 6.9250E-03 8.7020E-03 1.6640E-03 3.7410E-03 1.3670E-02 1.6230E-02

7.5270E-03 3.2260E-02 1.9040E-01 3.5050E-01 3.6690E-01 3.6420E-02 4.1500E-01

1.1150E+00 1.6370E+00 7.4390E-02 5.3100E-01 7.9740E-01 5.1770E-01 4.5280E-03

1.9700E-02 3.4790E-02 4.2480E-02 2.9940E-02 3.1680E-03 1.7110E-02 3.1940E-02

3.6230E-02 2.9950E-02 1.6610E-02 1.0290E-02 3.6150E-02 5.4880E-02 1.2540E-02

3.8720E-02 5.7440E-02 4.3460E-02 1.3180E-02 4.3050E-02 7.5160E-02 8.2340E-02

2.1900E-02 4.4690E-02 1.9500E-02 2.4790E-02 1.3250E-01 3.4180E-01 4.9550E-01

1.4690E-02 3.7590E-02 4.3780E-02 6.9750E-03 6.7200E-03 1.3890E-02 4.0790E-03

3.8430E-03 7.8760E-02 9.4770E-01 4.3600E+00 8.5330E-04 6.1480E-02 1.2310E+00

7.8380E+00 1.0710E-03 1.7710E-02 1.0230E+00 1.1830E+01 9.0580E-04 3.5200E-03

5.5950E-03 4.4210E-03 1.1260E-03 6.5160E-03 1.2810E-02 9.0500E-03 1.0980E-03

7.8500E-03 1.5580E-02 1.5870E-02 1.3550E-03 3.6550E-02 5.2890E-01 3.2030E+00

3.8190E-03 2.0340E-02 4.0600E-02 4.4730E-02 4.4440E-03 2.6230E-02 9.4740E-02

3.2900E-01 3.3860E-03 2.6220E-02 1.8630E-01 1.1360E+00 5.4010E-04 2.3380E-03

3.0160E-03 8.0790E-04 3.9170E-03 6.4560E-03 4.4390E-03 5.1550E-04 3.1220E-03

7.7150E-03 1.0070E-02 1.2580E-03 6.0220E-03 1.3190E-02 1.1420E-02 4.7340E-04

4.4040E-03 2.1160E-02 5.3720E-02 4.0380E-03 1.3120E-03 2.0040E-03 9.7860E-04

7.6090E-04 3.4940E-03 5.8700E-03 6.1410E-03 6.3310E-04 4.2820E-03 1.1620E-02

1.6390E-02 3.5420E+00 1.6670E-01 3.2660E-02 8.6980E-01 4.8200E-01 1.5590E-01

2.8520E-02 1.3720E+00 1.5980E+00 5.1060E-01 1.1480E-01 4.9790E-02 4.5240E-02

1.9480E-02 7.9580E-03 2.8660E-03 7.2700E-02 4.6670E-02 2.8860E-02 1.6090E-02

7.6330E-03 2.7620E-03 7.2170E-02 3.0100E-02 9.3410E-03 5.1070E-01 8.3610E-02

2.3780E-02 6.4500E-03 2.6960E-01 8.2350E-02 2.7260E-02 9.5720E-03 1.3180E-01

6.8890E-02 1.2420E-02 9.9410E-01 4.6320E-01 1.2340E-01 2.9950E-02 2.1510E-01

1.0110E-01 3.5460E-02 2.8140E-01 3.3180E-01 1.6390E-01 7.5440E-02 5.8520E+00

8.7510E-01 9.2510E-02 8.4140E-03 6.4210E-01 3.4110E-01 8.3180E-02 1.1950E-02

9.4510E-01 3.4700E-01 1.0050E-01 1.0100E-02 1.5180E-01 2.7460E-02 1.8810E-02

9.9520E-03 1.7420E+01 4.5320E-01 3.7890E-03 8.8100E-04 2.2470E+01 2.6440E+00

1.1120E-01 1.0580E-03 2.5150E+01 2.5630E+00 1.5260E-01 5.5730E-03 6.6020E-01

9.9320E-02 1.0610E-02 1.3230E-03 4.8690E-01 6.6350E-02 1.0760E-02 1.8160E-03

6.3260E-02 3.0110E-02 1.0960E-02 2.1860E-03 4.4490E-02 1.1720E-02 1.8090E-03

7.8620E-01 5.2430E-02 6.5720E-03 1.6820E-03 3.9570E-01 6.7540E-02 1.0060E-02

2.0160E-03 4.6670E-02 1.9390E-02 5.5750E-03 1.2580E-03 4.8910E-02 2.0240E-02

6.5340E-03 1.8660E-03 1.6120E-02 7.9890E-03 4.8610E-03 1.9980E-03 1.8470E-02

8.8520E-03 3.7280E-03 1.2770E-03 3.8250E-02 1.5150E-02 4.9440E-03 1.1060E-03

5.1530E+00 2.1890E-01 2.3450E-01 6.1480E-01 4.5350E-01 1.7440E-01 1.3580E+00

1.4910E+00 1.0050E+00 4.2890E-01 2.7500E-02 4.3160E-02 3.0950E-02 1.6720E-02

6.4480E-03 3.9950E-02 3.4820E-02 2.4820E-02 1.8490E-02 1.3850E-02 7.8330E-03

3.9430E-02 3.0360E-02 1.9480E-02 1.3480E-01 2.8700E-01 5.9650E-02 1.8220E-02

8.2340E-02 1.4010E-01 6.4430E-02 2.4170E-02 9.1710E-02 3.9390E-02 3.9270E-02

4.6320E-01 5.3900E-01 3.8220E-01 1.2440E-01 1.4160E-01 9.1200E-02 4.8510E-02

2.2510E-01 2.2420E-01 1.6370E-01 6.9040E-02 4.9010E-01 3.8580E+00 1.0090E+00

1.1120E-01 2.4510E-01 4.8060E-01 3.2140E-01 9.6910E-02 1.8010E-01 1.0890E+00

5.9990E-01 1.2060E-01 4.2450E-02 1.0180E-01 1.5510E-02 6.6450E-03 2.4070E+00

1.1390E+01 5.0200E-01 3.0850E-03 2.6400E+00 1.4240E+01 3.1620E+00 1.4080E-01

8.4090E-01 1.8200E+01 3.1840E+00 1.9110E-01 9.9280E-02 3.9880E-01 1.0690E-01

1.2100E-02 3.3340E-02 3.4420E-01 7.1850E-02 1.2170E-02 2.4650E-02 2.6000E-02

2.2290E-02 1.2280E-02 2.2680E-02 1.6890E-02 6.8550E-03 1.3770E-01 4.8530E-01

4.9110E-02 5.1930E-03 6.7470E-02 2.3360E-01 6.8680E-02 1.0620E-02 2.3060E-02

1.7430E-02 1.3130E-02 4.6780E-03 1.7630E-02 2.1220E-02 1.6530E-02 6.6950E-03

1.2900E-02 6.0570E-03 3.6470E-03 2.1750E-03 1.0210E-02 8.0000E-03 5.2250E-03

2.4300E-03 1.5140E-02 1.6580E-02 1.0780E-02 5.0880E-03 3.8790E+00 6.0610E-02

3.8950E-01 4.3350E-01 3.9130E-01 8.0030E-01 1.2140E+00 9.8900E-01 6.2180E-01

1.4160E-02 2.8260E-02 2.7360E-02 2.0900E-02 1.1300E-02 2.0510E-02 1.9150E-02

2.3730E-02 2.1200E-02 1.3910E-02 6.3250E-03 1.9250E-02 2.5590E-02 2.2110E-02

4.0540E-02 1.1550E-01 1.8120E-01 3.6940E-02 2.7260E-02 6.4430E-02 9.2790E-02

4.8800E-02 5.1680E-02 4.4760E-02 3.1340E-02 1.2340E-01 3.8220E-01 4.1110E-01

2.9790E-01 8.7120E-02 7.8030E-02 4.5870E-02 1.6890E-01 1.5000E-01 1.2580E-01

6.6810E-02 2.6410E-02 5.5520E-01 2.7300E+00 7.9050E-01 3.2980E-02 2.3310E-01

3.1860E-01 2.7310E-01 6.6500E-03 3.3150E-01 7.4460E-01 4.9370E-01 2.3080E-02

3.4310E-02 6.1670E-02 5.7720E-03 1.9120E-01 2.9150E+00 7.2760E+00 3.5080E-01

1.1050E-01 3.1630E+00 9.4790E+00 2.3900E+00 7.1930E-03 1.0230E+00 1.3350E+01

2.4480E+00 1.0610E-02 1.0690E-01 2.6350E-01 8.1830E-02 6.1640E-03 3.0860E-02

2.5650E-01 5.7150E-02 6.4020E-03 1.8170E-02 1.8810E-02 2.0530E-02 1.0220E-02

1.5060E-02 9.5300E-03 2.0610E-02 1.5000E-01 3.0420E-01 3.3240E-02 1.0050E-02

6.8670E-02 1.5400E-01 5.2590E-02 9.0430E-03 1.5610E-02 1.0780E-02 8.2940E-03

4.6390E-03 1.4430E-02 1.3740E-02 1.3770E-02 9.6710E-03 4.1840E-03 3.0310E-03

1.6940E-03 5.1730E-03 6.2450E-03 5.0770E-03 2.9000E-03 4.9380E-03 1.0760E-02

1.1390E-02 8.6160E-03 1.3830E-02 1.1680E-01 2.9690E-01 4.1830E-01 2.4340E-01

7.5600E-01 8.7180E-01 5.2350E-01 6.1150E-03 1.2830E-02 1.9310E-02 1.9000E-02

1.1580E-02 6.6360E-03 1.5850E-02 1.5790E-02 1.4070E-02 1.1180E-02 6.3630E-03

8.0450E-03 1.8100E-02 1.8490E-02 1.3440E-02 3.8600E-02 8.5100E-02 1.0970E-01

9.5720E-03 2.4170E-02 4.8800E-02 7.2970E-02 2.3050E-02 4.5780E-02 1.6360E-02

2.9950E-02 1.2440E-01 2.9800E-01 3.5740E-01 4.8500E-02 5.7900E-02 3.4290E-02

1.1260E-01 9.3560E-02 7.9630E-02 5.5270E-02 3.5660E-03 2.8720E-02 4.2170E-01

2.2810E+00 2.2300E-03 3.7130E-02 1.8670E-01 3.4590E-01 6.5730E-04 7.1860E-03

2.5300E-01 7.9010E-01 1.5650E-02 1.1170E-02 2.0520E-02 3.5870E-02 6.6970E-03

2.5890E-01 2.2350E+00 4.6530E+00 1.0580E-03 1.4080E-01 2.3900E+00 7.5620E+00

1.9220E-03 6.8990E-03 7.6580E-01 1.0440E+01 1.3220E-03 1.2110E-02 8.1830E-02

2.1330E-01 9.3270E-04 6.6140E-03 2.4540E-02 2.0210E-01 5.9470E-04 7.0570E-03

1.5730E-02 1.9230E-02 3.8460E-03 1.0480E-02 8.8840E-03 3.9160E-03 2.3570E-02

1.1430E-01 1.9690E-01 2.0160E-03 1.0620E-02 5.2600E-02 1.2490E-01 2.8640E-03

8.7940E-03 1.1320E-02 6.1780E-03 1.1920E-03 4.4770E-03 1.1480E-02 1.3890E-02

6.4490E-03 2.5600E-03 2.3180E-03 1.0610E-03 2.3600E-03 4.0560E-03 4.0700E-03

2.4430E-03 1.1070E-03 5.0880E-03 8.6130E-03 9.0090E-03 3.5990E+00 1.2140E-01

1.2560E-02 1.5430E+00 7.9700E-01 2.3410E-01 4.7940E-02 1.8740E-02 3.2620E-02

1.0830E-02 3.2280E-03 7.9740E-04 1.0120E-01 4.5050E-02 1.8690E-02 6.9410E-03

2.0870E-03 4.0880E-04 5.5860E-02 1.4040E-02 5.3640E-03 1.5110E-01 5.6840E-02

1.8890E-02 4.3830E-03 5.3200E-01 7.1860E-02 2.1670E-02 7.2830E-03 1.2440E-01

2.4890E-02 5.2740E-03 1.0580E+00 2.9060E-01 5.8730E-02 9.0500E-03 1.8600E-01

5.5370E-02 8.3780E-03 3.1510E-03 1.9400E-02 3.8860E-03 1.0120E-03 8.5770E-01

1.5270E-01 2.5820E-02 2.3700E-03 1.7820E+00 2.3980E-01 2.8260E-02 2.7570E-03

1.0800E-01 7.4010E-02 2.0080E-02 2.4340E-03 2.4590E-02 1.1450E-02 3.3690E-03

4.7970E-04 6.4830E-02 1.9930E-02 2.8660E-03 4.6570E-04 5.3670E-01 3.5940E-02

5.8670E-03 1.6820E-03 1.1700E-01 4.5420E-02 1.3640E-02 2.3930E-03 1.9390E+01

7.1090E-01 5.5760E-03 9.0950E-04 2.5890E+01 2.3980E+00 9.5000E-02 6.8670E-04

3.1310E+01 2.7390E+00 1.2850E-01 2.7540E-03 3.2120E-02 6.5780E-03 2.1980E-03

7.1470E-02 2.8520E-02 1.0660E-02 2.6700E-03 1.7230E+00 8.7850E-02 1.2670E-02

3.9750E-03 5.3830E-02 1.5790E-02 3.9430E-03 3.7130E-04 1.1340E-01 2.6820E-02

5.5900E-03 9.5220E-04 1.0860E-03 1.1870E-02 3.5880E-03 8.7000E-04 2.4880E-02

8.7860E-03 2.3150E-03 5.0510E-04 7.1140E-02 1.6860E-02 3.3100E-03 5.6250E-04

6.4810E+00 1.6470E-01 8.5300E-01 1.8790E+00 5.1350E-01 1.9830E-01 1.4190E-02

4.2870E-02 2.5080E-02 1.0770E-02 3.5780E-03 3.5150E-02 4.6470E-02 3.2850E-02

1.8440E-02 8.9850E-03 3.5720E-03 2.6280E-02 2.7760E-02 8.7170E-03 7.6610E-02

6.6240E-02 3.4620E-02 1.5250E-02 1.0550E-01 3.4490E-01 5.7700E-02 1.9190E-02

6.3760E-02 5.1520E-02 1.3520E-02 3.5090E-01 5.1220E-01 2.5430E-01 6.2740E-02

1.0780E-01 6.8730E-02 3.1560E-02 2.6260E-03 9.9450E-03 8.2700E-03 2.0290E-03

1.5260E-01 5.2330E-01 1.5120E-01 2.9800E-02 1.5990E-01 1.2620E+00 2.7240E-01

3.2630E-02 6.1850E-02 8.6390E-02 6.5930E-02 2.2890E-02 1.4400E-02 8.8000E-03

6.8960E-03 3.1620E-03 2.8970E-02 2.4960E-02 1.6880E-02 2.6050E-03 7.1580E-02

3.7120E-01 3.5330E-02 5.4900E-03 4.5410E-02 5.2820E-02 3.5630E-02 1.4810E-02

2.0240E+00 1.3860E+01 8.6330E-01 5.9000E-03 2.3920E+00 1.8220E+01 2.9440E+00

1.1610E-01 5.5870E-01 2.4090E+01 3.4640E+00 1.5540E-01 1.6560E-02 1.4290E-02

3.2210E-03 3.7670E-02 3.2270E-02 1.6190E-02 8.3200E-03 2.0340E-01 1.2190E+00

8.9490E-02 1.1510E-02 2.3400E-02 2.4060E-02 1.0180E-02 3.9760E-03 2.6810E-02

6.4280E-02 2.5280E-02 6.0980E-03 9.0550E-04 6.9190E-03 4.7870E-03 1.9020E-03

1.2110E-02 1.0270E-02 6.1150E-03 1.9160E-03 2.1030E-02 3.7020E-02 1.5020E-02

3.4820E-03 5.7970E+00 4.0250E-01 1.0570E+00 1.2540E+00 3.3750E-01 8.0830E-03

2.4750E-02 2.8460E-02 1.9640E-02 8.6000E-03 1.1020E-02 2.3380E-02 3.0630E-02

2.6670E-02 1.7110E-02 7.7030E-03 1.2220E-02 2.2040E-02 1.5930E-02 3.5780E-02

5.0480E-02 4.5740E-02 2.2180E-02 2.9930E-02 9.6800E-02 2.5010E-01 4.5000E-02

3.0370E-02 4.6730E-02 2.5940E-02 9.1230E-02 3.0970E-01 3.3940E-01 2.0380E-01

5.6050E-02 6.7950E-02 4.2480E-02 2.1010E-03 4.8410E-03 7.3640E-03 3.9900E-03

2.5820E-02 1.5120E-01 3.8300E-01 1.2460E-01 1.5190E-02 1.7670E-01 9.7160E-01

2.1790E-01 1.2180E-02 5.5530E-02 6.2250E-02 5.9690E-02 6.7170E-03 8.6590E-03

6.6070E-03 4.6220E-03 9.5630E-03 2.3590E-02 1.3940E-02 1.1620E-02 1.0750E-02

7.8840E-02 2.7020E-01 2.7160E-02 1.3630E-02 3.5630E-02 3.8040E-02 3.1640E-02

1.2430E-01 2.5060E+00 1.0130E+01 6.4710E-01 9.4770E-02 2.9440E+00 1.3640E+01

2.2590E+00 3.7570E-03 1.6290E+00 1.8890E+01 2.6640E+00 8.3770E-03 1.2390E-02

6.4830E-03 1.8870E-02 2.3640E-02 2.2960E-02 1.0070E-02 2.5480E-02 2.3280E-01

8.9190E-01 6.8250E-02 9.0610E-03 1.6690E-02 1.6550E-02 6.9870E-03 5.5910E-03

2.5280E-02 4.6090E-02 2.1000E-02 7.2450E-04 3.7890E-03 4.4720E-03 2.6250E-03

5.0420E-03 8.6680E-03 6.5660E-03 4.0500E-03 5.2190E-03 1.9110E-02 2.4960E-02

1.1960E-02 1.5950E-01 5.1990E-01 8.3930E-01 8.3800E-01 2.8890E-03 1.0590E-02

1.8800E-02 2.1670E-02 1.4630E-02 2.0440E-03 9.8500E-03 1.7630E-02 2.2790E-02

2.1570E-02 1.3150E-02 6.0190E-03 1.1450E-02 2.0070E-02 1.3980E-02 3.4580E-02

3.9510E-02 2.7050E-02 1.0530E-02 2.8850E-02 7.7300E-02 1.9970E-01 1.3310E-02

3.1430E-02 3.2540E-02 1.7370E-02 1.0140E-01 2.5800E-01 3.3140E-01 2.4750E-02

5.7670E-02 4.2440E-02 1.5750E-03 2.2590E-03 4.7720E-03 5.1180E-03 2.3700E-03

2.9790E-02 1.2460E-01 3.5940E-01 1.3910E-03 1.7100E-02 1.4060E-01 8.7710E-01

5.3570E-04 1.3860E-02 4.8660E-02 7.9100E-02 2.1770E-03 6.9950E-03 7.0710E-03

3.7090E-03 2.3390E-03 1.0820E-02 1.9160E-02 1.1730E-02 2.5900E-03 1.1460E-02

6.1740E-02 2.1440E-01 2.3930E-03 1.4810E-02 3.1640E-02 4.0360E-02 3.8870E-03

1.5640E-01 1.9300E+00 7.9620E+00 6.8660E-04 1.1600E-01 2.2590E+00 1.1830E+01

5.2790E-04 4.5330E-03 1.2330E+00 1.6160E+01 4.2780E-03 7.6240E-03 8.5410E-03

7.9800E-03 1.7570E-02 1.8170E-02 1.2940E-02 5.9920E-03 2.7310E-02 1.8100E-01

6.9980E-01 2.4320E-03 1.0010E-02 1.3690E-02 1.0840E-02 9.5210E-04 6.0980E-03

2.1000E-02 4.5330E-02 5.4330E-04 1.9160E-03 3.4800E-03 2.7680E-03 1.7480E-03

5.1230E-03 6.8960E-03 4.4760E-03 1.0360E-03 5.7620E-03 1.5770E-02 2.3380E-02

3.6340E+00 3.0290E-01 1.5910E-01 3.6980E-02 2.8330E-02 1.5080E-02 7.3770E-03

2.9930E-03 3.8100E-02 2.2990E-02 1.3240E-02 7.4650E-03 4.0710E-03 1.8270E-03

7.0730E-02 3.5460E-02 2.7530E-02 4.3150E-01 2.1970E-01 9.5370E-02 3.1180E-02

5.4990E-01 2.8320E-01 1.4320E-01 6.1250E-02 4.7840E-01 6.8560E-02 2.1710E-02

3.5150E-01 1.6430E-01 7.0030E-02 2.5290E-02 5.2060E-01 2.8640E-01 3.8130E-02

5.6180E-02 1.3600E-01 7.1700E-02 3.9640E-02 2.5010E-01 1.1160E-01 3.3970E-02

7.2830E-03 1.6530E-01 7.3400E-02 2.6090E-02 6.3580E-03 1.5840E-01 7.3810E-02

2.6250E-02 5.7930E-03 4.6410E-02 2.5130E-02 1.4060E-02 6.1840E-03 2.2710E+00

4.4250E-01 3.2120E-02 5.7780E-03 2.1410E+00 3.5770E-01 5.6500E-02 1.1850E-02

1.6970E-01 8.8530E-02 3.8810E-02 1.3060E-02 2.8580E+00 4.3480E-01 5.7670E-02

1.0330E-02 2.4220E-01 8.8540E-02 3.0510E-02 1.0090E-02 2.6780E-01 1.0960E-01

4.4340E-02 1.6400E-02 1.2280E+01 2.3930E-01 5.5880E-03 1.6800E+01 3.0940E+00

1.2820E-01 2.1820E-03 2.3900E+01 3.3530E+00 2.7730E-01 1.4850E-02 1.2590E-01

4.7530E-02 1.3660E-02 2.7830E-03 2.6190E-02 1.5750E-02 8.0060E-03 3.2240E-03

4.1230E-02 1.0680E-01 1.8220E-02 8.6270E-03 4.7610E-02 2.5510E-02 1.0310E-02

2.6640E-03 3.0980E-02 1.2510E-02 4.7850E-03 1.3600E-03 5.1070E+00 1.3590E-01

2.0670E-02 1.9460E-02 1.6780E-02 1.1140E-02 5.0570E-03 1.6030E-02 1.6010E-02

1.4460E-02 1.0560E-02 6.1220E-03 2.5800E-03 3.8450E-02 4.6130E-02 1.5850E-02

2.1880E-01 1.7610E-01 1.1900E-01 6.6720E-02 2.5190E-01 2.2520E-01 1.7790E-01

1.1140E-01 1.6180E-01 2.3050E-01 3.4610E-02 1.3580E-01 1.5130E-01 1.0740E-01

6.3900E-02 3.4260E-01 1.0940E-01 1.8180E-01 4.2130E-02 8.7100E-02 7.4160E-02

2.4220E-02 7.6780E-02 9.0930E-02 9.4970E-02 3.9580E-02 4.3530E-02 7.0180E-02

5.9430E-02 3.0170E-02 4.1050E-02 6.4580E-02 6.1340E-02 3.1210E-02 2.5110E-02

2.3610E-02 1.3260E-02 6.8660E-03 4.4230E-01 1.1100E+00 4.8010E-01 3.1330E-02

1.2310E-01 1.3560E+00 3.8530E-01 6.3100E-02 6.6670E-02 6.7110E-02 5.8910E-02

3.9900E-02 1.1790E-01 1.8500E+00 4.8760E-01 6.6780E-02 5.1870E-02 1.2080E-01

7.4360E-02 3.1560E-02 5.9590E-02 1.3590E-01 8.7370E-02 4.5680E-02 2.9540E+00

6.2790E+00 1.7060E-01 3.0930E+00 8.2690E+00 3.4880E+00 1.6420E-01 6.7260E-01

1.5610E+01 4.0450E+00 3.6830E-01 4.7520E-02 4.9380E-02 3.2750E-02 1.2710E-02

1.2690E-02 1.0170E-02 9.3920E-03 7.6320E-03 3.0920E-02 3.8400E-02 5.4710E-02

7.1770E-03 2.5510E-02 1.7000E-02 1.3530E-02 8.5290E-03 9.8140E-03 1.4200E-02

8.3730E-03 4.8620E-03 3.2210E+00 9.2690E-03 1.4380E-02 1.1410E-02 9.4180E-03

5.9610E-03 5.9280E-03 1.0340E-02 9.1220E-03 7.9630E-03 6.5900E-03 3.9020E-03

2.5440E-02 2.3580E-02 1.7860E-02 9.5160E-02 1.2210E-01 1.1220E-01 5.8490E-02

9.9440E-02 1.4810E-01 1.4250E-01 1.1880E-01 5.2960E-02 1.3450E-01 9.6920E-02

4.6360E-02 8.4520E-02 9.8900E-02 7.5840E-02 1.5140E-01 1.6740E-01 1.0370E-01

2.8080E-02 5.6870E-02 4.3430E-02 2.3370E-02 7.6870E-03 7.0400E-02 4.6190E-02

7.7270E-02 6.3390E-03 3.4900E-02 4.3830E-02 5.0470E-02 3.7800E-03 3.5370E-02

3.9450E-02 5.3540E-02 1.4070E-02 1.3250E-02 1.3140E-02 5.4520E-03 3.2090E-02

4.8010E-01 5.2990E-01 3.3370E-01 2.2550E-02 1.0280E-01 8.6700E-01 2.9300E-01

1.8660E-02 4.3250E-02 4.5780E-02 4.7360E-02 2.0420E-02 9.9370E-02 1.1900E+00

3.7180E-01 1.2270E-02 3.9090E-02 7.5560E-02 5.8800E-02 1.7270E-02 3.9220E-02

9.0910E-02 7.1690E-02 4.0660E-01 3.3020E+00 2.5610E+00 1.2810E-01 3.4880E+00

3.9380E+00 2.4550E+00 9.8900E-03 7.4680E-01 9.9340E+00 3.1020E+00 1.3660E-02

3.2760E-02 2.9010E-02 1.9500E-02 4.4210E-03 7.4150E-03 7.4240E-03 7.3250E-03

2.0610E-02 1.5350E-02 3.0320E-02 2.1190E-02 1.0310E-02 1.3530E-02 1.2510E-02

6.7130E-03 3.0060E-03 5.9860E-03 9.6790E-03 6.1550E-03 3.4260E-03 5.5460E-03

7.5130E-03 5.8580E-03 2.8390E-03 2.5790E-03 2.8550E-03 4.9360E-03 5.3300E-03

4.0960E-03 2.1270E-03 1.4030E-02 6.2830E-03 1.3040E-02 3.1170E-02 6.6710E-02

6.0340E-02 3.5960E-02 3.2310E-02 6.7740E-02 8.4490E-02 7.1580E-02 1.7850E-02

4.0630E-02 8.3630E-02 1.2020E-02 3.6400E-02 5.1130E-02 5.3270E-02 4.1730E-02

1.4110E-01 2.8500E-02 1.4040E-02 2.9260E-02 1.6750E-02 1.5820E-02 1.3130E-03

6.8910E-03 4.8740E-02 4.3790E-02 5.1720E-04 6.3570E-03 2.4680E-02 3.6220E-02

3.8720E-05 4.0830E-03 2.5420E-02 3.6520E-02 6.1840E-03 6.8660E-03 5.4510E-03

4.4560E-03 5.7750E-03 3.1330E-02 3.3370E-01 3.1710E-01 4.8940E-03 1.9230E-02

6.8410E-02 5.5030E-01 3.3620E-03 1.6480E-02 2.8780E-02 2.8910E-02 4.0180E-03

1.8080E-02 6.6490E-02 7.5240E-01 3.1100E-03 9.5240E-03 2.5920E-02 5.4320E-02

3.8690E-03 1.3930E-02 2.6330E-02 6.5400E-02 1.8460E-02 6.2860E-01 2.4880E+00

2.1770E-03 1.6420E-01 2.4550E+00 2.3840E+00 4.8380E-03 4.1760E-03 5.2030E-01

6.3680E+00 2.7820E-03 1.2710E-02 1.9500E-02 1.2480E-02 1.0130E-03 3.5880E-03

4.7170E-03 3.9720E-03 1.0310E-02 6.5310E-03 8.1720E-03 1.8730E-02 2.6640E-03

8.5300E-03 6.7130E-03 3.6150E-03 5.1930E-04 2.7770E-03 3.7620E-03 5.3550E-03

4.0310E+00 1.4410E+00 5.0130E-01 2.0440E-01 9.5950E+00 3.8480E+00 1.1390E+00

2.6090E-01 5.4980E-02 1.2110E-02 4.3950E+00 1.2850E+00 4.5690E-02 3.7110E+00

5.4000E-01 9.8100E-02 6.8940E-03 2.8150E+00 8.3040E-01 1.3910E-01 1.2170E-02

1.0290E+00 1.5000E-01 1.5520E-02 7.8090E-02 3.2740E-02 1.4650E-02 6.3520E-03

1.9740E-02 1.2550E-02 6.7840E-03 3.3220E-02 8.8610E-02 1.3950E-02 3.9420E-03

1.3750E-01 1.0770E-01 4.9720E-02 1.1500E-02 8.6940E-02 4.3010E-02 1.2870E-02

2.0180E-03 5.6780E-02 1.4640E-02 2.9000E-03 3.6390E-04 1.2000E-01 3.8380E-02

6.6490E-03 1.0690E-04 1.1500E-01 5.9570E-02 5.2690E-02 3.4250E-02 1.7070E-01

4.1610E-02 1.0570E-02 2.5390E-03 4.7430E-02 1.5500E-02 4.1550E-03 9.0120E-04

9.0120E-02 8.1100E-02 4.7860E-02 1.5600E-02 2.0280E-01 4.5380E-02 7.4090E-03

7.1020E-04 3.7400E-02 1.5930E-02 4.5950E-03 7.6550E-04 5.3770E-02 3.9100E-02

1.0560E-02 5.9610E-02 2.7160E-02 1.4630E-02 7.6740E-03 5.2260E-02 2.4920E-02

8.6580E-03 2.2720E-03 7.5860E-02 7.8280E-02 3.9420E-02 9.1550E-03 4.8950E-02

2.7370E-02 9.5070E-03 1.9870E-03 7.3120E-02 2.4620E-02 1.1350E-02 6.8150E-03

2.1400E-02 1.1110E-02 5.7970E-03 2.8130E-03 3.3820E-02 1.6820E-02 6.3740E-03

1.5010E-03 5.1360E+00 2.3440E+00 4.1790E-01 2.7820E+00 3.7070E+00 3.3490E+00

1.5780E+00 4.3310E-01 8.3170E-02 2.1350E+00 1.5910E+00 8.5380E-01 1.1260E+00

1.8550E+00 3.7800E-01 9.3860E-02 9.7250E-01 1.1970E+00 7.0630E-01 1.4540E-01

4.7570E-01 3.9580E-01 8.3790E-02 3.5710E-02 3.7670E-02 2.1100E-02 1.0980E-02

1.5460E-02 1.1120E-02 4.8170E-03 2.6570E-02 4.1650E-02 3.6770E-02 6.7930E-03

1.0350E-01 3.6590E-02 5.6090E-02 4.8990E-02 3.9010E-02 2.9770E-02 3.3560E-02

1.3530E-02 1.0820E-02 3.1620E-02 1.4200E-02 3.1120E-03 5.3530E-02 4.4560E-02

2.7000E-02 7.0350E-03 7.0060E-02 8.9280E-02 3.9620E-02 1.0310E-02 5.1110E-02

8.6930E-02 3.2500E-02 9.8160E-03 1.5300E-02 2.2340E-02 1.2600E-02 4.1390E-03

8.0210E-02 3.6760E-02 3.0110E-02 4.0650E-02 4.5730E-02 1.0830E-01 4.2950E-02

8.0470E-03 1.4290E-02 1.5090E-02 1.2770E-02 4.8040E-03 4.5120E-02 1.8390E-02

1.9240E-02 3.3250E-02 3.0910E-02 1.7730E-02 5.3700E-03 2.6610E-02 1.9650E-02

1.6360E-02 7.8660E-03 7.8290E-02 2.5740E-02 2.8030E-02 3.0130E-02 2.6520E-02

1.5460E-02 1.8750E-02 9.5250E-03 5.8500E-02 1.6410E-02 1.3730E-02 4.0790E-03

1.3060E-02 1.0510E-02 6.8900E-03 2.4360E-03 1.7830E-02 1.3050E-02 9.9700E-03

5.9500E-03 3.1350E+00 1.8130E+00 3.2680E-01 2.6900E+00 1.8160E+00 2.1810E+00

1.4890E+00 4.4780E-01 8.5120E-01 1.3890E+00 1.1940E+00 3.0750E-01 1.0050E+00

1.0330E+00 2.2690E-01 2.4230E-01 8.3230E-01 7.0180E-01 4.8410E-01 1.9680E-01

3.4430E-01 1.7540E-01 1.6750E-02 2.4070E-02 2.3970E-02 1.4300E-02 1.1630E-02

8.1260E-03 3.7350E-03 1.9930E-02 1.8590E-02 3.0750E-02 1.4570E-02 4.8810E-02

4.8250E-02 3.4340E-02 5.2440E-02 1.0840E-02 2.8980E-02 2.0140E-02 2.6940E-02

1.2400E-03 1.2040E-02 2.1210E-02 1.0340E-02 1.9150E-02 3.6730E-02 2.6630E-02

1.6570E-02 5.6980E-02 5.6860E-02 3.3520E-02 9.5840E-03 1.4530E-02 4.4550E-02

5.3550E-02 2.2630E-02 4.1300E-03 1.2860E-02 1.4420E-02 9.3790E-03 5.1210E-02

2.7830E-02 3.5270E-02 2.6510E-02 7.1070E-03 4.8040E-02 6.8460E-02 3.0210E-02

3.7570E-03 1.1260E-02 1.0110E-02 1.0080E-02 3.0880E-02 1.7430E-02 1.3740E-02

1.9800E-02 2.3140E-02 1.4830E-02 7.6880E-03 1.0950E-02 1.6720E-02 1.3180E-02

1.2000E-02 5.3560E-02 2.2910E-02 2.9050E-02 1.6110E-02 9.6780E-03 1.6810E-02

1.0990E-02 1.5220E-02 4.3880E-02 1.1510E-02 1.0030E-02 4.1240E-03 7.9210E-03

8.3450E-03 5.3060E-03 3.1040E-03 7.8050E-03 1.0320E-02 9.3050E-03 7.6780E-03

1.9620E+00 5.8550E-02 3.4560E-01 1.9710E+00 1.2450E+00 1.2220E+00 1.1230E+00

2.3040E-01 9.7150E-01 1.0870E+00 7.3840E-02 3.6010E-01 7.6930E-01 5.0240E-01

3.5260E-02 3.3630E-01 5.4610E-01 5.7310E-01 7.0210E-02 2.1170E-01 1.9580E-01

7.7080E-03 1.2880E-02 1.7160E-02 1.4990E-02 7.8750E-03 5.0320E-03 2.7200E-03

1.3290E-02 7.9480E-03 1.7800E-02 1.6860E-02 1.4710E-02 4.1740E-02 3.5810E-02

3.0310E-02 1.4330E-03 1.4340E-02 1.8220E-02 2.3940E-02 8.0320E-05 1.9120E-03

1.1390E-02 1.6500E-02 4.8800E-03 2.1010E-02 2.3770E-02 1.6400E-02 4.5640E-02

2.3650E-02 2.1650E-02 1.3690E-02 4.1290E-03 1.5510E-02 3.5830E-02 3.4710E-02

9.3210E-04 4.8200E-03 9.8510E-03 1.1580E-02 2.3190E-02 3.1860E-02 2.6000E-02

1.2820E-02 6.3420E-04 1.0810E-02 4.1110E-02 4.9990E-02 5.4200E-04 4.8950E-03

7.7960E-03 1.0240E-02 1.7690E-02 1.7340E-02 6.3480E-03 1.2160E-02 1.2410E-02

1.1550E-02 7.5110E-03 3.6390E-03 1.0180E-02 1.1210E-02 1.0210E-02 2.6550E-02

3.1360E-02 1.8390E-02 4.7870E-03 2.3400E-03 1.0300E-02 1.0740E-02 1.1760E-02

2.9250E-02 7.6930E-03 5.4940E-03 3.9220E-03 4.7070E-03 4.9770E-03 4.1630E-03

2.6050E-03 2.6370E-03 6.7750E-03 7.5580E-03 6.4320E-03 1.0300E-02 6.2430E-02

2.4730E-01 1.1330E+00 1.0660E+00 4.6610E-01 1.8260E-02 4.8980E-01 6.3650E-01

1.2020E-02 1.0670E-01 2.8590E-01 4.4610E-01 2.7490E-03 5.6310E-02 3.0780E-01

3.7210E-01 1.9840E-02 9.2370E-02 1.2660E-01 2.9830E-03 5.6420E-03 7.8680E-03

9.8750E-03 3.9970E-03 2.3430E-03 1.4650E-03 6.6450E-03 2.9550E-03 7.2540E-03

1.1100E-02 1.8790E-03 2.1100E-02 2.8350E-02 9.9690E-03 3.0610E-05 2.4040E-03

1.3960E-02 1.2570E-02 1.0350E-05 1.1050E-04 2.0200E-03 1.2790E-02 6.0030E-04

7.9640E-03 1.5040E-02 9.4280E-03 2.6140E-02 6.0670E-03 9.4810E-03 1.0640E-02

1.0420E-03 4.6510E-03 1.2470E-02 2.6930E-02 1.9510E-04 1.1290E-03 4.2900E-03

7.9820E-03 6.7130E-03 2.3600E-02 1.1630E-02 4.9900E-03 3.5810E-05 1.0320E-03

1.0980E-02 3.9220E-02 3.4920E-05 8.4830E-04 4.7330E-03 6.1200E-03 7.6740E-03

1.1190E-02 1.8310E-03 6.0820E-03 4.5480E-03 6.7050E-03 4.4820E-03 9.4060E-04

4.0340E-03 7.2420E-03 5.4050E-03 9.0140E-03 2.4150E-02 6.7440E-03 6.3280E-04

3.3750E-04 3.2490E-03 8.5530E-03 5.4250E-03 1.4630E-02 3.9330E-03 2.1760E-03

2.4470E-03 2.2640E-03 2.0610E-03 2.5210E-03 1.3790E-03 5.8830E-04 3.1960E-03

4.4040E-03 3.5130E-03 4.4770E+00 6.1580E-01 9.9290E-02 2.1880E-02 4.7910E-03

9.8360E+00 2.7200E-01 7.0980E-02 2.7270E+00 5.4170E-01 2.9370E-02 4.1160E-03

4.0830E+00 5.7260E-01 4.2160E-02 2.8510E-03 1.8230E+00 2.7180E-02 1.7400E-02

5.3790E-02 1.8630E-02 7.2390E-03 2.2150E-03 1.8910E-02 3.1150E-03 1.0960E-03

1.2610E-02 2.3320E-02 1.4140E-02 2.7860E-03 1.2200E-01 2.6660E-02 4.8200E-03

6.0580E-04 9.3600E-02 3.1120E-02 6.3240E-03 6.2610E-04 3.2580E-01 9.9630E-02

1.7720E-02 1.5080E-03 1.5150E-01 1.9360E-02 1.1350E-03 7.1460E-05 5.6230E-02

2.6330E-02 9.8280E-03 1.5730E-03 6.8520E-02 5.8290E-02 2.6080E-02 4.5050E-03

2.7180E-01 7.7490E-02 1.9940E-02 2.7730E-03 1.4320E-01 6.1850E-02 1.6280E-02

1.8520E-03 1.2180E-01 7.9540E-02 2.6340E-02 3.6920E-03 3.8730E-01 1.1010E-01

2.3030E-02 2.4370E-03 4.5420E-02 4.4970E-02 3.8280E-02 6.9670E-02 4.7480E-02

2.0650E-02 3.5230E-03 1.9350E-01 4.8320E-02 7.8530E-03 1.4020E-03 4.4220E-02

1.5470E-02 5.9160E-03 1.3040E-03 9.3570E-02 3.9190E-02 9.9070E-03 1.5650E-03

9.1540E-02 4.6820E-02 2.1130E-02 7.2250E-04 7.5910E-02 3.1590E-02 6.9040E-03

6.7370E-04 7.4880E-02 4.7730E-02 1.3480E-02 1.5270E-03 5.1040E+00 8.8540E-01

1.3930E-01 2.9080E-02 4.0220E+00 4.2100E+00 1.5320E-01 1.2220E+00 1.0750E+00

4.3080E-01 2.2800E-02 2.0190E+00 3.8810E+00 5.0580E-01 3.9150E-02 8.6710E-01

6.7950E-01 1.0570E-02 2.6180E-02 2.5340E-02 1.1020E-02 5.6750E-03 1.0540E-02

7.3440E-03 1.3840E-03 1.0510E-02 1.8660E-02 8.1950E-03 6.6900E-03 4.1660E-02

6.0620E-02 2.1650E-02 4.4450E-03 3.7750E-02 4.0690E-02 2.5340E-02 5.9370E-03

1.1610E-01 1.5090E-01 8.6820E-02 1.6720E-02 6.0420E-02 6.6850E-02 1.5150E-02

9.6910E-04 3.5790E-02 2.3080E-02 1.1990E-02 7.4350E-03 5.9750E-02 2.2820E-02

2.5940E-02 2.2630E-02 1.0730E-01 1.2880E-01 5.5630E-02 1.8260E-02 7.9040E-02

5.2320E-02 3.9790E-02 1.4750E-02 8.3950E-02 3.5190E-02 4.9660E-02 2.4120E-02

1.4020E-01 1.8500E-01 8.8970E-02 2.1580E-02 4.5930E-02 4.5490E-02 1.5810E-02

5.4730E-02 2.8770E-02 1.8860E-02 1.5400E-02 7.9920E-02 8.4420E-02 3.8100E-02

6.7910E-03 2.4490E-02 1.9610E-02 7.5390E-03 4.1200E-03 4.6940E-02 3.5660E-02

2.8590E-02 8.9870E-03 7.6290E-02 3.3470E-02 1.3130E-02 1.0620E-02 4.5560E-02

2.5850E-02 1.8830E-02 5.6550E-03 5.3110E-02 1.9840E-02 2.9520E-02 1.2210E-02

4.4660E+00 8.8500E-01 1.2520E-01 1.4020E+00 3.9070E+00 1.3950E+00 4.7500E-01

9.3850E-01 5.6990E-01 2.1280E-01 4.4750E-01 2.3140E+00 2.1090E+00 2.8490E-01

3.7430E-01 6.8560E-01 1.8690E-01 1.2760E-02 1.8140E-02 1.5780E-02 7.9020E-03

5.7310E-03 7.0780E-03 2.6090E-03 8.4080E-03 1.3270E-02 7.2920E-03 6.2740E-03

1.2300E-02 3.9180E-02 3.7300E-02 1.3940E-02 1.2220E-02 3.0820E-02 2.7660E-02

1.7040E-02 3.1800E-02 1.0550E-01 1.0280E-01 5.6400E-02 2.1130E-02 5.2370E-02

3.3460E-02 7.7490E-03 2.1300E-02 1.8140E-02 1.5380E-02 7.8100E-03 3.8990E-02

2.0870E-02 2.1020E-02 2.4030E-02 3.8870E-02 8.7360E-02 8.2120E-02 3.9610E-02

3.7240E-02 4.7130E-02 3.6230E-02 2.8120E-02 4.2820E-02 4.1440E-02 3.0300E-02

3.9760E-02 4.2970E-02 1.2390E-01 1.2140E-01 6.0200E-02 4.5440E-02 3.2520E-02

7.8100E-03 3.7400E-02 2.1610E-02 2.2060E-02 1.3130E-02 2.8750E-02 6.5120E-02

5.0440E-02 2.3060E-02 1.3440E-02 1.5020E-02 1.1580E-02 4.5760E-03 1.9450E-02

3.1660E-02 2.4980E-02 2.0050E-02 6.1020E-02 2.1100E-02 1.3030E-02 1.1650E-02

2.3860E-02 2.4640E-02 1.7280E-02 1.0950E-02 2.8230E-02 2.4720E-02 1.7280E-02

2.1490E-02 3.3580E+00 6.6030E-01 3.9800E-01 2.2860E+00 2.3440E+00 1.4890E-01

5.5980E-01 5.5180E-01 3.4160E-01 7.3770E-02 7.8060E-01 1.9330E+00 9.9280E-01

1.4460E-01 4.6320E-01 3.2730E-01 6.0500E-03 1.0850E-02 1.4250E-02 9.7900E-03

3.0560E-03 5.1180E-03 3.3880E-03 6.3050E-03 8.4380E-03 7.3450E-03 4.3440E-03

3.0720E-03 1.6870E-02 3.2230E-02 2.4870E-02 2.8380E-03 1.6400E-02 2.2650E-02

2.3990E-02 5.1570E-03 4.9460E-02 8.1700E-02 8.5980E-02 6.2010E-03 2.8030E-02

3.4730E-02 1.7070E-02 1.1330E-02 1.4410E-02 1.4140E-02 7.1000E-03 1.9960E-02

2.3220E-02 1.8880E-02 1.6630E-02 1.2470E-02 4.3660E-02 7.1310E-02 5.8520E-02

1.4450E-02 3.4490E-02 3.2080E-02 3.0510E-02 1.6520E-02 3.7380E-02 2.5950E-02

3.5900E-02 1.0250E-02 5.7520E-02 1.0070E-01 9.3010E-02 4.0760E-02 1.7880E-02

5.6960E-03 2.1790E-02 2.0670E-02 1.9240E-02 8.9590E-03 8.7730E-03 3.5640E-02

4.5340E-02 3.5780E-02 7.0070E-03 1.0230E-02 1.1020E-02 5.1930E-03 6.4090E-03

2.1100E-02 2.1070E-02 2.3540E-02 4.5770E-02 1.1560E-02 1.3790E-02 8.9900E-03

1.0710E-02 1.9920E-02 1.5740E-02 1.1170E-02 1.1650E-02 2.3600E-02 1.4660E-02

1.8890E-02 2.1480E+00 9.6720E-02 8.7490E-01 2.3800E+00 3.7400E-02 2.4950E-01

4.4350E-01 3.3700E-01 1.0160E-02 1.5610E-01 9.2840E-01 1.4110E+00 4.9470E-02

2.3680E-01 3.3720E-01 2.6290E-03 6.0820E-03 9.1170E-03 9.4590E-03 1.5650E-03

3.0040E-03 3.1390E-03 4.2040E-03 4.7110E-03 6.3080E-03 2.4010E-03 6.3250E-04

5.2600E-03 1.7720E-02 2.7750E-02 3.4870E-04 5.6430E-03 1.5300E-02 2.2620E-02

2.1070E-05 1.3430E-02 4.9090E-02 8.5690E-02 1.4210E-03 1.1060E-02 2.4400E-02

2.0480E-02 5.1160E-03 1.0750E-02 9.7480E-03 5.7020E-03 7.6170E-03 2.0380E-02

1.6280E-02 8.1850E-03 3.1410E-03 1.8110E-02 4.2850E-02 5.9880E-02 4.2420E-03

1.9480E-02 2.6880E-02 2.3770E-02 4.3570E-03 2.2620E-02 2.7950E-02 2.2230E-02

1.5400E-03 1.8820E-02 5.8570E-02 9.5370E-02 3.0920E-02 7.2990E-03 4.6710E-03

1.0480E-02 1.8530E-02 1.2470E-02 5.6300E-03 2.3180E-03 1.4050E-02 3.1270E-02

3.6060E-02 3.2870E-03 6.5850E-03 7.3940E-03 5.0350E-03 1.5970E-03 9.7900E-03

1.7310E-02 1.9380E-02 3.0520E-02 5.3360E-03 1.2010E-02 5.5430E-03 3.9630E-03

1.2860E-02 1.3570E-02 7.9640E-03 3.5100E-03 1.5240E-02 1.6390E-02 1.0750E-02

2.6270E-02 1.7200E-01 1.4750E+00 6.8430E-03 7.4020E-02 2.4750E-01 2.0510E-01

1.1400E-03 2.0160E-02 1.9890E-01 1.0260E+00 1.4240E-02 8.7210E-02 2.1030E-01

9.2280E-04 2.8270E-03 4.0040E-03 5.8880E-03 6.6450E-04 1.3160E-03 1.8730E-03

2.1020E-03 2.0430E-03 3.6780E-03 9.8780E-04 9.9210E-05 1.1880E-03 6.1220E-03

1.8270E-02 4.1100E-06 8.4650E-04 7.4340E-03 1.3560E-02 2.3060E-06 4.2030E-05

2.1080E-02 5.2960E-02 2.2530E-04 2.9980E-03 1.1570E-02 1.3890E-02 1.7690E-03

5.9330E-03 4.6950E-03 3.2620E-03 1.8770E-03 1.1810E-02 9.8490E-03 2.7010E-03

4.2180E-04 6.2010E-03 1.7440E-02 3.7930E-02 7.7150E-04 7.8170E-03 1.6040E-02

1.2550E-02 5.1940E-04 8.8820E-03 1.9850E-02 9.3320E-03 1.6210E-05 3.7450E-03

2.3230E-02 6.0160E-02 1.6700E-02 1.9580E-03 2.7880E-03 3.7820E-03 1.1320E-02

5.6420E-03 2.8090E-03 5.8390E-04 3.5340E-03 1.5280E-02 2.2440E-02 1.2300E-03

3.3410E-03 3.3930E-03 3.1890E-03 2.9340E-04 2.8170E-03 1.0310E-02 1.0620E-02

1.5250E-02 1.8880E-03 7.0350E-03 2.5230E-03 1.0990E-03 5.9730E-03 8.2400E-03

3.8690E-03 6.3600E-04 6.4760E-03 1.1890E-02 3.9360E-03 1.4940E+00 3.0620E-01

1.3930E+00 4.7740E-01 1.2570E-01 2.2310E-02 2.4800E+00 8.2680E-01 2.1630E-01

4.8890E-02 2.8580E+00 1.6000E-01 2.1060E-02 1.3760E-02 9.4340E-03 5.6520E-03

2.9120E-03 9.4330E-03 8.1650E-03 4.1140E-03 1.6580E-02 7.0480E-02 3.0110E-02

1.7210E-02 1.3080E-01 7.6930E-02 3.7200E-02 1.2170E-02 1.1920E-01 4.9210E-02

1.6110E-02 3.3780E-03 4.7120E-04 5.0770E-04 3.6520E-04 1.6670E-04 2.0420E-02

8.1930E-03 2.9310E-03 8.7930E-04 8.0770E-02 2.3510E-02 6.1630E-03 1.8540E-03

4.0870E-02 3.7160E-02 3.3430E-02 2.5990E-02 8.7510E-02 8.0270E-02 4.8840E-02

1.8240E-02 1.4090E-01 6.2030E-02 2.7540E-02 1.3130E-02 8.4610E-02 6.1790E-02

3.4060E-02 1.2060E-02 9.3390E-03 3.9750E-03 1.4020E-03 3.8100E-04 6.5220E-02

3.0870E-02 1.2110E-02 1.2230E-01 7.1830E-02 2.6850E-02 4.8020E-03 4.2950E-02

4.6160E-02 4.8680E-02 4.1710E-02 1.4330E-02 5.9940E-03 2.3000E-03 7.5460E-04

1.2650E-02 9.5920E-03 5.8590E-03 2.7780E-03 3.8960E-02 3.1790E-02 3.3730E-02

2.1110E-02 4.3000E-02 5.1060E-02 4.2490E-02 2.3680E-02 6.7870E-02 5.6720E-02

3.5850E-02 1.7820E-02 1.2440E+00 3.5770E-01 6.0200E-01 3.7530E-01 1.4220E-01

3.4120E-01 1.2300E+00 8.1280E-01 2.7080E-01 4.9410E-01 1.6660E+00 1.1890E-01

8.2510E-03 5.9450E-03 5.2810E-03 4.3420E-03 8.8470E-03 4.4200E-03 3.0220E-03

1.2430E-02 3.6920E-02 4.2320E-02 9.1340E-03 5.3950E-02 4.7220E-02 4.7150E-02

4.4520E-02 1.4540E-02 5.6150E-02 4.7730E-02 2.2500E-02 4.8410E-04 8.7750E-05

1.6270E-04 3.9710E-04 6.7680E-03 9.1180E-03 5.9320E-03 2.5070E-03 1.6100E-02

4.1130E-02 2.1740E-02 5.2560E-03 3.6500E-02 3.4540E-02 2.1900E-02 1.0140E-02

7.5730E-02 1.5570E-02 2.9790E-02 5.5060E-02 3.9100E-02 7.0480E-02 5.0170E-02

2.3030E-02 5.1470E-02 2.3790E-02 2.9740E-02 3.9380E-02 1.3070E-03 4.4120E-03

3.7600E-03 1.8430E-03 3.7000E-02 2.9250E-02 1.4900E-02 6.7860E-02 3.1370E-02

3.9360E-02 3.0770E-02 4.7710E-02 5.0770E-02 2.8200E-02 7.9570E-03 5.0440E-03

6.4600E-03 4.2200E-03 1.8110E-03 8.1820E-03 4.4270E-03 4.8370E-03 5.7180E-03

2.9220E-02 3.5690E-02 2.0880E-02 8.4020E-03 5.4820E-02 3.4370E-02 2.0900E-02

1.0090E-02 5.4080E-02 2.4310E-02 2.6620E-02 2.8690E-02 6.0580E-02 2.5960E-01

3.8340E-01 2.7640E-01 4.9130E-02 2.3900E-01 6.5990E-01 8.0320E-01 6.6780E-02

4.5300E-01 9.9950E-01 3.5070E-03 5.0390E-03 4.3800E-03 2.9550E-03 6.1520E-03

3.7050E-03 1.0010E-03 8.2910E-03 2.5140E-02 1.5940E-02 1.7830E-02 8.0210E-03

3.6590E-02 4.4230E-02 3.9740E-02 7.7660E-04 9.9370E-03 3.2250E-02 5.0990E-02

8.3530E-05 3.1730E-04 2.6130E-04 8.8200E-05 1.9930E-03 4.5800E-03 5.7320E-03

3.9110E-03 4.1990E-03 1.1160E-02 2.2640E-02 1.8150E-02 3.3080E-02 1.6670E-02

1.0940E-02 8.0360E-03 1.2910E-02 5.0950E-02 3.8800E-02 1.4770E-02 1.5730E-02

2.4170E-02 3.9790E-02 4.2170E-02 8.3010E-03 3.4740E-02 3.2460E-02 2.0750E-02

1.6170E-04 8.7730E-04 2.5570E-03 3.9520E-03 1.9500E-02 2.1030E-02 1.3570E-02

1.3050E-02 4.9220E-02 3.5390E-02 1.5240E-02 5.3600E-02 1.8470E-02 9.6610E-03

8.0310E-03 1.6670E-03 3.3280E-03 4.0010E-03 2.6950E-03 2.3270E-03 5.2830E-03

4.7460E-03 3.0840E-03 1.9480E-02 2.9990E-02 1.0360E-02 2.9720E-03 4.6390E-02

2.2730E-02 8.7120E-03 2.2830E-03 2.1300E-02 3.3570E-02 2.3480E-02 1.0800E-02

2.1320E+00 4.4310E-01 8.2660E-02 7.1570E+00 2.7230E+00 6.6860E-01 1.4070E-01

2.0670E+00 8.2310E-01 4.4070E-02 2.1300E-01 1.0690E-01 4.0010E-02 1.0730E-02

8.9340E-02 3.8190E-02 1.6620E-02 4.3070E-02 7.2230E-02 2.7720E-02 6.5690E-03

1.1350E-01 5.0500E-02 2.0050E-02 5.4780E-03 5.3840E-02 2.7430E-02 1.1020E-02

2.6950E-03 6.0480E-02 2.1940E-02 6.1290E-03 1.0900E-03 2.7400E-01 8.0270E-02

1.6420E-02 1.8910E-03 1.9660E-01 5.1020E-02 2.1270E-02 9.0900E-03 2.0260E-01

7.1860E-02 2.1810E-02 5.2960E-03 1.0770E-01 3.8500E-02 1.1330E-02 2.7880E-03

2.0000E-01 7.0780E-02 2.3160E-02 6.9380E-03 6.8960E-02 2.7800E-02 8.5850E-03

1.7730E-03 4.3390E-02 1.9070E-02 5.8940E-03 1.1530E-03 6.4090E-02 2.7520E-02

2.3410E-03 7.2510E-02 3.3780E-02 1.5750E-02 5.4240E-03 5.0400E-02 2.1840E-02

8.7830E-03 2.8740E-03 4.0170E-02 2.2600E-02 1.0300E-02 3.0450E-03 2.7420E-02

1.1460E-02 3.8910E-03 1.3380E-03 2.1950E-02 1.1070E-02 5.4310E-03 1.6460E-03

1.4600E-02 7.0910E-03 3.4500E-03 1.4400E-03 1.6480E-02 6.8080E-03 2.2400E-03

4.8280E-04 1.7700E+00 4.2410E-01 2.0830E+00 2.7600E+00 2.4400E+00 7.4650E-01

1.1110E+00 5.2200E-01 5.6760E-01 8.3340E-02 8.3150E-02 6.3170E-02 4.1640E-02

5.0170E-02 4.1980E-02 1.6020E-02 3.2300E-02 3.8080E-02 2.6240E-02 1.5560E-02

3.4630E-02 5.0320E-02 3.5210E-02 2.2040E-02 1.8330E-02 2.0590E-02 1.9580E-02

1.2740E-02 8.1890E-03 3.0160E-02 2.1360E-02 7.5280E-03 8.0140E-02 1.1740E-01

6.3910E-02 1.8000E-02 5.0970E-02 1.1130E-01 3.5340E-02 1.0870E-02 5.3160E-02

9.2640E-02 5.7120E-02 2.3390E-02 2.1900E-02 5.1840E-02 3.4310E-02 1.2800E-02

5.2370E-02 9.4680E-02 5.5620E-02 2.3060E-02 1.7700E-02 2.9420E-02 2.3310E-02

1.0080E-02 1.1190E-02 1.7050E-02 1.6790E-02 7.0990E-03 3.6080E-02 1.5970E-02

1.8420E-02 3.3780E-02 3.3500E-02 1.7830E-02 1.0500E-02 1.7570E-02 2.2360E-02

1.4580E-02 8.4150E-03 2.2600E-02 1.5720E-02 1.0950E-02 7.8150E-03 7.5200E-03

1.1760E-02 9.8300E-03 3.9660E-03 1.6460E-02 6.7670E-03 4.0500E-03 2.7940E-03

7.0910E-03 6.8290E-03 4.1870E-03 1.8280E-03 5.3860E-03 6.7070E-03 4.9330E-03

2.4830E-03 1.1180E+00 2.4690E-01 1.9570E+00 1.2990E+00 1.8530E+00 4.0720E-01

6.3280E-01 4.2480E-01 2.3050E-02 6.0230E-02 5.4950E-02 4.6590E-02 2.7930E-02

2.7640E-02 1.6530E-02 2.1530E-02 1.7000E-02 2.2030E-02 1.4220E-02 8.9610E-03

2.1800E-02 3.5130E-02 2.8910E-02 3.3490E-03 1.3060E-02 1.3970E-02 1.7110E-02

2.4620E-04 8.0210E-03 1.8550E-02 1.8010E-02 1.6380E-02 6.3860E-02 6.5100E-02

4.0960E-02 2.1250E-02 3.5320E-02 6.3260E-02 1.9170E-02 1.1450E-02 4.0390E-02

5.6110E-02 4.2960E-02 3.1970E-03 1.8830E-02 3.1040E-02 2.7570E-02 1.3160E-02

3.8630E-02 5.7580E-02 4.1110E-02 2.3670E-03 1.4870E-02 1.7480E-02 1.9040E-02

6.2130E-04 1.0700E-02 9.2790E-03 1.4150E-02 1.4080E-02 1.9850E-02 1.3060E-02

1.5740E-02 1.7830E-02 2.1920E-02 8.2370E-03 5.6510E-03 1.0990E-02 1.4820E-02

1.0510E-02 1.0300E-02 1.0940E-02 1.1930E-02 4.8780E-03 1.3400E-03 6.5700E-03

6.4110E-03 7.7350E-03 1.0980E-02 3.4770E-03 3.4970E-03 2.1010E-03 3.4510E-03

4.1860E-03 3.6480E-03 2.0040E-03 1.2220E-03 3.8150E-03 4.2380E-03 3.7300E-03

5.6410E-02 2.0600E-01 1.3300E+00 1.0860E+00 7.9500E-02 4.6760E-01 1.8530E-01

4.0680E-03 2.1460E-02 3.2050E-02 3.0990E-02 1.2780E-02 1.2380E-02 1.0850E-02

1.0760E-02 5.8360E-03 1.2760E-02 8.0260E-03 8.4760E-04 9.0330E-03 1.4940E-02

2.2580E-02 3.7690E-05 3.6810E-03 9.3960E-03 1.0640E-02 4.1570E-05 2.1460E-04

5.6800E-03 1.6470E-02 1.8910E-03 1.7980E-02 4.0940E-02 3.2330E-02 9.0900E-03

1.0860E-02 1.9160E-02 3.0390E-02 1.9290E-03 1.0670E-02 2.6690E-02 3.6200E-02

6.4450E-04 2.7270E-03 1.2910E-02 2.4050E-02 3.0620E-03 1.0900E-02 2.4900E-02

3.6390E-02 2.0030E-04 2.4200E-03 1.0350E-02 1.3910E-02 8.3710E-05 5.7740E-04

7.5290E-03 9.1850E-03 3.1830E-03 1.4970E-02 5.3400E-03 5.4240E-03 1.0500E-02

8.2370E-03 7.7100E-03 1.2680E-03 4.7520E-03 6.7840E-03 8.1800E-03 3.0450E-03

7.8150E-03 4.8780E-03 3.2920E-03 4.7810E-04 8.3700E-04 4.3720E-03 5.3410E-03

5.4870E-03 1.3680E-03 2.1480E-03 1.0220E-03 1.4400E-03 1.8280E-03 2.0040E-03

1.3720E-03 1.3540E-04 1.2500E-03 2.5250E-03 2.5930E-03 3.1880E+00 5.2710E-01

7.2380E-02 7.3460E+00 4.1030E-01 2.0620E-01 1.2180E-01 4.7940E-02 1.8200E-02

5.0140E-03 2.6660E-02 1.2320E-02 2.8770E-03 3.9310E-03 3.5580E-02 7.3030E-03

2.9610E-03 7.7250E-02 2.6460E-02 8.1120E-03 1.6460E-03 4.4570E-02 1.7540E-02

6.6570E-03 1.4660E-03 5.7330E-02 2.4570E-02 8.3280E-03 1.3940E-03 1.4820E-01

4.9650E-02 7.7920E-03 1.1050E-03 1.5450E-01 5.2400E-02 1.2180E-02 1.9680E-03

4.5170E-02 1.8490E-02 7.2870E-03 2.2520E-03 8.3620E-02 3.2070E-02 9.2960E-03

1.8580E-03 2.2920E-01 6.2790E-02 1.6050E-02 2.1670E-03 1.0560E-01 3.2730E-02

8.7750E-03 1.7260E-03 1.8070E-01 6.5070E-02 1.8740E-02 3.6190E-03 9.6160E-02

2.7150E-02 1.5630E-02 4.8790E-02 2.4200E-02 9.1120E-03 1.9010E-03 6.5290E-02

2.2950E-02 7.2660E-03 1.7880E-03 1.7160E-02 7.1480E-03 2.3100E-03 4.4880E-04

2.2570E-02 1.0970E-02 4.2240E-03 1.2290E-03 3.8670E-02 2.0380E-02 7.3990E-03

3.0910E-03 2.2580E-02 1.1210E-02 4.0760E-03 6.6720E-04 2.4890E-02 1.3350E-02

6.7290E-03 2.4880E-03 3.0860E+00 5.9390E-01 2.6420E+00 3.5630E+00 1.6360E-01

4.4800E-02 6.5160E-02 3.3930E-02 1.7760E-02 1.7400E-02 9.4070E-03 6.6770E-03

3.1450E-03 1.6640E-02 1.6740E-02 3.2880E-03 2.2090E-02 3.8530E-02 2.1230E-02

8.9250E-03 1.3390E-02 2.2830E-02 1.2700E-02 7.3460E-03 1.7780E-02 2.6200E-02

1.9740E-02 9.5830E-03 6.2300E-02 5.3470E-02 4.2050E-02 7.5830E-03 6.5530E-02

6.1690E-02 3.8080E-02 1.1470E-02 1.8470E-02 2.1180E-02 1.2090E-02 6.8050E-03

2.7490E-02 3.7090E-02 2.6660E-02 1.0250E-02 6.2790E-02 1.1760E-01 4.9680E-02

1.8110E-02 2.6560E-02 5.4380E-02 2.8490E-02 9.7040E-03 4.7470E-02 9.0810E-02

5.7220E-02 2.1100E-02 5.0310E-02 5.1060E-02 9.7670E-03 2.7700E-02 1.8900E-02

1.2710E-02 7.8930E-03 2.2960E-02 3.0590E-02 1.7010E-02 7.2990E-03 8.4970E-03

6.8310E-03 4.2770E-03 2.0540E-03 9.8450E-03 9.2010E-03 7.8410E-03 4.3070E-03

3.0940E-02 1.1850E-02 9.5610E-03 3.2840E-03 1.2840E-02 8.4870E-03 5.6860E-03

3.8250E-03 1.3360E-02 1.1600E-02 7.1930E-03 5.8260E-03 2.3980E+00 8.5270E-01

2.5450E+00 1.3800E+00 1.7660E-02 3.0570E-02 4.9050E-02 2.7070E-02 9.8380E-03

9.2510E-03 6.0260E-03 2.3590E-03 7.9590E-03 1.2590E-02 6.9570E-03 5.6960E-03

1.7160E-02 2.7100E-02 1.8120E-02 4.1390E-03 8.8410E-03 1.7490E-02 1.1740E-02

3.7600E-03 1.3970E-02 1.9010E-02 1.8250E-02 1.7510E-02 5.0800E-02 2.7350E-02

2.8420E-02 2.2020E-02 4.8110E-02 3.7480E-02 2.4970E-02 7.2850E-03 1.2090E-02

1.5110E-02 9.4320E-03 6.2840E-03 2.2830E-02 2.4490E-02 2.2540E-02 1.6050E-02

4.9680E-02 8.0460E-02 3.9940E-02 5.8010E-03 2.2550E-02 3.7230E-02 2.3800E-02

9.2700E-03 4.0830E-02 6.3210E-02 4.9490E-02 2.9570E-02 3.5800E-02 1.7990E-02

1.3160E-02 1.5010E-02 1.4740E-02 7.4810E-03 7.2670E-03 1.7010E-02 2.0690E-02

1.3420E-02 3.5620E-03 5.2560E-03 4.7780E-03 2.6480E-03 3.2010E-03 7.0180E-03

6.4310E-03 6.7420E-03 2.3210E-02 6.9870E-03 7.4320E-03 4.1010E-03 5.9700E-03

6.7170E-03 7.0260E-03 3.4140E-03 6.7280E-03 7.1920E-03 9.1160E-03 5.4520E-03

3.0050E-01 9.1730E-01 1.9680E+00 4.9780E-03 1.7730E-02 2.5900E-02 2.9040E-02

4.7000E-03 8.0910E-03 3.9530E-03 1.5720E-03 3.9990E-03 6.1490E-03 8.1870E-03

8.5960E-04 6.1040E-03 1.4170E-02 2.4250E-02 4.5810E-04 4.4950E-03 7.9180E-03

1.5270E-02 6.1070E-05 4.3340E-03 1.2140E-02 2.0120E-02 3.5130E-03 1.9770E-02

3.8620E-02 2.0810E-02 5.4910E-03 2.3410E-02 3.6010E-02 2.3470E-02 2.2520E-03

6.8040E-03 9.4310E-03 1.0790E-02 9.7870E-04 6.7030E-03 1.8520E-02 2.4560E-02

2.1670E-03 1.8120E-02 3.9950E-02 6.3870E-02 9.1020E-04 6.1810E-03 1.8200E-02

3.4300E-02 1.1140E-03 9.9870E-03 3.3490E-02 6.4010E-02 1.8460E-02 1.5670E-02

2.1460E-02 4.4280E-03 1.2440E-02 1.0480E-02 6.2430E-03 1.7890E-03 7.2990E-03

1.3430E-02 1.6410E-02 1.0960E-03 3.5070E-03 3.7950E-03 2.4300E-03 7.7540E-04

3.1380E-03 5.7650E-03 5.9160E-03 1.5470E-02 4.0030E-03 4.4140E-03 3.9280E-03

1.7800E-03 5.9540E-03 4.7960E-03 2.8870E-03 2.4880E-03 5.8260E-03 5.4520E-03

5.2260E-03 3.3930E-01 8.0400E-02 4.6000E-02 2.4500E-02 1.2670E-02 6.2540E-03

9.2460E-02 5.3500E-02 1.4700E-02 1.9010E-02 4.6450E-02 1.5640E-02 6.8160E-03

2.0830E-02 1.5770E-02 9.5010E-03 4.3390E-03 6.7220E-03 3.8990E-03 2.0250E-03

8.4840E-04 1.4010E-03 1.1560E-03 7.9540E-04 4.3780E-04 5.2420E-02 2.6600E-02

1.0930E-02 3.2760E-03 6.6890E-02 4.2560E-02 1.7850E-02 4.3910E-03 2.1830E-02

1.7420E-02 1.2670E-02 8.1270E-03 3.5690E-02 2.4400E-02 1.3630E-02 5.6900E-03

1.1180E-01 4.5570E-02 1.7720E-02 7.2760E-03 3.4340E-02 2.3920E-02 1.5210E-02

8.7190E-03 9.5180E-03 4.4990E-03 1.8310E-03 5.6980E-04 1.3580E-01 3.1370E-02

9.1270E-03 9.7350E-02 3.8490E-02 1.4010E-02 4.4710E-03 1.0320E-01 5.0760E-02

2.5670E-02 1.3440E-02 3.1150E-02 1.7880E-02 6.9930E-03 1.5500E-03 9.2450E-03

7.3340E-03 4.8190E-03 2.6260E-03 4.6620E-02 2.5290E-02 1.4340E-02 8.1960E-03

1.3380E-02 1.0870E-02 7.2530E-03 3.5490E-03 1.5450E-02 9.8550E-03 5.7900E-03

3.0490E-03 2.1880E-01 1.3590E-02 1.9830E-02 1.6190E-02 1.0020E-02 5.2800E-02

2.2100E-02 3.2100E-02 1.2680E-02 1.5640E-02 2.3890E-02 6.4040E-03 1.1580E-02

5.4210E-03 7.1030E-03 9.5260E-03 1.6600E-03 2.4960E-03 2.5720E-03 2.2470E-03

8.2770E-04 4.1720E-04 5.1290E-04 7.6900E-04 1.8800E-02 1.8010E-02 1.5860E-02

9.4850E-03 3.4870E-02 1.3520E-02 2.1350E-02 1.8040E-02 1.4490E-02 1.0750E-02

8.5350E-03 6.2680E-03 1.6010E-02 1.0080E-02 1.2260E-02 1.4600E-02 1.3510E-02

5.2350E-02 3.8910E-02 1.6960E-02 1.6060E-02 1.3440E-02 1.3070E-02 1.2200E-02

8.7230E-04 3.9380E-03 3.7670E-03 2.3680E-03 3.1370E-02 6.7930E-02 1.8220E-02

2.1050E-02 4.2330E-02 2.8070E-02 1.1430E-02 2.4520E-02 4.8750E-02 3.6870E-02

1.8750E-02 1.3810E-02 7.3670E-03 9.6890E-03 7.5190E-03 5.6240E-03 2.9370E-03

3.3530E-03 4.1030E-03 3.1080E-02 1.4340E-02 1.3960E-02 3.5730E-03 9.9830E-03

6.2010E-03 4.5690E-03 2.6250E-03 6.8180E-03 6.2450E-03 5.5080E-03 4.1950E-03

4.2890E-03 6.7710E-03 9.4710E-03 9.2800E-03 1.4690E-02 3.2000E-02 7.0510E-03

6.3380E-03 6.8150E-03 6.4040E-03 9.7500E-03 1.2200E-03 6.8310E-03 5.8150E-03

2.9480E-03 1.6880E-04 9.6300E-04 1.5440E-03 1.7950E-03 1.0370E-04 4.6760E-04

4.4100E-04 2.5110E-04 3.3600E-03 1.1320E-02 1.0500E-02 5.8870E-03 3.5330E-03

2.2950E-02 1.3510E-02 3.9160E-03 6.5700E-03 6.1540E-03 4.5300E-03 2.7610E-03

1.2360E-03 9.6510E-03 9.4030E-03 6.1840E-03 4.8910E-03 6.3990E-03 2.1640E-02

2.7950E-02 4.3920E-03 8.2890E-03 8.2460E-03 6.4640E-03 5.7440E-05 5.1810E-04

1.8650E-03 3.0310E-03 9.1260E-03 1.8220E-02 3.1400E-02 5.0470E-03 1.1770E-02

1.9650E-02 1.4960E-02 1.0110E-02 1.0950E-02 2.0330E-02 2.3060E-02 1.0990E-03

9.2960E-03 6.3530E-03 2.4470E-03 1.1450E-03 3.0750E-03 2.5060E-03 1.2790E-03

1.5530E-02 8.1960E-03 3.5730E-03 4.1750E-03 4.6790E-03 3.9640E-03 2.2050E-03

8.4010E-04 2.1200E-03 3.4150E-03 3.3370E-03 2.5130E-03 5.8870E+00 1.9450E-01

4.7160E-02 6.9350E-01 1.0450E-01 2.8900E-02 2.8240E-02 5.0620E-02 1.6500E-02

3.9720E-03 6.1460E-01 7.7760E-02 1.1700E-02 1.7470E-03 1.1270E-01 4.1450E-02

1.1370E-02 1.5320E-03 1.2570E-01 4.6970E-02 9.9620E-03 1.0770E-03 1.4330E-01

3.5720E-02 1.3410E-02 3.9680E-03 2.6080E-01 3.7440E-02 1.1950E-02 2.7880E-03

4.0810E-01 8.5260E-02 1.9810E-02 4.1010E-03 2.8340E-01 6.3640E-02 1.5220E-02

2.5280E-03 8.3220E-01 1.1330E-01 1.3030E-02 2.1430E-03 1.1530E+00 1.6980E-01

3.2710E-02 5.7650E-03 1.9310E-01 7.5290E-02 2.2970E-02 3.9740E-03 3.2590E-02

1.1010E-02 1.6600E-03 4.5830E-02 1.4410E-02 4.2430E-03 1.3620E-03 1.2410E-01

4.3050E-02 1.7840E-02 5.4200E-03 1.2670E+01 5.5420E-01 1.0850E-01 4.1260E-02

2.9200E+01 3.6100E+00 3.8580E-01 5.9280E-02 2.5310E-01 5.9330E-02 2.8000E-02

3.3440E-03 5.3000E+00 2.0230E-01 8.3740E-03 2.9840E-03 1.6940E+01 2.1060E+00

1.1430E-01 6.8360E-03 7.2320E+00 1.9630E-01 2.9720E-01 3.1010E-01 5.4280E-02

2.2590E-02 2.8090E-02 1.9930E-02 8.8760E-03 3.6150E-02 4.3660E-01 8.3970E-02

1.3460E-02 3.0780E-02 5.1470E-02 3.6430E-02 1.3320E-02 3.1410E-02 5.5460E-02

4.8260E-02 1.1870E-02 4.8170E-02 7.7640E-02 2.1710E-02 9.7660E-03 6.2430E-02

1.5420E-01 2.4110E-02 9.9530E-03 8.4550E-02 2.3520E-01 7.4030E-02 2.0770E-02

4.2290E-02 2.0150E-01 6.3640E-02 1.7300E-02 1.1230E-01 5.2170E-01 1.2270E-01

1.4340E-02 8.8330E-02 8.4150E-01 1.7720E-01 3.6810E-02 5.7320E-02 8.9680E-02

6.3000E-02 2.6230E-02 1.8370E-02 1.1400E-02 6.4600E-03 1.8410E-02 2.0780E-02

1.0590E-02 2.9130E-03 4.2980E-02 6.6000E-02 2.6620E-02 1.6770E-02 1.9550E+00

8.1850E+00 4.9390E-01 6.4250E-02 1.6490E+00 2.0400E+01 4.1980E+00 4.4180E-01

2.0250E-01 3.9140E-02 1.6510E-02 1.6880E-02 7.9080E-01 3.4000E+00 2.1630E-01

5.2760E-03 2.1040E+00 1.0620E+01 2.4710E+00 1.3860E-01 5.4200E+00 1.1960E-01

2.3930E-01 1.3730E-01 1.6950E-02 1.4320E-02 1.7520E-02 1.0830E-02 6.6150E-03

3.2780E-02 3.2180E-01 6.6700E-02 5.2300E-03 2.6910E-02 3.5010E-02 3.1820E-02

9.1830E-04 3.4840E-02 3.3740E-02 4.0560E-02 1.9630E-02 3.4880E-02 5.0800E-02

1.2720E-02 1.8940E-02 5.3120E-02 1.0110E-01 1.5030E-02 1.9820E-02 7.3630E-02

1.6030E-01 5.7800E-02 9.7880E-03 3.6230E-02 1.6530E-01 5.3070E-02 1.2650E-02

1.2200E-01 3.5110E-01 9.3820E-02 2.0750E-02 7.3950E-02 6.4820E-01 1.4320E-01

1.1810E-02 4.7310E-02 6.2380E-02 5.5670E-02 8.9180E-03 1.1000E-02 7.2460E-03

6.8720E-03 1.4070E-02 1.2010E-02 6.5770E-03 1.7830E-02 2.6620E-02 4.8960E-02

2.0930E-02 2.7770E-01 2.2070E+00 5.2150E+00 3.2210E-01 1.4680E-01 1.7930E+00

1.4800E+01 3.2680E+00 1.5190E-01 2.0470E-02 1.9690E-02 1.4240E-02 7.7250E-02

9.3250E-01 2.1490E+00 1.4970E-01 1.1400E-01 2.4710E+00 7.0470E+00 1.8710E+00

4.7380E-02 1.1790E-01 1.6550E-01 1.1300E-02 6.5150E-03 1.2430E-02 9.5080E-03

8.1070E-04 7.2890E-03 2.6230E-02 2.5100E-01 1.0750E-04 6.0960E-03 2.2230E-02

3.8340E-02 5.6240E-05 1.0270E-03 2.6780E-02 4.5410E-02 7.7930E-03 1.7090E-02

2.4830E-02 2.9080E-02 6.0570E-03 1.8860E-02 3.9740E-02 6.1050E-02 4.1010E-03

2.0770E-02 5.7670E-02 1.2540E-01 1.1610E-03 1.0930E-02 2.9730E-02 1.4110E-01

2.1210E-03 1.4320E-02 9.3560E-02 2.7710E-01 2.8770E-03 2.2580E-02 6.0420E-02

5.1120E-01 8.9600E-04 1.3210E-02 3.9560E-02 6.4450E-02 3.5060E-03 8.8410E-03

5.7620E-03 2.6300E-03 6.0730E-03 1.0050E-02 7.5880E-03 5.4190E-03 1.6770E-02

2.0930E-02 3.3120E-02 7.6440E-02 2.8560E-01 1.6690E+00 3.3170E+00 3.4690E-02

1.4470E-01 1.3650E+00 1.1800E+01 1.0120E-01 7.9860E-03 2.0430E-02 7.8510E-03

7.3750E-03 9.8200E-02 7.1410E-01 1.3860E+00 6.8270E-03 1.3850E-01 1.8710E+00

5.6520E+00 2.2760E+00 1.3770E-01 2.1210E-01 1.5980E-01 7.8040E-02 1.1080E-02

4.0620E-02 2.0120E-02 9.2170E-03 3.8680E-03 1.0200E-02 5.7330E-03 2.8650E-03

1.1540E-03 1.0240E-02 5.3120E-03 2.3960E-03 8.1060E-04 8.2590E-02 7.8790E-02

6.5940E-02 3.8080E-02 1.9100E-01 6.5060E-02 2.3100E-02 8.9340E-03 8.0190E-02

4.2540E-02 2.0350E-02 8.4520E-03 5.5180E-02 2.7470E-02 1.2820E-02 5.6450E-03

7.5630E-02 3.9000E-02 1.7490E-02 6.3410E-03 1.1420E-01 5.5810E-02 2.4100E-02

8.5450E-03 4.7700E-02 2.7690E-02 1.4440E-02 6.2810E-03 8.1500E-01 3.5660E-01

1.0200E-02 5.4120E-01 1.4780E-01 3.0970E-02 6.3790E-03 8.1820E-02 5.9740E-02

3.4560E-02 1.5690E-02 1.0150E+01 2.6180E+00 5.2280E-01 1.2660E-01 7.1270E-01

3.5490E-01 1.7440E-01 8.8860E-02 5.4280E+00 8.2200E+00 3.5150E+00 1.0810E-01

9.0410E+00 2.2130E+00 3.2250E-01 1.9690E-02 6.4020E-02 2.6770E-02 1.0210E-02

3.6710E-03 1.9450E+00 1.4140E-01 7.7940E-02 2.9650E-02 5.8570E-02 7.1180E-03

1.7010E-02 1.5270E-02 9.8200E-03 2.2970E-03 3.8040E-03 3.9030E-03 3.2970E-03

1.2640E-03 4.0350E-03 4.1530E-03 3.0550E-03 7.6370E-02 6.2670E-02 2.9760E-02

8.3280E-03 2.7710E-02 9.6270E-02 5.4020E-02 1.4660E-02 2.3440E-02 3.0890E-02

2.7410E-02 1.9290E-02 9.8590E-03 2.3460E-02 2.0880E-02 1.3210E-02 2.0560E-02

2.7860E-02 2.5470E-02 1.8420E-02 1.8860E-02 4.5690E-02 4.2180E-02 2.8400E-02

1.2060E-02 1.7810E-02 1.8300E-02 1.5920E-02 3.5620E-01 1.1350E-01 3.1810E-01

3.2680E-02 2.6970E-01 1.4810E-01 3.4610E-02 4.6610E-02 2.3380E-02 2.7850E-02

3.0050E-02 4.2180E-01 5.2420E+00 2.7510E+00 5.3390E-01 1.2740E-01 3.2400E-01

2.7670E-01 1.5920E-01 3.6190E+00 3.5150E+00 1.2530E+00 3.1270E+00 2.2720E-01

4.5850E+00 2.4340E+00 4.8500E-01 8.7320E-03 2.8290E-02 2.1950E-02 1.0810E-02

7.0660E-02 1.1070E-02 5.8530E-02 1.3010E-02 1.4800E-03 3.8810E-03 8.3270E-03

1.0920E-02 1.9260E-04 1.3460E-03 2.3010E-03 2.8040E-03 3.5250E-05 7.5120E-04

2.1110E-03 3.3500E-03 5.3310E-02 1.7930E-02 1.0610E-02 6.7420E-03 1.1520E-02

1.2040E-02 3.8580E-02 3.4270E-02 4.6100E-03 1.3170E-02 1.7170E-02 1.5560E-02

2.3670E-03 5.2340E-03 1.1240E-02 1.4850E-02 2.7170E-03 1.2250E-02 1.6380E-02

1.4810E-02 2.0310E-03 1.1110E-02 2.3790E-02 3.0630E-02 1.4040E-03 6.9330E-03

1.0950E-02 1.2750E-02 1.0200E-02 3.1790E-01 6.5750E-02 6.9400E-03 1.8910E-02

1.1220E-01 1.0460E-01 8.5810E-03 2.6500E-02 1.9810E-02 9.0590E-03 1.6030E-01

1.9400E-01 2.0960E+00 2.0250E+00 4.7090E-02 6.0440E-02 1.4050E-01 1.9560E-01

1.8090E+00 1.0810E-01 3.1270E+00 7.1280E-01 8.7740E-03 1.5950E-01 1.8830E+00

1.8150E+00 2.0140E-03 4.7470E-03 1.2700E-02 1.5430E-02 1.8780E+00 1.2520E+00

6.2620E-01 3.4330E-02 2.8610E-02 2.2890E-02 1.7170E-02 1.9670E-04 1.6860E-04

1.4050E-04 1.1240E-04 4.8940E-04 4.2820E-04 3.6710E-04 3.0590E-04 3.7210E+00

2.7970E+00 1.8680E+00 9.3500E-01 1.0810E-01 8.1060E-02 5.4080E-02 2.7050E-02

4.6210E-03 3.6970E-03 2.7730E-03 1.8490E-03 2.0850E-02 1.7370E-02 1.3900E-02

1.0420E-02 2.1080E-02 1.6870E-02 1.2650E-02 8.4340E-03 1.5030E-02 1.2510E-02

1.0010E-02 7.5110E-03 2.3680E-04 2.0290E-04 1.6910E-04 1.3520E-04 3.0900E-02

2.0600E-02 1.0290E-02 2.8500E-02 2.1400E-02 1.4280E-02 7.1420E-03 1.9390E-02

1.5520E-02 1.1640E-02 7.7590E-03 6.2340E-02 4.6760E-02 3.1170E-02 1.5590E-02

1.1800E-02 9.8370E-03 7.8740E-03 5.9050E-03 3.8580E-02 1.5430E-02 1.0280E-02

5.1410E-03 4.4490E-02 3.3370E-02 2.2240E-02 1.1120E-02 3.2900E-03 2.6320E-03

1.9740E-03 1.3160E-03 1.8140E+00 8.2330E-01 1.6020E-02 1.0830E-02 6.1390E-03

2.7820E-03 2.7320E-02 1.2400E-02 4.6760E-03 1.2910E-03 5.4620E-04 4.4720E-04

3.0230E-04 1.6070E-04 6.6800E+00 4.3020E+00 1.7210E+00 3.5270E-01 8.1700E-02

4.6870E-02 2.1090E-02 6.8320E-03 1.0400E-01 8.3010E-02 6.9560E-02 5.2480E-02

5.8110E-02 4.4080E-02 2.9190E-02 1.6850E-02 3.7470E-02 2.3070E-02 1.3080E-02

6.6480E-03 2.5700E-02 1.1860E-02 4.7480E-03 1.5000E-03 1.4560E-02 6.7790E-03

2.7040E-03 8.2050E-04 3.1690E-02 3.2000E-02 2.0200E-02 5.9270E-02 3.4750E-02

1.7270E-02 6.6080E-03 6.0200E-02 3.2370E-02 1.5680E-02 6.6170E-03 7.9440E-02

5.0550E-02 2.3770E-02 7.7860E-03 7.1020E-03 4.9110E-03 2.8430E-03 1.3020E-03

1.9410E-02 3.4200E-02 3.3930E-02 2.1730E-02 5.9010E-02 4.3550E-02 2.0140E-02

5.6800E-03 3.7640E-02 1.5520E-02 5.8310E-03 2.0950E-03 7.0330E-01 6.8850E-03

4.7750E-03 5.5940E-03 6.1960E-03 1.5550E-03 1.1540E-02 1.0890E-02 6.3050E-03

3.1650E-04 1.5580E-04 1.9670E-04 3.0130E-04 3.5400E+00 1.0970E+00 2.1420E+00

1.9280E+00 3.6090E-02 2.5880E-02 2.5440E-02 1.6950E-02 6.9060E-02 7.2980E-02

4.5320E-02 1.8690E-02 3.2410E-02 2.1300E-02 2.1880E-02 2.3240E-02 1.5390E-02

1.4940E-02 1.3240E-02 9.9690E-03 3.2370E-03 1.0530E-02 9.5280E-03 5.9080E-03

1.1820E-03 6.0800E-03 5.7800E-03 3.5320E-03 3.1940E-02 1.8230E-02 5.6940E-03

2.7110E-02 2.1760E-02 1.8550E-02 1.1170E-02 1.8060E-02 2.3340E-02 2.0750E-02

1.4640E-02 4.1500E-02 2.2000E-02 2.5330E-02 1.8870E-02 3.2630E-03 2.1660E-03

2.4960E-03 2.8440E-03 1.2940E-02 3.3930E-02 2.0320E-02 5.6650E-03 3.8450E-02

9.1560E-03 1.9580E-02 1.8400E-02 4.8110E-03 1.6820E-02 1.2930E-02 6.1770E-03

8.1390E-04 4.0050E-03 4.1110E-03 2.7820E-03 9.0670E-05 9.2660E-04 5.1830E-03

8.9570E-03 3.3020E-05 1.8100E-04 1.7280E-04 9.6910E-05 2.0830E-01 2.4390E+00

1.3700E+00 3.3750E-01 7.3070E-03 2.1180E-02 1.6140E-02 7.5680E-03 4.7670E-02

2.0620E-02 1.7590E-02 1.7150E-02 8.3020E-03 1.6980E-02 1.4810E-02 9.3200E-03

4.4790E-03 7.8670E-03 8.0930E-03 6.3310E-03 2.6990E-04 1.9420E-03 5.1960E-03

7.1970E-03 8.1620E-05 7.0060E-04 2.8160E-03 4.6890E-03 2.0130E-02 5.6920E-03

2.0790E-03 7.8510E-03 1.4240E-02 1.1380E-02 5.8300E-03 3.6860E-03 1.0080E-02

1.2970E-02 1.1690E-02 8.3060E-03 2.4380E-02 1.5510E-02 5.6580E-03 4.0280E-04

1.9000E-03 1.8410E-03 1.2390E-03 6.4670E-03 2.1730E-02 5.6640E-03 2.5620E-03

5.2440E-03 2.4320E-02 1.1640E-02 1.5910E-03 1.1720E-03 2.5810E-03 7.4280E-03

9.1860E-03 1.0170E+00 3.9370E-02 5.2490E-03 1.6800E+00 7.0800E-01 7.5700E-02

4.1720E-03 2.9450E+00 7.3820E-01 1.0520E-01 5.1580E-03 5.6940E-02 1.2380E-02

3.1930E-03 7.5470E-04 2.5620E+00 2.8890E-01 5.2690E-03 8.0940E-04 2.3640E+00

4.9070E-01 4.7410E-02 1.9770E-03 9.6000E-01 4.5880E-01 4.9260E-02 2.0600E-03

4.4720E-01 1.2940E-01 3.4760E-02 7.0550E-03 6.9440E-01 1.8980E-01 4.7410E-02

8.0220E-03 3.4200E-01 2.1650E-01 2.2830E-02 1.6420E-03 3.9830E-02 6.8460E-03

1.8330E-04 1.9740E-01 2.3310E-02 1.7320E-03 9.4960E-05 2.0650E-01 4.0380E-02

3.5460E-03 3.9300E-04 2.1050E-01 3.0630E-02 9.2710E-03 1.0040E-03 1.1100E-01

3.7850E-02 8.8360E-03 1.5740E-03 3.5810E-02 9.9600E-03 6.1590E-03 4.4920E-04

7.0700E-02 8.2440E-03 1.8910E-03 1.5330E-04 1.1560E-01 3.2860E-02 8.3740E-03

1.5580E-03 1.5900E+00 4.5240E-02 5.6230E-01 2.0880E+00 8.1450E-01 8.9670E-02

6.0610E-01 2.9140E+00 1.3280E+00 1.2530E-01 2.0980E-02 2.8660E-02 8.8550E-03

2.5580E-03 7.0930E-01 1.3660E+00 3.0080E-01 4.8730E-03 6.3200E-01 1.2230E+00

5.1010E-01 5.5980E-02 4.5870E-01 1.0210E+00 5.0320E-01 5.8840E-02 1.5460E-01

2.2390E-01 1.0160E-01 3.5420E-02 1.8950E-01 3.7790E-01 1.6540E-01 5.1770E-02

1.8800E-01 3.3920E-01 2.4990E-01 2.6770E-02 1.9640E-02 1.5130E-02 4.2780E-03

5.5580E-02 1.0620E-01 2.1820E-02 1.8450E-03 5.2820E-02 1.0920E-01 4.3130E-02

3.9430E-03 6.4340E-02 1.1880E-01 1.7290E-02 9.1580E-03 3.7850E-02 1.0070E-01

3.4130E-02 9.5840E-03 2.9840E-02 7.9690E-03 2.1140E-03 3.7230E-03 1.9820E-02

4.0180E-02 5.5420E-03 1.9440E-03 3.9400E-02 5.7710E-02 2.6230E-02 8.6760E-03

1.1290E+00 3.1860E-02 6.5510E-01 1.5060E+00 6.5010E-01 6.0100E-03 7.4870E-01

3.4310E+00 1.0500E+00 7.4950E-03 1.7190E-02 1.8330E-02 5.8500E-03 1.4060E-01

7.3710E-01 8.1650E-01 2.1060E-01 1.0560E-01 6.5000E-01 7.8600E-01 3.9690E-01

4.9240E-02 5.0320E-01 6.8010E-01 4.0120E-01 4.8790E-02 1.2500E-01 1.5600E-01

8.2630E-02 4.7270E-02 1.6530E-01 2.7400E-01 1.4140E-01 8.5110E-03 2.2370E-01

2.1200E-01 1.9880E-01 8.2780E-03 1.4450E-02 8.5090E-03 1.2270E-02 5.5510E-02

6.5290E-02 1.5270E-02 8.3450E-03 5.5660E-02 7.0070E-02 3.3200E-02 2.1130E-02

5.3640E-02 8.1150E-02 1.1710E-02 8.8360E-03 3.4130E-02 7.4050E-02 2.8770E-02

2.3870E-02 4.8270E-03 3.2670E-03 2.9510E-03 5.4570E-03 1.8150E-02 2.6560E-02

3.8270E-03 1.1970E-02 3.2350E-02 3.9960E-02 2.1340E-02 1.1710E-03 3.7190E-02

5.1170E-01 1.5830E+00 2.9910E-04 6.9990E-03 5.7230E-01 3.3500E+00 2.5140E-03

7.7120E-03 1.3590E-02 1.2820E-02 1.5970E-02 1.7980E-01 5.9190E-01 6.4100E-01

9.0780E-03 1.2740E-01 5.2570E-01 7.9150E-01 2.0550E-03 5.8830E-02 4.0120E-01

7.6330E-01 1.1950E-02 5.1820E-02 1.0550E-01 1.4000E-01 8.0030E-03 5.1750E-02

1.4140E-01 2.6990E-01 7.7220E-04 9.5950E-03 1.7300E-01 2.9880E-01 2.5380E-03

1.0440E-02 1.0470E-02 1.7620E-03 1.5270E-02 4.4670E-02 4.9550E-02 9.4860E-04

9.8990E-03 4.4600E-02 7.0030E-02 5.7240E-03 2.3280E-02 4.3150E-02 5.3570E-02

1.5740E-03 9.5830E-03 2.8770E-02 6.9410E-02 1.7900E-02 2.0950E-03 5.0270E-03

1.1610E-03 1.2070E-03 6.3160E-03 1.4600E-02 1.8370E-02 2.7360E-03 1.2880E-02

2.7280E-02 3.6320E-02 1.5300E+00 1.3710E-01 3.9010E-03 3.1120E+00 6.0650E-01

9.6850E-02 4.5890E-03 3.5810E-02 8.5780E-03 2.7550E-03 6.1460E-05 5.9920E-02

1.9610E-02 2.3410E-04 6.7390E-06 1.7490E-01 3.3420E-02 2.6270E-03 7.4770E-05

1.0800E+00 3.7110E-01 2.3390E-02 2.1310E-04 1.2960E+00 1.8390E-01 3.0760E-02

3.5620E-03 3.4380E-01 2.6820E-01 3.0490E-02 3.8860E-03 1.1110E+00 4.6260E-01

6.0840E-02 3.6020E-03 1.2040E-02 6.7190E-04 2.5560E-05 6.4570E-02 1.2830E-02

3.6310E-03 3.4560E-05 2.2320E-01 1.4000E-02 1.6820E-03 2.0000E-04 3.5540E-02

1.0550E-02 3.2580E-04 4.9000E-05 2.3270E-01 4.4010E-02 4.7210E-03 2.9940E-04

4.0680E-04 2.6310E-02 3.7840E-03 2.1860E-05 3.5550E-02 1.1560E-02 3.8580E-03

1.9850E-05 3.6610E-01 3.4290E-02 3.5430E-03 5.6160E-05 2.7620E+00 1.6050E-01

4.7740E-01 3.0020E+00 1.4110E+00 1.7280E-01 1.5180E-02 1.8250E-02 4.0530E-03

2.9860E-03 2.9860E-02 1.8280E-02 1.9990E-02 2.5170E-04 5.0970E-02 9.1910E-02

3.4990E-02 3.0530E-03 4.5200E-01 1.1920E+00 4.2950E-01 2.7710E-02 3.1850E-01

7.8000E-01 1.6670E-01 3.3280E-02 3.1580E-01 6.4150E-01 2.8910E-01 3.3580E-02

2.9360E-01 1.2680E+00 4.9970E-01 7.0070E-02 5.4020E-03 5.1080E-03 4.0620E-04

2.5120E-02 3.3550E-02 6.8170E-03 3.9990E-03 3.8420E-02 1.5090E-01 1.3810E-02

1.8140E-03 1.6790E-02 1.2240E-02 1.0500E-02 2.9590E-04 5.3690E-02 1.3500E-01

4.7340E-02 5.4170E-03 3.4870E-04 1.3350E-02 1.0120E-02 2.3340E-03 1.7660E-02

1.6720E-02 5.0610E-03 4.2720E-03 7.3670E-02 2.3420E-01 3.4230E-02 4.1590E-03

2.1620E+00 6.5170E-02 1.2070E+00 3.8080E+00 1.7100E+00 6.5150E-03 1.0400E-02

1.3810E-02 2.9910E-03 9.0670E-03 2.6080E-02 7.7390E-03 1.4110E-02 9.9030E-03

5.2380E-02 6.1230E-02 2.7300E-02 5.1690E-02 5.1580E-01 8.5590E-01 3.3730E-01

7.2370E-02 3.1380E-01 5.6150E-01 1.3460E-01 5.0480E-02 3.3660E-01 4.4890E-01

2.3170E-01 6.0600E-02 4.9620E-01 9.5390E-01 4.1120E-01 2.0270E-03 4.8050E-03

2.2650E-03 9.7060E-03 1.8970E-02 2.4200E-02 5.0120E-03 5.8710E-03 4.2960E-02

1.1120E-01 1.0890E-02 5.1610E-03 1.4720E-02 5.9220E-03 7.3940E-03 8.0700E-03

5.7540E-02 9.7580E-02 3.8080E-02 2.9060E-04 5.8260E-03 1.0140E-02 5.5480E-03

8.4710E-03 1.0360E-02 1.3790E-02 3.7970E-03 1.2440E-02 7.9320E-02 1.6960E-01

2.7110E-02 5.7240E-04 7.5700E-02 1.4670E+00 4.4400E+00 1.8430E-03 7.2790E-03

9.0580E-03 8.8010E-03 1.4440E-03 1.1250E-02 2.2180E-02 1.0710E-02 1.0310E-03

1.1860E-02 4.3380E-02 6.4410E-02 2.4180E-03 6.1820E-02 4.1620E-01 9.3320E-01

1.2340E-02 8.2790E-02 2.6180E-01 5.0910E-01 6.5070E-03 5.7370E-02 2.7610E-01

5.1480E-01 3.6020E-03 6.9890E-02 4.0950E-01 1.0580E+00 5.4490E-04 2.7570E-03

3.9750E-03 2.5080E-03 1.1080E-02 1.6300E-02 1.6430E-02 7.6380E-04 6.9130E-03

3.4510E-02 9.4550E-02 9.2720E-04 6.2980E-03 1.2470E-02 6.8680E-03 6.9930E-04

9.3790E-03 4.7150E-02 1.0370E-01 2.3240E-04 1.8340E-03 7.5030E-03 7.8700E-03

2.4310E-03 9.4290E-03 9.3410E-03 7.9370E-03 1.2360E-03 1.4940E-02 6.4630E-02

1.5000E-01 6.6880E-01 2.7370E-02 6.5110E-04 1.7080E-01 2.9540E-02 1.0840E-04

1.6940E-05 1.3460E-02 9.3080E-04 2.4760E-05 1.6800E-06 2.9820E-02 7.6460E-03

4.8560E-04 9.9830E-06 1.9230E+00 1.9600E-01 2.7620E-03 3.1830E-05 1.0710E-01

2.3970E-02 3.3260E-03 3.7110E-05 3.5540E-01 1.0570E-01 1.0340E-02 8.0170E-04

1.0650E+00 2.2420E-01 5.7300E-02 3.8340E-03 4.9640E-04 1.6540E-04 2.6810E-05

1.6050E-02 2.4480E-03 2.0540E-04 3.6490E-05 8.8910E-02 1.4430E-02 2.4940E-03

1.9470E-04 3.7080E-02 6.6490E-03 2.8970E-04 5.6460E-05 4.4980E-01 5.7980E-02

6.1060E-03 1.4550E-04 1.5100E-03 6.9660E-04 3.8140E-04 8.3170E-05 3.2830E-02

3.6070E-03 1.2380E-04 1.7990E-06 3.5530E-02 9.9600E-03 1.3960E-03 3.2590E-05

1.2900E+00 4.9740E-02 6.7320E-02 7.7980E-02 3.0010E-02 9.6270E-05 4.1400E-03

7.5370E-03 9.1050E-04 2.4880E-05 1.1310E-02 1.3270E-02 8.0770E-03 5.5770E-04

3.2640E-01 1.9340E+00 2.4050E-01 3.1690E-03 3.7470E-02 5.4350E-02 2.1990E-02

3.8460E-03 1.0360E-01 4.5280E-01 1.1430E-01 1.1590E-02 2.6390E-01 1.3690E+00

4.0530E-01 6.4620E-02 3.2580E-04 1.8550E-04 9.1400E-05 6.0540E-03 7.9530E-03

2.2200E-03 1.7670E-04 2.6110E-02 5.1300E-02 1.2630E-02 2.7390E-03 1.4810E-02

1.7100E-02 6.4050E-03 2.4270E-04 1.0960E-01 4.7500E-01 6.1230E-02 7.0550E-03

1.3210E-03 5.5500E-04 2.5750E-04 2.0340E-04 1.1210E-02 1.7170E-02 3.4690E-03

1.3300E-04 1.4250E-02 1.6050E-02 9.1390E-03 1.6010E-03 1.5390E+00 1.9310E-02

6.3970E-02 4.5790E-02 2.1270E-02 9.9330E-04 4.3390E-03 4.8320E-03 6.4690E-04

2.6100E-03 1.1240E-02 8.3060E-03 6.3110E-03 4.1590E-02 6.2730E-01 2.4040E+00

1.8430E-01 1.0040E-02 3.4810E-02 3.7970E-02 1.8040E-02 2.5580E-02 1.7150E-01

3.4360E-01 9.2120E-02 7.7560E-02 4.7520E-01 1.0790E+00 3.4070E-01 1.9530E-04

1.9780E-04 1.2340E-04 1.8490E-03 5.6800E-03 4.9610E-03 1.5690E-03 6.8460E-03

2.4900E-02 3.7330E-02 1.0460E-02 4.5050E-03 1.3780E-02 1.0240E-02 4.5300E-03

1.5580E-02 1.2250E-01 3.7170E-01 4.9920E-02 1.1330E-03 3.9250E-04 2.7800E-04

2.0020E-04 2.9930E-03 1.1150E-02 1.0800E-02 2.4710E-03 4.0580E-03 1.2830E-02

1.0810E-02 7.4880E-03 3.1770E-03 2.3960E-02 5.4390E-02 4.3760E-02 1.4840E-04

1.2460E-03 3.6040E-03 4.0110E-03 3.1510E-04 3.0930E-03 9.5720E-03 1.0750E-02

1.8780E-03 4.9950E-02 4.9520E-01 2.1770E+00 1.4320E-03 1.1730E-02 3.0370E-02

4.0510E-02 2.6930E-03 2.9540E-02 1.4220E-01 3.5430E-01 6.8910E-03 8.7950E-02

4.0290E-01 1.1490E+00 1.0160E-04 1.9750E-04 1.3140E-04 4.1040E-04 2.1970E-03

4.7990E-03 4.3100E-03 1.1950E-03 7.8420E-03 2.1390E-02 3.5840E-02 9.0280E-04

5.4390E-03 1.1710E-02 9.4950E-03 1.2370E-03 1.8170E-02 9.9870E-02 3.4700E-01

9.4400E-04 2.4270E-04 3.4090E-04 1.4210E-04 4.9420E-04 3.7120E-03 9.3660E-03

9.2750E-03 6.1240E-04 4.7190E-03 1.1330E-02 1.2660E-02 3.7120E+00 5.5810E-01

3.6430E-02 1.3340E-01 5.3710E-02 3.3360E-02 1.6840E-02 8.6760E-02 5.8690E-02

3.2830E-02 1.7540E-02 7.9800E-02 3.7110E-02 1.3550E-02 3.3610E-03 4.6560E-02

2.6820E-02 1.1690E-02 3.3790E-03 4.2280E-02 2.4910E-02 1.1690E-02 3.9080E-03

8.5500E-02 3.2350E-02 8.7810E-03 1.3950E-03 9.2180E-02 5.9240E-02 1.0150E-02

3.1840E-02 1.8540E-02 9.0270E-03 3.4900E-03 8.7910E-02 4.0470E-02 1.3160E-02

3.8290E-03 6.2640E-02 3.1980E-02 1.4740E-02 6.4830E-03 4.6570E-02 1.6500E-02

6.7340E-03 3.5950E-03 1.0720E-01 1.0370E-01 6.8290E-02 4.2210E-03 5.3990E-02

2.7390E-02 9.5600E-03 2.8010E-03 3.7510E-02 1.7330E-02 5.5910E-03 1.1240E-03

3.3080E+00 6.6460E-01 5.3710E-02 8.2150E-02 2.9970E-02 1.2210E-02 5.3350E-02

3.4770E-02 3.6530E-02 2.2270E-02 2.6190E-02 3.1290E-02 2.7600E-02 1.5280E-02

2.3510E-02 1.5750E-02 1.5280E-02 1.1810E-02 1.9880E-02 1.5120E-02 1.5050E-02

1.2050E-02 1.5920E-02 3.8630E-02 3.0580E-02 1.0900E-02 6.7250E-02 1.7840E-02

3.5990E-02 1.8530E-02 1.3130E-02 1.0210E-02 5.3030E-03 3.3180E-02 3.0900E-02

3.1740E-02 1.3250E-02 3.1990E-02 2.6900E-02 2.0810E-02 7.1990E-03 9.3670E-03

2.5840E-02 1.4420E-02 5.4270E-03 8.0390E-02 7.7090E-02 8.2010E-03 4.6810E-02

2.7390E-02 1.7670E-02 1.7950E-02 7.2950E-03 1.4250E-02 1.2990E-02 1.2620E-02

6.3100E-03 2.2040E+00 3.3360E-02 2.9970E-02 4.3490E-02 1.1880E-02 2.4460E-02

3.3510E-02 1.7790E-02 2.2190E-02 5.0450E-03 1.9470E-02 1.9740E-02 2.2670E-02

7.6420E-03 1.3470E-02 1.2050E-02 1.1060E-02 5.9100E-03 1.2040E-02 1.1230E-02

1.2210E-02 3.9310E-04 1.5920E-02 2.2160E-02 2.5550E-02 3.2250E-02 3.0490E-02

1.7940E-02 9.0230E-03 1.0200E-02 7.5080E-03 4.7150E-03 6.8800E-03 2.7050E-02

1.5290E-02 2.3530E-02 1.4740E-02 2.0820E-02 1.1720E-02 1.0650E-02 3.5780E-03

6.9370E-03 1.5600E-02 1.0590E-02 5.3590E-02 3.2540E-02 3.4470E-02 2.1060E-02

9.5600E-03 1.7960E-02 9.2580E-03 1.0090E-02 2.8950E-03 1.0650E-02 7.6620E-03

9.5850E-03 1.6840E-02 1.2210E-02 1.1880E-02 1.8430E-02 1.0260E-02 1.2930E-02

1.7810E-02 7.9780E-03 4.8940E-04 5.0670E-03 1.3450E-02 1.4460E-02 1.2640E-03

7.1480E-03 8.3630E-03 5.3400E-03 9.2390E-04 5.4250E-03 8.0290E-03 6.3220E-03

3.5990E-05 3.8870E-04 1.1230E-02 2.0360E-02 1.0030E-02 2.7040E-02 3.2520E-03

3.4900E-03 5.3010E-03 4.7130E-03 2.2220E-03 1.7260E-03 5.4930E-03 1.7780E-02

1.1390E-02 6.4830E-03 7.1990E-03 1.0650E-02 4.6280E-03 1.6460E-03 1.6930E-03

4.0380E-03 1.0960E-02 2.6800E-02 6.9060E-03 3.5820E-02 1.3030E-03 2.8010E-03

7.2950E-03 1.0090E-02 3.2430E-03 2.8920E-04 3.0110E-03 7.1200E-03 4.9770E-03

1.3480E+00 7.7980E-02 7.7050E-03 4.6530E+00 1.5620E+00 3.3160E-01 3.6230E-02

9.0480E+00 2.0630E+00 3.3880E-01 3.2040E-02 1.4050E-01 5.4170E-02 2.1350E-02

5.7480E-03 1.6750E-01 5.8270E-02 1.8090E-02 4.0530E-03 4.1990E-02 1.8320E-02

8.3780E-03 2.3820E-03 3.3640E-01 1.3190E-01 2.3260E-02 6.5450E-01 2.9800E-01

8.4810E-02 1.3030E-02 4.9110E-01 1.5330E-01 3.2840E-02 5.5200E-03 1.6070E-01

7.9220E-02 2.4830E-02 7.3170E-03 3.8960E-02 1.8180E-02 7.3400E-03 2.5720E-03

2.1000E-02 1.9100E-02 1.4780E-02 8.2840E-03 5.9720E-02 3.5340E-02 1.7530E-02

6.3830E-03 6.5530E-02 3.4770E-02 1.4780E-02 5.4820E-03 1.4850E+00 8.7920E-02

1.1280E+00 1.9620E+00 1.4380E+00 4.1570E-01 5.1390E-01 5.3660E+00 2.2970E+00

4.4270E-01 4.1670E-02 6.8250E-02 3.4350E-02 2.2120E-02 2.6050E-02 1.0470E-01

6.1800E-02 2.1470E-02 1.0680E-02 2.1730E-02 1.1530E-02 9.3470E-03 1.7960E-01

1.0940E-01 7.9720E-02 2.9700E-01 2.0790E-01 1.9580E-01 8.6870E-02 1.0570E-01

2.2390E-01 1.4440E-01 3.8540E-02 7.9210E-02 4.9320E-02 5.6640E-02 1.8880E-02

1.2870E-02 1.6530E-02 1.3520E-02 7.4300E-03 1.5750E-02 1.5940E-02 1.0780E-02

4.9100E-03 3.5340E-02 2.4870E-02 1.7990E-02 1.1030E-02 2.9840E-02 2.4180E-02

2.3100E-02 1.3280E-02 1.0380E+00 9.4790E-02 1.0740E+00 1.0200E+00 1.1110E+00

3.1110E-03 5.4380E-01 3.3700E+00 1.8310E+00 1.3850E-02 2.2550E-02 4.9190E-02

2.5330E-02 5.3670E-03 2.1350E-02 7.9200E-02 3.5470E-02 3.8560E-03 4.1180E-03

1.7320E-02 1.0240E-02 7.5710E-02 1.0290E-01 6.7190E-02 8.4550E-02 1.9530E-01

1.2950E-01 1.1560E-01 1.0380E-02 1.0150E-01 1.1960E-01 1.1040E-01 2.4820E-02

5.6640E-02 2.1190E-02 3.3370E-02 3.2780E-03 9.2520E-03 1.0320E-02 1.0710E-02

1.0500E-02 1.1570E-02 6.5710E-03 2.9430E-03 1.7530E-02 1.7990E-02 1.6130E-02

7.8370E-03 9.5770E-03 1.9960E-02 1.4460E-02 1.6270E-02 2.6390E-03 1.0950E-01

7.4340E-01 7.9430E-01 2.8310E-04 3.1540E-03 3.8130E-01 2.4870E+00 1.9630E-03

1.3490E-02 1.3970E-02 2.6040E-02 4.3470E-04 5.4120E-03 1.4810E-02 4.1100E-02

1.0080E-05 4.2830E-03 3.1370E-03 1.0340E-02 2.2780E-02 6.5430E-02 3.4680E-02

1.3030E-02 8.6690E-02 1.1550E-01 4.7380E-02 1.8410E-03 9.5060E-03 6.9700E-02

8.9970E-02 7.3170E-03 1.8870E-02 3.3370E-02 8.4610E-03 7.7810E-04 2.6230E-03

6.1170E-03 7.2620E-03 5.2500E-03 6.1010E-03 3.0100E-03 1.4300E-03 6.3830E-03

1.1040E-02 7.8370E-03 4.4860E-03 2.6950E-03 7.1810E-03 1.2240E-02 8.0210E-03

3.3690E+00 3.0860E-01 1.7380E-02 8.2940E+00 2.1830E+00 3.3590E-01 2.3280E-02

4.9950E-01 1.5540E-01 3.2240E-02 5.5690E-03 7.8790E-01 2.5480E-01 5.6910E-02

7.1750E-03 4.2670E-01 1.1930E-01 1.8920E-02 1.5030E-03 4.1480E-01 2.1130E-02

3.3030E-03 6.3750E-01 1.3080E-01 1.5040E-02 8.4820E-04 7.5690E-01 2.5690E-01

5.9820E-02 6.3510E-03 1.3880E-01 4.7980E-02 9.7940E-03 3.1010E-03 8.2810E-02

3.4880E-02 1.3160E-02 3.8230E-03 3.2900E-02 5.9890E-02 1.2060E-02 7.7390E-03

6.2750E-02 2.8590E-02 1.1470E-02 2.4920E-03 9.0830E-02 3.3270E-02 7.8250E-03

1.3080E-03 3.6920E+00 3.7570E-01 1.6850E+00 4.2960E+00 2.2970E+00 4.1130E-01

1.5460E-01 2.2520E-01 1.3980E-01 3.5030E-02 2.0350E-01 3.8610E-01 2.4630E-01

6.7000E-02 7.5720E-02 2.2560E-01 1.3050E-01 2.3020E-02 1.4780E-01 1.9120E-01

1.2330E-02 1.9250E-01 3.0090E-01 1.1730E-01 1.6690E-02 2.5570E-01 3.2820E-01

2.1130E-01 6.9460E-02 5.9720E-02 5.2450E-02 4.0800E-02 6.7920E-03 3.0450E-02

3.8520E-02 2.5440E-02 1.3430E-02 2.6320E-02 2.7850E-02 3.1980E-02 3.9120E-03

3.3310E-02 2.7020E-02 1.4140E-02 9.7800E-03 3.3240E-02 3.6690E-02 2.8100E-02

8.5520E-03 2.8320E+00 1.3430E-01 1.8030E+00 2.7330E+00 1.8500E+00 3.2130E-02

1.3920E-01 1.3550E-01 1.0930E-01 3.0850E-02 1.9660E-01 2.5240E-01 2.0620E-01

1.8870E-03 8.6940E-02 1.4700E-01 1.0600E-01 4.2450E-02 1.4130E-01 7.9620E-02

4.2650E-02 1.7500E-01 1.7230E-01 8.0650E-02 5.9660E-02 2.1060E-01 2.0890E-01

1.6980E-01 1.8930E-02 4.9190E-02 2.5050E-02 2.6670E-02 9.9640E-03 2.1660E-02

2.7530E-02 2.1770E-02 1.9750E-02 1.4820E-02 2.1990E-02 1.1000E-02 1.6210E-02

1.7800E-02 2.1090E-02 8.0780E-03 7.8240E-03 2.8090E-02 2.1830E-02 2.2190E-02

2.2390E-03 1.6190E-01 1.3960E+00 2.7880E+00 5.5690E-03 3.4940E-02 1.0910E-01

1.2800E-01 2.4500E-03 3.6620E-02 1.5900E-01 2.6380E-01 9.6340E-05 2.1530E-03

6.6070E-02 1.5990E-01 9.6290E-03 5.6240E-02 1.0960E-01 5.7150E-03 5.2000E-02

1.3460E-01 1.2150E-01 6.3520E-03 6.9350E-02 1.6940E-01 1.8770E-01 6.1780E-03

1.8150E-02 3.6180E-02 1.9370E-02 2.4080E-03 9.7800E-03 1.7830E-02 2.3950E-02

1.3160E-02 9.0060E-03 8.3360E-03 1.4530E-02 5.6660E-03 1.5050E-02 1.2270E-02

9.1350E-03 1.3080E-03 8.5510E-03 2.2190E-02 2.1250E-02 3.1720E+00 1.2360E-01

5.0450E-03 5.0710E-01 1.2190E-01 2.5950E-02 5.4130E-03 3.4750E-01 9.1690E-02

1.3450E-02 6.1480E-04 2.6200E-01 8.0890E-02 1.9850E-02 2.6150E-03 2.2100E-02

8.8460E-03 1.1340E-03 7.4300E-01 5.9470E-02 1.1030E-02 2.0090E-03 5.0320E-01

1.0300E-01 1.1900E-02 1.3950E-03 7.0290E-02 1.8080E-02 2.9680E-03 1.0350E-03

2.4230E-01 5.7680E-02 9.7710E-03 1.9210E-03 7.7490E-02 3.1760E-02 1.6320E-02

3.5600E-03 8.9670E-02 2.1060E-02 6.8410E-03 5.6640E-04 1.5930E-01 4.6620E-02

1.1610E-02 1.4610E-03 3.9050E+00 1.4780E-01 1.5150E-01 2.6590E-01 1.0730E-01

2.6300E-02 9.1390E-02 1.7740E-01 9.3710E-02 1.6020E-02 7.0530E-02 1.3830E-01

7.3630E-02 2.2450E-02 1.4370E-02 7.2270E-03 5.1330E-03 1.8450E-01 4.3820E-01

4.7080E-02 9.7160E-03 1.3300E-01 2.6520E-01 1.0520E-01 1.3160E-02 2.8350E-02

3.0720E-02 1.6030E-02 1.8910E-03 5.7620E-02 1.3300E-01 5.8730E-02 1.0460E-02

6.4580E-02 2.3130E-02 1.1080E-02 8.8220E-03 3.4400E-02 4.6330E-02 1.0700E-02

7.0130E-03 5.5560E-02 7.7810E-02 3.6390E-02 1.2720E-02 2.9930E+00 3.9500E-02

1.3640E-01 1.7980E-01 8.5190E-02 1.3420E-02 9.3410E-02 1.1960E-01 7.6710E-02

1.4730E-02 6.3650E-02 1.0120E-01 6.4450E-02 8.0290E-03 7.8660E-03 5.4860E-03

4.1800E-02 1.8760E-01 2.8210E-01 3.2090E-02 2.3810E-02 1.3530E-01 1.7250E-01

8.1750E-02 9.2290E-03 2.4720E-02 1.6900E-02 1.0730E-02 9.7610E-03 5.8710E-02

9.2050E-02 4.7450E-02 5.1660E-02 1.4640E-02 1.1700E-02 8.0840E-03 1.3800E-02

2.3890E-02 3.3770E-02 7.2830E-03 1.6690E-02 4.4600E-02 5.4530E-02 3.0170E-02

9.1130E-03 4.2590E-02 1.1230E-01 1.6680E-01 6.1420E-04 1.6000E-02 7.6540E-02

1.3430E-01 1.4270E-03 1.6550E-02 5.4910E-02 1.1020E-01 3.6210E-03 8.1310E-03

4.2830E-03 9.1000E-03 4.8590E-02 1.4910E-01 2.0090E-01 3.1050E-03 2.8010E-02

1.0930E-01 1.6960E-01 2.9960E-03 9.6070E-03 1.9530E-02 1.4060E-02 1.9210E-03

1.0450E-02 4.7440E-02 9.6200E-02 3.8740E-02 7.9340E-03 1.2540E-02 5.3520E-03

3.8900E-03 1.5030E-02 1.9560E-02 2.0570E-02 3.0440E-03 1.8690E-02 3.8270E-02

4.9510E-02 2.0570E+00 7.4200E-02 3.8290E-03 6.1920E+00 1.5720E+00 2.1730E-01

1.3200E-02 1.1920E+01 2.1790E+00 2.6010E-01 1.5430E-02 4.6970E-01 5.8090E-02

1.9980E-02 5.8420E-01 1.8910E-01 3.1470E-02 8.2790E-03 6.5270E-01 1.5260E-01

2.4110E-02 3.3190E-03 1.8810E-01 5.8740E-02 8.2990E-03 2.3420E-03 8.4770E-02

2.6000E-02 7.1700E-03 1.5080E-03 2.6890E-02 2.8180E-02 1.0380E-02 4.7730E-03

4.5850E-02 2.1640E-02 7.2440E-03 1.1850E-03 9.6650E-02 2.8190E-02 7.5220E-03

1.3990E-03 2.4910E+00 9.0710E-02 1.1970E+00 3.2400E+00 1.7000E+00 2.6730E-01

8.7940E-01 7.7910E+00 2.5540E+00 3.2100E-01 1.9210E-01 2.1790E-01 2.8080E-02

2.3880E-01 2.2080E-01 1.6620E-01 2.4510E-02 1.5240E-01 3.3700E-01 1.4970E-01

2.7130E-02 7.5180E-02 7.0390E-02 5.4150E-02 6.2110E-03 2.0690E-02 4.4980E-02

2.2930E-02 7.8410E-03 2.1510E-02 1.6500E-02 1.3800E-02 4.3740E-03 2.5030E-02

1.6900E-02 1.2020E-02 6.7970E-03 2.8180E-02 4.8340E-02 2.2420E-02 8.0620E-03

1.8770E+00 7.2330E-02 1.3250E+00 2.0490E+00 1.3580E+00 6.2480E-03 1.0390E+00

5.5970E+00 2.0310E+00 7.4690E-02 1.6280E-01 9.1040E-02 6.8190E-02 2.0230E-01

1.0640E-01 1.1080E-01 2.4100E-02 1.4970E-01 2.1000E-01 1.1600E-01 1.9970E-02

6.6050E-02 3.2040E-02 3.6400E-02 4.7260E-03 1.7670E-02 3.1160E-02 1.9130E-02

1.6140E-02 1.0020E-02 1.0420E-02 5.5700E-03 1.0970E-02 1.4170E-02 1.3010E-02

7.4050E-03 7.5220E-03 2.2420E-02 3.2510E-02 1.7800E-02 1.0100E-03 8.7390E-02

1.0160E+00 2.0990E+00 5.1610E-04 6.9480E-03 7.8330E-01 4.9960E+00 3.0280E-02

7.2240E-02 1.1640E-01 1.8330E-02 7.0850E-02 1.5160E-01 8.4340E-02 3.3190E-03

2.7120E-02 1.1600E-01 1.8680E-01 5.1090E-03 2.1060E-02 4.9680E-02 2.7140E-02

8.2900E-04 5.0210E-03 1.4450E-02 2.8400E-02 1.0760E-02 5.9780E-03 5.8500E-03

5.5070E-03 3.1800E-03 1.1070E-02 1.0250E-02 5.8730E-03 1.3990E-03 8.0620E-03

1.7800E-02 2.6240E-02 3.8780E+00 2.6420E-01 1.1310E-02 7.0160E+00 1.7920E+00

3.3010E-01 1.4280E-02 8.1210E-02 4.6270E-02 1.2740E-02 2.6500E-01 1.8650E-02

4.2560E-03 7.0900E-04 7.5100E-01 1.7650E-01 3.7840E-02 8.0760E-03 1.1030E-01

1.5700E-02 4.2490E-03 9.0050E-04 2.9460E-01 6.9060E-02 1.2210E-02 1.9880E-03

1.1240E-02 3.2270E-02 6.6730E-03 4.1910E-04 1.0220E-01 2.4300E-02 8.5700E-03

1.4230E-03 1.9330E-01 6.4110E-02 4.9990E-03 3.8330E-04 4.5550E+00 3.1650E-01

1.4340E+00 7.6100E+00 3.2360E+00 3.9370E-01 6.2270E-02 3.0740E-02 2.3850E-02

6.3300E-02 1.5970E-01 1.3450E-02 3.8460E-03 2.2000E-01 3.9840E-01 1.5510E-01

3.8190E-02 3.3400E-02 6.1570E-02 1.0710E-02 3.5560E-03 6.9040E-02 1.6370E-01

6.8710E-02 1.3400E-02 9.3650E-03 1.6690E-02 1.2050E-02 4.0640E-03 3.9460E-02

5.3680E-02 1.2820E-02 7.7440E-03 8.1550E-02 1.4540E-01 6.9290E-02 5.7260E-03

3.5470E+00 1.5080E-01 2.6570E+00 5.4380E+00 2.6010E+00 4.1970E-02 3.0940E-02

2.0570E-02 1.4350E-02 6.4580E-02 1.0410E-01 9.1030E-03 5.7260E-02 1.9870E-01

2.7070E-01 1.2300E-01 1.0450E-02 2.9630E-02 4.0210E-02 7.0910E-03 1.2210E-02

6.8710E-02 1.1480E-01 5.6130E-02 7.4920E-03 7.4950E-03 1.1690E-02 7.0520E-03

1.6490E-02 2.7990E-02 3.8150E-02 8.3430E-03 1.2630E-02 8.5920E-02 8.9750E-02

5.3290E-02 3.7360E-04 1.7970E-01 2.0890E+00 5.8650E+00 2.4890E-02 3.2270E-02

1.2950E-02 3.2170E-03 1.6600E-02 5.1310E-02 7.2920E-02 1.3390E-02 6.1730E-02

1.6340E-01 2.4890E-01 3.2270E-03 1.1070E-02 2.3470E-02 2.7780E-02 1.9880E-03

1.3400E-02 5.6120E-02 1.1750E-01 5.6180E-03 2.5890E-03 8.9470E-03 8.1460E-03

5.6430E-03 1.6840E-02 2.2320E-02 2.3430E-02 1.1890E-03 1.5160E-02 6.8940E-02

9.5910E-02 1.5180E+00 1.2060E-01 4.0220E-03 1.6780E-02 2.0520E-03 1.0770E-04

7.3040E-02 2.5150E-02 7.9160E-03 1.7660E-04 1.9860E+00 1.5490E-01 2.0710E-02

2.6830E-03 3.5530E-02 9.8580E-03 1.4500E-03 1.9370E-04 4.9480E-01 8.8480E-02

1.0490E-02 9.1840E-04 6.2990E-04 2.4590E-02 3.6770E-03 1.0390E-04 4.0050E-02

8.7180E-03 6.6290E-04 5.3150E-05 2.5520E-01 2.3750E-02 4.2830E-03 2.5360E-04

3.0750E+00 1.4090E-01 8.2740E-03 6.7290E-03 1.2290E-03 3.7450E-02 3.2900E-02

1.2170E-02 8.5790E-03 3.6960E-01 1.3170E+00 1.4990E-01 2.2140E-02 1.6200E-02

1.4710E-02 8.0500E-03 1.3500E-03 1.0890E-01 2.9550E-01 9.4050E-02 1.1860E-02

5.3980E-04 1.2580E-02 9.5070E-03 2.2370E-03 1.6230E-02 1.7540E-02 7.9800E-03

6.6570E-04 5.1210E-02 1.6640E-01 2.0560E-02 4.8560E-03 3.7230E+00 3.5440E-03

6.5670E-03 3.4170E-03 1.7880E-02 2.2370E-02 2.6700E-02 8.9640E-03 6.3080E-02

4.0260E-01 9.6540E-01 1.1880E-01 5.8570E-03 1.3110E-02 8.9770E-03 5.6470E-03

1.7110E-02 1.1610E-01 2.1630E-01 7.6010E-02 4.4990E-04 5.5740E-03 9.4980E-03

5.1960E-03 4.9540E-03 1.4430E-02 1.0320E-02 5.6360E-03 1.0340E-02 5.2390E-02

1.2290E-01 1.6970E-02 1.1610E-03 4.4930E-03 5.1670E-03 5.2440E-03 1.9790E-02

2.0020E-02 1.5690E-02 9.2630E-03 7.3460E-02 3.2600E-01 8.3140E-01 1.5370E-03

6.6620E-03 1.1080E-02 7.5890E-03 1.7930E-03 1.9800E-02 9.5500E-02 2.2360E-01

3.6000E-04 1.8440E-03 7.0440E-03 7.3270E-03 9.7540E-04 5.9600E-03 1.2140E-02

9.1960E-03 1.4400E-03 1.2080E-02 4.3280E-02 1.0520E-01 6.9740E-01 4.9350E-02

2.5650E+00 1.2230E+00 4.1310E-01 7.2000E-02 7.8400E+00 2.7600E+00 7.5180E-01

1.3680E-01 5.4070E-02 3.0050E-02 1.4810E-02 5.7910E-03 2.3740E-02 1.7520E-02

1.0420E-02 4.7310E-03 4.3940E-02 1.0910E-01 8.9840E-02 5.4620E-02 9.2770E-02

5.5420E-02 3.1420E-02 1.4300E-02 4.1750E-02 2.6380E-02 1.7740E-02 1.1600E-02

5.8740E-01 8.2040E-01 7.6660E-01 7.6650E-01 4.9670E-01 3.4180E-01 3.5990E+00

2.6710E+00 1.0640E+00 2.2720E-02 2.1170E-02 1.6680E-02 9.2440E-03 1.2540E-02

6.4150E-03 8.1430E-03 1.0500E-02 2.9300E-02 8.9840E-02 6.0730E-02 1.8460E-02

4.3870E-02 4.2040E-02 2.9120E-02 1.4240E-02 1.8070E-02 2.2490E-02 1.6050E-02

8.3510E-03 3.3130E-02 5.7510E-01 5.3070E-01 2.8650E-01 1.9640E-02 2.1730E-01

1.5130E+00 2.0910E+00 6.9920E-03 1.1620E-02 1.0380E-02 5.9130E-03 1.3290E-03

7.3980E-03 6.5030E-03 3.5690E-03 1.4650E-02 5.4610E-02 1.8460E-02 1.1440E-02

1.8500E-02 1.8870E-02 1.7010E-02 1.0250E-02 9.7950E-03 6.8270E-03 7.9690E-03

7.8960E-03 3.0840E+00 4.6210E-01 3.3500E-02 8.3960E+00 3.0800E+00 6.7910E-01

7.9280E-02 1.2080E-01 5.8950E-02 1.5880E-02 2.7920E-03 5.9590E-02 3.2210E-02

1.5350E-02 6.2760E-03 1.4720E-01 1.4480E-01 3.9280E-02 1.6500E-02 1.4170E-01

7.4050E-02 2.8700E-02 1.0650E-02 1.3060E-01 5.2470E-02 1.4370E-02 2.2020E-03

2.7610E+00 5.4400E-01 2.3160E+00 3.2530E+00 2.7900E+00 8.4460E-01 5.8950E-02

3.2790E-02 4.1440E-02 1.5600E-02 2.4650E-02 2.4840E-02 2.1280E-02 1.4510E-02

1.1030E-01 6.3520E-02 6.9990E-02 1.6950E-02 7.4050E-02 4.9760E-02 4.9780E-02

1.7700E-02 4.1040E-02 4.9420E-02 4.2130E-02 1.7150E-02 1.8410E+00 1.9930E-01

2.2070E+00 1.5850E+00 2.1540E+00 1.5880E-02 4.1440E-02 1.6820E-02 2.5050E-02

8.1130E-03 1.5670E-02 1.6670E-02 1.6490E-02 7.3580E-02 2.9650E-02 4.2550E-02

2.8110E-02 2.8710E-02 4.9780E-02 2.1680E-02 2.7350E-02 6.2720E-03 3.3710E-02

2.7490E-02 3.2360E-02 8.8070E-03 2.2500E-01 1.5270E+00 1.3130E+00 2.7920E-03

1.5600E-02 2.5060E-02 6.1380E-03 2.1040E-03 6.2270E-03 9.9650E-03 1.0180E-02

3.6780E-02 1.2770E-02 1.5350E-02 2.2030E-02 1.0650E-02 1.7700E-02 2.7360E-02

8.0490E-03 3.2040E-04 7.0150E-03 2.2990E-02 1.9610E-02 3.1520E+00 2.3160E-01

1.2390E-02 1.8600E-01 8.0650E-02 2.3610E-02 5.7790E-03 1.2500E-01 6.0490E-02

2.3430E-02 7.2340E-03 5.6500E-02 3.6430E-01 3.6140E-02 5.7010E-03 3.7190E-01

1.1940E-01 1.5700E-02 4.0920E-03 1.1800E-01 6.0390E-02 2.1230E-02 3.5900E-03

3.5730E+00 2.8290E-01 9.4960E-02 6.7660E-02 5.5070E-02 1.9100E-02 5.4190E-02

5.1570E-02 4.3800E-02 2.3500E-02 4.5200E-02 1.4260E-01 1.6120E-01 2.1050E-02

1.5160E-01 1.3400E-01 1.1080E-01 1.2280E-02 6.0360E-02 4.1120E-02 3.7970E-02

2.3140E-02 2.7250E+00 3.7940E-02 6.4240E-02 4.0830E-02 3.4580E-02 1.7770E-02

3.9110E-02 3.5600E-02 3.7320E-02 3.3900E-02 4.7920E-02 1.2400E-01 7.1760E-02

3.9460E-02 1.3320E-01 5.9040E-02 7.4870E-02 2.1220E-02 3.7960E-02 3.1160E-02

3.1620E-02 1.2630E-02 3.6090E-02 4.6260E-02 2.3440E-02 4.6840E-03 1.7050E-02

3.1850E-02 3.3000E-02 2.2600E-02 1.3780E-02 5.7650E-02 9.1030E-02 9.3710E-03

4.2590E-02 1.0060E-01 5.1840E-02 3.5900E-03 2.3140E-02 3.1600E-02 2.2970E-02

1.8940E+00 3.3110E-01 1.1770E-01 6.5470E+00 1.6510E+00 3.6870E-01 9.2360E-02

1.1530E+00 2.1550E+00 1.1960E+00 1.0520E-01 1.9150E+00 6.1090E-01 1.0960E-01

6.5920E-03 2.3510E+00 7.2400E-01 1.4670E-01 1.8310E-02 1.8330E+00 2.1400E-01

5.4550E-01 3.8390E+00 1.7140E+00 4.1450E-01 8.6400E-01 1.4250E+00 3.6860E-01

7.9740E-01 6.0990E-01 7.3740E-01 5.0270E-01 1.3150E-01 4.9260E-01 1.0730E+00

6.8700E-01 1.8070E-01 1.2160E+00 8.8290E-02 4.8220E-01 2.4190E+00 1.3530E+00

5.7590E-01 5.9700E-01 6.9410E-01 4.3590E-01 1.0930E-01 5.0230E-01 3.8160E-01

3.2780E-01 4.0390E-02 4.7940E-01 5.7570E-01 5.2850E-01 2.9360E-02 5.8490E-02

3.2380E-01 1.7600E+00 2.8800E-01 1.4040E-01 6.2130E-01 1.0180E-01 6.5920E-03

1.3130E-01 3.2770E-01 1.9500E-01 3.5260E-03 4.2840E-02 3.3200E-01 4.3420E-01

5.6110E+00 3.9600E-01 4.7090E-02 2.1360E-01 7.8430E-02 2.7860E-02 6.1120E-03

5.2420E+00 2.6100E-01 5.6340E-03 1.1600E-03 1.0800E+01 2.1650E+00 1.8540E-01

7.5480E-03 6.6120E+00 4.5010E-01 1.7800E-01 4.8560E-02 3.0060E-02 1.5040E-02

1.1630E+00 3.1520E+00 2.7110E-01 4.7710E-03 2.8100E+00 5.6410E+00 2.2980E+00

2.1920E-01 5.1300E+00 1.4230E-01 2.7590E-02 2.9220E-02 1.8110E-02 1.8730E-01

1.3040E+00 1.9930E+00 1.8960E-01 4.4090E-01 2.9460E+00 3.6140E+00 1.7790E+00

1.0670E-01 1.4000E-02 2.5260E-02 1.6930E-02 1.8170E-02 2.4310E-01 1.0360E+00

1.4580E+00 3.5450E-02 5.3800E-01 2.3720E+00 3.6400E+00 7.5840E-01 5.0560E-01

2.5280E-01 2.1330E+00 1.6040E+00 1.0710E+00 5.3650E-01 1.8920E-02 1.5140E-02

1.1360E-02 7.5690E-03 2.3690E+00 1.0750E+00 4.5300E+00 3.0780E+00 1.2530E+00

2.5680E-01 3.6990E-01 1.5160E-01 6.2820E-02 2.9550E-02 9.2170E-01 2.6150E+00

5.9420E-01 1.4730E+00 1.4050E+00 4.6100E-02 1.8070E-01 1.3040E-01 5.2610E-02

1.4910E-01 1.8030E+00 9.2730E-01 1.6520E-01 2.2430E-02 1.8770E-02 7.0230E-02

9.3450E-02 2.3660E+00 2.9800E-01 3.5000E-02 2.2440E+00 7.3740E-01 1.9320E-01

4.7480E-02 2.2770E+00 3.2580E-01 5.2590E-01 1.0370E+00 6.4940E-01 2.0650E-01

1.5420E+00 8.6800E-02 4.5700E-01 5.7990E-01 4.8970E-01 2.0020E-02 7.2120E-02

3.0580E-01 4.0880E-01 4.5280E+00 4.5730E-01 2.5760E-02 4.8830E+00 5.5730E-01

3.7570E+00

3000.00

6.2690E+00 1.8530E+00 8.6010E-01 3.5960E-01 4.0040E+00 1.7040E+00 5.9130E-01

1.6490E-01 1.5320E+01 6.2110E-01 2.0760E-01 6.0560E-02 8.6450E-01 4.4110E-01

1.4570E-02 3.4910E-01 1.1440E-01 6.7200E-03 6.6820E-01 3.2650E-01 9.8070E-02

1.6110E-02 3.3160E-01 2.1290E-01 1.0860E-01 3.5660E-02 1.7690E-01 2.0020E-01

7.6430E-02 1.9940E-02 2.5610E-01 1.4600E-01 6.7900E-02 3.4570E-02 1.9790E+01

8.5290E+00 2.1060E+00 1.0300E+00 4.1380E-01 3.0020E+01 5.3760E+00 7.1660E-01

1.1580E-01 4.5840E-02 1.9740E-02 1.1560E+01 2.2560E-01 5.3520E-02 1.5100E+00

2.7900E-01 1.5510E-02 2.8770E-03 2.5430E+00 3.3090E-01 3.6150E-02 1.1050E-02

8.7540E-01 1.7150E-02 9.3670E-03 1.1610E-01 8.1870E-02 3.5520E-02 8.7880E-03

6.9640E-02 4.4480E-02 1.7300E-02 8.8630E-03 3.2990E-02 1.1060E-02 3.2980E-03

8.0030E-02 3.8970E-02 1.7850E-02 6.4340E-03 2.5410E-02 1.5470E-02 6.6980E-03

1.7070E-03 6.9060E-02 3.8820E-02 1.3240E-02 2.4050E-03 5.2290E-02 2.1150E-02

4.8270E-03 5.3460E-04 3.9220E-02 1.5580E-02 6.0670E-03 1.7730E-03 3.4970E-02

1.1520E-02 3.4970E-03 1.0990E-03 5.8240E-02 2.6520E-02 1.1450E-02 3.9460E-03

7.6700E-02 2.8570E-02 7.5380E-03 1.1330E-03 4.9350E-02 1.5390E-02 3.8930E-03

7.0610E-04 5.0200E-02 2.3600E-02 8.6250E-03 1.9100E-03 3.8220E-02 1.3490E-02

6.4090E-03 3.2560E-02 2.0800E-02 7.3910E-03 1.6170E-03 2.9530E-02 1.6590E-02

1.0160E-02 7.1110E-03 1.3640E-02 1.0100E-02 3.9250E-03 9.2780E-04 1.0970E-02

8.4810E-03 4.5280E-03 1.4680E-03 2.9810E-02 9.7990E-03 7.7540E-03 4.4770E-03

1.5550E-02 1.0520E-02 5.5700E-03 2.5260E-03 1.9800E-02 1.3630E-02 6.2290E-03

1.8350E-03 5.8030E+00 1.4230E+00 5.2670E-01 1.8390E+00 1.6730E+00 1.1190E+00

5.2850E-01 3.3130E+00 9.1280E+00 3.8490E-01 1.4180E-01 6.0760E-01 1.9640E-01

2.5770E-01 2.0280E-01 1.0910E-01 6.6010E-02 2.9160E-01 2.4560E-01 2.5610E-01

1.0260E-01 1.8670E-01 2.2050E-01 1.0270E-01 9.1790E-02 9.6650E-02 1.9400E-01

1.3320E-01 7.3580E-02 1.5870E-01 1.3400E-01 1.0040E-01 2.6210E-02 6.1280E+00

1.1080E+01 8.8080E+00 1.7010E+00 6.7540E-01 8.6230E-01 1.9510E+01 7.1160E+00

1.2600E+00 1.4470E-01 2.9460E-02 3.4500E+00 5.8590E+00 1.3940E-01 5.0570E-01

6.6780E-01 2.5960E-01 1.2830E-02 5.0120E-01 1.4700E+00 3.3380E-01 3.1250E-02

3.3330E-01 3.8170E-01 6.5470E-03 8.2970E-02 3.5440E-02 4.2620E-02 3.2760E-02

5.4450E-02 3.0920E-02 1.9770E-02 7.0930E-03 1.9310E-02 1.3250E-02 5.3180E-03

3.7890E-02 3.6770E-02 2.4080E-02 1.5870E-02 1.4190E-02 9.0730E-03 9.5230E-03

6.6230E-03 3.3920E-02 2.1860E-02 2.9260E-02 1.3780E-02 2.6960E-02 1.7780E-02

1.3810E-02 4.4850E-03 1.9990E-02 1.7320E-02 8.6590E-03 4.1420E-03 1.3170E-02

1.6080E-02 8.6080E-03 3.0090E-03 2.5840E-02 2.6920E-02 1.7040E-02 1.0320E-02

3.1850E-02 3.0950E-02 2.0720E-02 7.6320E-03 1.5220E-02 2.3610E-02 1.2660E-02

3.9810E-03 2.1340E-02 2.0790E-02 1.6640E-02 8.7130E-03 2.2800E-02 1.8150E-02

5.5300E-03 2.3060E-02 9.8280E-03 1.1210E-02 5.7830E-03 1.7290E-02 1.6090E-02

1.2230E-02 5.1070E-03 1.0800E-02 3.9420E-03 5.1480E-03 2.9770E-03 8.1530E-03

3.9410E-03 4.1220E-03 4.1500E-03 2.3850E-02 8.6300E-03 6.1310E-03 2.8620E-03

1.1500E-02 7.1730E-03 6.0810E-03 2.5810E-03 1.3850E-02 6.7270E-03 7.1480E-03

5.4730E-03 4.5470E+00 8.5350E-01 7.4310E-01 1.2190E+00 1.0970E+00 8.1290E-01

6.0660E-01 3.9000E+00 5.0030E+00 2.1590E-01 3.3460E-01 2.3920E-01 2.2310E-01

1.0130E-01 1.0800E-01 7.5050E-02 8.1410E-02 2.2210E-01 1.6590E-01 2.0480E-01

1.1420E-01 1.2130E-01 1.5960E-01 8.1190E-02 6.1640E-02 1.2950E-01 1.3530E-01

1.0820E-01 9.4750E-02 1.1730E-01 6.3220E-02 4.6770E-02 1.1410E+00 8.2340E+00

4.3730E+00 7.4020E+00 1.0150E+00 1.4230E-01 8.1600E-01 1.2130E+01 6.8880E+00

1.5160E+00 1.4060E-01 6.7820E-01 4.1990E+00 2.2070E+00 1.2810E-01 4.6120E-01

3.4330E-01 1.4700E-01 6.7860E-02 5.9330E-01 8.7740E-01 2.1400E-01 1.0750E-01

3.0970E-01 1.2390E-01 4.1850E-02 3.8750E-02 3.0330E-02 3.4410E-02 3.8280E-02

2.5350E-02 1.5230E-02 5.3190E-03 1.0790E-02 1.1340E-02 6.2850E-03 1.6960E-02

2.3520E-02 2.5960E-02 1.9520E-02 5.6730E-03 8.2740E-03 7.0630E-03 8.6180E-03

9.7500E-03 2.4250E-02 1.5500E-02 2.4610E-02 1.1090E-02 1.6490E-02 1.1310E-02

8.3810E-03 9.8770E-03 1.2220E-02 1.0690E-02 4.7970E-03 4.5770E-03 1.0190E-02

9.9250E-03 5.9550E-03 1.0910E-02 1.6790E-02 1.8730E-02 1.3660E-02 1.0600E-02

2.2860E-02 1.9780E-02 1.5130E-02 3.8750E-03 1.3070E-02 1.5230E-02 9.4280E-03

7.1450E-03 1.4740E-02 1.4730E-02 1.3990E-02 1.3940E-02 1.4260E-02 6.6640E-03

1.2370E-02 1.0820E-02 7.6720E-03 6.5560E-03 1.0640E-02 1.2630E-02 8.4030E-03

6.3590E-03 6.1950E-03 4.6300E-03 3.3580E-03 2.9700E-03 4.3220E-03 3.6790E-03

3.4370E-03 3.8370E-03 1.7880E-02 7.0320E-03 4.2960E-03 1.8890E-03 7.4720E-03

6.4140E-03 3.8410E-03 2.7750E-03 7.2010E-03 6.6560E-03 5.4390E-03 5.6070E-03

2.7390E+00 2.5420E-01 6.8350E-01 8.6080E-01 7.8580E-01 1.5670E-01 8.0380E-01

3.3960E+00 2.1270E+00 1.4130E-01 2.6910E-01 1.2140E-01 4.0840E-02 9.0550E-02

5.8090E-02 1.1460E-02 1.0710E-01 1.4340E-01 1.8790E-01 5.2110E-02 8.1380E-02

1.0780E-01 7.9720E-02 2.2480E-02 6.9130E-02 1.0070E-01 1.0600E-01 5.6320E-02

6.7690E-02 5.4930E-02 3.7890E-02 4.4900E-01 1.5210E+00 6.9910E+00 1.4090E+00

4.5310E+00 5.1330E-02 1.3330E-01 5.7010E-01 6.8590E+00 5.4860E+00 1.3220E+00

6.5800E-02 1.4530E+00 3.2040E+00 2.1950E-02 1.7870E-01 2.8800E-01 2.1220E-01

1.2200E-02 1.0180E-01 5.1350E-01 5.0790E-01 2.9480E-02 1.4940E-01 1.8190E-01

1.5180E-02 3.3450E-02 2.7760E-02 2.0510E-02 2.3640E-02 1.9670E-02 9.2630E-03

3.5460E-03 5.5910E-03 7.8050E-03 5.5460E-03 6.5270E-03 1.3620E-02 1.8740E-02

1.8430E-02 1.5430E-03 5.3060E-03 6.2220E-03 6.6160E-03 1.2830E-03 1.2680E-02

1.5040E-02 2.0400E-02 3.4760E-03 1.0830E-02 1.0300E-02 6.8990E-03 4.4580E-03

7.5530E-03 8.1830E-03 4.8620E-03 1.5350E-03 4.5500E-03 7.2970E-03 7.0530E-03

4.0310E-03 9.1120E-03 1.3360E-02 1.3560E-02 2.5690E-03 1.1560E-02 1.5930E-02

1.5510E-02 7.7380E-04 4.6630E-03 1.0220E-02 1.2080E-02 1.6580E-03 7.4430E-03

1.1210E-02 1.3430E-02 8.2780E-03 8.5100E-03 6.4560E-03 5.2150E-03 9.4550E-03

6.5870E-03 3.6890E-03 6.8620E-03 6.7590E-03 6.1930E-03 5.5410E-03 2.7620E-03

4.4450E-03 2.7960E-03 1.4300E-03 1.6280E-03 3.2340E-03 2.9940E-03 2.3260E-03

1.1920E-02 4.9900E-03 2.6260E-03 1.1960E-03 4.4150E-03 4.5040E-03 3.0120E-03

1.7370E-03 2.8320E-03 5.5430E-03 4.7370E-03 3.4910E-03 6.9690E-02 2.7010E-01

4.8340E-01 4.7210E-01 5.5360E-02 1.3540E-01 7.3350E-01 2.3170E+00 4.0670E-02

1.7980E-01 4.4340E-02 1.2010E-02 5.1710E-02 3.0760E-02 4.9020E-04 1.8550E-02

1.0370E-01 1.0220E-01 1.5470E-02 5.1910E-02 3.7560E-02 5.5560E-02 4.4210E-03

2.7950E-02 5.1640E-02 6.5120E-02 2.7590E-02 2.4030E-02 3.9640E-02 1.7400E-02

1.2140E-01 6.7460E-01 1.0150E+00 4.5230E+00 1.4130E+00 2.3260E-02 2.4390E-02

8.6570E-02 3.2910E-01 3.1090E+00 3.6390E+00 2.1410E-02 7.2370E-02 2.2680E+00

3.0820E-03 3.3480E-02 1.6300E-01 1.5040E-01 5.3610E-03 7.0590E-03 9.9290E-02

4.5240E-01 7.2010E-03 4.3900E-02 1.2930E-01 3.4810E-03 1.8120E-02 1.9500E-02

7.3460E-03 1.1130E-02 1.1010E-02 4.1460E-03 1.7730E-03 2.3470E-03 3.8930E-03

3.2320E-03 1.8730E-03 6.5160E-03 8.8800E-03 1.1380E-02 1.9350E-04 2.1700E-03

4.1360E-03 3.2570E-03 1.4540E-05 2.1470E-03 1.2480E-02 1.0060E-02 7.2830E-04

4.6700E-03 7.0220E-03 3.3380E-03 1.6200E-03 3.7030E-03 3.9860E-03 3.2190E-03

4.8710E-04 1.4360E-03 3.5150E-03 4.7790E-03 1.1220E-03 4.1180E-03 6.1980E-03

8.5950E-03 3.6140E-04 3.7350E-03 9.2660E-03 9.4240E-03 1.1800E-04 1.0570E-03

4.2120E-03 8.4810E-03 1.7090E-04 2.4270E-03 6.3060E-03 7.9650E-03 3.9320E-03

3.6950E-03 3.9950E-03 1.6260E-03 5.2270E-03 4.5560E-03 1.0640E-03 3.5910E-03

2.2760E-03 3.7630E-03 3.0480E-03 9.0780E-04 2.6150E-03 1.9250E-03 2.7050E-04

3.7450E-04 1.8800E-03 1.8900E-03 9.4750E-04 5.9600E-03 2.5930E-03 1.2220E-03

5.9060E-04 2.0620E-03 2.1390E-03 1.9990E-03 6.3340E-04 7.7510E-04 3.0130E-03

3.1310E-03 1.3830E-03 8.8040E+00 2.3570E+00 6.5490E-01 2.5320E+00 8.7200E-01

1.6670E-01 1.8530E-02 1.1920E+00 3.2100E-01 1.0980E-01 6.0370E-01 1.1130E-01

2.9380E-02 1.0480E+00 4.1840E-01 8.6680E-02 1.0550E-02 9.8470E-01 3.2900E-01

9.1180E-02 1.0900E-02 6.1260E-01 3.0590E-01 8.5810E-02 1.0870E-02 3.2980E-01

2.4140E-01 8.7970E-02 2.4060E-02 8.5460E-01 4.5170E-01 1.6250E-01 5.3330E-02

1.3760E-02 8.6530E-01 4.4100E-01 1.9360E-01 7.0750E-02 2.1130E-02 4.9130E-03

3.9320E-01 1.6040E-01 3.4320E-02 7.5360E+00 2.8220E-01 7.2630E-02 1.1310E-02

3.9080E+00 6.1810E-01 9.0300E-02 1.5030E-02 4.0960E-01 1.5440E-01 2.1200E-02

7.4460E-01 2.7950E-01 1.0220E-01 3.9790E-02 8.4790E-02 3.6550E-02 1.6460E-02

2.6870E-01 3.5850E-01 2.2100E-01 3.5370E-02 3.0320E+00 3.6180E-01 4.8570E-02

7.1400E-03 1.8250E-01 9.6190E-02 2.3640E-02 3.4420E-03 3.1100E-01 2.0070E-01

3.8960E-02 4.2910E-03 1.6870E+00 4.0770E-02 8.0450E-03 1.0790E-03 7.6510E-01

2.7030E-02 6.2010E-03 1.5150E-03 8.6880E-01 1.2350E-01 1.5980E-02 2.4320E-03

1.3620E+00 1.6370E-01 2.3420E-02 3.3950E-03 2.8110E+00 3.1430E-01 1.7750E-02

2.4130E-03 6.6140E-01 1.1290E-01 2.4790E-02 3.4730E-03 2.7930E-01 1.0190E-01

2.6000E-02 3.1250E-03 3.1110E-02 1.2860E-02 2.6820E-03 2.5000E-01 3.3680E-02

1.1650E-02 2.3830E-03 5.5840E-02 2.1180E-02 7.3800E-03 1.6810E-03 9.7540E-02

1.8070E-02 4.3890E-03 7.8410E-04 7.8900E-02 2.7860E-02 8.1140E-03 1.3120E-03

3.0110E-02 8.8010E-03 4.9730E-03 8.6270E-04 6.5810E-02 8.6950E-03 2.1150E-03

3.6120E-04 1.6410E-01 3.0020E-02 5.5290E-03 9.2550E-04 7.6010E+00 2.2790E+00

1.0720E+00 1.0300E+00 6.6250E-01 1.8130E-01 6.1110E-01 5.4020E-01 1.5540E-01

2.7360E-01 2.6430E-01 5.8580E-02 3.0170E-01 5.3950E-01 4.6550E-01 1.0420E-01

2.9840E-01 6.0210E-01 3.0200E-01 1.0360E-01 2.3070E-01 3.5040E-01 2.7400E-01

1.0070E-01 1.8600E-01 2.5210E-01 1.4460E-01 6.7070E-02 2.9790E-01 5.8480E-01

3.4250E-01 1.5480E-01 5.9040E-02 3.2560E-01 3.3100E-01 2.9210E-01 1.9680E-01

9.8960E-02 3.4020E-02 2.1200E-01 1.4940E-01 1.0800E-01 1.1190E+00 4.9410E+00

1.9210E-01 6.9060E-02 6.1800E-01 2.3550E+00 6.2540E-01 9.8710E-02 2.4240E-01

1.3440E-01 9.1610E-02 2.7950E-01 3.5560E-01 2.1140E-01 8.6280E-02 5.3560E-02

4.1360E-02 1.5570E-02 2.1490E-01 2.7370E-01 8.9590E-02 1.2840E-01 1.5330E-01

2.1240E+00 4.0080E-01 5.5920E-02 6.6450E-02 1.5550E-01 9.0320E-02 2.7510E-02

1.1120E-01 3.6900E-01 2.1330E-01 4.6450E-02 2.3000E-01 1.1190E+00 3.1520E-02

7.9270E-03 1.1220E-01 5.0170E-01 2.1020E-02 5.0160E-03 1.2340E-01 5.3900E-01

1.2840E-01 1.7740E-02 7.2150E-02 9.6690E-01 1.7850E-01 2.7010E-02 3.1340E-01

1.8200E+00 3.6870E-01 2.0020E-02 7.0130E-02 4.3760E-01 1.0610E-01 2.8700E-02

7.5370E-02 1.2940E-01 9.2870E-02 3.0780E-02 1.9210E-02 1.0970E-02 7.1410E-03

5.9350E-02 1.4950E-01 1.9200E-02 1.0170E-02 2.1180E-02 2.5860E-02 1.4260E-02

7.5620E-03 2.7660E-02 5.1970E-02 1.2990E-02 4.0080E-03 2.3440E-02 3.7730E-02

2.2560E-02 9.2300E-03 2.4090E-02 6.3960E-03 2.4560E-03 2.8540E-03 1.5470E-02

3.7960E-02 6.2050E-03 1.9600E-03 3.0020E-02 9.6160E-02 2.8250E-02 6.0400E-03

5.8530E+00 3.5930E-01 8.2100E-01 6.0930E-01 4.3600E-01 3.1130E-01 4.2740E-01

2.4530E-01 1.1700E-01 2.0880E-01 1.2170E-01 1.8530E-02 3.5680E-01 3.3210E-01

3.8880E-01 7.7340E-02 2.7700E-01 4.4910E-01 2.4270E-01 5.0980E-02 2.2210E-01

2.4820E-01 2.3040E-01 1.0650E-01 1.8000E-01 1.6770E-01 8.5520E-02 1.0630E-01

2.7640E-01 3.7550E-01 2.6580E-01 1.1210E-01 7.4410E-02 2.2890E-01 2.1720E-01

1.9030E-01 1.5500E-01 9.0650E-02 9.5030E-02 1.3420E-01 1.2220E-01 1.6320E-01

1.2290E+00 3.2250E+00 1.2460E-01 9.0300E-02 6.2540E-01 1.5790E+00 4.8100E-01

1.2080E-01 1.3750E-01 9.3220E-02 1.0220E-01 2.1140E-01 2.2820E-01 1.5770E-01

3.4060E-02 3.1620E-02 1.6270E-02 1.6120E-01 1.5870E-01 1.2040E-01 8.9700E-02

2.6160E-02 1.4150E-01 1.6270E+00 3.1590E-01 9.8250E-03 6.1570E-02 1.0670E-01

7.6830E-02 4.3300E-03 1.2290E-01 2.5090E-01 1.7700E-01 2.4790E-02 2.6790E-01

7.2760E-01 2.1030E-02 1.5200E-02 1.2640E-01 3.2460E-01 1.3680E-02 1.5980E-02

1.2840E-01 3.6360E-01 9.8520E-02 1.3090E-02 6.4970E-02 7.1400E-01 1.4130E-01

1.7750E-02 3.6870E-01 1.2270E+00 2.7840E-01 1.6230E-02 5.5580E-02 3.2250E-01

8.7500E-02 1.0800E-02 6.9400E-02 8.5940E-02 8.0200E-02 1.0320E-02 1.0690E-02

6.9820E-03 1.8440E-02 4.8750E-02 9.9750E-02 1.1650E-02 7.3800E-03 1.4260E-02

1.8530E-02 1.1480E-02 8.0140E-03 2.2990E-02 3.3010E-02 8.4610E-03 5.5400E-03

1.8570E-02 2.6210E-02 1.9390E-02 1.8070E-02 3.6620E-03 2.9800E-03 2.1390E-03

3.9670E-03 1.3780E-02 2.4400E-02 4.0450E-03 5.5290E-03 2.8240E-02 6.4630E-02

2.1940E-02 6.8160E-02 3.8200E-01 6.1820E-01 3.9440E-01 1.5570E-01 2.4470E-01

2.5660E-01 4.8200E-02 1.1160E-01 1.3840E-01 2.3540E-03 1.9610E-02 2.7790E-01

4.3980E-01 9.7480E-03 9.9820E-02 2.4150E-01 3.6630E-01 3.3970E-03 6.3400E-02

1.8720E-01 2.3840E-01 4.6710E-02 1.1400E-01 1.2530E-01 8.6440E-02 3.0840E-02

1.1600E-01 1.9620E-01 2.4090E-01 1.7070E-01 1.1820E-02 6.5270E-02 1.5010E-01

1.7830E-01 1.4850E-01 8.2040E-02 3.1360E-02 1.0340E-01 9.9030E-02 3.1950E-02

1.8530E-01 9.3600E-01 1.9460E+00 1.5040E-02 9.8710E-02 4.8100E-01 1.2540E+00

4.7060E-02 1.2000E-01 6.6990E-02 3.9790E-02 8.6270E-02 1.5770E-01 1.8260E-01

2.0650E-02 1.8870E-02 1.4060E-02 1.0740E-01 6.9670E-02 1.4280E-01 3.3410E-02

3.4040E-03 2.8570E-02 1.1240E-01 1.2630E+00 6.2940E-04 1.1100E-02 4.9720E-02

1.0840E-01 3.0760E-04 4.7830E-03 9.4510E-02 2.7040E-01 3.4440E-03 3.0060E-02

2.0480E-01 4.5600E-01 3.3740E-03 1.6730E-02 9.6100E-02 2.0370E-01 2.4320E-03

1.7730E-02 9.8510E-02 2.8570E-01 1.5510E-03 1.4450E-02 5.2000E-02 5.5430E-01

2.4120E-03 2.0020E-02 2.7920E-01 9.6000E-01 1.2930E-03 1.8550E-02 4.6310E-02

2.5510E-01 8.9310E-05 1.2750E-02 5.6460E-02 9.4930E-02 4.6620E-03 9.0320E-03

4.9690E-03 5.6390E-03 1.8210E-02 3.6080E-02 5.9140E-02 1.6810E-03 7.5620E-03

1.1470E-02 1.3710E-02 2.0530E-03 8.4420E-03 1.7260E-02 2.0570E-02 5.4920E-04

6.2090E-03 1.5410E-02 2.4290E-02 1.2040E-02 1.6300E-03 3.2510E-03 9.7310E-04

9.7100E-04 4.2430E-03 1.0390E-02 1.5190E-02 9.2540E-04 6.0400E-03 2.1950E-02

5.1320E-02 2.6200E+00 8.9840E-01 4.1170E-01 8.9220E-01 4.2040E-01 6.2170E-02

2.6380E-01 1.1610E-01 2.5980E-02 5.1350E-01 2.7190E-01 1.2380E-01 3.3960E-02

3.1780E-01 1.7340E-01 8.5020E-02 3.9610E-02 4.2450E-01 2.4190E-01 1.0970E-01

4.0080E-02 3.9140E-01 3.3800E-01 1.9150E-01 6.7980E-02 2.9090E+00 1.7340E+00

5.9520E-01 1.8160E-01 5.2980E-02 5.9870E+00 2.1250E+00 6.8700E-01 2.1370E-01

7.1900E-02 2.4760E-02 2.5800E+00 4.2650E-01 7.2670E-02 1.7280E+01 3.2690E+00

2.0270E-01 4.0270E-02 2.6670E+01 3.9320E+00 5.9470E-01 2.2740E-01 1.0350E+01

1.1900E-01 3.4260E-02 1.1220E-01 6.2700E-02 3.2410E-02 1.4010E-02 5.2980E-02

3.0090E-02 1.0850E-02 9.4840E-03 1.9340E-02 7.7910E-03 3.5520E-03 1.5490E-01

7.7530E-02 3.3230E-02 9.4950E-03 1.2060E-02 7.3960E-03 3.6280E-03 1.2920E-03

3.4140E-02 1.9330E-02 9.1330E-03 2.6600E-03 1.7160E-01 3.8860E-02 5.4180E-03

1.1120E-03 1.8900E-01 4.7880E-02 1.0410E-02 3.3600E-03 3.0510E-02 1.2940E-02

5.0680E-03 1.4540E-03 5.9080E-02 2.9830E-02 1.2940E-02 4.0320E-03 1.8650E-01

4.7860E-02 1.3780E-02 3.2320E-03 3.0720E-02 1.3860E-02 5.3370E-03 1.3310E-03

2.4600E-02 1.1060E-02 4.6640E-03 1.5490E-03 1.0090E-01 2.1640E-02 1.1670E-02

3.2950E-02 1.8890E-02 8.0280E-03 2.2820E-03 1.2980E-02 7.9800E-03 4.9810E-03

2.9800E-03 4.2290E-02 2.9410E-02 1.4320E-02 4.7550E-03 4.6230E-03 3.1780E-03

1.9040E-03 9.1880E-04 2.3180E-02 7.8060E-03 2.5230E-03 1.3120E-03 4.3430E-03

3.2790E-03 1.8580E-03 7.6570E-04 4.4410E-03 2.2080E-03 1.0710E-03 4.4480E-04

2.1350E+00 4.0700E-01 5.2030E-01 2.5080E-01 2.6070E-01 1.5070E-01 8.7870E-02

6.6370E-02 1.8280E-01 2.2190E-01 1.7060E-01 1.4000E-01 1.4730E-01 1.4000E-01

1.1330E-01 6.5470E-02 1.6430E-01 2.1460E-01 1.6150E-01 1.0960E-01 2.5450E-01

3.3030E-01 1.7440E-01 9.6510E-02 7.9980E-01 1.8460E+00 1.3870E+00 6.6690E-01

1.8950E-01 3.8580E-01 2.9920E+00 2.0990E+00 9.5520E-01 3.2250E-01 8.2760E-02

6.7790E-01 1.3190E+00 3.1320E-01 3.2700E+00 8.5350E+00 3.5990E+00 1.9050E-01

8.9180E-01 1.7590E+01 4.4380E+00 5.2550E-01 2.4750E+00 5.3530E+00 6.2510E-02

5.4560E-02 4.9190E-02 3.5740E-02 2.6470E-02 3.5640E-02 2.0580E-02 1.4250E-02

7.1130E-03 1.0480E-02 9.3620E-03 3.1630E-03 5.7070E-02 6.3410E-02 4.9830E-02

3.6040E-02 5.5810E-03 4.2910E-03 4.6210E-03 3.7870E-03 1.2950E-02 1.3370E-02

1.2360E-02 1.0260E-02 3.8870E-02 8.1340E-02 3.7540E-02 5.0250E-03 4.7870E-02

9.0300E-02 4.2470E-02 7.3720E-03 1.0340E-02 1.3560E-02 8.4480E-03 5.1320E-03

2.2080E-02 2.4160E-02 1.9500E-02 1.3660E-02 2.9020E-02 1.0530E-01 3.9290E-02

1.4930E-02 9.5870E-03 1.3100E-02 9.7500E-03 6.0090E-03 6.6370E-03 1.1650E-02

8.1510E-03 4.9800E-03 3.9730E-02 5.3370E-02 7.5140E-03 1.8880E-02 1.1610E-02

9.8620E-03 6.2570E-03 7.1050E-03 6.7340E-03 4.9030E-03 2.9500E-03 2.9410E-02

1.4650E-02 1.4130E-02 9.8840E-03 2.6920E-03 1.9540E-03 1.6710E-03 1.6410E-03

1.7380E-02 3.7440E-03 4.0770E-03 9.1060E-04 3.2790E-03 1.8350E-03 1.5660E-03

1.0040E-03 1.8620E-03 2.0250E-03 1.3370E-03 8.9970E-04 1.2680E+00 2.2500E-01

2.8260E-01 1.8110E-01 6.9180E-02 8.2090E-02 5.1910E-02 4.9720E-02 1.0240E-01

1.7380E-01 1.5210E-01 6.0160E-02 9.4780E-02 8.2610E-02 7.4560E-02 5.6030E-02

1.0890E-01 1.4950E-01 1.2830E-01 1.5150E-01 1.7440E-01 1.9440E-01 7.1420E-02

1.9850E-01 9.1010E-01 9.9190E-01 8.4750E-01 5.0540E-01 1.0110E-01 2.4590E-01

1.4260E+00 1.5230E+00 9.1980E-01 3.3580E-01 1.3550E-01 6.7820E-01 7.1820E-01

2.0270E-01 3.5990E+00 4.0770E+00 2.5080E+00 2.9470E-01 7.0970E-01 1.1250E+01

3.2990E+00 3.6470E-01 2.7450E+00 2.1180E+00 2.3580E-02 2.9500E-02 3.4240E-02

2.3320E-02 2.0140E-02 1.7130E-02 9.6800E-03 4.7420E-03 5.8180E-03 5.9360E-03

3.5840E-03 1.5750E-02 3.4360E-02 4.6340E-02 4.1130E-02 1.5200E-03 3.5520E-03

3.1430E-03 3.9730E-03 3.0840E-03 7.8720E-03 1.0310E-02 1.1370E-02 5.4180E-03

3.7520E-02 4.0300E-02 2.5260E-02 1.0420E-02 4.2460E-02 4.5100E-02 2.7370E-02

3.2130E-03 6.2320E-03 9.3510E-03 6.1930E-03 6.2130E-03 1.3680E-02 1.7160E-02

1.5880E-02 7.8710E-03 1.8620E-02 6.9570E-02 2.9630E-02 2.2490E-03 6.2800E-03

9.0340E-03 8.0640E-03 1.8080E-03 4.1960E-03 8.0710E-03 6.8660E-03 1.8470E-02

2.9060E-02 1.9560E-02 8.0270E-03 9.8610E-03 8.4350E-03 4.7500E-03 3.9290E-03

4.1210E-03 3.6900E-03 2.7200E-03 1.4320E-02 1.4130E-02 1.0930E-02 6.0030E-03

1.1960E-03 1.3570E-03 1.5310E-03 1.2160E-03 1.1590E-02 2.0250E-03 2.3350E-03

1.4620E-03 1.8590E-03 1.5660E-03 1.1110E-03 5.8770E-04 7.6230E-04 1.0450E-03

1.3780E-03 8.9760E-04 6.6310E-02 2.0420E-01 7.4540E-02 2.3460E-02 5.2790E-02

2.5350E-02 4.0800E-04 5.4690E-02 7.5090E-02 1.0870E-01 2.1890E-02 3.7160E-02

5.3650E-02 4.3380E-02 1.0950E-02 4.7780E-02 7.1070E-02 9.1240E-02 6.7640E-02

9.6490E-02 7.1410E-02 6.6500E-02 5.5950E-02 1.5160E-01 5.2640E-01 6.0710E-01

3.8490E-01 2.9450E-02 6.3190E-02 1.2990E-01 5.6150E-01 8.5380E-01 6.3380E-01

2.8420E-02 1.4320E-01 5.8720E-01 4.0270E-02 1.9050E-01 2.5090E+00 2.4460E+00

1.3550E-01 1.3720E-01 4.2430E-01 7.0380E+00 2.8850E-02 4.6930E-01 2.0830E+00

7.2690E-03 1.6670E-02 1.6140E-02 1.5240E-02 8.6570E-03 1.0470E-02 4.3520E-03

2.3700E-03 2.7060E-03 2.4790E-03 2.4830E-03 1.5350E-03 1.5810E-02 2.3460E-02

2.7980E-02 2.2890E-04 1.3800E-03 2.4580E-03 2.0270E-03 2.0440E-05 3.3470E-03

5.8620E-03 7.0850E-03 1.1120E-03 5.0250E-03 2.5260E-02 2.2860E-02 3.3600E-03

7.3720E-03 2.7360E-02 2.4580E-02 5.5700E-04 2.9640E-03 3.9050E-03 5.0690E-03

8.5830E-04 5.8660E-03 9.2050E-03 1.0530E-02 1.0340E-03 7.7910E-03 1.2030E-02

4.2010E-02 1.4730E-04 2.3620E-03 4.3510E-03 5.9520E-03 2.6050E-04 1.6580E-03

2.9100E-03 5.6410E-03 8.6470E-03 7.7280E-03 1.7170E-02 2.2820E-03 6.2570E-03

4.7500E-03 2.2470E-03 1.8070E-03 1.8240E-03 1.9200E-03 1.6800E-03 4.7550E-03

9.8840E-03 6.0030E-03 2.0510E-03 3.3800E-04 8.7910E-04 7.8780E-04 6.4620E-04

5.7950E-03 9.7800E-04 7.6740E-04 1.1640E-03 7.6570E-04 1.0040E-03 5.8770E-04

2.0450E-04 2.2690E-04 5.5180E-04 5.8860E-04 6.7330E-04 1.4720E+00 5.3480E-01

3.6360E+00 2.5960E-01 1.1520E-01 5.7730E-02 3.2060E-02 1.7300E-02 9.3460E-03

4.4080E-01 2.1660E-01 9.7310E-02 4.1490E-02 9.8130E-02 6.8010E-02 3.7100E-02

1.7090E-02 6.9230E-01 5.3140E-01 2.8670E-01 9.8550E-02 5.9240E-01 4.7650E-01

2.7550E-01 1.3840E-01 5.4350E-02 5.2680E-01 4.0420E-01 2.6600E-01 1.5000E-01

7.0510E-02 2.4980E-02 4.1290E-01 2.5410E-01 8.5540E-02 2.8120E+00 9.2870E-01

3.1200E-01 1.1390E-01 1.4980E+00 1.1260E+00 6.2020E-01 2.4180E-01 5.3290E+00

2.3320E+00 5.5600E-02 3.6260E-01 1.5730E-01 6.0240E-02 1.9850E-02 2.6420E-01

1.8360E-01 1.1150E-01 3.8820E-01 4.1930E-01 2.2440E-01 5.6610E-02 4.4390E-01

1.9190E-01 7.1380E-02 2.1630E-02 7.8150E-02 4.2430E-02 2.0620E-02 8.2180E-03

8.2650E-02 3.9160E-02 1.5630E-02 4.4060E-03 6.3580E-01 1.6700E-01 3.1510E-02

5.4460E-03 1.4210E+00 3.3870E-01 4.9370E-02 5.6850E-03 6.9840E-02 3.1450E-02

1.2440E-02 4.0880E-03 1.1890E-01 5.6170E-02 2.3590E-02 8.3980E-03 3.5870E-02

2.3160E-02 1.3030E-02 6.2250E-03 1.0480E-02 6.5200E-03 4.3630E-03 3.0450E-03

8.9120E-03 4.5150E-03 2.0290E-03 7.4340E-04 1.3260E+00 5.7770E-01 1.4590E-02

7.0770E-01 1.8720E-01 3.9240E-02 9.6030E-03 1.2640E-01 1.0090E-01 5.9480E-02

2.6240E-02 8.6210E-01 2.3300E-01 5.9680E-02 2.1420E-02 2.0660E-01 8.8720E-02

3.3780E-02 1.1370E-02 2.6640E-01 1.5840E-01 8.2180E-02 1.5570E-02 2.4850E-01

9.3620E-02 4.4220E-02 2.1840E-02 6.6200E-02 2.9700E-02 1.1360E-02 3.3290E-03

7.4030E-01 2.5950E-01 2.3110E+00 1.0380E-01 1.2090E-02 2.5800E-02 2.3990E-02

1.6220E-02 9.0530E-02 1.9920E-01 1.6120E-01 8.9400E-02 3.8190E-02 3.9800E-02

4.0460E-02 3.6980E-02 4.2780E-01 3.2420E-01 2.7160E-01 1.6550E-01 2.6700E-01

2.5670E-01 2.3940E-01 1.9730E-01 1.1090E-01 2.8790E-01 1.3820E-01 1.3600E-01

1.5980E-01 1.4940E-01 8.9500E-02 2.1650E-01 9.7680E-02 1.8640E-01 3.7340E-01

1.4020E+00 7.8750E-01 2.1350E-01 8.9730E-01 3.1840E-01 4.8950E-01 6.1850E-01

2.3320E+00 7.1920E-01 2.0930E+00 5.6660E-02 1.5270E-01 1.2330E-01 6.7180E-02

1.8360E-01 1.5160E-01 3.7770E-02 2.5880E-01 2.2430E-01 1.0200E-01 1.5020E-01

3.6980E-02 1.9160E-01 1.6690E-01 9.0360E-02 1.5410E-02 3.0090E-02 3.0220E-02

2.3860E-02 4.6150E-03 3.4400E-02 3.4290E-02 2.1230E-02 2.9870E-02 3.1980E-01

1.7300E-01 3.7960E-02 2.4230E-02 7.3710E-01 3.8120E-01 6.7180E-02 1.2640E-02

2.8330E-02 2.3630E-02 1.3940E-02 1.6820E-02 4.9190E-02 4.4330E-02 2.7720E-02

1.6220E-02 1.2800E-02 1.2440E-02 1.0720E-02 3.7650E-03 5.5420E-03 4.4140E-03

2.5550E-03 1.2690E-03 3.5840E-03 3.4980E-03 2.4490E-03 5.7770E-01 1.8410E-01

5.1760E-01 3.5410E-02 3.6160E-01 1.9220E-01 3.9800E-02 8.3890E-02 2.9150E-02

4.2400E-02 5.3270E-02 4.9340E-02 4.5780E-01 2.3490E-01 4.2210E-02 1.5730E-02

9.2050E-02 7.8570E-02 4.0190E-02 1.7760E-01 8.2180E-02 3.0960E-02 5.7650E-02

4.7880E-02 1.3770E-01 7.1060E-02 1.5440E-02 1.1810E-02 2.6140E-02 2.2230E-02

1.3530E-02 1.1490E-01 1.0370E-01 1.1180E+00 4.0090E-03 5.9800E-03 1.1980E-02

1.6990E-02 2.5120E-02 4.8840E-02 9.3450E-02 1.0420E-01 6.2990E-03 2.1790E-02

2.6210E-02 2.3770E-02 1.0070E-01 2.1170E-01 1.5950E-01 7.7740E-02 6.3520E-02

1.6390E-01 1.5650E-01 1.1140E-01 5.5910E-02 8.8450E-03 1.4480E-01 1.4760E-01

1.0250E-01 5.4690E-02 2.1280E-02 3.9560E-02 1.4990E-01 6.1410E-02 1.4490E-01

1.6960E-01 5.6760E-01 5.0510E-01 9.4090E-02 5.4780E-01 3.8420E-01 1.3540E-01

5.5600E-02 2.0930E+00 4.2330E-01 8.6260E-03 3.3000E-02 7.3600E-02 8.4230E-02

1.1150E-01 3.7770E-02 3.6760E-02 1.2940E-01 5.6600E-02 1.4850E-01 3.6220E-02

4.9670E-03 2.1360E-02 8.5600E-02 1.3100E-01 1.5440E-03 8.9470E-03 1.7060E-02

2.2240E-02 5.1020E-05 2.7870E-03 1.5530E-02 2.8900E-02 5.7170E-03 1.7750E-02

1.3220E-01 1.2510E-01 6.6730E-03 1.2930E-02 2.9530E-01 2.9000E-01 1.6740E-03

7.5390E-03 1.4420E-02 1.5630E-02 2.3010E-03 9.6930E-03 2.4140E-02 3.2920E-02

3.8160E-03 8.7790E-03 8.0690E-03 5.4260E-03 2.0210E-03 1.5040E-03 2.0740E-03

2.5280E-03 1.2750E-04 7.3680E-04 1.8380E-03 2.6970E-03 1.4590E-02 5.1750E-01

1.0750E-01 1.1830E-02 1.7450E-02 1.4590E-01 1.3940E-01 1.3250E-02 4.8860E-02

3.2300E-02 9.9460E-03 2.9350E-02 1.5170E-02 1.7590E-01 1.7150E-01 3.9560E-03

8.1970E-03 3.9110E-02 6.1660E-02 8.8810E-02 1.5560E-02 5.7650E-02 1.2180E-02

3.0160E-02 1.3540E-02 4.7990E-02 4.4350E-02 9.6880E-04 7.3590E-03 1.3800E-02

1.4730E-02 1.9780E+00 1.7700E-01 2.3660E-01 1.2840E-01 6.9420E-02 3.8190E-02

7.3610E-01 5.5240E-01 4.3190E-01 3.1060E-01 3.3620E-01 2.5590E-01 1.5690E-01

7.1240E-02 1.0820E+00 9.2000E-01 7.2410E-01 2.3860E-01 5.6920E-02 4.9780E-02

2.4790E-02 1.0990E-02 3.9320E-03 9.5460E-02 5.8760E-02 3.3840E-02 1.7910E-02

8.4380E-03 3.1410E-03 5.1670E-02 3.6130E-02 1.6670E-02 4.6310E-01 2.0940E-01

9.4630E-02 3.7990E-02 2.1930E-01 1.5450E-01 9.7980E-02 5.4730E-02 2.7180E-01

1.4120E-01 3.1200E-02 3.0460E-01 1.8290E-01 1.0570E-01 5.6930E-02 3.3010E-01

2.7920E-01 1.6940E-01 4.8630E+00 9.2620E+00 4.0960E+00 2.6870E-01 1.1300E-01

5.6570E-02 2.7460E-02 1.3390E-02 5.3120E-02 2.7820E-02 1.2760E-02 4.5230E-03

7.7050E-02 3.9090E-02 1.7110E-02 5.4930E-03 1.9900E+01 4.7840E+00 6.5520E-01

2.7050E-02 5.2570E-02 3.5870E-02 2.6400E-02 1.4780E-02 3.1190E-02 1.9190E-02

1.2190E-02 7.5080E-03 2.6870E-02 2.0820E-02 1.7120E-02 1.3810E-02 2.7160E-02

1.7060E-02 8.9530E-03 3.7320E-03 9.3040E-03 5.8680E-03 3.6630E-03 2.2390E-03

1.2720E-02 8.5110E-03 4.8980E-03 2.2070E-03 2.5920E-01 1.1440E-01 4.5030E-03

2.8880E-02 1.6280E-02 1.0290E-02 5.3830E-03 2.2880E-02 1.8280E-02 1.3240E-02

8.4370E-03 8.7830E-02 2.8260E-02 1.0240E-02 4.3530E-03 2.0090E-02 9.7390E-03

4.4260E-03 1.9180E-03 5.0380E-02 2.6270E-02 1.5000E-02 3.9570E-03 2.2180E-02

1.1180E-02 6.5510E-03 3.3460E-03 8.9830E-03 5.1780E-03 2.4940E-03 9.2250E-04

1.6220E+00 4.7530E-02 1.0660E-01 9.8220E-02 6.3740E-02 4.3390E-01 4.7390E-01

3.1000E-01 1.4280E-01 1.6150E-01 1.2670E-01 1.3710E-01 1.5820E-01 8.0590E-01

6.4730E-01 4.3870E-01 2.1750E-01 2.2050E-02 3.4110E-02 3.0610E-02 2.1400E-02

1.0600E-02 2.5840E-02 3.2270E-02 3.1670E-02 2.6620E-02 1.8870E-02 9.6930E-03

3.1670E-02 1.5330E-02 2.2480E-02 1.3350E-01 2.0990E-01 1.3690E-01 5.6410E-02

1.1720E-01 8.9430E-02 7.9790E-02 6.4690E-02 1.4120E-01 6.1160E-02 9.3770E-02

1.1860E-01 1.3160E-01 1.0920E-01 7.4050E-02 2.7920E-01 1.8420E-01 5.6250E-02

3.2420E+00 4.0960E+00 1.5150E+00 3.4760E+00 2.0650E-02 5.0090E-02 4.3450E-02

2.6080E-02 8.9220E-03 2.0410E-02 2.0490E-02 1.5660E-02 8.1930E-03 3.0680E-02

3.1380E-02 2.2240E-02 3.8540E-01 1.0170E+01 5.3490E+00 1.0200E+00 3.0520E-02

3.4270E-02 1.7100E-02 4.5830E-03 1.2780E-02 1.5580E-02 1.1690E-02 6.6680E-03

1.5630E-02 1.7280E-02 1.2620E-02 6.8960E-03 1.1640E-02 8.6780E-03 9.1640E-03

8.4540E-03 3.4520E-03 4.2230E-03 3.6920E-03 2.6890E-03 4.9000E-03 4.0700E-03

4.6480E-03 5.2750E-03 1.1440E-01 3.7010E-02 1.0060E-01 1.2410E-02 1.6400E-02

8.9490E-03 2.8040E-03 1.5220E-02 1.1090E-02 8.9120E-03 6.6610E-03 1.0910E-02

4.6020E-02 2.4390E-02 5.4460E-03 3.2120E-03 8.6720E-03 7.6260E-03 4.6120E-03

3.3190E-02 1.5000E-02 5.9610E-03 9.1930E-03 7.8540E-03 1.2290E-02 6.7020E-03

1.9970E-03 3.2000E-03 2.9320E-03 2.9990E-03 2.5880E-03 1.7070E-02 2.3020E-02

4.7560E-02 7.0180E-02 2.7560E-01 1.4250E-01 1.3280E-01 1.2750E-01 2.3480E-02

9.2610E-02 9.5510E-02 7.1300E-02 2.6740E-01 3.0910E-01 2.3530E-01 1.2900E-01

4.3680E-03 1.2580E-02 1.6960E-02 1.5770E-02 9.3690E-03 2.9250E-03 1.2590E-02

1.7390E-02 1.7670E-02 1.4000E-02 7.6720E-03 9.5250E-03 1.8180E-02 7.3490E-03

4.7420E-02 6.3770E-02 9.0560E-02 6.6620E-02 3.9580E-02 5.6950E-02 4.7910E-02

3.1010E-02 3.1200E-02 9.3770E-02 2.3100E-02 4.1200E-02 5.7110E-02 6.3660E-02

5.4790E-02 1.6940E-01 5.6250E-02 3.3350E-02 1.6210E+00 2.6870E-01 3.4890E+00

7.9970E-01 6.6300E-03 1.0230E-02 2.2610E-02 3.0660E-02 4.6770E-04 5.3460E-03

1.1390E-02 1.5540E-02 1.2720E-04 4.9360E-03 1.5550E-02 2.5630E-02 4.7060E-03

2.7780E-01 4.1510E+00 4.0320E+00 2.0600E-02 7.6660E-03 8.3930E-03 6.5800E-03

6.0840E-03 5.2750E-03 6.1530E-03 5.8460E-03 9.9200E-03 5.5820E-03 5.2070E-03

5.5020E-03 1.8560E-03 6.7700E-03 6.2690E-03 4.0730E-03 1.2860E-03 1.6300E-03

2.0130E-03 2.0870E-03 4.1010E-04 2.8770E-03 3.3360E-03 2.8230E-03 4.5020E-03

1.0060E-01 2.0900E-02 7.3710E-03 3.8300E-03 5.1000E-03 3.9860E-03 6.7810E-03

6.5310E-03 4.7780E-03 2.8540E-03 5.8740E-03 3.7970E-03 1.7470E-02 1.6270E-02

8.0640E-04 1.6860E-03 4.0290E-03 5.5300E-03 1.6580E-02 3.9560E-03 9.1930E-03

1.9240E-03 4.5680E-03 2.4920E-03 4.0510E-03 3.3100E-03 3.7280E-04 1.9340E-03

2.0400E-03 1.5110E-03 5.3870E+00 3.8510E-01 3.8490E-02 7.7960E-01 3.5330E-01

9.1020E-02 8.8020E-03 2.0170E+00 7.4100E-01 2.9690E-01 2.9540E-02 9.5950E-02

5.1440E-01 8.1560E-02 6.6480E-04 9.5980E-02 6.7210E-02 2.2540E-02 6.1760E-03

8.3330E-04 1.7680E-01 9.3660E-02 4.1100E-02 1.4010E-02 3.4250E-03 4.2080E-04

2.2140E-01 5.6490E-02 7.4040E-03 3.5070E-01 9.5030E-02 2.3090E-02 4.0770E-03

3.6850E-01 1.2410E-01 3.2200E-02 6.5370E-03 1.0800E-01 4.8280E-02 5.9940E-03

1.5320E+00 3.7920E-01 1.0230E-01 1.5490E-02 1.8660E-01 2.9230E-02 4.8900E-03

1.7420E-02 3.7050E-02 2.1850E-02 2.0240E-03 1.3570E+01 8.9750E-01 2.2320E-02

2.6480E-03 2.3370E+01 2.0580E+00 8.1310E-02 1.2850E-03 3.0200E+01 2.7360E+00

1.2260E-01 3.7160E-03 1.9150E-02 4.7980E-03 9.6420E-04 1.2220E-04 4.0540E-02

9.7280E-03 7.6030E-04 8.2370E-05 4.9480E-02 1.6830E-02 3.5360E-03 1.8210E-04

6.2610E+00 2.5830E-01 6.0150E-03 5.7170E-04 1.3540E-01 4.3170E-02 9.8210E-03

1.2260E-03 6.8410E-01 8.3270E-02 1.7410E-02 2.9440E-03 2.0970E+00 2.0490E-01

2.3630E-02 3.3530E-03 9.3070E-03 8.1880E-04 4.2100E-05 2.0460E-02 5.6500E-03

7.9170E-04 5.6370E-05 2.8380E-02 7.1210E-03 1.2880E-03 1.5340E-04 4.5840E-02

8.1900E-03 8.6340E-04 2.1150E-04 1.2200E-01 1.8600E-02 2.3180E-03 2.5710E-04

6.5040E-03 4.6670E-03 2.2250E-03 4.8730E-04 2.3030E-02 3.8820E-03 1.0120E-03

2.2130E-05 4.4820E-02 1.0010E-02 1.6050E-03 1.6600E-04 9.9600E+00 5.0970E-01

3.8500E-01 4.7690E-01 3.0060E-01 9.9390E-02 7.1310E-01 1.5810E+00 1.2270E+00

3.3320E-01 2.4790E-01 6.7660E-01 3.8840E-01 8.9920E-02 5.9420E-02 9.2220E-02

4.8960E-02 2.1150E-02 8.5250E-03 8.6280E-02 6.8690E-02 5.9520E-02 4.0250E-02

2.0210E-02 6.7370E-03 1.1220E-01 9.4710E-02 3.7760E-02 1.5810E-01 1.6150E-01

6.5690E-02 2.0060E-02 1.5740E-01 1.6830E-01 9.7770E-02 3.2230E-02 7.7060E-02

3.4800E-02 2.7590E-02 5.3170E-01 9.5230E-01 4.2240E-01 1.0720E-01 9.6380E-02

7.7280E-02 1.6010E-02 1.4930E-02 2.9860E-02 9.6180E-03 1.2760E-02 1.5610E+00

9.6930E+00 1.1020E+00 2.4690E-02 2.0400E+00 1.8110E+01 2.5460E+00 9.5840E-02

3.1960E-01 2.5520E+01 3.4680E+00 1.4280E-01 8.2930E-03 8.7440E-03 3.5100E-03

9.0670E-04 1.7190E-02 1.6950E-02 8.9190E-03 7.3410E-04 2.1280E-02 2.1090E-02

1.3610E-02 4.0340E-03 5.4300E-01 4.7300E+00 3.1790E-01 6.7710E-03 5.5560E-02

6.1550E-02 3.4850E-02 1.0540E-02 1.1280E-01 4.6690E-01 7.7050E-02 1.8610E-02

2.0320E-01 1.5490E+00 2.2990E-01 2.5980E-02 4.3770E-03 3.8480E-03 4.9090E-04

9.3060E-03 8.4260E-03 4.5640E-03 8.0480E-04 9.8560E-03 1.4130E-02 6.2990E-03

1.3870E-03 1.7050E-02 2.2080E-02 7.4190E-03 6.7190E-04 2.3500E-02 7.6290E-02

1.9600E-02 2.5780E-03 5.5750E-03 3.4080E-03 1.7250E-03 1.1920E-03 8.3720E-03

1.2240E-02 2.2470E-03 1.0980E-03 1.4410E-02 2.3180E-02 9.1580E-03 1.7540E-03

1.0320E+01 1.4970E-01 3.7970E-01 3.5910E-01 2.5710E-01 1.9070E-01 1.0370E+00

1.5480E+00 1.0670E+00 1.6000E-01 6.1420E-01 4.4000E-01 2.7850E-01 2.6130E-02

5.3370E-02 6.4920E-02 4.2730E-02 1.6570E-02 2.8080E-02 5.8800E-02 5.0900E-02

4.2280E-02 3.4170E-02 2.0050E-02 4.9220E-02 8.6790E-02 6.7890E-02 6.4570E-02

1.2060E-01 1.0740E-01 4.4490E-02 5.6610E-02 1.2580E-01 1.1740E-01 8.0830E-02

4.6880E-02 3.9740E-02 2.9270E-02 1.6560E-01 5.5460E-01 8.0630E-01 3.4550E-01

4.5610E-02 7.4200E-02 3.8300E-02 1.2440E-02 1.9320E-02 1.2830E-02 1.1380E-02

1.0080E-01 1.9300E+00 7.4560E+00 8.4320E-01 4.2880E-02 2.5400E+00 1.3700E+01

1.9670E+00 9.7350E-03 1.0390E+00 2.1280E+01 2.6740E+00 3.1300E-03 6.5720E-03

5.7160E-03 2.4600E-03 5.4050E-03 1.5050E-02 9.7660E-03 6.2860E-03 6.7530E-03

1.7190E-02 1.4570E-02 1.1500E-02 3.0320E-02 6.7750E-01 3.7150E+00 2.4300E-01

1.8100E-02 4.5370E-02 4.2840E-02 2.9100E-02 2.3750E-02 1.1180E-01 3.6220E-01

6.5160E-02 2.3630E-02 2.2930E-01 1.2380E+00 1.8470E-01 1.7620E-03 3.6810E-03

1.8200E-03 3.3260E-03 7.4710E-03 5.2180E-03 3.2330E-03 2.7200E-03 8.8550E-03

9.6920E-03 5.1240E-03 5.1350E-03 1.5730E-02 1.3330E-02 5.1550E-03 3.7400E-03

2.4990E-02 5.6930E-02 1.5850E-02 4.6460E-03 2.2330E-03 1.8120E-03 1.2250E-03

2.9840E-03 6.8000E-03 8.5440E-03 1.6340E-03 3.6730E-03 1.3420E-02 1.5930E-02

7.3900E-03 3.1610E-02 1.8460E-01 3.4930E-01 3.7100E-01 3.4520E-02 4.1780E-01

1.2200E+00 1.8000E+00 5.3720E-02 3.5690E-01 5.3150E-01 3.5190E-01 6.8510E-03

2.7880E-02 4.4130E-02 4.8930E-02 3.3060E-02 4.7690E-03 2.5180E-02 4.5370E-02

4.9620E-02 3.9560E-02 2.1340E-02 1.5750E-02 6.1070E-02 8.6030E-02 2.1300E-02

6.7780E-02 9.9200E-02 7.7550E-02 1.5050E-02 5.9210E-02 1.1010E-01 1.1860E-01

2.3300E-02 4.7390E-02 2.2020E-02 4.3270E-02 2.2520E-01 5.4030E-01 7.7900E-01

1.9200E-02 5.1080E-02 5.6120E-02 9.9540E-03 9.5190E-03 1.9540E-02 5.7610E-03

5.4970E-03 1.1960E-01 1.5260E+00 7.3460E+00 1.2850E-03 9.5840E-02 1.9640E+00

1.2580E+01 1.5890E-03 2.6020E-02 1.5850E+00 1.9300E+01 8.9710E-04 3.4860E-03

5.5420E-03 4.3780E-03 1.1150E-03 6.4500E-03 1.2680E-02 8.9590E-03 1.0870E-03

7.7740E-03 1.5430E-02 1.5720E-02 1.3420E-03 3.6190E-02 5.2390E-01 3.1730E+00

3.7830E-03 2.0130E-02 4.0160E-02 4.4240E-02 4.4050E-03 2.5980E-02 9.3850E-02

3.2640E-01 3.3530E-03 2.5970E-02 1.8470E-01 1.1270E+00 5.3260E-04 2.3050E-03

2.9730E-03 7.9650E-04 3.8610E-03 6.3650E-03 4.3760E-03 5.0820E-04 3.0770E-03

7.6050E-03 9.9240E-03 1.2430E-03 5.9460E-03 1.3020E-02 1.1270E-02 4.5480E-04

4.2560E-03 2.0490E-02 5.6150E-02 3.7170E-03 1.2880E-03 1.9680E-03 9.6080E-04

7.4720E-04 3.4300E-03 5.7640E-03 6.0290E-03 6.2170E-04 4.2040E-03 1.1410E-02

1.6090E-02 4.4480E+00 1.9510E-01 3.6490E-02 1.1210E+00 5.6850E-01 1.8200E-01

3.3340E-02 1.2280E+00 1.2260E+00 3.7880E-01 7.7280E-02 7.8150E-02 5.2930E-02

2.2880E-02 9.6480E-03 3.6280E-03 9.5420E-02 6.6830E-02 4.4240E-02 2.5660E-02

1.2560E-02 4.6380E-03 9.1710E-02 3.6190E-02 1.2210E-02 7.8740E-01 1.3310E-01

3.5970E-02 1.0350E-02 3.5630E-01 1.2230E-01 4.4100E-02 1.5120E-02 2.0460E-01

1.0420E-01 1.7760E-02 1.0240E+00 5.2590E-01 1.5520E-01 4.3640E-02 2.4020E-01

1.0670E-01 3.7970E-02 3.9110E-01 4.6130E-01 2.2850E-01 1.0500E-01 8.8530E+00

1.2850E+00 1.3250E-01 1.1850E-02 8.8870E-01 4.7190E-01 1.1510E-01 1.6550E-02

1.3050E+00 4.7970E-01 1.3900E-01 1.4000E-02 1.5040E-01 2.7190E-02 1.8630E-02

9.8540E-03 1.7250E+01 4.4870E-01 3.7710E-03 8.7120E-04 2.2260E+01 2.6190E+00

1.1010E-01 1.0460E-03 2.4910E+01 2.5390E+00 1.5110E-01 5.5180E-03 6.5630E-01

9.8710E-02 1.0470E-02 1.3040E-03 4.8420E-01 6.6130E-02 1.0690E-02 1.8070E-03

6.2650E-02 2.9820E-02 1.0860E-02 2.1650E-03 4.3860E-02 1.1560E-02 1.7840E-03

7.7530E-01 5.1680E-02 6.4800E-03 1.6590E-03 3.9020E-01 6.6600E-02 9.9210E-03

1.9880E-03 4.6140E-02 1.9110E-02 5.4990E-03 1.2440E-03 4.7620E-02 1.9710E-02

6.3490E-03 1.8080E-03 1.4810E-02 7.8460E-03 4.7740E-03 1.9620E-03 1.8140E-02

8.6940E-03 3.6600E-03 1.2540E-03 3.7580E-02 1.4890E-02 4.8570E-03 1.0880E-03

6.0430E+00 2.4140E-01 3.0770E-01 7.5610E-01 5.3750E-01 2.0370E-01 1.0270E+00

1.2170E+00 7.7390E-01 3.2940E-01 3.6880E-02 5.2960E-02 3.6930E-02 1.9380E-02

7.3710E-03 5.9740E-02 4.7500E-02 3.2870E-02 2.5790E-02 2.0950E-02 1.2460E-02

4.8540E-02 4.0390E-02 2.3100E-02 2.1170E-01 4.3600E-01 9.9120E-02 2.6600E-02

1.2230E-01 1.7890E-01 8.9510E-02 3.9530E-02 1.4040E-01 6.0720E-02 5.9980E-02

5.2590E-01 5.6820E-01 4.1940E-01 1.4980E-01 1.5370E-01 1.0330E-01 5.0870E-02

3.1290E-01 3.1210E-01 2.2730E-01 9.6390E-02 7.0050E-01 5.8910E+00 1.4890E+00

1.5950E-01 3.3910E-01 6.6420E-01 4.4450E-01 1.3410E-01 2.4950E-01 1.5020E+00

8.2840E-01 1.6680E-01 4.2050E-02 1.0090E-01 1.5360E-02 6.5800E-03 2.3840E+00

1.1290E+01 4.9710E-01 3.0640E-03 2.6150E+00 1.4100E+01 3.1320E+00 1.3940E-01

8.3240E-01 1.8030E+01 3.1540E+00 1.8930E-01 9.8640E-02 3.9670E-01 1.0610E-01

1.1950E-02 3.3010E-02 3.4330E-01 7.1580E-02 1.2090E-02 2.4410E-02 2.5750E-02

2.2080E-02 1.2170E-02 2.2360E-02 1.6650E-02 6.7580E-03 1.3580E-01 4.7850E-01

4.8400E-02 5.1210E-03 6.6530E-02 2.3030E-01 6.7720E-02 1.0470E-02 2.2740E-02

1.7290E-02 1.2940E-02 4.6100E-03 1.7100E-02 2.1210E-02 1.6100E-02 6.5090E-03

1.1850E-02 5.9480E-03 3.5820E-03 2.1350E-03 1.0020E-02 7.8590E-03 5.1330E-03

2.3860E-03 1.4870E-02 1.6290E-02 1.0600E-02 4.9970E-03 4.5480E+00 7.9370E-02

4.5840E-01 5.3140E-01 4.6260E-01 5.7550E-01 9.5110E-01 8.1200E-01 4.8360E-01

1.7490E-02 3.3180E-02 3.3260E-02 2.4770E-02 1.2810E-02 3.3390E-02 2.6590E-02

3.3080E-02 2.9330E-02 1.8800E-02 8.2590E-03 2.3710E-02 3.2690E-02 2.7600E-02

6.2690E-02 1.8360E-01 2.7090E-01 6.2080E-02 4.4100E-02 8.9510E-02 1.2090E-01

6.8210E-02 7.8000E-02 6.9200E-02 4.8640E-02 1.5520E-01 4.1940E-01 4.6930E-01

3.2470E-01 9.3200E-02 8.6980E-02 5.0720E-02 2.3470E-01 2.0900E-01 1.7490E-01

9.2970E-02 3.6970E-02 7.9530E-01 4.1840E+00 1.1650E+00 4.5660E-02 3.2250E-01

4.4030E-01 3.7780E-01 9.3140E-03 4.5820E-01 1.0270E+00 6.8190E-01 2.2850E-02

3.4000E-02 6.1120E-02 5.7170E-03 1.8940E-01 2.8880E+00 7.2080E+00 3.4730E-01

1.0940E-01 3.1330E+00 9.3890E+00 2.3670E+00 7.1230E-03 1.0130E+00 1.3230E+01

2.4260E+00 1.0470E-02 1.0610E-01 2.6210E-01 8.1220E-02 6.0990E-03 3.0620E-02

2.5680E-01 5.6980E-02 6.3410E-03 1.8000E-02 1.8630E-02 2.0340E-02 1.0080E-02

1.4850E-02 9.3950E-03 2.0320E-02 1.4790E-01 3.0000E-01 3.2770E-02 9.9050E-03

6.7710E-02 1.5190E-01 5.1860E-02 8.9180E-03 1.5410E-02 1.0670E-02 8.1730E-03

4.4990E-03 1.4010E-02 1.3870E-02 1.3410E-02 8.8840E-03 4.1090E-03 2.9770E-03

1.6630E-03 5.0810E-03 6.1340E-03 4.9890E-03 2.8480E-03 4.8500E-03 1.0570E-02

1.1190E-02 8.4760E-03 1.6250E-02 1.3580E-01 3.5020E-01 5.0980E-01 1.7170E-01

5.8370E-01 6.8980E-01 4.3670E-01 7.6940E-03 1.4690E-02 2.2020E-02 2.2370E-02

1.4000E-02 1.1230E-02 2.5530E-02 2.2950E-02 1.8410E-02 1.3810E-02 7.6900E-03

1.0400E-02 2.1400E-02 2.4180E-02 2.1070E-02 5.9330E-02 1.3540E-01 1.6740E-01

1.5120E-02 3.9530E-02 6.8210E-02 9.2280E-02 3.4050E-02 7.0560E-02 2.5950E-02

4.3640E-02 1.4980E-01 3.2470E-01 3.9430E-01 5.1740E-02 6.2200E-02 3.9890E-02

1.5640E-01 1.3020E-01 1.1100E-01 7.6640E-02 5.0110E-03 4.0190E-02 6.0390E-01

3.4710E+00 3.0920E-03 5.1410E-02 2.5830E-01 4.7810E-01 9.1290E-04 1.0070E-02

3.4980E-01 1.0900E+00 1.5500E-02 1.1060E-02 2.0330E-02 3.5560E-02 6.6330E-03

2.5650E-01 2.2140E+00 4.6130E+00 1.0460E-03 1.3940E-01 2.3670E+00 7.4910E+00

1.9030E-03 6.8350E-03 7.5810E-01 1.0350E+01 1.3030E-03 1.1950E-02 8.1330E-02

2.1220E-01 9.3160E-04 6.5480E-03 2.4340E-02 2.0260E-01 5.8890E-04 6.9900E-03

1.5580E-02 1.9050E-02 3.7910E-03 1.0330E-02 8.7580E-03 3.8610E-03 2.3240E-02

1.1270E-01 1.9420E-01 1.9880E-03 1.0470E-02 5.1870E-02 1.2320E-01 2.8280E-03

8.6660E-03 1.1170E-02 6.1310E-03 1.1530E-03 4.3430E-03 1.1140E-02 1.3890E-02

5.9240E-03 2.5140E-03 2.2760E-03 1.0420E-03 2.3170E-03 3.9830E-03 3.9970E-03

2.4000E-03 1.0880E-03 4.9970E-03 8.4630E-03 8.8530E-03 4.2810E+00 1.7300E-01

1.9540E-02 1.3980E+00 7.0650E-01 2.0810E-01 4.1920E-02 4.7190E-02 3.9230E-02

1.3380E-02 4.0490E-03 1.0120E-03 1.1980E-01 5.9460E-02 2.6980E-02 1.0590E-02

3.3010E-03 6.5970E-04 6.4120E-02 1.5240E-02 4.8050E-03 2.4040E-01 8.0280E-02

2.2600E-02 4.4110E-03 6.8350E-01 1.0510E-01 2.8050E-02 7.7930E-03 1.5830E-01

3.4020E-02 7.9460E-03 1.7050E+00 4.7100E-01 1.0020E-01 1.8960E-02 2.0490E-01

6.2860E-02 9.3010E-03 4.7860E-03 2.8070E-02 5.8030E-03 1.5910E-03 1.3820E+00

2.3020E-01 3.7730E-02 3.4920E-03 2.7970E+00 3.6430E-01 4.2720E-02 4.3610E-03

1.5530E-01 1.0970E-01 3.0370E-02 3.8650E-03 2.4340E-02 1.1340E-02 3.3370E-03

4.7520E-04 6.4150E-02 1.9720E-02 2.8380E-03 4.6090E-04 5.3200E-01 3.5590E-02

5.8090E-03 1.6650E-03 1.1580E-01 4.4970E-02 1.3510E-02 2.3680E-03 1.9230E+01

7.0250E-01 5.4970E-03 8.9570E-04 2.5670E+01 2.3770E+00 9.4020E-02 6.7950E-04

3.1120E+01 2.7150E+00 1.2740E-01 2.7720E-03 3.1670E-02 6.4850E-03 2.1670E-03

7.0460E-02 2.8110E-02 1.0510E-02 2.6330E-03 1.6990E+00 8.6600E-02 1.2490E-02

3.9200E-03 5.3320E-02 1.5620E-02 3.9000E-03 3.6820E-04 1.1080E-01 2.5870E-02

5.4170E-03 9.0690E-04 1.0300E-03 1.1650E-02 3.5230E-03 8.5430E-04 2.4430E-02

8.6270E-03 2.2730E-03 4.9600E-04 6.9880E-02 1.6550E-02 3.2500E-03 5.5240E-04

7.5130E+00 2.2240E-01 7.6570E-01 1.5240E+00 4.5330E-01 1.7700E-01 2.4770E-02

4.8570E-02 2.9370E-02 1.3160E-02 4.4480E-03 4.9290E-02 5.2260E-02 3.9190E-02

2.4470E-02 1.3230E-02 5.5230E-03 2.9500E-02 3.1030E-02 9.6110E-03 1.1340E-01

1.0500E-01 5.2420E-02 1.9420E-02 1.4780E-01 4.2580E-01 8.6720E-02 2.6390E-02

8.2740E-02 6.5980E-02 1.8150E-02 5.6810E-01 8.3120E-01 4.1010E-01 1.0340E-01

1.2040E-01 7.5060E-02 3.5880E-02 3.9880E-03 1.4520E-02 1.2040E-02 2.9950E-03

2.2990E-01 8.4690E-01 2.3020E-01 4.3520E-02 2.3820E-01 2.0010E+00 4.1480E-01

4.9200E-02 9.1650E-02 1.2930E-01 9.6910E-02 3.4490E-02 1.4260E-02 8.7120E-03

6.8260E-03 3.1310E-03 2.8660E-02 2.4700E-02 1.6700E-02 2.5790E-03 7.0950E-02

3.6800E-01 3.4980E-02 5.4360E-03 4.4960E-02 5.2330E-02 3.5280E-02 1.4670E-02

2.0070E+00 1.3750E+01 8.5310E-01 5.8150E-03 2.3710E+00 1.8070E+01 2.9190E+00

1.1490E-01 5.5260E-01 2.3960E+01 3.4350E+00 1.5400E-01 1.6330E-02 1.4090E-02

3.1750E-03 3.7140E-02 3.1820E-02 1.5960E-02 8.2040E-03 2.0060E-01 1.2020E+00

8.8220E-02 1.1350E-02 2.3160E-02 2.3850E-02 1.0080E-02 3.9230E-03 2.5860E-02

6.5920E-02 2.4460E-02 5.9010E-03 8.5860E-04 6.7930E-03 4.7000E-03 1.8670E-03

1.1890E-02 1.0080E-02 6.0050E-03 1.8810E-03 2.0650E-02 3.6370E-02 1.4750E-02

3.4190E-03 6.6520E+00 3.6240E-01 8.8740E-01 1.0200E+00 2.9800E-01 1.1280E-02

2.9190E-02 3.2460E-02 2.2780E-02 1.0410E-02 1.6890E-02 3.1230E-02 3.5730E-02

3.0980E-02 2.1550E-02 1.0750E-02 1.3030E-02 2.4800E-02 1.8170E-02 4.7630E-02

7.9230E-02 7.0400E-02 3.4630E-02 4.0100E-02 1.3490E-01 3.0610E-01 6.8500E-02

4.0650E-02 5.9700E-02 3.3140E-02 1.5260E-01 4.9970E-01 5.5090E-01 3.2700E-01

6.3050E-02 7.4730E-02 4.7220E-02 3.1910E-03 7.1760E-03 1.0690E-02 5.7760E-03

3.7720E-02 2.3020E-01 6.2060E-01 1.8900E-01 2.3120E-02 2.6300E-01 1.5460E+00

3.3150E-01 1.8670E-02 8.1390E-02 9.3830E-02 8.8030E-02 6.6520E-03 8.5710E-03

6.5410E-03 4.5740E-03 9.4640E-03 2.3340E-02 1.3800E-02 1.1500E-02 1.0640E-02

7.8160E-02 2.6790E-01 2.6890E-02 1.3500E-02 3.5280E-02 3.7700E-02 3.1320E-02

1.2310E-01 2.4840E+00 1.0050E+01 6.3950E-01 9.3750E-02 2.9190E+00 1.3530E+01

2.2400E+00 3.7210E-03 1.6110E+00 1.8790E+01 2.6410E+00 8.2590E-03 1.2220E-02

6.3920E-03 1.8610E-02 2.3310E-02 2.2640E-02 9.9280E-03 2.5120E-02 2.2960E-01

8.7970E-01 6.7280E-02 8.9630E-03 1.6540E-02 1.6390E-02 6.9160E-03 5.4170E-03

2.4460E-02 4.7450E-02 2.0300E-02 6.8690E-04 3.7200E-03 4.3910E-03 2.5770E-03

4.9510E-03 8.5110E-03 6.4480E-03 3.9770E-03 5.1250E-03 1.8760E-02 2.4530E-02

1.1740E-02 1.4180E-01 4.5580E-01 7.0550E-01 6.7740E-01 3.7270E-03 1.2980E-02

2.2010E-02 2.4310E-02 1.6080E-02 3.2630E-03 1.5020E-02 2.4490E-02 2.8190E-02

2.4620E-02 1.4310E-02 5.6420E-03 1.2970E-02 2.3020E-02 1.6270E-02 4.8670E-02

6.3190E-02 4.5050E-02 1.1990E-02 4.0590E-02 1.0910E-01 2.5040E-01 1.8690E-02

4.0550E-02 4.0880E-02 3.3410E-02 1.6570E-01 4.1440E-01 5.3420E-01 2.7900E-02

6.4700E-02 4.6200E-02 2.3930E-03 3.4340E-03 6.9270E-03 7.3740E-03 3.4920E-03

4.3510E-02 1.8900E-01 5.8050E-01 2.2270E-03 2.5910E-02 2.0930E-01 1.3850E+00

8.5590E-04 2.1150E-02 7.1630E-02 1.1760E-01 2.1560E-03 6.9270E-03 6.9980E-03

3.6710E-03 2.3150E-03 1.0700E-02 1.8960E-02 1.1600E-02 2.5640E-03 1.1350E-02

6.1200E-02 2.1260E-01 2.3680E-03 1.4670E-02 3.1320E-02 3.9990E-02 3.8400E-03

1.5480E-01 1.9130E+00 7.8980E+00 6.7940E-04 1.1480E-01 2.2400E+00 1.1730E+01

5.2230E-04 4.4840E-03 1.2200E+00 1.6070E+01 4.2180E-03 7.5170E-03 8.4220E-03

7.8680E-03 1.7320E-02 1.7920E-02 1.2760E-02 5.9080E-03 2.6930E-02 1.7850E-01

6.9010E-01 2.4060E-03 9.8870E-03 1.3560E-02 1.0750E-02 9.0680E-04 5.9010E-03

2.0300E-02 4.4440E-02 5.1510E-04 1.8810E-03 3.4170E-03 2.7180E-03 1.7160E-03

5.0310E-03 6.7710E-03 4.3950E-03 1.0170E-03 5.6580E-03 1.5480E-02 2.2960E-02

3.0580E+00 2.6410E-01 1.2570E-01 4.1600E-02 3.0190E-02 1.6350E-02 8.2100E-03

3.4100E-03 3.7440E-02 2.3220E-02 1.3880E-02 8.1860E-03 4.6550E-03 2.1300E-03

5.4170E-02 2.5390E-02 1.8500E-02 3.9670E-01 1.9620E-01 8.3080E-02 2.7580E-02

4.9790E-01 2.4000E-01 1.2440E-01 5.0240E-02 4.8060E-01 6.8350E-02 2.3340E-02

5.7790E-01 2.7640E-01 1.2230E-01 4.8620E-02 5.8820E-01 3.2710E-01 3.7310E-02

7.8830E-02 2.0750E-01 1.0180E-01 5.6160E-02 3.5430E-01 1.5800E-01 4.8220E-02

1.0320E-02 2.3660E-01 1.0410E-01 3.6840E-02 9.0140E-03 2.2390E-01 1.0410E-01

3.7000E-02 8.1740E-03 4.5890E-02 2.4850E-02 1.3910E-02 6.1210E-03 2.2490E+00

4.3790E-01 3.1740E-02 5.7070E-03 2.1190E+00 3.5390E-01 5.5840E-02 1.1700E-02

1.6760E-01 8.7420E-02 3.8320E-02 1.2890E-02 2.8250E+00 4.2920E-01 5.6740E-02

1.0140E-02 2.3660E-01 8.6550E-02 2.9880E-02 9.8990E-03 2.6160E-01 1.0720E-01

4.3450E-02 1.6090E-02 1.2110E+01 2.3590E-01 5.5110E-03 1.6570E+01 3.0510E+00

1.2640E-01 2.1540E-03 2.3580E+01 3.3060E+00 2.7340E-01 1.4640E-02 1.2490E-01

4.7090E-02 1.3510E-02 2.7500E-03 2.5410E-02 1.5160E-02 7.6560E-03 3.0710E-03

3.8630E-02 1.0500E-01 1.7890E-02 8.4720E-03 4.6750E-02 2.5060E-02 1.0120E-02

2.6170E-03 3.0430E-02 1.2280E-02 4.7000E-03 1.3350E-03 4.2030E+00 1.4000E-01

2.2610E-02 2.1110E-02 1.8000E-02 1.1830E-02 5.2460E-03 1.6650E-02 1.6300E-02

1.4620E-02 1.0690E-02 6.2390E-03 2.6370E-03 2.7960E-02 3.3730E-02 1.1930E-02

1.9070E-01 1.6850E-01 1.0590E-01 5.7400E-02 2.2270E-01 1.9870E-01 1.5410E-01

9.3390E-02 1.6180E-01 2.3440E-01 3.3320E-02 2.3000E-01 2.5130E-01 1.8210E-01

1.0560E-01 3.8990E-01 1.1240E-01 2.1210E-01 5.9110E-02 1.2690E-01 1.1280E-01

3.4430E-02 1.0860E-01 1.2940E-01 1.3410E-01 5.6200E-02 6.1120E-02 1.0150E-01

8.4650E-02 4.2560E-02 5.7700E-02 9.1630E-02 8.6500E-02 4.3980E-02 2.4830E-02

2.3360E-02 1.3110E-02 6.7870E-03 4.3770E-01 1.0990E+00 4.7530E-01 3.0970E-02

1.2170E-01 1.3430E+00 3.8120E-01 6.2370E-02 6.5840E-02 6.6270E-02 5.8180E-02

3.9400E-02 1.1600E-01 1.8290E+00 4.8170E-01 6.5740E-02 5.0740E-02 1.1800E-01

7.2610E-02 3.0890E-02 5.8380E-02 1.3280E-01 8.5340E-02 4.4750E-02 2.9130E+00

6.1920E+00 1.6820E-01 3.0500E+00 8.1550E+00 3.4390E+00 1.6190E-01 6.6300E-01

1.5390E+01 3.9890E+00 3.6320E-01 4.7080E-02 4.9030E-02 3.2470E-02 1.2580E-02

1.2160E-02 9.8620E-03 9.1120E-03 7.3120E-03 2.8970E-02 3.7710E-02 5.3740E-02

7.0480E-03 2.5060E-02 1.6690E-02 1.3280E-02 8.3760E-03 9.6370E-03 1.3950E-02

8.2240E-03 4.7750E-03 2.7120E+00 1.0250E-02 1.5350E-02 1.2200E-02 9.8560E-03

6.2060E-03 6.7670E-03 1.0660E-02 9.1800E-03 7.8800E-03 6.4600E-03 3.7880E-03

1.7480E-02 1.7530E-02 1.3730E-02 8.2100E-02 1.1140E-01 1.0360E-01 5.3280E-02

8.2840E-02 1.2660E-01 1.2560E-01 1.0440E-01 5.3790E-02 1.3480E-01 9.7220E-02

8.2710E-02 1.4490E-01 1.5900E-01 1.2610E-01 1.6890E-01 1.8960E-01 1.1790E-01

3.9410E-02 8.1010E-02 6.5520E-02 3.6210E-02 1.1060E-02 9.9110E-02 6.6230E-02

1.0910E-01 8.9540E-03 4.9000E-02 6.3480E-02 7.1810E-02 5.3690E-03 4.9620E-02

5.6100E-02 7.5490E-02 1.3920E-02 1.3100E-02 1.2990E-02 5.3910E-03 3.1710E-02

4.7530E-01 5.2450E-01 3.3030E-01 2.2270E-02 1.0160E-01 8.5830E-01 2.9000E-01

1.8420E-02 4.2710E-02 4.5210E-02 4.6770E-02 2.0020E-02 9.7850E-02 1.1770E+00

3.6730E-01 1.2050E-02 3.8170E-02 7.3860E-02 5.7410E-02 1.6970E-02 3.8350E-02

8.8850E-02 7.0030E-02 4.0090E-01 3.2560E+00 2.5250E+00 1.2630E-01 3.4390E+00

3.8830E+00 2.4210E+00 9.7550E-03 7.3620E-01 9.7960E+00 3.0590E+00 1.3510E-02

3.2480E-02 2.8790E-02 1.9340E-02 4.2080E-03 7.1470E-03 7.2050E-03 7.1080E-03

1.9310E-02 1.5070E-02 2.9790E-02 2.0810E-02 1.0120E-02 1.3280E-02 1.2280E-02

6.5930E-03 2.9520E-03 5.8780E-03 9.5070E-03 6.0450E-03 3.8740E-03 5.7810E-03

7.7350E-03 6.1310E-03 2.9970E-03 3.0920E-03 3.1110E-03 4.9560E-03 5.2200E-03

3.9610E-03 2.0330E-03 9.3810E-03 4.9600E-03 9.9840E-03 2.7500E-02 5.7270E-02

5.7850E-02 3.3770E-02 2.5940E-02 5.8400E-02 7.3410E-02 6.5250E-02 1.8810E-02

3.9520E-02 8.4460E-02 2.4670E-02 5.9770E-02 8.5940E-02 8.5980E-02 4.3760E-02

1.6480E-01 2.9650E-02 1.9700E-02 4.1460E-02 2.4430E-02 2.5460E-02 1.8210E-03

1.0020E-02 6.8640E-02 6.2250E-02 7.6710E-04 8.9290E-03 3.4640E-02 5.2290E-02

5.3700E-05 5.8010E-03 3.5660E-02 5.1760E-02 6.1210E-03 6.7870E-03 5.3900E-03

4.4070E-03 5.7030E-03 3.0970E-02 3.3030E-01 3.1390E-01 4.8340E-03 1.8990E-02

6.7610E-02 5.4470E-01 3.3200E-03 1.6270E-02 2.8420E-02 2.8550E-02 3.9440E-03

1.7710E-02 6.5480E-02 7.4380E-01 3.0530E-03 9.3560E-03 2.5300E-02 5.3050E-02

3.7990E-03 1.3700E-02 2.5740E-02 6.3840E-02 1.8200E-02 6.1990E-01 2.4530E+00

2.1490E-03 1.6190E-01 2.4210E+00 2.3510E+00 4.7710E-03 4.1200E-03 5.1290E-01

6.2800E+00 2.7490E-03 1.2580E-02 1.9340E-02 1.2400E-02 9.6260E-04 3.4170E-03

4.5530E-03 3.8540E-03 9.6560E-03 6.4130E-03 8.0250E-03 1.8400E-02 2.6170E-03

8.3770E-03 6.5930E-03 3.5510E-03 5.1000E-04 2.7270E-03 3.6950E-03 5.2600E-03

4.2160E+00 1.3890E+00 4.5020E-01 1.8030E-01 9.4010E+00 3.8050E+00 1.0900E+00

2.2820E-01 4.2800E-02 9.2560E-03 4.1910E+00 1.2010E+00 4.1390E-02 3.5980E+00

5.3730E-01 9.7130E-02 6.2530E-03 2.7510E+00 8.1370E-01 1.3350E-01 1.0770E-02

1.0050E+00 1.5510E-01 1.5040E-02 5.6170E-02 2.3500E-02 9.8410E-03 3.9350E-03

2.1110E-02 1.3280E-02 6.8320E-03 5.0930E-02 1.3220E-01 1.9630E-02 5.5870E-03

2.1200E-01 1.6710E-01 7.7250E-02 1.7850E-02 1.3780E-01 6.8080E-02 2.0350E-02

3.1890E-03 8.7320E-02 2.2590E-02 4.5070E-03 5.7490E-04 1.1880E-01 3.8010E-02

6.5850E-03 1.0580E-04 1.1390E-01 5.8990E-02 5.2180E-02 3.3920E-02 1.6910E-01

4.1210E-02 1.0470E-02 2.5140E-03 4.6970E-02 1.5350E-02 4.1160E-03 8.9270E-04

8.9250E-02 8.0310E-02 4.7400E-02 1.5450E-02 2.0090E-01 4.4940E-02 7.3370E-03

7.0330E-04 3.7040E-02 1.5770E-02 4.5510E-03 7.5890E-04 5.3020E-02 3.8550E-02

1.0400E-02 5.8780E-02 2.6780E-02 1.4430E-02 7.5670E-03 5.1530E-02 2.4570E-02

8.5370E-03 2.2400E-03 7.5190E-02 7.7590E-02 3.9080E-02 9.0750E-03 4.7460E-02

2.6540E-02 9.2180E-03 1.9270E-03 6.7670E-02 2.4170E-02 1.1140E-02 6.6920E-03

2.1010E-02 1.0910E-02 5.6930E-03 2.7630E-03 3.3210E-02 1.6510E-02 6.2590E-03

1.4740E-03 4.5920E+00 2.0490E+00 3.6800E-01 2.7750E+00 3.4900E+00 3.3570E+00

1.5760E+00 4.0180E-01 6.5160E-02 2.0180E+00 1.5280E+00 7.9820E-01 1.1030E+00

1.7810E+00 3.7460E-01 9.3160E-02 9.5240E-01 1.1640E+00 6.9290E-01 1.3950E-01

4.7040E-01 3.8280E-01 8.7040E-02 2.5630E-02 2.6030E-02 1.5220E-02 7.7100E-03

1.6920E-02 1.2030E-02 5.2350E-03 4.0750E-02 6.1390E-02 5.5050E-02 9.5440E-03

1.6050E-01 5.5800E-02 8.6840E-02 7.6120E-02 6.1740E-02 4.7280E-02 5.3150E-02

2.1410E-02 1.6710E-02 4.8590E-02 2.1860E-02 4.8320E-03 5.3020E-02 4.4130E-02

2.6740E-02 6.9680E-03 6.9400E-02 8.8420E-02 3.9240E-02 1.0210E-02 5.0630E-02

8.6120E-02 3.2200E-02 9.7230E-03 1.5150E-02 2.2130E-02 1.2480E-02 4.0990E-03

7.9430E-02 3.6400E-02 2.9820E-02 4.0260E-02 4.5290E-02 1.0730E-01 4.2530E-02

7.9690E-03 1.4150E-02 1.4940E-02 1.2650E-02 4.7580E-03 4.4490E-02 1.8130E-02

1.8970E-02 3.2790E-02 3.0480E-02 1.7480E-02 5.2940E-03 2.6240E-02 1.9380E-02

1.6130E-02 7.7560E-03 7.7600E-02 2.5510E-02 2.7780E-02 2.9870E-02 2.5720E-02

1.4990E-02 1.8180E-02 9.2350E-03 5.4130E-02 1.6110E-02 1.3480E-02 4.0060E-03

1.2820E-02 1.0320E-02 6.7660E-03 2.3920E-03 1.7510E-02 1.2810E-02 9.7910E-03

5.8430E-03 2.7880E+00 1.5840E+00 2.6720E-01 2.7690E+00 1.6180E+00 2.1450E+00

1.5110E+00 4.3190E-01 7.9810E-01 1.3270E+00 1.1320E+00 3.0400E-01 9.7260E-01

9.9280E-01 2.2470E-01 2.3530E-01 8.1650E-01 6.7870E-01 4.7400E-01 1.9670E-01

3.3500E-01 1.7340E-01 1.1570E-02 1.7230E-02 1.6760E-02 1.0550E-02 1.2340E-02

8.7520E-03 4.0350E-03 3.0560E-02 2.6990E-02 4.5940E-02 2.1550E-02 7.5840E-02

7.4580E-02 5.2720E-02 8.1300E-02 1.7140E-02 4.5900E-02 3.1980E-02 4.2660E-02

1.9450E-03 1.8530E-02 3.2600E-02 1.5930E-02 1.8970E-02 3.6380E-02 2.6370E-02

1.6410E-02 5.6440E-02 5.6320E-02 3.3200E-02 9.4920E-03 1.4390E-02 4.4130E-02

5.3050E-02 2.2420E-02 4.0910E-03 1.2730E-02 1.4280E-02 9.2880E-03 5.0720E-02

2.7560E-02 3.4930E-02 2.6250E-02 7.0380E-03 4.7580E-02 6.7800E-02 2.9920E-02

3.7210E-03 1.1150E-02 1.0010E-02 9.9830E-03 3.0450E-02 1.7190E-02 1.3550E-02

1.9520E-02 2.2820E-02 1.4620E-02 7.5810E-03 1.0800E-02 1.6490E-02 1.3000E-02

1.1830E-02 5.3090E-02 2.2710E-02 2.8790E-02 1.5970E-02 9.3840E-03 1.6300E-02

1.0660E-02 1.4760E-02 4.0600E-02 1.1300E-02 9.8500E-03 4.0500E-03 7.7790E-03

8.1950E-03 5.2100E-03 3.0490E-03 7.6650E-03 1.0130E-02 9.1380E-03 7.5390E-03

1.7460E+00 4.3880E-02 2.9140E-01 2.0470E+00 1.1300E+00 1.1510E+00 1.1600E+00

2.1430E-01 9.1750E-01 1.0390E+00 7.2940E-02 3.5350E-01 7.4120E-01 4.8440E-01

3.2900E-02 3.3030E-01 5.2980E-01 5.5750E-01 7.0670E-02 2.0930E-01 1.9010E-01

4.9540E-03 9.2950E-03 1.2300E-02 1.0830E-02 8.1580E-03 5.4570E-03 2.8410E-03

2.0370E-02 1.1380E-02 2.6310E-02 2.5310E-02 2.2860E-02 6.4840E-02 5.5300E-02

4.6650E-02 2.2630E-03 2.2690E-02 2.8890E-02 3.7950E-02 1.2770E-04 2.9710E-03

1.7520E-02 2.5360E-02 4.8330E-03 2.0810E-02 2.3550E-02 1.6240E-02 4.5200E-02

2.3430E-02 2.1440E-02 1.3560E-02 4.0900E-03 1.5360E-02 3.5500E-02 3.4390E-02

9.2310E-04 4.7740E-03 9.7560E-03 1.1470E-02 2.2970E-02 3.1560E-02 2.5750E-02

1.2700E-02 6.2810E-04 1.0710E-02 4.0720E-02 4.9510E-02 5.3730E-04 4.8480E-03

7.7210E-03 1.0140E-02 1.7440E-02 1.7100E-02 6.2590E-03 1.1990E-02 1.2240E-02

1.1390E-02 7.4060E-03 3.5880E-03 1.0040E-02 1.1050E-02 1.0070E-02 2.6310E-02

3.1090E-02 1.8220E-02 4.7330E-03 2.2680E-03 9.9810E-03 1.0410E-02 1.1400E-02

2.7070E-02 7.5540E-03 5.3950E-03 3.8520E-03 4.6220E-03 4.8870E-03 4.0880E-03

2.5590E-03 2.5900E-03 6.6530E-03 7.4220E-03 6.3160E-03 8.0140E-03 4.5910E-02

2.1000E-01 1.1720E+00 1.0630E+00 4.1750E-01 1.6540E-02 4.5750E-01 6.1140E-01

1.1480E-02 1.0590E-01 2.7930E-01 4.2680E-01 2.1970E-03 5.3300E-02 3.0210E-01

3.5980E-01 1.9940E-02 9.3100E-02 1.2200E-01 1.8140E-03 3.9540E-03 5.9060E-03

6.9390E-03 4.0780E-03 2.5650E-03 1.4970E-03 1.0190E-02 4.1920E-03 1.0550E-02

1.6750E-02 2.9100E-03 3.2800E-02 4.4000E-02 1.5110E-02 4.7570E-05 3.7990E-03

2.2090E-02 1.9960E-02 1.6460E-05 1.7570E-04 3.1280E-03 1.9650E-02 5.9450E-04

7.8870E-03 1.4890E-02 9.3360E-03 2.5880E-02 6.0080E-03 9.3910E-03 1.0530E-02

1.0320E-03 4.6070E-03 1.2350E-02 2.6680E-02 1.9320E-04 1.1180E-03 4.2480E-03

7.9050E-03 6.6480E-03 2.3370E-02 1.1520E-02 4.9420E-03 3.5460E-05 1.0220E-03

1.0880E-02 3.8840E-02 3.4580E-05 8.4090E-04 4.6870E-03 6.0610E-03 7.5650E-03

1.1030E-02 1.8050E-03 5.9970E-03 4.4850E-03 6.6110E-03 4.4190E-03 9.2760E-04

3.9780E-03 7.1410E-03 5.3300E-03 8.9350E-03 2.3940E-02 6.6660E-03 6.2760E-04

3.2730E-04 3.1500E-03 8.2920E-03 5.2600E-03 1.3540E-02 3.8620E-03 2.1360E-03

2.4020E-03 2.2230E-03 2.0240E-03 2.4750E-03 1.3540E-03 5.7770E-04 3.1390E-03

4.3250E-03 3.4500E-03 4.4510E+00 5.5020E-01 7.3260E-02 1.4790E-02 2.9500E-03

9.1570E+00 2.3450E-01 6.9890E-02 2.6450E+00 5.3010E-01 2.4900E-02 3.6510E-03

3.7610E+00 5.3950E-01 3.8610E-02 2.5070E-03 1.8560E+00 2.8840E-02 1.7930E-02

5.3910E-02 1.9500E-02 6.5240E-03 1.5870E-03 1.2940E-02 3.0780E-03 1.1630E-03

1.8170E-02 3.4640E-02 2.0280E-02 3.9860E-03 1.8190E-01 4.0130E-02 7.2910E-03

9.0830E-04 1.4710E-01 4.9460E-02 1.0050E-02 9.9520E-04 4.9680E-01 1.5210E-01

2.7070E-02 2.3080E-03 1.5000E-01 1.9180E-02 1.1240E-03 7.0780E-05 5.5670E-02

2.6070E-02 9.7330E-03 1.5580E-03 6.7860E-02 5.7720E-02 2.5820E-02 4.4610E-03

2.6920E-01 7.6750E-02 1.9750E-02 2.7470E-03 1.4170E-01 6.1130E-02 1.6100E-02

1.8330E-03 1.2060E-01 7.8770E-02 2.6080E-02 3.6560E-03 3.8380E-01 1.0910E-01

2.2810E-02 2.4130E-03 4.4780E-02 4.4320E-02 3.7740E-02 6.8700E-02 4.6820E-02

2.0360E-02 3.4740E-03 1.9080E-01 4.7650E-02 7.7430E-03 1.3820E-03 4.3830E-02

1.5340E-02 5.8650E-03 1.2920E-03 9.0720E-02 3.8000E-02 9.6050E-03 1.4890E-03

8.4080E-02 4.5980E-02 2.0750E-02 7.0950E-04 7.4540E-02 3.1030E-02 6.7790E-03

6.6150E-04 7.3530E-02 4.6870E-02 1.3230E-02 1.4990E-03 5.1980E+00 8.3140E-01

1.0570E-01 2.0620E-02 3.7250E+00 3.9240E+00 1.3060E-01 1.1890E+00 1.0350E+00

4.2620E-01 1.9180E-02 1.9170E+00 3.6960E+00 4.7780E-01 3.5990E-02 8.8470E-01

6.9130E-01 1.1270E-02 2.6870E-02 2.3090E-02 1.2000E-02 5.3690E-03 7.7970E-03

5.2470E-03 1.3520E-03 1.5150E-02 2.7320E-02 1.2180E-02 9.5940E-03 6.2420E-02

9.0130E-02 3.2530E-02 6.7280E-03 5.9990E-02 6.3250E-02 4.0280E-02 9.4360E-03

1.7720E-01 2.3000E-01 1.3250E-01 2.5550E-02 5.9830E-02 6.6210E-02 1.5000E-02

9.5980E-04 3.5440E-02 2.2850E-02 1.1870E-02 7.3630E-03 5.9170E-02 2.2600E-02

2.5690E-02 2.2420E-02 1.0620E-01 1.2750E-01 5.5100E-02 1.8090E-02 7.8170E-02

5.1760E-02 3.9320E-02 1.4580E-02 8.3140E-02 3.4850E-02 4.9180E-02 2.3880E-02

1.3890E-01 1.8320E-01 8.8110E-02 2.1370E-02 4.5270E-02 4.4840E-02 1.5580E-02

5.3970E-02 2.8370E-02 1.8600E-02 1.5190E-02 7.8800E-02 8.3240E-02 3.7570E-02

6.6960E-03 2.4280E-02 1.9430E-02 7.4730E-03 4.0840E-03 4.5510E-02 3.4580E-02

2.7720E-02 8.7130E-03 7.0070E-02 3.2870E-02 1.2890E-02 1.0430E-02 4.4740E-02

2.5390E-02 1.8490E-02 5.5530E-03 5.2150E-02 1.9480E-02 2.8990E-02 1.1990E-02

4.5400E+00 8.5740E-01 9.6550E-02 1.2900E+00 3.6400E+00 1.2850E+00 4.6120E-01

9.1100E-01 5.4920E-01 2.0850E-01 4.2290E-01 2.2020E+00 2.0080E+00 2.6880E-01

3.8300E-01 6.9740E-01 1.9140E-01 1.2730E-02 1.8000E-02 1.5100E-02 8.5260E-03

4.7140E-03 4.9040E-03 2.0440E-03 1.2120E-02 1.9260E-02 1.0900E-02 9.1200E-03

1.8530E-02 5.8450E-02 5.5520E-02 2.0970E-02 1.9430E-02 4.8550E-02 4.3200E-02

2.7080E-02 4.8570E-02 1.6090E-01 1.5670E-01 8.6100E-02 2.0930E-02 5.1870E-02

3.3140E-02 7.6740E-03 2.1100E-02 1.7960E-02 1.5230E-02 7.7350E-03 3.8620E-02

2.0670E-02 2.0820E-02 2.3800E-02 3.8500E-02 8.6530E-02 8.1340E-02 3.9230E-02

3.6820E-02 4.6650E-02 3.5880E-02 2.7790E-02 4.2400E-02 4.1040E-02 3.0010E-02

3.9380E-02 4.2550E-02 1.2270E-01 1.2030E-01 5.9620E-02 4.4790E-02 3.2060E-02

7.7010E-03 3.6880E-02 2.1310E-02 2.1750E-02 1.2950E-02 2.8350E-02 6.4210E-02

4.9740E-02 2.2740E-02 1.3320E-02 1.4890E-02 1.1470E-02 4.5360E-03 1.8860E-02

3.0700E-02 2.4220E-02 1.9440E-02 5.6050E-02 2.0720E-02 1.2790E-02 1.1440E-02

2.3430E-02 2.4190E-02 1.6970E-02 1.0750E-02 2.7730E-02 2.4270E-02 1.6970E-02

2.1100E-02 3.4120E+00 6.4630E-01 3.6420E-01 2.1220E+00 2.1760E+00 1.4240E-01

5.4250E-01 5.2710E-01 3.3180E-01 6.8850E-02 7.3890E-01 1.8280E+00 9.3650E-01

1.4860E-01 4.7200E-01 3.3340E-01 5.5740E-03 1.1340E-02 1.3580E-02 1.0270E-02

2.7210E-03 3.6280E-03 2.3040E-03 9.0850E-03 1.2180E-02 1.0830E-02 6.4460E-03

4.6470E-03 2.5320E-02 4.7970E-02 3.7180E-02 4.5110E-03 2.6060E-02 3.5360E-02

3.7990E-02 7.8900E-03 7.5520E-02 1.2460E-01 1.3120E-01 6.1410E-03 2.7760E-02

3.4400E-02 1.6910E-02 1.1220E-02 1.4270E-02 1.4000E-02 7.0300E-03 1.9770E-02

2.3000E-02 1.8700E-02 1.6470E-02 1.2350E-02 4.3250E-02 7.0640E-02 5.7960E-02

1.4280E-02 3.4100E-02 3.1740E-02 3.0180E-02 1.6360E-02 3.7020E-02 2.5700E-02

3.5550E-02 1.0150E-02 5.6960E-02 9.9740E-02 9.2110E-02 4.0170E-02 1.7620E-02

5.6150E-03 2.1490E-02 2.0380E-02 1.8970E-02 8.8340E-03 8.6510E-03 3.5140E-02

4.4710E-02 3.5280E-02 6.9450E-03 1.0140E-02 1.0920E-02 5.1470E-03 6.2140E-03

2.0450E-02 2.0420E-02 2.2830E-02 4.2040E-02 1.1350E-02 1.3540E-02 8.8280E-03

1.0520E-02 1.9560E-02 1.5450E-02 1.0970E-02 1.1440E-02 2.3170E-02 1.4390E-02

1.8550E-02 2.1950E+00 8.9170E-02 8.0360E-01 2.2150E+00 3.4980E-02 2.4120E-01

4.2810E-01 3.2400E-01 9.1960E-03 1.4670E-01 8.7640E-01 1.3330E+00 5.1120E-02

2.4200E-01 3.4280E-01 2.1550E-03 6.2640E-03 9.3730E-03 9.1440E-03 1.4980E-03

2.2940E-03 2.0210E-03 6.0570E-03 6.7730E-03 9.2020E-03 3.6660E-03 9.5380E-04

7.9570E-03 2.6500E-02 4.1330E-02 5.5420E-04 8.9700E-03 2.4290E-02 3.5430E-02

3.3500E-05 2.0530E-02 7.4900E-02 1.3070E-01 1.4070E-03 1.0950E-02 2.4170E-02

2.0290E-02 5.0670E-03 1.0640E-02 9.6520E-03 5.6470E-03 7.5430E-03 2.0190E-02

1.6120E-02 8.1060E-03 3.1110E-03 1.7940E-02 4.2440E-02 5.9310E-02 4.1960E-03

1.9260E-02 2.6590E-02 2.3530E-02 4.3140E-03 2.2400E-02 2.7680E-02 2.2020E-02

1.5250E-03 1.8640E-02 5.8050E-02 9.4450E-02 3.0480E-02 7.1960E-03 4.6040E-03

1.0330E-02 1.8270E-02 1.2300E-02 5.5510E-03 2.2860E-03 1.3850E-02 3.0830E-02

3.5560E-02 3.2590E-03 6.5270E-03 7.3290E-03 4.9910E-03 1.5340E-03 9.4920E-03

1.6780E-02 1.8790E-02 2.8030E-02 5.2400E-03 1.1790E-02 5.4430E-03 3.8920E-03

1.2630E-02 1.3320E-02 7.8210E-03 3.4470E-03 1.4960E-02 1.6090E-02 1.0550E-02

2.5270E-02 1.5290E-01 1.3740E+00 6.1170E-03 7.0560E-02 2.4140E-01 1.9580E-01

9.8760E-04 1.8340E-02 1.8620E-01 9.6940E-01 1.4810E-02 8.9530E-02 2.1360E-01

6.6120E-04 2.7350E-03 4.5700E-03 5.4030E-03 6.6820E-04 1.0390E-03 1.1770E-03

3.0290E-03 2.9310E-03 5.3330E-03 1.5550E-03 1.4660E-04 1.8050E-03 9.2490E-03

2.7170E-02 6.5340E-06 1.3450E-03 1.1820E-02 2.1100E-02 3.6650E-06 6.6820E-05

3.2210E-02 8.0730E-02 2.2320E-04 2.9690E-03 1.1460E-02 1.3750E-02 1.7520E-03

5.8750E-03 4.6470E-03 3.2300E-03 1.8590E-03 1.1690E-02 9.7540E-03 2.6750E-03

4.1780E-04 6.1410E-03 1.7270E-02 3.7570E-02 7.6360E-04 7.7290E-03 1.5850E-02

1.2420E-02 5.1430E-04 8.7960E-03 1.9660E-02 9.2440E-03 1.6050E-05 3.7090E-03

2.3010E-02 5.9580E-02 1.6460E-02 1.9300E-03 2.7480E-03 3.7290E-03 1.1160E-02

5.5630E-03 2.7700E-03 5.7580E-04 3.4850E-03 1.5070E-02 2.2130E-02 1.2190E-03

3.3110E-03 3.3630E-03 3.1610E-03 2.7190E-04 2.7310E-03 1.0000E-02 1.0290E-02

1.4010E-02 1.8540E-03 6.9080E-03 2.4770E-03 1.0790E-03 5.8650E-03 8.0920E-03

3.8000E-03 6.2450E-04 6.3590E-03 1.1670E-02 3.8650E-03 1.3910E+00 2.7680E-01

1.3010E+00 4.6170E-01 1.2440E-01 2.1470E-02 2.5100E+00 8.3330E-01 2.1660E-01

4.8950E-02 2.7680E+00 1.5550E-01 2.4220E-02 1.6840E-02 1.0890E-02 5.9310E-03

2.6290E-03 1.1950E-02 9.7180E-03 4.5190E-03 2.6530E-02 1.0280E-01 4.5910E-02

2.6170E-02 2.0120E-01 1.1710E-01 5.6190E-02 1.8280E-02 1.8580E-01 7.6690E-02

2.5080E-02 5.2380E-03 7.5970E-04 8.1610E-04 5.8640E-04 2.6290E-04 2.0220E-02

8.1160E-03 2.9040E-03 8.7030E-04 7.9990E-02 2.3290E-02 6.1030E-03 1.8360E-03

4.0480E-02 3.6800E-02 3.3110E-02 2.5740E-02 8.6670E-02 7.9500E-02 4.8370E-02

1.8070E-02 1.3960E-01 6.1430E-02 2.7270E-02 1.2960E-02 8.3790E-02 6.1190E-02

3.3730E-02 1.1950E-02 9.2280E-03 3.9300E-03 1.3880E-03 3.7730E-04 6.4310E-02

3.0440E-02 1.1940E-02 1.2060E-01 7.0830E-02 2.6480E-02 4.7350E-03 4.2350E-02

4.5520E-02 4.8000E-02 4.1130E-02 1.4210E-02 5.9430E-03 2.2800E-03 7.4800E-04

1.2260E-02 9.3000E-03 5.6810E-03 2.6700E-03 3.6060E-02 3.1220E-02 3.3130E-02

2.0730E-02 4.2230E-02 5.0140E-02 4.1730E-02 2.3250E-02 6.6650E-02 5.5700E-02

3.5210E-02 1.7500E-02 1.1640E+00 3.5150E-01 5.4420E-01 3.5050E-01 1.4170E-01

3.4080E-01 1.2480E+00 8.1950E-01 2.7010E-01 4.7910E-01 1.6200E+00 1.1190E-01

9.2380E-03 6.5260E-03 6.1400E-03 5.3100E-03 1.0620E-02 5.1740E-03 3.9080E-03

1.9900E-02 5.5720E-02 6.1470E-02 1.4000E-02 8.1300E-02 7.3270E-02 7.2570E-02

6.7400E-02 2.2630E-02 8.7520E-02 7.4400E-02 3.5060E-02 7.6650E-04 1.4250E-04

2.6730E-04 6.3790E-04 6.7040E-03 9.0240E-03 5.8740E-03 2.4830E-03 1.5940E-02

4.0740E-02 2.1530E-02 5.2070E-03 3.6150E-02 3.4210E-02 2.1690E-02 1.0040E-02

7.5000E-02 1.5420E-02 2.9500E-02 5.4530E-02 3.8720E-02 6.9780E-02 4.9690E-02

2.2810E-02 5.0980E-02 2.3560E-02 2.9450E-02 3.9000E-02 1.2950E-03 4.3600E-03

3.7160E-03 1.8220E-03 3.6480E-02 2.8840E-02 1.4690E-02 6.6910E-02 3.0930E-02

3.8810E-02 3.0340E-02 4.7040E-02 5.0060E-02 2.7810E-02 7.8460E-03 5.0010E-03

6.4080E-03 4.1850E-03 1.7960E-03 7.9330E-03 4.2920E-03 4.6890E-03 5.5440E-03

2.7040E-02 3.5050E-02 2.0500E-02 8.2510E-03 5.3830E-02 3.3750E-02 2.0520E-02

9.9070E-03 5.3110E-02 2.3870E-02 2.6150E-02 2.8180E-02 5.8920E-02 2.5450E-01

3.5540E-01 2.5050E-01 4.9210E-02 2.3870E-01 6.6430E-01 8.1090E-01 6.9080E-02

4.3540E-01 9.6920E-01 3.0820E-03 5.9120E-03 5.4250E-03 3.7240E-03 6.9570E-03

4.8080E-03 1.3460E-03 1.3270E-02 3.8220E-02 2.3820E-02 2.5430E-02 1.2010E-02

5.5150E-02 6.7630E-02 6.1610E-02 1.1860E-03 1.5470E-02 5.0260E-02 7.9490E-02

1.3010E-04 5.0260E-04 4.2020E-04 1.4320E-04 1.9730E-03 4.5370E-03 5.6760E-03

3.8710E-03 4.1570E-03 1.1050E-02 2.2430E-02 1.7980E-02 3.2760E-02 1.6510E-02

1.0830E-02 7.9570E-03 1.2780E-02 5.0460E-02 3.8430E-02 1.4630E-02 1.5510E-02

2.3930E-02 3.9410E-02 4.1770E-02 8.2200E-03 3.4400E-02 3.2150E-02 2.0550E-02

1.6010E-04 8.6860E-04 2.5270E-03 3.9040E-03 1.9230E-02 2.0740E-02 1.3380E-02

1.2870E-02 4.8530E-02 3.4900E-02 1.5030E-02 5.2850E-02 1.8210E-02 9.5260E-03

7.9200E-03 1.6530E-03 3.2990E-03 3.9690E-03 2.6730E-03 2.2150E-03 5.1230E-03

4.6020E-03 2.9900E-03 1.8030E-02 2.9450E-02 1.0170E-02 2.9190E-03 4.5560E-02

2.2320E-02 8.5560E-03 2.2410E-03 2.0910E-02 3.2970E-02 2.3050E-02 1.0600E-02

2.0090E+00 4.0460E-01 6.8650E-02 7.0470E+00 2.6220E+00 6.2160E-01 1.2580E-01

2.0820E+00 8.3750E-01 4.9920E-02 2.4790E-01 1.3510E-01 5.1860E-02 1.4740E-02

9.7520E-02 3.9330E-02 1.5100E-02 6.3960E-02 1.1160E-01 4.2610E-02 9.6540E-03

1.7370E-01 7.7140E-02 3.0510E-02 8.3100E-03 8.1860E-02 4.1850E-02 1.6980E-02

4.1900E-03 8.9240E-02 3.2390E-02 9.0640E-03 1.6190E-03 2.7130E-01 7.9500E-02

1.6260E-02 1.8730E-03 1.9470E-01 5.0520E-02 2.1060E-02 9.0010E-03 2.0070E-01

7.1160E-02 2.1590E-02 5.2440E-03 1.0660E-01 3.8120E-02 1.1220E-02 2.7610E-03

1.9790E-01 7.0060E-02 2.2920E-02 6.8640E-03 6.8300E-02 2.7530E-02 8.5020E-03

1.7560E-03 4.2910E-02 1.8870E-02 5.8360E-03 1.1420E-03 6.3190E-02 2.7140E-02

2.3080E-03 7.1480E-02 3.3300E-02 1.5530E-02 5.3470E-03 4.9680E-02 2.1530E-02

8.6540E-03 2.8320E-03 3.9680E-02 2.2350E-02 1.0190E-02 3.0110E-03 2.5400E-02

1.0630E-02 3.6380E-03 1.2520E-03 2.0300E-02 1.0870E-02 5.3320E-03 1.6160E-03

1.4330E-02 6.9620E-03 3.3870E-03 1.4140E-03 1.6180E-02 6.6850E-03 2.1990E-03

4.7410E-04 1.6660E+00 4.0000E-01 1.9870E+00 2.7500E+00 2.3850E+00 7.0080E-01

1.1270E+00 5.2950E-01 5.7280E-01 1.0210E-01 9.5630E-02 7.1900E-02 5.3700E-02

5.3160E-02 4.4120E-02 1.7450E-02 4.7970E-02 5.8650E-02 3.9980E-02 2.4240E-02

5.2810E-02 7.7010E-02 5.3990E-02 3.3550E-02 2.8050E-02 3.1420E-02 2.9610E-02

1.9580E-02 1.2110E-02 4.4500E-02 3.1510E-02 1.1130E-02 7.9370E-02 1.1620E-01

6.3290E-02 1.7830E-02 5.0470E-02 1.1020E-01 3.5000E-02 1.0760E-02 5.2640E-02

9.1740E-02 5.6560E-02 2.3160E-02 2.1680E-02 5.1340E-02 3.3970E-02 1.2670E-02

5.1830E-02 9.3670E-02 5.5060E-02 2.2820E-02 1.7520E-02 2.9140E-02 2.3080E-02

9.9830E-03 1.1080E-02 1.6860E-02 1.6600E-02 7.0260E-03 3.5580E-02 1.5740E-02

1.8160E-02 3.3300E-02 3.3020E-02 1.7580E-02 1.0350E-02 1.7310E-02 2.2040E-02

1.4370E-02 8.2930E-03 2.2350E-02 1.5510E-02 1.0830E-02 7.7310E-03 6.9780E-03

1.0940E-02 9.0620E-03 3.7070E-03 1.5230E-02 6.6440E-03 3.9760E-03 2.7430E-03

6.9620E-03 6.7050E-03 4.1110E-03 1.7950E-03 5.2890E-03 6.5860E-03 4.8440E-03

2.4380E-03 1.0510E+00 2.1600E-01 1.8980E+00 1.2900E+00 1.8140E+00 4.1760E-01

6.3730E-01 4.2650E-01 2.9850E-02 7.4750E-02 6.4010E-02 5.2290E-02 2.7970E-02

2.9970E-02 1.8320E-02 3.1980E-02 2.5860E-02 3.4010E-02 2.2030E-02 1.3560E-02

3.3430E-02 5.3590E-02 4.4320E-02 5.2810E-03 1.9710E-02 2.1540E-02 2.5910E-02

3.7730E-04 1.1840E-02 2.7380E-02 2.6570E-02 1.6220E-02 6.3240E-02 6.4470E-02

4.0570E-02 2.1040E-02 3.4980E-02 6.2640E-02 1.8990E-02 1.1340E-02 4.0000E-02

5.5570E-02 4.2540E-02 3.1660E-03 1.8640E-02 3.0740E-02 2.7300E-02 1.3020E-02

3.8260E-02 5.6950E-02 4.0700E-02 2.3440E-03 1.4720E-02 1.7310E-02 1.8850E-02

6.1520E-04 1.0580E-02 9.1790E-03 1.4000E-02 1.3880E-02 1.9570E-02 1.2880E-02

1.5520E-02 1.7580E-02 2.1600E-02 8.1200E-03 5.5680E-03 1.0830E-02 1.4600E-02

1.0360E-02 1.0190E-02 1.0820E-02 1.1780E-02 4.8180E-03 1.2760E-03 6.0330E-03

6.0200E-03 7.1330E-03 1.0160E-02 3.4140E-03 3.4330E-03 2.0630E-03 3.3880E-03

4.1100E-03 3.5820E-03 1.9680E-03 1.2000E-03 3.7470E-03 4.1610E-03 3.6630E-03

5.0200E-02 1.7890E-01 1.2930E+00 1.0870E+00 8.4860E-02 4.6970E-01 1.8580E-01

5.9660E-03 2.7280E-02 3.5930E-02 3.4900E-02 1.1930E-02 1.3890E-02 1.1930E-02

1.5980E-02 8.6940E-03 1.9920E-02 1.2340E-02 1.2850E-03 1.3670E-02 2.2920E-02

3.4580E-02 5.9350E-05 5.8040E-03 1.4190E-02 1.6170E-02 6.2890E-05 3.3000E-04

8.3830E-03 2.4300E-02 1.8730E-03 1.7810E-02 4.0550E-02 3.2020E-02 9.0010E-03

1.0750E-02 1.8980E-02 3.0100E-02 1.9110E-03 1.0560E-02 2.6430E-02 3.5850E-02

6.3830E-04 2.7000E-03 1.2780E-02 2.3810E-02 3.0300E-03 1.0780E-02 2.4660E-02

3.6000E-02 1.9840E-04 2.3960E-03 1.0250E-02 1.3780E-02 8.2900E-05 5.7180E-04

7.4440E-03 9.0830E-03 3.1390E-03 1.4760E-02 5.2630E-03 5.3470E-03 1.0350E-02

8.1200E-03 7.6000E-03 1.2490E-03 4.6830E-03 6.6860E-03 8.0640E-03 3.0110E-03

7.7310E-03 4.8180E-03 3.2450E-03 4.4330E-04 8.0260E-04 4.0130E-03 4.9600E-03

5.0760E-03 1.3430E-03 2.1090E-03 1.0030E-03 1.4140E-03 1.7950E-03 1.9680E-03

1.3470E-03 1.3290E-04 1.2270E-03 2.4790E-03 2.5460E-03 3.0070E+00 4.7960E-01

6.4990E-02 7.6460E+00 4.4160E-01 2.2380E-01 1.8250E-01 7.5840E-02 2.8730E-02

8.8230E-03 3.2950E-02 1.4400E-02 3.5060E-03 5.7900E-03 5.2300E-02 1.0770E-02

4.2230E-03 1.1700E-01 4.0830E-02 1.2620E-02 2.5180E-03 6.8190E-02 2.7120E-02

1.0420E-02 2.3090E-03 8.5920E-02 3.6770E-02 1.2480E-02 2.0890E-03 1.4680E-01

4.9160E-02 7.7140E-03 1.0940E-03 1.5300E-01 5.1900E-02 1.2060E-02 1.9490E-03

4.4730E-02 1.8310E-02 7.2170E-03 2.2310E-03 8.2820E-02 3.1760E-02 9.2060E-03

1.8400E-03 2.2660E-01 6.2060E-02 1.5880E-02 2.1460E-03 1.0440E-01 3.2330E-02

8.6630E-03 1.7040E-03 1.7900E-01 6.4430E-02 1.8550E-02 3.5830E-03 9.4820E-02

2.6770E-02 1.5400E-02 4.8100E-02 2.3860E-02 8.9810E-03 1.8740E-03 6.4380E-02

2.2630E-02 7.1640E-03 1.7630E-03 1.7020E-02 7.0850E-03 2.2900E-03 4.4480E-04

2.1890E-02 1.0590E-02 4.0590E-03 1.1730E-03 3.5530E-02 2.0010E-02 7.2640E-03

3.0350E-03 2.2170E-02 1.1010E-02 4.0020E-03 6.5520E-04 2.4440E-02 1.3110E-02

6.6070E-03 2.4430E-03 2.9420E+00 5.4130E-01 2.7610E+00 3.7120E+00 1.7520E-01

6.9200E-02 9.7960E-02 5.5850E-02 2.6940E-02 2.0950E-02 1.2070E-02 7.7330E-03

4.6320E-03 2.4490E-02 2.4410E-02 4.9270E-03 3.4240E-02 5.7740E-02 3.2480E-02

1.3920E-02 2.0790E-02 3.4840E-02 1.9450E-02 1.1480E-02 2.6590E-02 3.9350E-02

2.9520E-02 1.4360E-02 6.1700E-02 5.2960E-02 4.1650E-02 7.5060E-03 6.4890E-02

6.1080E-02 3.7710E-02 1.1360E-02 1.8290E-02 2.0980E-02 1.1970E-02 6.7400E-03

2.7220E-02 3.6740E-02 2.6400E-02 1.0150E-02 6.2050E-02 1.1630E-01 4.9080E-02

1.7910E-02 2.6220E-02 5.3820E-02 2.8140E-02 9.5800E-03 4.6990E-02 8.9900E-02

5.6680E-02 2.0880E-02 4.9610E-02 5.0350E-02 9.6290E-03 2.7310E-02 1.8630E-02

1.2530E-02 7.7800E-03 2.2640E-02 3.0160E-02 1.6770E-02 7.1960E-03 8.4230E-03

6.7710E-03 4.2390E-03 2.0360E-03 9.4900E-03 8.9220E-03 7.5830E-03 4.1470E-03

2.8420E-02 1.1630E-02 9.3870E-03 3.2240E-03 1.2610E-02 8.3330E-03 5.5840E-03

3.7550E-03 1.3120E-02 1.1390E-02 7.0630E-03 5.7200E-03 2.2830E+00 9.0010E-01

2.6490E+00 1.4360E+00 2.7630E-02 4.8460E-02 7.2950E-02 4.3910E-02 1.1720E-02

1.1470E-02 7.3400E-03 3.4740E-03 1.1650E-02 1.8470E-02 1.0260E-02 8.8830E-03

2.6410E-02 4.0670E-02 2.7820E-02 6.5190E-03 1.3590E-02 2.6810E-02 1.8040E-02

5.6430E-03 2.0860E-02 2.8570E-02 2.7300E-02 1.7340E-02 5.0310E-02 2.7080E-02

2.8140E-02 2.1810E-02 4.7640E-02 3.7110E-02 2.4720E-02 7.2150E-03 1.1970E-02

1.4960E-02 9.3400E-03 6.2230E-03 2.2600E-02 2.4260E-02 2.2320E-02 1.5880E-02

4.9080E-02 7.9600E-02 3.9460E-02 5.7270E-03 2.2260E-02 3.6850E-02 2.3500E-02

9.1710E-03 4.0430E-02 6.2580E-02 4.9020E-02 2.9160E-02 3.5300E-02 1.7740E-02

1.2970E-02 1.4800E-02 1.4530E-02 7.3760E-03 7.1650E-03 1.6770E-02 2.0400E-02

1.3230E-02 3.5310E-03 5.2100E-03 4.7360E-03 2.6240E-03 3.0720E-03 6.7760E-03

6.2360E-03 6.5220E-03 2.1320E-02 6.8600E-03 7.2970E-03 4.0260E-03 5.8610E-03

6.5960E-03 6.8980E-03 3.3520E-03 6.6060E-03 7.0620E-03 8.9500E-03 5.3540E-03

3.2280E-01 9.5640E-01 2.0450E+00 8.7160E-03 2.6810E-02 4.0600E-02 4.1490E-02

5.6300E-03 9.5610E-03 5.1490E-03 2.3160E-03 5.7760E-03 9.1500E-03 1.1990E-02

1.2960E-03 9.5630E-03 2.1870E-02 3.6460E-02 7.2560E-04 7.0770E-03 1.2210E-02

2.3290E-02 9.1740E-05 6.5050E-03 1.8140E-02 3.0180E-02 3.4780E-03 1.9570E-02

3.8250E-02 2.0610E-02 5.4380E-03 2.3190E-02 3.5660E-02 2.3240E-02 2.2310E-03

6.7390E-03 9.3390E-03 1.0680E-02 9.6930E-04 6.6380E-03 1.8340E-02 2.4330E-02

2.1460E-03 1.7920E-02 3.9470E-02 6.3160E-02 8.9870E-04 6.1020E-03 1.7970E-02

3.3930E-02 1.1030E-03 9.8780E-03 3.3150E-02 6.3360E-02 1.8190E-02 1.5450E-02

2.1160E-02 4.3660E-03 1.2260E-02 1.0330E-02 6.1540E-03 1.7640E-03 7.1960E-03

1.3240E-02 1.6180E-02 1.0870E-03 3.4760E-03 3.7620E-03 2.4070E-03 7.3730E-04

3.0180E-03 5.5690E-03 5.7370E-03 1.4210E-02 3.9300E-03 4.3340E-03 3.8570E-03

1.7480E-03 5.8460E-03 4.7090E-03 2.8340E-03 2.4430E-03 5.7200E-03 5.3540E-03

5.1310E-03 3.5470E-01 8.1580E-02 6.0110E-02 3.2180E-02 1.6100E-02 7.3470E-03

1.0080E-01 5.8650E-02 1.6200E-02 2.7710E-02 6.6840E-02 2.2830E-02 9.9840E-03

3.0960E-02 2.3040E-02 1.3760E-02 6.2540E-03 1.0680E-02 6.1960E-03 3.2140E-03

1.3110E-03 2.0360E-03 1.6790E-03 1.1550E-03 6.3580E-04 5.1890E-02 2.6330E-02

1.0820E-02 3.2420E-03 6.6250E-02 4.2160E-02 1.7680E-02 4.3470E-03 2.1610E-02

1.7250E-02 1.2550E-02 8.0480E-03 3.5350E-02 2.4170E-02 1.3500E-02 5.6360E-03

1.1070E-01 4.5130E-02 1.7510E-02 7.1670E-03 3.3900E-02 2.3600E-02 1.5000E-02

8.6020E-03 9.4020E-03 4.4470E-03 1.8120E-03 5.6440E-04 1.3390E-01 3.0920E-02

8.9980E-03 9.5980E-02 3.7950E-02 1.3810E-02 4.4080E-03 1.0180E-01 5.0040E-02

2.5310E-02 1.3250E-02 3.0910E-02 1.7730E-02 6.9320E-03 1.5360E-03 8.9170E-03

7.0610E-03 4.6350E-03 2.5230E-03 4.3390E-02 2.4830E-02 1.4080E-02 8.0470E-03

1.3140E-02 1.0670E-02 7.1220E-03 3.4850E-03 1.5170E-02 9.6770E-03 5.6850E-03

2.9940E-03 2.3180E-01 1.7980E-02 2.4410E-02 2.0840E-02 1.3920E-02 5.7550E-02

2.4250E-02 3.5100E-02 1.8480E-02 2.2830E-02 3.4290E-02 9.3050E-03 1.6620E-02

8.2690E-03 1.0600E-02 1.3850E-02 2.5800E-03 3.9670E-03 4.0880E-03 3.5720E-03

1.2020E-03 6.0600E-04 7.4510E-04 1.1170E-03 1.8610E-02 1.7830E-02 1.5700E-02

9.3870E-03 3.4540E-02 1.3390E-02 2.1150E-02 1.7870E-02 1.4350E-02 1.0640E-02

8.4510E-03 6.2040E-03 1.5860E-02 9.9800E-03 1.2140E-02 1.4460E-02 1.3350E-02

5.1840E-02 3.8540E-02 1.6780E-02 1.5840E-02 1.3280E-02 1.2910E-02 1.2040E-02

8.6400E-04 3.8900E-03 3.7210E-03 2.3410E-03 3.0920E-02 6.6980E-02 1.7970E-02

2.0750E-02 4.1740E-02 2.7680E-02 1.1270E-02 2.4180E-02 4.8070E-02 3.6360E-02

1.8490E-02 1.3690E-02 7.3040E-03 9.6140E-03 7.4540E-03 5.4060E-03 2.8350E-03

3.2330E-03 3.9500E-03 2.8920E-02 1.4080E-02 1.3710E-02 3.5080E-03 9.8030E-03

6.0890E-03 4.4870E-03 2.5770E-03 6.6950E-03 6.1310E-03 5.4080E-03 4.1190E-03

4.5170E-03 9.5450E-03 1.2660E-02 1.1800E-02 1.6180E-02 3.4890E-02 7.7160E-03

9.2380E-03 9.9820E-03 9.3050E-03 1.3930E-02 1.7560E-03 9.8090E-03 8.5370E-03

4.5710E-03 2.3960E-04 1.5060E-03 2.4550E-03 2.8530E-03 1.5050E-04 6.7930E-04

6.4080E-04 3.6480E-04 3.3270E-03 1.1210E-02 1.0400E-02 5.8280E-03 3.4960E-03

2.2730E-02 1.3380E-02 3.8780E-03 6.5070E-03 6.0920E-03 4.4840E-03 2.7330E-03

1.2240E-03 9.5580E-03 9.3130E-03 6.1240E-03 4.8050E-03 6.3330E-03 2.1440E-02

2.7680E-02 4.3320E-03 8.1760E-03 8.1390E-03 6.3860E-03 5.6910E-05 5.1320E-04

1.8430E-03 2.9930E-03 8.9970E-03 1.7970E-02 3.0960E-02 4.9770E-03 1.1610E-02

1.9380E-02 1.4750E-02 9.9680E-03 1.0800E-02 2.0050E-02 2.2740E-02 1.0880E-03

9.2150E-03 6.2980E-03 2.4270E-03 1.0990E-03 2.9570E-03 2.4150E-03 1.2380E-03

1.4460E-02 8.0470E-03 3.5080E-03 4.1000E-03 4.5950E-03 3.8920E-03 2.1650E-03

8.2490E-04 2.0810E-03 3.3530E-03 3.2760E-03 2.4670E-03 5.6380E+00 2.4990E-01

6.7430E-02 7.4880E-01 1.0660E-01 2.8720E-02 4.1490E-02 7.5660E-02 2.4820E-02

5.8410E-03 9.6820E-01 1.2110E-01 1.8120E-02 2.7160E-03 1.7720E-01 6.4120E-02

1.7610E-02 2.4220E-03 1.9170E-01 7.1210E-02 1.5440E-02 1.6760E-03 1.4190E-01

3.5320E-02 1.3260E-02 3.9270E-03 2.5830E-01 3.7080E-02 1.1830E-02 2.7620E-03

4.0420E-01 8.4430E-02 1.9610E-02 4.0590E-03 2.8080E-01 6.3040E-02 1.5070E-02

2.5040E-03 8.2480E-01 1.1230E-01 1.2920E-02 2.1270E-03 1.1430E+00 1.6820E-01

3.2290E-02 5.6830E-03 1.9020E-01 7.4120E-02 2.2610E-02 3.9090E-03 3.2110E-02

1.0850E-02 1.6360E-03 4.5190E-02 1.4210E-02 4.1830E-03 1.3410E-03 1.2240E-01

4.2430E-02 1.7590E-02 5.3410E-03 1.2570E+01 5.4700E-01 1.0680E-01 4.0740E-02

2.8340E+01 3.5030E+00 3.7340E-01 5.6120E-02 2.2640E-01 5.8260E-02 2.7490E-02

3.2840E-03 5.2050E+00 1.9860E-01 8.2230E-03 2.9310E-03 1.6630E+01 2.0690E+00

1.1220E-01 6.7180E-03 6.8290E+00 2.4440E-01 3.1640E-01 3.3550E-01 5.5700E-02

3.3190E-02 4.2100E-02 2.9560E-02 1.3430E-02 5.5270E-02 6.9110E-01 1.3120E-01

2.0830E-02 4.7240E-02 7.9930E-02 5.6360E-02 2.0610E-02 4.7510E-02 8.5780E-02

7.2720E-02 1.8350E-02 4.7640E-02 7.6900E-02 2.1470E-02 9.6530E-03 6.1840E-02

1.5270E-01 2.3880E-02 9.8580E-03 8.3720E-02 2.3300E-01 7.3300E-02 2.0570E-02

4.1860E-02 1.9960E-01 6.3040E-02 1.7130E-02 1.1120E-01 5.1700E-01 1.2160E-01

1.4210E-02 8.7120E-02 8.3390E-01 1.7550E-01 3.6330E-02 5.6420E-02 8.8340E-02

6.2040E-02 2.5810E-02 1.8100E-02 1.1230E-02 6.3660E-03 1.8150E-02 2.0490E-02

1.0440E-02 2.8720E-03 4.2360E-02 6.5080E-02 2.6240E-02 1.6540E-02 1.9410E+00

8.1220E+00 4.8790E-01 6.3250E-02 1.5810E+00 1.9810E+01 4.0750E+00 4.2870E-01

1.8110E-01 3.8430E-02 1.6210E-02 1.6570E-02 7.7660E-01 3.3390E+00 2.1240E-01

5.1800E-03 2.0670E+00 1.0430E+01 2.4270E+00 1.3610E-01 5.1190E+00 1.2470E-01

2.5810E-01 1.4790E-01 2.4900E-02 2.1430E-02 2.6160E-02 1.6230E-02 1.0240E-02

5.0140E-02 5.0990E-01 1.0420E-01 8.1680E-03 4.1110E-02 5.4510E-02 4.9200E-02

1.4530E-03 5.1970E-02 5.2980E-02 6.1280E-02 1.9410E-02 3.4520E-02 5.0320E-02

1.2590E-02 1.8760E-02 5.2610E-02 1.0020E-01 1.4880E-02 1.9620E-02 7.2900E-02

1.5880E-01 5.7230E-02 9.6910E-03 3.5870E-02 1.6370E-01 5.2560E-02 1.2540E-02

1.2090E-01 3.4820E-01 9.2980E-02 2.0430E-02 7.3120E-02 6.4230E-01 1.4180E-01

1.1620E-02 4.6580E-02 6.1440E-02 5.4820E-02 8.7880E-03 1.0840E-02 7.1390E-03

6.7760E-03 1.3870E-02 1.1840E-02 6.4840E-03 1.7580E-02 2.6240E-02 4.8280E-02

2.0630E-02 2.7440E-01 2.1910E+00 5.1750E+00 3.1830E-01 1.4100E-01 1.7170E+00

1.4380E+01 3.1720E+00 1.3590E-01 2.0100E-02 1.9330E-02 1.3980E-02 7.5860E-02

9.1570E-01 2.1110E+00 1.4700E-01 1.1190E-01 2.4270E+00 6.9210E+00 1.8370E+00

4.8030E-02 1.2530E-01 1.8020E-01 1.6600E-02 9.6850E-03 1.8730E-02 1.4130E-02

1.2650E-03 1.1290E-02 4.0160E-02 3.9690E-01 1.6930E-04 9.4880E-03 3.4000E-02

6.0810E-02 8.8500E-05 1.6330E-03 4.0120E-02 6.9570E-02 7.7100E-03 1.6900E-02

2.4580E-02 2.8810E-02 5.9990E-03 1.8680E-02 3.9360E-02 6.0470E-02 4.0590E-03

2.0570E-02 5.7100E-02 1.2420E-01 1.1500E-03 1.0820E-02 2.9430E-02 1.3980E-01

2.1050E-03 1.4180E-02 9.2720E-02 2.7460E-01 2.8370E-03 2.2240E-02 5.9730E-02

5.0660E-01 8.8540E-04 1.3000E-02 3.8950E-02 6.3480E-02 3.4550E-03 8.7120E-03

5.6770E-03 2.5910E-03 5.9880E-03 9.9090E-03 7.4820E-03 5.3400E-03 1.6540E-02

2.0630E-02 3.2660E-02 7.5660E-02 2.8260E-01 1.6570E+00 3.2900E+00 3.2550E-02

1.3980E-01 1.3080E+00 1.1460E+01 9.0560E-02 7.8420E-03 2.0060E-02 7.7090E-03

7.2420E-03 9.6430E-02 7.0130E-01 1.3610E+00 6.7070E-03 1.3600E-01 1.8370E+00

5.5500E+00 2.0680E+00 1.1930E-01 3.5020E-01 2.7190E-01 1.3170E-01 1.6910E-02

6.3210E-02 3.1190E-02 1.4160E-02 5.8340E-03 1.5830E-02 8.8630E-03 4.4120E-03

1.7670E-03 1.6260E-02 8.4310E-03 3.8020E-03 1.2850E-03 8.1690E-02 7.7850E-02

6.5140E-02 3.7610E-02 1.8950E-01 6.4470E-02 2.2850E-02 8.8300E-03 7.9220E-02

4.2040E-02 2.0120E-02 8.3610E-03 5.4520E-02 2.7160E-02 1.2690E-02 5.5890E-03

7.3840E-02 3.8090E-02 1.7090E-02 6.2010E-03 1.1130E-01 5.4400E-02 2.3500E-02

8.3350E-03 4.6840E-02 2.7170E-02 1.4170E-02 6.1580E-03 8.0360E-01 3.5160E-01

1.0060E-02 5.3360E-01 1.4570E-01 3.0530E-02 6.2860E-03 8.0660E-02 5.8890E-02

3.4070E-02 1.5460E-02 1.0070E+01 2.5960E+00 5.1730E-01 1.2450E-01 6.8890E-01

3.4310E-01 1.6850E-01 8.5780E-02 5.1740E+00 8.0720E+00 3.4520E+00 1.0610E-01

8.8790E+00 2.1740E+00 3.1670E-01 1.9330E-02 6.2870E-02 2.6280E-02 1.0020E-02

3.6050E-03 1.7740E+00 2.3330E-01 1.3140E-01 4.9590E-02 1.0020E-01 1.0890E-02

2.6380E-02 2.3730E-02 1.5270E-02 3.5180E-03 5.9100E-03 6.0590E-03 5.0930E-03

2.0060E-03 6.4040E-03 6.5920E-03 4.8490E-03 7.5430E-02 6.1950E-02 2.9430E-02

8.2340E-03 2.7400E-02 9.5520E-02 5.3580E-02 1.4530E-02 2.3180E-02 3.0510E-02

2.7080E-02 1.9070E-02 9.7600E-03 2.3190E-02 2.0630E-02 1.3060E-02 2.0100E-02

2.7200E-02 2.4860E-02 1.7990E-02 1.8380E-02 4.4540E-02 4.1120E-02 2.7680E-02

1.1820E-02 1.7490E-02 1.7970E-02 1.5620E-02 3.5120E-01 1.1190E-01 3.1370E-01

3.2210E-02 2.6590E-01 1.4600E-01 3.4130E-02 4.5950E-02 2.3050E-02 2.7450E-02

2.9620E-02 4.1590E-01 5.1980E+00 2.7280E+00 5.2940E-01 1.2320E-01 3.1300E-01

2.6740E-01 1.5390E-01 3.4490E+00 3.4520E+00 1.2300E+00 3.0710E+00 2.2310E-01

4.5030E+00 2.3910E+00 4.7630E-01 8.5740E-03 2.7780E-02 2.1550E-02 1.0610E-02

1.1660E-01 1.6910E-02 1.0000E-01 2.2180E-02 2.1570E-03 5.9830E-03 1.2960E-02

1.7030E-02 2.7930E-04 2.0640E-03 3.5620E-03 4.3650E-03 5.2210E-05 1.1850E-03

3.3500E-03 5.3180E-03 5.2650E-02 1.7710E-02 1.0500E-02 6.6770E-03 1.1390E-02

1.1910E-02 3.8280E-02 3.4020E-02 4.5620E-03 1.3020E-02 1.6970E-02 1.5370E-02

2.3450E-03 5.1810E-03 1.1110E-02 1.4670E-02 2.6590E-03 1.1970E-02 1.5990E-02

1.4450E-02 1.9860E-03 1.0830E-02 2.3190E-02 2.9860E-02 1.3750E-03 6.7970E-03

1.0750E-02 1.2530E-02 1.0060E-02 3.1350E-01 6.4830E-02 6.8370E-03 1.8650E-02

1.1060E-01 1.0310E-01 8.4570E-03 2.6120E-02 1.9530E-02 8.9300E-03 1.5760E-01

1.9160E-01 2.0780E+00 2.0080E+00 4.5400E-02 5.8490E-02 1.3590E-01 1.8900E-01

1.7250E+00 1.0610E-01 3.0710E+00 7.0000E-01 8.6150E-03 1.5660E-01 1.8490E+00

1.7820E+00 1.9770E-03 4.6610E-03 1.2470E-02 1.5150E-02 2.7350E+00 1.8230E+00

9.1200E-01 5.4570E-02 4.5470E-02 3.6380E-02 2.7280E-02 2.8720E-04 2.4620E-04

2.0510E-04 1.6410E-04 7.6260E-04 6.6720E-04 5.7200E-04 4.7660E-04 3.6850E+00

2.7700E+00 1.8500E+00 9.2610E-01 1.0700E-01 8.0280E-02 5.3560E-02 2.6790E-02

4.5760E-03 3.6620E-03 2.7460E-03 1.8310E-03 2.0650E-02 1.7200E-02 1.3760E-02

1.0320E-02 2.0880E-02 1.6700E-02 1.2530E-02 8.3520E-03 1.4890E-02 1.2400E-02

9.9220E-03 7.4450E-03 2.3460E-04 2.0110E-04 1.6760E-04 1.3400E-04 3.0460E-02

2.0300E-02 1.0150E-02 2.8100E-02 2.1100E-02 1.4080E-02 7.0420E-03 1.9120E-02

1.5300E-02 1.1480E-02 7.6500E-03 6.1290E-02 4.5970E-02 3.0650E-02 1.5330E-02

1.1020E-02 9.1830E-03 7.3500E-03 5.5120E-03 3.5680E-02 1.5150E-02 1.0090E-02

5.0480E-03 4.3690E-02 3.2770E-02 2.1840E-02 1.0920E-02 3.2310E-03 2.5850E-03

1.9380E-03 1.2920E-03 2.7530E+00 1.2580E+00 2.5130E-02 1.7280E-02 9.7970E-03

4.4360E-03 4.3050E-02 1.9740E-02 7.4340E-03 2.0530E-03 8.7170E-04 7.1410E-04

4.8200E-04 2.5650E-04 6.6160E+00 4.2610E+00 1.7040E+00 3.4930E-01 8.0920E-02

4.6430E-02 2.0890E-02 6.7660E-03 1.0300E-01 8.2190E-02 6.8880E-02 5.1970E-02

5.7560E-02 4.3650E-02 2.8910E-02 1.6690E-02 3.7120E-02 2.2850E-02 1.2960E-02

6.5840E-03 2.5450E-02 1.1750E-02 4.7020E-03 1.4850E-03 1.4440E-02 6.7140E-03

2.6780E-03 8.1480E-04 3.1250E-02 3.1550E-02 1.9920E-02 5.8440E-02 3.4270E-02

1.7030E-02 6.5140E-03 5.9360E-02 3.1920E-02 1.5460E-02 6.5240E-03 7.8470E-02

4.9880E-02 2.3450E-02 7.6830E-03 6.8870E-03 4.8110E-03 2.7770E-03 1.2630E-03

1.8890E-02 3.3590E-02 3.3320E-02 2.1330E-02 5.7950E-02 4.2770E-02 1.9770E-02

5.5780E-03 3.6970E-02 1.5240E-02 5.7260E-03 2.0570E-03 1.0580E+00 1.1000E-02

6.9630E-03 8.6430E-03 9.8940E-03 2.4720E-03 1.8050E-02 1.7110E-02 1.0020E-02

5.0460E-04 2.4850E-04 3.1380E-04 4.8130E-04 3.5060E+00 1.0860E+00 2.1220E+00

1.9100E+00 3.5740E-02 2.5620E-02 2.5200E-02 1.6790E-02 6.8390E-02 7.2250E-02

4.4870E-02 1.8500E-02 3.2100E-02 2.1100E-02 2.1670E-02 2.3020E-02 1.5240E-02

1.4790E-02 1.3120E-02 9.8730E-03 3.2060E-03 1.0430E-02 9.4360E-03 5.8510E-03

1.1710E-03 6.0220E-03 5.7240E-03 3.4980E-03 3.1490E-02 1.7980E-02 5.6150E-03

2.6730E-02 2.1460E-02 1.8290E-02 1.1010E-02 1.7810E-02 2.3010E-02 2.0460E-02

1.4440E-02 4.0920E-02 2.1780E-02 2.5020E-02 1.8600E-02 3.1560E-03 2.1000E-03

2.4210E-03 2.7770E-03 1.2590E-02 3.3320E-02 1.9950E-02 5.5630E-03 3.7760E-02

8.9900E-03 1.9220E-02 1.8070E-02 4.7240E-03 1.6510E-02 1.2690E-02 6.0660E-03

1.2170E-03 6.4030E-03 6.5580E-03 4.0290E-03 1.3740E-04 1.4730E-03 8.2430E-03

1.4010E-02 5.2500E-05 2.8840E-04 2.7580E-04 1.5260E-04 2.0620E-01 2.4160E+00

1.3570E+00 3.3420E-01 7.2370E-03 2.0980E-02 1.5980E-02 7.4890E-03 4.7200E-02

2.0420E-02 1.7410E-02 1.6980E-02 8.2220E-03 1.6820E-02 1.4670E-02 9.2310E-03

4.4360E-03 7.7920E-03 8.0160E-03 6.2700E-03 2.6730E-04 1.9230E-03 5.1450E-03

7.1270E-03 8.0830E-05 6.9390E-04 2.7890E-03 4.6440E-03 1.9850E-02 5.6130E-03

2.0490E-03 7.7390E-03 1.4040E-02 1.1220E-02 5.7480E-03 3.6350E-03 9.9390E-03

1.2790E-02 1.1530E-02 8.1990E-03 2.4040E-02 1.5320E-02 5.6090E-03 3.8990E-04

1.8380E-03 1.7940E-03 1.2020E-03 6.2940E-03 2.1330E-02 5.5620E-03 2.5150E-03

5.1490E-03 2.3890E-02 1.1430E-02 1.5620E-03 1.1510E-03 2.5350E-03 7.2950E-03

9.0220E-03 1.6100E+00 6.0170E-02 7.8740E-03 2.6720E+00 1.1070E+00 1.1810E-01

6.4440E-03 4.6640E+00 1.1740E+00 1.6620E-01 8.2520E-03 5.6380E-02 1.2260E-02

3.1620E-03 7.4740E-04 2.5380E+00 2.8610E-01 5.2200E-03 8.0170E-04 2.3420E+00

4.8600E-01 4.6950E-02 1.9580E-03 9.5040E-01 4.5410E-01 4.8760E-02 2.0400E-03

4.4290E-01 1.2830E-01 3.4450E-02 6.9870E-03 6.8780E-01 1.8800E-01 4.6960E-02

7.9440E-03 3.3780E-01 2.1360E-01 2.2590E-02 1.6270E-03 3.9270E-02 6.7500E-03

1.8070E-04 1.9460E-01 2.2980E-02 1.7080E-03 9.3630E-05 2.0360E-01 3.9820E-02

3.4970E-03 3.8750E-04 2.0690E-01 3.0190E-02 9.1490E-03 9.8840E-04 1.0500E-01

3.5990E-02 8.2560E-03 1.4630E-03 3.3780E-02 9.7820E-03 6.0480E-03 4.4110E-04

6.9430E-02 8.0960E-03 1.8570E-03 1.5050E-04 1.1350E-01 3.2270E-02 8.2240E-03

1.5300E-03 2.6910E+00 6.9310E-02 8.7640E-01 3.3130E+00 1.2740E+00 1.4000E-01

9.5970E-01 4.6190E+00 2.1010E+00 1.9800E-01 2.0780E-02 2.8380E-02 8.7700E-03

2.5330E-03 7.0240E-01 1.3530E+00 2.9790E-01 4.8260E-03 6.2590E-01 1.2110E+00

5.0510E-01 5.5440E-02 4.5400E-01 1.0110E+00 4.9800E-01 5.8240E-02 1.5310E-01

2.2180E-01 1.0060E-01 3.5080E-02 1.8770E-01 3.7430E-01 1.6380E-01 5.1280E-02

1.8540E-01 3.3530E-01 2.4630E-01 2.6470E-02 1.9370E-02 1.4920E-02 4.2180E-03

5.4800E-02 1.0470E-01 2.1520E-02 1.8190E-03 5.2080E-02 1.0770E-01 4.2530E-02

3.8880E-03 6.3310E-02 1.1670E-01 1.7010E-02 9.0430E-03 3.5990E-02 9.6030E-02

3.2700E-02 8.9600E-03 2.8150E-02 7.8260E-03 2.0760E-03 3.6550E-03 1.9460E-02

3.9460E-02 5.4420E-03 1.9090E-03 3.8690E-02 5.6670E-02 2.5760E-02 8.5200E-03

1.7930E+00 4.9700E-02 1.0210E+00 2.3960E+00 1.0170E+00 9.4550E-03 1.1850E+00

5.4560E+00 1.6610E+00 7.4230E-03 1.7020E-02 1.8140E-02 5.7930E-03 1.3920E-01

7.2990E-01 8.0860E-01 2.0850E-01 1.0450E-01 6.4360E-01 7.7840E-01 3.9300E-01

4.8740E-02 4.9800E-01 6.7350E-01 3.9700E-01 4.8320E-02 1.2380E-01 1.5450E-01

8.1830E-02 4.6820E-02 1.6370E-01 2.7140E-01 1.4000E-01 8.4290E-03 2.2050E-01

2.0990E-01 1.9600E-01 8.1620E-03 1.4250E-02 8.3900E-03 1.2100E-02 5.4740E-02

6.4380E-02 1.5060E-02 8.2290E-03 5.4880E-02 6.9090E-02 3.2740E-02 2.0820E-02

5.2730E-02 7.9790E-02 1.1520E-02 8.2560E-03 3.2690E-02 7.0460E-02 2.7500E-02

2.2510E-02 4.7400E-03 3.2090E-03 2.8980E-03 5.3590E-03 1.7820E-02 2.6080E-02

3.7580E-03 1.1750E-02 3.1770E-02 3.9240E-02 2.0950E-02 1.7640E-03 5.8070E-02

7.9750E-01 2.5050E+00 4.6100E-04 1.0990E-02 9.0650E-01 5.3230E+00 2.4890E-03

7.6370E-03 1.3460E-02 1.2690E-02 1.5820E-02 1.7810E-01 5.8620E-01 6.3480E-01

8.9900E-03 1.2620E-01 5.2060E-01 7.8390E-01 2.0350E-03 5.8230E-02 3.9700E-01

7.5560E-01 1.1840E-02 5.1330E-02 1.0450E-01 1.3870E-01 7.9260E-03 5.1260E-02

1.4000E-01 2.6730E-01 7.6520E-04 9.5030E-03 1.7050E-01 2.9520E-01 2.5030E-03

1.0290E-02 1.0320E-02 1.7370E-03 1.5060E-02 4.4050E-02 4.8860E-02 9.3540E-04

9.7610E-03 4.3980E-02 6.9050E-02 5.6430E-03 2.2940E-02 4.2420E-02 5.2650E-02

1.4630E-03 8.9590E-03 2.7500E-02 6.6260E-02 1.6880E-02 2.0580E-03 4.9370E-03

1.1400E-03 1.1850E-03 6.2020E-03 1.4330E-02 1.8040E-02 2.6870E-03 1.2650E-02

2.6790E-02 3.5670E-02 2.4330E+00 2.1700E-01 6.1970E-03 4.9260E+00 9.4870E-01

1.5200E-01 7.2740E-03 3.5470E-02 8.4960E-03 2.7280E-03 6.0710E-05 5.9340E-02

1.9420E-02 2.3190E-04 6.6740E-06 1.7320E-01 3.3100E-02 2.6010E-03 7.4060E-05

1.0690E+00 3.6740E-01 2.3160E-02 2.1110E-04 1.2840E+00 1.8190E-01 3.0450E-02

3.5220E-03 3.4050E-01 2.6520E-01 3.0200E-02 3.8490E-03 1.1000E+00 4.5820E-01

6.0260E-02 3.5670E-03 1.1870E-02 6.6250E-04 2.5200E-05 6.3670E-02 1.2650E-02

3.5800E-03 3.4080E-05 2.2010E-01 1.3800E-02 1.6590E-03 1.9720E-04 3.5230E-02

1.0460E-02 3.2150E-04 4.8260E-05 2.2240E-01 4.2470E-02 4.5780E-03 2.8760E-04

3.6330E-04 2.5830E-02 3.7150E-03 2.1460E-05 3.4910E-02 1.1350E-02 3.7880E-03

1.9490E-05 3.5950E-01 3.3670E-02 3.4800E-03 5.5150E-05 4.3720E+00 2.5400E-01

7.4550E-01 4.7350E+00 2.1810E+00 2.7150E-01 1.5030E-02 1.8080E-02 4.0140E-03

2.9570E-03 2.9570E-02 1.8110E-02 1.9800E-02 2.4920E-04 5.0480E-02 9.1040E-02

3.4650E-02 3.0230E-03 4.4740E-01 1.1800E+00 4.2510E-01 2.7440E-02 3.1540E-01

7.7270E-01 1.6480E-01 3.2930E-02 3.1240E-01 6.3540E-01 2.8570E-01 3.3250E-02

2.9060E-01 1.2560E+00 4.9500E-01 6.9400E-02 5.3270E-03 5.0370E-03 4.0050E-04

2.4770E-02 3.3080E-02 6.7210E-03 3.9430E-03 3.7880E-02 1.4880E-01 1.3620E-02

1.7890E-03 1.6650E-02 1.2130E-02 1.0410E-02 2.9200E-04 5.1790E-02 1.2800E-01

4.5620E-02 5.2520E-03 3.1140E-04 1.3110E-02 9.9400E-03 2.2920E-03 1.7340E-02

1.6420E-02 4.9700E-03 4.1940E-03 7.2340E-02 2.3000E-01 3.3610E-02 4.0840E-03

3.4220E+00 1.0370E-01 1.8590E+00 6.0370E+00 2.6620E+00 6.4520E-03 1.0300E-02

1.3680E-02 2.9620E-03 8.9790E-03 2.5820E-02 7.6640E-03 1.3970E-02 9.8080E-03

5.1880E-02 6.0650E-02 2.7030E-02 5.1170E-02 5.1060E-01 8.4770E-01 3.3390E-01

7.1660E-02 3.1080E-01 5.5620E-01 1.3320E-01 5.0000E-02 3.3270E-01 4.4460E-01

2.2910E-01 6.0020E-02 4.9150E-01 9.4490E-01 4.0730E-01 1.9990E-03 4.7380E-03

2.2330E-03 9.5710E-03 1.8710E-02 2.3860E-02 4.9410E-03 5.7890E-03 4.2360E-02

1.0960E-01 1.0740E-02 5.1160E-03 1.4590E-02 5.8670E-03 7.3290E-03 7.8180E-03

5.5650E-02 9.2500E-02 3.6720E-02 2.5950E-04 5.7200E-03 9.9530E-03 5.4470E-03

8.3180E-03 1.0170E-02 1.3540E-02 3.7290E-03 1.2210E-02 7.7900E-02 1.6650E-01

2.6620E-02 9.1190E-04 1.2050E-01 2.2800E+00 6.9990E+00 1.8250E-03 7.2090E-03

8.9710E-03 8.7170E-03 1.4300E-03 1.1140E-02 2.1960E-02 1.0600E-02 1.0210E-03

1.1740E-02 4.2960E-02 6.3790E-02 2.3940E-03 6.1200E-02 4.1200E-01 9.2420E-01

1.2230E-02 8.1970E-02 2.5920E-01 5.0430E-01 6.4440E-03 5.6820E-02 2.7300E-01

5.0970E-01 3.5670E-03 6.9220E-02 4.0560E-01 1.0480E+00 5.3760E-04 2.7190E-03

3.9200E-03 2.4730E-03 1.0930E-02 1.6070E-02 1.6200E-02 7.5310E-04 6.8170E-03

3.4030E-02 9.3230E-02 9.1870E-04 6.2420E-03 1.2360E-02 6.8080E-03 6.7560E-04

9.0860E-03 4.5450E-02 9.8650E-02 2.0760E-04 1.8010E-03 7.3670E-03 7.7270E-03

2.3870E-03 9.2580E-03 9.1730E-03 7.7940E-03 1.2140E-03 1.4670E-02 6.3460E-02

1.4730E-01 1.0360E+00 4.0920E-02 9.9810E-04 1.6920E-01 2.9250E-02 1.0730E-04

1.6780E-05 1.3330E-02 9.2180E-04 2.4530E-05 1.6640E-06 2.9530E-02 7.5720E-03

4.8090E-04 9.8870E-06 1.9050E+00 1.9400E-01 2.7360E-03 3.1520E-05 1.0610E-01

2.3740E-02 3.2930E-03 3.6750E-05 3.5180E-01 1.0470E-01 1.0240E-02 7.9490E-04

1.0550E+00 2.2210E-01 5.6760E-02 3.7980E-03 4.8950E-04 1.6300E-04 2.6400E-05

1.5830E-02 2.4140E-03 2.0230E-04 3.5960E-05 8.7670E-02 1.4230E-02 2.4570E-03

1.9160E-04 3.6540E-02 6.5810E-03 2.8580E-04 5.5700E-05 4.3560E-01 5.6250E-02

5.9300E-03 1.4880E-04 1.3870E-03 6.8410E-04 3.7460E-04 8.1690E-05 3.2230E-02

3.5420E-03 1.2150E-04 1.7660E-06 3.4890E-02 9.7820E-03 1.3710E-03 3.2010E-05

2.0350E+00 7.4910E-02 6.6670E-02 7.7240E-02 2.9720E-02 9.5340E-05 4.1010E-03

7.4630E-03 9.0180E-04 2.4650E-05 1.1200E-02 1.3140E-02 7.9990E-03 5.5240E-04

3.2330E-01 1.9160E+00 2.3810E-01 3.1390E-03 3.7110E-02 5.3820E-02 2.1780E-02

3.8090E-03 1.0260E-01 4.4850E-01 1.1320E-01 1.1480E-02 2.6140E-01 1.3570E+00

4.0140E-01 6.4010E-02 3.2130E-04 1.8290E-04 9.0050E-05 5.9700E-03 7.8410E-03

2.1890E-03 1.7400E-04 2.5750E-02 5.0580E-02 1.2450E-02 2.6990E-03 1.4620E-02

1.6830E-02 6.3400E-03 2.3950E-04 1.0670E-01 4.6220E-01 5.9240E-02 6.8500E-03

1.2140E-03 5.4510E-04 2.5290E-04 1.9980E-04 1.1010E-02 1.6860E-02 3.4070E-03

1.3060E-04 1.3990E-02 1.5760E-02 8.9760E-03 1.5710E-03 2.4110E+00 1.9130E-02

6.3350E-02 4.5350E-02 2.1070E-02 9.8380E-04 4.2980E-03 4.7840E-03 6.4070E-04

2.5840E-03 1.1130E-02 8.2260E-03 6.2500E-03 4.1180E-02 6.2120E-01 2.3810E+00

1.8240E-01 9.9460E-03 3.4460E-02 3.7610E-02 1.7870E-02 2.5330E-02 1.6980E-01

3.4030E-01 9.1230E-02 7.6810E-02 4.7060E-01 1.0690E+00 3.3740E-01 1.9250E-04

1.9500E-04 1.2170E-04 1.8230E-03 5.6010E-03 4.8910E-03 1.5470E-03 6.7490E-03

2.4550E-02 3.6810E-02 1.0310E-02 4.4510E-03 1.3590E-02 1.0070E-02 4.4850E-03

1.5120E-02 1.1930E-01 3.6170E-01 4.8380E-02 1.0410E-03 3.8550E-04 2.7300E-04

1.9670E-04 2.9400E-03 1.0950E-02 1.0600E-02 2.4260E-03 3.9850E-03 1.2600E-02

1.0610E-02 7.3540E-03 3.1460E-03 2.3730E-02 5.3870E-02 4.3350E-02 1.4700E-04

1.2340E-03 3.5690E-03 3.9720E-03 3.1210E-04 3.0630E-03 9.4800E-03 1.0640E-02

1.8600E-03 4.9470E-02 4.9040E-01 2.1560E+00 1.4180E-03 1.1620E-02 3.0080E-02

4.0120E-02 2.6680E-03 2.9260E-02 1.4080E-01 3.5090E-01 6.8260E-03 8.7100E-02

3.9910E-01 1.1380E+00 1.0010E-04 1.9470E-04 1.2960E-04 4.0460E-04 2.1660E-03

4.7320E-03 4.2490E-03 1.1770E-03 7.7320E-03 2.1090E-02 3.5340E-02 8.9220E-04

5.3740E-03 1.1550E-02 9.3440E-03 1.2070E-03 1.7640E-02 9.7250E-02 3.3770E-01

8.6740E-04 2.3840E-04 3.3480E-04 1.3950E-04 4.8530E-04 3.6450E-03 9.1990E-03

9.1070E-03 6.0140E-04 4.6340E-03 1.1120E-02 1.2430E-02 3.6760E+00 5.5260E-01

3.6070E-02 1.3210E-01 5.3200E-02 3.3040E-02 1.6680E-02 8.5920E-02 5.8120E-02

3.2510E-02 1.7370E-02 7.9030E-02 3.6760E-02 1.3420E-02 3.3290E-03 4.6130E-02

2.6560E-02 1.1580E-02 3.3460E-03 4.1970E-02 2.4670E-02 1.1580E-02 3.8680E-03

8.4680E-02 3.2040E-02 8.6970E-03 1.3820E-03 9.0890E-02 5.8410E-02 1.0010E-02

3.1400E-02 1.8280E-02 8.9000E-03 3.4410E-03 8.6670E-02 3.9900E-02 1.2980E-02

3.7740E-03 6.2010E-02 3.1670E-02 1.4570E-02 6.4190E-03 4.5570E-02 1.6060E-02

6.4460E-03 3.4010E-03 1.0190E-01 1.0180E-01 6.7070E-02 4.1450E-03 5.3020E-02

2.6900E-02 9.3880E-03 2.7510E-03 3.6840E-02 1.7010E-02 5.4900E-03 1.1040E-03

3.2760E+00 6.5810E-01 5.3200E-02 8.1350E-02 2.9690E-02 1.2090E-02 5.2830E-02

3.4440E-02 3.6180E-02 2.2050E-02 2.5940E-02 3.0990E-02 2.7330E-02 1.5130E-02

2.3310E-02 1.5600E-02 1.5130E-02 1.1700E-02 1.9690E-02 1.4970E-02 1.4900E-02

1.1940E-02 1.5760E-02 3.8260E-02 3.0290E-02 1.0800E-02 6.6310E-02 1.7590E-02

3.5490E-02 1.8270E-02 1.2950E-02 1.0070E-02 5.2290E-03 3.2710E-02 3.0470E-02

3.1290E-02 1.3070E-02 3.1680E-02 2.6570E-02 2.0630E-02 7.1320E-03 9.0760E-03

2.5180E-02 1.4090E-02 5.2800E-03 7.6390E-02 7.5710E-02 8.0540E-03 4.5970E-02

2.6900E-02 1.7350E-02 1.7620E-02 7.1640E-03 1.3990E-02 1.2750E-02 1.2390E-02

6.1970E-03 2.1820E+00 3.3040E-02 2.9690E-02 4.3050E-02 1.1760E-02 2.4220E-02

3.3190E-02 1.7620E-02 2.1980E-02 4.9960E-03 1.9280E-02 1.9550E-02 2.2460E-02

7.5690E-03 1.3340E-02 1.1940E-02 1.0960E-02 5.8500E-03 1.1930E-02 1.1120E-02

1.2090E-02 3.8930E-04 1.5760E-02 2.1950E-02 2.5300E-02 3.1800E-02 3.0060E-02

1.7690E-02 8.8960E-03 1.0060E-02 7.4010E-03 4.6490E-03 6.7810E-03 2.6660E-02

1.5080E-02 2.3200E-02 1.4570E-02 2.0640E-02 1.1570E-02 1.0570E-02 3.4200E-03

6.7260E-03 1.5270E-02 1.0360E-02 5.0920E-02 3.1960E-02 3.3850E-02 2.0690E-02

9.3880E-03 1.7630E-02 9.0920E-03 9.9130E-03 2.8430E-03 1.0460E-02 7.5250E-03

9.4130E-03 1.6680E-02 1.2090E-02 1.1760E-02 1.8230E-02 1.0160E-02 1.2800E-02

1.7640E-02 7.8980E-03 4.8470E-04 5.0180E-03 1.3320E-02 1.4320E-02 1.2520E-03

7.0870E-03 8.2830E-03 5.2890E-03 9.1460E-04 5.3700E-03 7.9510E-03 6.2610E-03

3.5640E-05 3.8500E-04 1.1120E-02 2.0170E-02 9.8880E-03 2.6660E-02 3.2060E-03

3.4410E-03 5.2270E-03 4.6470E-03 2.1900E-03 1.7010E-03 5.4150E-03 1.7530E-02

1.1230E-02 6.4190E-03 7.1320E-03 1.0570E-02 4.5680E-03 1.5170E-03 1.6010E-03

3.9160E-03 1.0680E-02 2.5470E-02 6.7820E-03 3.5180E-02 1.2790E-03 2.7510E-03

7.1640E-03 9.9130E-03 3.1850E-03 2.8400E-04 2.9570E-03 6.9930E-03 4.8870E-03

1.3350E+00 7.7160E-02 7.6260E-03 4.6070E+00 1.5470E+00 3.2830E-01 3.5870E-02

8.9610E+00 2.0430E+00 3.3550E-01 3.1730E-02 1.3910E-01 5.3610E-02 2.1120E-02

5.6800E-03 1.6590E-01 5.7740E-02 1.7920E-02 4.0220E-03 4.1540E-02 1.8150E-02

8.2900E-03 2.3570E-03 3.3170E-01 1.3010E-01 2.2940E-02 6.4530E-01 2.9380E-01

8.3630E-02 1.2850E-02 4.8410E-01 1.5120E-01 3.2370E-02 5.4430E-03 1.5870E-01

7.8060E-02 2.4490E-02 7.2270E-03 3.7280E-02 1.7340E-02 6.9910E-03 2.4880E-03

1.9960E-02 1.8750E-02 1.4510E-02 8.1340E-03 5.8640E-02 3.4710E-02 1.7210E-02

6.2680E-03 6.4350E-02 3.4150E-02 1.4510E-02 5.3820E-03 1.4710E+00 8.6990E-02

1.1170E+00 1.9420E+00 1.4240E+00 4.1150E-01 5.0880E-01 5.3150E+00 2.2750E+00

4.3840E-01 4.1250E-02 6.7520E-02 3.4010E-02 2.1890E-02 2.5820E-02 1.0370E-01

6.1230E-02 2.1280E-02 1.0570E-02 2.1480E-02 1.1410E-02 9.2480E-03 1.7710E-01

1.0790E-01 7.8600E-02 2.9290E-01 2.0500E-01 1.9310E-01 8.5660E-02 1.0420E-01

2.2080E-01 1.4240E-01 3.7990E-02 7.8050E-02 4.8880E-02 5.5810E-02 1.8590E-02

1.2410E-02 1.5890E-02 1.3060E-02 7.0880E-03 1.4970E-02 1.5650E-02 1.0580E-02

4.8210E-03 3.4710E-02 2.4420E-02 1.7660E-02 1.0830E-02 2.9300E-02 2.3750E-02

2.2680E-02 1.3040E-02 1.0280E+00 9.3830E-02 1.0630E+00 1.0100E+00 1.1000E+00

3.0810E-03 5.3840E-01 3.3380E+00 1.8130E+00 1.3700E-02 2.2340E-02 4.8640E-02

2.5090E-02 5.3210E-03 2.1170E-02 7.8480E-02 3.5130E-02 3.8160E-03 4.0730E-03

1.7120E-02 1.0140E-02 7.4650E-02 1.0150E-01 6.6240E-02 8.3370E-02 1.9260E-01

1.2770E-01 1.1400E-01 1.0240E-02 1.0010E-01 1.1790E-01 1.0890E-01 2.4480E-02

5.5810E-02 2.0980E-02 3.2870E-02 3.1210E-03 8.7930E-03 9.9600E-03 1.0360E-02

9.9820E-03 1.1360E-02 6.4530E-03 2.8900E-03 1.7210E-02 1.7660E-02 1.5840E-02

7.6960E-03 9.4040E-03 1.9600E-02 1.4200E-02 1.5970E-02 2.6130E-03 1.0840E-01

7.3600E-01 7.8650E-01 2.8030E-04 3.1240E-03 3.7750E-01 2.4640E+00 1.9380E-03

1.3340E-02 1.3860E-02 2.5760E-02 4.3050E-04 5.3620E-03 1.4680E-02 4.0670E-02

9.9830E-06 4.2380E-03 3.1030E-03 1.0220E-02 2.2460E-02 6.4510E-02 3.4200E-02

1.2850E-02 8.5480E-02 1.1390E-01 4.6710E-02 1.8150E-03 9.3730E-03 6.8710E-02

8.8700E-02 7.2270E-03 1.8580E-02 3.2870E-02 8.3810E-03 7.4030E-04 2.5090E-03

5.8140E-03 6.9960E-03 4.9910E-03 5.9910E-03 2.9560E-03 1.4040E-03 6.2680E-03

1.0840E-02 7.6960E-03 4.4050E-03 2.6470E-03 7.0510E-03 1.2020E-02 7.8770E-03

3.3370E+00 3.0560E-01 1.7200E-02 8.2130E+00 2.1610E+00 3.3270E-01 2.3060E-02

4.9430E-01 1.5390E-01 3.1940E-02 5.5150E-03 7.8040E-01 2.5230E-01 5.6300E-02

7.1010E-03 4.2230E-01 1.1820E-01 1.8740E-02 1.4880E-03 4.0900E-01 2.0840E-02

3.2570E-03 6.2850E-01 1.2900E-01 1.4830E-02 8.3620E-04 7.4630E-01 2.5330E-01

5.8980E-02 6.2620E-03 1.3760E-01 4.7550E-02 9.6990E-03 3.0740E-03 8.0320E-02

3.3830E-02 1.2760E-02 3.6890E-03 3.0940E-02 5.8820E-02 1.1840E-02 7.6000E-03

6.1620E-02 2.8080E-02 1.1260E-02 2.4470E-03 8.9210E-02 3.2670E-02 7.6850E-03

1.2840E-03 3.6560E+00 3.7200E-01 1.6690E+00 4.2540E+00 2.2740E+00 4.0730E-01

1.5310E-01 2.2270E-01 1.3850E-01 3.4690E-02 2.0150E-01 3.8240E-01 2.4390E-01

6.6300E-02 7.4990E-02 2.2350E-01 1.2930E-01 2.2810E-02 1.4570E-01 1.8850E-01

1.2160E-02 1.8980E-01 2.9660E-01 1.1570E-01 1.6460E-02 2.5210E-01 3.2360E-01

2.0840E-01 6.8490E-02 5.9190E-02 5.1980E-02 4.0460E-02 6.7260E-03 2.9530E-02

3.7370E-02 2.4680E-02 1.3030E-02 2.4750E-02 2.7350E-02 3.1410E-02 3.8420E-03

3.2710E-02 2.6540E-02 1.3880E-02 9.6040E-03 3.2650E-02 3.6030E-02 2.7600E-02

8.3980E-03 2.8040E+00 1.3300E-01 1.7850E+00 2.7060E+00 1.8320E+00 3.1830E-02

1.3790E-01 1.3400E-01 1.0830E-01 3.0500E-02 1.9470E-01 2.5000E-01 2.0430E-01

1.8690E-03 8.6090E-02 1.4560E-01 1.0500E-01 4.1860E-02 1.3930E-01 7.8510E-02

4.2040E-02 1.7260E-01 1.6990E-01 7.9490E-02 5.8820E-02 2.0770E-01 2.0600E-01

1.6740E-01 1.8750E-02 4.8780E-02 2.4820E-02 2.6440E-02 9.6520E-03 2.1010E-02

2.6710E-02 2.1120E-02 1.8570E-02 1.4550E-02 2.1600E-02 1.0800E-02 1.5920E-02

1.7480E-02 2.0720E-02 7.9330E-03 7.6840E-03 2.7590E-02 2.1430E-02 2.1790E-02

2.2180E-03 1.6030E-01 1.3820E+00 2.7610E+00 5.5150E-03 3.4610E-02 1.0810E-01

1.2660E-01 2.4290E-03 3.6200E-02 1.5750E-01 2.6130E-01 9.5420E-05 2.1320E-03

6.5430E-02 1.5830E-01 9.4950E-03 5.5460E-02 1.0810E-01 5.6340E-03 5.1260E-02

1.3270E-01 1.1980E-01 6.2630E-03 6.8380E-02 1.6700E-01 1.8510E-01 6.1190E-03

1.7990E-02 3.5880E-02 1.9180E-02 2.3180E-03 9.4850E-03 1.7300E-02 2.3250E-02

1.2370E-02 8.8440E-03 8.1860E-03 1.4270E-02 5.5640E-03 1.4780E-02 1.2050E-02

8.9720E-03 1.2840E-03 8.3970E-03 2.1790E-02 2.0860E-02 3.1400E+00 1.2240E-01

4.9950E-03 5.0240E-01 1.2080E-01 2.5700E-02 5.3610E-03 3.4400E-01 9.0740E-02

1.3330E-02 6.0890E-04 2.5950E-01 8.0110E-02 1.9660E-02 2.5900E-03 2.1790E-02

8.7230E-03 1.1180E-03 7.3260E-01 5.8620E-02 1.0880E-02 1.9810E-03 4.9620E-01

1.0160E-01 1.1730E-02 1.3760E-03 6.9570E-02 1.7890E-02 2.9260E-03 1.0150E-03

2.3570E-01 5.6150E-02 9.4760E-03 1.8540E-03 7.0450E-02 3.1190E-02 1.6020E-02

3.4960E-03 8.8050E-02 2.0680E-02 6.7180E-03 5.5620E-04 1.5640E-01 4.5780E-02

1.1400E-02 1.4340E-03 3.8670E+00 1.4630E-01 1.5010E-01 2.6340E-01 1.0630E-01

2.6050E-02 9.0450E-02 1.7560E-01 9.2810E-02 1.5860E-02 6.9850E-02 1.3700E-01

7.2920E-02 2.2240E-02 1.4170E-02 7.1260E-03 5.0610E-03 1.8190E-01 4.3210E-01

4.6420E-02 9.5800E-03 1.3110E-01 2.6150E-01 1.0370E-01 1.2980E-02 2.8050E-02

3.0400E-02 1.5860E-02 1.8720E-03 5.6070E-02 1.2980E-01 5.7170E-02 1.0140E-02

5.8720E-02 2.2710E-02 1.0880E-02 8.6640E-03 3.3780E-02 4.5500E-02 1.0510E-02

6.8860E-03 5.4560E-02 7.6410E-02 3.5740E-02 1.2490E-02 2.9640E+00 3.9140E-02

1.3520E-01 1.7810E-01 8.4400E-02 1.3300E-02 9.2510E-02 1.1840E-01 7.5990E-02

1.4580E-02 6.3030E-02 1.0020E-01 6.3830E-02 7.9170E-03 7.7560E-03 5.4090E-03

4.1220E-02 1.8500E-01 2.7820E-01 3.1640E-02 2.3480E-02 1.3340E-01 1.7010E-01

8.0610E-02 9.1230E-03 2.4460E-02 1.6730E-02 1.0630E-02 9.4660E-03 5.7140E-02

9.0580E-02 4.6190E-02 4.6970E-02 1.4370E-02 1.1490E-02 7.9390E-03 1.3550E-02

2.3460E-02 3.3160E-02 7.1520E-03 1.6390E-02 4.3800E-02 5.3550E-02 2.9630E-02

9.0250E-03 4.2190E-02 1.1130E-01 1.6520E-01 6.0830E-04 1.5840E-02 7.5820E-02

1.3300E-01 1.4130E-03 1.6390E-02 5.4380E-02 1.0920E-01 3.5700E-03 8.0180E-03

4.2230E-03 8.9730E-03 4.7910E-02 1.4700E-01 1.9810E-01 3.0620E-03 2.7620E-02

1.0780E-01 1.6720E-01 2.9500E-03 9.5110E-03 1.9330E-02 1.3920E-02 1.8530E-03

1.0130E-02 4.6170E-02 9.4660E-02 3.5230E-02 7.7920E-03 1.2310E-02 5.2560E-03

3.8200E-03 1.4760E-02 1.9200E-02 2.0200E-02 2.9900E-03 1.8350E-02 3.7580E-02

4.8620E-02 2.0340E+00 7.3200E-02 3.7830E-03 6.1280E+00 1.5540E+00 2.1480E-01

1.3050E-02 1.1810E+01 2.1580E+00 2.5730E-01 1.5260E-02 4.6300E-01 5.7280E-02

1.9700E-02 5.7600E-01 1.8650E-01 3.1030E-02 8.1630E-03 6.4340E-01 1.5040E-01

2.3770E-02 3.2730E-03 1.8600E-01 5.8130E-02 8.2270E-03 2.3220E-03 8.0730E-02

2.4680E-02 6.7830E-03 1.4220E-03 2.5170E-02 2.7680E-02 1.0190E-02 4.6870E-03

4.5030E-02 2.1260E-02 7.1130E-03 1.1630E-03 9.4910E-02 2.7690E-02 7.3870E-03

1.3740E-03 2.4630E+00 8.9480E-02 1.1830E+00 3.2090E+00 1.6800E+00 2.6420E-01

8.6970E-01 7.7170E+00 2.5290E+00 3.1770E-01 1.8940E-01 2.1490E-01 2.7690E-02

2.3550E-01 2.1770E-01 1.6390E-01 2.4170E-02 1.5020E-01 3.3220E-01 1.4750E-01

2.6740E-02 7.4400E-02 6.9670E-02 5.3520E-02 6.1630E-03 1.9640E-02 4.2850E-02

2.1780E-02 7.4210E-03 2.0140E-02 1.6200E-02 1.3550E-02 4.2950E-03 2.4580E-02

1.6590E-02 1.1800E-02 6.6740E-03 2.7680E-02 4.7470E-02 2.2020E-02 7.9170E-03

1.8560E+00 7.1500E-02 1.3100E+00 2.0300E+00 1.3430E+00 6.1650E-03 1.0280E+00

5.5440E+00 2.0110E+00 7.3650E-02 1.6050E-01 8.9760E-02 6.7240E-02 1.9950E-01

1.0490E-01 1.0930E-01 2.3760E-02 1.4750E-01 2.0710E-01 1.1430E-01 1.9810E-02

6.5300E-02 3.1760E-02 3.5970E-02 4.4670E-03 1.6780E-02 2.9670E-02 1.8170E-02

1.5100E-02 9.8370E-03 1.0230E-02 5.4700E-03 1.0770E-02 1.3910E-02 1.2770E-02

7.2720E-03 7.3870E-03 2.2020E-02 3.1930E-02 1.7480E-02 1.0010E-03 8.6400E-02

1.0040E+00 2.0780E+00 5.1080E-04 6.8550E-03 7.7470E-01 4.9490E+00 2.9860E-02

7.1220E-02 1.1480E-01 1.8070E-02 6.9860E-02 1.4950E-01 8.3160E-02 3.2730E-03

2.6730E-02 1.1430E-01 1.8420E-01 5.0640E-03 2.0870E-02 4.9110E-02 2.6860E-02

7.8110E-04 4.7450E-03 1.3720E-02 2.7040E-02 1.0070E-02 5.8700E-03 5.7460E-03

5.4080E-03 3.1230E-03 1.0870E-02 1.0060E-02 5.7670E-03 1.3740E-03 7.9170E-03

1.7480E-02 2.5770E-02 3.8400E+00 2.6160E-01 1.1230E-02 6.9500E+00 1.7720E+00

3.2670E-01 1.4140E-02 8.0070E-02 4.5610E-02 1.2560E-02 2.6130E-01 1.8390E-02

4.1970E-03 6.9920E-04 7.4040E-01 1.7400E-01 3.7310E-02 7.9630E-03 1.0930E-01

1.5540E-02 4.2050E-03 8.8790E-04 2.8070E-01 6.6800E-02 1.1730E-02 1.9060E-03

1.0180E-02 3.1680E-02 6.5530E-03 4.1160E-04 1.0030E-01 2.3860E-02 8.4150E-03

1.3970E-03 1.8980E-01 6.2950E-02 4.9090E-03 3.7640E-04 4.5100E+00 3.1340E-01

1.4170E+00 7.5370E+00 3.2020E+00 3.8950E-01 6.1390E-02 3.0310E-02 2.3520E-02

6.2420E-02 1.5750E-01 1.3260E-02 3.7920E-03 2.1690E-01 3.9280E-01 1.5290E-01

3.7660E-02 3.3090E-02 6.1040E-02 1.0600E-02 3.5240E-03 6.6780E-02 1.5520E-01

6.6030E-02 1.2900E-02 8.4840E-03 1.6390E-02 1.1830E-02 3.9900E-03 3.8750E-02

5.2710E-02 1.2590E-02 7.6040E-03 8.0080E-02 1.4280E-01 6.8040E-02 5.6230E-03

3.5120E+00 1.4920E-01 2.6270E+00 5.3860E+00 2.5730E+00 4.1380E-02 3.0510E-02

2.0280E-02 1.4150E-02 6.3680E-02 1.0260E-01 8.9760E-03 5.6460E-02 1.9590E-01

2.6690E-01 1.2130E-01 1.0350E-02 2.9370E-02 3.9870E-02 7.0180E-03 1.1730E-02

6.6030E-02 1.0880E-01 5.4080E-02 6.7870E-03 7.3600E-03 1.1480E-02 6.9240E-03

1.6190E-02 2.7490E-02 3.7470E-02 8.1920E-03 1.2400E-02 8.4380E-02 8.8140E-02

5.2330E-02 3.7000E-04 1.7790E-01 2.0660E+00 5.8080E+00 2.4540E-02 3.1820E-02

1.2770E-02 3.1720E-03 1.6370E-02 5.0590E-02 7.1900E-02 1.3200E-02 6.0870E-02

1.6110E-01 2.4540E-01 3.1910E-03 1.0960E-02 2.3270E-02 2.7540E-02 1.9060E-03

1.2900E-02 5.4070E-02 1.1160E-01 5.0900E-03 2.5420E-03 8.7840E-03 7.9980E-03

5.5410E-03 1.6530E-02 2.1920E-02 2.3010E-02 1.1670E-03 1.4880E-02 6.7700E-02

9.4190E-02 1.5030E+00 1.1930E-01 4.0080E-03 1.6550E-02 2.0230E-03 1.0620E-04

7.2020E-02 2.4800E-02 7.8060E-03 1.7410E-04 1.9580E+00 1.5270E-01 2.0420E-02

2.6460E-03 3.5110E-02 9.6950E-03 1.4240E-03 1.9090E-04 4.8150E-01 8.5960E-02

1.0130E-02 8.8570E-04 5.7210E-04 2.4150E-02 3.6110E-03 1.0210E-04 3.9330E-02

8.5590E-03 6.5090E-04 5.2190E-05 2.5070E-01 2.3320E-02 4.2050E-03 2.4900E-04

3.0440E+00 1.3940E-01 8.1590E-03 6.6350E-03 1.2120E-03 3.6930E-02 3.2450E-02

1.2000E-02 8.4590E-03 3.6440E-01 1.2990E+00 1.4780E-01 2.1830E-02 1.5970E-02

1.4570E-02 7.9210E-03 1.3250E-03 1.0570E-01 2.8680E-01 9.1380E-02 1.1460E-02

4.9030E-04 1.2350E-02 9.3370E-03 2.1960E-03 1.5930E-02 1.7220E-02 7.8340E-03

6.5360E-04 5.0290E-02 1.6340E-01 2.0190E-02 4.7680E-03 3.6830E+00 3.4950E-03

6.4750E-03 3.3690E-03 1.7630E-02 2.2060E-02 2.6330E-02 8.8390E-03 6.2200E-02

3.9700E-01 9.5190E-01 1.1710E-01 5.7640E-03 1.2940E-02 8.8960E-03 5.5560E-03

1.6600E-02 1.1270E-01 2.1010E-01 7.3830E-02 4.0860E-04 5.4750E-03 9.3280E-03

5.1020E-03 4.8650E-03 1.4170E-02 1.0130E-02 5.5330E-03 1.0150E-02 5.1450E-02

1.2070E-01 1.6660E-02 1.1450E-03 4.4300E-03 5.0950E-03 5.1710E-03 1.9510E-02

1.9740E-02 1.5470E-02 9.1340E-03 7.2430E-02 3.2150E-01 8.1980E-01 1.5120E-03

6.5580E-03 1.0940E-02 7.5180E-03 1.7320E-03 1.9210E-02 9.2740E-02 2.1720E-01

3.2690E-04 1.8100E-03 6.9180E-03 7.1960E-03 9.5800E-04 5.8530E-03 1.1920E-02

9.0300E-03 1.4140E-03 1.1860E-02 4.2500E-02 1.0330E-01 6.8760E-01 4.8640E-02

2.5280E+00 1.2060E+00 4.0720E-01 7.0990E-02 7.7310E+00 2.7210E+00 7.4130E-01

1.3490E-01 5.3600E-02 2.9800E-02 1.4680E-02 5.7400E-03 2.2650E-02 1.6680E-02

9.9300E-03 4.5380E-03 4.1110E-02 1.0710E-01 8.8230E-02 5.3650E-02 9.1100E-02

5.4420E-02 3.0860E-02 1.4040E-02 4.1000E-02 2.5910E-02 1.7420E-02 1.1390E-02

5.7910E-01 8.0890E-01 7.5560E-01 7.5560E-01 4.8970E-01 3.3700E-01 3.5490E+00

2.6340E+00 1.0490E+00 2.2530E-02 2.0970E-02 1.6540E-02 9.1660E-03 1.1900E-02

6.2080E-03 7.7970E-03 9.9580E-03 2.7410E-02 8.8230E-02 5.9640E-02 1.8120E-02

4.3080E-02 4.1290E-02 2.8600E-02 1.3980E-02 1.7740E-02 2.2080E-02 1.5760E-02

8.2010E-03 3.2670E-02 5.6700E-01 5.2320E-01 2.8240E-01 1.9370E-02 2.1430E-01

1.4920E+00 2.0620E+00 6.9140E-03 1.1520E-02 1.0290E-02 5.8590E-03 1.2770E-03

7.0010E-03 6.1810E-03 3.4390E-03 1.3700E-02 5.3640E-02 1.8120E-02 1.1230E-02

1.8160E-02 1.8530E-02 1.6700E-02 1.0060E-02 9.6190E-03 6.7050E-03 7.8260E-03

7.7540E-03 3.0410E+00 4.5570E-01 3.3030E-02 8.2790E+00 3.0370E+00 6.6960E-01

7.8160E-02 1.1950E-01 5.8360E-02 1.5750E-02 2.7670E-03 5.7910E-02 3.1240E-02

1.4880E-02 5.9770E-03 1.4440E-01 1.4220E-01 3.8580E-02 1.6200E-02 1.3910E-01

7.2720E-02 2.8190E-02 1.0460E-02 1.2820E-01 5.1530E-02 1.4110E-02 2.1620E-03

2.7220E+00 5.3640E-01 2.2840E+00 3.2080E+00 2.7510E+00 8.3280E-01 5.8360E-02

3.2480E-02 4.1010E-02 1.5390E-02 2.3910E-02 2.4100E-02 2.0640E-02 1.4070E-02

1.0830E-01 6.2370E-02 6.8730E-02 1.6640E-02 7.2720E-02 4.8860E-02 4.8880E-02

1.7380E-02 4.0300E-02 4.8530E-02 4.1370E-02 1.6840E-02 1.8150E+00 1.9650E-01

2.1760E+00 1.5630E+00 2.1240E+00 1.5750E-02 4.1010E-02 1.6660E-02 2.4750E-02

7.7800E-03 1.5190E-02 1.6170E-02 1.6000E-02 7.2210E-02 2.9120E-02 4.1790E-02

2.7600E-02 2.8200E-02 4.8880E-02 2.1290E-02 2.6860E-02 6.1590E-03 3.3110E-02

2.7000E-02 3.1780E-02 8.6840E-03 2.2190E-01 1.5060E+00 1.2950E+00 2.7670E-03

1.5390E-02 2.4760E-02 6.0770E-03 1.9420E-03 6.0380E-03 9.6650E-03 9.8760E-03

3.6090E-02 1.2540E-02 1.5070E-02 2.1630E-02 1.0460E-02 1.7380E-02 2.6870E-02

7.9040E-03 3.1470E-04 6.8880E-03 2.2580E-02 1.9250E-02 3.1080E+00 2.2830E-01

1.2220E-02 1.8410E-01 7.9670E-02 2.3260E-02 5.6960E-03 1.2120E-01 5.8660E-02

2.2130E-02 6.6730E-03 5.2040E-02 3.5780E-01 3.5480E-02 5.5960E-03 3.6520E-01

1.1720E-01 1.5410E-02 4.0180E-03 1.1590E-01 5.9300E-02 2.0840E-02 3.5260E-03

3.5230E+00 2.7890E-01 9.3850E-02 6.6990E-02 5.4510E-02 1.8810E-02 5.2540E-02

4.9430E-02 4.2480E-02 2.2340E-02 4.1630E-02 1.4000E-01 1.5830E-01 2.0670E-02

1.4880E-01 1.3160E-01 1.0880E-01 1.2060E-02 5.9270E-02 4.0380E-02 3.7290E-02

2.2730E-02 2.6870E+00 3.7430E-02 6.3600E-02 4.0340E-02 3.4240E-02 1.6590E-02

3.7930E-02 3.3450E-02 3.6190E-02 3.1220E-02 4.7060E-02 1.2170E-01 7.0470E-02

3.8750E-02 1.3080E-01 5.7980E-02 7.3530E-02 2.0830E-02 3.7280E-02 3.0600E-02

3.1050E-02 1.2450E-02 3.5610E-02 4.5820E-02 2.3230E-02 4.2910E-03 1.6000E-02

3.0880E-02 3.2010E-02 2.0810E-02 1.3530E-02 5.6610E-02 8.9390E-02 9.2020E-03

4.1830E-02 9.8790E-02 5.0920E-02 3.5260E-03 2.2730E-02 3.1040E-02 2.2550E-02

1.8770E+00 3.2720E-01 1.1590E-01 6.3160E+00 1.5990E+00 3.5650E-01 8.6270E-02

1.1220E+00 2.1160E+00 1.1740E+00 1.0330E-01 1.8800E+00 5.9990E-01 1.0760E-01

6.4730E-03 2.3080E+00 7.1090E-01 1.4400E-01 1.7980E-02 1.8140E+00 2.1210E-01

5.2730E-01 3.6810E+00 1.6600E+00 4.0040E-01 8.4100E-01 1.3990E+00 3.6190E-01

7.8310E-01 5.9890E-01 7.2400E-01 4.9370E-01 1.2910E-01 4.8370E-01 1.0530E+00

6.7460E-01 1.7740E-01 1.2030E+00 8.1420E-02 4.6640E-01 2.3140E+00 1.3100E+00

5.6050E-01 5.8620E-01 6.8160E-01 4.2810E-01 1.0730E-01 4.9330E-01 3.7470E-01

3.2180E-01 3.9670E-02 4.7080E-01 5.6530E-01 5.1900E-01 2.6610E-02 5.4610E-02

3.1330E-01 1.6900E+00 2.8030E-01 1.3780E-01 6.1010E-01 9.9960E-02 6.4730E-03

1.2890E-01 3.2170E-01 1.9150E-01 3.4630E-03 4.2070E-02 3.2610E-01 4.2640E-01

5.2220E+00 3.7370E-01 4.3980E-02 1.9530E-01 7.7020E-02 2.7360E-02 6.0020E-03

5.1480E+00 2.5630E-01 5.5330E-03 1.1390E-03 1.0600E+01 2.1260E+00 1.8200E-01

7.4130E-03 6.1420E+00 4.2500E-01 1.6270E-01 4.7690E-02 2.9520E-02 1.4770E-02

1.1420E+00 3.0960E+00 2.6620E-01 4.6850E-03 2.7600E+00 5.5390E+00 2.2560E+00

2.1520E-01 4.7680E+00 1.3010E-01 2.7100E-02 2.8700E-02 1.7780E-02 1.8390E-01

1.2800E+00 1.9570E+00 1.8620E-01 4.3300E-01 2.8930E+00 3.5490E+00 1.7470E+00

9.7590E-02 1.3750E-02 2.4810E-02 1.6620E-02 1.7840E-02 2.3880E-01 1.0170E+00

1.4310E+00 3.4820E-02 5.2830E-01 2.3290E+00 3.5750E+00 7.4440E-01 4.9630E-01

2.4810E-01 2.0940E+00 1.5750E+00 1.0520E+00 5.2680E-01 1.8580E-02 1.4860E-02

1.1150E-02 7.4330E-03 2.3260E+00 1.0550E+00 4.4490E+00 3.0230E+00 1.2300E+00

2.5210E-01 3.6330E-01 1.4880E-01 6.1690E-02 2.9020E-02 9.0490E-01 2.5680E+00

5.8340E-01 1.4460E+00 1.3790E+00 4.5270E-02 1.7740E-01 1.2800E-01 5.1660E-02

1.4640E-01 1.7700E+00 9.1060E-01 1.6220E-01 2.2020E-02 1.8430E-02 6.8970E-02

9.1770E-02 2.3230E+00 2.9260E-01 3.4360E-02 2.2030E+00 7.2400E-01 1.8970E-01

4.6630E-02 2.2360E+00 3.1990E-01 5.1630E-01 1.0180E+00 6.3760E-01 2.0270E-01

1.5140E+00 8.5230E-02 4.4870E-01 5.6940E-01 4.8080E-01 1.9660E-02 7.0820E-02

3.0020E-01 4.0140E-01 4.4470E+00 4.4910E-01 2.5290E-02 4.7950E+00 5.4730E-01

3.6900E+00

5000.00

5.9740E+00 1.6790E+00 7.8160E-01 3.3030E-01 4.0510E+00 1.7140E+00 5.8530E-01

1.6450E-01 1.3580E+01 5.4710E-01 1.8580E-01 5.6310E-02 9.0070E-01 4.6670E-01

2.1020E-02 3.3000E-01 1.0820E-01 7.4270E-03 6.4870E-01 3.1850E-01 9.6230E-02

1.6130E-02 3.6520E-01 2.1480E-01 1.1070E-01 3.6990E-02 2.4360E-01 2.0690E-01

7.7830E-02 1.9930E-02 2.6250E-01 1.4960E-01 7.0140E-02 3.5480E-02 2.1320E+01

7.8060E+00 1.5380E+00 7.0780E-01 2.7650E-01 2.9410E+01 5.1860E+00 6.5290E-01

9.3730E-02 3.7310E-02 1.6330E-02 1.1770E+01 2.1060E-01 4.9470E-02 1.4970E+00

2.7470E-01 1.4160E-02 2.6810E-03 2.4910E+00 3.2110E-01 3.4400E-02 1.0680E-02

8.7050E-01 1.6950E-02 9.2650E-03 1.2160E-01 8.5670E-02 3.7090E-02 9.0770E-03

7.2210E-02 4.6230E-02 1.8210E-02 9.2330E-03 3.2540E-02 1.0770E-02 3.2260E-03

8.1870E-02 3.9850E-02 1.7640E-02 6.1630E-03 2.7380E-02 1.6570E-02 7.1060E-03

1.7950E-03 7.1300E-02 4.0090E-02 1.3670E-02 2.4780E-03 5.2220E-02 2.1110E-02

4.8200E-03 5.3370E-04 3.9160E-02 1.5560E-02 6.0580E-03 1.7700E-03 3.4910E-02

1.1500E-02 3.4910E-03 1.0970E-03 5.8140E-02 2.6480E-02 1.1430E-02 3.9390E-03

7.6320E-02 2.8440E-02 7.5010E-03 1.1270E-03 4.9110E-02 1.5320E-02 3.8730E-03

7.0240E-04 4.9970E-02 2.3490E-02 8.5860E-03 1.9000E-03 3.8170E-02 1.3480E-02

6.4030E-03 3.2530E-02 2.0780E-02 7.3850E-03 1.6160E-03 2.9510E-02 1.6580E-02

1.0150E-02 7.1050E-03 1.3580E-02 1.0050E-02 3.9050E-03 9.2300E-04 1.1060E-02

8.5470E-03 4.5630E-03 1.4800E-03 2.8320E-02 9.7940E-03 7.7500E-03 4.4750E-03

1.5540E-02 1.0520E-02 5.5680E-03 2.5240E-03 1.9800E-02 1.3630E-02 6.2260E-03

1.8340E-03 5.6880E+00 1.2970E+00 4.7500E-01 1.8510E+00 1.6900E+00 1.1400E+00

5.2210E-01 2.9340E+00 8.0990E+00 3.4020E-01 1.2390E-01 6.4010E-01 2.0910E-01

2.7020E-01 1.9180E-01 1.0430E-01 6.2010E-02 2.8460E-01 2.3700E-01 2.4880E-01

1.0050E-01 2.0010E-01 2.2260E-01 1.0330E-01 9.2950E-02 1.1920E-01 2.0630E-01

1.3900E-01 7.5180E-02 1.6380E-01 1.3490E-01 1.0220E-01 2.7180E-02 6.1430E+00

1.1030E+01 8.5460E+00 1.3110E+00 4.8470E-01 7.4140E-01 1.9190E+01 6.9400E+00

1.1840E+00 1.1770E-01 2.2950E-02 3.5010E+00 5.9740E+00 1.3030E-01 5.0010E-01

6.6220E-01 2.5730E-01 1.1640E-02 4.8820E-01 1.4430E+00 3.2490E-01 2.9620E-02

3.3140E-01 3.7960E-01 6.4640E-03 8.6840E-02 3.7140E-02 4.4500E-02 3.4310E-02

5.6530E-02 3.2340E-02 2.0450E-02 7.3880E-03 1.8950E-02 1.3100E-02 5.1700E-03

3.8750E-02 3.6690E-02 2.5130E-02 1.5830E-02 1.5210E-02 9.7770E-03 1.0260E-02

7.0370E-03 3.5030E-02 2.2550E-02 3.0210E-02 1.4230E-02 2.6920E-02 1.7750E-02

1.3790E-02 4.4790E-03 1.9960E-02 1.7300E-02 8.6450E-03 4.1350E-03 1.3150E-02

1.6050E-02 8.5960E-03 3.0040E-03 2.5800E-02 2.6880E-02 1.7010E-02 1.0310E-02

3.1700E-02 3.0800E-02 2.0630E-02 7.5940E-03 1.5150E-02 2.3490E-02 1.2600E-02

3.9610E-03 2.1240E-02 2.0700E-02 1.6560E-02 8.6740E-03 2.2780E-02 1.8140E-02

5.5250E-03 2.3040E-02 9.8200E-03 1.1200E-02 5.7790E-03 1.7280E-02 1.6070E-02

1.2220E-02 5.1030E-03 1.0750E-02 3.9250E-03 5.1250E-03 2.9620E-03 8.2170E-03

3.9710E-03 4.1540E-03 4.1820E-03 2.2660E-02 8.6260E-03 6.1280E-03 2.8600E-03

1.1500E-02 7.1690E-03 6.0770E-03 2.5790E-03 1.3850E-02 6.7240E-03 7.1440E-03

5.4710E-03 4.5030E+00 7.7110E-01 7.4000E-01 1.2410E+00 1.1010E+00 8.2350E-01

5.3790E-01 3.4600E+00 4.4370E+00 1.8940E-01 3.5580E-01 2.5160E-01 2.3310E-01

9.6210E-02 1.0250E-01 7.0610E-02 8.0030E-02 2.1580E-01 1.6020E-01 1.9930E-01

1.1760E-01 1.2210E-01 1.6100E-01 8.1350E-02 6.5160E-02 1.3570E-01 1.4320E-01

1.1250E-01 9.7960E-02 1.1850E-01 6.3700E-02 4.7360E-02 8.9770E-01 8.1140E+00

4.1370E+00 7.3160E+00 8.1990E-01 1.1050E-01 7.2330E-01 1.1930E+01 6.7500E+00

1.4540E+00 1.1550E-01 6.7970E-01 4.2790E+00 2.2440E+00 1.2560E-01 4.5750E-01

3.3990E-01 1.4660E-01 6.5100E-02 5.8020E-01 8.6070E-01 2.0810E-01 1.0690E-01

3.0800E-01 1.2320E-01 4.3740E-02 4.0480E-02 3.1860E-02 3.6010E-02 3.9850E-02

2.6390E-02 1.5740E-02 5.5410E-03 1.0550E-02 1.1190E-02 6.1720E-03 1.6860E-02

2.4370E-02 2.5790E-02 2.0280E-02 6.0080E-03 8.9160E-03 7.6110E-03 9.2710E-03

1.0060E-02 2.5040E-02 1.6000E-02 2.5420E-02 1.1080E-02 1.6470E-02 1.1300E-02

8.3690E-03 9.8620E-03 1.2210E-02 1.0680E-02 4.7890E-03 4.5690E-03 1.0180E-02

9.9080E-03 5.9460E-03 1.0890E-02 1.6760E-02 1.8700E-02 1.3640E-02 1.0550E-02

2.2750E-02 1.9690E-02 1.5060E-02 3.8550E-03 1.3010E-02 1.5160E-02 9.3850E-03

7.1120E-03 1.4680E-02 1.4670E-02 1.3930E-02 1.3930E-02 1.4250E-02 6.6590E-03

1.2360E-02 1.0810E-02 7.6660E-03 6.5500E-03 1.0630E-02 1.2620E-02 8.3950E-03

6.3540E-03 6.1630E-03 4.6090E-03 3.3430E-03 2.9560E-03 4.3560E-03 3.7070E-03

3.4630E-03 3.8670E-03 1.6990E-02 7.0290E-03 4.2940E-03 1.8880E-03 7.4680E-03

6.4100E-03 3.8380E-03 2.7730E-03 7.1970E-03 6.6530E-03 5.4370E-03 5.6050E-03

2.7330E+00 2.5150E-01 6.8860E-01 8.6750E-01 7.9830E-01 1.4100E-01 7.1100E-01

3.0110E+00 1.8860E+00 1.5330E-01 2.8170E-01 1.2630E-01 3.9310E-02 8.5320E-02

5.4900E-02 1.1530E-02 1.0460E-01 1.3910E-01 1.8190E-01 5.3510E-02 8.2050E-02

1.0840E-01 7.9870E-02 2.2580E-02 7.1020E-02 1.0580E-01 1.1210E-01 5.8130E-02

6.9040E-02 5.5240E-02 3.7830E-02 3.3380E-01 1.1730E+00 7.0050E+00 1.2120E+00

4.5580E+00 4.2090E-02 1.0060E-01 5.1300E-01 6.7340E+00 5.3820E+00 1.2790E+00

6.1170E-02 1.4750E+00 3.2660E+00 2.1030E-02 1.7780E-01 2.8750E-01 2.1210E-01

1.1630E-02 9.8280E-02 5.0610E-01 5.0130E-01 2.9270E-02 1.4850E-01 1.8090E-01

1.5800E-02 3.4990E-02 2.9110E-02 2.1490E-02 2.4710E-02 2.0350E-02 9.6030E-03

3.6940E-03 5.4620E-03 7.6640E-03 5.4880E-03 6.2750E-03 1.3990E-02 1.8970E-02

1.8970E-02 1.6210E-03 5.6500E-03 6.7050E-03 7.1300E-03 1.3210E-03 1.3100E-02

1.5530E-02 2.1070E-02 3.4710E-03 1.0820E-02 1.0290E-02 6.8890E-03 4.4510E-03

7.5410E-03 8.1720E-03 4.8550E-03 1.5320E-03 4.5420E-03 7.2840E-03 7.0410E-03

4.0240E-03 9.0970E-03 1.3340E-02 1.3540E-02 2.5570E-03 1.1510E-02 1.5860E-02

1.5430E-02 7.6970E-04 4.6380E-03 1.0170E-02 1.2020E-02 1.6490E-03 7.4090E-03

1.1160E-02 1.3360E-02 8.2700E-03 8.5030E-03 6.4500E-03 5.2110E-03 9.4470E-03

6.5810E-03 3.6860E-03 6.8570E-03 6.7540E-03 6.1880E-03 5.5370E-03 2.7480E-03

4.4250E-03 2.7840E-03 1.4240E-03 1.6410E-03 3.2590E-03 3.0170E-03 2.3440E-03

1.1330E-02 4.9880E-03 2.6240E-03 1.1960E-03 4.4130E-03 4.5010E-03 3.0100E-03

1.7360E-03 2.8300E-03 5.5410E-03 4.7350E-03 3.4890E-03 6.9820E-02 2.6470E-01

4.9340E-01 4.7850E-01 5.0900E-02 1.1810E-01 6.4960E-01 2.0560E+00 4.5450E-02

1.8730E-01 4.5930E-02 1.1830E-02 4.8490E-02 2.9160E-02 5.9470E-04 1.8400E-02

1.0110E-01 9.8460E-02 1.6130E-02 5.2560E-02 3.7420E-02 5.5820E-02 4.3320E-03

2.8340E-02 5.3440E-02 6.9590E-02 2.8420E-02 2.4820E-02 3.9970E-02 1.7120E-02

9.1460E-02 4.8410E-01 8.1900E-01 4.5530E+00 1.4220E+00 1.9280E-02 1.9700E-02

6.4220E-02 2.9220E-01 3.0460E+00 3.5840E+00 1.9790E-02 6.7740E-02 2.3130E+00

2.8490E-03 3.2630E-02 1.6290E-01 1.5030E-01 5.2050E-03 6.4450E-03 9.6760E-02

4.4740E-01 7.1310E-03 4.3650E-02 1.2860E-01 3.5780E-03 1.8990E-02 2.0390E-02

7.7310E-03 1.1670E-02 1.1340E-02 4.3180E-03 1.8470E-03 2.2920E-03 3.8030E-03

3.2120E-03 1.7660E-03 6.3610E-03 9.4620E-03 1.1510E-02 2.0040E-04 2.2870E-03

4.4250E-03 3.5100E-03 1.3430E-05 2.2140E-03 1.2890E-02 1.0390E-02 7.2720E-04

4.6630E-03 7.0120E-03 3.3330E-03 1.6170E-03 3.6970E-03 3.9800E-03 3.2140E-03

4.8640E-04 1.4340E-03 3.5100E-03 4.7710E-03 1.1200E-03 4.1100E-03 6.1880E-03

8.5800E-03 3.5950E-04 3.7170E-03 9.2220E-03 9.3780E-03 1.1730E-04 1.0510E-03

4.1900E-03 8.4390E-03 1.7000E-04 2.4140E-03 6.2760E-03 7.9280E-03 3.9280E-03

3.6920E-03 3.9900E-03 1.6250E-03 5.2230E-03 4.5530E-03 1.0630E-03 3.5880E-03

2.2740E-03 3.7600E-03 3.0460E-03 9.0320E-04 2.6030E-03 1.9160E-03 2.6920E-04

3.7740E-04 1.8940E-03 1.9050E-03 9.5480E-04 5.6640E-03 2.5910E-03 1.2220E-03

5.9040E-04 2.0620E-03 2.1380E-03 1.9980E-03 6.3300E-04 7.7470E-04 3.0110E-03

3.1290E-03 1.3830E-03 9.5070E+00 2.5290E+00 7.6150E-01 2.2830E+00 7.7730E-01

1.4840E-01 1.7240E-02 1.2200E+00 3.6000E-01 1.2270E-01 5.7880E-01 1.0760E-01

2.7560E-02 1.0270E+00 4.0510E-01 8.5290E-02 1.0510E-02 1.0610E+00 3.4370E-01

9.2240E-02 1.2680E-02 6.4500E-01 3.1900E-01 9.1350E-02 1.3270E-02 3.2910E-01

2.1430E-01 7.6520E-02 2.0960E-02 8.8150E-01 4.3190E-01 1.5610E-01 5.1180E-02

1.3020E-02 7.9640E-01 4.0310E-01 1.7580E-01 6.3140E-02 1.8380E-02 4.1110E-03

3.5090E-01 1.4060E-01 3.0090E-02 7.8630E+00 3.2380E-01 8.6600E-02 1.5200E-02

4.0540E+00 6.4690E-01 9.8670E-02 1.8930E-02 4.3340E-01 1.6250E-01 2.4510E-02

1.2030E+00 4.9690E-01 2.1800E-01 1.0870E-01 1.0170E-01 4.4380E-02 1.9020E-02

2.5230E-01 3.3830E-01 2.0800E-01 3.2990E-02 3.2990E+00 3.8150E-01 4.8100E-02

6.9510E-03 1.9600E-01 1.0100E-01 2.4850E-02 3.5410E-03 3.1110E-01 2.0420E-01

3.9320E-02 4.2480E-03 1.6880E+00 4.0750E-02 8.0370E-03 1.0790E-03 7.6480E-01

2.6930E-02 6.1840E-03 1.5150E-03 8.6910E-01 1.2340E-01 1.5960E-02 2.4310E-03

1.3620E+00 1.6360E-01 2.3390E-02 3.3930E-03 2.8140E+00 3.1730E-01 1.7710E-02

2.4210E-03 6.6550E-01 1.1250E-01 2.4620E-02 3.4470E-03 2.7800E-01 1.0140E-01

2.5860E-02 3.1100E-03 3.1080E-02 1.2850E-02 2.6770E-03 2.5100E-01 3.3630E-02

1.1630E-02 2.3770E-03 5.5790E-02 2.1130E-02 7.3490E-03 1.6700E-03 9.7210E-02

1.7790E-02 4.3670E-03 7.7880E-04 7.6410E-02 2.6930E-02 7.8880E-03 1.3020E-03

2.9330E-02 8.7970E-03 4.9650E-03 8.6100E-04 6.5970E-02 8.6910E-03 2.1140E-03

3.6100E-04 1.6420E-01 3.0050E-02 5.5270E-03 9.2560E-04 8.3050E+00 2.3800E+00

9.5780E-01 9.2460E-01 5.9870E-01 1.5760E-01 6.4760E-01 5.5320E-01 1.7450E-01

2.6390E-01 2.5210E-01 5.7070E-02 2.9330E-01 5.2110E-01 4.4590E-01 1.0170E-01

3.2100E-01 6.1040E-01 3.0520E-01 1.0280E-01 2.3990E-01 3.6670E-01 2.8120E-01

1.0550E-01 1.7940E-01 2.2190E-01 1.2860E-01 5.8250E-02 3.0400E-01 5.5050E-01

3.2450E-01 1.4820E-01 5.6840E-02 2.9610E-01 3.0640E-01 2.6980E-01 1.8010E-01

8.9560E-02 3.0290E-02 1.8730E-01 1.3450E-01 9.4550E-02 1.1950E+00 5.1370E+00

2.1900E-01 7.9590E-02 6.4680E-01 2.4460E+00 6.5160E-01 1.0510E-01 2.5600E-01

1.4560E-01 9.5260E-02 4.9690E-01 5.9750E-01 3.6940E-01 1.5720E-01 6.4630E-02

4.8330E-02 1.9420E-02 2.0180E-01 2.5800E-01 8.4290E-02 1.2110E-01 1.5090E-01

2.3130E+00 4.2850E-01 5.5490E-02 6.9920E-02 1.6190E-01 9.4610E-02 2.8970E-02

1.1350E-01 3.7240E-01 2.1750E-01 4.6950E-02 2.3010E-01 1.1190E+00 3.1490E-02

7.9140E-03 1.1240E-01 5.0150E-01 2.0940E-02 4.9940E-03 1.2340E-01 5.3930E-01

1.2840E-01 1.7720E-02 7.2020E-02 9.6580E-01 1.7840E-01 2.6970E-02 3.1340E-01

1.8400E+00 3.6890E-01 1.9960E-02 6.9630E-02 4.4130E-01 1.0610E-01 2.8510E-02

7.4970E-02 1.2880E-01 9.2370E-02 3.0630E-02 1.9190E-02 1.0960E-02 7.1350E-03

5.9430E-02 1.5020E-01 1.9170E-02 1.0160E-02 2.1130E-02 2.5870E-02 1.4240E-02

7.5350E-03 2.7370E-02 5.2050E-02 1.2740E-02 3.9740E-03 2.2650E-02 3.6670E-02

2.1770E-02 8.9490E-03 2.3470E-02 6.3860E-03 2.4530E-03 2.8500E-03 1.5490E-02

3.8070E-02 6.2020E-03 1.9590E-03 3.0020E-02 9.6190E-02 2.8280E-02 6.0370E-03

6.3480E+00 3.1360E-01 7.4100E-01 5.4290E-01 3.9610E-01 3.4050E-01 4.4220E-01

2.5500E-01 1.1240E-01 2.0000E-01 1.1710E-01 1.8680E-02 3.4130E-01 3.2180E-01

3.7350E-01 8.2480E-02 2.8690E-01 4.3860E-01 2.4400E-01 5.6030E-02 2.2880E-01

2.5820E-01 2.3770E-01 9.6510E-02 1.5980E-01 1.4630E-01 7.6210E-02 1.0590E-01

2.6330E-01 3.5390E-01 2.5120E-01 1.0690E-01 6.5840E-02 2.1000E-01 2.0000E-01

1.7470E-01 1.4190E-01 8.2740E-02 8.3410E-02 1.1960E-01 1.0850E-01 1.8570E-01

1.2950E+00 3.3520E+00 1.4090E-01 9.8670E-02 6.5160E-01 1.6380E+00 5.0010E-01

1.2890E-01 1.4620E-01 9.8000E-02 2.1800E-01 3.6940E-01 3.6980E-01 2.5860E-01

4.0720E-02 3.7680E-02 1.9780E-02 1.5140E-01 1.4930E-01 1.1360E-01 8.4670E-02

2.5290E-02 1.4030E-01 1.8100E+00 3.3670E-01 1.0320E-02 6.4700E-02 1.1100E-01

8.0570E-02 4.0100E-03 1.2610E-01 2.5240E-01 1.8030E-01 2.4780E-02 2.6800E-01

7.2810E-01 2.1010E-02 1.5180E-02 1.2640E-01 3.2440E-01 1.3620E-02 1.5960E-02

1.2840E-01 3.6380E-01 9.8520E-02 1.3080E-02 6.4810E-02 7.1320E-01 1.4120E-01

1.7690E-02 3.6890E-01 1.2410E+00 2.7850E-01 1.6100E-02 5.5220E-02 3.2530E-01

8.7500E-02 1.0740E-02 6.8980E-02 8.5540E-02 7.9780E-02 1.0310E-02 1.0680E-02

6.9750E-03 1.8420E-02 4.8860E-02 1.0020E-01 1.1640E-02 7.3490E-03 1.4240E-02

1.8510E-02 1.1460E-02 7.9380E-03 2.2750E-02 3.3110E-02 8.2830E-03 5.4020E-03

1.7900E-02 2.5520E-02 1.8710E-02 1.7600E-02 3.6570E-03 2.9780E-03 2.1380E-03

3.9660E-03 1.3810E-02 2.4470E-02 4.0430E-03 5.5270E-03 2.8270E-02 6.4650E-02

2.1960E-02 6.1310E-02 3.3820E-01 5.6040E-01 3.5630E-01 1.7330E-01 2.6250E-01

2.5740E-01 4.5870E-02 1.0820E-01 1.3160E-01 2.3500E-03 1.9820E-02 2.6660E-01

4.2360E-01 1.1880E-02 1.0010E-01 2.4280E-01 3.6050E-01 5.0400E-03 6.7240E-02

1.9220E-01 2.5060E-01 4.1060E-02 9.9730E-02 1.1130E-01 7.6090E-02 2.9810E-02

1.1150E-01 1.8710E-01 2.2730E-01 1.6010E-01 9.9010E-03 5.8100E-02 1.3660E-01

1.6330E-01 1.3690E-01 7.5880E-02 2.7500E-02 9.0680E-02 8.9010E-02 3.9880E-02

2.0610E-01 9.8450E-01 2.0370E+00 1.8930E-02 1.0510E-01 5.0010E-01 1.3000E+00

5.1440E-02 1.2510E-01 7.1660E-02 1.0870E-01 1.5720E-01 2.5860E-01 2.8590E-01

2.4240E-02 2.3430E-02 1.6510E-02 1.0090E-01 6.5330E-02 1.3470E-01 3.1580E-02

3.3280E-03 2.7580E-02 1.1130E-01 1.4000E+00 5.9360E-04 1.1720E-02 5.2310E-02

1.1300E-01 2.8650E-04 4.4290E-03 9.6860E-02 2.7360E-01 3.4420E-03 3.0040E-02

2.0480E-01 4.5630E-01 3.3680E-03 1.6720E-02 9.6130E-02 2.0390E-01 2.4300E-03

1.7700E-02 9.8510E-02 2.8580E-01 1.5500E-03 1.4430E-02 5.1890E-02 5.5370E-01

2.4170E-03 1.9950E-02 2.8190E-01 9.7080E-01 1.2840E-03 1.8400E-02 4.6000E-02

2.5710E-01 8.9060E-05 1.2690E-02 5.6130E-02 9.4470E-02 4.6580E-03 9.0230E-03

4.9650E-03 5.6270E-03 1.8200E-02 3.6190E-02 5.9430E-02 1.6700E-03 7.5350E-03

1.1450E-02 1.3730E-02 2.0390E-03 8.3390E-03 1.7080E-02 2.0600E-02 5.4310E-04

6.0340E-03 1.4850E-02 2.3560E-02 1.1730E-02 1.6270E-03 3.2490E-03 9.7260E-04

9.7050E-04 4.2420E-03 1.0420E-02 1.5230E-02 9.2510E-04 6.0380E-03 2.1970E-02

5.1330E-02 2.3310E+00 8.2620E-01 3.8200E-01 8.9680E-01 4.2570E-01 6.5530E-02

2.8800E-01 1.2340E-01 2.8190E-02 5.6760E-01 2.9800E-01 1.3380E-01 3.6380E-02

3.7210E-01 2.0090E-01 9.9490E-02 4.6640E-02 4.8180E-01 2.6940E-01 1.2310E-01

4.6220E-02 4.0070E-01 3.0260E-01 1.7290E-01 6.6760E-02 3.1070E+00 1.6560E+00

5.5350E-01 1.6310E-01 4.6280E-02 5.2840E+00 1.8530E+00 5.8790E-01 1.7760E-01

5.8100E-02 1.9750E-02 2.3350E+00 3.6880E-01 5.7760E-02 1.7510E+01 3.2420E+00

1.6320E-01 3.1170E-02 2.7000E+01 3.8430E+00 5.0900E-01 1.7880E-01 1.0670E+01

1.1780E-01 3.3810E-02 1.3510E-01 7.6810E-02 4.0400E-02 1.7940E-02 5.9920E-02

3.3770E-02 1.2550E-02 9.1660E-03 1.9270E-02 7.6790E-03 3.5080E-03 1.5550E-01

7.7650E-02 3.3110E-02 9.3280E-03 1.2440E-02 7.5600E-03 3.7170E-03 1.3300E-03

3.4230E-02 1.9370E-02 9.1700E-03 2.6750E-03 1.7190E-01 3.8850E-02 5.3930E-03

1.1050E-03 1.8970E-01 4.7860E-02 1.0390E-02 3.3540E-03 3.0400E-02 1.2880E-02

5.0450E-03 1.4490E-03 5.8810E-02 2.9710E-02 1.2900E-02 4.0250E-03 1.8670E-01

4.7590E-02 1.3660E-02 3.2060E-03 3.0200E-02 1.3620E-02 5.2430E-03 1.3060E-03

2.4410E-02 1.0990E-02 4.6360E-03 1.5410E-03 1.0110E-01 2.1540E-02 1.1620E-02

3.2910E-02 1.8860E-02 8.0170E-03 2.2790E-03 1.2970E-02 7.9720E-03 4.9750E-03

2.9770E-03 4.1140E-02 2.8620E-02 1.3940E-02 4.6280E-03 4.6560E-03 3.2030E-03

1.9210E-03 9.2440E-04 2.1770E-02 7.8760E-03 2.5220E-03 1.3110E-03 4.3300E-03

3.2670E-03 1.8530E-03 7.6470E-04 4.5610E-03 2.2090E-03 1.0700E-03 4.4420E-04

1.8770E+00 3.6730E-01 5.2630E-01 2.5190E-01 2.6320E-01 1.6180E-01 9.8510E-02

7.0010E-02 2.0010E-01 2.4170E-01 1.9010E-01 1.5150E-01 1.7150E-01 1.6520E-01

1.3050E-01 7.6220E-02 1.8740E-01 2.3740E-01 1.8130E-01 1.2180E-01 2.4180E-01

3.0430E-01 1.5890E-01 8.2980E-02 8.0880E-01 1.7950E+00 1.3370E+00 6.3210E-01

1.7380E-01 3.0850E-01 2.6540E+00 1.8540E+00 8.3330E-01 2.7460E-01 6.7640E-02

5.9920E-01 1.2000E+00 2.7320E-01 3.2430E+00 8.6780E+00 3.6360E+00 1.5570E-01

7.2240E-01 1.7890E+01 4.4050E+00 4.7110E-01 2.5420E+00 5.5260E+00 6.1980E-02

6.7120E-02 5.9590E-02 4.3680E-02 3.2330E-02 4.0150E-02 2.3960E-02 1.5710E-02

6.8750E-03 1.0380E-02 9.3450E-03 3.1130E-03 5.7100E-02 6.3530E-02 5.0000E-02

3.6070E-02 5.6750E-03 4.5190E-03 4.7190E-03 3.8740E-03 1.2970E-02 1.3460E-02

1.2350E-02 1.0300E-02 3.8890E-02 8.1580E-02 3.7600E-02 5.0060E-03 4.7880E-02

9.0640E-02 4.2470E-02 7.3590E-03 1.0290E-02 1.3520E-02 8.4150E-03 5.1060E-03

2.2000E-02 2.4060E-02 1.9410E-02 1.3610E-02 2.8680E-02 1.0590E-01 3.9170E-02

1.4790E-02 9.4190E-03 1.2880E-02 9.5830E-03 5.9050E-03 6.6000E-03 1.1550E-02

8.0920E-03 4.9490E-03 3.9670E-02 5.3470E-02 7.4830E-03 1.8850E-02 1.1580E-02

9.8490E-03 6.2470E-03 7.0980E-03 6.7290E-03 4.8990E-03 2.9470E-03 2.8620E-02

1.4260E-02 1.3750E-02 9.6230E-03 2.7140E-03 1.9560E-03 1.6850E-03 1.6540E-03

1.6330E-02 3.7590E-03 4.1130E-03 9.1000E-04 3.2670E-03 1.8330E-03 1.5620E-03

9.9880E-04 1.8600E-03 2.0810E-03 1.3600E-03 8.9870E-04 1.1040E+00 2.2900E-01

2.8430E-01 1.8170E-01 7.4110E-02 8.9360E-02 5.6730E-02 5.2380E-02 1.1550E-01

1.8630E-01 1.6880E-01 7.0830E-02 1.0850E-01 9.8490E-02 8.5490E-02 6.3060E-02

1.2340E-01 1.6370E-01 1.4330E-01 1.4480E-01 1.5890E-01 1.7250E-01 6.5220E-02

1.7680E-01 8.6530E-01 9.5980E-01 8.2030E-01 4.8560E-01 8.0810E-02 1.9680E-01

1.2590E+00 1.3490E+00 8.0950E-01 2.9070E-01 1.1270E-01 6.1080E-01 6.4870E-01

1.6310E-01 3.6370E+00 4.1200E+00 2.5460E+00 2.3170E-01 5.8160E-01 1.1460E+01

3.2810E+00 3.6810E-01 2.8360E+00 2.1910E+00 2.9610E-02 3.6260E-02 4.1110E-02

2.8160E-02 2.2880E-02 1.9350E-02 1.0910E-02 4.5830E-03 5.7440E-03 5.9060E-03

3.5750E-03 1.5600E-02 3.4460E-02 4.6410E-02 4.1330E-02 1.5720E-03 3.5730E-03

3.3270E-03 4.0540E-03 3.1170E-03 7.8300E-03 1.0410E-02 1.1370E-02 5.3930E-03

3.7580E-02 4.0370E-02 2.5300E-02 1.0400E-02 4.2470E-02 4.5260E-02 2.7470E-02

3.1990E-03 6.2030E-03 9.3220E-03 6.1680E-03 6.2020E-03 1.3620E-02 1.7100E-02

1.5810E-02 7.8000E-03 1.8370E-02 6.9850E-02 2.9540E-02 2.2080E-03 6.1690E-03

8.8850E-03 7.9270E-03 1.7980E-03 4.1730E-03 8.0040E-03 6.8170E-03 1.8400E-02

2.9100E-02 1.9600E-02 8.0170E-03 9.8480E-03 8.4270E-03 4.7430E-03 3.9250E-03

4.1170E-03 3.6870E-03 2.7180E-03 1.3940E-02 1.3750E-02 1.0640E-02 5.8370E-03

1.2030E-03 1.3680E-03 1.5300E-03 1.2260E-03 1.0890E-02 2.0270E-03 2.3560E-03

1.4740E-03 1.8540E-03 1.5620E-03 1.1060E-03 5.8640E-04 7.6120E-04 1.0450E-03

1.4170E-03 9.0930E-04 6.8000E-02 2.0590E-01 7.4230E-02 2.5290E-02 5.5990E-02

2.8760E-02 5.2750E-04 5.7460E-02 8.4430E-02 1.1900E-01 2.5810E-02 4.3690E-02

6.0960E-02 5.1200E-02 1.2770E-02 5.2640E-02 8.0190E-02 1.0050E-01 6.6520E-02

8.2970E-02 6.5210E-02 6.0590E-02 4.8660E-02 1.3480E-01 5.0110E-01 5.8960E-01

3.7710E-01 2.3610E-02 5.0460E-02 1.0380E-01 4.9060E-01 7.5680E-01 5.6260E-01

2.1940E-02 1.2300E-01 5.3370E-01 3.1170E-02 1.5570E-01 2.5460E+00 2.4920E+00

1.0630E-01 1.0820E-01 3.5010E-01 7.1550E+00 2.8490E-02 4.8450E-01 2.1560E+00

9.4540E-03 2.0410E-02 1.9610E-02 1.8100E-02 9.9520E-03 1.1520E-02 5.0930E-03

2.2910E-03 2.6720E-03 2.4480E-03 2.4910E-03 1.4390E-03 1.5770E-02 2.3590E-02

2.8100E-02 2.3650E-04 1.4270E-03 2.4700E-03 2.1280E-03 1.8910E-05 3.3840E-03

5.8360E-03 7.1220E-03 1.1050E-03 5.0060E-03 2.5300E-02 2.2940E-02 3.3540E-03

7.3580E-03 2.7460E-02 2.4670E-02 5.5610E-04 2.9480E-03 3.8860E-03 5.0560E-03

8.5680E-04 5.8500E-03 9.1600E-03 1.0480E-02 1.0290E-03 7.7150E-03 1.1860E-02

4.2260E-02 1.4320E-04 2.3210E-03 4.2760E-03 5.8540E-03 2.5930E-04 1.6490E-03

2.8940E-03 5.5930E-03 8.6040E-03 7.7200E-03 1.7210E-02 2.2790E-03 6.2470E-03

4.7430E-03 2.2430E-03 1.8050E-03 1.8220E-03 1.9180E-03 1.6790E-03 4.6280E-03

9.6230E-03 5.8370E-03 1.9960E-03 3.4060E-04 8.8500E-04 7.9410E-04 6.4560E-04

5.4430E-03 9.7740E-04 7.7540E-04 1.1730E-03 7.6470E-04 9.9880E-04 5.8640E-04

2.0440E-04 2.2670E-04 5.5080E-04 5.8830E-04 6.9290E-04 1.4070E+00 5.1640E-01

3.6470E+00 2.4200E-01 9.3510E-02 6.1640E-02 3.4110E-02 1.8310E-02 9.8080E-03

4.5680E-01 2.3090E-01 1.0710E-01 4.6510E-02 1.2210E-01 8.7250E-02 5.0590E-02

2.4840E-02 7.0330E-01 4.9790E-01 2.5960E-01 8.9930E-02 5.3680E-01 4.1780E-01

2.4060E-01 1.2000E-01 4.6850E-02 4.6250E-01 3.5530E-01 2.3390E-01 1.3180E-01

6.1800E-02 2.1700E-02 3.7700E-01 2.3140E-01 7.7130E-02 2.7990E+00 8.8900E-01

2.7840E-01 9.6730E-02 1.2050E+00 9.0950E-01 4.9960E-01 1.9200E-01 5.3670E+00

2.3470E+00 5.4240E-02 3.8500E-01 1.7150E-01 6.8520E-02 2.4340E-02 3.1660E-01

1.9750E-01 1.1580E-01 4.1030E-01 4.4900E-01 2.3350E-01 5.3010E-02 4.1170E-01

1.7840E-01 6.6720E-02 2.0510E-02 7.1870E-02 3.9050E-02 1.8980E-02 7.5700E-03

7.7310E-02 3.6710E-02 1.4700E-02 4.1620E-03 6.3780E-01 1.6870E-01 3.1840E-02

5.4740E-03 1.4210E+00 3.3870E-01 4.9380E-02 5.6760E-03 6.9700E-02 3.1350E-02

1.2390E-02 4.0680E-03 1.1870E-01 5.6070E-02 2.3550E-02 8.3830E-03 3.5350E-02

2.2860E-02 1.2900E-02 6.1910E-03 1.0420E-02 6.4510E-03 4.2900E-03 2.9490E-03

8.7620E-03 4.4440E-03 1.9990E-03 7.3330E-04 1.3270E+00 5.7790E-01 1.4570E-02

7.0830E-01 1.8780E-01 3.9240E-02 9.5950E-03 1.2630E-01 1.0080E-01 5.9430E-02

2.6210E-02 8.6160E-01 2.3280E-01 5.8810E-02 2.0730E-02 2.0220E-01 8.7720E-02

3.3940E-02 1.1250E-02 2.9160E-01 1.5870E-01 8.2320E-02 1.5570E-02 2.4860E-01

9.3620E-02 4.4200E-02 2.1830E-02 6.6160E-02 2.9680E-02 1.1350E-02 3.3260E-03

7.0740E-01 2.4190E-01 2.3010E+00 1.1280E-01 1.2810E-02 2.7380E-02 2.5470E-02

1.7290E-02 1.0220E-01 2.0630E-01 1.6670E-01 9.4260E-02 5.4370E-02 4.6400E-02

4.8390E-02 4.7810E-02 3.9400E-01 3.0310E-01 2.5910E-01 1.5920E-01 2.3780E-01

2.2560E-01 2.1060E-01 1.7330E-01 9.6900E-02 2.5360E-01 1.2070E-01 1.1900E-01

1.4040E-01 1.3150E-01 7.8310E-02 1.9700E-01 8.8680E-02 1.7010E-01 3.2700E-01

1.3980E+00 7.7950E-01 2.0410E-01 7.2760E-01 2.4720E-01 3.9220E-01 5.0360E-01

2.3470E+00 7.2320E-01 2.1080E+00 6.5920E-02 1.6230E-01 1.3140E-01 7.2870E-02

1.9750E-01 1.7740E-01 4.5280E-02 2.7350E-01 2.3330E-01 1.0370E-01 1.6890E-01

3.4910E-02 1.7780E-01 1.5490E-01 8.3950E-02 1.4210E-02 2.7660E-02 2.7790E-02

2.1960E-02 4.4310E-03 3.2140E-02 3.2060E-02 1.9930E-02 2.9880E-02 3.2210E-01

1.7440E-01 3.8290E-02 2.4190E-02 7.3720E-01 3.8110E-01 6.7440E-02 1.2560E-02

2.8290E-02 2.3580E-02 1.3880E-02 1.6790E-02 4.9110E-02 4.4260E-02 2.7680E-02

1.6040E-02 1.2650E-02 1.2280E-02 1.0550E-02 3.6950E-03 5.4860E-03 4.3790E-03

2.5400E-03 1.2540E-03 3.5210E-03 3.4380E-03 2.4120E-03 5.7790E-01 1.8420E-01

5.1780E-01 3.5380E-02 3.6180E-01 1.9240E-01 3.9820E-02 8.3810E-02 2.9100E-02

4.2360E-02 5.3220E-02 4.8270E-02 4.5750E-01 2.3480E-01 4.2180E-02 1.5880E-02

8.9790E-02 7.6860E-02 3.9930E-02 1.9440E-01 8.2320E-02 3.1000E-02 5.7790E-02

4.7860E-02 1.3780E-01 7.1090E-02 1.5450E-02 1.1810E-02 2.6120E-02 2.2220E-02

1.3520E-02 9.3230E-02 1.1270E-01 1.1210E+00 4.0700E-03 6.4050E-03 1.2770E-02

1.7910E-02 2.8730E-02 5.4510E-02 9.6160E-02 1.0460E-01 1.0150E-02 3.0500E-02

3.2480E-02 2.5970E-02 9.4140E-02 2.0200E-01 1.5500E-01 7.6180E-02 5.4220E-02

1.4310E-01 1.3730E-01 9.8160E-02 4.9410E-02 7.2910E-03 1.2760E-01 1.3000E-01

9.0010E-02 4.7750E-02 1.8440E-02 3.5380E-02 1.3700E-01 5.6170E-02 1.2210E-01

1.5200E-01 5.6790E-01 5.1140E-01 7.1490E-02 4.4670E-01 3.1080E-01 1.0590E-01

5.4230E-02 2.1090E+00 4.2640E-01 1.1820E-02 3.7410E-02 7.8320E-02 8.8040E-02

1.1580E-01 4.5290E-02 4.8060E-02 1.3680E-01 5.3000E-02 1.6610E-01 3.8970E-02

4.9200E-03 2.0060E-02 7.9430E-02 1.2130E-01 1.4210E-03 8.2510E-03 1.5700E-02

2.0440E-02 5.0330E-05 2.6750E-03 1.4550E-02 2.7000E-02 5.7350E-03 1.7760E-02

1.3360E-01 1.2700E-01 6.6630E-03 1.2910E-02 2.9670E-01 2.9010E-01 1.6650E-03

7.5200E-03 1.4390E-02 1.5610E-02 2.2960E-03 9.6760E-03 2.4100E-02 3.2870E-02

3.7960E-03 8.6520E-03 7.9430E-03 5.3360E-03 1.9370E-03 1.4820E-03 2.0650E-03

2.5160E-03 1.2570E-04 7.2870E-04 1.8090E-03 2.6490E-03 1.4570E-02 5.1770E-01

1.0760E-01 1.1820E-02 1.7440E-02 1.4600E-01 1.4010E-01 1.3230E-02 4.8810E-02

3.2270E-02 9.9210E-03 2.8350E-02 1.5030E-02 1.7580E-01 1.7140E-01 3.7860E-03

8.2550E-03 3.8470E-02 5.9960E-02 9.7190E-02 1.5560E-02 5.7790E-02 1.2200E-02

3.0140E-02 1.3540E-02 4.8020E-02 4.4380E-02 9.6810E-04 7.3550E-03 1.3790E-02

1.4720E-02 2.1040E+00 1.6060E-01 2.9990E-01 1.5250E-01 7.7530E-02 3.8110E-02

7.8310E-01 5.7310E-01 4.3550E-01 3.0380E-01 3.9770E-01 2.8690E-01 1.7150E-01

7.9190E-02 9.1020E-01 7.4270E-01 5.5220E-01 1.8570E-01 7.3340E-02 5.5810E-02

2.9430E-02 1.4180E-02 5.5590E-03 1.1950E-01 7.2330E-02 4.1230E-02 2.1800E-02

1.0370E-02 3.9060E-03 6.8940E-02 4.8010E-02 2.1990E-02 5.2160E-01 2.4170E-01

1.1080E-01 4.4460E-02 2.3540E-01 1.5780E-01 9.5340E-02 5.0710E-02 2.6520E-01

1.3590E-01 2.8410E-02 2.9550E-01 1.7400E-01 9.9570E-02 5.3550E-02 3.6870E-01

3.1320E-01 1.8920E-01 5.1790E+00 1.0000E+01 4.4010E+00 2.6230E-01 1.0620E-01

5.3370E-02 2.6150E-02 1.2950E-02 4.9460E-02 2.5970E-02 1.1950E-02 4.2430E-03

7.3390E-02 3.7280E-02 1.6330E-02 5.2490E-03 1.9900E+01 4.7830E+00 6.5520E-01

2.6960E-02 5.2670E-02 3.5710E-02 2.6220E-02 1.4660E-02 3.1130E-02 1.9140E-02

1.2160E-02 7.4830E-03 2.6820E-02 2.0770E-02 1.7060E-02 1.3760E-02 2.6600E-02

1.6690E-02 8.7550E-03 3.6500E-03 9.2620E-03 5.8400E-03 3.6190E-03 2.1810E-03

1.2660E-02 8.4730E-03 4.8760E-03 2.1970E-03 2.6040E-01 1.1470E-01 4.4870E-03

2.8840E-02 1.6260E-02 1.0280E-02 5.3780E-03 2.2830E-02 1.8220E-02 1.3190E-02

8.4050E-03 8.9910E-02 2.8310E-02 1.0230E-02 4.2960E-03 2.0280E-02 9.8290E-03

4.4650E-03 1.9320E-03 5.2150E-02 2.6410E-02 1.5110E-02 3.9550E-03 2.2230E-02

1.1180E-02 6.5480E-03 3.3440E-03 8.9790E-03 5.1760E-03 2.4920E-03 9.2190E-04

1.7570E+00 5.1320E-02 1.2960E-01 1.2210E-01 7.8160E-02 4.3740E-01 4.9000E-01

3.2480E-01 1.5310E-01 1.7750E-01 1.4860E-01 1.5770E-01 1.7070E-01 6.3710E-01

5.1590E-01 3.6060E-01 1.8440E-01 2.7670E-02 3.8480E-02 3.3750E-02 2.3310E-02

1.1430E-02 3.0070E-02 4.1380E-02 4.0500E-02 3.3150E-02 2.2820E-02 1.1460E-02

4.2060E-02 2.0320E-02 3.0070E-02 1.5780E-01 2.3370E-01 1.5500E-01 6.6030E-02

1.1460E-01 9.2770E-02 8.4160E-02 6.8030E-02 1.3580E-01 5.8350E-02 9.2140E-02

1.1020E-01 1.2940E-01 1.0600E-01 6.9780E-02 3.1320E-01 2.0630E-01 6.2410E-02

3.4530E+00 4.4010E+00 1.6160E+00 3.7760E+00 1.9740E-02 4.7270E-02 4.0900E-02

2.4490E-02 8.4070E-03 1.8970E-02 1.9070E-02 1.4640E-02 7.8670E-03 2.9190E-02

2.9870E-02 2.1230E-02 3.8360E-01 1.0220E+01 5.3480E+00 1.0190E+00 3.0310E-02

3.4190E-02 1.7110E-02 4.5870E-03 1.2740E-02 1.5550E-02 1.1670E-02 6.6560E-03

1.5570E-02 1.7230E-02 1.2590E-02 6.8810E-03 1.1380E-02 8.5140E-03 8.9760E-03

8.2650E-03 3.4060E-03 4.2030E-03 3.6730E-03 2.6750E-03 4.8780E-03 4.0510E-03

4.6260E-03 5.2510E-03 1.1460E-01 3.7040E-02 1.0070E-01 1.2390E-02 1.6390E-02

8.9390E-03 2.7980E-03 1.5170E-02 1.1050E-02 8.8860E-03 6.6480E-03 1.0800E-02

4.6130E-02 2.4540E-02 5.5330E-03 3.2400E-03 8.7530E-03 7.6970E-03 4.6550E-03

3.3870E-02 1.5110E-02 6.0180E-03 9.2360E-03 7.8500E-03 1.2320E-02 6.7210E-03

2.0010E-03 3.1980E-03 2.9300E-03 2.9970E-03 2.5860E-03 1.4520E-02 2.6410E-02

5.8430E-02 8.9920E-02 2.6580E-01 1.5010E-01 1.4250E-01 1.3700E-01 2.6220E-02

1.0130E-01 1.0770E-01 8.4390E-02 2.1010E-01 2.5690E-01 1.9790E-01 1.0760E-01

7.1260E-03 1.4470E-02 1.8400E-02 1.6810E-02 9.8760E-03 4.0190E-03 1.4520E-02

2.0860E-02 2.2090E-02 1.7900E-02 9.9640E-03 1.2510E-02 2.4290E-02 9.7430E-03

5.5310E-02 7.5830E-02 1.0180E-01 7.3280E-02 3.5150E-02 5.7580E-02 5.1620E-02

3.5320E-02 2.8390E-02 9.2100E-02 2.2630E-02 3.9050E-02 5.2720E-02 6.1330E-02

5.4640E-02 1.8920E-01 6.2410E-02 3.7450E-02 1.7260E+00 2.6230E-01 3.7870E+00

8.6230E-01 6.5340E-03 9.6910E-03 2.1220E-02 2.8760E-02 4.3770E-04 5.0380E-03

1.0630E-02 1.4430E-02 1.1780E-04 4.7420E-03 1.4830E-02 2.4390E-02 4.7240E-03

2.7650E-01 4.1680E+00 4.0500E+00 2.0430E-02 7.6280E-03 8.4290E-03 6.6160E-03

6.0620E-03 5.2600E-03 6.1410E-03 5.8340E-03 9.8850E-03 5.5650E-03 5.1960E-03

5.4930E-03 1.8170E-03 6.6130E-03 6.1360E-03 3.9970E-03 1.2360E-03 1.6220E-03

2.0020E-03 2.0770E-03 4.0800E-04 2.8640E-03 3.3210E-03 2.8100E-03 4.4860E-03

1.0070E-01 2.0930E-02 7.3650E-03 3.8210E-03 5.0950E-03 3.9900E-03 6.7520E-03

6.5160E-03 4.7680E-03 2.8470E-03 5.7940E-03 3.7700E-03 1.7610E-02 1.6420E-02

7.9810E-04 1.7020E-03 4.0670E-03 5.5820E-03 1.6900E-02 3.9540E-03 9.2360E-03

1.9470E-03 4.5660E-03 2.4910E-03 4.0630E-03 3.3200E-03 3.7260E-04 1.9340E-03

2.0390E-03 1.5110E-03 5.8780E+00 3.7670E-01 3.8100E-02 9.3560E-01 3.6870E-01

8.5220E-02 8.3380E-03 2.0590E+00 7.4840E-01 2.8040E-01 2.6740E-02 1.4040E-01

3.9340E-01 6.8040E-02 3.0070E-03 1.4780E-01 8.8260E-02 3.2640E-02 9.2770E-03

1.2380E-03 2.2840E-01 1.1700E-01 5.0200E-02 1.6880E-02 4.1040E-03 5.0170E-04

2.5450E-01 6.8410E-02 8.8780E-03 4.0010E-01 1.0900E-01 2.6780E-02 4.6550E-03

4.0660E-01 1.3580E-01 3.4020E-02 6.3050E-03 1.0860E-01 4.6370E-02 5.8150E-03

1.7340E+00 4.6300E-01 1.7240E-01 3.0940E-02 2.1960E-01 3.5220E-02 5.6410E-03

1.6700E-02 3.4980E-02 2.0620E-02 1.9680E-03 1.4820E+01 9.2560E-01 2.1140E-02

2.4770E-03 2.5440E+01 2.2290E+00 8.5800E-02 1.3100E-03 3.2990E+01 2.9320E+00

1.2810E-01 3.7600E-03 1.9120E-02 4.7910E-03 9.6170E-04 1.2200E-04 4.0370E-02

9.6830E-03 7.5660E-04 8.2120E-05 4.9370E-02 1.6800E-02 3.5300E-03 1.8160E-04

6.2670E+00 2.5720E-01 5.9990E-03 5.9200E-04 1.3410E-01 4.2810E-02 9.7720E-03

1.2200E-03 6.8320E-01 8.2820E-02 1.7340E-02 2.9410E-03 2.0950E+00 2.0420E-01

2.3520E-02 3.3360E-03 9.2810E-03 8.1830E-04 4.2060E-05 2.0430E-02 5.6370E-03

7.9010E-04 5.6320E-05 2.8310E-02 7.0980E-03 1.2830E-03 1.5310E-04 4.5020E-02

8.0270E-03 8.5690E-04 2.0860E-04 1.3310E-01 1.8540E-02 2.3280E-03 2.5420E-04

6.1170E-03 4.6590E-03 2.2190E-03 4.8630E-04 2.2980E-02 3.8790E-03 1.0100E-03

2.2120E-05 4.4790E-02 9.9840E-03 1.6020E-03 1.6590E-04 1.0740E+01 4.9080E-01

4.2820E-01 5.1710E-01 3.1550E-01 9.2880E-02 7.1720E-01 1.6740E+00 1.2360E+00

3.1580E-01 2.2020E-01 5.1960E-01 2.9220E-01 7.1670E-02 8.6180E-02 1.0020E-01

5.8690E-02 2.9540E-02 1.2840E-02 1.0660E-01 9.0770E-02 7.6490E-02 4.9990E-02

2.4500E-02 8.0640E-03 1.3150E-01 1.0730E-01 4.5750E-02 1.8110E-01 1.8380E-01

7.4840E-02 2.3400E-02 1.7260E-01 1.8470E-01 1.0780E-01 3.4600E-02 7.5990E-02

3.5690E-02 2.6480E-02 6.3650E-01 1.1040E+00 6.0800E-01 1.7630E-01 1.1410E-01

9.0500E-02 1.9340E-02 1.4320E-02 2.8180E-02 9.1540E-03 1.2010E-02 1.6810E+00

1.0610E+01 1.1400E+00 2.3400E-02 2.2070E+00 2.0220E+01 2.7580E+00 1.0120E-01

3.3200E-01 2.8200E+01 3.7250E+00 1.4930E-01 8.2810E-03 8.7300E-03 3.5040E-03

9.0420E-04 1.7120E-02 1.6880E-02 8.8790E-03 7.3010E-04 2.1240E-02 2.1030E-02

1.3590E-02 4.0270E-03 5.4260E-01 4.7330E+00 3.1650E-01 6.7520E-03 5.5090E-02

6.1020E-02 3.4520E-02 1.0480E-02 1.1230E-01 4.6670E-01 7.6580E-02 1.8530E-02

2.0260E-01 1.5480E+00 2.2920E-01 2.5860E-02 4.3680E-03 3.8360E-03 4.9060E-04

9.2950E-03 8.4110E-03 4.5590E-03 8.0280E-04 9.8270E-03 1.4100E-02 6.2810E-03

1.3820E-03 1.6730E-02 2.1720E-02 7.2550E-03 6.6840E-04 2.3620E-02 8.4800E-02

1.9500E-02 2.5930E-03 5.2440E-03 3.4050E-03 1.7220E-03 1.1880E-03 8.3590E-03

1.2210E-02 2.2460E-03 1.0960E-03 1.4380E-02 2.3170E-02 9.1320E-03 1.7510E-03

1.1310E+01 1.5150E-01 4.0310E-01 3.7230E-01 2.6700E-01 1.9480E-01 1.0980E+00

1.5430E+00 1.0690E+00 1.3680E-01 4.6460E-01 3.4000E-01 2.0840E-01 3.8370E-02

6.4760E-02 7.2430E-02 5.0430E-02 2.2410E-02 3.4000E-02 7.3420E-02 6.6360E-02

5.5070E-02 4.3090E-02 2.4550E-02 5.8660E-02 9.9370E-02 7.9100E-02 7.4310E-02

1.3710E-01 1.2260E-01 5.0980E-02 6.0840E-02 1.3880E-01 1.2850E-01 8.9330E-02

4.5730E-02 4.0200E-02 2.8950E-02 2.1950E-01 6.7230E-01 1.0840E+00 5.0000E-01

5.4260E-02 8.7170E-02 4.5330E-02 1.1930E-02 1.8260E-02 1.2140E-02 1.0720E-02

1.0340E-01 2.0920E+00 8.1630E+00 8.7140E-01 4.4660E-02 2.7490E+00 1.4940E+01

2.1300E+00 9.6320E-03 1.0860E+00 2.3630E+01 2.8710E+00 3.1250E-03 6.5620E-03

5.7060E-03 2.4550E-03 5.3800E-03 1.4980E-02 9.7240E-03 6.2570E-03 6.7420E-03

1.7160E-02 1.4530E-02 1.1480E-02 3.0230E-02 6.7700E-01 3.7180E+00 2.4190E-01

1.7970E-02 4.4950E-02 4.2500E-02 2.8830E-02 2.3650E-02 1.1130E-01 3.6220E-01

6.4790E-02 2.3520E-02 2.2850E-01 1.2380E+00 1.8410E-01 1.7610E-03 3.6710E-03

1.8160E-03 3.3190E-03 7.4610E-03 5.2090E-03 3.2290E-03 2.7110E-03 8.8310E-03

9.6700E-03 5.1080E-03 5.0450E-03 1.5440E-02 1.3130E-02 5.0400E-03 3.7490E-03

2.5130E-02 6.3800E-02 1.5790E-02 4.3700E-03 2.2260E-03 1.8090E-03 1.2240E-03

2.9800E-03 6.7890E-03 8.5220E-03 1.6330E-03 3.6660E-03 1.3400E-02 1.5930E-02

7.3700E-03 3.0380E-02 1.8170E-01 3.6490E-01 3.9430E-01 3.3560E-02 4.0810E-01

1.2230E+00 1.8110E+00 4.7810E-02 2.7360E-01 4.0050E-01 2.6800E-01 1.0170E-02

3.9280E-02 5.5680E-02 5.5730E-02 3.5470E-02 5.7340E-03 3.0480E-02 5.6090E-02

6.3050E-02 5.1570E-02 2.8330E-02 1.8910E-02 7.2690E-02 9.7860E-02 2.4600E-02

7.8410E-02 1.1350E-01 8.8760E-02 1.5290E-02 6.4310E-02 1.2180E-01 1.3110E-01

2.2580E-02 4.6420E-02 2.2910E-02 7.7020E-02 3.4740E-01 7.6070E-01 1.0420E+00

2.2870E-02 6.0720E-02 6.5690E-02 9.5450E-03 9.0430E-03 1.8400E-02 5.4550E-03

5.3000E-03 1.2300E-01 1.6670E+00 8.3860E+00 1.3100E-03 1.0120E-01 2.1260E+00

1.3710E+01 1.5930E-03 2.5800E-02 1.6630E+00 2.1380E+01 8.9570E-04 3.4810E-03

5.5330E-03 4.3710E-03 1.1100E-03 6.4210E-03 1.2620E-02 8.9220E-03 1.0850E-03

7.7620E-03 1.5400E-02 1.5680E-02 1.3400E-03 3.6100E-02 5.2350E-01 3.1730E+00

3.7640E-03 1.9990E-02 3.9790E-02 4.3840E-02 4.3940E-03 2.5860E-02 9.3410E-02

3.2660E-01 3.3360E-03 2.5850E-02 1.8440E-01 1.1260E+00 5.3220E-04 2.3010E-03

2.9640E-03 7.9520E-04 3.8520E-03 6.3560E-03 4.3680E-03 5.0660E-04 3.0670E-03

7.5840E-03 9.9010E-03 1.2250E-03 5.8390E-03 1.2770E-02 1.1090E-02 4.5230E-04

4.2700E-03 2.0610E-02 6.1760E-02 3.4960E-03 1.2850E-03 1.9610E-03 9.5800E-04

7.4600E-04 3.4250E-03 5.7540E-03 6.0150E-03 6.2060E-04 4.1950E-03 1.1390E-02

1.6090E-02 5.1980E+00 2.1380E-01 3.9670E-02 1.1220E+00 5.7350E-01 1.8270E-01

3.4230E-02 1.2700E+00 1.0490E+00 3.1850E-01 6.1270E-02 9.8360E-02 5.9790E-02

2.7560E-02 1.2650E-02 5.1120E-03 1.3790E-01 9.7870E-02 6.5440E-02 3.8260E-02

1.8800E-02 6.9590E-03 1.2030E-01 4.6230E-02 1.5570E-02 8.9330E-01 1.5520E-01

4.2050E-02 1.2620E-02 4.1420E-01 1.4830E-01 5.4630E-02 1.8570E-02 2.1120E-01

1.0370E-01 1.7900E-02 1.1440E+00 6.7110E-01 2.1290E-01 6.8790E-02 2.6850E-01

1.1220E-01 3.9700E-02 3.6280E-01 4.2810E-01 2.1290E-01 9.7470E-02 9.0880E+00

1.2760E+00 1.2760E-01 1.1180E-02 8.2000E-01 4.3510E-01 1.0620E-01 1.5280E-02

1.2010E+00 4.4220E-01 1.2820E-01 1.2940E-02 1.5090E-01 2.7140E-02 1.8570E-02

9.8210E-03 1.7260E+01 4.4710E-01 3.8910E-03 8.6050E-04 2.2260E+01 2.6180E+00

1.1000E-01 1.0380E-03 2.4910E+01 2.5370E+00 1.5080E-01 5.4960E-03 6.6100E-01

9.9350E-02 1.0300E-02 1.2760E-03 4.8830E-01 6.7150E-02 1.0760E-02 1.8250E-03

6.2350E-02 2.9680E-02 1.0800E-02 2.1550E-03 4.3750E-02 1.1530E-02 1.7800E-03

7.7540E-01 5.1500E-02 6.4750E-03 1.6580E-03 3.9030E-01 6.6570E-02 9.9180E-03

1.9900E-03 4.5500E-02 1.8650E-02 5.3810E-03 1.2270E-03 4.8260E-02 1.9990E-02

6.4170E-03 1.8200E-03 1.3900E-02 7.8430E-03 4.7720E-03 1.9610E-03 1.8200E-02

8.6990E-03 3.6560E-03 1.2530E-03 3.7790E-02 1.5050E-02 4.8770E-03 1.1010E-03

6.7920E+00 2.5320E-01 3.3100E-01 7.4810E-01 5.2970E-01 2.0390E-01 9.0490E-01

1.0840E+00 6.6550E-01 2.8120E-01 4.6470E-02 5.9010E-02 4.1270E-02 2.2030E-02

8.6070E-03 8.8040E-02 6.9170E-02 4.7550E-02 3.7630E-02 3.0980E-02 1.8590E-02

6.2730E-02 5.3390E-02 2.9520E-02 2.4390E-01 4.9150E-01 1.1660E-01 3.0270E-02

1.4830E-01 2.0470E-01 1.0650E-01 4.9140E-02 1.4220E-01 6.4420E-02 5.9540E-02

6.7110E-01 6.4400E-01 5.2820E-01 1.9520E-01 1.6680E-01 1.1590E-01 5.3640E-02

2.9020E-01 2.9020E-01 2.1060E-01 8.9930E-02 6.7280E-01 6.1100E+00 1.4860E+00

1.5380E-01 3.1270E-01 6.1170E-01 4.0970E-01 1.2370E-01 2.3040E-01 1.3800E+00

7.6210E-01 1.5380E-01 4.2010E-02 1.0120E-01 1.5340E-02 6.5640E-03 2.3850E+00

1.1290E+01 4.9520E-01 3.1200E-03 2.6140E+00 1.4110E+01 3.1310E+00 1.3910E-01

8.2810E-01 1.8030E+01 3.1580E+00 1.8890E-01 9.9160E-02 4.0030E-01 1.0640E-01

1.1760E-02 3.2830E-02 3.4940E-01 7.2590E-02 1.2160E-02 2.4290E-02 2.5620E-02

2.1970E-02 1.2110E-02 2.2300E-02 1.6600E-02 6.7410E-03 1.3590E-01 4.7850E-01

4.8200E-02 5.1190E-03 6.6500E-02 2.3040E-01 6.7690E-02 1.0460E-02 2.2260E-02

1.7220E-02 1.2640E-02 4.4950E-03 1.7240E-02 2.2160E-02 1.6330E-02 6.5840E-03

1.1120E-02 5.9460E-03 3.5800E-03 2.1340E-03 1.0030E-02 7.8850E-03 5.1510E-03

2.3820E-03 1.4970E-02 1.6400E-02 1.0810E-02 5.0090E-03 5.1070E+00 8.8160E-02

4.5160E-01 5.2240E-01 4.5480E-01 4.7740E-01 8.2690E-01 7.2350E-01 4.1790E-01

2.2490E-02 3.7370E-02 3.6700E-02 2.7120E-02 1.3980E-02 4.9830E-02 3.8670E-02

4.8310E-02 4.2860E-02 2.7320E-02 1.1900E-02 3.0330E-02 4.2820E-02 3.6050E-02

7.3040E-02 2.1160E-01 3.0350E-01 7.3190E-02 5.4630E-02 1.0650E-01 1.3910E-01

8.1320E-02 7.8290E-02 7.1540E-02 4.9770E-02 2.1290E-01 5.2820E-01 6.0340E-01

4.0380E-01 9.9120E-02 9.6850E-02 5.6410E-02 2.1770E-01 1.9440E-01 1.6230E-01

8.6370E-02 3.4620E-02 7.6570E-01 4.3570E+00 1.1610E+00 4.2150E-02 2.9740E-01

4.0540E-01 3.4820E-01 8.7310E-03 4.2220E-01 9.4300E-01 6.2740E-01 2.2790E-02

3.4080E-02 6.1350E-02 5.7070E-03 1.8940E-01 2.8880E+00 7.2100E+00 3.4600E-01

1.0910E-01 3.1350E+00 9.3860E+00 2.3670E+00 7.1070E-03 1.0080E+00 1.3220E+01

2.4280E+00 1.0290E-02 1.0640E-01 2.6460E-01 8.1380E-02 6.0550E-03 3.0640E-02

2.6470E-01 5.7930E-02 6.3090E-03 1.7910E-02 1.8540E-02 2.0240E-02 1.0050E-02

1.4810E-02 9.3710E-03 2.0290E-02 1.4790E-01 3.0010E-01 3.2630E-02 9.9010E-03

6.7680E-02 1.5190E-01 5.1840E-02 8.7200E-03 1.5120E-02 1.0540E-02 7.9760E-03

4.5350E-03 1.4130E-02 1.4670E-02 1.3610E-02 8.3370E-03 4.1060E-03 2.9750E-03

1.6620E-03 5.0890E-03 6.1470E-03 5.0140E-03 2.8510E-03 4.8530E-03 1.0620E-02

1.1280E-02 8.6300E-03 1.7010E-02 1.3600E-01 3.5040E-01 5.0280E-01 1.4170E-01

5.0060E-01 6.0250E-01 3.9330E-01 1.0690E-02 1.7200E-02 2.4260E-02 2.4170E-02

1.5020E-02 1.6830E-02 3.8060E-02 3.3670E-02 2.6590E-02 1.9770E-02 1.0980E-02

1.3270E-02 2.7440E-02 3.2080E-02 2.5210E-02 6.8230E-02 1.5550E-01 1.8950E-01

1.8570E-02 4.9140E-02 8.1320E-02 1.0530E-01 3.4130E-02 7.0890E-02 2.8030E-02

6.8770E-02 1.9520E-01 4.0390E-01 4.9760E-01 5.4370E-02 6.7450E-02 4.6060E-02

1.4510E-01 1.2110E-01 1.0340E-01 7.0870E-02 4.7160E-03 3.7620E-02 5.8120E-01

3.5880E+00 2.8590E-03 4.7450E-02 2.3820E-01 4.4040E-01 8.4610E-04 9.4500E-03

3.2230E-01 1.0020E+00 1.5450E-02 1.1050E-02 2.0380E-02 3.5680E-02 6.6280E-03

2.5660E-01 2.2150E+00 4.6370E+00 1.0380E-03 1.3910E-01 2.3690E+00 7.4910E+00

1.8960E-03 6.8360E-03 7.5430E-01 1.0350E+01 1.2740E-03 1.1760E-02 8.1850E-02

2.1400E-01 9.5240E-04 6.5080E-03 2.4360E-02 2.0950E-01 5.8540E-04 6.9550E-03

1.5500E-02 1.8950E-02 3.7830E-03 1.0300E-02 8.7350E-03 3.8560E-03 2.3210E-02

1.1270E-01 1.9420E-01 1.9890E-03 1.0460E-02 5.1850E-02 1.2320E-01 2.7790E-03

8.4570E-03 1.0950E-02 6.1170E-03 1.1580E-03 4.3780E-03 1.1240E-02 1.4510E-02

5.5590E-03 2.5120E-03 2.2760E-03 1.0420E-03 2.3150E-03 3.9830E-03 4.0010E-03

2.4090E-03 1.0930E-03 5.0060E-03 8.5060E-03 8.9050E-03 4.8780E+00 2.0710E-01

2.4990E-02 1.3990E+00 6.5320E-01 1.8750E-01 3.8740E-02 7.0180E-02 4.4680E-02

1.6090E-02 5.1470E-03 1.3250E-03 1.6280E-01 8.8230E-02 4.2700E-02 1.7520E-02

5.6180E-03 1.1460E-03 8.4680E-02 1.9960E-02 5.9850E-03 3.1020E-01 1.0110E-01

2.7730E-02 5.1710E-03 7.7680E-01 1.2460E-01 3.2350E-02 8.6620E-03 1.7910E-01

3.7620E-02 9.2710E-03 1.9820E+00 5.7890E-01 1.4320E-01 3.8140E-02 2.2590E-01

7.1800E-02 1.0810E-02 4.9310E-03 2.7420E-02 5.8700E-03 1.6990E-03 1.5100E+00

2.3500E-01 3.7190E-02 3.4760E-03 2.9810E+00 3.7510E-01 4.3740E-02 4.6790E-03

1.5040E-01 1.1010E-01 3.1160E-02 4.1640E-03 2.4200E-02 1.1310E-02 3.3320E-03

4.7480E-04 6.3660E-02 1.9550E-02 2.8330E-03 4.5820E-04 5.3440E-01 3.5470E-02

5.7870E-03 1.6560E-03 1.1580E-01 4.4800E-02 1.3450E-02 2.3570E-03 1.9220E+01

6.9390E-01 5.3990E-03 8.7570E-04 2.5650E+01 2.3710E+00 9.3330E-02 6.7420E-04

3.1320E+01 2.7100E+00 1.2700E-01 2.9020E-03 3.1650E-02 6.4720E-03 2.1650E-03

7.0340E-02 2.8040E-02 1.0480E-02 2.6300E-03 1.7010E+00 8.6380E-02 1.2470E-02

3.9220E-03 5.2890E-02 1.5400E-02 3.8500E-03 3.6670E-04 1.1290E-01 2.5870E-02

5.4380E-03 8.9060E-04 1.0090E-03 1.1610E-02 3.5120E-03 8.5290E-04 2.4380E-02

8.6150E-03 2.2670E-03 4.9520E-04 6.9980E-02 1.6520E-02 3.2470E-03 5.5150E-04

8.7350E+00 2.5770E-01 7.3320E-01 1.3360E+00 4.2890E-01 1.5770E-01 3.4260E-02

5.2980E-02 3.1910E-02 1.5150E-02 5.5370E-03 7.6330E-02 6.7950E-02 5.3550E-02

3.6530E-02 2.1270E-02 9.2670E-03 3.8840E-02 4.0610E-02 1.2700E-02 1.4440E-01

1.3630E-01 6.6900E-02 2.3840E-02 1.7290E-01 4.7670E-01 1.0360E-01 3.0760E-02

9.3010E-02 7.5450E-02 1.9850E-02 6.9040E-01 9.6750E-01 4.9110E-01 1.3660E-01

1.3510E-01 8.2490E-02 4.0810E-02 4.1090E-03 1.4320E-02 1.1840E-02 2.9900E-03

2.3460E-01 9.3030E-01 2.3760E-01 4.2860E-02 2.3990E-01 2.1580E+00 4.2820E-01

5.0240E-02 9.1910E-02 1.3110E-01 9.6260E-02 3.5260E-02 1.4200E-02 8.6680E-03

6.7920E-03 3.1250E-03 2.8430E-02 2.4560E-02 1.6520E-02 2.5720E-03 7.1310E-02

3.7000E-01 3.4860E-02 5.4180E-03 4.4790E-02 5.2440E-02 3.5170E-02 1.4600E-02

2.0030E+00 1.3750E+01 8.4270E-01 5.7050E-03 2.3650E+00 1.8060E+01 2.9130E+00

1.1400E-01 5.4750E-01 2.4170E+01 3.4300E+00 1.5350E-01 1.6310E-02 1.4080E-02

3.1670E-03 3.7100E-02 3.1760E-02 1.5920E-02 8.1950E-03 2.0060E-01 1.2030E+00

8.7960E-02 1.1340E-02 2.2900E-02 2.3730E-02 9.9950E-03 3.8400E-03 2.5860E-02

7.0980E-02 2.4570E-02 5.9150E-03 8.4120E-04 6.7710E-03 4.6860E-03 1.8610E-03

1.1880E-02 1.0060E-02 6.0030E-03 1.8760E-03 2.0630E-02 3.6480E-02 1.4720E-02

3.4160E-03 7.4820E+00 3.3850E-01 8.0690E-01 8.8680E-01 2.8230E-01 1.4760E-02

3.1870E-02 3.5710E-02 2.5180E-02 1.1450E-02 2.7900E-02 4.6520E-02 4.8060E-02

4.1770E-02 3.0970E-02 1.6560E-02 1.6900E-02 3.2610E-02 2.4100E-02 5.9540E-02

1.0210E-01 9.0600E-02 4.4270E-02 4.6610E-02 1.5750E-01 3.4150E-01 8.1930E-02

4.5660E-02 6.7770E-02 3.7210E-02 2.0660E-01 5.9330E-01 6.4120E-01 3.8730E-01

7.1600E-02 8.2390E-02 5.2460E-02 3.2880E-03 7.2010E-03 1.0480E-02 5.6410E-03

3.7160E-02 2.3760E-01 6.8260E-01 1.9430E-01 2.3830E-02 2.6460E-01 1.6710E+00

3.4190E-01 1.9450E-02 8.0580E-02 9.5860E-02 8.7790E-02 6.6420E-03 8.5220E-03

6.5170E-03 4.5460E-03 9.4010E-03 2.3130E-02 1.3750E-02 1.1370E-02 1.0610E-02

7.8530E-02 2.6940E-01 2.6800E-02 1.3440E-02 3.5170E-02 3.7790E-02 3.1220E-02

1.2240E-01 2.4800E+00 1.0050E+01 6.3160E-01 9.2930E-02 2.9120E+00 1.3530E+01

2.2350E+00 3.7010E-03 1.5960E+00 1.8970E+01 2.6380E+00 8.2480E-03 1.2210E-02

6.3840E-03 1.8560E-02 2.3280E-02 2.2590E-02 9.9170E-03 2.5100E-02 2.2970E-01

8.8090E-01 6.7090E-02 8.8500E-03 1.6430E-02 1.6240E-02 6.8430E-03 5.4380E-03

2.4570E-02 5.1300E-02 2.0370E-02 6.7300E-04 3.7090E-03 4.3770E-03 2.5680E-03

4.9430E-03 8.4940E-03 6.4460E-03 3.9750E-03 5.1180E-03 1.8750E-02 2.4620E-02

1.1720E-02 1.3060E-01 4.1440E-01 6.4100E-01 5.9380E-01 4.8430E-03 1.5470E-02

2.4630E-02 2.6070E-02 1.7030E-02 5.5730E-03 2.4710E-02 3.7630E-02 3.9880E-02

3.2490E-02 1.8050E-02 7.1410E-03 1.7270E-02 3.0440E-02 2.0080E-02 6.1130E-02

8.1430E-02 5.9010E-02 1.3490E-02 4.7590E-02 1.2770E-01 2.8160E-01 2.1230E-02

4.5130E-02 4.6620E-02 5.9360E-02 2.1120E-01 4.8760E-01 6.1300E-01 3.2140E-02

7.2620E-02 5.0280E-02 2.4650E-03 3.5430E-03 6.7870E-03 7.1640E-03 3.4750E-03

4.2860E-02 1.9430E-01 6.3650E-01 2.4190E-03 2.6590E-02 2.1070E-01 1.4870E+00

9.2740E-04 2.1930E-02 7.1290E-02 1.1830E-01 2.1530E-03 6.9090E-03 6.9530E-03

3.6440E-03 2.3040E-03 1.0630E-02 1.8780E-02 1.1530E-02 2.5510E-03 1.1330E-02

6.1500E-02 2.1360E-01 2.3570E-03 1.4600E-02 3.1220E-02 4.0030E-02 3.7940E-03

1.5400E-01 1.9100E+00 7.8950E+00 6.7410E-04 1.1390E-01 2.2350E+00 1.1730E+01

5.1780E-04 4.4440E-03 1.2080E+00 1.6200E+01 4.2120E-03 7.5040E-03 8.4150E-03

7.8520E-03 1.7300E-02 1.7890E-02 1.2730E-02 5.9090E-03 2.6900E-02 1.7860E-01

6.9100E-01 2.3780E-03 9.7340E-03 1.3440E-02 1.0680E-02 8.9050E-04 5.9160E-03

2.0370E-02 4.5470E-02 5.0470E-04 1.8760E-03 3.4050E-03 2.7090E-03 1.7130E-03

5.0230E-03 6.7580E-03 4.3880E-03 1.0160E-03 5.6500E-03 1.5470E-02 2.3020E-02

3.1330E+00 2.8040E-01 1.2380E-01 4.7230E-02 3.2380E-02 1.7780E-02 9.1540E-03

3.8770E-03 4.7190E-02 2.9660E-02 1.8180E-02 1.1080E-02 6.4960E-03 3.0350E-03

5.2970E-02 2.5210E-02 1.7850E-02 4.0810E-01 1.9930E-01 8.0350E-02 2.6700E-02

4.8220E-01 2.1760E-01 1.2220E-01 4.7090E-02 5.0030E-01 7.4090E-02 2.5470E-02

8.8870E-01 4.5620E-01 2.2510E-01 1.0530E-01 6.4390E-01 3.5580E-01 4.1070E-02

7.3940E-02 2.1460E-01 9.6740E-02 5.3290E-02 3.3610E-01 1.4970E-01 4.5830E-02

9.7970E-03 2.2710E-01 9.8810E-02 3.4810E-02 8.5620E-03 2.1180E-01 9.8140E-02

3.4880E-02 7.7150E-03 4.5320E-02 2.4560E-02 1.3780E-02 6.0840E-03 2.2380E+00

4.3520E-01 3.1230E-02 5.5920E-03 2.1070E+00 3.5060E-01 5.4970E-02 1.1480E-02

1.6420E-01 8.5580E-02 3.7500E-02 1.2610E-02 2.7930E+00 4.2270E-01 5.5300E-02

9.7980E-03 2.2520E-01 8.2590E-02 2.8690E-02 9.5570E-03 2.4900E-01 1.0250E-01

4.1830E-02 1.5570E-02 1.2120E+01 2.3520E-01 5.5180E-03 1.6580E+01 3.0520E+00

1.2600E-01 2.1740E-03 2.3660E+01 3.3070E+00 2.7340E-01 1.4650E-02 1.2470E-01

4.6750E-02 1.3360E-02 2.7090E-03 2.5620E-02 1.5130E-02 7.5740E-03 3.0190E-03

3.7230E-02 1.0520E-01 1.7890E-02 8.4670E-03 4.6750E-02 2.5050E-02 1.0120E-02

2.6160E-03 3.0460E-02 1.2290E-02 4.7080E-03 1.3350E-03 4.1050E+00 1.5800E-01

2.5180E-02 2.2950E-02 1.9430E-02 1.2650E-02 5.3960E-03 2.1560E-02 2.1250E-02

1.8870E-02 1.3700E-02 7.9760E-03 3.3730E-03 2.7660E-02 3.2320E-02 1.2100E-02

1.8240E-01 1.8300E-01 1.0390E-01 5.5620E-02 2.1650E-01 1.8680E-01 1.4380E-01

8.4650E-02 1.6910E-01 2.4340E-01 3.5990E-02 3.8780E-01 4.0150E-01 2.9450E-01

1.7300E-01 4.2500E-01 1.2520E-01 2.3030E-01 5.5450E-02 1.2450E-01 1.1610E-01

3.2820E-02 1.0270E-01 1.2330E-01 1.2660E-01 5.3430E-02 5.7400E-02 9.8550E-02

8.0790E-02 4.0170E-02 5.4220E-02 8.7100E-02 8.1620E-02 4.1460E-02 2.4540E-02

2.3130E-02 1.2970E-02 6.6880E-03 4.3490E-01 1.0940E+00 4.7280E-01 3.0510E-02

1.1960E-01 1.3360E+00 3.7840E-01 6.1460E-02 6.4430E-02 6.4930E-02 5.6980E-02

3.8560E-02 1.1280E-01 1.8100E+00 4.7560E-01 6.4180E-02 4.8540E-02 1.1240E-01

6.9060E-02 2.9600E-02 5.6130E-02 1.2630E-01 8.1230E-02 4.3000E-02 2.9150E+00

6.1950E+00 1.6760E-01 3.0510E+00 8.1570E+00 3.4400E+00 1.6130E-01 6.6100E-01

1.5400E+01 3.9900E+00 3.6320E-01 4.6740E-02 4.9070E-02 3.2320E-02 1.2450E-02

1.2070E-02 9.9410E-03 9.1820E-03 7.2550E-03 2.7930E-02 3.7710E-02 5.3870E-02

7.0450E-03 2.5050E-02 1.6700E-02 1.3290E-02 8.3750E-03 9.6330E-03 1.3970E-02

8.2300E-03 4.7770E-03 2.7050E+00 1.1440E-02 1.6560E-02 1.3040E-02 1.0510E-02

6.6590E-03 9.4060E-03 1.3780E-02 1.1790E-02 1.0020E-02 8.1050E-03 4.7100E-03

1.7080E-02 1.7170E-02 1.3450E-02 7.7740E-02 1.1300E-01 1.0970E-01 5.3770E-02

7.7290E-02 1.1670E-01 1.1950E-01 9.8040E-02 5.7390E-02 1.3960E-01 1.0110E-01

1.6110E-01 2.3880E-01 2.4480E-01 1.9310E-01 1.8410E-01 2.0730E-01 1.2900E-01

3.6970E-02 7.7380E-02 6.6890E-02 3.8040E-02 1.0680E-02 9.3280E-02 6.3690E-02

1.0310E-01 8.4700E-03 4.6010E-02 6.1710E-02 6.8440E-02 5.1050E-03 4.6510E-02

5.3450E-02 7.1210E-02 1.3790E-02 1.2960E-02 1.2820E-02 5.3270E-03 3.1190E-02

4.7280E-01 5.2200E-01 3.2880E-01 2.1820E-02 1.0010E-01 8.5420E-01 2.8780E-01

1.8020E-02 4.1810E-02 4.4280E-02 4.5800E-02 1.9280E-02 9.5580E-02 1.1650E+00

3.6270E-01 1.1680E-02 3.6300E-02 7.0480E-02 5.4590E-02 1.6480E-02 3.6630E-02

8.4730E-02 6.6660E-02 4.0100E-01 3.2580E+00 2.5270E+00 1.2590E-01 3.4400E+00

3.8840E+00 2.4220E+00 9.7740E-03 7.3400E-01 9.8000E+00 3.0600E+00 1.3360E-02

3.2330E-02 2.8780E-02 1.9270E-02 4.1360E-03 7.1410E-03 7.2690E-03 7.1690E-03

1.8620E-02 1.5070E-02 2.9860E-02 2.0870E-02 1.0120E-02 1.3280E-02 1.2280E-02

6.5920E-03 2.9500E-03 5.8740E-03 9.5210E-03 6.0490E-03 4.4760E-03 6.0210E-03

8.1360E-03 6.5940E-03 3.2200E-03 4.4680E-03 4.1530E-03 6.2410E-03 6.5180E-03

4.9620E-03 2.5590E-03 9.0230E-03 5.2090E-03 9.5850E-03 2.6420E-02 5.5170E-02

6.3320E-02 3.5080E-02 2.4010E-02 5.5600E-02 6.8080E-02 6.3510E-02 2.0390E-02

4.1520E-02 8.6750E-02 5.8120E-02 1.0030E-01 1.3340E-01 1.2710E-01 4.7900E-02

1.7900E-01 3.3240E-02 1.8480E-02 3.9350E-02 2.4020E-02 2.7770E-02 1.6840E-03

9.7840E-03 6.4610E-02 5.9260E-02 7.6650E-04 8.3900E-03 3.2490E-02 5.0660E-02

4.9660E-05 5.5180E-03 3.3430E-02 4.9130E-02 6.0840E-03 6.6880E-03 5.3240E-03

4.3570E-03 5.5870E-03 3.0510E-02 3.2880E-01 3.1250E-01 4.7420E-03 1.8600E-02

6.6600E-02 5.4210E-01 3.2460E-03 1.5910E-02 2.7820E-02 2.7980E-02 3.8170E-03

1.7040E-02 6.4000E-02 7.3630E-01 2.9520E-03 9.0740E-03 2.4040E-02 5.0470E-02

3.6780E-03 1.3320E-02 2.4570E-02 6.0660E-02 1.8160E-02 6.2000E-01 2.4550E+00

2.1650E-03 1.6130E-01 2.4220E+00 2.3520E+00 4.7760E-03 4.1380E-03 5.1130E-01

6.2820E+00 2.7080E-03 1.2450E-02 1.9270E-02 1.2440E-02 9.4240E-04 3.3640E-03

4.5590E-03 3.8890E-03 9.3090E-03 6.4100E-03 8.0250E-03 1.8460E-02 2.6150E-03

8.3760E-03 6.6010E-03 3.5600E-03 5.0970E-04 2.7250E-03 3.6920E-03 5.2690E-03

4.1420E+00 1.2940E+00 3.8780E-01 1.5500E-01 9.2010E+00 3.7560E+00 1.0650E+00

2.1550E-01 3.8350E-02 8.2710E-03 4.0400E+00 1.1780E+00 4.0580E-02 3.5080E+00

5.2570E-01 9.5280E-02 6.1960E-03 2.6660E+00 7.8960E-01 1.2860E-01 1.0080E-02

9.8010E-01 1.5550E-01 1.4340E-02 5.4510E-02 2.2770E-02 9.2500E-03 3.5720E-03

2.2690E-02 1.4010E-02 7.1450E-03 5.3010E-02 1.3360E-01 1.8510E-02 5.3110E-03

2.2170E-01 1.7600E-01 8.1490E-02 1.8810E-02 1.4830E-01 7.3120E-02 2.1840E-02

3.4190E-03 9.1380E-02 2.3720E-02 4.7730E-03 6.1690E-04 1.1870E-01 3.7940E-02

6.5740E-03 1.0570E-04 1.1370E-01 5.8890E-02 5.2090E-02 3.3860E-02 1.6910E-01

4.1190E-02 1.0460E-02 2.5100E-03 4.6890E-02 1.5320E-02 4.1080E-03 8.9240E-04

8.8780E-02 7.9880E-02 4.7140E-02 1.5360E-02 1.9980E-01 4.4710E-02 7.2990E-03

6.9960E-04 3.6840E-02 1.5690E-02 4.5270E-03 7.5750E-04 5.2970E-02 3.8510E-02

1.0360E-02 5.8720E-02 2.6750E-02 1.4420E-02 7.5590E-03 5.1480E-02 2.4550E-02

8.5280E-03 2.2380E-03 7.4810E-02 7.7180E-02 3.8870E-02 9.0280E-03 4.7820E-02

2.6740E-02 9.2870E-03 1.9410E-03 6.4100E-02 2.4160E-02 1.1130E-02 6.6880E-03

2.1000E-02 1.0910E-02 5.6900E-03 2.7610E-03 3.3190E-02 1.6500E-02 6.2550E-03

1.4740E-03 4.1970E+00 1.8490E+00 3.1210E-01 2.7560E+00 3.3430E+00 3.3250E+00

1.5650E+00 3.8840E-01 5.8520E-02 1.9590E+00 1.4630E+00 7.8340E-01 1.0760E+00

1.7420E+00 3.6760E-01 9.1920E-02 9.2400E-01 1.1250E+00 6.7640E-01 1.3550E-01

4.6140E-01 3.7090E-01 8.7580E-02 2.4800E-02 2.4560E-02 1.4690E-02 7.4300E-03

1.8070E-02 1.2880E-02 5.5470E-03 4.2410E-02 6.1180E-02 5.5830E-02 8.9830E-03

1.6910E-01 5.7720E-02 9.1260E-02 8.0310E-02 6.6300E-02 5.0950E-02 5.7100E-02

2.2970E-02 1.7570E-02 5.0820E-02 2.2900E-02 5.1100E-03 5.2930E-02 4.4040E-02

2.6700E-02 6.9560E-03 6.9330E-02 8.8260E-02 3.9170E-02 1.0200E-02 5.0600E-02

8.6090E-02 3.2180E-02 9.7170E-03 1.5120E-02 2.2090E-02 1.2460E-02 4.0920E-03

7.9000E-02 3.6210E-02 2.9660E-02 4.0040E-02 4.5050E-02 1.0670E-01 4.2310E-02

7.9270E-03 1.4070E-02 1.4860E-02 1.2580E-02 4.7330E-03 4.4440E-02 1.8080E-02

1.8950E-02 3.2760E-02 3.0450E-02 1.7460E-02 5.2840E-03 2.6210E-02 1.9380E-02

1.6110E-02 7.7480E-03 7.7190E-02 2.5380E-02 2.7640E-02 2.9710E-02 2.5910E-02

1.5100E-02 1.8320E-02 9.3040E-03 5.1280E-02 1.6100E-02 1.3470E-02 4.0030E-03

1.2810E-02 1.0320E-02 6.7620E-03 2.3890E-03 1.7500E-02 1.2800E-02 9.7850E-03

5.8390E-03 2.5120E+00 1.4440E+00 2.4440E-01 2.7820E+00 1.5060E+00 2.1040E+00

1.5090E+00 4.2360E-01 7.7900E-01 1.2760E+00 1.0970E+00 2.9740E-01 9.5250E-01

9.7220E-01 2.2100E-01 2.2770E-01 7.9250E-01 6.5740E-01 4.6310E-01 1.9400E-01

3.2570E-01 1.7020E-01 1.1030E-02 1.6710E-02 1.6050E-02 1.0310E-02 1.3060E-02

9.3850E-03 4.3270E-03 3.1810E-02 2.6440E-02 4.6490E-02 2.1560E-02 8.0010E-02

7.8260E-02 5.4920E-02 8.5560E-02 1.8390E-02 4.9330E-02 3.4460E-02 4.5820E-02

2.0740E-03 1.9410E-02 3.4100E-02 1.6700E-02 1.8940E-02 3.6320E-02 2.6320E-02

1.6380E-02 5.6340E-02 5.6260E-02 3.3150E-02 9.4760E-03 1.4390E-02 4.4110E-02

5.3030E-02 2.2410E-02 4.0830E-03 1.2710E-02 1.4260E-02 9.2720E-03 5.0450E-02

2.7420E-02 3.4740E-02 2.6110E-02 7.0010E-03 4.7330E-02 6.7450E-02 2.9760E-02

3.7010E-03 1.1090E-02 9.9590E-03 9.9300E-03 3.0410E-02 1.7170E-02 1.3540E-02

1.9500E-02 2.2800E-02 1.4610E-02 7.5730E-03 1.0790E-02 1.6470E-02 1.2990E-02

1.1820E-02 5.2820E-02 2.2590E-02 2.8640E-02 1.5890E-02 9.4540E-03 1.6420E-02

1.0740E-02 1.4870E-02 3.8460E-02 1.1290E-02 9.8440E-03 4.0470E-03 7.7740E-03

8.1900E-03 5.2050E-03 3.0470E-03 7.6600E-03 1.0130E-02 9.1320E-03 7.5350E-03

1.5860E+00 3.8650E-02 2.6980E-01 2.0660E+00 1.0650E+00 1.1050E+00 1.1660E+00

2.1000E-01 8.9130E-01 9.9990E-01 7.1530E-02 3.4720E-01 7.2670E-01 4.7510E-01

3.1400E-02 3.2080E-01 5.1580E-01 5.4420E-01 6.9790E-02 2.0540E-01 1.8480E-01

4.5380E-03 9.0260E-03 1.1970E-02 1.0490E-02 8.5960E-03 5.8450E-03 3.0730E-03

2.1200E-02 1.0950E-02 2.6300E-02 2.5740E-02 2.4120E-02 6.8370E-02 5.7950E-02

4.8740E-02 2.4250E-03 2.4340E-02 3.1070E-02 4.0820E-02 1.3760E-04 3.1460E-03

1.8350E-02 2.6540E-02 4.8250E-03 2.0770E-02 2.3510E-02 1.6220E-02 4.5120E-02

2.3390E-02 2.1400E-02 1.3540E-02 4.0880E-03 1.5360E-02 3.5480E-02 3.4370E-02

9.2150E-04 4.7660E-03 9.7390E-03 1.1450E-02 2.2850E-02 3.1390E-02 2.5610E-02

1.2640E-02 6.2480E-04 1.0650E-02 4.0500E-02 4.9250E-02 5.3620E-04 4.8220E-03

7.6800E-03 1.0090E-02 1.7400E-02 1.7080E-02 6.2530E-03 1.1980E-02 1.2230E-02

1.1380E-02 7.3990E-03 3.5840E-03 1.0030E-02 1.1040E-02 1.0060E-02 2.6180E-02

3.0930E-02 1.8130E-02 4.6730E-03 2.2860E-03 1.0060E-02 1.0490E-02 1.1490E-02

2.5640E-02 7.5490E-03 5.3920E-03 3.8490E-03 4.6190E-03 4.8840E-03 4.0850E-03

2.5570E-03 2.5880E-03 6.6490E-03 7.4180E-03 6.3120E-03 7.2480E-03 4.0030E-02

1.9490E-01 1.1800E+00 1.0480E+00 3.8810E-01 1.6210E-02 4.4850E-01 5.8570E-01

1.1360E-02 1.0430E-01 2.7430E-01 4.1820E-01 1.9690E-03 5.1500E-02 2.9600E-01

3.5060E-01 1.9610E-02 9.2320E-02 1.1810E-01 1.6210E-03 3.8160E-03 5.8050E-03

6.5570E-03 4.2810E-03 2.7430E-03 1.6280E-03 1.0600E-02 3.9900E-03 1.0360E-02

1.7140E-02 3.0600E-03 3.4630E-02 4.6370E-02 1.5530E-02 5.0300E-05 4.0730E-03

2.3710E-02 2.1500E-02 1.7730E-05 1.8940E-04 3.2980E-03 2.0550E-02 5.9350E-04

7.8740E-03 1.4870E-02 9.3140E-03 2.5840E-02 5.9980E-03 9.3840E-03 1.0500E-02

1.0310E-03 4.6040E-03 1.2330E-02 2.6670E-02 1.9290E-04 1.1160E-03 4.2410E-03

7.8910E-03 6.6130E-03 2.3240E-02 1.1470E-02 4.9170E-03 3.5280E-05 1.0170E-03

1.0820E-02 3.8640E-02 3.4400E-05 8.3900E-04 4.6620E-03 6.0290E-03 7.5400E-03

1.1020E-02 1.8030E-03 5.9910E-03 4.4780E-03 6.6040E-03 4.4150E-03 9.2820E-04

3.9740E-03 7.1340E-03 5.3280E-03 8.8880E-03 2.3820E-02 6.5760E-03 6.2570E-04

3.2980E-04 3.1740E-03 8.3550E-03 5.3000E-03 1.2820E-02 3.8590E-03 2.1350E-03

2.4010E-03 2.2220E-03 2.0220E-03 2.4740E-03 1.3530E-03 5.7750E-04 3.1370E-03

4.3220E-03 3.4480E-03 4.3280E+00 5.1040E-01 6.1220E-02 1.1870E-02 2.2730E-03

8.9870E+00 2.1530E-01 6.6580E-02 2.5480E+00 5.1430E-01 2.3970E-02 3.5820E-03

3.6180E+00 5.1930E-01 3.6640E-02 2.3040E-03 1.8530E+00 2.8190E-02 1.7630E-02

6.1940E-02 2.3360E-02 7.6830E-03 1.7330E-03 1.4600E-02 4.0100E-03 1.4360E-03

1.7630E-02 3.4900E-02 1.9550E-02 3.8270E-03 1.8340E-01 4.0860E-02 7.4600E-03

9.2080E-04 1.5690E-01 5.3280E-02 1.0830E-02 1.0720E-03 5.1470E-01 1.5780E-01

2.8110E-02 2.4020E-03 1.4970E-01 1.9150E-02 1.1220E-03 7.0660E-05 5.5490E-02

2.6030E-02 9.7160E-03 1.5550E-03 6.7790E-02 5.7620E-02 2.5780E-02 4.4530E-03

2.6890E-01 7.6680E-02 1.9710E-02 2.7450E-03 1.4070E-01 6.0430E-02 1.5930E-02

1.8200E-03 1.2000E-01 7.8350E-02 2.5940E-02 3.6370E-03 3.8270E-01 1.0850E-01

2.2690E-02 2.4000E-03 4.4690E-02 4.4150E-02 3.7580E-02 6.8630E-02 4.6770E-02

2.0340E-02 3.4700E-03 1.9080E-01 4.7640E-02 7.7350E-03 1.3810E-03 4.3610E-02

1.5260E-02 5.8390E-03 1.2860E-03 9.1410E-02 3.8280E-02 9.6770E-03 1.4660E-03

7.8840E-02 4.5950E-02 2.0740E-02 7.0910E-04 7.4500E-02 3.1010E-02 6.7750E-03

6.6110E-04 7.3490E-02 4.6840E-02 1.3220E-02 1.4980E-03 5.1060E+00 7.8980E-01

8.9370E-02 1.6850E-02 3.6510E+00 3.8630E+00 1.1970E-01 1.1480E+00 9.9470E-01

4.1360E-01 1.8390E-02 1.8500E+00 3.5700E+00 4.6040E-01 3.4240E-02 8.8230E-01

6.9000E-01 1.1010E-02 3.1610E-02 2.5530E-02 1.4320E-02 6.4060E-03 9.1490E-03

5.9470E-03 1.7760E-03 1.4700E-02 2.7040E-02 1.2280E-02 9.2520E-03 6.3260E-02

9.0630E-02 3.3070E-02 6.8880E-03 6.4630E-02 6.6730E-02 4.3400E-02 1.0170E-02

1.8370E-01 2.3820E-01 1.3740E-01 2.6530E-02 5.9730E-02 6.6100E-02 1.4970E-02

9.5770E-04 3.5360E-02 2.2780E-02 1.1850E-02 7.3500E-03 5.9070E-02 2.2570E-02

2.5650E-02 2.2380E-02 1.0620E-01 1.2740E-01 5.5050E-02 1.8060E-02 7.7420E-02

5.1320E-02 3.8850E-02 1.4430E-02 8.2690E-02 3.4660E-02 4.8920E-02 2.3750E-02

1.3820E-01 1.8230E-01 8.7640E-02 2.1260E-02 4.5110E-02 4.4670E-02 1.5530E-02

5.3920E-02 2.8340E-02 1.8580E-02 1.5170E-02 7.8790E-02 8.3230E-02 3.7570E-02

6.6890E-03 2.4150E-02 1.9340E-02 7.4350E-03 4.0660E-03 4.5850E-02 3.4840E-02

2.7930E-02 8.7790E-03 6.5700E-02 3.2850E-02 1.2880E-02 1.0430E-02 4.4710E-02

2.5370E-02 1.8480E-02 5.5490E-03 5.2120E-02 1.9470E-02 2.8970E-02 1.1980E-02

4.4590E+00 8.2640E-01 8.2240E-02 1.2590E+00 3.5830E+00 1.2580E+00 4.4600E-01

8.7740E-01 5.2830E-01 2.0340E-01 4.0730E-01 2.1260E+00 1.9390E+00 2.5880E-01

3.8150E-01 6.9620E-01 1.9070E-01 1.5110E-02 2.0620E-02 1.7190E-02 1.0250E-02

5.7530E-03 5.5050E-03 2.4890E-03 1.1760E-02 1.8850E-02 1.1060E-02 8.9480E-03

1.8880E-02 5.8970E-02 5.5900E-02 2.1350E-02 2.0930E-02 5.1940E-02 4.5820E-02

2.9170E-02 5.0410E-02 1.6670E-01 1.6230E-01 8.9310E-02 2.0890E-02 5.1780E-02

3.3080E-02 7.6610E-03 2.1060E-02 1.7900E-02 1.5200E-02 7.7170E-03 3.8550E-02

2.0650E-02 2.0780E-02 2.3750E-02 3.8470E-02 8.6450E-02 8.1270E-02 3.9190E-02

3.6430E-02 4.6310E-02 3.5690E-02 2.7470E-02 4.2170E-02 4.0820E-02 2.9850E-02

3.9170E-02 4.2320E-02 1.2210E-01 1.1960E-01 5.9300E-02 4.4620E-02 3.1940E-02

7.6910E-03 3.6840E-02 2.1290E-02 2.1730E-02 1.2940E-02 2.8350E-02 6.4200E-02

4.9730E-02 2.2740E-02 1.3250E-02 1.4810E-02 1.1420E-02 4.5130E-03 1.9000E-02

3.0930E-02 2.4400E-02 1.9580E-02 5.2550E-02 2.0710E-02 1.2780E-02 1.1430E-02

2.3420E-02 2.4180E-02 1.6960E-02 1.0750E-02 2.7710E-02 2.4260E-02 1.6960E-02

2.1090E-02 3.3480E+00 6.2580E-01 3.5170E-01 2.0840E+00 2.1390E+00 1.3880E-01

5.2780E-01 5.1020E-01 3.2290E-01 6.5950E-02 7.1460E-01 1.7770E+00 9.1080E-01

1.4770E-01 4.7090E-01 3.3270E-01 6.5610E-03 1.3360E-02 1.5440E-02 1.2010E-02

3.3750E-03 4.1670E-03 2.6010E-03 8.8150E-03 1.1830E-02 1.0820E-02 6.4870E-03

4.7550E-03 2.5710E-02 4.8280E-02 3.7600E-02 4.8600E-03 2.8080E-02 3.7490E-02

4.0780E-02 8.2030E-03 7.8330E-02 1.2900E-01 1.3600E-01 6.1310E-03 2.7720E-02

3.4340E-02 1.6880E-02 1.1200E-02 1.4230E-02 1.3980E-02 7.0070E-03 1.9730E-02

2.2960E-02 1.8670E-02 1.6440E-02 1.2330E-02 4.3210E-02 7.0580E-02 5.7910E-02

1.4130E-02 3.3750E-02 3.1480E-02 2.9900E-02 1.6270E-02 3.6820E-02 2.5560E-02

3.5360E-02 1.0100E-02 5.6660E-02 9.9210E-02 9.1630E-02 4.0020E-02 1.7560E-02

5.5930E-03 2.1470E-02 2.0360E-02 1.8950E-02 8.8250E-03 8.6420E-03 3.5140E-02

4.4700E-02 3.5280E-02 6.9100E-03 1.0090E-02 1.0860E-02 5.1210E-03 6.2610E-03

2.0610E-02 2.0580E-02 2.3000E-02 3.9420E-02 1.1340E-02 1.3530E-02 8.8220E-03

1.0520E-02 1.9550E-02 1.5440E-02 1.0970E-02 1.1430E-02 2.3160E-02 1.4380E-02

1.8540E-02 2.1600E+00 8.4730E-02 7.8450E-01 2.1810E+00 3.4200E-02 2.3520E-01

4.1580E-01 3.1400E-01 8.6570E-03 1.4130E-01 8.5200E-01 1.2970E+00 5.0640E-02

2.4120E-01 3.4230E-01 2.4680E-03 7.5060E-03 1.0930E-02 1.0250E-02 1.8720E-03

2.7600E-03 2.2010E-03 5.8770E-03 6.5490E-03 9.0680E-03 3.8140E-03 9.7270E-04

8.1420E-03 2.6800E-02 4.1640E-02 5.9700E-04 9.6640E-03 2.6150E-02 3.7680E-02

3.6100E-05 2.1320E-02 7.7650E-02 1.3530E-01 1.4050E-03 1.0930E-02 2.4120E-02

2.0250E-02 5.0580E-03 1.0620E-02 9.6200E-03 5.6320E-03 7.5300E-03 2.0150E-02

1.6090E-02 8.0920E-03 3.1060E-03 1.7910E-02 4.2400E-02 5.9260E-02 4.1570E-03

1.9040E-02 2.6360E-02 2.3400E-02 4.2910E-03 2.2290E-02 2.7530E-02 2.1900E-02

1.5170E-03 1.8540E-02 5.7870E-02 9.3960E-02 3.0360E-02 7.1810E-03 4.5830E-03

1.0320E-02 1.8250E-02 1.2290E-02 5.5450E-03 2.2840E-03 1.3850E-02 3.0830E-02

3.5560E-02 3.2440E-03 6.4940E-03 7.2920E-03 4.9650E-03 1.5290E-03 9.5630E-03

1.6910E-02 1.8930E-02 2.6280E-02 5.2370E-03 1.1780E-02 5.4400E-03 3.8890E-03

1.2620E-02 1.3310E-02 7.8160E-03 3.4440E-03 1.4950E-02 1.6080E-02 1.0550E-02

2.3920E-02 1.4620E-01 1.3540E+00 5.9960E-03 6.8900E-02 2.3530E-01 1.8920E-01

9.1590E-04 1.7630E-02 1.8110E-01 9.4430E-01 1.4590E-02 8.9140E-02 2.1340E-01

7.2210E-04 3.2830E-03 5.4970E-03 5.8960E-03 8.3720E-04 1.2790E-03 1.2590E-03

2.9390E-03 2.8250E-03 5.2160E-03 1.6620E-03 1.4640E-04 1.8540E-03 9.4550E-03

2.7320E-02 7.0410E-06 1.4500E-03 1.2730E-02 2.2290E-02 3.9500E-06 7.2000E-05

3.3440E-02 8.3610E-02 2.2300E-04 2.9640E-03 1.1440E-02 1.3730E-02 1.7490E-03

5.8650E-03 4.6180E-03 3.2170E-03 1.8560E-03 1.1670E-02 9.7370E-03 2.6710E-03

4.1760E-04 6.1300E-03 1.7250E-02 3.7540E-02 7.5840E-04 7.6490E-03 1.5660E-02

1.2310E-02 5.1160E-04 8.7490E-03 1.9550E-02 9.2010E-03 1.5970E-05 3.6890E-03

2.2890E-02 5.9270E-02 1.6400E-02 1.9210E-03 2.7350E-03 3.7250E-03 1.1150E-02

5.5570E-03 2.7670E-03 5.7520E-04 3.4810E-03 1.5070E-02 2.2130E-02 1.2140E-03

3.2940E-03 3.3460E-03 3.1450E-03 2.5780E-04 2.7510E-03 1.0080E-02 1.0370E-02

1.3140E-02 1.8530E-03 6.9040E-03 2.4760E-03 1.0790E-03 5.8620E-03 8.0870E-03

3.7970E-03 6.2410E-04 6.3550E-03 1.1660E-02 3.8620E-03 1.3240E+00 2.6290E-01

1.2350E+00 4.4720E-01 1.2370E-01 2.1830E-02 2.4630E+00 8.1770E-01 2.1330E-01

4.9130E-02 2.7390E+00 1.5230E-01 2.5660E-02 1.9920E-02 1.2580E-02 6.6820E-03

2.8560E-03 1.4100E-02 1.1160E-02 5.0300E-03 2.8790E-02 1.0130E-01 4.7530E-02

2.7000E-02 2.0970E-01 1.2070E-01 5.7470E-02 1.8580E-02 1.9680E-01 8.1220E-02

2.6540E-02 5.5200E-03 8.3120E-04 8.9000E-04 6.3880E-04 2.8150E-04 2.0170E-02

8.1120E-03 2.9030E-03 8.6540E-04 7.9850E-02 2.3250E-02 6.0930E-03 1.8320E-03

4.0410E-02 3.6730E-02 3.3050E-02 2.5700E-02 8.6510E-02 7.9360E-02 4.8280E-02

1.8040E-02 1.3890E-01 6.1100E-02 2.7130E-02 1.2750E-02 8.3340E-02 6.0860E-02

3.3550E-02 1.1880E-02 9.1130E-03 3.8880E-03 1.3790E-03 3.7540E-04 6.4250E-02

3.0410E-02 1.1930E-02 1.2050E-01 7.0790E-02 2.6470E-02 4.7330E-03 4.2310E-02

4.5470E-02 4.7950E-02 4.1090E-02 1.4170E-02 5.9200E-03 2.2690E-03 7.4430E-04

1.2350E-02 9.3700E-03 5.7240E-03 2.6620E-03 3.4180E-02 3.1200E-02 3.3110E-02

2.0720E-02 4.2200E-02 5.0110E-02 4.1700E-02 2.3240E-02 6.6610E-02 5.5660E-02

3.5180E-02 1.7490E-02 1.1090E+00 3.4560E-01 5.1450E-01 3.3670E-01 1.4030E-01

3.3430E-01 1.2260E+00 8.0900E-01 2.6580E-01 4.7250E-01 1.6070E+00 1.0760E-01

1.0540E-02 7.6380E-03 7.1860E-03 6.1700E-03 1.2240E-02 5.8990E-03 4.6470E-03

2.1600E-02 5.7080E-02 6.0250E-02 1.4580E-02 8.2950E-02 7.7050E-02 7.5690E-02

6.9110E-02 2.3940E-02 9.2710E-02 7.8810E-02 3.7130E-02 8.2370E-04 1.5720E-04

2.9830E-04 6.9510E-04 6.7030E-03 8.9650E-03 5.8630E-03 2.4840E-03 1.5910E-02

4.0660E-02 2.1490E-02 5.2030E-03 3.6080E-02 3.4150E-02 2.1650E-02 1.0030E-02

7.4870E-02 1.5390E-02 2.9450E-02 5.4430E-02 3.8520E-02 6.9350E-02 4.9430E-02

2.2690E-02 5.0700E-02 2.3450E-02 2.9300E-02 3.8790E-02 1.2880E-03 4.3070E-03

3.6710E-03 1.8040E-03 3.6470E-02 2.8810E-02 1.4680E-02 6.6870E-02 3.0900E-02

3.8790E-02 3.0320E-02 4.6990E-02 5.0010E-02 2.7780E-02 7.8380E-03 4.9780E-03

6.3940E-03 4.1720E-03 1.7880E-03 7.9920E-03 4.3240E-03 4.7250E-03 5.5850E-03

2.5630E-02 3.5030E-02 2.0490E-02 8.2460E-03 5.3800E-02 3.3720E-02 2.0510E-02

9.9010E-03 5.3080E-02 2.3860E-02 2.6130E-02 2.8160E-02 5.9430E-02 2.5050E-01

3.4010E-01 2.3690E-01 4.9790E-02 2.3370E-01 6.5540E-01 8.0070E-01 6.9960E-02

4.2790E-01 9.6060E-01 3.3230E-03 6.8070E-03 6.4050E-03 4.4890E-03 7.8150E-03

5.7250E-03 1.6260E-03 1.4400E-02 3.9440E-02 2.4130E-02 2.4360E-02 1.2160E-02

5.6290E-02 7.0050E-02 6.4720E-02 1.2300E-03 1.6370E-02 5.3240E-02 8.4220E-02

1.3790E-04 5.4050E-04 4.5860E-04 1.5790E-04 1.9660E-03 4.5370E-03 5.6630E-03

3.8500E-03 4.1420E-03 1.1030E-02 2.2390E-02 1.7950E-02 3.2700E-02 1.6480E-02

1.0810E-02 7.9380E-03 1.2760E-02 5.0370E-02 3.8360E-02 1.4610E-02 1.5230E-02

2.3810E-02 3.9200E-02 4.1550E-02 8.1770E-03 3.4220E-02 3.1980E-02 2.0440E-02

1.5930E-04 8.6310E-04 2.4970E-03 3.8540E-03 1.9210E-02 2.0730E-02 1.3360E-02

1.2860E-02 4.8500E-02 3.4880E-02 1.5020E-02 5.2790E-02 1.8190E-02 9.5160E-03

7.9200E-03 1.6440E-03 3.2850E-03 3.9580E-03 2.6680E-03 2.1800E-03 5.1610E-03

4.6370E-03 3.0120E-03 1.7090E-02 2.9430E-02 1.0170E-02 2.9170E-03 4.5530E-02

2.2310E-02 8.5500E-03 2.2400E-03 2.0900E-02 3.2950E-02 2.3040E-02 1.0600E-02

1.9640E+00 3.9290E-01 6.4460E-02 6.9880E+00 2.5810E+00 6.0050E-01 1.1870E-01

2.0760E+00 8.4270E-01 5.1830E-02 2.8150E-01 1.6250E-01 6.6530E-02 2.2610E-02

1.0170E-01 4.0740E-02 1.5130E-02 6.4290E-02 1.1680E-01 4.4400E-02 9.5760E-03

1.8030E-01 7.9860E-02 3.1440E-02 8.5350E-03 8.4320E-02 4.3280E-02 1.7730E-02

4.4160E-03 8.9160E-02 3.2390E-02 9.0840E-03 1.6320E-03 2.7090E-01 7.9390E-02

1.6230E-02 1.8670E-03 1.9430E-01 5.0400E-02 2.1000E-02 8.9730E-03 2.0020E-01

7.0970E-02 2.1530E-02 5.2330E-03 1.0630E-01 3.8020E-02 1.1200E-02 2.7570E-03

1.9630E-01 6.9550E-02 2.2730E-02 6.8040E-03 6.7940E-02 2.7360E-02 8.4560E-03

1.7470E-03 4.2510E-02 1.8710E-02 5.7990E-03 1.1360E-03 6.3080E-02 2.7110E-02

2.3060E-03 7.1280E-02 3.3200E-02 1.5480E-02 5.3330E-03 4.9490E-02 2.1410E-02

8.5960E-03 2.8100E-03 3.8980E-02 2.2060E-02 1.0070E-02 2.9720E-03 2.4040E-02

1.0080E-02 3.4870E-03 1.2010E-03 1.9220E-02 1.0830E-02 5.3220E-03 1.6150E-03

1.4300E-02 6.9480E-03 3.3790E-03 1.4100E-03 1.6160E-02 6.6740E-03 2.1950E-03

4.7330E-04 1.6250E+00 3.9260E-01 1.9500E+00 2.7310E+00 2.3660E+00 6.8080E-01

1.1290E+00 5.2440E-01 5.7550E-01 1.2170E-01 1.1100E-01 8.2240E-02 6.3900E-02

5.5410E-02 4.5470E-02 1.8360E-02 4.8220E-02 6.1230E-02 4.1240E-02 2.5590E-02

5.4570E-02 7.9940E-02 5.6130E-02 3.4610E-02 2.9090E-02 3.2480E-02 3.0340E-02

2.0410E-02 1.2130E-02 4.4460E-02 3.1480E-02 1.1140E-02 7.9240E-02 1.1600E-01

6.3190E-02 1.7790E-02 5.0350E-02 1.1000E-01 3.4930E-02 1.0730E-02 5.2490E-02

9.1560E-02 5.6430E-02 2.3100E-02 2.1630E-02 5.1240E-02 3.3870E-02 1.2650E-02

5.1460E-02 9.2830E-02 5.4700E-02 2.2640E-02 1.7390E-02 2.9010E-02 2.2930E-02

9.9290E-03 1.1000E-02 1.6700E-02 1.6450E-02 6.9770E-03 3.5550E-02 1.5690E-02

1.8150E-02 3.3200E-02 3.2940E-02 1.7520E-02 1.0310E-02 1.7210E-02 2.1970E-02

1.4310E-02 8.2410E-03 2.2060E-02 1.5190E-02 1.0660E-02 7.6440E-03 6.6260E-03

1.0400E-02 8.5210E-03 3.5530E-03 1.4410E-02 6.6270E-03 3.9630E-03 2.7360E-03

6.9480E-03 6.6880E-03 4.1040E-03 1.7910E-03 5.2800E-03 6.5740E-03 4.8370E-03

2.4330E-03 1.0300E+00 2.0020E-01 1.8810E+00 1.2710E+00 1.8020E+00 4.2060E-01

6.3620E-01 4.2510E-01 4.0110E-02 8.8520E-02 7.2740E-02 5.7640E-02 2.8730E-02

3.1250E-02 1.9150E-02 3.2140E-02 2.6660E-02 3.5580E-02 2.3130E-02 1.3900E-02

3.4740E-02 5.5450E-02 4.6060E-02 5.6450E-03 2.0140E-02 2.2500E-02 2.6580E-02

3.9580E-04 1.1830E-02 2.7370E-02 2.6540E-02 1.6190E-02 6.3140E-02 6.4360E-02

4.0500E-02 2.0980E-02 3.4910E-02 6.2480E-02 1.8960E-02 1.1310E-02 3.9900E-02

5.5470E-02 4.2440E-02 3.1610E-03 1.8570E-02 3.0690E-02 2.7210E-02 1.2900E-02

3.8040E-02 5.6390E-02 4.0440E-02 2.3310E-03 1.4630E-02 1.7220E-02 1.8730E-02

6.1200E-04 1.0470E-02 9.0960E-03 1.3870E-02 1.3870E-02 1.9540E-02 1.2850E-02

1.5470E-02 1.7520E-02 2.1550E-02 8.0960E-03 5.5270E-03 1.0780E-02 1.4550E-02

1.0310E-02 1.0070E-02 1.0650E-02 1.1570E-02 4.7370E-03 1.2530E-03 5.6450E-03

5.7960E-03 6.7100E-03 9.6130E-03 3.4090E-03 3.4220E-03 2.0550E-03 3.3800E-03

4.1030E-03 3.5720E-03 1.9660E-03 1.1970E-03 3.7420E-03 4.1520E-03 3.6580E-03

4.7340E-02 1.6450E-01 1.2840E+00 1.0810E+00 8.6160E-02 4.7130E-01 1.8330E-01

1.0640E-02 3.2500E-02 3.9560E-02 3.8580E-02 1.2040E-02 1.4700E-02 1.2350E-02

1.6070E-02 8.7560E-03 2.1080E-02 1.2850E-02 1.3180E-03 1.4000E-02 2.3820E-02

3.5940E-02 6.3490E-05 6.2030E-03 1.4510E-02 1.6660E-02 6.5100E-05 3.4720E-04

8.3780E-03 2.4270E-02 1.8670E-03 1.7770E-02 4.0480E-02 3.1970E-02 8.9730E-03

1.0720E-02 1.8950E-02 3.0020E-02 1.9070E-03 1.0530E-02 2.6360E-02 3.5780E-02

6.3740E-04 2.6960E-03 1.2720E-02 2.3760E-02 3.0040E-03 1.0680E-02 2.4530E-02

3.5680E-02 1.9740E-04 2.3830E-03 1.0180E-02 1.3710E-02 8.2440E-05 5.6880E-04

7.3650E-03 8.9920E-03 3.1360E-03 1.4750E-02 5.2410E-03 5.3330E-03 1.0310E-02

8.0960E-03 7.5810E-03 1.2390E-03 4.6500E-03 6.6560E-03 8.0400E-03 2.9720E-03

7.6440E-03 4.7370E-03 3.1670E-03 4.1930E-04 7.9600E-04 3.7530E-03 4.7070E-03

4.8050E-03 1.3420E-03 2.1030E-03 9.9820E-04 1.4100E-03 1.7910E-03 1.9660E-03

1.3430E-03 1.3280E-04 1.2240E-03 2.4770E-03 2.5420E-03 2.8900E+00 4.4880E-01

5.9610E-02 7.6000E+00 4.3550E-01 2.2040E-01 2.4010E-01 1.0750E-01 4.4340E-02

1.6640E-02 4.0310E-02 1.7640E-02 4.2720E-03 5.7540E-03 5.1920E-02 1.0740E-02

4.0440E-03 1.2000E-01 4.2670E-02 1.3300E-02 2.6130E-03 7.0710E-02 2.8450E-02

1.1060E-02 2.4700E-03 8.7240E-02 3.7270E-02 1.2660E-02 2.1230E-03 1.4650E-01

4.9040E-02 7.6770E-03 1.0930E-03 1.5240E-01 5.1790E-02 1.2030E-02 1.9440E-03

4.4620E-02 1.8280E-02 7.2080E-03 2.2270E-03 8.2660E-02 3.1710E-02 9.1900E-03

1.8370E-03 2.2420E-01 6.1330E-02 1.5740E-02 2.1340E-03 1.0340E-01 3.1870E-02

8.5320E-03 1.6790E-03 1.7810E-01 6.4030E-02 1.8400E-02 3.5580E-03 9.4720E-02

2.6730E-02 1.5340E-02 4.7960E-02 2.3830E-02 8.9450E-03 1.8710E-03 6.4290E-02

2.2600E-02 7.1510E-03 1.7590E-03 1.6940E-02 7.0510E-03 2.2780E-03 4.4250E-04

2.2060E-02 1.0600E-02 4.0380E-03 1.1540E-03 3.3320E-02 1.9970E-02 7.2470E-03

3.0260E-03 2.2130E-02 1.0990E-02 3.9950E-03 6.5470E-04 2.4400E-02 1.3080E-02

6.5900E-03 2.4360E-03 2.8490E+00 5.0790E-01 2.7410E+00 3.6880E+00 1.7290E-01

9.7330E-02 1.3090E-01 7.8550E-02 3.8160E-02 2.5710E-02 1.4780E-02 9.4840E-03

4.6040E-03 2.4340E-02 2.4010E-02 4.9980E-03 3.5950E-02 5.8560E-02 3.3670E-02

1.4720E-02 2.1910E-02 3.6040E-02 2.0180E-02 1.2180E-02 2.6930E-02 4.0040E-02

2.9910E-02 1.4570E-02 6.1550E-02 5.2870E-02 4.1580E-02 7.4640E-03 6.4730E-02

6.0860E-02 3.7590E-02 1.1340E-02 1.8260E-02 2.0940E-02 1.1940E-02 6.7310E-03

2.7180E-02 3.6680E-02 2.6330E-02 1.0130E-02 6.1330E-02 1.1520E-01 4.8430E-02

1.7750E-02 2.5810E-02 5.3420E-02 2.7760E-02 9.4340E-03 4.6650E-02 8.9330E-02

5.6400E-02 2.0720E-02 4.9550E-02 5.0300E-02 9.6070E-03 2.7260E-02 1.8570E-02

1.2500E-02 7.7460E-03 2.2610E-02 3.0110E-02 1.6750E-02 7.1840E-03 8.3830E-03

6.7370E-03 4.2180E-03 2.0250E-03 9.4840E-03 8.9920E-03 7.6120E-03 4.1370E-03

2.6660E-02 1.1610E-02 9.3670E-03 3.2170E-03 1.2590E-02 8.3150E-03 5.5760E-03

3.7470E-03 1.3090E-02 1.1360E-02 7.0530E-03 5.7060E-03 2.2090E+00 8.9170E-01

2.6320E+00 1.4270E+00 4.2790E-02 6.7150E-02 9.6300E-02 5.9810E-02 1.4360E-02

1.4050E-02 8.9790E-03 3.4530E-03 1.1500E-02 1.8290E-02 1.0230E-02 9.3910E-03

2.7540E-02 4.1300E-02 2.8930E-02 6.9710E-03 1.4150E-02 2.7870E-02 1.8790E-02

5.7380E-03 2.1090E-02 2.9100E-02 2.7660E-02 1.7280E-02 5.0230E-02 2.7000E-02

2.8100E-02 2.1760E-02 4.7470E-02 3.7010E-02 2.4630E-02 7.2060E-03 1.1940E-02

1.4940E-02 9.3170E-03 6.2120E-03 2.2540E-02 2.4220E-02 2.2260E-02 1.5740E-02

4.8430E-02 7.8920E-02 3.8950E-02 5.6400E-03 2.1920E-02 3.6610E-02 2.3180E-02

9.0900E-03 4.0180E-02 6.2190E-02 4.8760E-02 2.9130E-02 3.5270E-02 1.7720E-02

1.2920E-02 1.4760E-02 1.4490E-02 7.3570E-03 7.1520E-03 1.6750E-02 2.0360E-02

1.3220E-02 3.5130E-03 5.1840E-03 4.7130E-03 2.6110E-03 3.0500E-03 6.7860E-03

6.2850E-03 6.5490E-03 2.0000E-02 6.8430E-03 7.2830E-03 4.0190E-03 5.8500E-03

6.5860E-03 6.8800E-03 3.3480E-03 6.5890E-03 7.0520E-03 8.9260E-03 5.3470E-03

3.1860E-01 9.4980E-01 2.0320E+00 1.6460E-02 3.7920E-02 5.4230E-02 5.2070E-02

6.8790E-03 1.1720E-02 6.2770E-03 2.3020E-03 5.6160E-03 9.2090E-03 1.1850E-02

1.3260E-03 1.0150E-02 2.2870E-02 3.7090E-02 7.7930E-04 7.5630E-03 1.2770E-02

2.4080E-02 9.4310E-05 6.6120E-03 1.8350E-02 3.0670E-02 3.4660E-03 1.9510E-02

3.8190E-02 2.0570E-02 5.4280E-03 2.3150E-02 3.5530E-02 2.3150E-02 2.2270E-03

6.7300E-03 9.3160E-03 1.0660E-02 9.6760E-04 6.6230E-03 1.8310E-02 2.4290E-02

2.1340E-03 1.7760E-02 3.8950E-02 6.2530E-02 8.8590E-04 6.0080E-03 1.7690E-02

3.3650E-02 1.0970E-03 9.7860E-03 3.2930E-02 6.2940E-02 1.8130E-02 1.5420E-02

2.1140E-02 4.3610E-03 1.2210E-02 1.0300E-02 6.1290E-03 1.7600E-03 7.1840E-03

1.3230E-02 1.6160E-02 1.0810E-03 3.4590E-03 3.7430E-03 2.3890E-03 7.2240E-04

3.0060E-03 5.5820E-03 5.7820E-03 1.3330E-02 3.9190E-03 4.3260E-03 3.8500E-03

1.7460E-03 5.8340E-03 4.7020E-03 2.8270E-03 2.4360E-03 5.7060E-03 5.3470E-03

5.1210E-03 3.5270E-01 8.0320E-02 8.2730E-02 4.6200E-02 2.4630E-02 1.2230E-02

1.0820E-01 6.3000E-02 1.7450E-02 2.7240E-02 6.4630E-02 2.2480E-02 9.8790E-03

3.1130E-02 2.2710E-02 1.3420E-02 6.0650E-03 1.1510E-02 6.6760E-03 3.4600E-03

1.3740E-03 2.0060E-03 1.6530E-03 1.1370E-03 6.2530E-04 5.1600E-02 2.6170E-02

1.0750E-02 3.2250E-03 6.6150E-02 4.2090E-02 1.7650E-02 4.3300E-03 2.1510E-02

1.7200E-02 1.2520E-02 8.0260E-03 3.5290E-02 2.4120E-02 1.3480E-02 5.6270E-03

1.1020E-01 4.4900E-02 1.7310E-02 7.0080E-03 3.3400E-02 2.3220E-02 1.4750E-02

8.4530E-03 9.2770E-03 4.3970E-03 1.8000E-03 5.6190E-04 1.3360E-01 3.0850E-02

8.9760E-03 9.5850E-02 3.7910E-02 1.3760E-02 4.3950E-03 1.0160E-01 4.9960E-02

2.5280E-02 1.3200E-02 3.0870E-02 1.7650E-02 6.8980E-03 1.5250E-03 8.9180E-03

7.0450E-03 4.6170E-03 2.5100E-03 4.1430E-02 2.4800E-02 1.4050E-02 8.0300E-03

1.3120E-02 1.0660E-02 7.1170E-03 3.4830E-03 1.5130E-02 9.6560E-03 5.6740E-03

2.9870E-03 2.3140E-01 2.7400E-02 3.4690E-02 2.9110E-02 1.9320E-02 6.1690E-02

2.6210E-02 3.7630E-02 1.8160E-02 2.2480E-02 3.3070E-02 9.1030E-03 1.6050E-02

8.5560E-03 1.0710E-02 1.3570E-02 2.7240E-03 4.2740E-03 4.4040E-03 3.8480E-03

1.1820E-03 5.9750E-04 7.3430E-04 1.0990E-03 1.8490E-02 1.7750E-02 1.5610E-02

9.3250E-03 3.4490E-02 1.3350E-02 2.1120E-02 1.7840E-02 1.4330E-02 1.0610E-02

8.4220E-03 6.1690E-03 1.5830E-02 9.9640E-03 1.2120E-02 1.4440E-02 1.3150E-02

5.1580E-02 3.8350E-02 1.6660E-02 1.5560E-02 1.3090E-02 1.2720E-02 1.1850E-02

8.6000E-04 3.8390E-03 3.6730E-03 2.3150E-03 3.0850E-02 6.6900E-02 1.7920E-02

2.0680E-02 4.1670E-02 2.7640E-02 1.1230E-02 2.4140E-02 4.8000E-02 3.6300E-02

1.8450E-02 1.3620E-02 7.2750E-03 9.5990E-03 7.4200E-03 5.3820E-03 2.8370E-03

3.2330E-03 3.9410E-03 2.7610E-02 1.4050E-02 1.3700E-02 3.5010E-03 9.7940E-03

6.0840E-03 4.4810E-03 2.5730E-03 6.6830E-03 6.1120E-03 5.3940E-03 4.1130E-03

8.1870E-03 1.3840E-02 1.7310E-02 1.5810E-02 1.7420E-02 3.7350E-02 8.3520E-03

9.0820E-03 9.8760E-03 9.1030E-03 1.3350E-02 1.6990E-03 9.4700E-03 8.4620E-03

4.8120E-03 2.2830E-04 1.5990E-03 2.6450E-03 3.0740E-03 1.4800E-04 6.6790E-04

6.3070E-04 3.6010E-04 3.3110E-03 1.1130E-02 1.0340E-02 5.8020E-03 3.4700E-03

2.2690E-02 1.3360E-02 3.8690E-03 6.4950E-03 6.0690E-03 4.4580E-03 2.7160E-03

1.2220E-03 9.5420E-03 9.2980E-03 6.1130E-03 4.6560E-03 6.2830E-03 2.1330E-02

2.7550E-02 4.2570E-03 8.0320E-03 8.0130E-03 6.3040E-03 5.6690E-05 5.1060E-04

1.8200E-03 2.9500E-03 8.9750E-03 1.7920E-02 3.0920E-02 4.9720E-03 1.1560E-02

1.9350E-02 1.4720E-02 9.9310E-03 1.0770E-02 2.0010E-02 2.2700E-02 1.0750E-03

9.1700E-03 6.2690E-03 2.4180E-03 1.0910E-03 2.9450E-03 2.4120E-03 1.2460E-03

1.3800E-02 8.0300E-03 3.5010E-03 4.0980E-03 4.5920E-03 3.8870E-03 2.1610E-03

8.2330E-04 2.0750E-03 3.3490E-03 3.2690E-03 2.4590E-03 5.6430E+00 3.4600E-01

1.0930E-01 8.8050E-01 1.2660E-01 3.1460E-02 4.1190E-02 7.6090E-02 2.5180E-02

5.7930E-03 1.0370E+00 1.2840E-01 1.9140E-02 2.8630E-03 1.8780E-01 6.6780E-02

1.8370E-02 2.5750E-03 1.9770E-01 7.2930E-02 1.6180E-02 1.7640E-03 1.4190E-01

3.4900E-02 1.3110E-02 3.9040E-03 2.5820E-01 3.7040E-02 1.1820E-02 2.7590E-03

4.0380E-01 8.4160E-02 1.9490E-02 4.0370E-03 2.8170E-01 6.2970E-02 1.5030E-02

2.5000E-03 8.2240E-01 1.1190E-01 1.2880E-02 2.1290E-03 1.1390E+00 1.6750E-01

3.1750E-02 5.5700E-03 1.8570E-01 7.2300E-02 2.2020E-02 3.8030E-03 3.1890E-02

1.0790E-02 1.6290E-03 4.5130E-02 1.4190E-02 4.1700E-03 1.3280E-03 1.2220E-01

4.2270E-02 1.7570E-02 5.3150E-03 1.2550E+01 5.3660E-01 1.0370E-01 3.9960E-02

2.8600E+01 3.5340E+00 3.7400E-01 5.4530E-02 2.0440E-01 5.8160E-02 2.7450E-02

3.2820E-03 5.2060E+00 1.9810E-01 8.2100E-03 2.9280E-03 1.6630E+01 2.0690E+00

1.1190E-01 6.7570E-03 6.7010E+00 3.2060E-01 3.7320E-01 3.9120E-01 6.7450E-02

3.2950E-02 4.2500E-02 2.9490E-02 1.3690E-02 5.7520E-02 7.4330E-01 1.3940E-01

2.2000E-02 4.8800E-02 8.3880E-02 5.8740E-02 2.1450E-02 4.9270E-02 8.9730E-02

7.5150E-02 1.9160E-02 4.7110E-02 7.6850E-02 2.1260E-02 9.5060E-03 6.1780E-02

1.5270E-01 2.3860E-02 9.8440E-03 8.3410E-02 2.3280E-01 7.3050E-02 2.0510E-02

4.1630E-02 1.9960E-01 6.2990E-02 1.7070E-02 1.1060E-01 5.1570E-01 1.2130E-01

1.4160E-02 8.5480E-02 8.3110E-01 1.7480E-01 3.5760E-02 5.5010E-02 8.6340E-02

6.0570E-02 2.5140E-02 1.7980E-02 1.1150E-02 6.3260E-03 1.8120E-02 2.0470E-02

1.0420E-02 2.8690E-03 4.2200E-02 6.5020E-02 2.6170E-02 1.6510E-02 1.9440E+00

8.1090E+00 4.7980E-01 6.1460E-02 1.5660E+00 2.0020E+01 4.1120E+00 4.3100E-01

1.6350E-01 3.8370E-02 1.6190E-02 1.6540E-02 7.7670E-01 3.3390E+00 2.1180E-01

5.1690E-03 2.0660E+00 1.0430E+01 2.4270E+00 1.3580E-01 5.0210E+00 1.4610E-01

3.0290E-01 1.7460E-01 2.4710E-02 2.1620E-02 2.6270E-02 1.6370E-02 1.0730E-02

5.2140E-02 5.4900E-01 1.1060E-01 8.5830E-03 4.2260E-02 5.7390E-02 5.1240E-02

1.5580E-03 5.3120E-02 5.6250E-02 6.3490E-02 1.9170E-02 3.4270E-02 5.0300E-02

1.2460E-02 1.8740E-02 5.2570E-02 1.0010E-01 1.4870E-02 1.9500E-02 7.2620E-02

1.5870E-01 5.7030E-02 9.6530E-03 3.5720E-02 1.6370E-01 5.2520E-02 1.2500E-02

1.2060E-01 3.4790E-01 9.2720E-02 1.9930E-02 7.2380E-02 6.4020E-01 1.4130E-01

1.1300E-02 4.5460E-02 6.0020E-02 5.3500E-02 8.7340E-03 1.0770E-02 7.0890E-03

6.7690E-03 1.3850E-02 1.1860E-02 6.4720E-03 1.7560E-02 2.6170E-02 4.8210E-02

2.0580E-02 2.7010E-01 2.1900E+00 5.1670E+00 3.1330E-01 1.3960E-01 1.7000E+00

1.4530E+01 3.2010E+00 1.2260E-01 2.0070E-02 1.9300E-02 1.3960E-02 7.5860E-02

9.1580E-01 2.1110E+00 1.4660E-01 1.1160E-01 2.4270E+00 6.9200E+00 1.8380E+00

5.4770E-02 1.4950E-01 2.1100E-01 1.6480E-02 9.7080E-03 1.9020E-02 1.4120E-02

1.3380E-03 1.1840E-02 4.1820E-02 4.2660E-01 1.8050E-04 9.9370E-03 3.4990E-02

6.4980E-02 9.4290E-05 1.7600E-03 4.1190E-02 7.2070E-02 7.6400E-03 1.6660E-02

2.4420E-02 2.8790E-02 5.9930E-03 1.8660E-02 3.9340E-02 6.0450E-02 4.0370E-03

2.0510E-02 5.6880E-02 1.2410E-01 1.1490E-03 1.0770E-02 2.9310E-02 1.3990E-01

2.1060E-03 1.4140E-02 9.2430E-02 2.7390E-01 2.7840E-03 2.1710E-02 5.9060E-02

5.0500E-01 8.7410E-04 1.2650E-02 3.8000E-02 6.2030E-02 3.4360E-03 8.6530E-03

5.6340E-03 2.5730E-03 5.9800E-03 9.8930E-03 7.4760E-03 5.3140E-03 1.6510E-02

2.0580E-02 3.2640E-02 7.4730E-02 2.7970E-01 1.6560E+00 3.2830E+00 3.1260E-02

1.3930E-01 1.2960E+00 1.1580E+01 8.1740E-02 7.8330E-03 2.0030E-02 7.6980E-03

7.2310E-03 9.6430E-02 7.0130E-01 1.3620E+00 6.7270E-03 1.3570E-01 1.8370E+00

5.5500E+00 1.9800E+00 1.2720E-01 3.9260E-01 3.1270E-01 1.5030E-01 1.7410E-02

6.6230E-02 3.2560E-02 1.4660E-02 5.9410E-03 1.6590E-02 9.2550E-03 4.5850E-03

1.8250E-03 1.7490E-02 9.0690E-03 4.0890E-03 1.3810E-03 8.0860E-02 7.6510E-02

6.3870E-02 3.6860E-02 1.9150E-01 6.4660E-02 2.2650E-02 8.6950E-03 7.7730E-02

4.1360E-02 1.9850E-02 8.2750E-03 5.3590E-02 2.6840E-02 1.2650E-02 5.5680E-03

7.0190E-02 3.6280E-02 1.6320E-02 5.9430E-03 1.0530E-01 5.1430E-02 2.2230E-02

7.9010E-03 4.5300E-02 2.6240E-02 1.3660E-02 5.9240E-03 8.0310E-01 3.5140E-01

1.0020E-02 5.3320E-01 1.4560E-01 3.0470E-02 6.2460E-03 8.0430E-02 5.8710E-02

3.3960E-02 1.5410E-02 1.0050E+01 2.5860E+00 5.1170E-01 1.2070E-01 6.8650E-01

3.4190E-01 1.6780E-01 8.5320E-02 5.1070E+00 8.0720E+00 3.4520E+00 1.0580E-01

8.8790E+00 2.1740E+00 3.1660E-01 1.9280E-02 6.2800E-02 2.6250E-02 1.0010E-02

3.6030E-03 1.6820E+00 2.6150E-01 1.4970E-01 5.5950E-02 1.1580E-01 1.1240E-02

2.7550E-02 2.4820E-02 1.5990E-02 3.6320E-03 6.2060E-03 6.3540E-03 5.3120E-03

2.1570E-03 6.8890E-03 7.0910E-03 5.2170E-03 7.3960E-02 6.1110E-02 2.9060E-02

8.1250E-03 2.7060E-02 9.6570E-02 5.4100E-02 1.4560E-02 2.2890E-02 2.9920E-02

2.6570E-02 1.8760E-02 9.7140E-03 2.2840E-02 2.0310E-02 1.2880E-02 1.9200E-02

2.5840E-02 2.3640E-02 1.7130E-02 1.7380E-02 4.2130E-02 3.8880E-02 2.6150E-02

1.1370E-02 1.6930E-02 1.7380E-02 1.5080E-02 3.5100E-01 1.1180E-01 3.1350E-01

3.2100E-02 2.6570E-01 1.4590E-01 3.4100E-02 4.5800E-02 2.3010E-02 2.7370E-02

2.9540E-02 4.0610E-01 5.1800E+00 2.7180E+00 5.2750E-01 1.2270E-01 3.1170E-01

2.6640E-01 1.5350E-01 3.4050E+00 3.4520E+00 1.2300E+00 3.0710E+00 2.2240E-01

4.5010E+00 2.3900E+00 4.7620E-01 8.5630E-03 2.7760E-02 2.1530E-02 1.0600E-02

1.3060E-01 1.7400E-02 1.1560E-01 2.5540E-02 2.1230E-03 6.2220E-03 1.3580E-02

1.7870E-02 2.7200E-04 2.1330E-03 3.7240E-03 4.5940E-03 5.2080E-05 1.2660E-03

3.6050E-03 5.7210E-03 5.1600E-02 1.7390E-02 1.0460E-02 6.6660E-03 1.1210E-02

1.1790E-02 3.8730E-02 3.4510E-02 4.5310E-03 1.2850E-02 1.6660E-02 1.5040E-02

2.3400E-03 5.1530E-03 1.0930E-02 1.4380E-02 2.5480E-03 1.1430E-02 1.5200E-02

1.3710E-02 1.8990E-03 1.0230E-02 2.1920E-02 2.8230E-02 1.3170E-03 6.5400E-03

1.0380E-02 1.2140E-02 1.0020E-02 3.1330E-01 6.4790E-02 6.7850E-03 1.8610E-02

1.1050E-01 1.0300E-01 8.4180E-03 2.6040E-02 1.9470E-02 8.8960E-03 1.5240E-01

1.8820E-01 2.0710E+00 2.0010E+00 4.5080E-02 5.8350E-02 1.3540E-01 1.8830E-01

1.7020E+00 1.0580E-01 3.0710E+00 7.0000E-01 8.6060E-03 1.5610E-01 1.8490E+00

1.7830E+00 1.9760E-03 4.6540E-03 1.2460E-02 1.5140E-02 2.6840E+00 1.7890E+00

8.9480E-01 5.8790E-02 4.8990E-02 3.9190E-02 2.9390E-02 2.8450E-04 2.4390E-04

2.0320E-04 1.6250E-04 8.0920E-04 7.0800E-04 6.0690E-04 5.0570E-04 3.6790E+00

2.7660E+00 1.8470E+00 9.2450E-01 1.0680E-01 8.0120E-02 5.3450E-02 2.6740E-02

4.5680E-03 3.6550E-03 2.7410E-03 1.8280E-03 2.0610E-02 1.7170E-02 1.3740E-02

1.0310E-02 2.0770E-02 1.6620E-02 1.2460E-02 8.3080E-03 1.4860E-02 1.2370E-02

9.8980E-03 7.4260E-03 2.3400E-04 2.0050E-04 1.6710E-04 1.3370E-04 3.0370E-02

2.0240E-02 1.0120E-02 2.8060E-02 2.1070E-02 1.4060E-02 7.0330E-03 1.9090E-02

1.5280E-02 1.1460E-02 7.6390E-03 5.9400E-02 4.4560E-02 2.9700E-02 1.4860E-02

1.0520E-02 8.7650E-03 7.0150E-03 5.2620E-03 3.3800E-02 1.5150E-02 1.0090E-02

5.0460E-03 4.3660E-02 3.2750E-02 2.1840E-02 1.0920E-02 3.2290E-03 2.5830E-03

1.9370E-03 1.2910E-03 2.8320E+00 1.3030E+00 2.6770E-02 1.8700E-02 1.0600E-02

4.7950E-03 4.6090E-02 2.1290E-02 8.0120E-03 2.2130E-03 9.4330E-04 7.7330E-04

5.2110E-04 2.7770E-04 6.6030E+00 4.2540E+00 1.7010E+00 3.4870E-01 8.0800E-02

4.6370E-02 2.0860E-02 6.7570E-03 1.0260E-01 8.1930E-02 6.8680E-02 5.1830E-02

5.7460E-02 4.3580E-02 2.8860E-02 1.6660E-02 3.6940E-02 2.2730E-02 1.2890E-02

6.5500E-03 2.5310E-02 1.1680E-02 4.6770E-03 1.4770E-03 1.4450E-02 6.6790E-03

2.6640E-03 8.1770E-04 3.1230E-02 3.1530E-02 1.9910E-02 5.8380E-02 3.4230E-02

1.7000E-02 6.4970E-03 5.9330E-02 3.1880E-02 1.5440E-02 6.5150E-03 7.7230E-02

4.8920E-02 2.2980E-02 7.5360E-03 6.9410E-03 4.9200E-03 2.8280E-03 1.2730E-03

1.9110E-02 3.3570E-02 3.3310E-02 2.1330E-02 5.7950E-02 4.2770E-02 1.9770E-02

5.5700E-03 3.7000E-02 1.5240E-02 5.7250E-03 2.0570E-03 1.0780E+00 1.1920E-02

6.8510E-03 9.0640E-03 1.0710E-02 2.6640E-03 1.9210E-02 1.8280E-02 1.0800E-02

5.4550E-04 2.6870E-04 3.3950E-04 5.2130E-04 3.5000E+00 1.0810E+00 2.1180E+00

1.9070E+00 3.5700E-02 2.5500E-02 2.5160E-02 1.6770E-02 6.8220E-02 7.1980E-02

4.4700E-02 1.8450E-02 3.2050E-02 2.1060E-02 2.1630E-02 2.2980E-02 1.5160E-02

1.4720E-02 1.3050E-02 9.8210E-03 3.1890E-03 1.0370E-02 9.3850E-03 5.8200E-03

1.1650E-03 5.9910E-03 5.6950E-03 3.4800E-03 3.1470E-02 1.7970E-02 5.6130E-03

2.6690E-02 2.1430E-02 1.8270E-02 1.1000E-02 1.7790E-02 2.2990E-02 2.0450E-02

1.4420E-02 4.0050E-02 2.1580E-02 2.4600E-02 1.8210E-02 3.1700E-03 2.1160E-03

2.4390E-03 2.8270E-03 1.2740E-02 3.3310E-02 1.9950E-02 5.5610E-03 3.7760E-02

8.9760E-03 1.9220E-02 1.8070E-02 4.7230E-03 1.6510E-02 1.2690E-02 6.0650E-03

1.2330E-03 6.9430E-03 7.0940E-03 3.9330E-03 1.4070E-04 1.5870E-03 8.8910E-03

1.4910E-02 5.6570E-05 3.1160E-04 2.9870E-04 1.6290E-04 2.0560E-01 2.4120E+00

1.3540E+00 3.3260E-01 7.2260E-03 2.0960E-02 1.5960E-02 7.4330E-03 4.7070E-02

2.0370E-02 1.7340E-02 1.6890E-02 8.2050E-03 1.6790E-02 1.4650E-02 9.2150E-03

4.4130E-03 7.7510E-03 7.9790E-03 6.2380E-03 2.6590E-04 1.9130E-03 5.1180E-03

7.0890E-03 8.0400E-05 6.9020E-04 2.7740E-03 4.6200E-03 1.9840E-02 5.6110E-03

2.0430E-03 7.7140E-03 1.4030E-02 1.1210E-02 5.7370E-03 3.6290E-03 9.9270E-03

1.2770E-02 1.1520E-02 8.0510E-03 2.3510E-02 1.5080E-02 5.5820E-03 3.9190E-04

1.8460E-03 1.8220E-03 1.2110E-03 6.3690E-03 2.1330E-02 5.5600E-03 2.5140E-03

5.1370E-03 2.3890E-02 1.1430E-02 1.5610E-03 1.1510E-03 2.5330E-03 7.3000E-03

9.0230E-03 1.7270E+00 6.2280E-02 8.0050E-03 2.8770E+00 1.1710E+00 1.2480E-01

6.7450E-03 5.0040E+00 1.2650E+00 1.7790E-01 8.9540E-03 5.6210E-02 1.2260E-02

3.1570E-03 7.4620E-04 2.5340E+00 2.8520E-01 5.2220E-03 8.0090E-04 2.3370E+00

4.8480E-01 4.6880E-02 1.9580E-03 9.4680E-01 4.5080E-01 4.8490E-02 2.0360E-03

4.4060E-01 1.2800E-01 3.4370E-02 6.9490E-03 6.8460E-01 1.8710E-01 4.6730E-02

7.9020E-03 3.3310E-01 2.0970E-01 2.2380E-02 1.6200E-03 3.9230E-02 6.7490E-03

1.8050E-04 1.9440E-01 2.2960E-02 1.7060E-03 9.3580E-05 2.0350E-01 3.9800E-02

3.4940E-03 3.8720E-04 2.0060E-01 2.9490E-02 8.9800E-03 9.6020E-04 1.0210E-01

3.5290E-02 7.8970E-03 1.3880E-03 3.2870E-02 9.7830E-03 6.0400E-03 4.4080E-04

6.9420E-02 8.0910E-03 1.8550E-03 1.5040E-04 1.1350E-01 3.2230E-02 8.2210E-03

1.5290E-03 3.0930E+00 7.1940E-02 9.2480E-01 3.5640E+00 1.3490E+00 1.4800E-01

1.0300E+00 4.9610E+00 2.2510E+00 2.1200E-01 2.0740E-02 2.8280E-02 8.7570E-03

2.5290E-03 7.0100E-01 1.3500E+00 2.9700E-01 4.8190E-03 6.2450E-01 1.2100E+00

5.0370E-01 5.5350E-02 4.5070E-01 1.0070E+00 4.9430E-01 5.7890E-02 1.5230E-01

2.2060E-01 1.0010E-01 3.4890E-02 1.8680E-01 3.7240E-01 1.6300E-01 5.1040E-02

1.8190E-01 3.3190E-01 2.4150E-01 2.6200E-02 1.9350E-02 1.4900E-02 4.2170E-03

5.4740E-02 1.0460E-01 2.1500E-02 1.8170E-03 5.2060E-02 1.0770E-01 4.2510E-02

3.8840E-03 6.1580E-02 1.1310E-01 1.6530E-02 8.8890E-03 3.5290E-02 9.4620E-02

3.2390E-02 8.5790E-03 2.7390E-02 7.8280E-03 2.0750E-03 3.6500E-03 1.9460E-02

3.9420E-02 5.4390E-03 1.9050E-03 3.8670E-02 5.6650E-02 2.5740E-02 8.5160E-03

1.9290E+00 5.2540E-02 1.0770E+00 2.5830E+00 1.0770E+00 1.0100E-02 1.2710E+00

5.8820E+00 1.7790E+00 7.4100E-03 1.6970E-02 1.8090E-02 5.7820E-03 1.3890E-01

7.2860E-01 8.0700E-01 2.0790E-01 1.0420E-01 6.4210E-01 7.7720E-01 3.9200E-01

4.8470E-02 4.9430E-01 6.7140E-01 3.9410E-01 4.8070E-02 1.2320E-01 1.5380E-01

8.1410E-02 4.6590E-02 1.6290E-01 2.7010E-01 1.3940E-01 8.3850E-03 2.1600E-01

2.0850E-01 1.9230E-01 8.1540E-03 1.4240E-02 8.3820E-03 1.2090E-02 5.4680E-02

6.4330E-02 1.5040E-02 8.2260E-03 5.4860E-02 6.9070E-02 3.2730E-02 2.0350E-02

5.1110E-02 7.7420E-02 1.1190E-02 7.8970E-03 3.2390E-02 6.9250E-02 2.7150E-02

2.1910E-02 4.7350E-03 3.2090E-03 2.8980E-03 5.3580E-03 1.7820E-02 2.6050E-02

3.7550E-03 1.1740E-02 3.1750E-02 3.9220E-02 2.0950E-02 1.8000E-03 6.1440E-02

8.4160E-01 2.6870E+00 4.8290E-04 1.1730E-02 9.7290E-01 5.7350E+00 2.4850E-03

7.6240E-03 1.3420E-02 1.2640E-02 1.5790E-02 1.7770E-01 5.8510E-01 6.3340E-01

8.9730E-03 1.2590E-01 5.1940E-01 7.8270E-01 2.0310E-03 5.7880E-02 3.9410E-01

7.5220E-01 1.1780E-02 5.1060E-02 1.0400E-01 1.3800E-01 7.8840E-03 5.1020E-02

1.3940E-01 2.6600E-01 7.6260E-04 9.4520E-03 1.6710E-01 2.9130E-01 2.5010E-03

1.0280E-02 1.0310E-02 1.7360E-03 1.5040E-02 4.4000E-02 4.8820E-02 9.3460E-04

9.7570E-03 4.3960E-02 6.9030E-02 5.5190E-03 2.2410E-02 4.1130E-02 5.1000E-02

1.3880E-03 8.5780E-03 2.7150E-02 6.5390E-02 1.6430E-02 2.0580E-03 4.9290E-03

1.1370E-03 1.1850E-03 6.2000E-03 1.4330E-02 1.8030E-02 2.6850E-03 1.2640E-02

2.6770E-02 3.5650E-02 2.6210E+00 2.3290E-01 6.6770E-03 5.2900E+00 1.0060E+00

1.6170E-01 7.8150E-03 3.5410E-02 8.4810E-03 2.7240E-03 5.9540E-05 5.9210E-02

1.9380E-02 2.3140E-04 6.6630E-06 1.7310E-01 3.3040E-02 2.5970E-03 7.3930E-05

1.0640E+00 3.6560E-01 2.3090E-02 2.1090E-04 1.2780E+00 1.8050E-01 3.0260E-02

3.4870E-03 3.3870E-01 2.6270E-01 3.0040E-02 3.8290E-03 1.0940E+00 4.5600E-01

5.9940E-02 3.5480E-03 1.1860E-02 6.6180E-04 2.5180E-05 6.3600E-02 1.2640E-02

3.5760E-03 3.4050E-05 2.2000E-01 1.3790E-02 1.6570E-03 1.9700E-04 3.5050E-02

1.0410E-02 3.1460E-04 4.6970E-05 2.1980E-01 4.2500E-02 4.6130E-03 2.8610E-04

3.2770E-04 2.5760E-02 3.7070E-03 2.1450E-05 3.4870E-02 1.1340E-02 3.7810E-03

1.9480E-05 3.5950E-01 3.3610E-02 3.4770E-03 5.5120E-05 4.6880E+00 2.7270E-01

7.8870E-01 5.0670E+00 2.2840E+00 2.8890E-01 1.5010E-02 1.8050E-02 4.0070E-03

2.9530E-03 2.9510E-02 1.8060E-02 1.9750E-02 2.4880E-04 5.0390E-02 9.0960E-02

3.4590E-02 3.0180E-03 4.4530E-01 1.1780E+00 4.2300E-01 2.7350E-02 3.1360E-01

7.6910E-01 1.6330E-01 3.2670E-02 3.0940E-01 6.3220E-01 2.8240E-01 3.3080E-02

2.8850E-01 1.2500E+00 4.9240E-01 6.9030E-02 5.3220E-03 5.0360E-03 4.0010E-04

2.4740E-02 3.3050E-02 6.7090E-03 3.9390E-03 3.7860E-02 1.4870E-01 1.3610E-02

1.7870E-03 1.6560E-02 1.2070E-02 1.0360E-02 2.8620E-04 5.1810E-02 1.2520E-01

4.5560E-02 5.2920E-03 2.8090E-04 1.3080E-02 9.9120E-03 2.2870E-03 1.7320E-02

1.6400E-02 4.9670E-03 4.1860E-03 7.2300E-02 2.2990E-01 3.3550E-02 4.0810E-03

3.6690E+00 1.1180E-01 1.9390E+00 6.4890E+00 2.8070E+00 6.4410E-03 1.0290E-02

1.3650E-02 2.9570E-03 8.9640E-03 2.5760E-02 7.6460E-03 1.3940E-02 9.7910E-03

5.1790E-02 6.0590E-02 2.6990E-02 5.0960E-02 5.0820E-01 8.4640E-01 3.3230E-01

7.1240E-02 3.0900E-01 5.5370E-01 1.3200E-01 4.9730E-02 3.2900E-01 4.4230E-01

2.2660E-01 5.9700E-02 4.8890E-01 9.4050E-01 4.0540E-01 1.9970E-03 4.7330E-03

2.2310E-03 9.5610E-03 1.8690E-02 2.3840E-02 4.9330E-03 5.7830E-03 4.2340E-02

1.0960E-01 1.0730E-02 5.0900E-03 1.4520E-02 5.8250E-03 7.2920E-03 7.8660E-03

5.5840E-02 9.0520E-02 3.6700E-02 2.3410E-04 5.7060E-03 9.9250E-03 5.4320E-03

8.3060E-03 1.0160E-02 1.3520E-02 3.7270E-03 1.2200E-02 7.7860E-02 1.6650E-01

2.6570E-02 9.8490E-04 1.2990E-01 2.3990E+00 7.4790E+00 1.8220E-03 7.1960E-03

8.9620E-03 8.7010E-03 1.4280E-03 1.1120E-02 2.1920E-02 1.0580E-02 1.0200E-03

1.1720E-02 4.2890E-02 6.3690E-02 2.3880E-03 6.0950E-02 4.1010E-01 9.2200E-01

1.2170E-02 8.1490E-02 2.5780E-01 5.0200E-01 6.4120E-03 5.6520E-02 2.7020E-01

5.0660E-01 3.5480E-03 6.8850E-02 4.0360E-01 1.0430E+00 5.3960E-04 2.7160E-03

3.9160E-03 2.4700E-03 1.0920E-02 1.6050E-02 1.6180E-02 7.5230E-04 6.8100E-03

3.4000E-02 9.3150E-02 9.1280E-04 6.2110E-03 1.2300E-02 6.7740E-03 6.7730E-04

9.1450E-03 4.5420E-02 9.6950E-02 1.8730E-04 1.7970E-03 7.3480E-03 7.7050E-03

2.3840E-03 9.2450E-03 9.1640E-03 7.7850E-03 1.2130E-03 1.4660E-02 6.3430E-02

1.4730E-01 1.0890E+00 4.1370E-02 1.0400E-03 1.6890E-01 2.9190E-02 1.0710E-04

1.6750E-05 1.3300E-02 9.2030E-04 2.4480E-05 1.6610E-06 2.9480E-02 7.5600E-03

4.8010E-04 9.8700E-06 1.9000E+00 1.9340E-01 2.7340E-03 3.1470E-05 1.0550E-01

2.3620E-02 3.2760E-03 3.6560E-05 3.4930E-01 1.0410E-01 1.0190E-02 7.9410E-04

1.0510E+00 2.2090E-01 5.6500E-02 3.7800E-03 4.8900E-04 1.6180E-04 2.6050E-05

1.5810E-02 2.4120E-03 2.0050E-04 3.5750E-05 8.7580E-02 1.4220E-02 2.4390E-03

1.8810E-04 3.5680E-02 6.5180E-03 2.7990E-04 5.4510E-05 4.3830E-01 5.6730E-02

5.9890E-03 1.6110E-04 1.3070E-03 6.8460E-04 3.7490E-04 8.1800E-05 3.2190E-02

3.5390E-03 1.2140E-04 1.7650E-06 3.4890E-02 9.7820E-03 1.3630E-03 3.1990E-05

2.1760E+00 7.6300E-02 6.6560E-02 7.7120E-02 2.9680E-02 9.5170E-05 4.0950E-03

7.4370E-03 9.0020E-04 2.4600E-05 1.1180E-02 1.3120E-02 7.9850E-03 5.5140E-04

3.2230E-01 1.9120E+00 2.3720E-01 3.1360E-03 3.6930E-02 5.3540E-02 2.1640E-02

3.7890E-03 1.0210E-01 4.4630E-01 1.1270E-01 1.1430E-02 2.6040E-01 1.3520E+00

3.9940E-01 6.3710E-02 3.2100E-04 1.8320E-04 8.9470E-05 5.9630E-03 7.8250E-03

2.1870E-03 1.7230E-04 2.5720E-02 5.0530E-02 1.2440E-02 2.6810E-03 1.4350E-02

1.6340E-02 6.2830E-03 2.3450E-04 1.0820E-01 4.6810E-01 5.9500E-02 6.9170E-03

1.1440E-03 5.4550E-04 2.5310E-04 1.9990E-04 1.1020E-02 1.6830E-02 3.4040E-03

1.3050E-04 1.3990E-02 1.5760E-02 8.9780E-03 1.5630E-03 2.5590E+00 1.9100E-02

6.3240E-02 4.5290E-02 2.1030E-02 9.8260E-04 4.2910E-03 4.7660E-03 6.3960E-04

2.5800E-03 1.1110E-02 8.2120E-03 6.2400E-03 4.1060E-02 6.2030E-01 2.3770E+00

1.8180E-01 9.9000E-03 3.4250E-02 3.7430E-02 1.7780E-02 2.5210E-02 1.6900E-01

3.3880E-01 9.0760E-02 7.6410E-02 4.6820E-01 1.0640E+00 3.3560E-01 1.9180E-04

1.9480E-04 1.2160E-04 1.8200E-03 5.5950E-03 4.8790E-03 1.5450E-03 6.7330E-03

2.4530E-02 3.6770E-02 1.0300E-02 4.3840E-03 1.3320E-02 9.7540E-03 4.4440E-03

1.5260E-02 1.2090E-01 3.6620E-01 4.8730E-02 9.8050E-04 3.8580E-04 2.7320E-04

1.9680E-04 2.9380E-03 1.0960E-02 1.0580E-02 2.4250E-03 3.9850E-03 1.2610E-02

1.0610E-02 7.3550E-03 3.1410E-03 2.3690E-02 5.3780E-02 4.3280E-02 1.4680E-04

1.2320E-03 3.5630E-03 3.9590E-03 3.1160E-04 3.0580E-03 9.4640E-03 1.0630E-02

1.8590E-03 4.9390E-02 4.8970E-01 2.1520E+00 1.4100E-03 1.1570E-02 2.9930E-02

3.9890E-02 2.6580E-03 2.9110E-02 1.4010E-01 3.4930E-01 6.7940E-03 8.6640E-02

3.9700E-01 1.1330E+00 9.9410E-05 1.9450E-04 1.2990E-04 4.0330E-04 2.1630E-03

4.7270E-03 4.2420E-03 1.1690E-03 7.7180E-03 2.1070E-02 3.5300E-02 8.7930E-04

5.2930E-03 1.1320E-02 9.0880E-03 1.2280E-03 1.7800E-02 9.8600E-02 3.4200E-01

8.1710E-04 2.3860E-04 3.3500E-04 1.3960E-04 4.8500E-04 3.6430E-03 9.2030E-03

9.0890E-03 6.0050E-04 4.6340E-03 1.1120E-02 1.2430E-02 3.6660E+00 5.5090E-01

3.5940E-02 1.3140E-01 5.3110E-02 3.2980E-02 1.6650E-02 8.5730E-02 5.7990E-02

3.2420E-02 1.7320E-02 7.8900E-02 3.6700E-02 1.3400E-02 3.3230E-03 4.5970E-02

2.6420E-02 1.1520E-02 3.3290E-03 4.2090E-02 2.4540E-02 1.1510E-02 3.8400E-03

8.4240E-02 3.1880E-02 8.6520E-03 1.3750E-03 9.0830E-02 5.8390E-02 9.9930E-03

3.1350E-02 1.8260E-02 8.8900E-03 3.4370E-03 8.6510E-02 3.9810E-02 1.2940E-02

3.7550E-03 6.1440E-02 3.1420E-02 1.4350E-02 6.3530E-03 4.6510E-02 1.6280E-02

6.3760E-03 3.3000E-03 1.0010E-01 1.0180E-01 6.7070E-02 4.1420E-03 5.3010E-02

2.6890E-02 9.3860E-03 2.7500E-03 3.6900E-02 1.7010E-02 5.4900E-03 1.1030E-03

3.2660E+00 6.5600E-01 5.3110E-02 8.1110E-02 2.9660E-02 1.2070E-02 5.2710E-02

3.4380E-02 3.6120E-02 2.2000E-02 2.5920E-02 3.0940E-02 2.7290E-02 1.5110E-02

2.3250E-02 1.5550E-02 1.5050E-02 1.1640E-02 1.9590E-02 1.4890E-02 1.4820E-02

1.1870E-02 1.5680E-02 3.8060E-02 3.0130E-02 1.0740E-02 6.6280E-02 1.7560E-02

3.5470E-02 1.8250E-02 1.2940E-02 1.0060E-02 5.2220E-03 3.2640E-02 3.0410E-02

3.1230E-02 1.3040E-02 3.1420E-02 2.6120E-02 2.0560E-02 7.0840E-03 9.1370E-03

2.5550E-02 1.4360E-02 5.3460E-03 7.5070E-02 7.5710E-02 8.0490E-03 4.5970E-02

2.6890E-02 1.7350E-02 1.7620E-02 7.1630E-03 1.3990E-02 1.2750E-02 1.2410E-02

6.1960E-03 2.1760E+00 3.2980E-02 2.9660E-02 4.2800E-02 1.1690E-02 2.4160E-02

3.3130E-02 1.7580E-02 2.1930E-02 4.9870E-03 1.9250E-02 1.9520E-02 2.2420E-02

7.5290E-03 1.3280E-02 1.1900E-02 1.0910E-02 5.8070E-03 1.1860E-02 1.1060E-02

1.2030E-02 3.8730E-04 1.5680E-02 2.1840E-02 2.5170E-02 3.1800E-02 3.0040E-02

1.7680E-02 8.8860E-03 1.0050E-02 7.3830E-03 4.6440E-03 6.7540E-03 2.6610E-02

1.5050E-02 2.3150E-02 1.4350E-02 2.0570E-02 1.1350E-02 1.0540E-02 3.3620E-03

6.7770E-03 1.5590E-02 1.0570E-02 5.0040E-02 3.1960E-02 3.3850E-02 2.0690E-02

9.3860E-03 1.7630E-02 9.0860E-03 9.9110E-03 2.8410E-03 1.0480E-02 7.5240E-03

9.4130E-03 1.6650E-02 1.2070E-02 1.1690E-02 1.8100E-02 1.0140E-02 1.2770E-02

1.7610E-02 7.8630E-03 4.8390E-04 5.0090E-03 1.3300E-02 1.4300E-02 1.2460E-03

7.0790E-03 8.2440E-03 5.2660E-03 9.0870E-04 5.3330E-03 7.9100E-03 6.2270E-03

3.5450E-05 3.8290E-04 1.1070E-02 2.0060E-02 9.8760E-03 2.6640E-02 3.1980E-03

3.4370E-03 5.2200E-03 4.6420E-03 2.1840E-03 1.6900E-03 5.3990E-03 1.7490E-02

1.1210E-02 6.3530E-03 7.0840E-03 1.0530E-02 4.4780E-03 1.4210E-03 1.5550E-03

3.9460E-03 1.0850E-02 2.5030E-02 6.7810E-03 3.5180E-02 1.2770E-03 2.7500E-03

7.1630E-03 9.9110E-03 3.1820E-03 2.8380E-04 2.9550E-03 7.0000E-03 4.8860E-03

1.3290E+00 7.6550E-02 7.5820E-03 4.5910E+00 1.5410E+00 3.2690E-01 3.5720E-02

8.9470E+00 2.0390E+00 3.3470E-01 3.1680E-02 1.3810E-01 5.3250E-02 2.0930E-02

5.6130E-03 1.6520E-01 5.7540E-02 1.7860E-02 4.0250E-03 4.1150E-02 1.8050E-02

8.2230E-03 2.3400E-03 3.3120E-01 1.2990E-01 2.2890E-02 6.4430E-01 2.9350E-01

8.3560E-02 1.2840E-02 4.8290E-01 1.5070E-01 3.2310E-02 5.4390E-03 1.5600E-01

7.6260E-02 2.3980E-02 7.1130E-03 3.6860E-02 1.7060E-02 6.8650E-03 2.4890E-03

1.9630E-02 1.8750E-02 1.4460E-02 8.1180E-03 5.8630E-02 3.4700E-02 1.7210E-02

6.2640E-03 6.4300E-02 3.4110E-02 1.4490E-02 5.3730E-03 1.4650E+00 8.6270E-02

1.1120E+00 1.9370E+00 1.4190E+00 4.0980E-01 5.0670E-01 5.3060E+00 2.2710E+00

4.3740E-01 4.0980E-02 6.6930E-02 3.3840E-02 2.1720E-02 2.5750E-02 1.0340E-01

6.1030E-02 2.1200E-02 1.0490E-02 2.1240E-02 1.1330E-02 9.1710E-03 1.7680E-01

1.0770E-01 7.8490E-02 2.9260E-01 2.0450E-01 1.9290E-01 8.5570E-02 1.0380E-01

2.2030E-01 1.4190E-01 3.7890E-02 7.6250E-02 4.8600E-02 5.4530E-02 1.8140E-02

1.2370E-02 1.5820E-02 1.3070E-02 6.9780E-03 1.4720E-02 1.5600E-02 1.0550E-02

4.8050E-03 3.4700E-02 2.4410E-02 1.7660E-02 1.0830E-02 2.9280E-02 2.3750E-02

2.2650E-02 1.3040E-02 1.0240E+00 9.3410E-02 1.0590E+00 1.0070E+00 1.0960E+00

3.0730E-03 5.3610E-01 3.3330E+00 1.8100E+00 1.3550E-02 2.2220E-02 4.8170E-02

2.4970E-02 5.3140E-03 2.1120E-02 7.8200E-02 3.4960E-02 3.7880E-03 4.0340E-03

1.6950E-02 1.0060E-02 7.4560E-02 1.0130E-01 6.6140E-02 8.3290E-02 1.9240E-01

1.2740E-01 1.1390E-01 1.0230E-02 9.9690E-02 1.1770E-01 1.0850E-01 2.3970E-02

5.4530E-02 2.0820E-02 3.2100E-02 3.0640E-03 8.6050E-03 9.9680E-03 1.0380E-02

9.8160E-03 1.1360E-02 6.4520E-03 2.8880E-03 1.7210E-02 1.7660E-02 1.5830E-02

7.6940E-03 9.3880E-03 1.9570E-02 1.4200E-02 1.5950E-02 2.6090E-03 1.0790E-01

7.3310E-01 7.8420E-01 2.7990E-04 3.1170E-03 3.7600E-01 2.4600E+00 1.9100E-03

1.3210E-02 1.3840E-02 2.5540E-02 4.2820E-04 5.3430E-03 1.4640E-02 4.0340E-02

9.9310E-06 4.2060E-03 3.0750E-03 1.0100E-02 2.2410E-02 6.4420E-02 3.4130E-02

1.2840E-02 8.5380E-02 1.1380E-01 4.6580E-02 1.8130E-03 9.3660E-03 6.8440E-02

8.8520E-02 7.1130E-03 1.8130E-02 3.2100E-02 8.3210E-03 7.2430E-04 2.4790E-03

5.6910E-03 6.9860E-03 4.9080E-03 5.9820E-03 2.9550E-03 1.4030E-03 6.2640E-03

1.0840E-02 7.6940E-03 4.4020E-03 2.6450E-03 7.0400E-03 1.2000E-02 7.8730E-03

3.3280E+00 3.0470E-01 1.7130E-02 8.1940E+00 2.1550E+00 3.3180E-01 2.3010E-02

4.9050E-01 1.5310E-01 3.1790E-02 5.4860E-03 7.7660E-01 2.5090E-01 5.5830E-02

7.0530E-03 4.1920E-01 1.1760E-01 1.8650E-02 1.4800E-03 4.0870E-01 2.0820E-02

3.2540E-03 6.2690E-01 1.2860E-01 1.4810E-02 8.3360E-04 7.4560E-01 2.5310E-01

5.8870E-02 6.2570E-03 1.3710E-01 4.7280E-02 9.6180E-03 3.0580E-03 8.0970E-02

3.4100E-02 1.2870E-02 3.6930E-03 2.9940E-02 5.8810E-02 1.1840E-02 7.5950E-03

6.1610E-02 2.8060E-02 1.1260E-02 2.4450E-03 8.9260E-02 3.2650E-02 7.6800E-03

1.2840E-03 3.6480E+00 3.7090E-01 1.6630E+00 4.2460E+00 2.2670E+00 4.0620E-01

1.5230E-01 2.2060E-01 1.3790E-01 3.4530E-02 2.0040E-01 3.8060E-01 2.4270E-01

6.5770E-02 7.4620E-02 2.2240E-01 1.2870E-01 2.2700E-02 1.4560E-01 1.8840E-01

1.2140E-02 1.8920E-01 2.9600E-01 1.1520E-01 1.6430E-02 2.5190E-01 3.2330E-01

2.0820E-01 6.8430E-02 5.8860E-02 5.1660E-02 4.0320E-02 6.6680E-03 2.9770E-02

3.7680E-02 2.4880E-02 1.3130E-02 2.3960E-02 2.7340E-02 3.1410E-02 3.8390E-03

3.2700E-02 2.6530E-02 1.3880E-02 9.6040E-03 3.2670E-02 3.6010E-02 2.7580E-02

8.3930E-03 2.7970E+00 1.3280E-01 1.7790E+00 2.7020E+00 1.8260E+00 3.1690E-02

1.3730E-01 1.3260E-01 1.0780E-01 3.0190E-02 1.9380E-01 2.4880E-01 2.0330E-01

1.8590E-03 8.5590E-02 1.4480E-01 1.0450E-01 4.1830E-02 1.3920E-01 7.8460E-02

4.1970E-02 1.7200E-01 1.6960E-01 7.9200E-02 5.8710E-02 2.0750E-01 2.0580E-01

1.6720E-01 1.8620E-02 4.8600E-02 2.4660E-02 2.6350E-02 9.7120E-03 2.1180E-02

2.6940E-02 2.1290E-02 1.7970E-02 1.4550E-02 2.1590E-02 1.0800E-02 1.5920E-02

1.7480E-02 2.0710E-02 7.9320E-03 7.6790E-03 2.7570E-02 2.1420E-02 2.1780E-02

2.2210E-03 1.6000E-01 1.3770E+00 2.7550E+00 5.4860E-03 3.4440E-02 1.0760E-01

1.2540E-01 2.4250E-03 3.5800E-02 1.5670E-01 2.6000E-01 9.4920E-05 2.1210E-03

6.5060E-02 1.5750E-01 9.4860E-03 5.5430E-02 1.0800E-01 5.6240E-03 5.1150E-02

1.3220E-01 1.1950E-01 6.2580E-03 6.8320E-02 1.6680E-01 1.8490E-01 6.0700E-03

1.7870E-02 3.5750E-02 1.9050E-02 2.3110E-03 9.5590E-03 1.7440E-02 2.3460E-02

1.1970E-02 8.8410E-03 8.1850E-03 1.4270E-02 5.5610E-03 1.4780E-02 1.2050E-02

8.9760E-03 1.2840E-03 8.3920E-03 2.1780E-02 2.0860E-02 3.1300E+00 1.2180E-01

4.9780E-03 5.0040E-01 1.2030E-01 2.5560E-02 5.3330E-03 3.4180E-01 9.0070E-02

1.3260E-02 6.0590E-04 2.5810E-01 7.9690E-02 1.9550E-02 2.5760E-03 2.1790E-02

8.7140E-03 1.1170E-03 7.3210E-01 5.8430E-02 1.0870E-02 1.9800E-03 4.9600E-01

1.0160E-01 1.1720E-02 1.3750E-03 6.8890E-02 1.7700E-02 2.8590E-03 9.7360E-04

2.3860E-01 5.6880E-02 9.5510E-03 1.8560E-03 6.5110E-02 3.1170E-02 1.6010E-02

3.4930E-03 8.7950E-02 2.0670E-02 6.7140E-03 5.5590E-04 1.5640E-01 4.5780E-02

1.1400E-02 1.4340E-03 3.8550E+00 1.4560E-01 1.4950E-01 2.6240E-01 1.0590E-01

2.5930E-02 8.9790E-02 1.7440E-01 9.2330E-02 1.5780E-02 6.9490E-02 1.3640E-01

7.2540E-02 2.2120E-02 1.4160E-02 7.1190E-03 5.0560E-03 1.8180E-01 4.3180E-01

4.6370E-02 9.5730E-03 1.3110E-01 2.6140E-01 1.0370E-01 1.2970E-02 2.7760E-02

3.0060E-02 1.5680E-02 1.8560E-03 5.6800E-02 1.3200E-01 5.7910E-02 1.0230E-02

5.4270E-02 2.2700E-02 1.0880E-02 8.6580E-03 3.3780E-02 4.5440E-02 1.0510E-02

6.8820E-03 5.4560E-02 7.6400E-02 3.5740E-02 1.2490E-02 2.9540E+00 3.8990E-02

1.3460E-01 1.7740E-01 8.4050E-02 1.3230E-02 9.2030E-02 1.1760E-01 7.5620E-02

1.4510E-02 6.2700E-02 9.9690E-02 6.3490E-02 7.9090E-03 7.7480E-03 5.4040E-03

4.1180E-02 1.8490E-01 2.7800E-01 3.1600E-02 2.3460E-02 1.3340E-01 1.7000E-01

8.0540E-02 8.9940E-03 2.4200E-02 1.6570E-02 1.0520E-02 9.5400E-03 5.7870E-02

9.3160E-02 4.6800E-02 4.3410E-02 1.4360E-02 1.1480E-02 7.9330E-03 1.3550E-02

2.3440E-02 3.3120E-02 7.1480E-03 1.6390E-02 4.3800E-02 5.3550E-02 2.9620E-02

8.9790E-03 4.2030E-02 1.1080E-01 1.6460E-01 6.0530E-04 1.5760E-02 7.5450E-02

1.3210E-01 1.4050E-03 1.6300E-02 5.4090E-02 1.0860E-01 3.5660E-03 8.0100E-03

4.2190E-03 8.9660E-03 4.7870E-02 1.4690E-01 1.9800E-01 3.0600E-03 2.7590E-02

1.0780E-01 1.6710E-01 2.8690E-03 9.4200E-03 1.9140E-02 1.3780E-02 1.8550E-03

1.0220E-02 4.6780E-02 9.7360E-02 3.2560E-02 7.7870E-03 1.2300E-02 5.2530E-03

3.8200E-03 1.4750E-02 1.9180E-02 2.0180E-02 2.9880E-03 1.8350E-02 3.7580E-02

4.8620E-02 2.0120E+00 7.1920E-02 3.7370E-03 6.0810E+00 1.5360E+00 2.1230E-01

1.2920E-02 1.1750E+01 2.1440E+00 2.5530E-01 1.5110E-02 4.6220E-01 5.7220E-02

1.9680E-02 5.7530E-01 1.8640E-01 3.1000E-02 8.1550E-03 6.4140E-01 1.4980E-01

2.3730E-02 3.2700E-03 1.8400E-01 5.7570E-02 8.1850E-03 2.3100E-03 7.9470E-02

2.4240E-02 6.6430E-03 1.3870E-03 2.4210E-02 2.7680E-02 1.0190E-02 4.6810E-03

4.5020E-02 2.1250E-02 7.1060E-03 1.1630E-03 9.4890E-02 2.7680E-02 7.3860E-03

1.3740E-03 2.4380E+00 8.7900E-02 1.1680E+00 3.1930E+00 1.6620E+00 2.6110E-01

8.6090E-01 7.6810E+00 2.5130E+00 3.1520E-01 1.8910E-01 2.1470E-01 2.7650E-02

2.3530E-01 2.1750E-01 1.6380E-01 2.4110E-02 1.4960E-01 3.3140E-01 1.4690E-01

2.6680E-02 7.3670E-02 6.9050E-02 5.2800E-02 6.1520E-03 1.9230E-02 4.2310E-02

2.1410E-02 7.2740E-03 1.9370E-02 1.6210E-02 1.3550E-02 4.2920E-03 2.4570E-02

1.6590E-02 1.1800E-02 6.6660E-03 2.7670E-02 4.7450E-02 2.2010E-02 7.9160E-03

1.8370E+00 7.0740E-02 1.2930E+00 2.0210E+00 1.3280E+00 6.0630E-03 1.0170E+00

5.5180E+00 1.9990E+00 7.3580E-02 1.6020E-01 8.9600E-02 6.7170E-02 1.9930E-01

1.0470E-01 1.0920E-01 2.3720E-02 1.4690E-01 2.0660E-01 1.1380E-01 1.9790E-02

6.4460E-02 3.1610E-02 3.5460E-02 4.3570E-03 1.6480E-02 2.9260E-02 1.7860E-02

1.4530E-02 9.8380E-03 1.0230E-02 5.4710E-03 1.0770E-02 1.3910E-02 1.2770E-02

7.2710E-03 7.3860E-03 2.2010E-02 3.1900E-02 1.7480E-02 9.9690E-04 8.5460E-02

9.9140E-01 2.0660E+00 5.0670E-04 6.7380E-03 7.6690E-01 4.9250E+00 2.9830E-02

7.1100E-02 1.1460E-01 1.8050E-02 6.9800E-02 1.4940E-01 8.3080E-02 3.2700E-03

2.6670E-02 1.1380E-01 1.8370E-01 5.0390E-03 2.0750E-02 4.8460E-02 2.6600E-02

7.5980E-04 4.6360E-03 1.3490E-02 2.6670E-02 9.6840E-03 5.8630E-03 5.7470E-03

5.4080E-03 3.1200E-03 1.0870E-02 1.0060E-02 5.7660E-03 1.3740E-03 7.9160E-03

1.7480E-02 2.5760E-02 3.8180E+00 2.6000E-01 1.1260E-02 6.9170E+00 1.7530E+00

3.2390E-01 1.4090E-02 7.9940E-02 4.5530E-02 1.2540E-02 2.6120E-01 1.8380E-02

4.1940E-03 6.9930E-04 7.3920E-01 1.7370E-01 3.7260E-02 7.9550E-03 1.0880E-01

1.5400E-02 4.1610E-03 8.6730E-04 2.7630E-01 6.7020E-02 1.1670E-02 1.8830E-03

9.3590E-03 3.1590E-02 6.5430E-03 4.1130E-04 1.0030E-01 2.3830E-02 8.4040E-03

1.3950E-03 1.8970E-01 6.2890E-02 4.9020E-03 3.7630E-04 4.4850E+00 3.1150E-01

1.3990E+00 7.5000E+00 3.1730E+00 3.8630E-01 6.1290E-02 3.0270E-02 2.3470E-02

6.2370E-02 1.5750E-01 1.3250E-02 3.7890E-03 2.1650E-01 3.9230E-01 1.5250E-01

3.7620E-02 3.2900E-02 6.0760E-02 1.0480E-02 3.5040E-03 6.7000E-02 1.5160E-01

6.5710E-02 1.2860E-02 7.7970E-03 1.6350E-02 1.1800E-02 3.9840E-03 3.8740E-02

5.2700E-02 1.2580E-02 7.5940E-03 8.0020E-02 1.4280E-01 6.7980E-02 5.6150E-03

3.4920E+00 1.4820E-01 2.6020E+00 5.3600E+00 2.5500E+00 4.1310E-02 3.0460E-02

2.0240E-02 1.4140E-02 6.3630E-02 1.0260E-01 8.9710E-03 5.6400E-02 1.9540E-01

2.6670E-01 1.2100E-01 1.0260E-02 2.9210E-02 3.9690E-02 6.9450E-03 1.1660E-02

6.5710E-02 1.0640E-01 5.4000E-02 6.2370E-03 7.3450E-03 1.1450E-02 6.9060E-03

1.6180E-02 2.7480E-02 3.7460E-02 8.1830E-03 1.2390E-02 8.4320E-02 8.8130E-02

5.2280E-02 3.6810E-04 1.7660E-01 2.0460E+00 5.7750E+00 2.4500E-02 3.1750E-02

1.2750E-02 3.1710E-03 1.6360E-02 5.0550E-02 7.1890E-02 1.3190E-02 6.0790E-02

1.6070E-01 2.4500E-01 3.1450E-03 1.0890E-02 2.3150E-02 2.7410E-02 1.8830E-03

1.2860E-02 5.3990E-02 1.0940E-01 4.6780E-03 2.5390E-03 8.7640E-03 7.9730E-03

5.5340E-03 1.6520E-02 2.1910E-02 2.3000E-02 1.1660E-03 1.4870E-02 6.7650E-02

9.4180E-02 1.4930E+00 1.1810E-01 4.0610E-03 1.6540E-02 2.0210E-03 1.0610E-04

7.1950E-02 2.4780E-02 7.7980E-03 1.7390E-04 1.9570E+00 1.5240E-01 2.0400E-02

2.6430E-03 3.4610E-02 9.4020E-03 1.3750E-03 1.8620E-04 4.8780E-01 8.6850E-02

1.0170E-02 8.8850E-04 5.2870E-04 2.4150E-02 3.6090E-03 1.0310E-04 3.9280E-02

8.5320E-03 6.5020E-04 5.2160E-05 2.5140E-01 2.3270E-02 4.1950E-03 2.4870E-04

3.0220E+00 1.3800E-01 8.1530E-03 6.6300E-03 1.2110E-03 3.6890E-02 3.2470E-02

1.1990E-02 8.4500E-03 3.6410E-01 1.2980E+00 1.4730E-01 2.1810E-02 1.5610E-02

1.4480E-02 7.6940E-03 1.2770E-03 1.0680E-01 2.8950E-01 9.2350E-02 1.1510E-02

4.5320E-04 1.2360E-02 9.3380E-03 2.1950E-03 1.5920E-02 1.7190E-02 7.8070E-03

6.5230E-04 5.0290E-02 1.6350E-01 2.0150E-02 4.7570E-03 3.6510E+00 3.4930E-03

6.4700E-03 3.3670E-03 1.7610E-02 2.2040E-02 2.6300E-02 8.8300E-03 6.2140E-02

3.9660E-01 9.5140E-01 1.1670E-01 5.6040E-03 1.2700E-02 8.8420E-03 5.3960E-03

1.6750E-02 1.1380E-01 2.1210E-01 7.4580E-02 3.7770E-04 5.4760E-03 9.3290E-03

5.1030E-03 4.8620E-03 1.4160E-02 1.0110E-02 5.5130E-03 1.0140E-02 5.1450E-02

1.2070E-01 1.6620E-02 1.1440E-03 4.4270E-03 5.0910E-03 5.1660E-03 1.9490E-02

1.9720E-02 1.5450E-02 9.1250E-03 7.2360E-02 3.2130E-01 8.1910E-01 1.4670E-03

6.3780E-03 1.0730E-02 7.4620E-03 1.7420E-03 1.9380E-02 9.3660E-02 2.1930E-01

3.0220E-04 1.8090E-03 6.9190E-03 7.1970E-03 9.5830E-04 5.8490E-03 1.1910E-02

9.0170E-03 1.4110E-03 1.1840E-02 4.2500E-02 1.0340E-01 6.8580E-01 4.8430E-02

2.5210E+00 1.2030E+00 4.0640E-01 7.0870E-02 7.7230E+00 2.7180E+00 7.4040E-01

1.3450E-01 5.3330E-02 2.9680E-02 1.4600E-02 5.7070E-03 2.2340E-02 1.6390E-02

9.7750E-03 4.5050E-03 3.9560E-02 1.0710E-01 8.8250E-02 5.3660E-02 9.1060E-02

5.4400E-02 3.0840E-02 1.4040E-02 4.0980E-02 2.5900E-02 1.7420E-02 1.1390E-02

5.7770E-01 8.0740E-01 7.5290E-01 7.5350E-01 4.8870E-01 3.3650E-01 3.5460E+00

2.6320E+00 1.0480E+00 2.2440E-02 2.0810E-02 1.6460E-02 9.1330E-03 1.1660E-02

6.2240E-03 7.7200E-03 9.7380E-03 2.6380E-02 8.8250E-02 5.9640E-02 1.8120E-02

4.3060E-02 4.1260E-02 2.8590E-02 1.3980E-02 1.7740E-02 2.2080E-02 1.5760E-02

8.1980E-03 3.2620E-02 5.6600E-01 5.2160E-01 2.8130E-01 1.9350E-02 2.1390E-01

1.4900E+00 2.0600E+00 6.8210E-03 1.1470E-02 1.0250E-02 5.8220E-03 1.2700E-03

6.8330E-03 6.0640E-03 3.4310E-03 1.3190E-02 5.3650E-02 1.8120E-02 1.1220E-02

1.8160E-02 1.8530E-02 1.6700E-02 1.0050E-02 9.6150E-03 6.7020E-03 7.8260E-03

7.7510E-03 3.0380E+00 4.5530E-01 3.2970E-02 8.2700E+00 3.0330E+00 6.6880E-01

7.8010E-02 1.1830E-01 5.7820E-02 1.5680E-02 2.7530E-03 5.8540E-02 3.1490E-02

1.5000E-02 5.8750E-03 1.4780E-01 1.4200E-01 3.8560E-02 1.6190E-02 1.3900E-01

7.2690E-02 2.8170E-02 1.0460E-02 1.2820E-01 5.1530E-02 1.4110E-02 2.1610E-03

2.7190E+00 5.3600E-01 2.2810E+00 3.2040E+00 2.7480E+00 8.3170E-01 5.7820E-02

3.2220E-02 4.0590E-02 1.5100E-02 2.4090E-02 2.4300E-02 2.0810E-02 1.4180E-02

1.1080E-01 6.2320E-02 6.8620E-02 1.6640E-02 7.2690E-02 4.8810E-02 4.8860E-02

1.7380E-02 4.0310E-02 4.8530E-02 4.1370E-02 1.6840E-02 1.8130E+00 1.9630E-01

2.1740E+00 1.5610E+00 2.1220E+00 1.5680E-02 4.0590E-02 1.6540E-02 2.4370E-02

7.7250E-03 1.5320E-02 1.6300E-02 1.6130E-02 7.3880E-02 2.9100E-02 4.1730E-02

2.7560E-02 2.8180E-02 4.8860E-02 2.1270E-02 2.6840E-02 6.1550E-03 3.3110E-02

2.7000E-02 3.1790E-02 8.6750E-03 2.2150E-01 1.5040E+00 1.2930E+00 2.7530E-03

1.5100E-02 2.4380E-02 6.0210E-03 1.8260E-03 6.0850E-03 9.7430E-03 9.9610E-03

3.6930E-02 1.2540E-02 1.5060E-02 2.1590E-02 1.0460E-02 1.7380E-02 2.6850E-02

7.8920E-03 3.1450E-04 6.8840E-03 2.2570E-02 1.9250E-02 3.1020E+00 2.2770E-01

1.2180E-02 1.8230E-01 7.8350E-02 2.2650E-02 5.5580E-03 1.2220E-01 5.9120E-02

2.1500E-02 6.2690E-03 4.9010E-02 3.5770E-01 3.5440E-02 5.5750E-03 3.6540E-01

1.1720E-01 1.5390E-02 4.0110E-03 1.1590E-01 5.9290E-02 2.0840E-02 3.5300E-03

3.5170E+00 2.7810E-01 9.2420E-02 6.6390E-02 5.3960E-02 1.8300E-02 5.2950E-02

4.9080E-02 4.2810E-02 2.1900E-02 3.9200E-02 1.4000E-01 1.5830E-01 2.0650E-02

1.4890E-01 1.3170E-01 1.0880E-01 1.2050E-02 5.9260E-02 4.0350E-02 3.7270E-02

2.2720E-02 2.6820E+00 3.6610E-02 6.3020E-02 3.9710E-02 3.3960E-02 1.5860E-02

3.8230E-02 3.2330E-02 3.6470E-02 2.9400E-02 4.7050E-02 1.2170E-01 7.0460E-02

3.8740E-02 1.3080E-01 5.7980E-02 7.3580E-02 2.0830E-02 3.7260E-02 3.0580E-02

3.1030E-02 1.2140E-02 3.4880E-02 4.5450E-02 2.3090E-02 3.9900E-03 1.5410E-02

3.1130E-02 3.2260E-02 1.9600E-02 1.3510E-02 5.6600E-02 8.9390E-02 9.1900E-03

4.1820E-02 9.8850E-02 5.0950E-02 3.5290E-03 2.2720E-02 3.1020E-02 2.2540E-02

1.8650E+00 3.2190E-01 1.1280E-01 6.3250E+00 1.6090E+00 3.5730E-01 8.2440E-02

1.1360E+00 2.1150E+00 1.1740E+00 1.0320E-01 1.8760E+00 5.9880E-01 1.0740E-01

6.4650E-03 2.3060E+00 7.1020E-01 1.4390E-01 1.7970E-02 1.7920E+00 2.1100E-01

5.2920E-01 3.6580E+00 1.6700E+00 4.0120E-01 8.5120E-01 1.3990E+00 3.6130E-01

7.8270E-01 5.9780E-01 7.2220E-01 4.9290E-01 1.2880E-01 4.8310E-01 1.0520E+00

6.7400E-01 1.7730E-01 1.1890E+00 7.6340E-02 4.6830E-01 2.2910E+00 1.3180E+00

5.6730E-01 5.8590E-01 6.8120E-01 4.2780E-01 1.0710E-01 4.9250E-01 3.7350E-01

3.2140E-01 3.9630E-02 4.7030E-01 5.6470E-01 5.1850E-01 2.4340E-02 5.2090E-02

3.1480E-01 1.6820E+00 2.8360E-01 1.3770E-01 6.0990E-01 9.9750E-02 6.4650E-03

1.2860E-01 3.2130E-01 1.9100E-01 3.4600E-03 4.2020E-02 3.2570E-01 4.2590E-01

4.9740E+00 3.6260E-01 4.2020E-02 1.8190E-01 7.7010E-02 2.7360E-02 5.9980E-03

5.1460E+00 2.5570E-01 5.5330E-03 1.1400E-03 1.0600E+01 2.1250E+00 1.8180E-01

7.4130E-03 5.8380E+00 4.1280E-01 1.5160E-01 4.7690E-02 2.9500E-02 1.4770E-02

1.1420E+00 3.0940E+00 2.6560E-01 4.6840E-03 2.7580E+00 5.5370E+00 2.2550E+00

2.1490E-01 4.5350E+00 1.2130E-01 2.7100E-02 2.8690E-02 1.7780E-02 1.8390E-01

1.2800E+00 1.9570E+00 1.8580E-01 4.3250E-01 2.8910E+00 3.5470E+00 1.7460E+00

9.0940E-02 1.3750E-02 2.4800E-02 1.6610E-02 1.7840E-02 2.3860E-01 1.0170E+00

1.4310E+00 3.4800E-02 5.2780E-01 2.3280E+00 3.5730E+00 7.4100E-01 4.9400E-01

2.4700E-01 2.0940E+00 1.5750E+00 1.0520E+00 5.2660E-01 1.8580E-02 1.4860E-02

1.1150E-02 7.4310E-03 2.3230E+00 1.0550E+00 4.4460E+00 3.0210E+00 1.2300E+00

2.5190E-01 3.6320E-01 1.4880E-01 6.1680E-02 2.9010E-02 9.0300E-01 2.5660E+00

5.8180E-01 1.4460E+00 1.3790E+00 4.5240E-02 1.7740E-01 1.2800E-01 5.1650E-02

1.4610E-01 1.7700E+00 9.1000E-01 1.6160E-01 2.2010E-02 1.8430E-02 6.8960E-02

9.1760E-02 2.3200E+00 2.9230E-01 3.4320E-02 2.1980E+00 7.2250E-01 1.8950E-01

4.6600E-02 2.2330E+00 3.1960E-01 5.1530E-01 1.0160E+00 6.3610E-01 2.0230E-01

1.5120E+00 8.5160E-02 4.4770E-01 5.6810E-01 4.7960E-01 1.9650E-02 7.0740E-02

2.9950E-01 4.0040E-01 4.4420E+00 4.4840E-01 2.5250E-02 4.7900E+00 5.4650E-01

3.6860E+00

7000.00

5.7280E+00 1.5570E+00 7.1830E-01 3.0410E-01 3.8900E+00 1.6370E+00 5.5060E-01

1.5390E-01 1.2290E+01 5.3360E-01 1.8150E-01 5.6310E-02 9.2480E-01 4.8470E-01

2.6450E-02 3.1830E-01 1.0380E-01 7.7460E-03 6.3730E-01 3.1360E-01 9.5280E-02

1.6240E-02 3.8410E-01 2.1510E-01 1.1160E-01 3.7690E-02 2.9270E-01 2.1070E-01

7.8600E-02 1.9830E-02 2.6880E-01 1.5200E-01 7.1590E-02 3.6130E-02 2.2140E+01

7.3910E+00 1.2300E+00 5.4490E-01 2.0970E-01 2.9300E+01 5.1220E+00 6.2180E-01

8.2330E-02 3.2980E-02 1.4620E-02 1.2020E+01 2.0160E-01 4.7320E-02 1.4800E+00

2.7050E-01 1.3230E-02 2.5430E-03 2.4450E+00 3.1400E-01 3.3470E-02 1.0540E-02

8.6530E-01 1.6670E-02 9.0800E-03 1.2540E-01 8.8680E-02 3.8430E-02 9.3640E-03

7.3790E-02 4.7480E-02 1.8870E-02 9.2550E-03 3.1050E-02 1.0160E-02 3.0590E-03

8.0770E-02 3.9310E-02 1.6870E-02 5.7170E-03 2.8200E-02 1.7000E-02 7.2540E-03

1.8180E-03 7.1140E-02 4.0010E-02 1.3630E-02 2.4680E-03 5.2170E-02 2.1090E-02

4.8150E-03 5.3290E-04 3.9120E-02 1.5540E-02 6.0520E-03 1.7680E-03 3.4860E-02

1.1490E-02 3.4860E-03 1.0960E-03 5.8060E-02 2.6440E-02 1.1420E-02 3.9330E-03

7.6220E-02 2.8410E-02 7.4920E-03 1.1250E-03 4.9060E-02 1.5310E-02 3.8660E-03

7.0110E-04 4.9920E-02 2.3470E-02 8.5780E-03 1.8970E-03 3.8120E-02 1.3470E-02

6.3970E-03 3.2510E-02 2.0770E-02 7.3820E-03 1.6150E-03 2.9490E-02 1.6570E-02

1.0150E-02 7.1020E-03 1.3560E-02 1.0040E-02 3.8970E-03 9.2120E-04 1.1140E-02

8.6100E-03 4.5970E-03 1.4910E-03 2.6970E-02 9.7910E-03 7.7470E-03 4.4730E-03

1.5530E-02 1.0510E-02 5.5670E-03 2.5240E-03 1.9790E-02 1.3620E-02 6.2250E-03

1.8340E-03 5.5590E+00 1.2190E+00 4.3860E-01 1.7720E+00 1.6150E+00 1.1010E+00

4.9210E-01 2.6910E+00 7.3260E+00 3.3460E-01 1.1910E-01 6.6130E-01 2.1810E-01

2.7880E-01 1.8460E-01 1.0150E-01 5.9210E-02 2.8060E-01 2.3180E-01 2.4440E-01

9.9340E-02 2.0710E-01 2.2410E-01 1.0310E-01 9.3400E-02 1.3630E-01 2.1240E-01

1.4210E-01 7.6140E-02 1.6790E-01 1.3590E-01 1.0360E-01 2.7690E-02 6.1120E+00

1.1000E+01 8.3830E+00 1.0820E+00 3.8140E-01 6.7420E-01 1.9200E+01 6.9090E+00

1.1520E+00 1.0340E-01 1.9630E-02 3.5650E+00 6.1040E+00 1.2480E-01 4.9380E-01

6.5470E-01 2.5440E-01 1.0830E-02 4.7820E-01 1.4170E+00 3.1810E-01 2.8700E-02

3.2930E-01 3.7720E-01 6.3750E-03 8.9850E-02 3.8100E-02 4.5940E-02 3.5580E-02

5.7920E-02 3.3250E-02 2.0940E-02 7.4060E-03 1.8010E-02 1.2530E-02 4.8710E-03

3.8230E-02 3.5390E-02 2.5240E-02 1.5280E-02 1.5660E-02 1.0070E-02 1.0570E-02

7.1930E-03 3.4950E-02 2.2490E-02 3.0150E-02 1.4200E-02 2.6890E-02 1.7740E-02

1.3780E-02 4.4740E-03 1.9930E-02 1.7280E-02 8.6340E-03 4.1310E-03 1.3130E-02

1.6030E-02 8.5880E-03 3.0000E-03 2.5760E-02 2.6840E-02 1.6990E-02 1.0290E-02

3.1670E-02 3.0750E-02 2.0600E-02 7.5840E-03 1.5140E-02 2.3460E-02 1.2590E-02

3.9530E-03 2.1220E-02 2.0670E-02 1.6540E-02 8.6660E-03 2.2770E-02 1.8130E-02

5.5200E-03 2.3030E-02 9.8140E-03 1.1190E-02 5.7760E-03 1.7270E-02 1.6060E-02

1.2210E-02 5.1000E-03 1.0740E-02 3.9200E-03 5.1180E-03 2.9560E-03 8.2770E-03

4.0010E-03 4.1850E-03 4.2130E-03 2.1570E-02 8.6230E-03 6.1270E-03 2.8590E-03

1.1490E-02 7.1640E-03 6.0740E-03 2.5770E-03 1.3840E-02 6.7230E-03 7.1420E-03

5.4690E-03 4.4210E+00 7.2740E-01 7.0060E-01 1.1970E+00 1.0480E+00 7.9320E-01

5.0920E-01 3.1470E+00 4.0130E+00 1.8550E-01 3.7050E-01 2.5990E-01 2.3950E-01

9.2710E-02 9.9230E-02 6.7730E-02 7.9360E-02 2.1190E-01 1.5680E-01 1.9590E-01

1.1930E-01 1.2220E-01 1.6200E-01 8.1110E-02 6.7720E-02 1.3900E-01 1.4730E-01

1.1490E-01 1.0020E-01 1.1970E-01 6.4110E-02 4.7800E-02 7.4910E-01 8.0370E+00

3.9920E+00 7.2600E+00 6.9430E-01 9.4230E-02 6.6960E-01 1.1950E+01 6.7460E+00

1.4310E+00 1.0210E-01 6.8610E-01 4.3690E+00 2.2880E+00 1.2340E-01 4.5250E-01

3.3570E-01 1.4570E-01 6.3430E-02 5.6910E-01 8.4560E-01 2.0360E-01 1.0620E-01

3.0610E-01 1.2240E-01 4.5300E-02 4.1720E-02 3.2830E-02 3.7240E-02 4.0960E-02

2.7050E-02 1.6060E-02 5.5540E-03 9.9990E-03 1.0690E-02 5.8670E-03 1.6220E-02

2.4310E-02 2.4780E-02 2.0290E-02 6.1240E-03 9.1840E-03 7.8400E-03 9.5450E-03

1.0040E-02 2.4990E-02 1.5950E-02 2.5370E-02 1.1060E-02 1.6450E-02 1.1290E-02

8.3620E-03 9.8510E-03 1.2200E-02 1.0660E-02 4.7840E-03 4.5630E-03 1.0170E-02

9.8940E-03 5.9410E-03 1.0880E-02 1.6740E-02 1.8670E-02 1.3620E-02 1.0530E-02

2.2720E-02 1.9660E-02 1.5040E-02 3.8480E-03 1.2990E-02 1.5140E-02 9.3750E-03

7.1060E-03 1.4660E-02 1.4650E-02 1.3910E-02 1.3920E-02 1.4240E-02 6.6560E-03

1.2350E-02 1.0800E-02 7.6620E-03 6.5460E-03 1.0630E-02 1.2610E-02 8.3870E-03

6.3510E-03 6.1510E-03 4.6030E-03 3.3400E-03 2.9520E-03 4.3880E-03 3.7350E-03

3.4890E-03 3.8950E-03 1.6180E-02 7.0270E-03 4.2930E-03 1.8880E-03 7.4630E-03

6.4060E-03 3.8360E-03 2.7710E-03 7.1950E-03 6.6520E-03 5.4350E-03 5.6030E-03

2.6960E+00 2.3540E-01 6.5930E-01 8.3010E-01 7.6910E-01 1.3850E-01 6.6030E-01

2.7280E+00 1.7100E+00 1.6190E-01 2.8980E-01 1.2920E-01 3.8120E-02 8.1910E-02

5.3020E-02 1.1660E-02 1.0320E-01 1.3650E-01 1.7820E-01 5.4200E-02 8.2120E-02

1.0870E-01 7.9880E-02 2.2570E-02 7.2110E-02 1.0850E-01 1.1530E-01 5.9370E-02

6.9970E-02 5.5550E-02 3.7910E-02 2.6770E-01 9.7140E-01 7.0110E+00 1.0800E+00

4.5650E+00 3.7400E-02 8.3750E-02 4.7960E-01 6.7400E+00 5.3840E+00 1.2660E+00

5.8560E-02 1.5010E+00 3.3360E+00 2.0340E-02 1.7630E-01 2.8560E-01 2.1090E-01

1.1390E-02 9.5870E-02 4.9890E-01 4.9460E-01 2.8980E-02 1.4760E-01 1.7980E-01

1.6350E-02 3.6220E-02 3.0050E-02 2.2110E-02 2.5470E-02 2.0790E-02 9.7920E-03

3.7030E-03 5.1700E-03 7.2850E-03 5.2510E-03 5.8440E-03 1.3860E-02 1.8550E-02

1.8820E-02 1.6410E-03 5.7870E-03 6.9070E-03 7.3440E-03 1.3140E-03 1.3070E-02

1.5490E-02 2.1020E-02 3.4670E-03 1.0800E-02 1.0280E-02 6.8830E-03 4.4470E-03

7.5320E-03 8.1650E-03 4.8500E-03 1.5300E-03 4.5360E-03 7.2740E-03 7.0310E-03

4.0180E-03 9.0840E-03 1.3320E-02 1.3520E-02 2.5540E-03 1.1500E-02 1.5840E-02

1.5410E-02 7.6830E-04 4.6290E-03 1.0160E-02 1.2010E-02 1.6460E-03 7.4020E-03

1.1150E-02 1.3350E-02 8.2630E-03 8.4980E-03 6.4460E-03 5.2080E-03 9.4410E-03

6.5770E-03 3.6850E-03 6.8530E-03 6.7500E-03 6.1860E-03 5.5340E-03 2.7430E-03

4.4200E-03 2.7800E-03 1.4210E-03 1.6530E-03 3.2830E-03 3.0400E-03 2.3620E-03

1.0790E-02 4.9860E-03 2.6230E-03 1.1950E-03 4.4120E-03 4.4980E-03 3.0080E-03

1.7350E-03 2.8290E-03 5.5390E-03 4.7340E-03 3.4880E-03 6.5290E-02 2.4800E-01

4.7780E-01 4.5920E-01 5.0560E-02 1.1390E-01 5.9750E-01 1.8560E+00 4.9180E-02

1.9230E-01 4.6840E-02 1.1620E-02 4.6330E-02 2.8310E-02 6.9180E-04 1.8370E-02

9.9460E-02 9.6210E-02 1.6480E-02 5.2820E-02 3.7100E-02 5.6060E-02 4.2380E-03

2.8590E-02 5.4490E-02 7.1860E-02 2.9010E-02 2.5250E-02 4.0290E-02 1.7020E-02

7.3700E-02 3.8090E-01 6.9360E-01 4.5600E+00 1.4220E+00 1.7290E-02 1.7330E-02

5.2760E-02 2.7110E-01 3.0430E+00 3.5940E+00 1.8930E-02 6.4920E-02 2.3640E+00

2.6860E-03 3.1920E-02 1.6200E-01 1.4940E-01 5.1480E-03 6.1600E-03 9.4880E-02

4.4200E-01 7.0190E-03 4.3400E-02 1.2780E-01 3.6810E-03 1.9710E-02 2.1070E-02

7.8930E-03 1.2060E-02 1.1570E-02 4.4030E-03 1.8510E-03 2.1700E-03 3.5990E-03

3.0840E-03 1.6130E-03 6.0120E-03 9.6680E-03 1.1240E-02 2.0040E-04 2.3210E-03

4.5500E-03 3.6160E-03 1.1990E-05 2.2060E-03 1.2870E-02 1.0360E-02 7.2660E-04

4.6580E-03 7.0060E-03 3.3310E-03 1.6160E-03 3.6930E-03 3.9760E-03 3.2100E-03

4.8600E-04 1.4320E-03 3.5070E-03 4.7640E-03 1.1190E-03 4.1050E-03 6.1790E-03

8.5680E-03 3.5880E-04 3.7120E-03 9.2100E-03 9.3680E-03 1.1700E-04 1.0490E-03

4.1830E-03 8.4290E-03 1.6970E-04 2.4100E-03 6.2700E-03 7.9200E-03 3.9250E-03

3.6900E-03 3.9840E-03 1.6240E-03 5.2200E-03 4.5510E-03 1.0630E-03 3.5860E-03

2.2730E-03 3.7580E-03 3.0450E-03 9.0140E-04 2.6000E-03 1.9130E-03 2.6870E-04

3.8020E-04 1.9080E-03 1.9190E-03 9.6190E-04 5.3930E-03 2.5900E-03 1.2210E-03

5.9020E-04 2.0610E-03 2.1370E-03 1.9970E-03 6.3260E-04 7.7440E-04 3.0100E-03

3.1290E-03 1.3820E-03 9.1700E+00 2.4360E+00 7.5350E-01 2.1610E+00 7.3530E-01

1.4260E-01 1.7720E-02 1.2200E+00 3.8280E-01 1.3060E-01 5.7590E-01 1.0900E-01

2.7260E-02 1.0450E+00 4.0510E-01 8.6830E-02 1.1260E-02 1.1080E+00 3.5490E-01

9.4580E-02 1.4720E-02 7.0470E-01 3.3970E-01 9.8620E-02 1.6110E-02 3.8000E-01

2.2060E-01 7.9380E-02 2.2750E-02 8.6930E-01 4.0970E-01 1.4840E-01 4.8510E-02

1.2130E-02 7.7160E-01 3.8830E-01 1.6840E-01 5.9840E-02 1.7120E-02 3.7260E-03

3.2840E-01 1.3080E-01 2.8140E-02 8.0500E+00 3.5360E-01 9.8600E-02 1.9520E-02

4.1490E+00 6.7290E-01 1.0970E-01 2.4760E-02 4.4980E-01 1.6930E-01 2.7910E-02

1.4850E+00 6.3880E-01 2.9840E-01 1.5860E-01 1.0990E-01 4.8500E-02 2.0200E-02

2.2910E-01 3.0870E-01 1.8940E-01 2.9750E-02 3.4310E+00 3.8750E-01 4.6090E-02

6.5470E-03 2.0150E-01 1.0180E-01 2.5070E-02 3.5080E-03 3.0080E-01 2.0050E-01

3.8340E-02 4.0690E-03 1.6930E+00 4.0790E-02 8.0360E-03 1.0820E-03 7.6570E-01

2.6790E-02 6.1620E-03 1.5190E-03 8.7140E-01 1.2360E-01 1.5950E-02 2.4330E-03

1.3640E+00 1.6360E-01 2.3380E-02 3.3960E-03 2.8340E+00 3.2330E-01 1.7740E-02

2.4460E-03 6.7520E-01 1.1260E-01 2.4530E-02 3.4340E-03 2.7770E-01 1.0130E-01

2.5820E-02 3.1070E-03 3.1060E-02 1.2840E-02 2.6690E-03 2.5380E-01 3.3590E-02

1.1600E-02 2.3670E-03 5.5770E-02 2.1050E-02 7.2940E-03 1.6490E-03 9.7580E-02

1.7530E-02 4.3570E-03 7.7540E-04 7.4550E-02 2.6180E-02 7.7000E-03 1.2910E-03

2.8610E-02 8.7940E-03 4.9500E-03 8.5770E-04 6.6410E-02 8.6880E-03 2.1120E-03

3.6100E-04 1.6440E-01 3.0130E-02 5.5260E-03 9.2670E-04 8.0470E+00 2.2720E+00

9.0610E-01 8.7310E-01 5.6760E-01 1.4810E-01 6.6400E-01 5.5210E-01 1.8540E-01

2.6490E-01 2.4940E-01 5.8150E-02 2.9360E-01 5.2630E-01 4.3920E-01 1.0270E-01

3.3660E-01 6.1670E-01 3.0920E-01 1.0350E-01 2.5690E-01 3.9400E-01 2.9550E-01

1.1200E-01 2.0130E-01 2.2750E-01 1.3250E-01 5.8750E-02 3.0040E-01 5.1330E-01

3.0530E-01 1.4090E-01 5.4170E-02 2.8390E-01 2.9830E-01 2.6180E-01 1.7370E-01

8.5670E-02 2.8680E-02 1.7460E-01 1.2640E-01 8.7920E-02 1.2430E+00 5.2490E+00

2.3780E-01 8.7060E-02 6.7270E-01 2.5030E+00 6.7210E-01 1.1270E-01 2.6630E-01

1.5410E-01 9.7980E-02 6.3880E-01 7.4970E-01 4.7120E-01 2.0420E-01 7.0230E-02

5.1440E-02 2.1530E-02 1.8320E-01 2.3510E-01 7.6700E-02 1.1040E-01 1.4370E-01

2.4080E+00 4.4060E-01 5.3270E-02 7.0630E-02 1.6220E-01 9.5240E-02 2.9280E-02

1.1180E-01 3.6310E-01 2.1400E-01 4.5830E-02 2.3070E-01 1.1230E+00 3.1490E-02

7.9040E-03 1.1310E-01 5.0210E-01 2.0830E-02 4.9610E-03 1.2360E-01 5.4080E-01

1.2860E-01 1.7700E-02 7.1900E-02 9.6550E-01 1.7840E-01 2.6960E-02 3.1520E-01

1.8810E+00 3.7140E-01 1.9980E-02 6.9350E-02 4.4910E-01 1.0670E-01 2.8410E-02

7.4820E-02 1.2860E-01 9.2180E-02 3.0570E-02 1.9180E-02 1.0950E-02 7.1300E-03

5.9660E-02 1.5210E-01 1.9140E-02 1.0140E-02 2.1050E-02 2.5930E-02 1.4220E-02

7.4880E-03 2.7170E-02 5.2610E-02 1.2490E-02 3.9490E-03 2.1990E-02 3.5960E-02

2.1130E-02 8.7180E-03 2.2890E-02 6.3700E-03 2.4470E-03 2.8420E-03 1.5550E-02

3.8360E-02 6.2000E-03 1.9560E-03 3.0040E-02 9.6360E-02 2.8380E-02 6.0360E-03

6.1360E+00 2.9490E-01 7.0180E-01 5.1170E-01 3.7610E-01 3.5670E-01 4.4440E-01

2.5690E-01 1.1300E-01 1.9890E-01 1.1690E-01 2.0420E-02 3.3450E-01 3.2730E-01

3.6840E-01 8.7000E-02 2.9450E-01 4.3390E-01 2.4620E-01 6.2110E-02 2.4140E-01

2.7560E-01 2.5000E-01 1.0360E-01 1.6460E-01 1.4790E-01 7.8020E-02 1.0320E-01

2.4940E-01 3.3030E-01 2.3550E-01 1.0150E-01 6.2040E-02 2.0240E-01 1.9390E-01

1.6930E-01 1.3700E-01 7.9610E-02 7.7700E-02 1.1200E-01 1.0140E-01 2.0330E-01

1.3350E+00 3.4230E+00 1.5150E-01 1.0970E-01 6.7200E-01 1.6760E+00 5.1430E-01

1.3560E-01 1.5240E-01 1.0120E-01 2.9840E-01 4.7120E-01 4.5700E-01 3.2140E-01

4.4080E-02 4.0610E-02 2.1650E-02 1.3750E-01 1.3580E-01 1.0360E-01 7.7300E-02

2.3640E-02 1.3460E-01 1.9230E+00 3.4520E-01 1.0410E-02 6.5290E-02 1.1120E-01

8.1190E-02 3.5910E-03 1.2490E-01 2.4540E-01 1.7730E-01 2.4800E-02 2.6880E-01

7.3040E-01 2.1000E-02 1.5180E-02 1.2650E-01 3.2480E-01 1.3550E-02 1.5950E-02

1.2860E-01 3.6480E-01 9.8710E-02 1.3070E-02 6.4650E-02 7.1300E-01 1.4130E-01

1.7710E-02 3.7120E-01 1.2690E+00 2.8030E-01 1.6020E-02 5.5050E-02 3.3110E-01

8.7990E-02 1.0730E-02 6.8770E-02 8.5460E-02 7.9630E-02 1.0300E-02 1.0670E-02

6.9700E-03 1.8400E-02 4.9160E-02 1.0150E-01 1.1620E-02 7.2940E-03 1.4220E-02

1.8500E-02 1.1450E-02 7.8790E-03 2.2600E-02 3.3540E-02 8.1050E-03 5.2870E-03

1.7340E-02 2.5070E-02 1.8160E-02 1.7170E-02 3.6460E-03 2.9770E-03 2.1370E-03

3.9660E-03 1.3890E-02 2.4660E-02 4.0420E-03 5.5260E-03 2.8370E-02 6.4760E-02

2.2040E-02 5.9960E-02 3.1910E-01 5.3130E-01 3.3710E-01 1.8380E-01 2.7040E-01

2.5260E-01 4.5850E-02 1.0920E-01 1.2960E-01 2.7120E-03 2.1610E-02 2.6170E-01

4.2300E-01 1.4110E-02 1.0140E-01 2.4490E-01 3.5800E-01 6.9450E-03 7.2010E-02

2.0170E-01 2.6830E-01 4.4170E-02 1.0110E-01 1.1380E-01 7.7270E-02 2.8270E-02

1.0620E-01 1.7750E-01 2.1330E-01 1.4920E-01 8.9760E-03 5.4960E-02 1.3100E-01

1.5770E-01 1.3290E-01 7.3980E-02 2.5690E-02 8.4350E-02 8.3560E-02 4.7740E-02

2.2020E-01 1.0130E+00 2.0900E+00 2.4760E-02 1.1270E-01 5.1430E-01 1.3290E+00

5.5590E-02 1.2850E-01 7.4740E-02 1.5860E-01 2.0420E-01 3.2140E-01 3.4770E-01

2.5990E-02 2.5930E-02 1.7770E-02 9.1620E-02 5.9250E-02 1.2300E-01 2.8890E-02

3.1490E-03 2.5750E-02 1.0660E-01 1.4830E+00 5.4140E-04 1.1880E-02 5.2830E-02

1.1340E-01 2.5820E-04 3.9650E-03 9.5760E-02 2.6740E-01 3.4430E-03 3.0070E-02

2.0510E-01 4.5770E-01 3.3630E-03 1.6730E-02 9.6390E-02 2.0450E-01 2.4320E-03

1.7690E-02 9.8700E-02 2.8670E-01 1.5490E-03 1.4420E-02 5.1770E-02 5.5350E-01

2.4380E-03 1.9970E-02 2.8730E-01 9.9220E-01 1.2800E-03 1.8310E-02 4.5840E-02

2.6150E-01 8.9200E-05 1.2660E-02 5.5980E-02 9.4340E-02 4.6560E-03 9.0160E-03

4.9610E-03 5.6100E-03 1.8190E-02 3.6490E-02 6.0210E-02 1.6490E-03 7.4880E-03

1.1440E-02 1.3770E-02 2.0300E-03 8.2530E-03 1.6980E-02 2.0820E-02 5.3640E-04

5.8900E-03 1.4390E-02 2.3050E-02 1.1440E-02 1.6220E-03 3.2480E-03 9.7220E-04

9.7020E-04 4.2440E-03 1.0470E-02 1.5350E-02 9.2520E-04 6.0370E-03 2.2050E-02

5.1420E-02 2.2100E+00 7.9900E-01 3.6760E-01 9.2640E-01 4.3820E-01 6.9300E-02

3.1280E-01 1.3150E-01 3.0530E-02 5.9080E-01 3.0920E-01 1.3810E-01 3.7410E-02

4.1070E-01 2.2000E-01 1.0950E-01 5.1350E-02 5.1220E-01 2.8170E-01 1.2900E-01

4.9190E-02 4.0740E-01 2.8480E-01 1.6370E-01 6.6560E-02 3.0850E+00 1.5380E+00

5.0310E-01 1.4380E-01 3.9810E-02 4.8060E+00 1.6680E+00 5.1980E-01 1.5300E-01

4.9000E-02 1.6580E-02 2.1630E+00 3.3110E-01 4.8630E-02 1.7800E+01 3.2510E+00

1.4060E-01 2.6050E-02 2.7280E+01 3.7900E+00 4.5950E-01 1.5090E-01 1.0950E+01

1.1600E-01 3.3270E-02 1.4570E-01 8.4290E-02 4.4970E-02 2.0340E-02 6.4300E-02

3.6340E-02 1.3870E-02 8.5640E-03 1.8600E-02 7.3070E-03 3.3410E-03 1.5050E-01

7.4990E-02 3.1840E-02 8.8520E-03 1.2370E-02 7.4560E-03 3.6730E-03 1.3200E-03

3.3240E-02 1.8790E-02 8.9090E-03 2.6020E-03 1.7290E-01 3.8910E-02 5.3560E-03

1.0930E-03 1.9150E-01 4.7910E-02 1.0380E-02 3.3490E-03 3.0250E-02 1.2790E-02

5.0100E-03 1.4430E-03 5.8420E-02 2.9540E-02 1.2860E-02 4.0210E-03 1.8790E-01

4.7470E-02 1.3540E-02 3.1850E-03 2.9680E-02 1.3380E-02 5.1480E-03 1.2800E-03

2.4280E-02 1.0940E-02 4.6240E-03 1.5380E-03 1.0160E-01 2.1350E-02 1.1510E-02

3.2860E-02 1.8810E-02 7.9960E-03 2.2740E-03 1.2960E-02 7.9660E-03 4.9700E-03

2.9730E-03 3.9760E-02 2.7670E-02 1.3480E-02 4.4760E-03 4.6880E-03 3.2280E-03

1.9380E-03 9.2950E-04 2.0430E-02 8.0480E-03 2.5200E-03 1.3110E-03 4.3130E-03

3.2470E-03 1.8430E-03 7.6310E-04 4.8520E-03 2.2160E-03 1.0690E-03 4.4340E-04

1.7570E+00 3.5780E-01 5.4350E-01 2.6210E-01 2.7000E-01 1.7370E-01 1.0900E-01

7.4140E-02 2.0770E-01 2.4960E-01 1.9940E-01 1.5590E-01 1.8800E-01 1.8390E-01

1.4200E-01 8.3870E-02 1.9840E-01 2.4830E-01 1.9060E-01 1.2690E-01 2.3680E-01

2.8960E-01 1.5150E-01 7.5750E-02 7.7310E-01 1.6940E+00 1.2540E+00 5.8450E-01

1.5620E-01 2.5480E-01 2.4240E+00 1.6860E+00 7.4970E-01 2.4160E-01 5.7260E-02

5.4630E-01 1.1150E+00 2.4680E-01 3.2510E+00 8.8370E+00 3.6880E+00 1.3560E-01

6.2330E-01 1.8140E+01 4.3970E+00 4.3950E-01 2.5970E+00 5.6760E+00 6.0980E-02

7.3990E-02 6.4280E-02 4.7700E-02 3.5500E-02 4.3200E-02 2.6240E-02 1.6640E-02

6.4240E-03 9.9330E-03 9.0380E-03 2.9600E-03 5.5080E-02 6.1370E-02 4.8350E-02

3.4810E-02 5.5700E-03 4.5730E-03 4.6490E-03 3.8230E-03 1.2570E-02 1.3120E-02

1.1960E-02 1.0000E-02 3.9010E-02 8.2240E-02 3.7790E-02 4.9790E-03 4.7990E-02

9.1520E-02 4.2560E-02 7.3460E-03 1.0210E-02 1.3480E-02 8.3670E-03 5.0660E-03

2.1890E-02 2.3920E-02 1.9290E-02 1.3540E-02 2.8340E-02 1.0740E-01 3.9210E-02

1.4660E-02 9.2490E-03 1.2660E-02 9.4130E-03 5.8000E-03 6.5840E-03 1.1480E-02

8.0560E-03 4.9340E-03 3.9610E-02 5.3730E-02 7.4240E-03 1.8800E-02 1.1550E-02

9.8260E-03 6.2300E-03 7.0900E-03 6.7250E-03 4.8950E-03 2.9440E-03 2.7670E-02

1.3780E-02 1.3280E-02 9.3080E-03 2.7350E-03 1.9560E-03 1.6980E-03 1.6670E-03

1.5320E-02 3.7960E-03 4.2040E-03 9.0930E-04 3.2470E-03 1.8330E-03 1.5560E-03

9.8930E-04 1.8580E-03 2.2170E-03 1.4150E-03 8.9780E-04 1.0250E+00 2.3720E-01

2.9330E-01 1.8730E-01 7.9550E-02 9.6780E-02 6.1580E-02 5.3050E-02 1.2230E-01

1.9020E-01 1.7640E-01 7.8240E-02 1.1730E-01 1.1090E-01 9.2880E-02 6.6200E-02

1.3010E-01 1.7000E-01 1.5030E-01 1.4200E-01 1.5150E-01 1.5950E-01 6.2350E-02

1.5400E-01 8.0260E-01 9.0230E-01 7.7250E-01 4.5530E-01 6.7460E-02 1.6250E-01

1.1460E+00 1.2310E+00 7.3450E-01 2.6010E-01 9.8350E-02 5.6410E-01 6.0130E-01

1.4040E-01 3.6890E+00 4.1800E+00 2.5900E+00 1.9530E-01 5.0690E-01 1.1650E+01

3.2840E+00 3.6930E-01 2.9130E+00 2.2530E+00 3.3150E-02 3.9880E-02 4.4150E-02

3.0450E-02 2.4850E-02 2.0770E-02 1.1650E-02 4.2820E-03 5.4750E-03 5.6910E-03

3.4570E-03 1.4910E-02 3.3320E-02 4.4830E-02 4.0020E-02 1.5660E-03 3.4720E-03

3.3800E-03 3.9920E-03 3.0430E-03 7.5470E-03 1.0170E-02 1.1010E-02 5.3550E-03

3.7780E-02 4.0600E-02 2.5450E-02 1.0390E-02 4.2560E-02 4.5670E-02 2.7730E-02

3.1780E-03 6.1600E-03 9.2840E-03 6.1310E-03 6.1920E-03 1.3530E-02 1.7010E-02

1.5690E-02 7.7380E-03 1.8120E-02 7.0650E-02 2.9580E-02 2.1670E-03 6.0570E-03

8.7340E-03 7.7870E-03 1.7940E-03 4.1640E-03 7.9560E-03 6.7870E-03 1.8270E-02

2.9240E-02 1.9710E-02 7.9960E-03 9.8250E-03 8.4170E-03 4.7330E-03 3.9200E-03

4.1120E-03 3.6860E-03 2.7160E-03 1.3480E-02 1.3280E-02 1.0290E-02 5.6350E-03

1.2090E-03 1.3790E-03 1.5270E-03 1.2350E-03 1.0210E-02 2.0350E-03 2.4100E-03

1.5050E-03 1.8440E-03 1.5560E-03 1.0990E-03 5.8490E-04 7.5950E-04 1.0440E-03

1.5120E-03 9.3780E-04 7.0850E-02 2.1150E-01 7.7130E-02 2.7260E-02 5.9500E-02

3.2010E-02 7.1560E-04 5.7940E-02 8.8990E-02 1.2300E-01 2.8380E-02 4.8470E-02

6.5630E-02 5.7180E-02 1.3790E-02 5.4470E-02 8.4330E-02 1.0480E-01 6.6380E-02

7.5740E-02 6.2350E-02 5.6890E-02 4.1730E-02 1.1760E-01 4.6530E-01 5.5690E-01

3.5900E-01 1.9970E-02 4.1860E-02 8.5550E-02 4.4210E-01 6.9100E-01 5.1540E-01

1.8050E-02 1.1000E-01 4.9710E-01 2.6040E-02 1.3550E-01 2.5900E+00 2.5400E+00

8.9600E-02 9.1250E-02 3.0660E-01 7.2690E+00 2.8030E-02 4.9640E-01 2.2200E+00

1.0820E-02 2.2470E-02 2.1360E-02 1.9160E-02 1.0930E-02 1.2160E-02 5.5410E-03

2.1410E-03 2.5440E-03 2.3380E-03 2.4270E-03 1.3040E-03 1.5180E-02 2.2840E-02

2.7210E-02 2.3560E-04 1.4220E-03 2.4000E-03 2.1480E-03 1.6960E-05 3.3060E-03

5.6300E-03 6.9300E-03 1.0930E-03 4.9790E-03 2.5450E-02 2.3140E-02 3.3490E-03

7.3460E-03 2.7720E-02 2.4930E-02 5.5550E-04 2.9230E-03 3.8580E-03 5.0390E-03

8.5550E-04 5.8300E-03 9.0920E-03 1.0410E-02 1.0260E-03 7.6450E-03 1.1690E-02

4.2870E-02 1.3880E-04 2.2800E-03 4.1990E-03 5.7540E-03 2.5900E-04 1.6440E-03

2.8870E-03 5.5590E-03 8.5240E-03 7.7110E-03 1.7350E-02 2.2740E-03 6.2300E-03

4.7330E-03 2.2380E-03 1.8030E-03 1.8210E-03 1.9160E-03 1.6790E-03 4.4760E-03

9.3080E-03 5.6350E-03 1.9290E-03 3.4310E-04 8.9040E-04 8.0010E-04 6.4470E-04

5.1060E-03 9.7670E-04 7.9510E-04 1.1960E-03 7.6310E-04 9.8930E-04 5.8490E-04

2.0490E-04 2.2610E-04 5.4930E-04 5.8810E-04 7.4020E-04 1.3450E+00 4.9960E-01

3.6350E+00 2.4480E-01 8.5450E-02 6.8420E-02 3.8050E-02 2.0450E-02 1.0910E-02

4.7500E-01 2.4360E-01 1.1510E-01 5.0540E-02 1.4110E-01 1.0090E-01 5.9890E-02

3.0320E-02 7.1970E-01 4.8870E-01 2.5110E-01 8.8230E-02 4.9220E-01 3.7450E-01

2.1520E-01 1.0670E-01 4.1420E-02 4.2310E-01 3.2450E-01 2.1330E-01 1.2000E-01

5.6100E-02 1.9600E-02 3.4950E-01 2.1450E-01 7.1520E-02 2.7910E+00 8.6510E-01

2.5820E-01 8.6500E-02 1.0380E+00 7.8600E-01 4.3080E-01 1.6390E-01 5.3970E+00

2.3590E+00 5.2940E-02 3.9750E-01 1.8000E-01 7.3780E-02 2.7350E-02 3.4530E-01

2.0330E-01 1.1650E-01 4.1890E-01 4.6250E-01 2.3470E-01 4.7990E-02 3.6890E-01

1.6030E-01 6.0270E-02 1.8800E-02 6.3860E-02 3.4720E-02 1.6890E-02 6.7390E-03

7.0610E-02 3.3630E-02 1.3530E-02 3.8570E-03 6.4360E-01 1.7240E-01 3.2560E-02

5.5400E-03 1.4240E+00 3.3940E-01 4.9500E-02 5.6710E-03 6.9580E-02 3.1230E-02

1.2320E-02 4.0370E-03 1.1860E-01 5.6000E-02 2.3510E-02 8.3710E-03 3.4970E-02

2.2640E-02 1.2810E-02 6.1780E-03 1.0400E-02 6.3920E-03 4.2110E-03 2.8410E-03

8.6020E-03 4.3700E-03 1.9690E-03 7.2330E-04 1.3290E+00 5.7910E-01 1.4550E-02

7.1030E-01 1.8930E-01 3.9280E-02 9.5890E-03 1.2620E-01 1.0080E-01 5.9390E-02

2.6190E-02 8.6550E-01 2.3370E-01 5.8140E-02 2.0020E-02 1.9860E-01 8.6910E-02

3.4030E-02 1.1130E-02 3.1600E-01 1.5960E-01 8.2710E-02 1.5560E-02 2.4900E-01

9.3680E-02 4.4190E-02 2.1820E-02 6.6110E-02 2.9650E-02 1.1350E-02 3.3240E-03

6.7140E-01 2.4470E-01 2.2750E+00 1.2460E-01 1.4500E-02 3.0250E-02 2.8130E-02

1.9340E-02 1.1150E-01 2.1500E-01 1.7290E-01 9.8480E-02 6.4960E-02 5.2550E-02

5.4820E-02 5.5030E-02 3.8480E-01 2.9610E-01 2.5580E-01 1.5790E-01 2.1680E-01

2.0130E-01 1.8840E-01 1.5540E-01 8.7020E-02 2.3100E-01 1.1030E-01 1.0880E-01

1.2830E-01 1.2020E-01 7.1350E-02 1.8260E-01 8.2220E-02 1.5770E-01 2.9880E-01

1.3960E+00 7.7470E-01 1.9810E-01 6.3030E-01 2.0740E-01 3.3690E-01 4.3750E-01

2.3590E+00 7.2610E-01 2.1210E+00 7.2010E-02 1.6760E-01 1.3590E-01 7.6330E-02

2.0330E-01 1.9080E-01 4.9610E-02 2.7920E-01 2.3440E-01 1.0190E-01 1.8130E-01

3.1870E-02 1.5940E-01 1.3880E-01 7.5380E-02 1.2660E-02 2.4560E-02 2.4690E-02

1.9540E-02 4.2040E-03 2.9300E-02 2.9250E-02 1.8300E-02 2.9950E-02 3.2720E-01

1.7740E-01 3.9010E-02 2.4170E-02 7.3890E-01 3.8170E-01 6.8100E-02 1.2450E-02

2.8260E-02 2.3540E-02 1.3810E-02 1.6770E-02 4.9060E-02 4.4210E-02 2.7640E-02

1.5890E-02 1.2540E-02 1.2160E-02 1.0410E-02 3.6170E-03 5.4370E-03 4.3560E-03

2.5330E-03 1.2420E-03 3.4530E-03 3.3740E-03 2.3740E-03 5.7910E-01 1.8450E-01

5.1890E-01 3.5360E-02 3.6250E-01 1.9300E-01 3.9900E-02 8.3730E-02 2.9020E-02

4.2320E-02 5.3180E-02 4.7200E-02 4.5950E-01 2.3590E-01 4.2360E-02 1.6020E-02

8.7870E-02 7.5440E-02 3.9770E-02 2.1070E-01 8.2700E-02 3.1120E-02 5.8180E-02

4.7840E-02 1.3800E-01 7.1210E-02 1.5470E-02 1.1800E-02 2.6100E-02 2.2200E-02

1.3510E-02 8.5150E-02 1.2460E-01 1.1110E+00 4.4050E-03 7.4370E-03 1.4200E-02

1.9550E-02 3.1650E-02 5.9060E-02 9.9350E-02 1.0680E-01 1.3000E-02 3.5990E-02

3.6950E-02 2.8410E-02 9.4490E-02 2.0010E-01 1.5400E-01 7.5680E-02 4.7480E-02

1.2840E-01 1.2330E-01 8.8060E-02 4.4220E-02 6.2740E-03 1.1630E-01 1.1880E-01

8.2370E-02 4.3750E-02 1.6940E-02 3.2800E-02 1.2700E-01 5.2070E-02 1.0850E-01

1.4100E-01 5.6810E-01 5.1540E-01 5.9070E-02 3.8850E-01 2.6880E-01 8.9330E-02

5.2910E-02 2.1210E+00 4.2880E-01 1.3990E-02 4.0320E-02 8.1020E-02 8.9970E-02

1.1650E-01 4.9610E-02 5.4580E-02 1.3960E-01 4.7970E-02 1.7730E-01 4.0410E-02

4.6970E-03 1.8220E-02 7.1210E-02 1.0860E-01 1.2630E-03 7.3560E-03 1.3960E-02

1.8150E-02 4.8900E-05 2.5380E-03 1.3340E-02 2.4600E-02 5.7830E-03 1.7810E-02

1.3660E-01 1.3090E-01 6.6560E-03 1.2890E-02 3.0000E-01 2.9080E-01 1.6490E-03

7.4860E-03 1.4360E-02 1.5600E-02 2.2900E-03 9.6610E-03 2.4070E-02 3.2840E-02

3.7890E-03 8.5410E-03 7.8470E-03 5.2600E-03 1.8420E-03 1.4600E-03 2.0630E-03

2.5130E-03 1.2380E-04 7.2150E-04 1.7780E-03 2.5980E-03 1.4550E-02 5.1880E-01

1.0780E-01 1.1810E-02 1.7430E-02 1.4630E-01 1.4200E-01 1.3200E-02 4.8770E-02

3.2260E-02 9.8860E-03 2.7310E-02 1.4920E-02 1.7670E-01 1.7220E-01 3.6040E-03

8.3090E-03 3.7970E-02 5.8560E-02 1.0530E-01 1.5550E-02 5.8180E-02 1.2280E-02

3.0120E-02 1.3530E-02 4.8120E-02 4.4480E-02 9.6720E-04 7.3500E-03 1.3780E-02

1.4710E-02 2.2510E+00 1.6480E-01 3.5790E-01 1.7580E-01 8.6740E-02 3.9930E-02

7.8970E-01 5.7080E-01 4.2550E-01 2.8980E-01 4.2420E-01 2.9780E-01 1.7610E-01

8.2800E-02 8.3340E-01 6.5990E-01 4.7160E-01 1.6360E-01 8.6000E-02 6.1620E-02

3.3770E-02 1.7040E-02 6.9610E-03 1.3540E-01 8.0840E-02 4.5560E-02 2.3910E-02

1.1330E-02 4.2710E-03 7.6060E-02 5.2930E-02 2.4200E-02 5.3750E-01 2.5050E-01

1.1470E-01 4.5830E-02 2.3890E-01 1.5620E-01 9.1800E-02 4.7380E-02 2.5860E-01

1.3100E-01 2.5940E-02 2.8650E-01 1.6650E-01 9.4450E-02 5.0570E-02 3.7480E-01

3.1880E-01 1.9220E-01 5.3100E+00 1.0330E+01 4.5290E+00 2.4730E-01 9.6420E-02

4.8710E-02 2.4110E-02 1.2140E-02 4.4480E-02 2.3410E-02 1.0800E-02 3.8450E-03

6.7530E-02 3.4340E-02 1.5070E-02 4.8470E-03 1.9930E+01 4.7900E+00 6.5660E-01

2.6840E-02 5.2970E-02 3.5450E-02 2.5910E-02 1.4470E-02 3.1060E-02 1.9080E-02

1.2120E-02 7.4460E-03 2.6770E-02 2.0700E-02 1.6990E-02 1.3690E-02 2.6020E-02

1.6300E-02 8.5410E-03 3.5620E-03 9.2530E-03 5.8340E-03 3.5810E-03 2.1190E-03

1.2650E-02 8.4660E-03 4.8730E-03 2.1960E-03 2.6360E-01 1.1530E-01 4.4590E-03

2.8810E-02 1.6230E-02 1.0260E-02 5.3720E-03 2.2750E-02 1.8150E-02 1.3120E-02

8.3520E-03 9.3050E-02 2.8540E-02 1.0270E-02 4.2380E-03 2.0460E-02 9.9160E-03

4.5040E-03 1.9450E-03 5.3910E-02 2.6760E-02 1.5360E-02 3.9550E-03 2.2370E-02

1.1190E-02 6.5490E-03 3.3430E-03 8.9780E-03 5.1750E-03 2.4920E-03 9.2140E-04

1.8860E+00 5.6690E-02 1.5130E-01 1.4420E-01 9.1620E-02 4.2800E-01 4.8510E-01

3.2470E-01 1.5600E-01 1.8250E-01 1.5870E-01 1.6600E-01 1.7290E-01 5.6100E-01

4.5230E-01 3.2220E-01 1.6810E-01 3.2990E-02 4.2090E-02 3.6490E-02 2.5250E-02

1.2420E-02 3.2030E-02 4.7300E-02 4.6320E-02 3.7370E-02 2.5270E-02 1.2520E-02

4.6360E-02 2.2390E-02 3.3220E-02 1.6430E-01 2.3940E-01 1.6000E-01 6.9050E-02

1.1070E-01 9.2430E-02 8.4660E-02 6.8410E-02 1.3070E-01 5.5630E-02 9.0600E-02

1.0370E-01 1.2620E-01 1.0270E-01 6.6580E-02 3.1880E-01 2.1010E-01 6.3110E-02

3.5400E+00 4.5280E+00 1.6580E+00 3.9400E+00 1.8270E-02 4.3160E-02 3.7240E-02

2.2240E-02 7.6530E-03 1.7020E-02 1.7130E-02 1.3220E-02 7.3010E-03 2.6830E-02

2.7480E-02 1.9580E-02 3.8080E-01 1.0330E+01 5.3580E+00 1.0200E+00 2.9950E-02

3.4100E-02 1.7170E-02 4.6030E-03 1.2680E-02 1.5520E-02 1.1660E-02 6.6470E-03

1.5500E-02 1.7180E-02 1.2560E-02 6.8630E-03 1.1090E-02 8.3510E-03 8.7820E-03

8.0610E-03 3.3640E-03 4.1980E-03 3.6670E-03 2.6700E-03 4.8750E-03 4.0480E-03

4.6220E-03 5.2470E-03 1.1500E-01 3.7150E-02 1.0110E-01 1.2370E-02 1.6400E-02

8.9320E-03 2.7900E-03 1.5100E-02 1.0980E-02 8.8490E-03 6.6330E-03 1.0680E-02

4.6550E-02 2.4890E-02 5.6890E-03 3.2680E-03 8.8310E-03 7.7660E-03 4.6960E-03

3.4500E-02 1.5360E-02 6.1580E-03 9.3470E-03 7.8490E-03 1.2410E-02 6.7720E-03

2.0130E-03 3.1970E-03 2.9290E-03 2.9950E-03 2.5840E-03 1.3500E-02 3.0140E-02

6.8480E-02 1.0750E-01 2.5060E-01 1.5190E-01 1.4470E-01 1.3850E-01 2.8280E-02

1.0330E-01 1.1170E-01 9.0010E-02 1.8790E-01 2.3230E-01 1.7850E-01 9.5860E-02

9.3710E-03 1.6550E-02 1.9930E-02 1.7760E-02 1.0290E-02 4.4940E-03 1.5430E-02

2.2950E-02 2.5000E-02 2.0580E-02 1.1570E-02 1.3750E-02 2.6800E-02 1.0700E-02

5.6790E-02 7.9530E-02 1.0500E-01 7.5030E-02 3.1930E-02 5.6720E-02 5.2510E-02

3.6840E-02 2.5890E-02 9.0450E-02 2.2100E-02 3.6960E-02 4.9570E-02 5.9300E-02

5.3900E-02 1.9210E-01 6.3110E-02 3.8240E-02 1.7700E+00 2.4720E-01 3.9300E+00

8.8990E-01 6.2400E-03 8.8850E-03 1.9250E-02 2.6070E-02 3.9480E-04 4.5880E-03

9.5850E-03 1.2950E-02 1.0540E-04 4.4020E-03 1.3670E-02 2.2420E-02 4.7690E-03

2.7450E-01 4.2100E+00 4.0930E+00 2.0160E-02 7.5700E-03 8.5180E-03 6.7020E-03

6.0290E-03 5.2390E-03 6.1290E-03 5.8230E-03 9.8350E-03 5.5410E-03 5.1860E-03

5.4880E-03 1.7760E-03 6.4410E-03 5.9970E-03 3.9240E-03 1.1790E-03 1.6200E-03

1.9990E-03 2.0730E-03 4.0720E-04 2.8620E-03 3.3180E-03 2.8070E-03 4.4560E-03

1.0110E-01 2.1000E-02 7.3580E-03 3.8070E-03 5.0910E-03 4.0040E-03 6.7040E-03

6.4960E-03 4.7550E-03 2.8360E-03 5.7120E-03 3.7430E-03 1.7910E-02 1.6720E-02

7.8500E-04 1.7160E-03 4.1030E-03 5.6330E-03 1.7190E-02 3.9530E-03 9.3470E-03

2.0040E-03 4.5650E-03 2.4900E-03 4.0950E-03 3.3460E-03 3.7240E-04 1.9330E-03

2.0380E-03 1.5100E-03 6.2750E+00 3.6470E-01 3.7570E-02 1.1160E+00 3.9620E-01

8.2790E-02 8.3980E-03 2.1770E+00 7.7260E-01 2.7210E-01 2.5970E-02 2.2360E-01

3.5480E-01 6.8360E-02 6.4490E-03 1.8410E-01 1.0400E-01 4.0080E-02 1.1540E-02

1.5270E-03 2.6300E-01 1.3060E-01 5.4900E-02 1.8230E-02 4.3990E-03 5.3750E-04

2.6180E-01 7.3410E-02 9.6140E-03 4.1610E-01 1.1370E-01 2.8130E-02 4.9260E-03

4.2820E-01 1.4250E-01 3.5390E-02 6.3950E-03 1.1010E-01 4.5570E-02 5.7610E-03

1.7800E+00 4.9490E-01 2.1610E-01 4.1450E-02 2.3090E-01 3.7490E-02 5.9040E-03

1.5500E-02 3.1930E-02 1.8810E-02 1.8490E-03 1.5470E+01 9.1710E-01 1.9430E-02

2.2420E-03 2.6460E+01 2.3090E+00 8.6650E-02 1.2860E-03 3.4460E+01 3.0080E+00

1.2850E-01 3.6660E-03 1.9100E-02 4.7870E-03 9.5900E-04 1.2170E-04 4.0090E-02

9.6130E-03 7.5190E-04 8.1810E-05 4.9240E-02 1.6780E-02 3.5250E-03 1.8100E-04

6.2900E+00 2.5540E-01 5.9820E-03 6.3340E-04 1.3330E-01 4.2550E-02 9.7510E-03

1.2190E-03 6.8580E-01 8.2650E-02 1.7330E-02 2.9520E-03 2.1040E+00 2.0440E-01

2.3500E-02 3.3300E-03 9.2370E-03 8.1820E-04 4.2020E-05 2.0370E-02 5.6150E-03

7.8770E-04 5.6290E-05 2.8190E-02 7.0600E-03 1.2750E-03 1.5270E-04 4.4200E-02

7.8420E-03 8.4910E-04 2.0500E-04 1.4250E-01 1.8470E-02 2.3380E-03 2.5110E-04

5.7660E-03 4.6400E-03 2.2050E-03 4.8420E-04 2.2910E-02 3.8730E-03 1.0050E-03

2.2110E-05 4.4770E-02 9.9370E-03 1.5960E-03 1.6560E-04 1.1270E+01 4.7230E-01

4.8000E-01 5.8530E-01 3.4460E-01 8.9840E-02 7.4960E-01 1.7440E+00 1.2290E+00

3.0620E-01 2.4650E-01 4.6880E-01 2.5900E-01 6.7320E-02 1.0560E-01 1.0670E-01

6.6130E-02 3.5770E-02 1.6010E-02 1.1780E-01 1.0670E-01 8.7670E-02 5.5680E-02

2.6660E-02 8.6350E-03 1.3740E-01 1.0920E-01 4.9090E-02 1.8890E-01 1.9100E-01

7.7910E-02 2.4530E-02 1.8120E-01 1.9450E-01 1.1320E-01 3.6150E-02 7.5990E-02

3.6600E-02 2.6000E-02 6.7330E-01 1.1470E+00 7.1300E-01 2.1850E-01 1.2030E-01

9.4900E-02 2.0620E-02 1.3280E-02 2.5710E-02 8.4270E-03 1.0940E-02 1.7320E+00

1.1090E+01 1.1330E+00 2.1530E-02 2.2820E+00 2.1560E+01 2.8560E+00 1.0220E-01

3.3110E-01 2.9760E+01 3.8290E+00 1.4980E-01 8.2730E-03 8.7190E-03 3.4990E-03

9.0140E-04 1.7000E-02 1.6770E-02 8.8150E-03 7.2450E-04 2.1200E-02 2.0960E-02

1.3570E-02 4.0220E-03 5.4280E-01 4.7480E+00 3.1430E-01 6.7330E-03 5.4740E-02

6.0680E-02 3.4250E-02 1.0450E-02 1.1220E-01 4.6920E-01 7.6340E-02 1.8520E-02

2.0290E-01 1.5550E+00 2.2950E-01 2.5830E-02 4.3530E-03 3.8150E-03 4.9050E-04

9.2770E-03 8.3840E-03 4.5520E-03 7.9950E-04 9.7780E-03 1.4040E-02 6.2480E-03

1.3740E-03 1.6400E-02 2.1380E-02 7.0690E-03 6.6700E-04 2.3740E-02 9.2160E-02

1.9390E-02 2.6070E-03 4.9420E-03 3.3980E-03 1.7150E-03 1.1810E-03 8.3370E-03

1.2170E-02 2.2450E-03 1.0900E-03 1.4340E-02 2.3180E-02 9.0880E-03 1.7440E-03

1.1840E+01 1.5710E-01 4.4550E-01 4.0800E-01 2.8800E-01 2.0560E-01 1.1370E+00

1.5380E+00 1.0600E+00 1.4240E-01 4.1310E-01 3.0780E-01 1.8280E-01 4.7330E-02

7.3450E-02 7.8320E-02 5.6300E-02 2.6780E-02 3.6820E-02 8.2020E-02 7.7050E-02

6.3970E-02 4.8630E-02 2.6980E-02 6.2240E-02 1.0190E-01 8.2240E-02 7.7710E-02

1.4240E-01 1.2740E-01 5.3170E-02 6.3410E-02 1.4590E-01 1.3540E-01 9.3880E-02

4.5420E-02 4.0870E-02 2.9000E-02 2.4530E-01 7.1570E-01 1.2280E+00 5.8760E-01

5.7360E-02 9.1580E-02 4.7820E-02 1.1070E-02 1.6690E-02 1.1110E-02 9.7650E-03

1.0210E-01 2.1680E+00 8.5420E+00 8.6490E-01 4.4640E-02 2.8440E+00 1.5560E+01

2.2060E+00 9.2000E-03 1.0870E+00 2.5080E+01 2.9510E+00 3.1220E-03 6.5560E-03

5.6990E-03 2.4520E-03 5.3420E-03 1.4880E-02 9.6620E-03 6.2120E-03 6.7320E-03

1.7120E-02 1.4480E-02 1.1470E-02 3.0130E-02 6.7730E-01 3.7300E+00 2.4020E-01

1.7900E-02 4.4620E-02 4.2300E-02 2.8620E-02 2.3640E-02 1.1120E-01 3.6430E-01

6.4610E-02 2.3490E-02 2.2870E-01 1.2440E+00 1.8430E-01 1.7600E-03 3.6520E-03

1.8090E-03 3.3060E-03 7.4420E-03 5.1930E-03 3.2240E-03 2.6960E-03 8.7890E-03

9.6350E-03 5.0810E-03 4.9460E-03 1.5120E-02 1.2950E-02 4.9110E-03 3.7560E-03

2.5280E-02 6.9760E-02 1.5710E-02 4.1190E-03 2.2120E-03 1.8020E-03 1.2200E-03

2.9710E-03 6.7730E-03 8.4860E-03 1.6320E-03 3.6510E-03 1.3360E-02 1.5940E-02

7.3340E-03 3.0280E-02 1.8560E-01 3.9740E-01 4.3980E-01 3.4660E-02 4.0310E-01

1.2140E+00 1.8070E+00 5.2320E-02 2.4650E-01 3.5340E-01 2.3850E-01 1.2600E-02

4.7710E-02 6.4420E-02 6.1210E-02 3.7590E-02 6.1720E-03 3.3070E-02 6.2180E-02

7.1650E-02 5.9940E-02 3.3450E-02 2.0300E-02 7.6850E-02 9.9750E-02 2.5860E-02

8.2090E-02 1.1810E-01 9.2420E-02 1.5730E-02 6.7350E-02 1.2820E-01 1.3830E-01

2.2330E-02 4.6200E-02 2.3700E-02 9.8880E-02 4.1970E-01 8.8220E-01 1.1780E+00

2.4170E-02 6.4220E-02 6.8900E-02 8.8550E-03 8.3070E-03 1.6750E-02 4.9950E-03

4.9760E-03 1.2190E-01 1.7400E+00 9.0960E+00 1.2860E-03 1.0220E-01 2.1990E+00

1.4270E+01 1.5420E-03 2.4700E-02 1.6700E+00 2.2650E+01 8.9480E-04 3.4770E-03

5.5280E-03 4.3660E-03 1.1040E-03 6.3750E-03 1.2530E-02 8.8630E-03 1.0820E-03

7.7490E-03 1.5370E-02 1.5630E-02 1.3430E-03 3.5990E-02 5.2380E-01 3.1790E+00

3.7600E-03 1.9890E-02 3.9510E-02 4.3570E-02 4.4040E-03 2.5840E-02 9.3330E-02

3.2880E-01 3.3300E-03 2.5820E-02 1.8510E-01 1.1310E+00 5.3210E-04 2.2950E-03

2.9470E-03 7.9320E-04 3.8360E-03 6.3410E-03 4.3540E-03 5.0430E-04 3.0500E-03

7.5470E-03 9.8620E-03 1.2040E-03 5.7220E-03 1.2510E-02 1.0900E-02 4.4960E-04

4.2830E-03 2.0730E-02 6.6600E-02 3.2950E-03 1.2770E-03 1.9460E-03 9.5140E-04

7.4350E-04 3.4160E-03 5.7410E-03 5.9940E-03 6.1850E-04 4.1790E-03 1.1360E-02

1.6090E-02 5.7340E+00 2.3050E-01 4.3650E-02 1.1520E+00 5.7990E-01 1.8340E-01

3.5360E-02 1.3720E+00 9.7270E-01 2.9210E-01 5.5060E-02 1.1490E-01 6.6630E-02

3.2140E-02 1.5610E-02 6.5980E-03 1.7740E-01 1.2210E-01 8.0100E-02 4.6370E-02

2.2650E-02 8.3540E-03 1.3910E-01 5.5190E-02 1.8030E-02 9.2590E-01 1.6480E-01

4.5490E-02 1.4000E-02 4.4930E-01 1.6410E-01 6.1090E-02 2.0790E-02 2.1410E-01

1.0270E-01 1.8230E-02 1.2160E+00 7.6670E-01 2.5180E-01 8.6380E-02 2.8170E-01

1.1470E-01 4.0650E-02 3.2490E-01 3.8370E-01 1.9150E-01 8.7420E-02 9.0180E+00

1.2250E+00 1.1890E-01 1.0200E-02 7.3040E-01 3.8720E-01 9.4560E-02 1.3620E-02

1.0670E+00 3.9350E-01 1.1420E-01 1.1550E-02 1.5200E-01 2.7080E-02 1.8490E-02

9.7760E-03 1.7300E+01 4.4470E-01 4.1370E-03 8.4290E-04 2.2300E+01 2.6220E+00

1.1000E-01 1.0250E-03 2.4950E+01 2.5390E+00 1.5060E-01 5.4690E-03 6.7130E-01

1.0080E-01 1.0130E-02 1.2500E-03 4.9700E-01 6.8970E-02 1.0910E-02 1.8620E-03

6.2260E-02 2.9640E-02 1.0790E-02 2.1520E-03 4.3570E-02 1.1490E-02 1.7740E-03

7.7660E-01 5.1180E-02 6.4740E-03 1.6570E-03 3.9100E-01 6.6590E-02 9.9240E-03

1.9950E-03 4.4850E-02 1.8150E-02 5.2500E-03 1.2090E-03 4.8920E-02 2.0270E-02

6.4840E-03 1.8320E-03 1.3090E-02 7.8430E-03 4.7710E-03 1.9600E-03 1.8350E-02

8.7200E-03 3.6470E-03 1.2520E-03 3.8280E-02 1.5450E-02 4.9280E-03 1.1340E-03

7.3440E+00 2.6480E-01 3.5290E-01 7.4760E-01 5.2540E-01 2.0370E-01 8.7540E-01

1.0260E+00 6.2030E-01 2.5880E-01 5.4970E-02 6.4980E-02 4.5760E-02 2.4700E-02

9.7530E-03 1.0830E-01 8.8250E-02 6.1010E-02 4.7270E-02 3.7990E-02 2.2510E-02

7.3840E-02 6.0530E-02 3.5420E-02 2.5650E-01 5.0770E-01 1.2360E-01 3.2170E-02

1.6410E-01 2.2050E-01 1.1690E-01 5.4920E-02 1.4240E-01 6.6860E-02 5.8700E-02

7.6670E-01 6.8540E-01 5.9960E-01 2.2530E-01 1.7290E-01 1.2190E-01 5.4800E-02

2.5990E-01 2.6060E-01 1.8840E-01 8.1050E-02 6.2440E-01 6.1220E+00 1.4350E+00

1.4360E-01 2.7840E-01 5.4370E-01 3.6460E-01 1.1020E-01 2.0550E-01 1.2230E+00

6.7680E-01 1.3690E-01 4.2030E-02 1.0210E-01 1.5320E-02 6.5450E-03 2.3900E+00

1.1320E+01 4.9260E-01 3.2380E-03 2.6170E+00 1.4130E+01 3.1350E+00 1.3890E-01

8.2140E-01 1.8070E+01 3.1710E+00 1.8870E-01 1.0050E-01 4.0770E-01 1.0740E-01

1.1570E-02 3.2800E-02 3.6010E-01 7.4440E-02 1.2320E-02 2.4260E-02 2.5580E-02

2.1950E-02 1.2090E-02 2.2210E-02 1.6540E-02 6.7150E-03 1.3620E-01 4.7900E-01

4.7840E-02 5.1220E-03 6.6500E-02 2.3070E-01 6.7720E-02 1.0450E-02 2.1720E-02

1.7170E-02 1.2310E-02 4.3660E-03 1.7370E-02 2.2970E-02 1.6560E-02 6.6590E-03

1.0470E-02 5.9450E-03 3.5770E-03 2.1340E-03 1.0040E-02 7.9560E-03 5.1980E-03

2.3730E-03 1.5190E-02 1.6640E-02 1.1320E-02 5.0400E-03 5.5200E+00 9.5090E-02

4.4750E-01 5.1870E-01 4.4990E-01 4.3770E-01 7.7470E-01 6.8170E-01 3.9040E-01

2.7210E-02 4.1750E-02 3.9990E-02 2.9470E-02 1.5270E-02 6.0120E-02 4.8560E-02

6.1080E-02 5.4310E-02 3.4700E-02 1.5180E-02 3.5860E-02 4.9440E-02 4.2030E-02

7.8170E-02 2.2130E-01 3.1270E-01 7.7410E-02 6.1090E-02 1.1690E-01 1.5000E-01

8.9270E-02 7.8190E-02 7.2690E-02 5.0090E-02 2.5180E-01 5.9960E-01 6.8740E-01

4.5530E-01 1.0190E-01 1.0150E-01 5.8990E-02 1.9490E-01 1.7460E-01 1.4540E-01

7.7490E-02 3.1330E-02 7.1260E-01 4.3810E+00 1.1200E+00 3.7550E-02 2.6480E-01

3.6030E-01 3.0990E-01 7.9190E-03 3.7550E-01 8.3580E-01 5.5730E-01 2.2720E-02

3.4300E-02 6.1930E-02 5.7000E-03 1.8980E-01 2.8950E+00 7.2300E+00 3.4420E-01

1.0880E-01 3.1460E+00 9.3980E+00 2.3720E+00 7.0930E-03 9.9960E-01 1.3250E+01

2.4380E+00 1.0110E-02 1.0730E-01 2.6960E-01 8.2080E-02 6.0370E-03 3.0850E-02

2.7740E-01 5.9600E-02 6.3000E-03 1.7890E-02 1.8510E-02 2.0210E-02 1.0020E-02

1.4750E-02 9.3330E-03 2.0260E-02 1.4800E-01 3.0060E-01 3.2380E-02 9.9030E-03

6.7690E-02 1.5190E-01 5.1860E-02 8.5010E-03 1.4810E-02 1.0420E-02 7.7620E-03

4.5700E-03 1.4260E-02 1.5350E-02 1.3810E-02 7.8500E-03 4.1040E-03 2.9730E-03

1.6610E-03 5.1130E-03 6.1840E-03 5.0780E-03 2.8620E-03 4.8640E-03 1.0740E-02

1.1480E-02 9.0020E-03 1.8000E-02 1.3570E-01 3.5050E-01 5.0010E-01 1.3010E-01

4.6310E-01 5.6540E-01 3.7350E-01 1.3680E-02 1.9590E-02 2.6620E-02 2.6070E-02

1.6060E-02 2.0180E-02 4.5990E-02 4.1710E-02 3.4090E-02 2.6000E-02 1.4610E-02

1.5430E-02 3.2910E-02 3.6530E-02 2.7630E-02 7.2160E-02 1.6220E-01 1.9580E-01

2.0800E-02 5.4920E-02 8.9270E-02 1.1320E-01 3.4270E-02 7.0410E-02 2.9260E-02

8.6360E-02 2.2530E-01 4.5530E-01 5.6230E-01 5.5700E-02 6.9760E-02 4.8890E-02

1.2990E-01 1.0870E-01 9.3090E-02 6.3280E-02 4.2920E-03 3.4060E-02 5.4070E-01

3.5840E+00 2.5500E-03 4.2270E-02 2.1210E-01 3.9150E-01 7.5740E-04 8.5790E-03

2.8670E-01 8.8820E-01 1.5380E-02 1.1030E-02 2.0510E-02 3.6010E-02 6.6450E-03

2.5730E-01 2.2200E+00 4.6950E+00 1.0250E-03 1.3890E-01 2.3780E+00 7.5070E+00

1.8880E-03 6.8530E-03 7.4820E-01 1.0360E+01 1.2470E-03 1.1580E-02 8.3050E-02

2.1790E-01 9.8730E-04 6.4970E-03 2.4520E-02 2.2050E-01 5.8400E-04 6.9450E-03

1.5480E-02 1.8930E-02 3.7690E-03 1.0260E-02 8.6990E-03 3.8510E-03 2.3170E-02

1.1280E-01 1.9450E-01 1.9930E-03 1.0450E-02 5.1850E-02 1.2320E-01 2.7240E-03

8.2250E-03 1.0720E-02 6.1170E-03 1.1610E-03 4.4120E-03 1.1340E-02 1.5060E-02

5.2340E-03 2.5100E-03 2.2750E-03 1.0420E-03 2.3120E-03 3.9860E-03 4.0140E-03

2.4330E-03 1.1050E-03 5.0320E-03 8.6100E-03 9.0330E-03 5.4300E+00 2.2950E-01

2.8960E-02 1.4830E+00 6.3410E-01 1.7980E-01 3.8980E-02 9.0230E-02 5.1320E-02

1.9310E-02 6.4350E-03 1.6840E-03 2.0030E-01 1.1250E-01 5.5780E-02 2.3280E-02

7.5510E-03 1.5580E-03 1.0080E-01 2.3730E-02 6.9880E-03 3.5170E-01 1.1460E-01

3.1940E-02 5.9640E-03 8.2770E-01 1.3650E-01 3.6020E-02 9.9530E-03 1.8730E-01

3.9700E-02 1.0290E-02 2.0630E+00 6.2400E-01 1.6770E-01 5.1360E-02 2.3460E-01

7.5720E-02 1.1510E-02 4.8980E-03 2.5950E-02 5.7400E-03 1.7430E-03 1.5780E+00

2.3140E-01 3.5400E-02 3.3430E-03 3.0540E+00 3.7220E-01 4.3160E-02 4.8060E-03

1.4130E-01 1.0680E-01 3.0890E-02 4.2930E-03 2.3980E-02 1.1270E-02 3.3290E-03

4.7490E-04 6.2890E-02 1.9280E-02 2.8270E-03 4.5360E-04 5.4020E-01 3.5310E-02

5.7580E-03 1.6420E-03 1.1610E-01 4.4590E-02 1.3360E-02 2.3410E-03 1.9320E+01

6.8560E-01 5.3290E-03 8.5560E-04 2.5770E+01 2.3770E+00 9.2950E-02 6.7060E-04

3.1770E+01 2.7190E+00 1.2720E-01 3.1040E-03 3.1640E-02 6.4510E-03 2.1640E-03

7.0120E-02 2.7900E-02 1.0430E-02 2.6280E-03 1.7080E+00 8.6000E-02 1.2440E-02

3.9300E-03 5.2500E-02 1.5180E-02 3.7960E-03 3.6650E-04 1.1510E-01 2.5870E-02

5.4300E-03 8.7260E-04 9.9000E-04 1.1530E-02 3.4890E-03 8.5020E-04 2.4290E-02

8.5890E-03 2.2550E-03 4.9350E-04 7.0330E-02 1.6480E-02 3.2420E-03 5.5000E-04

9.6820E+00 2.7990E-01 7.4270E-01 1.2540E+00 4.2410E-01 1.4830E-01 4.3510E-02

5.8740E-02 3.5190E-02 1.7550E-02 6.8370E-03 9.8870E-02 8.2060E-02 6.6040E-02

4.6700E-02 2.7960E-02 1.2390E-02 4.6240E-02 4.8200E-02 1.5160E-02 1.6370E-01

1.5530E-01 7.5880E-02 2.6970E-02 1.8780E-01 5.0480E-01 1.1300E-01 3.3940E-02

9.7520E-02 7.9540E-02 2.0720E-02 7.3910E-01 1.0080E+00 5.2130E-01 1.5310E-01

1.4160E-01 8.5680E-02 4.2930E-02 4.0820E-03 1.3680E-02 1.1290E-02 2.8880E-03

2.3090E-01 9.7680E-01 2.3640E-01 4.0780E-02 2.3280E-01 2.2340E+00 4.2610E-01

4.9450E-02 8.9160E-02 1.2850E-01 9.2480E-02 3.4830E-02 1.4130E-02 8.6040E-03

6.7410E-03 3.1190E-03 2.8050E-02 2.4340E-02 1.6230E-02 2.5630E-03 7.2150E-02

3.7450E-01 3.4700E-02 5.3970E-03 4.4580E-02 5.2880E-02 3.5040E-02 1.4500E-02

2.0090E+00 1.3820E+01 8.3290E-01 5.6220E-03 2.3710E+00 1.8150E+01 2.9200E+00

1.1350E-01 5.4290E-01 2.4590E+01 3.4440E+00 1.5360E-01 1.6280E-02 1.4080E-02

3.1530E-03 3.7030E-02 3.1670E-02 1.5860E-02 8.1760E-03 2.0080E-01 1.2060E+00

8.7510E-02 1.1330E-02 2.2630E-02 2.3630E-02 9.9090E-03 3.7470E-03 2.5840E-02

7.5260E-02 2.4680E-02 5.9020E-03 8.2520E-04 6.7240E-03 4.6560E-03 1.8470E-03

1.1870E-02 1.0030E-02 6.0030E-03 1.8640E-03 2.0630E-02 3.6800E-02 1.4680E-02

3.4110E-03 8.0960E+00 3.3450E-01 7.7700E-01 8.2460E-01 2.7870E-01 1.8580E-02

3.5290E-02 3.9920E-02 2.8240E-02 1.2740E-02 3.7030E-02 5.9350E-02 5.8920E-02

5.1320E-02 3.9040E-02 2.1400E-02 1.9990E-02 3.8800E-02 2.8780E-02 6.7940E-02

1.1590E-01 1.0290E-01 4.9990E-02 5.1560E-02 1.7020E-01 3.6140E-01 8.9260E-02

4.8290E-02 7.1110E-02 3.8820E-02 2.3530E-01 6.2650E-01 6.6770E-01 4.0800E-01

7.5410E-02 8.5630E-02 5.4680E-02 3.2660E-03 6.9930E-03 9.9520E-03 5.3380E-03

3.5360E-02 2.3640E-01 7.1760E-01 1.9270E-01 2.3640E-02 2.5670E-01 1.7340E+00

3.3980E-01 1.9560E-02 7.7180E-02 9.4550E-02 8.4670E-02 6.6350E-03 8.4490E-03

6.4840E-03 4.5040E-03 9.3000E-03 2.2780E-02 1.3690E-02 1.1170E-02 1.0580E-02

7.9430E-02 2.7290E-01 2.6680E-02 1.3350E-02 3.5040E-02 3.8130E-02 3.1090E-02

1.2210E-01 2.4870E+00 1.0100E+01 6.2430E-01 9.2320E-02 2.9200E+00 1.3590E+01

2.2410E+00 3.6890E-03 1.5830E+00 1.9320E+01 2.6490E+00 8.2340E-03 1.2210E-02

6.3730E-03 1.8470E-02 2.3240E-02 2.2500E-02 9.9010E-03 2.5070E-02 2.3010E-01

8.8460E-01 6.6750E-02 8.7310E-03 1.6330E-02 1.6100E-02 6.7710E-03 5.4300E-03

2.4680E-02 5.4570E-02 2.0430E-02 6.6020E-04 3.6850E-03 4.3470E-03 2.5490E-03

4.9250E-03 8.4600E-03 6.4450E-03 3.9750E-03 5.1090E-03 1.8740E-02 2.4870E-02

1.1690E-02 1.2870E-01 3.9680E-01 6.1580E-01 5.5620E-01 6.1200E-03 1.8470E-02

2.7900E-02 2.8520E-02 1.8440E-02 7.5050E-03 3.2750E-02 4.8600E-02 4.9940E-02

3.9510E-02 2.1500E-02 8.3920E-03 2.0670E-02 3.6300E-02 2.3460E-02 6.9130E-02

9.2150E-02 6.7170E-02 1.5320E-02 5.2260E-02 1.3790E-01 2.9840E-01 2.2890E-02

4.6990E-02 4.8780E-02 7.6530E-02 2.3230E-01 5.1140E-01 6.3250E-01 3.4090E-02

7.6030E-02 5.1970E-02 2.4490E-03 3.5280E-03 6.4410E-03 6.7480E-03 3.3410E-03

4.0770E-02 1.9270E-01 6.6710E-01 2.5120E-03 2.6290E-02 2.0460E-01 1.5330E+00

9.6050E-04 2.1950E-02 6.8630E-02 1.1500E-01 2.1520E-03 6.8870E-03 6.8830E-03

3.6030E-03 2.2850E-03 1.0510E-02 1.8510E-02 1.1420E-02 2.5320E-03 1.1300E-02

6.2220E-02 2.1620E-01 2.3410E-03 1.4510E-02 3.1090E-02 4.0270E-02 3.7660E-03

1.5380E-01 1.9160E+00 7.9350E+00 6.7050E-04 1.1340E-01 2.2410E+00 1.1780E+01

5.1380E-04 4.4140E-03 1.2000E+00 1.6470E+01 4.2050E-03 7.4850E-03 8.4120E-03

7.8280E-03 1.7260E-02 1.7840E-02 1.2680E-02 5.9170E-03 2.6870E-02 1.7890E-01

6.9380E-01 2.3500E-03 9.5680E-03 1.3340E-02 1.0630E-02 8.7250E-04 5.9020E-03

2.0430E-02 4.6570E-02 4.9510E-04 1.8670E-03 3.3800E-03 2.6900E-03 1.7060E-03

5.0060E-03 6.7310E-03 4.3730E-03 1.0140E-03 5.6410E-03 1.5460E-02 2.3190E-02

3.4150E+00 3.1880E-01 1.3530E-01 5.3590E-02 3.5780E-02 2.0010E-02 1.0550E-02

4.5480E-03 5.9560E-02 3.8060E-02 2.4030E-02 1.5210E-02 9.2400E-03 4.4290E-03

5.5290E-02 2.7170E-02 1.8690E-02 4.4280E-01 2.2000E-01 8.4710E-02 2.8310E-02

5.0750E-01 2.1370E-01 1.3300E-01 5.0050E-02 5.3440E-01 8.3800E-02 2.8780E-02

1.0810E+00 5.7400E-01 2.9610E-01 1.4620E-01 6.7710E-01 3.7360E-01 4.4560E-02

6.6920E-02 2.1350E-01 8.8720E-02 4.8770E-02 3.0710E-01 1.3660E-01 4.1950E-02

8.9590E-03 2.0980E-01 9.0440E-02 3.1740E-02 7.8470E-03 1.9320E-01 8.9250E-02

3.1700E-02 7.0180E-03 4.4400E-02 2.4080E-02 1.3570E-02 6.0270E-03 2.2240E+00

4.3130E-01 3.0380E-02 5.4010E-03 2.0900E+00 3.4560E-01 5.3520E-02 1.1090E-02

1.5830E-01 8.2450E-02 3.6100E-02 1.2130E-02 2.7710E+00 4.1720E-01 5.3800E-02

9.4260E-03 2.1210E-01 7.8050E-02 2.7340E-02 9.1810E-03 2.3450E-01 9.7200E-02

4.0020E-02 1.4990E-02 1.2150E+01 2.3400E-01 5.5410E-03 1.6610E+01 3.0570E+00

1.2530E-01 2.2190E-03 2.3890E+01 3.3110E+00 2.7360E-01 1.4680E-02 1.2500E-01

4.6530E-02 1.3210E-02 2.6650E-03 2.5830E-02 1.5110E-02 7.5030E-03 2.9690E-03

3.5980E-02 1.0600E-01 1.7880E-02 8.4640E-03 4.6780E-02 2.5060E-02 1.0120E-02

2.6170E-03 3.0590E-02 1.2320E-02 4.7310E-03 1.3340E-03 4.2850E+00 1.8230E-01

2.8660E-02 2.5440E-02 2.1490E-02 1.3960E-02 5.7890E-03 2.8100E-02 2.7960E-02

2.4630E-02 1.7700E-02 1.0210E-02 4.2890E-03 2.9570E-02 3.3030E-02 1.3300E-02

1.8590E-01 2.0950E-01 1.0650E-01 5.8560E-02 2.3020E-01 1.8970E-01 1.4580E-01

8.3540E-02 1.8110E-01 2.5850E-01 4.0610E-02 4.9250E-01 4.9660E-01 3.6690E-01

2.1710E-01 4.4660E-01 1.3400E-01 2.4090E-01 5.0180E-02 1.1790E-01 1.1500E-01

3.0170E-02 9.3660E-02 1.1320E-01 1.1520E-01 4.8920E-02 5.2020E-02 9.1980E-02

7.4290E-02 3.6590E-02 4.9120E-02 7.9830E-02 7.4280E-02 3.7680E-02 2.4050E-02

2.2770E-02 1.2740E-02 6.5220E-03 4.3100E-01 1.0880E+00 4.6970E-01 2.9760E-02

1.1620E-01 1.3280E+00 3.7420E-01 5.9950E-02 6.2040E-02 6.2640E-02 5.4930E-02

3.7120E-02 1.0930E-01 1.7990E+00 4.7100E-01 6.2580E-02 4.6030E-02 1.0590E-01

6.4960E-02 2.8120E-02 5.3590E-02 1.1890E-01 7.6500E-02 4.1030E-02 2.9210E+00

6.2100E+00 1.6670E-01 3.0560E+00 8.1720E+00 3.4470E+00 1.6040E-01 6.5740E-01

1.5430E+01 3.9960E+00 3.6350E-01 4.6520E-02 4.9400E-02 3.2290E-02 1.2340E-02

1.1990E-02 1.0020E-02 9.2360E-03 7.2110E-03 2.6980E-02 3.7750E-02 5.4280E-02

7.0430E-03 2.5060E-02 1.6720E-02 1.3300E-02 8.3810E-03 9.6300E-03 1.4050E-02

8.2540E-03 4.7850E-03 2.8580E+00 1.3190E-02 1.8400E-02 1.4250E-02 1.1470E-02

7.2930E-03 1.3260E-02 1.8060E-02 1.5170E-02 1.2700E-02 1.0170E-02 5.8890E-03

1.8130E-02 1.8050E-02 1.4100E-02 7.9900E-02 1.2080E-01 1.2370E-01 5.6060E-02

8.0490E-02 1.1700E-01 1.2310E-01 9.9330E-02 6.3260E-02 1.4720E-01 1.0750E-01

2.1630E-01 3.0010E-01 2.9780E-01 2.3460E-01 1.9420E-01 2.1790E-01 1.3550E-01

3.3450E-02 7.1320E-02 6.5800E-02 3.8380E-02 9.9290E-03 8.4590E-02 5.8970E-02

9.3890E-02 7.7340E-03 4.1690E-02 5.7660E-02 6.2850E-02 4.6750E-03 4.2060E-02

4.9100E-02 6.4790E-02 1.3580E-02 1.2720E-02 1.2550E-02 5.2230E-03 3.0310E-02

4.6970E-01 5.1890E-01 3.2680E-01 2.1050E-02 9.7480E-02 8.4900E-01 2.8470E-01

1.7330E-02 4.0290E-02 4.2700E-02 4.4160E-02 1.8460E-02 9.3170E-02 1.1570E+00

3.5920E-01 1.1270E-02 3.4150E-02 6.6590E-02 5.1330E-02 1.5950E-02 3.4650E-02

8.0010E-02 6.2790E-02 4.0170E-01 3.2660E+00 2.5320E+00 1.2510E-01 3.4470E+00

3.8910E+00 2.4260E+00 9.8280E-03 7.3000E-01 9.8200E+00 3.0640E+00 1.3210E-02

3.2290E-02 2.8920E-02 1.9290E-02 4.0720E-03 7.1330E-03 7.3310E-03 7.2280E-03

1.7990E-02 1.5080E-02 3.0070E-02 2.1020E-02 1.0120E-02 1.3290E-02 1.2290E-02

6.5970E-03 2.9490E-03 5.8700E-03 9.5700E-03 6.0660E-03 5.3210E-03 6.5630E-03

8.8410E-03 7.2050E-03 3.4870E-03 6.6230E-03 5.5270E-03 7.8670E-03 8.1570E-03

6.2170E-03 3.2160E-03 9.4170E-03 5.9260E-03 9.7690E-03 2.7740E-02 5.7600E-02

7.2470E-02 3.7150E-02 2.5490E-02 5.8020E-02 6.8160E-02 6.6490E-02 2.2860E-02

4.4950E-02 9.0320E-02 8.2600E-02 1.2740E-01 1.6310E-01 1.5130E-01 5.1200E-02

1.8720E-01 3.5430E-02 1.6730E-02 3.6020E-02 2.2790E-02 2.8930E-02 1.5040E-03

9.1810E-03 5.8620E-02 5.4350E-02 7.3590E-04 7.6120E-03 2.9420E-02 4.7190E-02

4.4310E-05 5.0550E-03 3.0240E-02 4.4960E-02 6.0270E-03 6.5220E-03 5.2170E-03

4.2760E-03 5.3940E-03 2.9750E-02 3.2680E-01 3.1090E-01 4.5860E-03 1.7930E-02

6.4900E-02 5.3880E-01 3.1210E-03 1.5310E-02 2.6810E-02 2.7000E-02 3.6780E-03

1.6290E-02 6.2430E-02 7.3170E-01 2.8430E-03 8.7620E-03 2.2580E-02 4.7490E-02

3.5460E-03 1.2910E-02 2.3220E-02 5.7000E-02 1.8100E-02 6.2110E-01 2.4610E+00

2.2020E-03 1.6040E-01 2.4260E+00 2.3560E+00 4.7940E-03 4.1830E-03 5.0850E-01

6.2940E+00 2.6640E-03 1.2340E-02 1.9290E-02 1.2560E-02 9.2100E-04 3.3240E-03

4.5640E-03 3.9220E-03 8.9950E-03 6.4080E-03 8.0320E-03 1.8610E-02 2.6150E-03

8.3810E-03 6.6260E-03 3.5860E-03 5.0960E-04 2.7240E-03 3.6900E-03 5.3000E-03

4.0520E+00 1.2190E+00 3.4230E-01 1.3680E-01 9.0740E+00 3.7320E+00 1.0550E+00

2.0960E-01 3.6280E-02 7.8320E-03 3.9290E+00 1.1720E+00 4.0560E-02 3.4430E+00

5.1540E-01 9.3780E-02 6.2620E-03 2.5950E+00 7.7010E-01 1.2500E-01 9.6390E-03

9.5370E-01 1.5580E-01 1.3780E-02 5.3420E-02 2.2620E-02 9.2030E-03 3.5180E-03

2.3200E-02 1.4320E-02 7.3560E-03 5.3160E-02 1.3050E-01 1.6890E-02 4.8790E-03

2.2320E-01 1.7830E-01 8.2670E-02 1.9070E-02 1.5270E-01 7.5190E-02 2.2450E-02

3.5110E-03 9.2500E-02 2.4090E-02 4.8860E-03 6.3530E-04 1.1860E-01 3.7890E-02

6.5640E-03 1.0550E-04 1.1360E-01 5.8810E-02 5.2010E-02 3.3810E-02 1.6930E-01

4.1230E-02 1.0470E-02 2.5070E-03 4.6820E-02 1.5300E-02 4.1020E-03 8.9360E-04

8.8610E-02 7.9720E-02 4.7050E-02 1.5330E-02 1.9940E-01 4.4620E-02 7.2860E-03

6.9830E-04 3.6770E-02 1.5660E-02 4.5180E-03 7.5970E-04 5.2920E-02 3.8480E-02

1.0270E-02 5.8660E-02 2.6730E-02 1.4410E-02 7.5510E-03 5.1430E-02 2.4520E-02

8.5200E-03 2.2360E-03 7.4640E-02 7.7020E-02 3.8790E-02 9.0080E-03 4.8160E-02

2.6930E-02 9.3530E-03 1.9550E-03 6.0820E-02 2.4140E-02 1.1130E-02 6.6830E-03

2.1000E-02 1.0900E-02 5.6860E-03 2.7590E-03 3.3160E-02 1.6490E-02 6.2510E-03

1.4730E-03 3.9330E+00 1.7200E+00 2.7120E-01 2.7490E+00 3.2490E+00 3.3080E+00

1.5610E+00 3.8230E-01 5.5400E-02 1.9220E+00 1.4090E+00 7.7910E-01 1.0550E+00

1.7150E+00 3.6110E-01 9.0670E-02 9.0060E-01 1.0930E+00 6.6210E-01 1.3240E-01

4.5190E-01 3.5880E-01 8.7950E-02 2.4550E-02 2.3660E-02 1.4400E-02 7.4730E-03

1.8430E-02 1.3180E-02 5.6470E-03 4.2530E-02 5.8990E-02 5.4700E-02 8.1820E-03

1.7130E-01 5.7530E-02 9.2280E-02 8.1480E-02 6.8180E-02 5.2550E-02 5.8740E-02

2.3610E-02 1.7860E-02 5.1410E-02 2.3200E-02 5.2250E-03 5.2850E-02 4.3960E-02

2.6660E-02 6.9460E-03 6.9330E-02 8.8140E-02 3.9110E-02 1.0180E-02 5.0660E-02

8.6210E-02 3.2220E-02 9.7260E-03 1.5100E-02 2.2060E-02 1.2440E-02 4.0860E-03

7.8840E-02 3.6140E-02 2.9610E-02 3.9960E-02 4.4970E-02 1.0650E-01 4.2230E-02

7.9130E-03 1.4040E-02 1.4830E-02 1.2560E-02 4.7240E-03 4.4400E-02 1.8000E-02

1.8930E-02 3.2730E-02 3.0420E-02 1.7450E-02 5.2710E-03 2.6190E-02 1.9390E-02

1.6100E-02 7.7410E-03 7.7030E-02 2.5320E-02 2.7580E-02 2.9650E-02 2.6090E-02

1.5210E-02 1.8450E-02 9.3700E-03 4.8650E-02 1.6090E-02 1.3460E-02 4.0000E-03

1.2810E-02 1.0310E-02 6.7580E-03 2.3850E-03 1.7490E-02 1.2800E-02 9.7780E-03

5.8350E-03 2.3240E+00 1.3580E+00 2.3300E-01 2.7950E+00 1.4350E+00 2.0790E+00

1.5100E+00 4.1990E-01 7.7000E-01 1.2370E+00 1.0740E+00 2.9190E-01 9.3740E-01

9.5790E-01 2.1740E-01 2.2180E-01 7.7230E-01 6.3920E-01 4.5360E-01 1.9100E-01

3.1620E-01 1.6680E-01 1.0990E-02 1.6420E-02 1.5680E-02 1.0190E-02 1.3360E-02

9.6010E-03 4.4120E-03 3.1900E-02 2.5070E-02 4.5460E-02 2.0870E-02 8.1170E-02

7.9020E-02 5.5090E-02 8.6630E-02 1.8890E-02 5.0750E-02 3.5530E-02 4.7130E-02

2.1260E-03 1.9670E-02 3.4510E-02 1.6940E-02 1.8910E-02 3.6260E-02 2.6270E-02

1.6360E-02 5.6250E-02 5.6250E-02 3.3120E-02 9.4620E-03 1.4400E-02 4.4170E-02

5.3100E-02 2.2430E-02 4.0780E-03 1.2690E-02 1.4240E-02 9.2580E-03 5.0350E-02

2.7360E-02 3.4670E-02 2.6060E-02 6.9880E-03 4.7240E-02 6.7320E-02 2.9710E-02

3.6940E-03 1.1070E-02 9.9390E-03 9.9100E-03 3.0360E-02 1.7140E-02 1.3520E-02

1.9480E-02 2.2780E-02 1.4590E-02 7.5660E-03 1.0780E-02 1.6460E-02 1.2970E-02

1.1810E-02 5.2700E-02 2.2550E-02 2.8580E-02 1.5850E-02 9.5210E-03 1.6540E-02

1.0820E-02 1.4970E-02 3.6490E-02 1.1290E-02 9.8370E-03 4.0450E-03 7.7690E-03

8.1840E-03 5.1980E-03 3.0450E-03 7.6540E-03 1.0120E-02 9.1260E-03 7.5290E-03

1.4780E+00 3.6280E-02 2.5870E-01 2.0820E+00 1.0240E+00 1.0760E+00 1.1700E+00

2.0880E-01 8.7530E-01 9.6940E-01 7.0420E-02 3.4180E-01 7.1610E-01 4.6810E-01

3.0390E-02 3.1300E-01 5.0370E-01 5.3220E-01 6.8920E-02 2.0120E-01 1.7920E-01

4.4710E-03 8.9760E-03 1.1810E-02 1.0220E-02 8.8270E-03 5.9610E-03 3.1530E-03

2.1260E-02 1.0200E-02 2.5430E-02 2.5300E-02 2.4470E-02 6.9340E-02 5.8460E-02

4.9020E-02 2.4900E-03 2.5020E-02 3.1990E-02 4.2040E-02 1.4170E-04 3.2210E-03

1.8590E-02 2.6860E-02 4.8180E-03 2.0740E-02 2.3490E-02 1.6200E-02 4.5050E-02

2.3350E-02 2.1380E-02 1.3520E-02 4.0920E-03 1.5370E-02 3.5530E-02 3.4420E-02

9.2020E-04 4.7580E-03 9.7250E-03 1.1440E-02 2.2800E-02 3.1320E-02 2.5560E-02

1.2620E-02 6.2360E-04 1.0630E-02 4.0430E-02 4.9160E-02 5.3760E-04 4.8120E-03

7.6640E-03 1.0070E-02 1.7340E-02 1.7070E-02 6.2470E-03 1.1970E-02 1.2220E-02

1.1370E-02 7.3910E-03 3.5810E-03 1.0020E-02 1.1030E-02 1.0050E-02 2.6120E-02

3.0860E-02 1.8090E-02 4.6280E-03 2.3020E-03 1.0130E-02 1.0570E-02 1.1570E-02

2.4330E-02 7.5440E-03 5.3880E-03 3.8470E-03 4.6160E-03 4.8810E-03 4.0810E-03

2.5550E-03 2.5860E-03 6.6440E-03 7.4130E-03 6.3080E-03 6.9100E-03 3.7390E-02

1.8710E-01 1.1870E+00 1.0400E+00 3.6880E-01 1.6200E-02 4.4570E-01 5.6470E-01

1.1330E-02 1.0280E-01 2.7000E-01 4.1240E-01 1.8350E-03 5.0210E-02 2.9050E-01

3.4230E-01 1.9330E-02 9.1360E-02 1.1400E-01 1.5820E-03 3.8590E-03 5.7310E-03

6.2600E-03 4.4030E-03 2.7870E-03 1.6780E-03 1.0630E-02 3.6720E-03 9.8560E-03

1.6940E-02 3.0960E-03 3.5160E-02 4.7000E-02 1.5390E-02 5.1320E-05 4.1830E-03

2.4370E-02 2.2160E-02 1.8270E-05 1.9500E-04 3.3630E-03 2.0790E-02 5.9270E-04

7.8630E-03 1.4840E-02 9.2890E-03 2.5800E-02 5.9890E-03 9.3900E-03 1.0470E-02

1.0290E-03 4.6080E-03 1.2310E-02 2.6710E-02 1.9260E-04 1.1150E-03 4.2340E-03

7.8790E-03 6.5990E-03 2.3190E-02 1.1450E-02 4.9090E-03 3.5210E-05 1.0150E-03

1.0800E-02 3.8570E-02 3.4330E-05 8.4110E-04 4.6530E-03 6.0170E-03 7.4990E-03

1.1010E-02 1.8010E-03 5.9850E-03 4.4700E-03 6.5980E-03 4.4100E-03 9.3070E-04

3.9700E-03 7.1270E-03 5.3290E-03 8.8690E-03 2.3760E-02 6.5060E-03 6.2640E-04

3.3220E-04 3.1960E-03 8.4140E-03 5.3370E-03 1.2170E-02 3.8560E-03 2.1340E-03

2.3990E-03 2.2200E-03 2.0180E-03 2.4720E-03 1.3520E-03 5.7730E-04 3.1340E-03

4.3190E-03 3.4450E-03 4.2420E+00 4.8600E-01 5.4230E-02 1.0230E-02 1.9130E-03

8.9320E+00 2.0470E-01 6.4680E-02 2.4670E+00 5.0290E-01 2.3760E-02 3.5850E-03

3.5180E+00 5.0640E-01 3.5750E-02 2.2270E-03 1.8470E+00 2.7130E-02 1.7090E-02

6.4480E-02 2.5140E-02 8.3670E-03 1.8710E-03 1.6030E-02 4.6740E-03 1.6440E-03

1.6550E-02 3.4130E-02 1.8230E-02 3.5450E-03 1.7850E-01 4.0060E-02 7.3380E-03

8.9900E-04 1.6080E-01 5.4870E-02 1.1150E-02 1.1040E-03 5.1530E-01 1.5810E-01

2.8210E-02 2.4160E-03 1.4950E-01 1.9120E-02 1.1200E-03 7.0560E-05 5.5230E-02

2.6000E-02 9.7010E-03 1.5530E-03 6.7770E-02 5.7540E-02 2.5740E-02 4.4470E-03

2.6900E-01 7.6690E-02 1.9690E-02 2.7470E-03 1.4000E-01 5.9810E-02 1.5810E-02

1.8140E-03 1.1980E-01 7.8190E-02 2.5890E-02 3.6290E-03 3.8320E-01 1.0830E-01

2.2640E-02 2.3950E-03 4.4530E-02 4.3840E-02 3.7300E-02 6.8570E-02 4.6730E-02

2.0320E-02 3.4670E-03 1.9090E-01 4.7690E-02 7.7280E-03 1.3790E-03 4.3520E-02

1.5230E-02 5.8320E-03 1.2840E-03 9.2060E-02 3.8550E-02 9.7460E-03 1.4510E-03

7.4030E-02 4.5920E-02 2.0720E-02 7.0860E-04 7.4450E-02 3.0990E-02 6.7700E-03

6.6070E-04 7.3430E-02 4.6810E-02 1.3210E-02 1.4970E-03 5.0340E+00 7.6480E-01

7.9910E-02 1.4680E-02 3.6270E+00 3.8490E+00 1.1380E-01 1.1150E+00 9.6080E-01

4.0400E-01 1.8190E-02 1.8030E+00 3.4790E+00 4.4890E-01 3.3430E-02 8.7850E-01

6.8760E-01 1.0580E-02 3.3530E-02 2.6220E-02 1.5260E-02 6.9860E-03 1.0210E-02

6.5480E-03 2.0760E-03 1.3790E-02 2.5950E-02 1.2010E-02 8.6280E-03 6.1800E-02

8.7980E-02 3.2380E-02 6.7790E-03 6.6560E-02 6.7690E-02 4.4690E-02 1.0470E-02

1.8410E-01 2.3840E-01 1.3770E-01 2.6610E-02 5.9640E-02 6.6000E-02 1.4950E-02

9.5510E-04 3.5250E-02 2.2700E-02 1.1840E-02 7.3390E-03 5.8980E-02 2.2560E-02

2.5610E-02 2.2340E-02 1.0620E-01 1.2750E-01 5.5050E-02 1.8030E-02 7.6800E-02

5.0990E-02 3.8420E-02 1.4310E-02 8.2520E-02 3.4600E-02 4.8820E-02 2.3710E-02

1.3790E-01 1.8190E-01 8.7470E-02 2.1220E-02 4.4810E-02 4.4360E-02 1.5420E-02

5.3860E-02 2.8310E-02 1.8560E-02 1.5160E-02 7.8860E-02 8.3300E-02 3.7600E-02

6.6830E-03 2.4110E-02 1.9300E-02 7.4200E-03 4.0610E-03 4.6180E-02 3.5090E-02

2.8130E-02 8.8410E-03 6.1700E-02 3.2820E-02 1.2880E-02 1.0420E-02 4.4680E-02

2.5350E-02 1.8470E-02 5.5460E-03 5.2080E-02 1.9460E-02 2.8950E-02 1.1980E-02

4.4030E+00 8.0740E-01 7.3920E-02 1.2470E+00 3.5700E+00 1.2490E+00 4.3450E-01

8.4960E-01 5.1110E-01 1.9960E-01 3.9710E-01 2.0720E+00 1.8900E+00 2.5240E-01

3.7920E-01 6.9390E-01 1.8970E-01 1.6250E-02 2.1450E-02 1.7880E-02 1.1000E-02

6.5030E-03 6.0350E-03 2.8030E-03 1.1030E-02 1.7870E-02 1.0890E-02 8.5060E-03

1.8520E-02 5.7400E-02 5.4310E-02 2.0930E-02 2.1560E-02 5.3340E-02 4.6700E-02

3.0040E-02 5.0560E-02 1.6690E-01 1.6240E-01 8.9510E-02 2.0860E-02 5.1700E-02

3.3040E-02 7.6500E-03 2.1040E-02 1.7810E-02 1.5180E-02 7.6960E-03 3.8490E-02

2.0640E-02 2.0750E-02 2.3720E-02 3.8470E-02 8.6480E-02 8.1300E-02 3.9200E-02

3.6090E-02 4.6070E-02 3.5600E-02 2.7180E-02 4.2090E-02 4.0740E-02 2.9790E-02

3.9090E-02 4.2240E-02 1.2190E-01 1.1940E-01 5.9180E-02 4.4310E-02 3.1720E-02

7.6720E-03 3.6810E-02 2.1270E-02 2.1710E-02 1.2920E-02 2.8370E-02 6.4260E-02

4.9770E-02 2.2760E-02 1.3230E-02 1.4780E-02 1.1390E-02 4.5040E-03 1.9140E-02

3.1150E-02 2.4580E-02 1.9720E-02 4.9350E-02 2.0700E-02 1.2780E-02 1.1430E-02

2.3400E-02 2.4160E-02 1.6950E-02 1.0740E-02 2.7690E-02 2.4240E-02 1.6950E-02

2.1080E-02 3.3050E+00 6.1310E-01 3.4620E-01 2.0750E+00 2.1300E+00 1.3640E-01

5.1550E-01 4.9570E-01 3.1540E-01 6.4310E-02 6.9780E-01 1.7400E+00 8.9260E-01

1.4630E-01 4.6920E-01 3.3160E-01 7.1090E-03 1.4160E-02 1.6050E-02 1.2620E-02

3.8500E-03 4.6100E-03 2.8540E-03 8.2740E-03 1.1120E-02 1.0490E-02 6.3360E-03

4.6770E-03 2.5150E-02 4.6900E-02 3.6660E-02 5.0040E-03 2.8910E-02 3.8190E-02

4.1910E-02 8.2400E-03 7.8510E-02 1.2910E-01 1.3620E-01 6.1220E-03 2.7680E-02

3.4290E-02 1.6860E-02 1.1190E-02 1.4170E-02 1.3960E-02 6.9750E-03 1.9700E-02

2.2920E-02 1.8640E-02 1.6420E-02 1.2310E-02 4.3210E-02 7.0600E-02 5.7920E-02

1.4010E-02 3.3440E-02 3.1280E-02 2.9680E-02 1.6240E-02 3.6750E-02 2.5510E-02

3.5290E-02 1.0080E-02 5.6550E-02 9.9030E-02 9.1460E-02 3.9730E-02 1.7450E-02

5.5550E-03 2.1450E-02 2.0340E-02 1.8930E-02 8.8170E-03 8.6340E-03 3.5170E-02

4.4740E-02 3.5310E-02 6.8960E-03 1.0070E-02 1.0840E-02 5.1110E-03 6.3050E-03

2.0750E-02 2.0730E-02 2.3160E-02 3.7020E-02 1.1340E-02 1.3530E-02 8.8160E-03

1.0510E-02 1.9540E-02 1.5430E-02 1.0960E-02 1.1430E-02 2.3140E-02 1.4370E-02

1.8530E-02 2.1350E+00 8.2430E-02 7.7800E-01 2.1740E+00 3.3800E-02 2.3060E-01

4.0520E-01 3.0520E-01 8.4220E-03 1.3790E-01 8.3480E-01 1.2720E+00 4.9910E-02

2.4010E-01 3.4140E-01 2.6780E-03 8.0980E-03 1.1490E-02 1.0540E-02 2.1480E-03

3.0910E-03 2.3800E-03 5.5170E-03 6.1220E-03 8.6630E-03 3.8510E-03 9.5400E-04

8.0110E-03 2.6140E-02 4.0490E-02 6.1480E-04 9.9520E-03 2.6930E-02 3.8510E-02

3.7180E-05 2.1390E-02 7.7780E-02 1.3550E-01 1.4030E-03 1.0920E-02 2.4090E-02

2.0220E-02 5.0500E-03 1.0610E-02 9.5750E-03 5.6140E-03 7.5190E-03 2.0120E-02

1.6070E-02 8.0810E-03 3.1010E-03 1.7880E-02 4.2410E-02 5.9280E-02 4.1290E-03

1.8850E-02 2.6180E-02 2.3320E-02 4.2830E-03 2.2240E-02 2.7480E-02 2.1860E-02

1.5140E-03 1.8500E-02 5.7950E-02 9.3780E-02 3.0130E-02 7.1540E-03 4.5460E-03

1.0310E-02 1.8230E-02 1.2280E-02 5.5400E-03 2.2820E-03 1.3860E-02 3.0850E-02

3.5590E-02 3.2410E-03 6.4810E-03 7.2770E-03 4.9550E-03 1.5330E-03 9.6310E-03

1.7030E-02 1.9060E-02 2.4680E-02 5.2330E-03 1.1780E-02 5.4360E-03 3.8870E-03

1.2620E-02 1.3310E-02 7.8110E-03 3.4420E-03 1.4940E-02 1.6070E-02 1.0540E-02

2.3160E-02 1.4320E-01 1.3510E+00 5.9770E-03 6.7820E-02 2.3010E-01 1.8330E-01

8.9260E-04 1.7360E-02 1.7770E-01 9.2590E-01 1.4270E-02 8.8610E-02 2.1280E-01

7.7950E-04 3.5820E-03 5.8560E-03 5.9800E-03 9.6250E-04 1.4470E-03 1.3500E-03

2.7580E-03 2.6310E-03 4.9420E-03 1.7040E-03 1.4110E-04 1.8280E-03 9.2970E-03

2.6530E-02 7.2520E-06 1.4930E-03 1.3110E-02 2.2630E-02 4.0680E-06 7.4160E-05

3.3540E-02 8.3680E-02 2.2300E-04 2.9600E-03 1.1430E-02 1.3710E-02 1.7460E-03

5.8560E-03 4.5740E-03 3.1980E-03 1.8530E-03 1.1650E-02 9.7220E-03 2.6670E-03

4.1810E-04 6.1210E-03 1.7250E-02 3.7550E-02 7.5580E-04 7.5850E-03 1.5480E-02

1.2220E-02 5.1050E-04 8.7320E-03 1.9510E-02 9.1910E-03 1.5940E-05 3.6810E-03

2.2840E-02 5.9160E-02 1.6280E-02 1.9040E-03 2.7130E-03 3.7220E-03 1.1140E-02

5.5520E-03 2.7650E-03 5.7470E-04 3.4780E-03 1.5080E-02 2.2150E-02 1.2120E-03

3.2880E-03 3.3390E-03 3.1390E-03 2.4600E-04 2.7710E-03 1.0150E-02 1.0440E-02

1.2340E-02 1.8520E-03 6.8990E-03 2.4740E-03 1.0780E-03 5.8580E-03 8.0810E-03

3.7950E-03 6.2370E-04 6.3510E-03 1.1660E-02 3.8590E-03 1.2820E+00 2.5640E-01

1.1850E+00 4.3590E-01 1.2300E-01 2.2100E-02 2.4250E+00 8.0560E-01 2.1100E-01

4.9460E-02 2.7070E+00 1.5060E-01 2.7420E-02 2.1600E-02 1.3530E-02 7.1370E-03

3.0290E-03 1.5140E-02 1.1860E-02 5.2880E-03 2.9870E-02 9.6730E-02 4.7530E-02

2.6900E-02 2.0990E-01 1.1980E-01 5.6640E-02 1.8220E-02 2.0070E-01 8.2810E-02

2.7040E-02 5.6050E-03 8.6940E-04 9.2780E-04 6.6520E-04 2.8910E-04 2.0110E-02

8.1200E-03 2.9080E-03 8.5880E-04 7.9740E-02 2.3210E-02 6.0840E-03 1.8280E-03

4.0350E-02 3.6680E-02 3.3000E-02 2.5660E-02 8.6380E-02 7.9240E-02 4.8210E-02

1.8010E-02 1.3860E-01 6.0990E-02 2.7090E-02 1.2560E-02 8.3170E-02 6.0740E-02

3.3480E-02 1.1860E-02 9.0060E-03 3.8510E-03 1.3740E-03 3.7470E-04 6.4190E-02

3.0380E-02 1.1920E-02 1.2060E-01 7.0800E-02 2.6470E-02 4.7340E-03 4.2270E-02

4.5430E-02 4.7900E-02 4.1040E-02 1.4190E-02 5.9180E-03 2.2660E-03 7.4280E-04

1.2440E-02 9.4370E-03 5.7650E-03 2.6640E-03 3.2470E-02 3.1180E-02 3.3080E-02

2.0710E-02 4.2170E-02 5.0070E-02 4.1670E-02 2.3220E-02 6.6560E-02 5.5630E-02

3.5160E-02 1.7480E-02 1.0720E+00 3.4080E-01 4.9190E-01 3.2600E-01 1.3910E-01

3.2980E-01 1.2090E+00 7.9990E-01 2.6250E-01 4.6710E-01 1.5920E+00 1.0430E-01

1.1280E-02 8.2960E-03 7.7730E-03 6.6290E-03 1.3020E-02 6.2500E-03 5.0050E-03

2.2410E-02 5.6530E-02 5.7170E-02 1.4690E-02 8.1570E-02 7.7720E-02 7.5840E-02

6.8250E-02 2.4380E-02 9.4540E-02 8.0370E-02 3.7850E-02 8.4860E-04 1.6570E-04

3.1810E-04 7.2400E-04 6.7150E-03 8.8710E-03 5.8560E-03 2.4900E-03 1.5890E-02

4.0610E-02 2.1460E-02 5.2080E-03 3.6030E-02 3.4100E-02 2.1620E-02 1.0010E-02

7.4760E-02 1.5370E-02 2.9410E-02 5.4350E-02 3.8450E-02 6.9200E-02 4.9340E-02

2.2650E-02 5.0600E-02 2.3420E-02 2.9240E-02 3.8710E-02 1.2860E-03 4.2570E-03

3.6300E-03 1.7890E-03 3.6480E-02 2.8780E-02 1.4660E-02 6.6880E-02 3.0870E-02

3.8800E-02 3.0320E-02 4.6940E-02 4.9960E-02 2.7760E-02 7.8310E-03 4.9730E-03

6.4070E-03 4.1760E-03 1.7850E-03 8.0490E-03 4.3550E-03 4.7580E-03 5.6250E-03

2.4350E-02 3.5000E-02 2.0480E-02 8.2400E-03 5.3760E-02 3.3700E-02 2.0500E-02

9.8940E-03 5.3040E-02 2.3840E-02 2.6110E-02 2.8140E-02 5.9790E-02 2.4710E-01

3.2820E-01 2.2650E-01 5.0460E-02 2.3010E-01 6.4780E-01 7.9160E-01 7.1480E-02

4.2080E-01 9.5000E-01 3.5200E-03 7.2970E-03 6.9290E-03 4.9050E-03 8.2330E-03

6.1700E-03 1.7610E-03 1.4940E-02 3.9300E-02 2.3680E-02 2.2600E-02 1.1890E-02

5.5370E-02 6.9790E-02 6.5230E-02 1.2320E-03 1.6680E-02 5.4300E-02 8.5900E-02

1.4090E-04 5.5710E-04 4.7840E-04 1.6640E-04 1.9580E-03 4.5460E-03 5.6500E-03

3.8160E-03 4.1190E-03 1.1020E-02 2.2360E-02 1.7920E-02 3.2650E-02 1.6460E-02

1.0800E-02 7.9140E-03 1.2740E-02 5.0290E-02 3.8300E-02 1.4580E-02 1.4960E-02

2.3760E-02 3.9130E-02 4.1470E-02 8.1600E-03 3.4150E-02 3.1910E-02 2.0400E-02

1.5900E-04 8.6030E-04 2.4700E-03 3.8050E-03 1.9190E-02 2.0730E-02 1.3350E-02

1.2870E-02 4.8500E-02 3.4890E-02 1.5030E-02 5.2740E-02 1.8170E-02 9.5080E-03

7.9310E-03 1.6410E-03 3.2820E-03 3.9640E-03 2.6750E-03 2.1530E-03 5.1980E-03

4.6700E-03 3.0340E-03 1.6230E-02 2.9410E-02 1.0160E-02 2.9150E-03 4.5500E-02

2.2300E-02 8.5450E-03 2.2390E-03 2.0890E-02 3.2920E-02 2.3020E-02 1.0590E-02

1.9410E+00 3.8800E-01 6.2740E-02 6.9300E+00 2.5540E+00 5.8800E-01 1.1470E-01

2.0680E+00 8.4650E-01 5.2770E-02 2.9680E-01 1.7860E-01 7.5670E-02 2.8050E-02

1.0170E-01 4.0590E-02 1.4900E-02 6.2490E-02 1.1740E-01 4.4460E-02 9.1690E-03

1.8020E-01 7.9550E-02 3.1180E-02 8.4350E-03 8.3610E-02 4.3060E-02 1.7790E-02

4.4660E-03 8.6300E-02 3.1380E-02 8.8220E-03 1.5960E-03 2.7050E-01 7.9300E-02

1.6200E-02 1.8610E-03 1.9390E-01 5.0250E-02 2.0910E-02 8.9350E-03 1.9970E-01

7.0740E-02 2.1460E-02 5.2200E-03 1.0600E-01 3.7890E-02 1.1170E-02 2.7530E-03

1.9510E-01 6.9180E-02 2.2580E-02 6.7520E-03 6.7820E-02 2.7280E-02 8.4380E-03

1.7430E-03 4.2170E-02 1.8590E-02 5.7790E-03 1.1340E-03 6.2900E-02 2.7090E-02

2.3040E-03 7.0940E-02 3.3030E-02 1.5410E-02 5.3120E-03 4.9130E-02 2.1190E-02

8.4850E-03 2.7670E-03 3.8230E-02 2.1770E-02 9.9510E-03 2.9300E-03 2.2820E-02

9.5950E-03 3.3510E-03 1.1520E-03 1.8200E-02 1.0760E-02 5.3000E-03 1.6130E-03

1.4240E-02 6.9190E-03 3.3620E-03 1.4030E-03 1.6110E-02 6.6540E-03 2.1870E-03

4.7180E-04 1.6050E+00 3.8930E-01 1.9280E+00 2.7060E+00 2.3510E+00 6.6870E-01

1.1300E+00 5.1810E-01 5.7800E-01 1.3230E-01 1.1800E-01 8.6750E-02 6.9340E-02

5.5350E-02 4.5210E-02 1.8440E-02 4.6870E-02 6.1410E-02 4.0910E-02 2.5930E-02

5.4240E-02 7.9930E-02 5.6140E-02 3.4350E-02 2.9020E-02 3.2300E-02 2.9940E-02

2.0440E-02 1.1770E-02 4.3030E-02 3.0460E-02 1.0810E-02 7.9140E-02 1.1580E-01

6.3120E-02 1.7750E-02 5.0200E-02 1.0970E-01 3.4870E-02 1.0680E-02 5.2290E-02

9.1390E-02 5.6270E-02 2.3020E-02 2.1550E-02 5.1140E-02 3.3720E-02 1.2620E-02

5.1200E-02 9.2150E-02 5.4460E-02 2.2500E-02 1.7300E-02 2.8980E-02 2.2850E-02

9.9080E-03 1.0940E-02 1.6550E-02 1.6320E-02 6.9460E-03 3.5510E-02 1.5590E-02

1.8140E-02 3.3030E-02 3.2800E-02 1.7440E-02 1.0260E-02 1.7010E-02 2.1830E-02

1.4200E-02 8.1420E-03 2.1770E-02 1.4840E-02 1.0490E-02 7.5650E-03 6.3220E-03

9.9040E-03 8.0500E-03 3.4180E-03 1.3650E-02 6.5930E-03 3.9370E-03 2.7210E-03

6.9190E-03 6.6540E-03 4.0910E-03 1.7820E-03 5.2640E-03 6.5510E-03 4.8260E-03

2.4240E-03 1.0210E+00 1.9100E-01 1.8690E+00 1.2520E+00 1.7910E+00 4.2240E-01

6.3470E-01 4.2350E-01 4.6600E-02 9.6350E-02 7.6060E-02 5.9280E-02 2.8500E-02

3.1230E-02 1.9150E-02 3.1240E-02 2.6440E-02 3.5750E-02 2.3300E-02 1.3710E-02

3.4710E-02 5.5290E-02 4.6070E-02 5.7720E-03 1.9840E-02 2.2580E-02 2.6270E-02

4.0500E-04 1.1450E-02 2.6510E-02 2.5690E-02 1.6150E-02 6.3070E-02 6.4270E-02

4.0460E-02 2.0890E-02 3.4850E-02 6.2290E-02 1.8940E-02 1.1270E-02 3.9770E-02

5.5390E-02 4.2320E-02 3.1570E-03 1.8450E-02 3.0660E-02 2.7080E-02 1.2790E-02

3.7920E-02 5.5900E-02 4.0270E-02 2.3270E-03 1.4570E-02 1.7190E-02 1.8660E-02

6.1070E-04 1.0370E-02 9.0290E-03 1.3760E-02 1.3860E-02 1.9490E-02 1.2820E-02

1.5400E-02 1.7440E-02 2.1440E-02 8.0540E-03 5.4470E-03 1.0680E-02 1.4440E-02

1.0240E-02 9.9510E-03 1.0480E-02 1.1360E-02 4.6450E-03 1.2270E-03 5.3180E-03

5.5770E-03 6.3430E-03 9.1010E-03 3.3970E-03 3.3990E-03 2.0390E-03 3.3620E-03

4.0900E-03 3.5500E-03 1.9610E-03 1.1920E-03 3.7350E-03 4.1340E-03 3.6490E-03

4.5780E-02 1.5590E-01 1.2770E+00 1.0720E+00 8.6770E-02 4.7270E-01 1.8060E-01

1.4010E-02 3.5120E-02 4.0690E-02 3.9690E-02 1.1890E-02 1.4790E-02 1.2320E-02

1.5620E-02 8.5060E-03 2.1380E-02 1.2860E-02 1.2990E-03 1.3810E-02 2.3810E-02

3.5970E-02 6.5200E-05 6.3420E-03 1.4310E-02 1.6520E-02 6.5850E-05 3.5670E-04

8.1090E-03 2.3490E-02 1.8610E-03 1.7730E-02 4.0440E-02 3.1930E-02 8.9350E-03

1.0670E-02 1.8930E-02 2.9930E-02 1.9050E-03 1.0480E-02 2.6270E-02 3.5710E-02

6.3670E-04 2.6930E-03 1.2640E-02 2.3700E-02 2.9810E-03 1.0580E-02 2.4460E-02

3.5420E-02 1.9710E-04 2.3790E-03 1.0140E-02 1.3680E-02 8.2270E-05 5.6760E-04

7.2940E-03 8.9130E-03 3.1340E-03 1.4740E-02 5.2010E-03 5.3120E-03 1.0260E-02

8.0540E-03 7.5490E-03 1.2190E-03 4.5860E-03 6.5980E-03 8.0000E-03 2.9300E-03

7.5650E-03 4.6450E-03 3.0790E-03 3.9650E-04 7.8890E-04 3.5350E-03 4.4740E-03

4.5500E-03 1.3390E-03 2.0900E-03 9.8860E-04 1.4030E-03 1.7820E-03 1.9610E-03

1.3360E-03 1.3270E-04 1.2180E-03 2.4720E-03 2.5330E-03 2.8090E+00 4.2840E-01

5.6280E-02 7.5560E+00 4.2770E-01 2.1560E-01 2.7450E-01 1.2790E-01 5.4780E-02

2.2270E-02 4.5550E-02 2.0200E-02 4.8250E-03 5.5150E-03 4.9790E-02 1.0330E-02

3.7400E-03 1.1850E-01 4.2810E-02 1.3450E-02 2.6120E-03 7.0530E-02 2.8680E-02

1.1270E-02 2.5330E-03 8.5560E-02 3.6490E-02 1.2400E-02 2.0850E-03 1.4630E-01

4.8880E-02 7.6190E-03 1.0910E-03 1.5170E-01 5.1670E-02 1.2010E-02 1.9400E-03

4.4510E-02 1.8260E-02 7.2040E-03 2.2230E-03 8.2500E-02 3.1670E-02 9.1760E-03

1.8340E-03 2.2210E-01 6.0690E-02 1.5640E-02 2.1290E-03 1.0250E-01 3.1430E-02

8.4060E-03 1.6560E-03 1.7800E-01 6.3790E-02 1.8300E-02 3.5400E-03 9.4580E-02

2.6660E-02 1.5230E-02 4.7700E-02 2.3760E-02 8.8770E-03 1.8650E-03 6.4160E-02

2.2560E-02 7.1320E-03 1.7550E-03 1.6920E-02 7.0400E-03 2.2720E-03 4.4140E-04

2.2230E-02 1.0600E-02 4.0130E-03 1.1340E-03 3.1300E-02 1.9900E-02 7.2110E-03

3.0060E-03 2.2040E-02 1.0950E-02 3.9790E-03 6.5390E-04 2.4310E-02 1.3040E-02

6.5560E-03 2.4220E-03 2.7840E+00 4.8540E-01 2.7210E+00 3.6650E+00 1.7020E-01

1.1440E-01 1.5240E-01 9.3600E-02 4.5260E-02 2.9270E-02 1.6570E-02 1.0890E-02

4.4120E-03 2.3360E-02 2.2820E-02 4.8900E-03 3.6210E-02 5.7260E-02 3.3520E-02

1.4910E-02 2.2170E-02 3.5880E-02 2.0140E-02 1.2400E-02 2.6350E-02 3.9350E-02

2.9270E-02 1.4270E-02 6.1370E-02 5.2780E-02 4.1520E-02 7.3970E-03 6.4530E-02

6.0580E-02 3.7440E-02 1.1310E-02 1.8240E-02 2.0910E-02 1.1900E-02 6.7250E-03

2.7130E-02 3.6650E-02 2.6250E-02 1.0110E-02 6.0680E-02 1.1440E-01 4.7830E-02

1.7620E-02 2.5410E-02 5.3140E-02 2.7390E-02 9.2940E-03 4.6410E-02 8.9020E-02

5.6270E-02 2.0600E-02 4.9450E-02 5.0250E-02 9.5680E-03 2.7170E-02 1.8440E-02

1.2440E-02 7.6840E-03 2.2560E-02 3.0040E-02 1.6730E-02 7.1640E-03 8.3700E-03

6.7240E-03 4.2100E-03 2.0200E-03 9.4710E-03 9.0580E-03 7.6380E-03 4.1240E-03

2.5040E-02 1.1560E-02 9.3270E-03 3.2040E-03 1.2540E-02 8.2780E-03 5.5630E-03

3.7290E-03 1.3040E-02 1.1310E-02 7.0370E-03 5.6780E-03 2.1570E+00 8.8190E-01

2.6160E+00 1.4190E+00 5.2880E-02 7.8380E-02 1.1170E-01 7.0090E-02 1.6370E-02

1.5870E-02 1.0180E-02 3.3090E-03 1.0970E-02 1.7500E-02 9.8500E-03 9.5200E-03

2.7570E-02 4.0450E-02 2.8890E-02 7.1490E-03 1.4160E-02 2.7860E-02 1.8820E-02

5.6320E-03 2.0600E-02 2.8630E-02 2.7070E-02 1.7190E-02 5.0160E-02 2.6900E-02

2.8070E-02 2.1730E-02 4.7260E-02 3.6860E-02 2.4520E-02 7.2020E-03 1.1900E-02

1.4920E-02 9.2890E-03 6.2010E-03 2.2460E-02 2.4190E-02 2.2190E-02 1.5640E-02

4.7820E-02 7.8430E-02 3.8470E-02 5.5570E-03 2.1580E-02 3.6460E-02 2.2870E-02

9.0220E-03 4.0010E-02 6.1980E-02 4.8620E-02 2.9080E-02 3.5220E-02 1.7690E-02

1.2820E-02 1.4680E-02 1.4420E-02 7.3210E-03 7.1330E-03 1.6730E-02 2.0300E-02

1.3200E-02 3.5060E-03 5.1740E-03 4.7040E-03 2.6060E-03 3.0250E-03 6.7940E-03

6.3320E-03 6.5740E-03 1.8780E-02 6.8090E-03 7.2540E-03 4.0050E-03 5.8280E-03

6.5680E-03 6.8430E-03 3.3400E-03 6.5550E-03 7.0360E-03 8.8780E-03 5.3350E-03

3.1300E-01 9.4340E-01 2.0210E+00 2.2020E-02 4.4920E-02 6.2300E-02 5.7440E-02

7.8160E-03 1.3390E-02 6.9970E-03 2.2060E-03 5.2760E-03 8.9460E-03 1.1320E-02

1.3100E-03 1.0330E-02 2.2950E-02 3.6360E-02 8.0100E-04 7.7520E-03 1.2830E-02

2.3950E-02 9.4920E-05 6.4880E-03 1.7940E-02 3.0100E-02 3.4500E-03 1.9410E-02

3.8140E-02 2.0540E-02 5.4200E-03 2.3110E-02 3.5350E-02 2.3020E-02 2.2230E-03

6.7240E-03 9.2880E-03 1.0630E-02 9.6630E-04 6.6060E-03 1.8290E-02 2.4270E-02

2.1290E-03 1.7630E-02 3.8470E-02 6.2020E-02 8.7400E-04 5.9200E-03 1.7410E-02

3.3440E-02 1.0950E-03 9.7070E-03 3.2780E-02 6.2700E-02 1.8000E-02 1.5370E-02

2.1130E-02 4.3500E-03 1.2120E-02 1.0240E-02 6.0820E-03 1.7560E-03 7.1640E-03

1.3210E-02 1.6120E-02 1.0790E-03 3.4520E-03 3.7360E-03 2.3760E-03 7.0620E-04

2.9920E-03 5.5920E-03 5.8250E-03 1.2520E-02 3.8960E-03 4.3110E-03 3.8370E-03

1.7410E-03 5.8100E-03 4.6890E-03 2.8140E-03 2.4220E-03 5.6780E-03 5.3350E-03

5.1020E-03 3.4900E-01 7.9210E-02 9.7590E-02 5.5550E-02 3.0510E-02 1.5740E-02

1.1320E-01 6.5420E-02 1.7800E-02 2.5880E-02 6.0310E-02 2.1390E-02 9.4580E-03

3.0240E-02 2.1640E-02 1.2650E-02 5.6820E-03 1.1850E-02 6.8750E-03 3.5680E-03

1.3870E-03 1.9300E-03 1.5870E-03 1.0900E-03 5.9910E-04 5.1150E-02 2.5910E-02

1.0650E-02 3.1970E-03 6.6090E-02 4.2040E-02 1.7630E-02 4.3050E-03 2.1360E-02

1.7140E-02 1.2470E-02 7.9980E-03 3.5260E-02 2.4090E-02 1.3470E-02 5.6220E-03

1.1000E-01 4.4810E-02 1.7130E-02 6.8350E-03 3.2930E-02 2.2860E-02 1.4500E-02

8.3050E-03 9.1690E-03 4.3580E-03 1.7930E-03 5.6130E-04 1.3330E-01 3.0720E-02

8.9410E-03 9.5620E-02 3.7830E-02 1.3690E-02 4.3730E-03 1.0130E-01 4.9830E-02

2.5220E-02 1.3120E-02 3.0970E-02 1.7630E-02 6.8880E-03 1.5180E-03 8.9120E-03

7.0210E-03 4.5930E-03 2.4930E-03 3.9600E-02 2.4740E-02 1.3990E-02 7.9950E-03

1.3090E-02 1.0640E-02 7.1120E-03 3.4820E-03 1.5060E-02 9.6170E-03 5.6510E-03

2.9730E-03 2.2930E-01 3.3790E-02 4.1750E-02 3.4620E-02 2.2770E-02 6.4010E-02

2.7240E-02 3.9450E-02 1.7260E-02 2.1380E-02 3.0790E-02 8.5930E-03 1.4980E-02

8.5360E-03 1.0440E-02 1.2850E-02 2.7640E-03 4.4020E-03 4.5360E-03 3.9630E-03

1.1320E-03 5.7660E-04 7.0760E-04 1.0550E-03 1.8290E-02 1.7620E-02 1.5470E-02

9.2240E-03 3.4460E-02 1.3290E-02 2.1090E-02 1.7830E-02 1.4310E-02 1.0580E-02

8.3840E-03 6.1160E-03 1.5820E-02 9.9530E-03 1.2110E-02 1.4420E-02 1.2960E-02

5.1500E-02 3.8290E-02 1.6580E-02 1.5280E-02 1.2910E-02 1.2540E-02 1.1650E-02

8.5900E-04 3.7950E-03 3.6300E-03 2.2950E-03 3.0720E-02 6.6800E-02 1.7840E-02

2.0560E-02 4.1560E-02 2.7580E-02 1.1160E-02 2.4070E-02 4.7910E-02 3.6210E-02

1.8380E-02 1.3600E-02 7.2710E-03 9.6300E-03 7.4100E-03 5.3510E-03 2.8380E-03

3.2310E-03 3.9270E-03 2.6400E-02 1.3990E-02 1.3670E-02 3.4860E-03 9.7810E-03

6.0760E-03 4.4710E-03 2.5650E-03 6.6630E-03 6.0720E-03 5.3660E-03 4.1000E-03

1.0930E-02 1.6630E-02 2.0320E-02 1.8460E-02 1.7770E-02 3.9110E-02 8.8140E-03

8.6280E-03 9.4530E-03 8.5930E-03 1.2340E-02 1.5880E-03 8.8360E-03 8.1070E-03

4.8760E-03 2.1060E-04 1.6310E-03 2.7230E-03 3.1660E-03 1.4190E-04 6.3940E-04

6.0560E-04 3.4870E-04 3.2860E-03 1.1010E-02 1.0250E-02 5.7610E-03 3.4260E-03

2.2670E-02 1.3350E-02 3.8600E-03 6.4860E-03 6.0370E-03 4.4190E-03 2.6910E-03

1.2200E-03 9.5290E-03 9.2870E-03 6.1030E-03 4.4880E-03 6.2430E-03 2.1300E-02

2.7510E-02 4.1820E-03 7.8890E-03 7.8920E-03 6.2310E-03 5.6700E-05 5.0970E-04

1.8020E-03 2.9110E-03 8.9400E-03 1.7840E-02 3.0880E-02 4.9630E-03 1.1490E-02

1.9310E-02 1.4680E-02 9.8610E-03 1.0730E-02 1.9950E-02 2.2650E-02 1.0630E-03

9.1550E-03 6.2610E-03 2.4170E-03 1.0820E-03 2.9300E-03 2.4070E-03 1.2520E-03

1.3200E-02 7.9950E-03 3.4860E-03 4.0940E-03 4.5890E-03 3.8780E-03 2.1540E-03

8.2040E-04 2.0640E-03 3.3410E-03 3.2540E-03 2.4420E-03 5.7250E+00 4.2650E-01

1.4120E-01 1.0590E+00 1.5400E-01 3.4470E-02 3.9510E-02 7.3190E-02 2.4470E-02

5.5310E-03 1.0660E+00 1.3100E-01 1.9550E-02 2.8950E-03 1.8890E-01 6.6150E-02

1.8200E-02 2.5890E-03 1.9540E-01 7.1660E-02 1.6180E-02 1.7730E-03 1.4200E-01

3.4200E-02 1.2850E-02 3.8680E-03 2.5860E-01 3.7040E-02 1.1820E-02 2.7610E-03

4.0380E-01 8.3730E-02 1.9300E-02 4.0020E-03 2.8370E-01 6.2970E-02 1.4980E-02

2.4980E-03 8.2370E-01 1.1210E-01 1.2900E-02 2.1440E-03 1.1400E+00 1.6740E-01

3.1200E-02 5.4490E-03 1.8070E-01 7.0210E-02 2.1340E-02 3.6800E-03 3.1500E-02

1.0670E-02 1.6160E-03 4.5070E-02 1.4160E-02 4.1510E-03 1.3040E-03 1.2190E-01

4.1960E-02 1.7520E-02 5.2640E-03 1.2580E+01 5.2450E-01 9.9780E-02 3.8920E-02

2.8860E+01 3.5640E+00 3.7230E-01 5.2680E-02 1.8440E-01 5.7990E-02 2.7370E-02

3.2790E-03 5.2120E+00 1.9710E-01 8.1890E-03 2.9270E-03 1.6640E+01 2.0700E+00

1.1150E-01 6.8550E-03 6.6910E+00 3.8780E-01 4.5010E-01 4.6510E-01 8.4090E-02

3.1610E-02 4.1050E-02 2.8170E-02 1.3350E-02 5.7840E-02 7.6730E-01 1.4240E-01

2.2440E-02 4.7990E-02 8.4120E-02 5.8230E-02 2.1230E-02 4.9880E-02 8.9800E-02

7.5930E-02 1.9130E-02 4.6230E-02 7.6900E-02 2.0910E-02 9.2570E-03 6.1790E-02

1.5280E-01 2.3870E-02 9.8370E-03 8.2900E-02 2.3280E-01 7.2700E-02 2.0400E-02

4.1260E-02 2.0000E-01 6.3010E-02 1.7000E-02 1.1040E-01 5.1660E-01 1.2150E-01

1.4170E-02 8.3690E-02 8.3170E-01 1.7480E-01 3.5180E-02 5.3380E-02 8.4050E-02

5.8880E-02 2.4370E-02 1.7770E-02 1.1020E-02 6.2540E-03 1.8090E-02 2.0450E-02

1.0390E-02 2.8670E-03 4.1880E-02 6.4960E-02 2.6040E-02 1.6450E-02 1.9600E+00

8.1360E+00 4.7070E-01 5.9230E-02 1.5450E+00 2.0220E+01 4.1490E+00 4.3050E-01

1.4750E-01 3.8260E-02 1.6160E-02 1.6490E-02 7.7750E-01 3.3440E+00 2.1070E-01

5.1470E-03 2.0680E+00 1.0440E+01 2.4290E+00 1.3510E-01 5.0130E+00 1.7480E-01

3.6320E-01 2.1100E-01 2.3710E-02 2.0900E-02 2.5240E-02 1.5790E-02 1.0790E-02

5.2350E-02 5.6720E-01 1.1300E-01 8.5510E-03 4.1400E-02 5.7740E-02 5.0760E-02

1.5960E-03 5.3160E-02 5.6970E-02 6.4280E-02 1.8760E-02 3.3860E-02 5.0360E-02

1.2250E-02 1.8740E-02 5.2590E-02 1.0020E-01 1.4870E-02 1.9310E-02 7.2200E-02

1.5870E-01 5.6720E-02 9.5990E-03 3.5500E-02 1.6400E-01 5.2540E-02 1.2520E-02

1.2080E-01 3.4950E-01 9.2860E-02 1.9360E-02 7.1760E-02 6.4090E-01 1.4120E-01

1.0940E-02 4.4160E-02 5.8410E-02 5.1990E-02 8.6390E-03 1.0640E-02 7.0030E-03

6.7610E-03 1.3810E-02 1.1900E-02 6.4520E-03 1.7500E-02 2.6040E-02 4.8130E-02

2.0470E-02 2.6550E-01 2.2000E+00 5.1850E+00 3.0790E-01 1.3670E-01 1.6800E+00

1.4680E+01 3.2290E+00 1.1060E-01 2.0020E-02 1.9250E-02 1.3910E-02 7.5930E-02

9.1660E-01 2.1140E+00 1.4580E-01 1.1100E-01 2.4290E+00 6.9250E+00 1.8390E+00

6.3370E-02 1.8300E-01 2.5230E-01 1.5810E-02 9.3450E-03 1.8460E-02 1.3480E-02

1.3580E-03 1.1900E-02 4.2040E-02 4.4010E-01 1.8390E-04 9.8750E-03 3.4310E-02

6.5820E-02 9.6000E-05 1.8140E-03 4.1370E-02 7.1540E-02 7.5270E-03 1.6260E-02

2.4180E-02 2.8820E-02 5.9920E-03 1.8650E-02 3.9370E-02 6.0530E-02 4.0020E-03

2.0400E-02 5.6540E-02 1.2420E-01 1.1490E-03 1.0700E-02 2.9120E-02 1.4030E-01

2.1190E-03 1.4150E-02 9.2540E-02 2.7450E-01 2.7270E-03 2.1120E-02 5.8470E-02

5.0560E-01 8.6300E-04 1.2240E-02 3.6900E-02 6.0380E-02 3.4020E-03 8.5510E-03

5.5630E-03 2.5420E-03 5.9700E-03 9.8690E-03 7.4710E-03 5.2620E-03 1.6450E-02

2.0470E-02 3.2630E-02 7.3400E-02 2.7700E-01 1.6640E+00 3.2900E+00 2.9890E-02

1.3720E-01 1.2810E+00 1.1700E+01 7.3730E-02 7.8200E-03 1.9960E-02 7.6780E-03

7.2120E-03 9.6490E-02 7.0190E-01 1.3640E+00 6.7790E-03 1.3500E-01 1.8390E+00

5.5540E+00 1.9580E+00 1.3800E-01 4.1980E-01 3.4040E-01 1.6230E-01 1.7120E-02

6.5910E-02 3.2340E-02 1.4500E-02 5.8140E-03 1.6600E-02 9.2240E-03 4.5490E-03

1.7980E-03 1.7990E-02 9.3260E-03 4.2030E-03 1.4190E-03 7.9580E-02 7.4270E-02

6.1710E-02 3.5580E-02 1.9580E-01 6.5200E-02 2.2340E-02 8.4690E-03 7.5180E-02

4.0190E-02 1.9390E-02 8.1280E-03 5.1970E-02 2.6260E-02 1.2560E-02 5.5380E-03

6.5990E-02 3.4270E-02 1.5500E-02 5.6940E-03 9.8100E-02 4.7950E-02 2.0750E-02

7.4090E-03 4.3460E-02 2.5140E-02 1.3050E-02 5.6450E-03 8.0290E-01 3.5130E-01

9.9650E-03 5.3280E-01 1.4550E-01 3.0380E-02 6.1750E-03 8.0030E-02 5.8390E-02

3.3740E-02 1.5290E-02 1.0060E+01 2.5860E+00 5.0640E-01 1.1580E-01 6.7500E-01

3.3610E-01 1.6490E-01 8.3740E-02 5.0600E+00 8.0790E+00 3.4560E+00 1.0520E-01

8.8840E+00 2.1760E+00 3.1660E-01 1.9190E-02 6.2670E-02 2.6200E-02 9.9950E-03

3.6020E-03 1.6490E+00 2.7950E-01 1.6150E-01 5.9690E-02 1.2680E-01 1.1100E-02

2.7350E-02 2.4680E-02 1.5920E-02 3.5800E-03 6.2220E-03 6.3600E-03 5.2890E-03

2.2180E-03 7.0830E-03 7.2910E-03 5.3650E-03 7.1470E-02 5.9740E-02 2.8490E-02

7.9530E-03 2.6470E-02 9.8880E-02 5.5220E-02 1.4640E-02 2.2410E-02 2.8920E-02

2.5720E-02 1.8230E-02 9.6430E-03 2.2240E-02 1.9740E-02 1.2560E-02 1.8260E-02

2.4300E-02 2.2240E-02 1.6170E-02 1.6220E-02 3.9310E-02 3.6260E-02 2.4360E-02

1.0840E-02 1.6250E-02 1.6680E-02 1.4430E-02 3.5090E-01 1.1180E-01 3.1350E-01

3.1930E-02 2.6560E-01 1.4580E-01 3.4080E-02 4.5530E-02 2.2940E-02 2.7230E-02

2.9390E-02 3.9440E-01 5.1810E+00 2.7190E+00 5.2740E-01 1.2060E-01 3.0640E-01

2.6190E-01 1.5100E-01 3.3730E+00 3.4560E+00 1.2310E+00 3.0750E+00 2.2110E-01

4.5010E+00 2.3900E+00 4.7620E-01 8.5450E-03 2.7710E-02 2.1490E-02 1.0570E-02

1.3950E-01 1.7100E-02 1.2650E-01 2.7790E-02 2.0230E-03 6.1710E-03 1.3520E-02

1.7790E-02 2.5470E-04 2.1050E-03 3.7160E-03 4.6150E-03 4.9940E-05 1.2920E-03

3.7070E-03 5.8830E-03 4.9790E-02 1.6850E-02 1.0410E-02 6.6590E-03 1.0900E-02

1.1570E-02 3.9690E-02 3.5540E-02 4.4790E-03 1.2550E-02 1.6120E-02 1.4480E-02

2.3360E-03 5.1080E-03 1.0610E-02 1.3870E-02 2.4220E-03 1.0830E-02 1.4300E-02

1.2840E-02 1.8080E-03 9.5300E-03 2.0420E-02 2.6320E-02 1.2490E-03 6.2320E-03

9.9510E-03 1.1660E-02 9.9640E-03 3.1320E-01 6.4770E-02 6.6880E-03 1.8550E-02

1.1050E-01 1.0300E-01 8.3430E-03 2.5900E-02 1.9380E-02 8.8360E-03 1.4580E-01

1.8430E-01 2.0720E+00 2.0020E+00 4.4180E-02 5.7390E-02 1.3320E-01 1.8510E-01

1.6860E+00 1.0520E-01 3.0730E+00 7.0060E-01 8.5940E-03 1.5520E-01 1.8490E+00

1.7850E+00 1.9760E-03 4.6400E-03 1.2430E-02 1.5110E-02 2.5410E+00 1.6940E+00

8.4730E-01 6.0540E-02 5.0450E-02 4.0360E-02 3.0270E-02 2.7490E-04 2.3570E-04

1.9640E-04 1.5710E-04 8.2940E-04 7.2570E-04 6.2200E-04 5.1840E-04 3.6740E+00

2.7620E+00 1.8450E+00 9.2340E-01 1.0660E-01 7.9960E-02 5.3340E-02 2.6680E-02

4.5610E-03 3.6500E-03 2.7370E-03 1.8250E-03 2.0590E-02 1.7150E-02 1.3720E-02

1.0290E-02 2.0730E-02 1.6580E-02 1.2440E-02 8.2910E-03 1.4890E-02 1.2400E-02

9.9180E-03 7.4420E-03 2.3440E-04 2.0090E-04 1.6740E-04 1.3390E-04 3.0230E-02

2.0150E-02 1.0070E-02 2.8020E-02 2.1040E-02 1.4040E-02 7.0220E-03 1.9040E-02

1.5240E-02 1.1430E-02 7.6210E-03 5.7450E-02 4.3090E-02 2.8730E-02 1.4370E-02

1.0020E-02 8.3540E-03 6.6860E-03 5.0140E-03 3.2120E-02 1.5140E-02 1.0080E-02

5.0450E-03 4.3640E-02 3.2750E-02 2.1840E-02 1.0920E-02 3.2260E-03 2.5810E-03

1.9360E-03 1.2900E-03 2.8050E+00 1.2980E+00 2.7390E-02 1.9330E-02 1.0970E-02

4.9560E-03 4.7410E-02 2.1960E-02 8.2530E-03 2.2790E-03 9.7590E-04 8.0050E-04

5.3860E-04 2.8730E-04 6.5890E+00 4.2500E+00 1.6980E+00 3.4800E-01 8.0750E-02

4.6350E-02 2.0860E-02 6.7530E-03 1.0200E-01 8.1590E-02 6.8420E-02 5.1630E-02

5.7380E-02 4.3510E-02 2.8820E-02 1.6640E-02 3.6910E-02 2.2690E-02 1.2870E-02

6.5380E-03 2.5260E-02 1.1660E-02 4.6670E-03 1.4740E-03 1.4550E-02 6.6670E-03

2.6590E-03 8.2640E-04 3.1230E-02 3.1520E-02 1.9900E-02 5.8340E-02 3.4180E-02

1.6950E-02 6.4660E-03 5.9350E-02 3.1830E-02 1.5410E-02 6.5020E-03 7.6130E-02

4.8010E-02 2.2530E-02 7.3980E-03 6.9920E-03 5.0340E-03 2.8800E-03 1.2830E-03

1.9300E-02 3.3570E-02 3.3310E-02 2.1330E-02 5.7990E-02 4.2800E-02 1.9790E-02

5.5550E-03 3.7100E-02 1.5250E-02 5.7270E-03 2.0580E-03 1.0580E+00 1.2350E-02

6.5210E-03 9.1490E-03 1.1090E-02 2.7430E-03 1.9730E-02 1.8810E-02 1.1130E-02

5.6360E-04 2.7780E-04 3.5110E-04 5.3970E-04 3.4960E+00 1.0750E+00 2.1140E+00

1.9050E+00 3.5700E-02 2.5340E-02 2.5150E-02 1.6770E-02 6.7990E-02 7.1590E-02

4.4460E-02 1.8380E-02 3.2000E-02 2.1030E-02 2.1600E-02 2.2950E-02 1.5130E-02

1.4690E-02 1.3020E-02 9.8030E-03 3.1820E-03 1.0350E-02 9.3660E-03 5.8080E-03

1.1620E-03 5.9800E-03 5.6850E-03 3.4730E-03 3.1460E-02 1.7970E-02 5.6140E-03

2.6650E-02 2.1390E-02 1.8250E-02 1.1000E-02 1.7750E-02 2.2970E-02 2.0460E-02

1.4400E-02 3.9210E-02 2.1440E-02 2.4220E-02 1.7830E-02 3.1830E-03 2.1310E-03

2.4570E-03 2.8790E-03 1.2860E-02 3.3310E-02 1.9950E-02 5.5590E-03 3.7790E-02

8.9500E-03 1.9240E-02 1.8090E-02 4.7230E-03 1.6520E-02 1.2700E-02 6.0670E-03

1.2040E-03 7.1980E-03 7.3340E-03 3.7160E-03 1.3830E-04 1.6340E-03 9.1700E-03

1.5310E-02 5.8270E-05 3.2190E-04 3.0910E-04 1.6680E-04 2.0480E-01 2.4090E+00

1.3520E+00 3.3010E-01 7.2190E-03 2.0960E-02 1.5950E-02 7.3440E-03 4.6890E-02

2.0320E-02 1.7250E-02 1.6760E-02 8.1880E-03 1.6770E-02 1.4630E-02 9.2040E-03

4.4050E-03 7.7370E-03 7.9710E-03 6.2280E-03 2.6540E-04 1.9090E-03 5.1070E-03

7.0740E-03 8.0240E-05 6.8880E-04 2.7690E-03 4.6120E-03 1.9830E-02 5.6120E-03

2.0350E-03 7.6680E-03 1.4030E-02 1.1200E-02 5.7220E-03 3.6210E-03 9.9110E-03

1.2750E-02 1.1510E-02 7.9140E-03 2.2990E-02 1.4870E-02 5.5720E-03 3.9370E-04

1.8530E-03 1.8490E-03 1.2190E-03 6.4310E-03 2.1330E-02 5.5580E-03 2.5120E-03

5.1120E-03 2.3910E-02 1.1440E-02 1.5580E-03 1.1500E-03 2.5310E-03 7.3190E-03

9.0350E-03 1.7690E+00 6.1970E-02 7.8620E-03 2.9540E+00 1.1860E+00 1.2620E-01

6.7770E-03 5.1310E+00 1.3010E+00 1.8200E-01 9.2880E-03 5.6020E-02 1.2270E-02

3.1520E-03 7.4510E-04 2.5300E+00 2.8410E-01 5.2380E-03 8.0100E-04 2.3330E+00

4.8350E-01 4.6820E-02 1.9610E-03 9.4160E-01 4.4530E-01 4.8040E-02 2.0340E-03

4.3980E-01 1.2820E-01 3.4450E-02 6.9350E-03 6.8380E-01 1.8690E-01 4.6680E-02

7.8870E-03 3.2850E-01 2.0550E-01 2.2200E-02 1.6200E-03 3.9190E-02 6.7540E-03

1.8040E-04 1.9430E-01 2.2940E-02 1.7050E-03 9.3580E-05 2.0360E-01 3.9820E-02

3.4910E-03 3.8700E-04 1.9440E-01 2.8840E-02 8.8190E-03 9.2830E-04 9.9440E-02

3.4600E-02 7.5540E-03 1.3140E-03 3.2090E-02 9.7950E-03 6.0260E-03 4.4050E-04

6.9450E-02 8.0850E-03 1.8520E-03 1.5030E-04 1.1350E-01 3.2190E-02 8.2190E-03

1.5260E-03 3.3880E+00 7.1750E-02 9.3390E-01 3.6650E+00 1.3670E+00 1.4970E-01

1.0560E+00 5.0930E+00 2.3050E+00 2.1690E-01 2.0720E-02 2.8170E-02 8.7490E-03

2.5260E-03 6.9940E-01 1.3470E+00 2.9580E-01 4.8140E-03 6.2290E-01 1.2080E+00

5.0200E-01 5.5280E-02 4.4520E-01 1.0020E+00 4.8800E-01 5.7340E-02 1.5200E-01

2.2020E-01 9.9930E-02 3.4830E-02 1.8660E-01 3.7180E-01 1.6280E-01 5.0980E-02

1.7810E-01 3.2910E-01 2.3630E-01 2.5960E-02 1.9330E-02 1.4890E-02 4.2210E-03

5.4680E-02 1.0450E-01 2.1470E-02 1.8160E-03 5.2080E-02 1.0770E-01 4.2530E-02

3.8810E-03 5.9910E-02 1.0950E-01 1.6070E-02 8.7520E-03 3.4600E-02 9.3400E-02

3.2060E-02 8.2180E-03 2.6740E-02 7.8370E-03 2.0740E-03 3.6390E-03 1.9470E-02

3.9380E-02 5.4350E-03 1.8980E-03 3.8660E-02 5.6640E-02 2.5740E-02 8.5150E-03

1.9820E+00 5.3200E-02 1.0880E+00 2.6610E+00 1.0910E+00 1.0350E-02 1.3030E+00

6.0610E+00 1.8220E+00 7.4000E-03 1.6930E-02 1.8020E-02 5.7710E-03 1.3850E-01

7.2710E-01 8.0560E-01 2.0700E-01 1.0390E-01 6.4020E-01 7.7640E-01 3.9070E-01

4.8020E-02 4.8800E-01 6.6870E-01 3.8920E-01 4.7980E-02 1.2300E-01 1.5360E-01

8.1260E-02 4.6540E-02 1.6270E-01 2.6990E-01 1.3920E-01 8.3690E-03 2.1090E-01

2.0770E-01 1.8820E-01 8.1470E-03 1.4220E-02 8.3740E-03 1.2070E-02 5.4630E-02

6.4290E-02 1.5020E-02 8.2280E-03 5.4880E-02 6.9090E-02 3.2740E-02 1.9900E-02

4.9510E-02 7.5090E-02 1.0880E-02 7.5540E-03 3.2060E-02 6.8200E-02 2.6790E-02

2.1390E-02 4.7290E-03 3.2130E-03 2.9020E-03 5.3610E-03 1.7830E-02 2.6010E-02

3.7530E-03 1.1710E-02 3.1750E-02 3.9220E-02 2.0940E-02 1.7740E-03 6.2250E-02

8.4980E-01 2.7560E+00 4.8690E-04 1.2000E-02 9.9810E-01 5.9050E+00 2.4820E-03

7.6140E-03 1.3380E-02 1.2580E-02 1.5770E-02 1.7720E-01 5.8390E-01 6.3210E-01

8.9570E-03 1.2540E-01 5.1790E-01 7.8170E-01 2.0290E-03 5.7330E-02 3.8920E-01

7.4710E-01 1.1750E-02 5.0970E-02 1.0380E-01 1.3770E-01 7.8690E-03 5.0960E-02

1.3920E-01 2.6570E-01 7.6310E-04 9.4340E-03 1.6330E-01 2.8770E-01 2.4980E-03

1.0270E-02 1.0300E-02 1.7360E-03 1.5020E-02 4.3960E-02 4.8780E-02 9.3400E-04

9.7600E-03 4.3980E-02 6.9050E-02 5.3960E-03 2.1910E-02 3.9860E-02 4.9370E-02

1.3140E-03 8.2180E-03 2.6790E-02 6.4630E-02 1.6040E-02 2.0610E-03 4.9160E-03

1.1320E-03 1.1840E-03 6.1980E-03 1.4340E-02 1.8010E-02 2.6820E-03 1.2610E-02

2.6770E-02 3.5650E-02 2.6980E+00 2.3920E-01 6.8800E-03 5.4410E+00 1.0220E+00

1.6460E-01 8.0280E-03 3.5360E-02 8.4690E-03 2.7190E-03 5.7580E-05 5.9070E-02

1.9350E-02 2.3110E-04 6.6530E-06 1.7330E-01 3.3000E-02 2.5940E-03 7.3830E-05

1.0560E+00 3.6270E-01 2.2980E-02 2.1090E-04 1.2760E+00 1.7940E-01 3.0150E-02

3.4560E-03 3.3810E-01 2.6060E-01 2.9980E-02 3.8230E-03 1.0910E+00 4.5500E-01

5.9820E-02 3.5410E-03 1.1850E-02 6.6110E-04 2.5160E-05 6.3540E-02 1.2620E-02

3.5730E-03 3.4010E-05 2.2000E-01 1.3770E-02 1.6560E-03 1.9680E-04 3.4980E-02

1.0390E-02 3.0680E-04 4.5400E-05 2.1770E-01 4.2500E-02 4.6460E-03 2.8440E-04

2.9650E-04 2.5590E-02 3.6890E-03 2.1440E-05 3.4790E-02 1.1310E-02 3.7680E-03

1.9470E-05 3.5980E-01 3.3500E-02 3.4750E-03 5.5090E-05 4.8040E+00 2.8010E-01

7.9910E-01 5.1940E+00 2.2910E+00 2.9410E-01 1.4980E-02 1.8030E-02 4.0010E-03

2.9510E-03 2.9450E-02 1.8020E-02 1.9710E-02 2.4840E-04 5.0330E-02 9.0980E-02

3.4540E-02 3.0140E-03 4.4210E-01 1.1750E+00 4.1960E-01 2.7220E-02 3.1280E-01

7.6840E-01 1.6200E-01 3.2480E-02 3.0710E-01 6.3120E-01 2.7930E-01 3.3010E-02

2.8710E-01 1.2490E+00 4.9120E-01 6.8890E-02 5.3170E-03 5.0390E-03 3.9970E-04

2.4710E-02 3.3010E-02 6.6920E-03 3.9350E-03 3.7860E-02 1.4880E-01 1.3600E-02

1.7850E-03 1.6530E-02 1.2050E-02 1.0340E-02 2.7950E-04 5.1790E-02 1.2310E-01

4.5470E-02 5.3310E-03 2.5420E-04 1.3000E-02 9.8470E-03 2.2760E-03 1.7280E-02

1.6360E-02 4.9630E-03 4.1710E-03 7.2230E-02 2.3010E-01 3.3420E-02 4.0740E-03

3.7610E+00 1.1510E-01 1.9370E+00 6.6740E+00 2.8340E+00 6.4310E-03 1.0280E-02

1.3630E-02 2.9530E-03 8.9510E-03 2.5700E-02 7.6300E-03 1.3910E-02 9.7780E-03

5.1720E-02 6.0590E-02 2.6950E-02 5.0630E-02 5.0460E-01 8.4560E-01 3.2970E-01

7.1060E-02 3.0830E-01 5.5320E-01 1.3100E-01 4.9640E-02 3.2580E-01 4.4160E-01

2.2440E-01 5.9590E-02 4.8760E-01 9.3960E-01 4.0450E-01 1.9950E-03 4.7290E-03

2.2290E-03 9.5510E-03 1.8670E-02 2.3810E-02 4.9210E-03 5.7780E-03 4.2340E-02

1.0960E-01 1.0720E-02 5.0800E-03 1.4490E-02 5.7980E-03 7.2790E-03 7.9130E-03

5.5910E-02 8.8960E-02 3.6660E-02 2.1180E-04 5.6730E-03 9.8610E-03 5.3990E-03

8.2830E-03 1.0150E-02 1.3480E-02 3.7220E-03 1.2180E-02 7.7810E-02 1.6670E-01

2.6470E-02 1.0170E-03 1.3370E-01 2.4170E+00 7.6480E+00 1.8190E-03 7.1850E-03

8.9610E-03 8.6890E-03 1.4260E-03 1.1100E-02 2.1860E-02 1.0550E-02 1.0180E-03

1.1710E-02 4.2840E-02 6.3610E-02 2.3790E-03 6.0570E-02 4.0740E-01 9.1950E-01

1.2150E-02 8.1270E-02 2.5710E-01 5.0150E-01 6.4010E-03 5.6410E-02 2.6780E-01

5.0490E-01 3.5410E-03 6.8720E-02 4.0270E-01 1.0420E+00 5.4480E-04 2.7140E-03

3.9130E-03 2.4680E-03 1.0910E-02 1.6040E-02 1.6170E-02 7.5160E-04 6.8050E-03

3.3970E-02 9.3080E-02 9.0920E-04 6.1990E-03 1.2270E-02 6.7610E-03 6.7880E-04

9.2020E-03 4.5360E-02 9.5580E-02 1.6950E-04 1.7880E-03 7.3040E-03 7.6540E-03

2.3760E-03 9.2190E-03 9.1470E-03 7.7680E-03 1.2130E-03 1.4630E-02 6.3380E-02

1.4740E-01 1.0970E+00 4.0290E-02 1.0460E-03 1.6870E-01 2.9130E-02 1.0700E-04

1.6720E-05 1.3270E-02 9.1900E-04 2.4450E-05 1.6590E-06 2.9440E-02 7.5490E-03

4.7940E-04 9.8550E-06 1.8960E+00 1.9250E-01 2.7350E-03 3.1420E-05 1.0530E-01

2.3580E-02 3.2690E-03 3.6490E-05 3.4780E-01 1.0400E-01 1.0180E-02 7.9740E-04

1.0500E+00 2.2050E-01 5.6440E-02 3.7750E-03 4.8860E-04 1.6000E-04 2.5440E-05

1.5780E-02 2.4090E-03 1.9710E-04 3.5390E-05 8.7500E-02 1.4200E-02 2.4050E-03

1.8140E-04 3.4850E-02 6.4720E-03 2.7290E-04 5.3050E-05 4.4120E-01 5.7190E-02

6.0470E-03 1.7430E-04 1.2440E-03 6.8630E-04 3.7600E-04 8.2120E-05 3.2100E-02

3.5370E-03 1.2140E-04 1.7640E-06 3.4920E-02 9.7920E-03 1.3510E-03 3.1970E-05

2.2270E+00 7.4780E-02 6.6460E-02 7.7050E-02 2.9640E-02 9.5030E-05 4.0920E-03

7.4010E-03 8.9890E-04 2.4570E-05 1.1170E-02 1.3100E-02 7.9740E-03 5.5060E-04

3.2110E-01 1.9090E+00 2.3590E-01 3.1380E-03 3.6870E-02 5.3450E-02 2.1570E-02

3.7810E-03 1.0200E-01 4.4580E-01 1.1260E-01 1.1410E-02 2.6030E-01 1.3520E+00

3.9870E-01 6.3650E-02 3.2070E-04 1.8400E-04 8.8570E-05 5.9570E-03 7.8030E-03

2.1850E-03 1.6910E-04 2.5700E-02 5.0480E-02 1.2430E-02 2.6470E-03 1.4120E-02

1.5840E-02 6.2420E-03 2.2890E-04 1.0970E-01 4.7400E-01 5.9740E-02 6.9820E-03

1.0880E-03 5.4690E-04 2.5380E-04 2.0040E-04 1.1040E-02 1.6770E-02 3.4020E-03

1.3050E-04 1.4010E-02 1.5770E-02 8.9910E-03 1.5480E-03 2.5980E+00 1.9080E-02

6.3160E-02 4.5240E-02 2.1010E-02 9.8220E-04 4.2880E-03 4.7400E-03 6.3870E-04

2.5760E-03 1.1100E-02 8.2010E-03 6.2310E-03 4.0910E-02 6.1980E-01 2.3740E+00

1.8090E-01 9.8900E-03 3.4140E-02 3.7380E-02 1.7760E-02 2.5170E-02 1.6870E-01

3.3840E-01 9.0600E-02 7.6260E-02 4.6750E-01 1.0630E+00 3.3510E-01 1.9060E-04

1.9460E-04 1.2150E-04 1.8160E-03 5.5910E-03 4.8600E-03 1.5440E-03 6.7110E-03

2.4500E-02 3.6740E-02 1.0290E-02 4.3290E-03 1.3070E-02 9.4230E-03 4.4150E-03

1.5390E-02 1.2250E-01 3.7080E-01 4.9060E-02 9.3310E-04 3.8690E-04 2.7390E-04

1.9730E-04 2.9360E-03 1.0980E-02 1.0540E-02 2.4230E-03 3.9870E-03 1.2620E-02

1.0610E-02 7.3650E-03 3.1360E-03 2.3670E-02 5.3700E-02 4.3240E-02 1.4660E-04

1.2300E-03 3.5580E-03 3.9420E-03 3.1120E-04 3.0540E-03 9.4510E-03 1.0610E-02

1.8610E-03 4.9330E-02 4.8930E-01 2.1500E+00 1.4080E-03 1.1550E-02 2.9870E-02

3.9790E-02 2.6590E-03 2.9070E-02 1.3990E-01 3.4900E-01 6.7870E-03 8.6480E-02

3.9630E-01 1.1320E+00 9.8340E-05 1.9430E-04 1.3060E-04 4.0130E-04 2.1600E-03

4.7240E-03 4.2320E-03 1.1540E-03 7.7010E-03 2.1050E-02 3.5270E-02 8.6790E-04

5.2260E-03 1.1120E-02 8.8270E-03 1.2490E-03 1.7950E-02 9.9960E-02 3.4640E-01

7.7760E-04 2.3940E-04 3.3580E-04 1.4000E-04 4.8470E-04 3.6400E-03 9.2210E-03

9.0560E-03 5.9940E-04 4.6360E-03 1.1140E-02 1.2440E-02 3.6520E+00 5.4850E-01

3.5740E-02 1.3040E-01 5.3040E-02 3.2940E-02 1.6630E-02 8.5550E-02 5.7860E-02

3.2320E-02 1.7260E-02 7.8790E-02 3.6650E-02 1.3380E-02 3.3190E-03 4.5990E-02

2.6380E-02 1.1500E-02 3.3230E-03 4.2500E-02 2.4490E-02 1.1480E-02 3.8220E-03

8.4090E-02 3.1820E-02 8.6360E-03 1.3720E-03 9.0820E-02 5.8420E-02 9.9690E-03

3.1310E-02 1.8240E-02 8.8790E-03 3.4330E-03 8.6320E-02 3.9700E-02 1.2870E-02

3.7210E-03 6.0960E-02 3.1220E-02 1.4120E-02 6.2740E-03 4.7490E-02 1.6500E-02

6.3010E-03 3.1820E-03 9.8660E-02 1.0190E-01 6.7130E-02 4.1390E-03 5.3020E-02

2.6900E-02 9.3900E-03 2.7510E-03 3.7050E-02 1.7030E-02 5.4940E-03 1.1000E-03

3.2550E+00 6.5320E-01 5.3040E-02 8.0850E-02 2.9670E-02 1.2060E-02 5.2570E-02

3.4330E-02 3.6070E-02 2.1940E-02 2.5920E-02 3.0900E-02 2.7250E-02 1.5080E-02

2.3290E-02 1.5560E-02 1.5020E-02 1.1620E-02 1.9550E-02 1.4860E-02 1.4790E-02

1.1850E-02 1.5650E-02 3.7990E-02 3.0080E-02 1.0720E-02 6.6300E-02 1.7530E-02

3.5470E-02 1.8230E-02 1.2930E-02 1.0050E-02 5.2140E-03 3.2540E-02 3.0350E-02

3.1150E-02 1.3000E-02 3.1220E-02 2.5630E-02 2.0570E-02 7.0550E-03 9.1950E-03

2.5920E-02 1.4630E-02 5.4120E-03 7.3990E-02 7.5780E-02 8.0440E-03 4.6020E-02

2.6900E-02 1.7350E-02 1.7630E-02 7.1660E-03 1.4000E-02 1.2760E-02 1.2460E-02

6.2010E-03 2.1690E+00 3.2940E-02 2.9670E-02 4.2420E-02 1.1580E-02 2.4080E-02

3.3090E-02 1.7550E-02 2.1880E-02 4.9810E-03 1.9220E-02 1.9490E-02 2.2390E-02

7.5160E-03 1.3250E-02 1.1910E-02 1.0900E-02 5.7800E-03 1.1840E-02 1.1040E-02

1.2010E-02 3.8660E-04 1.5650E-02 2.1800E-02 2.5120E-02 3.1830E-02 3.0040E-02

1.7670E-02 8.8750E-03 1.0040E-02 7.3560E-03 4.6400E-03 6.7060E-03 2.6530E-02

1.5020E-02 2.3100E-02 1.4110E-02 2.0570E-02 1.1110E-02 1.0550E-02 3.2760E-03

6.8270E-03 1.5920E-02 1.0790E-02 4.9320E-02 3.1980E-02 3.3880E-02 2.0710E-02

9.3900E-03 1.7630E-02 9.0810E-03 9.9140E-03 2.8390E-03 1.0520E-02 7.5270E-03

9.4190E-03 1.6630E-02 1.2060E-02 1.1580E-02 1.7890E-02 1.0100E-02 1.2720E-02

1.7580E-02 7.8170E-03 4.8320E-04 5.0030E-03 1.3280E-02 1.4280E-02 1.2430E-03

7.1060E-03 8.2340E-03 5.2620E-03 9.0540E-04 5.3110E-03 7.8960E-03 6.2150E-03

3.5390E-05 3.8220E-04 1.1050E-02 2.0020E-02 9.8620E-03 2.6640E-02 3.1840E-03

3.4330E-03 5.2120E-03 4.6380E-03 2.1750E-03 1.6700E-03 5.3720E-03 1.7450E-02

1.1200E-02 6.2740E-03 7.0530E-03 1.0540E-02 4.3740E-03 1.3250E-03 1.5060E-03

3.9750E-03 1.1020E-02 2.4670E-02 6.7860E-03 3.5210E-02 1.2730E-03 2.7510E-03

7.1660E-03 9.9130E-03 3.1780E-03 2.8360E-04 2.9530E-03 7.0220E-03 4.8890E-03

1.3210E+00 7.5560E-02 7.5200E-03 4.5700E+00 1.5320E+00 3.2500E-01 3.5520E-02

8.9390E+00 2.0350E+00 3.3370E-01 3.1640E-02 1.3760E-01 5.3080E-02 2.0820E-02

5.5600E-03 1.6520E-01 5.7570E-02 1.7880E-02 4.0530E-03 4.0810E-02 1.7990E-02

8.1730E-03 2.3290E-03 3.3060E-01 1.2970E-01 2.2810E-02 6.4280E-01 2.9310E-01

8.3490E-02 1.2830E-02 4.8090E-01 1.4990E-01 3.2190E-02 5.4360E-03 1.5370E-01

7.4570E-02 2.3520E-02 7.0230E-03 3.6400E-02 1.6760E-02 6.7290E-03 2.4690E-03

1.9350E-02 1.8760E-02 1.4360E-02 8.0820E-03 5.8630E-02 3.4700E-02 1.7210E-02

6.2610E-03 6.4240E-02 3.4060E-02 1.4450E-02 5.3540E-03 1.4570E+00 8.5090E-02

1.1060E+00 1.9290E+00 1.4110E+00 4.0730E-01 5.0360E-01 5.3000E+00 2.2680E+00

4.3620E-01 4.0850E-02 6.6510E-02 3.3770E-02 2.1630E-02 2.5810E-02 1.0340E-01

6.1080E-02 2.1210E-02 1.0430E-02 2.1020E-02 1.1250E-02 9.1140E-03 1.7650E-01

1.0750E-01 7.8320E-02 2.9220E-01 2.0380E-01 1.9260E-01 8.5460E-02 1.0320E-01

2.1980E-01 1.4110E-01 3.7720E-02 7.4560E-02 4.8470E-02 5.3340E-02 1.7700E-02

1.2260E-02 1.5730E-02 1.3000E-02 6.8570E-03 1.4510E-02 1.5500E-02 1.0490E-02

4.7740E-03 3.4700E-02 2.4400E-02 1.7670E-02 1.0830E-02 2.9230E-02 2.3790E-02

2.2600E-02 1.3030E-02 1.0190E+00 9.2790E-02 1.0530E+00 1.0040E+00 1.0900E+00

3.0630E-03 5.3280E-01 3.3290E+00 1.8070E+00 1.3450E-02 2.2180E-02 4.7810E-02

2.4930E-02 5.3330E-03 2.1170E-02 7.8240E-02 3.4920E-02 3.7700E-03 4.0020E-03

1.6790E-02 9.9950E-03 7.4440E-02 1.0120E-01 6.6020E-02 8.3210E-02 1.9210E-01

1.2690E-01 1.1370E-01 1.0230E-02 9.8980E-02 1.1750E-01 1.0790E-01 2.3510E-02

5.3330E-02 2.0690E-02 3.1380E-02 3.0010E-03 8.3960E-03 9.9710E-03 1.0350E-02

9.6730E-03 1.1350E-02 6.4550E-03 2.8880E-03 1.7210E-02 1.7660E-02 1.5800E-02

7.6970E-03 9.3580E-03 1.9510E-02 1.4190E-02 1.5910E-02 2.6050E-03 1.0710E-01

7.2900E-01 7.8130E-01 2.7960E-04 3.1090E-03 3.7360E-01 2.4570E+00 1.8840E-03

1.3130E-02 1.3900E-02 2.5390E-02 4.2730E-04 5.3460E-03 1.4680E-02 4.0090E-02

9.9110E-06 4.1850E-03 3.0520E-03 9.9850E-03 2.2350E-02 6.4270E-02 3.4040E-02

1.2830E-02 8.5270E-02 1.1360E-01 4.6370E-02 1.8110E-03 9.3620E-03 6.7940E-02

8.8290E-02 7.0230E-03 1.7690E-02 3.1380E-02 8.2800E-03 7.0430E-04 2.4460E-03

5.5550E-03 6.9710E-03 4.8370E-03 5.9590E-03 2.9560E-03 1.4020E-03 6.2610E-03

1.0830E-02 7.6970E-03 4.3990E-03 2.6430E-03 7.0200E-03 1.1960E-02 7.8690E-03

3.3180E+00 3.0340E-01 1.7020E-02 8.1700E+00 2.1460E+00 3.3060E-01 2.2970E-02

4.8810E-01 1.5290E-01 3.1770E-02 5.4750E-03 7.7540E-01 2.5040E-01 5.5520E-02

7.0250E-03 4.1720E-01 1.1740E-01 1.8630E-02 1.4770E-03 4.0860E-01 2.0780E-02

3.2520E-03 6.2430E-01 1.2790E-01 1.4770E-02 8.2900E-04 7.4480E-01 2.5280E-01

5.8690E-02 6.2520E-03 1.3710E-01 4.7160E-02 9.5540E-03 3.0520E-03 8.1600E-02

3.4370E-02 1.2960E-02 3.6950E-03 2.8980E-02 5.8850E-02 1.1830E-02 7.5900E-03

6.1640E-02 2.8040E-02 1.1250E-02 2.4410E-03 8.9450E-02 3.2640E-02 7.6760E-03

1.2830E-03 3.6370E+00 3.6950E-01 1.6560E+00 4.2390E+00 2.2580E+00 4.0470E-01

1.5210E-01 2.1890E-01 1.3770E-01 3.4490E-02 2.0000E-01 3.8000E-01 2.4240E-01

6.5440E-02 7.4500E-02 2.2200E-01 1.2850E-01 2.2670E-02 1.4560E-01 1.8830E-01

1.2120E-02 1.8830E-01 2.9520E-01 1.1440E-01 1.6380E-02 2.5160E-01 3.2300E-01

2.0800E-01 6.8360E-02 5.8700E-02 5.1490E-02 4.0330E-02 6.6210E-03 2.9990E-02

3.7990E-02 2.5080E-02 1.3230E-02 2.3190E-02 2.7360E-02 3.1430E-02 3.8370E-03

3.2720E-02 2.6540E-02 1.3890E-02 9.6100E-03 3.2750E-02 3.6000E-02 2.7570E-02

8.3890E-03 2.7890E+00 1.3250E-01 1.7710E+00 2.6990E+00 1.8190E+00 3.1660E-02

1.3710E-01 1.3150E-01 1.0770E-01 2.9940E-02 1.9360E-01 2.4850E-01 2.0300E-01

1.8550E-03 8.5360E-02 1.4460E-01 1.0440E-01 4.1820E-02 1.3920E-01 7.8440E-02

4.1840E-02 1.7110E-01 1.6920E-01 7.8630E-02 5.8530E-02 2.0720E-01 2.0570E-01

1.6700E-01 1.8530E-02 4.8610E-02 2.4550E-02 2.6360E-02 9.7680E-03 2.1350E-02

2.7160E-02 2.1460E-02 1.7390E-02 1.4550E-02 2.1610E-02 1.0810E-02 1.5930E-02

1.7490E-02 2.0720E-02 7.9360E-03 7.6750E-03 2.7560E-02 2.1420E-02 2.1780E-02

2.2290E-03 1.5960E-01 1.3710E+00 2.7490E+00 5.4750E-03 3.4400E-02 1.0750E-01

1.2450E-01 2.4330E-03 3.5480E-02 1.5650E-01 2.5970E-01 9.4760E-05 2.1170E-03

6.4900E-02 1.5730E-01 9.4780E-03 5.5420E-02 1.0800E-01 5.6090E-03 5.0960E-02

1.3150E-01 1.1920E-01 6.2530E-03 6.8250E-02 1.6660E-01 1.8480E-01 6.0340E-03

1.7810E-02 3.5750E-02 1.8960E-02 2.3030E-03 9.6310E-03 1.7580E-02 2.3660E-02

1.1590E-02 8.8410E-03 8.1900E-03 1.4290E-02 5.5570E-03 1.4790E-02 1.2060E-02

8.9940E-03 1.2830E-03 8.3880E-03 2.1780E-02 2.0850E-02 3.1160E+00 1.2080E-01

4.9550E-03 5.0040E-01 1.2030E-01 2.5520E-02 5.3250E-03 3.4060E-01 8.9630E-02

1.3240E-02 6.0500E-04 2.5760E-01 7.9550E-02 1.9520E-02 2.5710E-03 2.1800E-02

8.7060E-03 1.1160E-03 7.3190E-01 5.8090E-02 1.0860E-02 1.9790E-03 4.9610E-01

1.0170E-01 1.1710E-02 1.3750E-03 6.8300E-02 1.7510E-02 2.7850E-03 9.2520E-04

2.4150E-01 5.7630E-02 9.6240E-03 1.8570E-03 6.0250E-02 3.1140E-02 1.6000E-02

3.4910E-03 8.7790E-02 2.0660E-02 6.7090E-03 5.5550E-04 1.5650E-01 4.5800E-02

1.1390E-02 1.4330E-03 3.8390E+00 1.4450E-01 1.4940E-01 2.6240E-01 1.0590E-01

2.5910E-02 8.9350E-02 1.7360E-01 9.2100E-02 1.5750E-02 6.9360E-02 1.3620E-01

7.2400E-02 2.2070E-02 1.4140E-02 7.1120E-03 5.0510E-03 1.8170E-01 4.3170E-01

4.6260E-02 9.5680E-03 1.3120E-01 2.6140E-01 1.0370E-01 1.2960E-02 2.7490E-02

2.9760E-02 1.5520E-02 1.8420E-03 5.7530E-02 1.3420E-01 5.8670E-02 1.0300E-02

5.0220E-02 2.2680E-02 1.0870E-02 8.6530E-03 3.3810E-02 4.5350E-02 1.0500E-02

6.8770E-03 5.4580E-02 7.6440E-02 3.5760E-02 1.2480E-02 2.9420E+00 3.9000E-02

1.3460E-01 1.7740E-01 8.4040E-02 1.3210E-02 9.1810E-02 1.1720E-01 7.5480E-02

1.4480E-02 6.2590E-02 9.9500E-02 6.3380E-02 7.9020E-03 7.7410E-03 5.3990E-03

4.1150E-02 1.8480E-01 2.7790E-01 3.1520E-02 2.3440E-02 1.3340E-01 1.7010E-01

8.0470E-02 8.8660E-03 2.3950E-02 1.6440E-02 1.0430E-02 9.6120E-03 5.8610E-02

9.5840E-02 4.7420E-02 4.0170E-02 1.4350E-02 1.1480E-02 7.9280E-03 1.3570E-02

2.3410E-02 3.3050E-02 7.1430E-03 1.6400E-02 4.3820E-02 5.3570E-02 2.9640E-02

8.9640E-03 4.2030E-02 1.1080E-01 1.6460E-01 6.0440E-04 1.5730E-02 7.5310E-02

1.3170E-01 1.4030E-03 1.6270E-02 5.3990E-02 1.0840E-01 3.5630E-03 8.0030E-03

4.2150E-03 8.9600E-03 4.7830E-02 1.4690E-01 1.9790E-01 3.0580E-03 2.7570E-02

1.0780E-01 1.6720E-01 2.7780E-03 9.3410E-03 1.8980E-02 1.3670E-02 1.8560E-03

1.0290E-02 4.7390E-02 1.0020E-01 3.0130E-02 7.7810E-03 1.2300E-02 5.2490E-03

3.8240E-03 1.4750E-02 1.9150E-02 2.0130E-02 2.9860E-03 1.8360E-02 3.7600E-02

4.8640E-02 1.9930E+00 7.0600E-02 3.7000E-03 6.0500E+00 1.5210E+00 2.1000E-01

1.2810E-02 1.1720E+01 2.1350E+00 2.5370E-01 1.4990E-02 4.6100E-01 5.7160E-02

1.9660E-02 5.7470E-01 1.8630E-01 3.0970E-02 8.1460E-03 6.3840E-01 1.4870E-01

2.3660E-02 3.2660E-03 1.8270E-01 5.7210E-02 8.1700E-03 2.3050E-03 7.8460E-02

2.4010E-02 6.5880E-03 1.3690E-03 2.3290E-02 2.7710E-02 1.0210E-02 4.6700E-03

4.5030E-02 2.1260E-02 7.0940E-03 1.1620E-03 9.4910E-02 2.7700E-02 7.3900E-03

1.3730E-03 2.4160E+00 8.6250E-02 1.1540E+00 3.1870E+00 1.6460E+00 2.5830E-01

8.5330E-01 7.6720E+00 2.5050E+00 3.1330E-01 1.8880E-01 2.1460E-01 2.7600E-02

2.3500E-01 2.1740E-01 1.6370E-01 2.4010E-02 1.4850E-01 3.3000E-01 1.4570E-01

2.6550E-02 7.3230E-02 6.8700E-02 5.2260E-02 6.1700E-03 1.8850E-02 4.2110E-02

2.1230E-02 7.2240E-03 1.8630E-02 1.6220E-02 1.3560E-02 4.2890E-03 2.4580E-02

1.6590E-02 1.1810E-02 6.6520E-03 2.7690E-02 4.7430E-02 2.2030E-02 7.9200E-03

1.8210E+00 7.0090E-02 1.2770E+00 2.0190E+00 1.3150E+00 5.9580E-03 1.0080E+00

5.5120E+00 1.9920E+00 7.3510E-02 1.5980E-01 8.9350E-02 6.7120E-02 1.9920E-01

1.0430E-01 1.0910E-01 2.3650E-02 1.4570E-01 2.0600E-01 1.1290E-01 1.9870E-02

6.3850E-02 3.1560E-02 3.5070E-02 4.2760E-03 1.6270E-02 2.9090E-02 1.7730E-02

1.3970E-02 9.8480E-03 1.0240E-02 5.4770E-03 1.0760E-02 1.3920E-02 1.2770E-02

7.2760E-03 7.3900E-03 2.2030E-02 3.1850E-02 1.7500E-02 9.9710E-04 8.4670E-02

9.7930E-01 2.0590E+00 5.0310E-04 6.6160E-03 7.6020E-01 4.9190E+00 2.9800E-02

7.0920E-02 1.1420E-01 1.8030E-02 6.9760E-02 1.4920E-01 8.3020E-02 3.2660E-03

2.6540E-02 1.1290E-01 1.8300E-01 5.0300E-03 2.0710E-02 4.7980E-02 2.6440E-02

7.4690E-04 4.5770E-03 1.3410E-02 2.6530E-02 9.3160E-03 5.8510E-03 5.7540E-03

5.4120E-03 3.1180E-03 1.0860E-02 1.0070E-02 5.7660E-03 1.3730E-03 7.9200E-03

1.7500E-02 2.5760E-02 3.8060E+00 2.5900E-01 1.1360E-02 6.9090E+00 1.7360E+00

3.2180E-01 1.4080E-02 7.9760E-02 4.5400E-02 1.2530E-02 2.6140E-01 1.8370E-02

4.1930E-03 7.0040E-04 7.3720E-01 1.7320E-01 3.7210E-02 7.9490E-03 1.0870E-01

1.5280E-02 4.1230E-03 8.4280E-04 2.7220E-01 6.7070E-02 1.1590E-02 1.8480E-03

8.6010E-03 3.1400E-02 6.5230E-03 4.1100E-04 1.0030E-01 2.3780E-02 8.3830E-03

1.3920E-03 1.8960E-01 6.2790E-02 4.8910E-03 3.7640E-04 4.4720E+00 3.1040E-01

1.3830E+00 7.4880E+00 3.1500E+00 3.8370E-01 6.1130E-02 3.0230E-02 2.3400E-02

6.2330E-02 1.5760E-01 1.3250E-02 3.7880E-03 2.1590E-01 3.9170E-01 1.5170E-01

3.7590E-02 3.2790E-02 6.0690E-02 1.0370E-02 3.4950E-03 6.7040E-02 1.4850E-01

6.5350E-02 1.2820E-02 7.1660E-03 1.6260E-02 1.1720E-02 3.9700E-03 3.8760E-02

5.2700E-02 1.2550E-02 7.5750E-03 7.9940E-02 1.4290E-01 6.7880E-02 5.6010E-03

3.4820E+00 1.4740E-01 2.5790E+00 5.3520E+00 2.5310E+00 4.1200E-02 3.0400E-02

2.0190E-02 1.4130E-02 6.3590E-02 1.0260E-01 8.9690E-03 5.6350E-02 1.9460E-01

2.6650E-01 1.2040E-01 1.0200E-02 2.9140E-02 3.9650E-02 6.8790E-03 1.1570E-02

6.5350E-02 1.0420E-01 5.3850E-02 5.7320E-03 7.3130E-03 1.1380E-02 6.8670E-03

1.6140E-02 2.7490E-02 3.7470E-02 8.1660E-03 1.2370E-02 8.4250E-02 8.8170E-02

5.2200E-02 3.6740E-04 1.7560E-01 2.0290E+00 5.7590E+00 2.4450E-02 3.1660E-02

1.2730E-02 3.1710E-03 1.6350E-02 5.0520E-02 7.1940E-02 1.3180E-02 6.0680E-02

1.6010E-01 2.4450E-01 3.0980E-03 1.0850E-02 2.3110E-02 2.7380E-02 1.8470E-03

1.2820E-02 5.3840E-02 1.0740E-01 4.2990E-03 2.5320E-03 8.7200E-03 7.9180E-03

5.5200E-03 1.6490E-02 2.1920E-02 2.3000E-02 1.1650E-03 1.4840E-02 6.7600E-02

9.4230E-02 1.4880E+00 1.1710E-01 4.1400E-03 1.6530E-02 2.0190E-03 1.0600E-04

7.1880E-02 2.4750E-02 7.7900E-03 1.7380E-04 1.9560E+00 1.5180E-01 2.0380E-02

2.6410E-03 3.4120E-02 9.0850E-03 1.3230E-03 1.8070E-04 4.9410E-01 8.7730E-02

1.0220E-02 8.9630E-04 4.9110E-04 2.4180E-02 3.6060E-03 1.0540E-04 3.9190E-02

8.4760E-03 6.4930E-04 5.2120E-05 2.5310E-01 2.3180E-02 4.1780E-03 2.4830E-04

3.0070E+00 1.3670E-01 8.1510E-03 6.6280E-03 1.2100E-03 3.6860E-02 3.2570E-02

1.1980E-02 8.4420E-03 3.6380E-01 1.2980E+00 1.4640E-01 2.1790E-02 1.5230E-02

1.4410E-02 7.4470E-03 1.2260E-03 1.0780E-01 2.9210E-01 9.3300E-02 1.1580E-02

4.2090E-04 1.2370E-02 9.3490E-03 2.1940E-03 1.5900E-02 1.7140E-02 7.7480E-03

6.5020E-04 5.0330E-02 1.6360E-01 2.0080E-02 4.7360E-03 3.6250E+00 3.4920E-03

6.4680E-03 3.3660E-03 1.7600E-02 2.2020E-02 2.6280E-02 8.8220E-03 6.2080E-02

3.9620E-01 9.5140E-01 1.1610E-01 5.4330E-03 1.2460E-02 8.8130E-03 5.2220E-03

1.6900E-02 1.1480E-01 2.1410E-01 7.5330E-02 3.5080E-04 5.4830E-03 9.3400E-03

5.1100E-03 4.8580E-03 1.4140E-02 1.0070E-02 5.4710E-03 1.0110E-02 5.1500E-02

1.2090E-01 1.6570E-02 1.1430E-03 4.4260E-03 5.0890E-03 5.1610E-03 1.9470E-02

1.9700E-02 1.5440E-02 9.1160E-03 7.2290E-02 3.2110E-01 8.1850E-01 1.4180E-03

6.1890E-03 1.0520E-02 7.4210E-03 1.7590E-03 1.9550E-02 9.4560E-02 2.2150E-01

2.8070E-04 1.8080E-03 6.9280E-03 7.2050E-03 9.5980E-04 5.8420E-03 1.1890E-02

8.9890E-03 1.4070E-03 1.1820E-02 4.2540E-02 1.0370E-01 6.8290E-01 4.8020E-02

2.5090E+00 1.1980E+00 4.0500E-01 7.0660E-02 7.7160E+00 2.7150E+00 7.3930E-01

1.3390E-01 5.3220E-02 2.9680E-02 1.4560E-02 5.6870E-03 2.2040E-02 1.6140E-02

9.6350E-03 4.4710E-03 3.8200E-02 1.0710E-01 8.8370E-02 5.3750E-02 9.1050E-02

5.4390E-02 3.0840E-02 1.4030E-02 4.0980E-02 2.5900E-02 1.7420E-02 1.1390E-02

5.7550E-01 8.0460E-01 7.4850E-01 7.5000E-01 4.8680E-01 3.3560E-01 3.5430E+00

2.6290E+00 1.0470E+00 2.2430E-02 2.0690E-02 1.6430E-02 9.1340E-03 1.1460E-02

6.2160E-03 7.6400E-03 9.5500E-03 2.5470E-02 8.8370E-02 5.9670E-02 1.8120E-02

4.3050E-02 4.1220E-02 2.8610E-02 1.3980E-02 1.7740E-02 2.2080E-02 1.5760E-02

8.1980E-03 3.2560E-02 5.6400E-01 5.1910E-01 2.7960E-01 1.9340E-02 2.1330E-01

1.4890E+00 2.0590E+00 6.7350E-03 1.1470E-02 1.0230E-02 5.7990E-03 1.2620E-03

6.6930E-03 5.9600E-03 3.4120E-03 1.2730E-02 5.3740E-02 1.8120E-02 1.1200E-02

1.8150E-02 1.8530E-02 1.6690E-02 1.0030E-02 9.6140E-03 6.7020E-03 7.8310E-03

7.7510E-03 3.0330E+00 4.5510E-01 3.2880E-02 8.2560E+00 3.0280E+00 6.6760E-01

7.7770E-02 1.1720E-01 5.7360E-02 1.5670E-02 2.7480E-03 5.9160E-02 3.1730E-02

1.5110E-02 5.7800E-03 1.5100E-01 1.4160E-01 3.8550E-02 1.6190E-02 1.3900E-01

7.2670E-02 2.8160E-02 1.0460E-02 1.2830E-01 5.1570E-02 1.4120E-02 2.1600E-03

2.7140E+00 5.3580E-01 2.2770E+00 3.1990E+00 2.7430E+00 8.2990E-01 5.7360E-02

3.2020E-02 4.0210E-02 1.4800E-02 2.4270E-02 2.4490E-02 2.0970E-02 1.4290E-02

1.1320E-01 6.2250E-02 6.8440E-02 1.6630E-02 7.2670E-02 4.8750E-02 4.8840E-02

1.7370E-02 4.0360E-02 4.8560E-02 4.1410E-02 1.6850E-02 1.8100E+00 1.9590E-01

2.1700E+00 1.5580E+00 2.1180E+00 1.5670E-02 4.0210E-02 1.6450E-02 2.3980E-02

7.6760E-03 1.5430E-02 1.6430E-02 1.6260E-02 7.5470E-02 2.9090E-02 4.1630E-02

2.7480E-02 2.8170E-02 4.8840E-02 2.1240E-02 2.6830E-02 6.1510E-03 3.3130E-02

2.7030E-02 3.1830E-02 8.6670E-03 2.2090E-01 1.5020E+00 1.2910E+00 2.7480E-03

1.4800E-02 2.3990E-02 5.9730E-03 1.7180E-03 6.1300E-03 9.8180E-03 1.0040E-02

3.7720E-02 1.2530E-02 1.5040E-02 2.1510E-02 1.0450E-02 1.7370E-02 2.6840E-02

7.8720E-03 3.1430E-04 6.8800E-03 2.2580E-02 1.9260E-02 3.0910E+00 2.2640E-01

1.2110E-02 1.8070E-01 7.6880E-02 2.1900E-02 5.3900E-03 1.2310E-01 5.9560E-02

2.0910E-02 5.8960E-03 4.6300E-02 3.5790E-01 3.5390E-02 5.5340E-03 3.6620E-01

1.1730E-01 1.5350E-02 3.9980E-03 1.1600E-01 5.9300E-02 2.0840E-02 3.5400E-03

3.5060E+00 2.7660E-01 9.0880E-02 6.5890E-02 5.3470E-02 1.7670E-02 5.3340E-02

4.8810E-02 4.3130E-02 2.1470E-02 3.7040E-02 1.4010E-01 1.5840E-01 2.0630E-02

1.4920E-01 1.3200E-01 1.0890E-01 1.2020E-02 5.9270E-02 4.0330E-02 3.7240E-02

2.2720E-02 2.6740E+00 3.5630E-02 6.2530E-02 3.9020E-02 3.3730E-02 1.5170E-02

3.8510E-02 3.1380E-02 3.6740E-02 2.7780E-02 4.7060E-02 1.2180E-01 7.0500E-02

3.8750E-02 1.3100E-01 5.8010E-02 7.3750E-02 2.0830E-02 3.7230E-02 3.0560E-02

3.1010E-02 1.1770E-02 3.4020E-02 4.5170E-02 2.3010E-02 3.7140E-03 1.4850E-02

3.1360E-02 3.2510E-02 1.8520E-02 1.3480E-02 5.6620E-02 8.9450E-02 9.1720E-03

4.1840E-02 9.9070E-02 5.1060E-02 3.5400E-03 2.2720E-02 3.1000E-02 2.2530E-02

1.8560E+00 3.1630E-01 1.0920E-01 6.3420E+00 1.6180E+00 3.5720E-01 7.8730E-02

1.1470E+00 2.1140E+00 1.1730E+00 1.0290E-01 1.8690E+00 5.9700E-01 1.0700E-01

6.4500E-03 2.3020E+00 7.0920E-01 1.4370E-01 1.7950E-02 1.7710E+00 2.1040E-01

5.3060E-01 3.6450E+00 1.6790E+00 4.0170E-01 8.5970E-01 1.3980E+00 3.6010E-01

7.8250E-01 5.9590E-01 7.1870E-01 4.9170E-01 1.2830E-01 4.8220E-01 1.0500E+00

6.7310E-01 1.7700E-01 1.1750E+00 7.1430E-02 4.6990E-01 2.2770E+00 1.3250E+00

5.7290E-01 5.8570E-01 6.8080E-01 4.2760E-01 1.0660E-01 4.9120E-01 3.7130E-01

3.2060E-01 3.9550E-02 4.6950E-01 5.6380E-01 5.1780E-01 2.2240E-02 4.9510E-02

3.1610E-01 1.6790E+00 2.8640E-01 1.3760E-01 6.0970E-01 9.9360E-02 6.4500E-03

1.2810E-01 3.2050E-01 1.8990E-01 3.4580E-03 4.1930E-02 3.2530E-01 4.2530E-01

4.7540E+00 3.5180E-01 4.0120E-02 1.6980E-01 7.7040E-02 2.7380E-02 5.9930E-03

5.1450E+00 2.5460E-01 5.5370E-03 1.1430E-03 1.0600E+01 2.1230E+00 1.8150E-01

7.4190E-03 5.5680E+00 4.0090E-01 1.4150E-01 4.7710E-02 2.9480E-02 1.4780E-02

1.1410E+00 3.0940E+00 2.6430E-01 4.6860E-03 2.7560E+00 5.5350E+00 2.2530E+00

2.1450E-01 4.3290E+00 1.1320E-01 2.7110E-02 2.8710E-02 1.7790E-02 1.8380E-01

1.2790E+00 1.9560E+00 1.8490E-01 4.3180E-01 2.8900E+00 3.5460E+00 1.7450E+00

8.4880E-02 1.3770E-02 2.4820E-02 1.6600E-02 1.7830E-02 2.3860E-01 1.0170E+00

1.4300E+00 3.4790E-02 5.2700E-01 2.3270E+00 3.5720E+00 7.3380E-01 4.8920E-01

2.4460E-01 2.0930E+00 1.5740E+00 1.0520E+00 5.2650E-01 1.8590E-02 1.4870E-02

1.1150E-02 7.4340E-03 2.3190E+00 1.0540E+00 4.4430E+00 3.0200E+00 1.2290E+00

2.5160E-01 3.6340E-01 1.4890E-01 6.1700E-02 2.9010E-02 8.9910E-01 2.5660E+00

5.7850E-01 1.4450E+00 1.3780E+00 4.5210E-02 1.7750E-01 1.2810E-01 5.1680E-02

1.4550E-01 1.7690E+00 9.0950E-01 1.6050E-01 2.2000E-02 1.8420E-02 6.9000E-02

9.1820E-02 2.3130E+00 2.9160E-01 3.4230E-02 2.1870E+00 7.1950E-01 1.8900E-01

4.6570E-02 2.2260E+00 3.1890E-01 5.1330E-01 1.0110E+00 6.3320E-01 2.0160E-01

1.5070E+00 8.5040E-02 4.4570E-01 5.6540E-01 4.7730E-01 1.9640E-02 7.0590E-02

2.9810E-01 3.9840E-01 4.4330E+00 4.4730E-01 2.5160E-02 4.7810E+00 5.4510E-01

3.6790E+00

10000.00

5.5210E+00 1.4910E+00 6.7470E-01 2.8390E-01 3.5950E+00 1.5070E+00 4.9690E-01

1.3710E-01 1.0980E+01 5.5990E-01 1.9090E-01 6.1040E-02 9.4800E-01 5.0240E-01

3.2780E-02 3.0760E-01 9.9190E-02 7.9860E-03 6.3100E-01 3.1100E-01 9.5110E-02

1.6510E-02 4.0160E-01 2.1550E-01 1.1250E-01 3.8250E-02 3.4440E-01 2.1530E-01

7.9770E-02 1.9760E-02 2.7610E-01 1.5440E-01 7.3080E-02 3.6890E-02 2.3040E+01

7.0620E+00 9.5990E-01 4.0780E-01 1.5490E-01 2.9570E+01 5.1290E+00 6.0010E-01

7.2720E-02 2.9370E-02 1.3200E-02 1.2430E+01 1.9300E-01 4.5490E-02 1.4540E+00

2.6450E-01 1.2200E-02 2.3850E-03 2.3860E+00 3.0560E-01 3.2570E-02 1.0430E-02

8.5790E-01 1.6260E-02 8.7830E-03 1.2940E-01 9.2340E-02 4.0070E-02 9.7060E-03

7.5460E-02 4.9020E-02 1.9700E-02 9.1770E-03 2.8950E-02 9.3560E-03 2.8370E-03

7.8590E-02 3.8250E-02 1.5800E-02 5.1390E-03 2.8780E-02 1.7310E-02 7.3790E-03

1.8330E-03 7.0490E-02 3.9650E-02 1.3500E-02 2.4400E-03 5.2150E-02 2.1070E-02

4.8120E-03 5.3200E-04 3.9100E-02 1.5520E-02 6.0460E-03 1.7660E-03 3.4800E-02

1.1470E-02 3.4800E-03 1.0940E-03 5.7960E-02 2.6390E-02 1.1400E-02 3.9260E-03

7.6210E-02 2.8420E-02 7.4920E-03 1.1240E-03 4.9070E-02 1.5320E-02 3.8620E-03

7.0040E-04 4.9940E-02 2.3480E-02 8.5840E-03 1.8950E-03 3.8020E-02 1.3450E-02

6.3900E-03 3.2480E-02 2.0760E-02 7.3790E-03 1.6140E-03 2.9490E-02 1.6560E-02

1.0140E-02 7.0990E-03 1.3560E-02 1.0040E-02 3.8920E-03 9.2000E-04 1.1220E-02

8.6700E-03 4.6290E-03 1.5010E-03 2.5290E-02 9.7870E-03 7.7420E-03 4.4710E-03

1.5510E-02 1.0500E-02 5.5660E-03 2.5230E-03 1.9790E-02 1.3620E-02 6.2220E-03

1.8330E-03 5.4420E+00 1.1970E+00 4.1910E-01 1.6330E+00 1.4840E+00 1.0260E+00

4.4570E-01 2.4790E+00 6.5400E+00 3.5520E-01 1.2270E-01 6.8130E-01 2.2760E-01

2.8710E-01 1.7770E-01 9.9090E-02 5.6380E-02 2.7880E-01 2.2840E-01 2.4180E-01

9.8970E-02 2.1330E-01 2.2600E-01 1.0290E-01 9.3850E-02 1.5510E-01 2.1820E-01

1.4550E-01 7.7520E-02 1.7240E-01 1.3690E-01 1.0520E-01 2.8160E-02 6.1010E+00

1.1060E+01 8.2970E+00 8.7150E-01 2.9070E-01 6.1400E-01 1.9500E+01 6.9830E+00

1.1360E+00 9.1260E-02 1.6910E-02 3.6780E+00 6.3230E+00 1.1960E-01 4.8440E-01

6.4320E-01 2.4990E-01 9.9270E-03 4.6600E-01 1.3840E+00 3.0990E-01 2.7780E-02

3.2640E-01 3.7390E-01 6.2440E-03 9.3460E-02 3.8930E-02 4.7640E-02 3.7160E-02

5.9530E-02 3.4270E-02 2.1530E-02 7.3430E-03 1.6720E-02 1.1720E-02 4.4790E-03

3.7200E-02 3.3470E-02 2.5080E-02 1.4470E-02 1.6090E-02 1.0280E-02 1.0790E-02

7.3270E-03 3.4640E-02 2.2270E-02 2.9890E-02 1.4070E-02 2.6860E-02 1.7730E-02

1.3770E-02 4.4710E-03 1.9910E-02 1.7270E-02 8.6230E-03 4.1280E-03 1.3110E-02

1.6000E-02 8.5840E-03 2.9950E-03 2.5720E-02 2.6790E-02 1.6960E-02 1.0270E-02

3.1670E-02 3.0750E-02 2.0600E-02 7.5830E-03 1.5150E-02 2.3470E-02 1.2600E-02

3.9490E-03 2.1230E-02 2.0680E-02 1.6550E-02 8.6720E-03 2.2760E-02 1.8120E-02

5.5140E-03 2.3010E-02 9.8070E-03 1.1180E-02 5.7740E-03 1.7260E-02 1.6040E-02

1.2210E-02 5.0980E-03 1.0740E-02 3.9220E-03 5.1190E-03 2.9520E-03 8.3350E-03

4.0290E-03 4.2140E-03 4.2420E-03 2.0240E-02 8.6180E-03 6.1240E-03 2.8570E-03

1.1470E-02 7.1560E-03 6.0660E-03 2.5740E-03 1.3840E-02 6.7210E-03 7.1400E-03

5.4670E-03 4.3190E+00 7.2550E-01 6.3730E-01 1.1130E+00 9.5810E-01 7.3730E-01

5.0330E-01 2.8470E+00 3.5830E+00 1.9560E-01 3.8500E-01 2.6810E-01 2.4510E-01

8.9220E-02 9.6260E-02 6.4990E-02 7.9350E-02 2.0960E-01 1.5460E-01 1.9400E-01

1.2070E-01 1.2240E-01 1.6330E-01 8.0910E-02 7.0780E-02 1.4240E-01 1.5110E-01

1.1770E-01 1.0260E-01 1.2110E-01 6.4410E-02 4.8340E-02 6.0860E-01 8.0250E+00

3.8810E+00 7.2690E+00 5.7410E-01 8.0690E-02 6.2000E-01 1.2160E+01 6.8500E+00

1.4290E+00 9.0500E-02 7.0080E-01 4.5230E+00 2.3650E+00 1.2030E-01 4.4460E-01

3.2950E-01 1.4370E-01 6.1650E-02 5.5520E-01 8.2590E-01 1.9820E-01 1.0510E-01

3.0350E-01 1.2140E-01 4.7230E-02 4.3110E-02 3.3840E-02 3.8710E-02 4.2300E-02

2.7780E-02 1.6420E-02 5.5070E-03 9.2560E-03 9.9800E-03 5.4480E-03 1.5300E-02

2.3980E-02 2.3320E-02 2.0070E-02 6.2190E-03 9.3750E-03 8.0030E-03 9.7550E-03

9.9450E-03 2.4770E-02 1.5790E-02 2.5140E-02 1.1050E-02 1.6440E-02 1.1280E-02

8.3580E-03 9.8400E-03 1.2190E-02 1.0650E-02 4.7780E-03 4.5550E-03 1.0170E-02

9.8770E-03 5.9390E-03 1.0860E-02 1.6710E-02 1.8640E-02 1.3590E-02 1.0530E-02

2.2730E-02 1.9660E-02 1.5040E-02 3.8440E-03 1.3000E-02 1.5140E-02 9.3810E-03

7.1110E-03 1.4670E-02 1.4660E-02 1.3920E-02 1.3920E-02 1.4230E-02 6.6530E-03

1.2350E-02 1.0790E-02 7.6580E-03 6.5400E-03 1.0620E-02 1.2610E-02 8.3750E-03

6.3480E-03 6.1430E-03 4.6030E-03 3.3410E-03 2.9520E-03 4.4180E-03 3.7610E-03

3.5140E-03 3.9230E-03 1.5180E-02 7.0230E-03 4.2910E-03 1.8870E-03 7.4540E-03

6.3980E-03 3.8310E-03 2.7680E-03 7.1920E-03 6.6500E-03 5.4340E-03 5.6010E-03

2.6400E+00 2.1080E-01 6.0830E-01 7.6460E-01 7.1400E-01 1.4680E-01 6.2640E-01

2.4450E+00 1.5340E+00 1.7070E-01 2.9710E-01 1.3190E-01 3.6880E-02 7.8640E-02

5.1390E-02 1.1910E-02 1.0260E-01 1.3490E-01 1.7580E-01 5.4780E-02 8.2160E-02

1.0920E-01 8.0050E-02 2.2650E-02 7.3550E-02 1.1120E-01 1.1840E-01 6.0680E-02

7.0960E-02 5.5820E-02 3.8020E-02 2.0750E-01 7.8680E-01 7.0760E+00 9.5170E-01

4.6080E+00 3.3510E-02 6.9780E-02 4.4850E-01 6.8580E+00 5.4760E+00 1.2720E+00

5.6200E-02 1.5490E+00 3.4550E+00 1.9500E-02 1.7360E-01 2.8170E-01 2.0820E-01

1.1190E-02 9.3130E-02 4.8900E-01 4.8520E-01 2.8530E-02 1.4640E-01 1.7830E-01

1.7020E-02 3.7720E-02 3.1080E-02 2.2770E-02 2.6420E-02 2.1280E-02 9.9670E-03

3.6710E-03 4.7800E-03 6.7650E-03 4.9130E-03 5.2820E-03 1.3560E-02 1.7840E-02

1.8430E-02 1.6520E-03 5.9100E-03 7.0510E-03 7.4970E-03 1.2980E-03 1.2960E-02

1.5350E-02 2.0830E-02 3.4650E-03 1.0790E-02 1.0280E-02 6.8790E-03 4.4420E-03

7.5230E-03 8.1610E-03 4.8460E-03 1.5280E-03 4.5280E-03 7.2610E-03 7.0180E-03

4.0110E-03 9.0680E-03 1.3300E-02 1.3500E-02 2.5550E-03 1.1500E-02 1.5840E-02

1.5410E-02 7.6750E-04 4.6250E-03 1.0170E-02 1.2010E-02 1.6440E-03 7.4070E-03

1.1160E-02 1.3360E-02 8.2530E-03 8.4930E-03 6.4410E-03 5.2060E-03 9.4350E-03

6.5730E-03 3.6840E-03 6.8500E-03 6.7470E-03 6.1840E-03 5.5330E-03 2.7390E-03

4.4210E-03 2.7800E-03 1.4210E-03 1.6650E-03 3.3060E-03 3.0610E-03 2.3780E-03

1.0120E-02 4.9830E-03 2.6220E-03 1.1950E-03 4.4110E-03 4.4930E-03 3.0040E-03

1.7330E-03 2.8280E-03 5.5370E-03 4.7320E-03 3.4880E-03 5.8040E-02 2.2310E-01

4.4660E-01 4.2390E-01 5.4340E-02 1.1770E-01 5.5400E-01 1.6490E+00 5.3270E-02

1.9670E-01 4.7680E-02 1.1380E-02 4.4200E-02 2.7640E-02 8.0810E-04 1.8510E-02

9.8570E-02 9.4680E-02 1.6750E-02 5.3100E-02 3.6780E-02 5.6460E-02 4.1280E-03

2.9030E-02 5.5770E-02 7.3910E-02 2.9630E-02 2.5650E-02 4.0670E-02 1.6900E-02

5.7300E-02 2.9030E-01 5.7350E-01 4.6040E+00 1.4310E+00 1.5630E-02 1.5400E-02

4.3230E-02 2.5170E-01 3.0890E+00 3.6650E+00 1.8200E-02 6.2160E-02 2.4490E+00

2.5020E-03 3.0980E-02 1.6000E-01 1.4750E-01 5.1060E-03 5.9090E-03 9.2590E-02

4.3400E-01 6.8410E-03 4.3040E-02 1.2670E-01 3.7940E-03 2.0600E-02 2.1890E-02

7.9820E-03 1.2550E-02 1.1820E-02 4.4690E-03 1.8360E-03 2.0080E-03 3.3240E-03

2.8970E-03 1.4170E-03 5.5440E-03 9.8020E-03 1.0790E-02 1.9880E-04 2.3460E-03

4.6690E-03 3.6910E-03 1.0160E-05 2.1830E-03 1.2760E-02 1.0260E-02 7.2620E-04

4.6540E-03 7.0020E-03 3.3290E-03 1.6140E-03 3.6900E-03 3.9730E-03 3.2070E-03

4.8580E-04 1.4290E-03 3.5050E-03 4.7560E-03 1.1170E-03 4.0970E-03 6.1680E-03

8.5530E-03 3.5840E-04 3.7120E-03 9.2110E-03 9.3750E-03 1.1680E-04 1.0480E-03

4.1780E-03 8.4290E-03 1.6950E-04 2.4070E-03 6.2740E-03 7.9230E-03 3.9200E-03

3.6880E-03 3.9730E-03 1.6230E-03 5.2180E-03 4.5490E-03 1.0620E-03 3.5850E-03

2.2720E-03 3.7560E-03 3.0440E-03 9.0020E-04 2.6010E-03 1.9120E-03 2.6850E-04

3.8280E-04 1.9220E-03 1.9320E-03 9.6870E-04 5.0580E-03 2.5890E-03 1.2200E-03

5.9010E-04 2.0600E-03 2.1340E-03 1.9940E-03 6.3190E-04 7.7400E-04 3.0090E-03

3.1280E-03 1.3820E-03 8.3650E+00 2.2270E+00 7.0050E-01 2.1060E+00 7.2480E-01

1.4770E-01 2.1230E-02 1.2320E+00 4.1140E-01 1.4040E-01 5.8240E-01 1.1390E-01

2.8440E-02 1.1270E+00 4.2530E-01 9.4800E-02 1.4200E-02 1.2070E+00 3.8050E-01

1.0230E-01 1.8940E-02 8.2370E-01 3.7880E-01 1.1230E-01 2.1800E-02 5.0930E-01

2.6220E-01 9.8670E-02 3.1210E-02 8.4120E-01 3.8440E-01 1.3970E-01 4.5410E-02

1.1090E-02 7.5690E-01 3.7870E-01 1.6330E-01 5.7550E-02 1.6220E-02 3.4380E-03

3.0770E-01 1.2260E-01 2.6480E-02 8.2630E+00 3.7530E-01 1.0920E-01 2.4110E-02

4.2570E+00 6.9990E-01 1.2210E-01 3.1760E-02 4.5990E-01 1.7460E-01 3.0960E-02

1.6390E+00 7.2360E-01 3.5020E-01 1.9220E-01 1.1230E-01 5.0000E-02 2.0460E-02

1.9930E-01 2.7040E-01 1.6540E-01 2.5610E-02 3.5530E+00 3.9220E-01 4.3240E-02

5.9980E-03 2.0530E-01 1.0140E-01 2.5000E-02 3.4240E-03 2.8550E-01 1.9380E-01

3.6750E-02 3.8120E-03 1.7070E+00 4.0920E-02 8.0460E-03 1.0890E-03 7.6870E-01

2.6560E-02 6.1270E-03 1.5270E-03 8.7760E-01 1.2410E-01 1.5950E-02 2.4420E-03

1.3690E+00 1.6380E-01 2.3400E-02 3.4070E-03 2.8760E+00 3.3520E-01 1.7850E-02

2.4970E-03 6.9470E-01 1.1310E-01 2.4480E-02 3.4250E-03 2.7780E-01 1.0120E-01

2.5810E-02 3.1070E-03 3.1030E-02 1.2830E-02 2.6520E-03 2.6070E-01 3.3530E-02

1.1560E-02 2.3500E-03 5.5800E-02 2.0930E-02 7.1870E-03 1.6100E-03 9.9180E-02

1.7200E-02 4.3430E-03 7.7170E-04 7.2900E-02 2.5380E-02 7.4880E-03 1.2700E-03

2.7690E-02 8.7890E-03 4.9230E-03 8.5060E-04 6.7500E-02 8.6830E-03 2.1080E-03

3.6100E-04 1.6510E-01 3.0340E-02 5.5250E-03 9.2960E-04 7.3860E+00 2.0690E+00

8.9060E-01 8.5110E-01 5.5560E-01 1.4710E-01 6.8820E-01 5.5410E-01 1.9900E-01

2.7120E-01 2.5110E-01 6.0750E-02 3.0760E-01 5.6560E-01 4.4920E-01 1.1010E-01

3.6600E-01 6.5330E-01 3.2520E-01 1.0870E-01 2.9130E-01 4.4710E-01 3.2490E-01

1.2410E-01 2.6340E-01 2.7320E-01 1.5820E-01 6.8240E-02 2.9320E-01 4.6990E-01

2.8340E-01 1.3260E-01 5.1140E-02 2.7550E-01 2.9370E-01 2.5690E-01 1.6960E-01

8.3070E-02 2.7590E-02 1.6370E-01 1.1850E-01 8.2440E-02 1.2880E+00 5.3860E+00

2.5100E-01 9.2470E-02 6.9940E-01 2.5720E+00 6.9320E-01 1.2070E-01 2.7330E-01

1.5980E-01 9.9890E-02 7.2360E-01 8.3610E-01 5.3130E-01 2.3280E-01 7.2050E-02

5.2030E-02 2.2400E-02 1.5940E-01 2.0560E-01 6.6920E-02 9.6590E-02 1.3350E-01

2.4970E+00 4.5250E-01 5.0110E-02 7.0520E-02 1.6060E-01 9.4780E-02 2.9260E-02

1.0850E-01 3.4800E-01 2.0750E-01 4.3990E-02 2.3230E-01 1.1320E+00 3.1520E-02

7.8890E-03 1.1470E-01 5.0410E-01 2.0650E-02 4.9040E-03 1.2410E-01 5.4490E-01

1.2930E-01 1.7700E-02 7.1760E-02 9.6610E-01 1.7880E-01 2.6970E-02 3.1910E-01

1.9620E+00 3.7660E-01 2.0070E-02 6.9150E-02 4.6440E-01 1.0810E-01 2.8360E-02

7.4700E-02 1.2870E-01 9.2080E-02 3.0550E-02 1.9160E-02 1.0950E-02 7.1230E-03

6.0230E-02 1.5680E-01 1.9080E-02 1.0120E-02 2.0930E-02 2.6070E-02 1.4200E-02

7.3950E-03 2.7050E-02 5.4090E-02 1.2170E-02 3.9180E-03 2.1270E-02 3.5470E-02

2.0470E-02 8.4650E-03 2.2150E-02 6.3370E-03 2.4360E-03 2.8270E-03 1.5700E-02

3.9110E-02 6.1980E-03 1.9500E-03 3.0110E-02 9.6780E-02 2.8630E-02 6.0340E-03

5.6270E+00 2.9350E-01 6.8580E-01 4.9960E-01 3.6720E-01 3.7790E-01 4.4920E-01

2.6030E-01 1.1670E-01 2.0110E-01 1.1850E-01 2.6070E-02 3.3860E-01 3.5690E-01

3.7710E-01 9.6520E-02 3.1370E-01 4.5030E-01 2.5720E-01 7.3120E-02 2.6690E-01

3.0980E-01 2.7410E-01 1.3250E-01 1.9670E-01 1.7300E-01 9.1310E-02 9.9530E-02

2.3360E-01 3.0300E-01 2.1750E-01 9.5580E-02 5.9360E-02 1.9730E-01 1.9030E-01

1.6630E-01 1.3400E-01 7.7630E-02 7.2870E-02 1.0500E-01 9.5100E-02 2.1830E-01

1.3760E+00 3.5100E+00 1.5830E-01 1.2200E-01 6.9310E-01 1.7210E+00 5.2850E-01

1.4080E-01 1.5640E-01 1.0310E-01 3.5020E-01 5.3140E-01 5.0470E-01 3.5660E-01

4.5160E-02 4.1410E-02 2.2340E-02 1.1960E-01 1.1850E-01 9.0620E-02 6.7740E-02

2.1410E-02 1.2630E-01 2.0550E+00 3.5330E-01 1.0380E-02 6.5130E-02 1.1010E-01

8.0870E-02 3.0600E-03 1.2200E-01 2.3430E-01 1.7170E-01 2.4880E-02 2.7080E-01

7.3650E-01 2.1020E-02 1.5190E-02 1.2690E-01 3.2600E-01 1.3420E-02 1.5940E-02

1.2930E-01 3.6760E-01 9.9250E-02 1.3060E-02 6.4420E-02 7.1350E-01 1.4160E-01

1.7780E-02 3.7630E-01 1.3240E+00 2.8420E-01 1.5950E-02 5.4940E-02 3.4260E-01

8.9070E-02 1.0720E-02 6.8560E-02 8.5500E-02 7.9560E-02 1.0290E-02 1.0660E-02

6.9620E-03 1.8370E-02 4.9880E-02 1.0450E-01 1.1610E-02 7.1870E-03 1.4200E-02

1.8500E-02 1.1430E-02 7.8120E-03 2.2510E-02 3.4580E-02 7.8800E-03 5.1540E-03

1.6720E-02 2.4810E-02 1.7580E-02 1.6610E-02 3.6240E-03 2.9760E-03 2.1360E-03

3.9670E-03 1.4090E-02 2.5130E-02 4.0410E-03 5.5250E-03 2.8620E-02 6.5050E-02

2.2220E-02 6.4810E-02 3.1460E-01 5.1810E-01 3.2740E-01 1.9710E-01 2.8090E-01

2.4820E-01 4.7710E-02 1.1220E-01 1.2940E-01 4.2100E-03 2.7020E-02 2.6520E-01

4.4370E-01 1.8490E-02 1.0700E-01 2.5600E-01 3.7160E-01 1.0930E-02 8.0490E-02

2.2070E-01 3.0070E-01 5.8790E-02 1.1770E-01 1.3340E-01 9.0700E-02 2.6400E-02

1.0020E-01 1.6690E-01 1.9740E-01 1.3670E-01 8.2800E-03 5.2770E-02 1.2730E-01

1.5440E-01 1.3080E-01 7.3050E-02 2.4150E-02 7.9080E-02 7.8360E-02 5.5500E-02

2.3070E-01 1.0420E+00 2.1520E+00 3.1750E-02 1.2070E-01 5.2850E-01 1.3620E+00

5.9130E-02 1.3060E-01 7.6470E-02 1.9220E-01 2.3270E-01 3.5660E-01 3.8020E-01

2.6480E-02 2.6920E-02 1.8150E-02 7.9720E-02 5.1430E-02 1.0770E-01 2.5380E-02

2.9050E-03 2.3280E-02 9.9770E-02 1.5790E+00 4.7370E-04 1.1900E-02 5.2740E-02

1.1250E-01 2.2250E-04 3.3760E-03 9.3360E-02 2.5700E-01 3.4510E-03 3.0180E-02

2.0610E-01 4.6150E-01 3.3560E-03 1.6770E-02 9.7070E-02 2.0620E-01 2.4390E-03

1.7680E-02 9.9240E-02 2.8880E-01 1.5510E-03 1.4420E-02 5.1610E-02 5.5380E-01

2.4800E-03 2.0040E-02 2.9820E-01 1.0350E+00 1.2780E-03 1.8220E-02 4.5730E-02

2.7010E-01 8.9650E-05 1.2660E-02 5.5840E-02 9.4340E-02 4.6540E-03 9.0050E-03

4.9570E-03 5.5810E-03 1.8200E-02 3.7260E-02 6.2150E-02 1.6100E-03 7.3950E-03

1.1420E-02 1.3890E-02 2.0190E-03 8.1540E-03 1.6980E-02 2.1430E-02 5.2540E-04

5.7300E-03 1.3880E-02 2.2660E-02 1.1070E-02 1.6110E-03 3.2460E-03 9.7160E-04

9.6970E-04 4.2480E-03 1.0610E-02 1.5660E-02 9.2570E-04 6.0360E-03 2.2230E-02

5.1650E-02 2.2300E+00 8.1770E-01 3.6890E-01 1.0080E+00 4.6900E-01 7.6260E-02

3.3470E-01 1.3850E-01 3.2580E-02 5.9530E-01 3.1120E-01 1.3860E-01 3.7580E-02

4.4410E-01 2.3510E-01 1.1720E-01 5.4680E-02 5.2790E-01 2.8430E-01 1.3000E-01

5.0090E-02 4.0990E-01 2.6670E-01 1.5360E-01 6.5170E-02 2.9630E+00 1.3850E+00

4.4100E-01 1.2120E-01 3.2530E-02 4.3330E+00 1.4840E+00 4.5300E-01 1.2920E-01

4.0270E-02 1.3580E-02 1.9880E+00 2.9470E-01 4.0340E-02 1.8340E+01 3.3060E+00

1.2040E-01 2.1580E-02 2.7840E+01 3.7690E+00 4.1640E-01 1.2590E-01 1.1380E+01

1.1330E-01 3.2560E-02 1.4830E-01 8.7410E-02 4.7120E-02 2.1540E-02 6.7630E-02

3.8680E-02 1.5290E-02 7.7470E-03 1.7700E-02 6.7640E-03 3.0920E-03 1.4220E-01

7.0690E-02 2.9860E-02 8.1680E-03 1.2150E-02 7.2500E-03 3.5800E-03 1.2950E-03

3.1810E-02 1.7950E-02 8.5210E-03 2.4900E-03 1.7520E-01 3.9070E-02 5.2890E-03

1.0720E-03 1.9570E-01 4.8090E-02 1.0350E-02 3.3420E-03 2.9980E-02 1.2630E-02

4.9490E-03 1.4340E-03 5.7710E-02 2.9250E-02 1.2790E-02 4.0170E-03 1.9060E-01

4.7340E-02 1.3370E-02 3.1500E-03 2.8910E-02 1.3030E-02 5.0140E-03 1.2440E-03

2.4150E-02 1.0910E-02 4.6150E-03 1.5390E-03 1.0290E-01 2.0970E-02 1.1280E-02

3.2720E-02 1.8690E-02 7.9400E-03 2.2600E-03 1.2960E-02 7.9560E-03 4.9600E-03

2.9670E-03 3.7540E-02 2.6150E-02 1.2750E-02 4.2350E-03 4.7170E-03 3.2530E-03

1.9550E-03 9.3350E-04 1.8670E-02 8.4640E-03 2.5170E-03 1.3090E-03 4.3050E-03

3.2140E-03 1.8250E-03 7.5930E-04 5.5470E-03 2.2500E-03 1.0680E-03 4.4180E-04

1.7520E+00 3.7840E-01 5.8700E-01 2.9050E-01 2.8770E-01 1.8410E-01 1.1850E-01

7.7530E-02 2.0930E-01 2.4990E-01 2.0270E-01 1.5560E-01 2.0070E-01 2.0070E-01

1.5090E-01 9.0020E-02 2.0170E-01 2.5230E-01 1.9380E-01 1.2720E-01 2.3000E-01

2.7380E-01 1.4420E-01 6.8740E-02 7.1170E-01 1.5580E+00 1.1450E+00 5.2390E-01

1.3500E-01 2.0270E-01 2.1970E+00 1.5210E+00 6.6730E-01 2.0930E-01 4.7200E-02

4.9410E-01 1.0280E+00 2.2110E-01 3.3040E+00 9.1240E+00 3.7930E+00 1.1740E-01

5.3390E-01 1.8610E+01 4.4330E+00 4.1310E-01 2.6860E+00 5.9120E+00 5.9520E-02

7.7080E-02 6.5130E-02 4.9170E-02 3.6890E-02 4.5820E-02 2.8300E-02 1.7330E-02

5.8110E-03 9.2930E-03 8.6170E-03 2.7410E-03 5.1860E-02 5.7880E-02 4.5640E-02

3.2800E-02 5.3860E-03 4.5830E-03 4.5160E-03 3.7200E-03 1.1990E-02 1.2610E-02

1.1410E-02 9.5660E-03 3.9320E-02 8.3840E-02 3.8260E-02 4.9310E-03 4.8290E-02

9.3610E-02 4.2820E-02 7.3260E-03 1.0070E-02 1.3410E-02 8.2790E-03 4.9920E-03

2.1690E-02 2.3690E-02 1.9060E-02 1.3420E-02 2.7800E-02 1.1040E-01 3.9390E-02

1.4460E-02 9.0100E-03 1.2330E-02 9.1670E-03 5.6510E-03 6.5760E-03 1.1390E-02

8.0180E-03 4.9220E-03 3.9560E-02 5.4380E-02 7.3030E-03 1.8680E-02 1.1470E-02

9.7700E-03 6.1830E-03 7.0790E-03 6.7210E-03 4.8910E-03 2.9400E-03 2.6150E-02

1.3020E-02 1.2540E-02 8.8010E-03 2.7560E-03 1.9510E-03 1.7110E-03 1.6800E-03

1.4000E-02 3.8870E-03 4.4220E-03 9.0800E-04 3.2140E-03 1.8450E-03 1.5490E-03

9.7210E-04 1.8520E-03 2.5430E-03 1.5490E-03 8.9810E-04 1.0150E+00 2.5630E-01

3.1800E-01 2.0330E-01 8.4300E-02 1.0330E-01 6.5860E-02 5.2270E-02 1.2550E-01

1.8810E-01 1.7850E-01 8.3850E-02 1.2360E-01 1.2260E-01 9.8750E-02 6.6640E-02

1.3210E-01 1.7140E-01 1.5240E-01 1.3730E-01 1.4420E-01 1.4650E-01 5.9780E-02

1.2720E-01 7.2230E-01 8.2530E-01 7.0830E-01 4.1550E-01 5.4710E-02 1.2900E-01

1.0350E+00 1.1140E+00 6.6030E-01 2.3020E-01 8.4850E-02 5.1690E-01 5.5340E-01

1.2000E-01 3.7940E+00 4.3010E+00 2.6710E+00 1.6270E-01 4.3990E-01 1.1970E+01

3.3230E+00 3.7340E-01 3.0340E+00 2.3500E+00 3.4870E-02 4.1450E-02 4.4680E-02

3.1180E-02 2.6770E-02 2.1890E-02 1.2170E-02 3.8730E-03 5.0790E-03 5.3980E-03

3.3010E-03 1.3890E-02 3.1430E-02 4.2290E-02 3.7840E-02 1.5420E-03 3.3170E-03

3.4040E-03 3.8750E-03 2.9230E-03 7.1620E-03 9.7920E-03 1.0510E-02 5.2880E-03

3.8240E-02 4.1140E-02 2.5790E-02 1.0360E-02 4.2800E-02 4.6660E-02 2.8340E-02

3.1410E-03 6.0790E-03 9.2200E-03 6.0630E-03 6.1790E-03 1.3360E-02 1.6850E-02

1.5480E-02 7.6330E-03 1.7720E-02 7.2220E-02 2.9710E-02 2.1100E-03 5.8970E-03

8.5130E-03 7.5840E-03 1.7940E-03 4.1590E-03 7.8980E-03 6.7540E-03 1.8010E-02

2.9570E-02 1.9970E-02 7.9400E-03 9.7690E-03 8.3880E-03 4.7090E-03 3.9120E-03

4.1050E-03 3.6850E-03 2.7140E-03 1.2750E-02 1.2540E-02 9.7330E-03 5.3130E-03

1.2130E-03 1.3890E-03 1.5180E-03 1.2450E-03 9.3330E-03 2.0550E-03 2.5380E-03

1.5800E-03 1.8260E-03 1.5490E-03 1.0900E-03 5.8550E-04 7.5620E-04 1.0440E-03

1.7390E-03 1.0060E-03 7.6940E-02 2.2620E-01 8.5960E-02 2.8970E-02 6.2420E-02

3.5000E-02 1.0130E-03 5.6680E-02 9.0830E-02 1.2310E-01 3.0110E-02 5.2410E-02

6.8970E-02 6.2840E-02 1.4290E-02 5.4120E-02 8.5440E-02 1.0640E-01 6.5040E-02

6.8730E-02 5.9780E-02 5.3140E-02 3.4000E-02 9.7170E-02 4.1910E-01 5.1250E-01

3.3370E-01 1.6550E-02 3.3590E-02 6.7750E-02 3.9430E-01 6.2580E-01 4.6910E-01

1.4560E-02 9.7390E-02 4.6000E-01 2.1550E-02 1.1730E-01 2.6710E+00 2.6250E+00

7.4540E-02 7.6140E-02 2.6780E-01 7.4760E+00 2.7390E-02 5.1420E-01 2.3190E+00

1.1520E-02 2.3410E-02 2.2070E-02 1.9080E-02 1.1970E-02 1.2580E-02 5.8690E-03

1.9360E-03 2.3550E-03 2.1830E-03 2.3470E-03 1.1310E-03 1.4260E-02 2.1600E-02

2.5730E-02 2.3200E-04 1.3990E-03 2.2910E-03 2.1460E-03 1.4530E-05 3.1780E-03

5.3470E-03 6.6510E-03 1.0720E-03 4.9310E-03 2.5790E-02 2.3610E-02 3.3420E-03

7.3260E-03 2.8340E-02 2.5530E-02 5.5490E-04 2.8790E-03 3.8040E-03 5.0130E-03

8.5380E-04 5.7970E-03 8.9650E-03 1.0280E-02 1.0210E-03 7.5260E-03 1.1430E-02

4.4120E-02 1.3310E-04 2.2230E-03 4.0880E-03 5.6070E-03 2.5910E-04 1.6420E-03

2.8840E-03 5.5170E-03 8.3600E-03 7.7050E-03 1.7720E-02 2.2600E-03 6.1830E-03

4.7090E-03 2.2270E-03 1.7990E-03 1.8180E-03 1.9120E-03 1.6790E-03 4.2350E-03

8.8010E-03 5.3130E-03 1.8200E-03 3.4510E-04 8.9490E-04 8.0600E-04 6.4220E-04

4.6660E-03 9.7530E-04 8.4240E-04 1.2510E-03 7.5930E-04 9.7210E-04 5.8550E-04

2.0900E-04 2.2480E-04 5.4640E-04 5.8780E-04 8.5330E-04 1.2800E+00 4.8370E-01

3.6240E+00 2.5620E-01 8.2140E-02 8.4440E-02 4.7360E-02 2.5550E-02 1.3660E-02

5.0590E-01 2.6070E-01 1.2470E-01 5.5570E-02 1.6170E-01 1.1420E-01 6.8810E-02

3.5750E-02 7.3720E-01 4.8440E-01 2.4600E-01 8.7750E-02 4.4320E-01 3.2920E-01

1.8880E-01 9.3010E-02 3.5830E-02 3.8510E-01 2.9450E-01 1.9320E-01 1.0840E-01

5.0510E-02 1.7580E-02 3.2070E-01 1.9710E-01 6.6000E-02 2.7970E+00 8.4510E-01

2.3920E-01 7.6920E-02 8.8980E-01 6.7700E-01 3.7020E-01 1.3920E-01 5.4830E+00

2.3950E+00 5.1160E-02 4.0210E-01 1.8400E-01 7.6750E-02 2.9470E-02 3.6230E-01

2.0440E-01 1.1490E-01 4.2950E-01 4.7710E-01 2.3560E-01 4.1530E-02 3.1450E-01

1.3710E-01 5.1990E-02 1.6540E-02 5.3760E-02 2.9270E-02 1.4260E-02 5.6910E-03

6.2590E-02 2.9970E-02 1.2150E-02 3.5060E-03 6.5810E-01 1.8070E-01 3.4140E-02

5.6880E-03 1.4330E+00 3.4140E-01 4.9810E-02 5.6670E-03 6.9410E-02 3.1040E-02

1.2190E-02 3.9760E-03 1.1840E-01 5.5920E-02 2.3480E-02 8.3560E-03 3.4760E-02

2.2480E-02 1.2740E-02 6.1670E-03 1.0390E-02 6.3090E-03 4.0880E-03 2.6820E-03

8.3570E-03 4.2570E-03 1.9240E-03 7.0870E-04 1.3370E+00 5.8230E-01 1.4510E-02

7.1550E-01 1.9290E-01 3.9390E-02 9.5810E-03 1.2610E-01 1.0070E-01 5.9350E-02

2.6150E-02 8.7460E-01 2.3580E-01 5.7640E-02 1.9170E-02 1.9460E-01 8.5910E-02

3.3990E-02 1.0910E-02 3.4900E-01 1.6170E-01 8.3670E-02 1.5560E-02 2.5010E-01

9.3870E-02 4.4180E-02 2.1800E-02 6.6020E-02 2.9610E-02 1.1330E-02 3.3190E-03

6.2940E-01 2.5600E-01 2.2490E+00 1.3860E-01 1.8370E-02 3.7380E-02 3.4600E-02

2.4010E-02 1.2200E-01 2.2960E-01 1.8350E-01 1.0430E-01 7.4460E-02 6.0210E-02

6.2030E-02 6.1640E-02 3.8070E-01 2.9090E-01 2.5430E-01 1.5760E-01 1.9420E-01

1.7580E-01 1.6510E-01 1.3680E-01 7.6850E-02 2.0870E-01 1.0020E-01 9.8990E-02

1.1660E-01 1.0910E-01 6.4700E-02 1.6780E-01 7.5640E-02 1.4480E-01 2.7130E-01

1.4020E+00 7.7390E-01 1.9260E-01 5.4440E-01 1.7240E-01 2.8800E-01 3.7900E-01

2.3940E+00 7.3590E-01 2.1560E+00 7.5530E-02 1.6980E-01 1.3780E-01 7.7880E-02

2.0440E-01 1.9790E-01 5.2490E-02 2.8610E-01 2.3490E-01 9.9240E-02 1.9650E-01

2.7910E-02 1.3600E-01 1.1840E-01 6.4470E-02 1.0720E-02 2.0650E-02 2.0770E-02

1.6490E-02 3.9730E-03 2.5880E-02 2.5890E-02 1.6380E-02 3.0140E-02 3.3870E-01

1.8400E-01 4.0610E-02 2.4150E-02 7.4360E-01 3.8340E-01 6.9660E-02 1.2220E-02

2.8240E-02 2.3490E-02 1.3680E-02 1.6750E-02 4.9000E-02 4.4160E-02 2.7600E-02

1.5720E-02 1.2460E-02 1.2110E-02 1.0270E-02 3.4940E-03 5.3700E-03 4.3280E-03

2.5260E-03 1.2240E-03 3.3480E-03 3.2750E-03 2.3180E-03 5.8220E-01 1.8550E-01

5.2180E-01 3.5350E-02 3.6450E-01 1.9440E-01 4.0110E-02 8.3620E-02 2.8910E-02

4.2260E-02 5.3130E-02 4.5900E-02 4.6430E-01 2.3830E-01 4.2800E-02 1.6160E-02

8.5580E-02 7.3800E-02 3.9610E-02 2.3270E-01 8.3650E-02 3.1400E-02 5.9130E-02

4.7830E-02 1.3860E-01 7.1530E-02 1.5520E-02 1.1790E-02 2.6060E-02 2.2170E-02

1.3500E-02 8.1850E-02 1.3860E-01 1.0990E+00 5.4720E-03 9.7210E-03 1.7520E-02

2.3720E-02 3.5430E-02 6.4020E-02 1.0490E-01 1.1220E-01 1.5970E-02 4.0650E-02

4.1370E-02 3.1760E-02 9.6040E-02 2.0020E-01 1.5350E-01 7.5060E-02 4.0620E-02

1.1320E-01 1.0880E-01 7.7500E-02 3.8790E-02 5.2970E-03 1.0520E-01 1.0780E-01

7.4960E-02 3.9960E-02 1.5550E-02 3.0390E-02 1.1650E-01 4.7750E-02 9.5950E-02

1.2990E-01 5.7120E-01 5.2240E-01 4.8310E-02 3.3700E-01 2.3160E-01 7.4650E-02

5.1080E-02 2.1560E+00 4.3570E-01 1.5530E-02 4.1880E-02 8.2040E-02 9.0450E-02

1.1490E-01 5.2490E-02 5.8750E-02 1.4310E-01 4.1490E-02 1.9070E-01 4.2190E-02

4.3560E-03 1.5850E-02 6.0760E-02 9.2380E-02 1.0650E-03 6.2290E-03 1.1760E-02

1.5260E-02 4.7860E-05 2.3980E-03 1.1890E-02 2.1730E-02 5.8910E-03 1.7930E-02

1.4340E-01 1.3960E-01 6.6490E-03 1.2890E-02 3.0790E-01 2.9260E-01 1.6180E-03

7.3980E-03 1.4310E-02 1.5590E-02 2.2790E-03 9.6420E-03 2.4030E-02 3.2820E-02

3.7850E-03 8.4070E-03 7.7760E-03 5.1890E-03 1.7040E-03 1.4270E-03 2.0640E-03

2.5140E-03 1.2090E-04 7.1180E-04 1.7320E-03 2.5180E-03 1.4510E-02 5.2170E-01

1.0830E-01 1.1800E-02 1.7410E-02 1.4700E-01 1.4660E-01 1.3160E-02 4.8720E-02

3.2240E-02 9.8350E-03 2.6090E-02 1.4760E-02 1.7860E-01 1.7410E-01 3.3320E-03

8.3570E-03 3.7430E-02 5.7000E-02 1.1630E-01 1.5540E-02 5.9130E-02 1.2460E-02

3.0090E-02 1.3520E-02 4.8370E-02 4.4730E-02 9.6540E-04 7.3400E-03 1.3770E-02

1.4690E-02 2.4870E+00 2.0550E-01 4.1580E-01 2.0240E-01 9.9760E-02 4.5320E-02

7.7790E-01 5.5610E-01 4.0710E-01 2.7100E-01 4.3500E-01 2.9930E-01 1.7660E-01

8.5290E-02 7.7450E-01 5.9510E-01 4.0910E-01 1.4810E-01 9.7430E-02 6.7070E-02

3.7830E-02 1.9670E-02 8.2160E-03 1.4600E-01 8.6110E-02 4.7980E-02 2.4930E-02

1.1740E-02 4.4090E-03 7.7790E-02 5.4050E-02 2.4640E-02 5.3060E-01 2.4680E-01

1.1220E-01 4.4400E-02 2.3420E-01 1.5010E-01 8.6140E-02 4.3180E-02 2.5320E-01

1.2660E-01 2.3110E-02 2.7170E-01 1.5540E-01 8.6970E-02 4.6150E-02 3.6160E-01

3.0890E-01 1.8620E-01 5.4460E+00 1.0610E+01 4.6310E+00 2.2610E-01 8.3880E-02

4.2700E-02 2.1470E-02 1.1080E-02 3.8070E-02 2.0120E-02 9.3150E-03 3.3250E-03

5.9700E-02 3.0410E-02 1.3370E-02 4.3090E-03 2.0030E+01 4.8130E+00 6.6050E-01

2.6640E-02 5.3680E-02 3.4960E-02 2.5310E-02 1.4090E-02 3.0970E-02 1.8980E-02

1.2030E-02 7.3650E-03 2.6680E-02 2.0580E-02 1.6850E-02 1.3570E-02 2.5210E-02

1.5730E-02 8.2290E-03 3.4330E-03 9.2600E-03 5.8350E-03 3.5300E-03 2.0300E-03

1.2660E-02 8.4730E-03 4.8780E-03 2.1990E-03 2.7160E-01 1.1690E-01 4.4050E-03

2.8780E-02 1.6200E-02 1.0240E-02 5.3620E-03 2.2620E-02 1.8030E-02 1.3000E-02

8.2540E-03 9.8110E-02 2.9030E-02 1.0370E-02 4.1550E-03 2.0660E-02 1.0010E-02

4.5440E-03 1.9550E-03 5.6340E-02 2.7590E-02 1.5910E-02 3.9560E-03 2.2700E-02

1.1220E-02 6.5530E-03 3.3430E-03 8.9780E-03 5.1740E-03 2.4910E-03 9.2030E-04

2.0510E+00 6.6070E-02 1.7430E-01 1.6690E-01 1.0630E-01 4.1060E-01 4.6880E-01

3.1710E-01 1.5570E-01 1.8270E-01 1.6410E-01 1.6880E-01 1.6950E-01 5.0310E-01

4.0150E-01 2.9090E-01 1.5450E-01 3.8160E-02 4.5080E-02 3.8840E-02 2.7120E-02

1.3470E-02 3.2600E-02 5.1240E-02 5.0250E-02 4.0100E-02 2.6750E-02 1.3110E-02

4.7340E-02 2.2850E-02 3.4020E-02 1.6140E-01 2.3540E-01 1.5820E-01 6.8630E-02

1.0430E-01 8.9020E-02 8.2360E-02 6.6740E-02 1.2580E-01 5.2620E-02 8.9900E-02

9.4760E-02 1.2010E-01 9.7270E-02 6.2070E-02 3.0880E-01 2.0340E-01 6.0520E-02

3.6310E+00 4.6290E+00 1.6980E+00 4.1260E+00 1.6370E-02 3.7850E-02 3.2520E-02

1.9350E-02 6.6660E-03 1.4520E-02 1.4650E-02 1.1390E-02 6.5370E-03 2.3690E-02

2.4280E-02 1.7360E-02 3.7550E-01 1.0570E+01 5.3850E+00 1.0250E+00 2.9270E-02

3.3950E-02 1.7320E-02 4.6450E-03 1.2560E-02 1.5470E-02 1.1630E-02 6.6350E-03

1.5370E-02 1.7090E-02 1.2500E-02 6.8350E-03 1.0650E-02 8.1370E-03 8.5130E-03

7.7640E-03 3.3030E-03 4.2000E-03 3.6640E-03 2.6680E-03 4.8800E-03 4.0510E-03

4.6260E-03 5.2510E-03 1.1600E-01 3.7440E-02 1.0190E-01 1.2330E-02 1.6430E-02

8.9290E-03 2.7810E-03 1.4980E-02 1.0880E-02 8.7890E-03 6.6140E-03 1.0500E-02

4.7400E-02 2.5580E-02 5.9830E-03 3.2960E-03 8.9150E-03 7.8400E-03 4.7410E-03

3.5290E-02 1.5910E-02 6.4940E-03 9.6200E-03 7.8480E-03 1.2640E-02 6.8950E-03

2.0430E-03 3.1960E-03 2.9260E-03 2.9930E-03 2.5820E-03 1.4730E-02 3.5470E-02

7.9060E-02 1.2410E-01 2.3150E-01 1.5040E-01 1.4370E-01 1.3650E-01 3.0950E-02

1.0210E-01 1.1170E-01 9.2090E-02 1.7350E-01 2.1280E-01 1.6180E-01 8.5550E-02

1.1290E-02 1.8690E-02 2.1440E-02 1.8560E-02 1.0590E-02 4.6490E-03 1.5680E-02

2.4150E-02 2.6930E-02 2.2480E-02 1.2740E-02 1.3980E-02 2.7410E-02 1.0910E-02

5.4760E-02 7.8850E-02 1.0400E-01 7.4230E-02 2.8260E-02 5.4430E-02 5.1630E-02

3.6820E-02 2.2980E-02 8.9490E-02 2.1610E-02 3.3700E-02 4.5360E-02 5.6100E-02

5.2100E-02 1.8620E-01 6.0520E-02 3.6840E-02 1.8150E+00 2.2590E-01 4.0560E+00

9.1260E-01 5.8410E-03 7.8480E-03 1.6730E-02 2.2610E-02 3.3820E-04 3.9980E-03

8.2340E-03 1.1040E-02 8.9810E-05 3.9430E-03 1.2110E-02 1.9790E-02 4.8720E-03

2.7080E-01 4.3070E+00 4.1910E+00 1.9620E-02 7.4590E-03 8.7200E-03 6.8950E-03

5.9550E-03 5.2000E-03 6.1120E-03 5.8050E-03 9.7400E-03 5.4980E-03 5.1710E-03

5.4830E-03 1.7160E-03 6.1850E-03 5.7990E-03 3.8310E-03 1.0970E-03 1.6200E-03

1.9970E-03 2.0730E-03 4.0680E-04 2.8640E-03 3.3200E-03 2.8080E-03 4.3970E-03

1.0210E-01 2.1190E-02 7.3450E-03 3.7860E-03 5.0890E-03 4.0400E-03 6.6120E-03

6.4680E-03 4.7370E-03 2.8180E-03 5.5970E-03 3.6980E-03 1.8490E-02 1.7310E-02

7.5830E-04 1.7320E-03 4.1430E-03 5.6870E-03 1.7540E-02 3.9530E-03 9.6200E-03

2.1400E-03 4.5640E-03 2.4910E-03 4.1740E-03 3.4090E-03 3.7220E-04 1.9330E-03

2.0360E-03 1.5090E-03 6.8940E+00 3.6580E-01 4.0210E-02 1.4700E+00 4.5970E-01

8.5080E-02 9.4400E-03 2.4610E+00 8.3740E-01 2.7100E-01 2.6980E-02 3.6870E-01

3.6200E-01 7.8010E-02 1.1660E-02 2.1540E-01 1.1660E-01 4.6000E-02 1.3320E-02

1.7520E-03 2.8890E-01 1.3960E-01 5.7470E-02 1.8850E-02 4.5090E-03 5.5220E-04

2.5720E-01 7.6000E-02 1.0130E-02 4.1270E-01 1.1330E-01 2.8260E-02 5.0300E-03

4.3810E-01 1.4550E-01 3.6220E-02 6.5310E-03 1.0950E-01 4.4260E-02 5.6250E-03

1.7290E+00 4.9270E-01 2.4030E-01 4.7960E-02 2.2900E-01 3.7510E-02 5.7840E-03

1.3890E-02 2.7970E-02 1.6450E-02 1.6860E-03 1.6120E+01 8.9120E-01 1.7340E-02

1.9400E-03 2.7410E+01 2.3770E+00 8.6050E-02 1.2400E-03 3.5910E+01 3.0590E+00

1.2670E-01 3.4970E-03 1.9080E-02 4.7840E-03 9.5590E-04 1.2150E-04 3.9550E-02

9.4720E-03 7.4510E-04 8.1240E-05 4.8970E-02 1.6720E-02 3.5190E-03 1.8010E-04

6.3480E+00 2.5190E-01 5.9660E-03 7.2330E-04 1.3230E-01 4.2190E-02 9.7220E-03

1.2190E-03 6.9210E-01 8.2520E-02 1.7370E-02 2.9790E-03 2.1240E+00 2.0510E-01

2.3510E-02 3.3280E-03 9.1460E-03 8.1840E-04 4.1970E-05 2.0230E-02 5.5700E-03

7.8310E-04 5.6260E-05 2.7950E-02 6.9840E-03 1.2640E-03 1.5220E-04 4.3100E-02

7.5640E-03 8.3300E-04 1.9790E-04 1.5300E-01 1.8310E-02 2.3470E-03 2.4650E-04

5.3340E-03 4.5850E-03 2.1760E-03 4.7960E-04 2.2820E-02 3.8570E-03 9.9420E-04

2.2080E-05 4.4750E-02 9.8480E-03 1.5810E-03 1.6490E-04 1.1920E+01 4.6610E-01

5.8420E-01 7.4710E-01 4.1080E-01 9.1500E-02 8.3570E-01 1.8550E+00 1.2300E+00

3.0390E-01 3.3360E-01 4.8440E-01 2.6040E-01 7.0930E-02 1.2150E-01 1.1240E-01

7.2250E-02 4.0760E-02 1.8510E-02 1.2460E-01 1.1930E-01 9.5920E-02 5.9370E-02

2.7780E-02 8.8420E-03 1.3780E-01 1.0590E-01 5.0800E-02 1.8800E-01 1.8920E-01

7.7540E-02 2.4530E-02 1.8520E-01 1.9930E-01 1.1560E-01 3.7000E-02 7.4830E-02

3.6730E-02 2.5250E-02 6.6620E-01 1.1270E+00 7.6070E-01 2.4130E-01 1.1960E-01

9.3820E-02 2.0700E-02 1.1910E-02 2.2510E-02 7.4720E-03 9.5420E-03 1.7740E+00

1.1580E+01 1.1040E+00 1.9230E-02 2.3430E+00 2.3110E+01 2.9390E+00 1.0150E-01

3.2440E-01 3.1460E+01 3.9070E+00 1.4780E-01 8.2660E-03 8.7080E-03 3.4930E-03

8.9740E-04 1.6760E-02 1.6560E-02 8.6820E-03 7.1600E-04 2.1120E-02 2.0810E-02

1.3520E-02 4.0110E-03 5.4390E-01 4.7880E+00 3.1000E-01 6.7140E-03 5.4300E-02

6.0350E-02 3.3900E-02 1.0400E-02 1.1220E-01 4.7460E-01 7.6100E-02 1.8540E-02

2.0400E-01 1.5720E+00 2.3050E-01 2.5840E-02 4.3220E-03 3.7710E-03 4.9070E-04

9.2270E-03 8.3180E-03 4.5310E-03 7.9310E-04 9.6780E-03 1.3930E-02 6.1800E-03

1.3610E-03 1.5930E-02 2.0960E-02 6.7930E-03 6.6610E-04 2.3920E-02 1.0050E-01

1.9160E-02 2.6220E-03 4.5720E-03 3.3700E-03 1.6940E-03 1.1640E-03 8.2930E-03

1.2130E-02 2.2420E-03 1.0780E-03 1.4250E-02 2.3220E-02 9.0150E-03 1.7270E-03

1.2260E+01 1.7450E-01 5.4210E-01 5.0730E-01 3.3760E-01 2.2960E-01 1.1900E+00

1.5620E+00 1.0590E+00 1.7360E-01 4.1840E-01 3.1760E-01 1.8120E-01 5.4500E-02

8.0590E-02 8.3270E-02 6.1120E-02 3.0300E-02 3.8160E-02 8.7680E-02 8.5280E-02

7.0850E-02 5.2490E-02 2.8400E-02 6.3610E-02 9.9840E-02 8.1900E-02 7.7630E-02

1.4120E-01 1.2620E-01 5.2950E-02 6.4660E-02 1.4910E-01 1.3880E-01 9.5860E-02

4.4490E-02 4.0750E-02 2.8610E-02 2.5250E-01 7.1210E-01 1.2850E+00 6.2760E-01

5.7070E-02 9.0720E-02 4.7570E-02 9.9220E-03 1.4640E-02 9.7690E-03 8.5250E-03

9.9380E-02 2.2340E+00 8.9260E+00 8.4250E-01 4.3860E-02 2.9220E+00 1.6160E+01

2.2690E+00 8.5590E-03 1.0690E+00 2.6710E+01 3.0100E+00 3.1200E-03 6.5510E-03

5.6950E-03 2.4480E-03 5.2690E-03 1.4670E-02 9.5430E-03 6.1170E-03 6.7120E-03

1.7050E-02 1.4370E-02 1.1430E-02 2.9950E-02 6.7900E-01 3.7620E+00 2.3700E-01

1.7800E-02 4.4210E-02 4.2110E-02 2.8330E-02 2.3680E-02 1.1130E-01 3.6880E-01

6.4470E-02 2.3510E-02 2.2950E-01 1.2580E+00 1.8510E-01 1.7610E-03 3.6140E-03

1.7950E-03 3.2800E-03 7.3970E-03 5.1530E-03 3.2080E-03 2.6710E-03 8.7010E-03

9.5660E-03 5.0250E-03 4.8000E-03 1.4690E-02 1.2730E-02 4.7190E-03 3.7590E-03

2.5500E-02 7.6580E-02 1.5550E-02 3.8110E-03 2.1790E-03 1.7810E-03 1.2090E-03

2.9550E-03 6.7550E-03 8.4430E-03 1.6300E-03 3.6210E-03 1.3310E-02 1.5960E-02

7.2740E-03 3.2580E-02 2.0340E-01 4.7510E-01 5.5060E-01 3.8380E-02 4.0580E-01

1.2150E+00 1.8260E+00 6.5770E-02 2.5080E-01 3.5400E-01 2.4190E-01 1.4510E-02

5.4430E-02 7.1550E-02 6.5900E-02 3.9520E-02 6.3570E-03 3.4360E-02 6.6000E-02

7.7820E-02 6.6440E-02 3.7590E-02 2.1100E-02 7.8130E-02 9.6860E-02 2.6040E-02

8.1990E-02 1.1730E-01 9.1670E-02 1.6070E-02 6.8860E-02 1.3110E-01 1.4160E-01

2.1790E-02 4.5340E-02 2.3940E-02 1.1160E-01 4.5620E-01 9.3520E-01 1.2300E+00

2.3970E-02 6.4010E-02 6.8180E-02 7.9400E-03 7.3410E-03 1.4610E-02 4.3970E-03

4.6220E-03 1.1920E-01 1.8130E+00 9.9340E+00 1.2400E-03 1.0150E-01 2.2600E+00

1.4810E+01 1.4600E-03 2.3050E-02 1.6460E+00 2.4070E+01 8.9400E-04 3.4750E-03

5.5240E-03 4.3610E-03 1.0920E-03 6.2840E-03 1.2360E-02 8.7490E-03 1.0770E-03

7.7250E-03 1.5310E-02 1.5530E-02 1.3590E-03 3.5810E-02 5.2510E-01 3.1960E+00

3.7600E-03 1.9770E-02 3.9150E-02 4.3270E-02 4.4320E-03 2.5860E-02 9.3390E-02

3.3340E-01 3.3270E-03 2.5830E-02 1.8660E-01 1.1440E+00 5.3220E-04 2.2820E-03

2.9110E-03 7.8920E-04 3.8030E-03 6.3030E-03 4.3190E-03 5.0060E-04 3.0200E-03

7.4710E-03 9.7830E-03 1.1690E-03 5.5530E-03 1.2150E-02 1.0680E-02 4.4520E-04

4.2920E-03 2.0910E-02 7.2040E-02 3.0480E-03 1.2610E-03 1.9140E-03 9.3460E-04

7.3840E-04 3.3970E-03 5.7250E-03 5.9770E-03 6.1380E-04 4.1420E-03 1.1310E-02

1.6100E-02 6.2690E+00 2.5770E-01 5.1030E-02 1.2630E+00 6.0510E-01 1.8900E-01

3.8100E-02 1.5560E+00 9.3420E-01 2.7760E-01 5.2820E-02 1.3200E-01 7.3820E-02

3.6820E-02 1.8650E-02 8.1400E-03 2.1810E-01 1.4370E-01 9.1410E-02 5.2000E-02

2.5130E-02 9.2210E-03 1.5470E-01 6.5630E-02 2.0410E-02 9.2420E-01 1.6830E-01

4.7650E-02 1.5010E-02 4.7250E-01 1.7510E-01 6.5830E-02 2.2530E-02 2.1400E-01

1.0070E-01 1.8440E-02 1.2360E+00 8.1630E-01 2.7400E-01 9.7240E-02 2.8180E-01

1.1360E-01 4.0670E-02 2.7630E-01 3.2680E-01 1.6400E-01 7.4510E-02 8.8760E+00

1.1540E+00 1.0730E-01 8.9380E-03 6.1650E-01 3.2640E-01 7.9760E-02 1.1490E-02

8.9740E-01 3.3170E-01 9.6320E-02 9.7890E-03 1.5480E-01 2.7000E-02 1.8350E-02

9.6920E-03 1.7420E+01 4.4060E-01 4.6700E-03 8.1250E-04 2.2430E+01 2.6330E+00

1.1030E-01 1.0030E-03 2.5060E+01 2.5460E+00 1.5030E-01 5.4280E-03 6.9150E-01

1.0370E-01 9.9100E-03 1.2190E-03 5.1450E-01 7.2380E-02 1.1210E-02 1.9300E-03

6.2250E-02 2.9630E-02 1.0790E-02 2.1520E-03 4.3250E-02 1.1400E-02 1.7630E-03

7.7990E-01 5.0540E-02 6.4790E-03 1.6600E-03 3.9270E-01 6.6670E-02 9.9440E-03

2.0080E-03 4.3940E-02 1.7440E-02 5.0560E-03 1.1820E-03 4.9860E-02 2.0650E-02

6.5600E-03 1.8440E-03 1.2120E-02 7.8460E-03 4.7710E-03 1.9570E-03 1.8710E-02

8.7710E-03 3.6300E-03 1.2480E-03 3.9370E-02 1.6420E-02 5.0510E-03 1.2130E-03

7.8880E+00 2.8660E-01 3.9400E-01 7.7900E-01 5.3730E-01 2.0830E-01 8.9370E-01

1.0020E+00 6.0210E-01 2.4480E-01 6.3600E-02 7.1510E-02 5.0650E-02 2.7500E-02

1.0880E-02 1.2480E-01 1.0710E-01 7.4740E-02 5.6180E-02 4.3460E-02 2.5210E-02

8.5370E-02 6.4720E-02 4.2460E-02 2.5940E-01 5.0580E-01 1.2540E-01 3.3150E-02

1.7500E-01 2.3100E-01 1.2390E-01 5.9040E-02 1.4100E-01 6.8240E-02 5.7300E-02

8.1630E-01 6.9360E-01 6.3570E-01 2.4140E-01 1.7220E-01 1.2270E-01 5.4010E-02

2.2100E-01 2.2260E-01 1.6000E-01 6.9610E-02 5.5890E-01 6.1040E+00 1.3610E+00

1.2980E-01 2.3480E-01 4.5750E-01 3.0730E-01 9.2910E-02 1.7400E-01 1.0250E+00

5.6870E-01 1.1550E-01 4.2110E-02 1.0410E-01 1.5310E-02 6.5120E-03 2.4060E+00

1.1400E+01 4.8780E-01 3.4950E-03 2.6270E+00 1.4210E+01 3.1490E+00 1.3890E-01

8.0820E-01 1.8160E+01 3.2040E+00 1.8840E-01 1.0300E-01 4.2180E-01 1.0940E-01

1.1330E-02 3.2930E-02 3.8000E-01 7.7890E-02 1.2620E-02 2.4260E-02 2.5580E-02

2.1940E-02 1.2090E-02 2.2050E-02 1.6420E-02 6.6640E-03 1.3710E-01 4.8050E-01

4.7120E-02 5.1310E-03 6.6550E-02 2.3170E-01 6.7810E-02 1.0450E-02 2.0960E-02

1.7110E-02 1.1850E-02 4.1770E-03 1.7510E-02 2.3870E-02 1.6870E-02 6.7470E-03

9.6930E-03 5.9460E-03 3.5730E-03 2.1330E-03 1.0090E-02 8.1260E-03 5.3120E-03

2.3550E-03 1.5620E-02 1.7200E-02 1.2530E-02 5.1160E-03 5.9270E+00 1.0560E-01

4.5620E-01 5.3620E-01 4.5800E-01 4.1960E-01 7.5430E-01 6.5930E-01 3.7960E-01

3.1990E-02 4.6510E-02 4.3530E-02 3.2020E-02 1.6710E-02 6.6960E-02 5.7760E-02

7.3170E-02 6.5200E-02 4.1890E-02 1.8480E-02 4.1950E-02 5.4910E-02 4.7530E-02

8.0750E-02 2.2240E-01 3.1110E-01 7.8260E-02 6.5830E-02 1.2390E-01 1.5750E-01

9.4570E-02 7.7330E-02 7.2820E-02 4.9740E-02 2.7400E-01 6.3570E-01 7.2730E-01

4.8060E-01 1.0140E-01 1.0160E-01 5.8850E-02 1.6580E-01 1.4920E-01 1.2380E-01

6.6120E-02 2.7110E-02 6.4050E-01 4.3900E+00 1.0600E+00 3.1690E-02 2.2330E-01

3.0310E-01 2.6120E-01 6.8810E-03 3.1630E-01 7.0000E-01 4.6850E-01 2.2600E-02

3.4820E-02 6.3250E-02 5.6930E-03 1.9090E-01 2.9130E+00 7.2810E+00 3.4070E-01

1.0840E-01 3.1740E+00 9.4370E+00 2.3850E+00 7.0830E-03 9.8390E-01 1.3320E+01

2.4630E+00 9.8610E-03 1.0940E-01 2.7920E-01 8.3580E-02 6.0480E-03 3.1280E-02

3.0060E-01 6.2720E-02 6.2980E-03 1.7890E-02 1.8500E-02 2.0210E-02 9.9430E-03

1.4640E-02 9.2640E-03 2.0240E-02 1.4840E-01 3.0190E-01 3.1870E-02 9.9140E-03

6.7760E-02 1.5220E-01 5.1930E-02 8.1820E-03 1.4380E-02 1.0260E-02 7.4690E-03

4.6040E-03 1.4380E-02 1.6110E-02 1.4090E-02 7.2680E-03 4.0990E-03 2.9690E-03

1.6590E-03 5.1710E-03 6.2750E-03 5.2330E-03 2.8880E-03 4.8930E-03 1.1010E-02

1.1930E-02 9.8950E-03 2.0080E-02 1.3850E-01 3.6010E-01 5.1670E-01 1.2590E-01

4.4210E-01 5.5080E-01 3.6540E-01 1.6760E-02 2.1990E-02 2.9180E-02 2.8230E-02

1.7270E-02 2.2240E-02 5.1370E-02 4.8570E-02 4.1740E-02 3.2900E-02 1.8760E-02

1.7580E-02 3.9360E-02 3.9320E-02 2.9270E-02 7.3570E-02 1.6250E-01 1.9490E-01

2.2530E-02 5.9040E-02 9.4560E-02 1.1830E-01 3.4120E-02 6.9150E-02 2.9950E-02

9.7220E-02 2.4140E-01 4.8060E-01 5.9220E-01 5.5550E-02 6.9100E-02 4.9180E-02

1.1050E-01 9.2760E-02 7.9770E-02 5.3600E-02 3.7510E-03 2.9500E-02 4.8580E-01

3.5590E+00 2.1550E-03 3.5670E-02 1.7890E-01 3.2960E-01 6.4430E-04 7.4670E-03

2.4160E-01 7.4460E-01 1.5250E-02 1.1020E-02 2.0820E-02 3.6770E-02 6.7380E-03

2.5910E-01 2.2330E+00 4.8240E+00 1.0030E-03 1.3870E-01 2.3990E+00 7.5500E+00

1.8820E-03 6.8980E-03 7.3650E-01 1.0420E+01 1.2160E-03 1.1330E-02 8.5380E-02

2.2530E-01 1.0520E-03 6.5130E-03 2.4870E-02 2.4060E-01 5.8340E-04 6.9430E-03

1.5480E-02 1.8920E-02 3.7430E-03 1.0180E-02 8.6360E-03 3.8460E-03 2.3120E-02

1.1310E-01 1.9540E-01 2.0040E-03 1.0450E-02 5.1910E-02 1.2340E-01 2.6420E-03

7.8900E-03 1.0410E-02 6.1160E-03 1.1630E-03 4.4450E-03 1.1440E-02 1.5690E-02

4.8460E-03 2.5070E-03 2.2750E-03 1.0430E-03 2.3040E-03 3.9950E-03 4.0460E-03

2.4890E-03 1.1350E-03 5.0940E-03 8.8450E-03 9.3450E-03 6.1450E+00 2.5790E-01

3.4730E-02 1.6400E+00 6.2880E-01 1.7790E-01 4.1440E-02 1.1200E-01 5.9250E-02

2.3140E-02 7.9640E-03 2.1040E-03 2.3370E-01 1.3360E-01 6.7030E-02 2.8220E-02

9.2080E-03 1.9150E-03 1.1350E-01 2.6740E-02 7.7650E-03 3.7480E-01 1.2300E-01

3.5320E-02 6.7100E-03 8.5770E-01 1.4330E-01 3.9060E-02 1.1360E-02 1.8600E-01

4.0230E-02 1.0960E-02 2.0290E+00 6.3030E-01 1.7920E-01 5.9740E-02 2.3290E-01

7.5860E-02 1.1610E-02 4.8010E-03 2.3970E-02 5.5260E-03 1.7800E-03 1.6460E+00

2.2460E-01 3.2800E-02 3.1480E-03 3.1190E+00 3.6460E-01 4.1920E-02 4.8980E-03

1.2920E-01 1.0170E-01 3.0280E-02 4.3970E-03 2.3600E-02 1.1200E-02 3.3280E-03

4.7580E-04 6.1560E-02 1.8790E-02 2.8130E-03 4.4460E-04 5.5350E-01 3.5040E-02

5.7100E-03 1.6190E-03 1.1760E-01 4.4300E-02 1.3210E-02 2.3160E-03 1.9530E+01

6.7320E-01 5.3130E-03 8.2980E-04 2.6030E+01 2.3930E+00 9.2710E-02 6.6660E-04

3.2610E+01 2.7390E+00 1.2780E-01 3.4690E-03 3.1630E-02 6.4080E-03 2.1620E-03

6.9610E-02 2.7620E-02 1.0330E-02 2.6250E-03 1.7240E+00 8.5200E-02 1.2380E-02

3.9510E-03 5.1860E-02 1.4830E-02 3.7050E-03 3.6710E-04 1.1820E-01 2.5800E-02

5.3610E-03 8.4370E-04 9.6540E-04 1.1330E-02 3.4340E-03 8.4390E-04 2.4070E-02

8.5140E-03 2.2260E-03 4.8880E-04 7.1370E-02 1.6460E-02 3.2390E-03 5.4710E-04

1.0630E+01 3.0730E-01 7.7870E-01 1.2120E+00 4.2780E-01 1.4250E-01 5.3890E-02

6.5670E-02 3.9210E-02 2.0410E-02 8.3900E-03 1.1830E-01 9.4820E-02 7.7140E-02

5.5560E-02 3.3700E-02 1.5080E-02 5.2080E-02 5.4100E-02 1.7140E-02 1.7510E-01

1.6650E-01 8.1190E-02 2.9080E-02 1.9640E-01 5.2290E-01 1.1780E-01 3.6230E-02

9.7390E-02 7.9540E-02 2.0750E-02 7.4280E-01 9.9320E-01 5.2120E-01 1.5880E-01

1.4140E-01 8.5090E-02 4.2940E-02 4.0000E-03 1.2790E-02 1.0540E-02 2.7370E-03

2.2380E-01 1.0260E+00 2.3260E-01 3.7760E-02 2.2100E-01 2.3110E+00 4.1900E-01

4.7890E-02 8.4960E-02 1.2390E-01 8.6970E-02 3.4000E-02 1.4000E-02 8.4940E-03

6.6540E-03 3.1100E-03 2.7390E-02 2.3990E-02 1.5720E-02 2.5490E-03 7.4060E-02

3.8500E-01 3.4420E-02 5.3640E-03 4.4290E-02 5.4360E-02 3.4890E-02 1.4340E-02

2.0240E+00 1.3980E+01 8.1800E-01 5.6060E-03 2.3860E+00 1.8340E+01 2.9410E+00

1.1300E-01 5.3560E-01 2.5380E+01 3.4750E+00 1.5430E-01 1.6240E-02 1.4070E-02

3.1230E-03 3.6820E-02 3.1450E-02 1.5750E-02 8.1180E-03 2.0150E-01 1.2140E+00

8.6580E-02 1.1320E-02 2.2210E-02 2.3460E-02 9.7650E-03 3.6030E-03 2.5770E-02

7.9850E-02 2.4790E-02 5.8270E-03 8.0480E-04 6.6140E-03 4.5840E-03 1.8150E-03

1.1800E-02 9.9480E-03 6.0040E-03 1.8360E-03 2.0710E-02 3.7630E-02 1.4640E-02

3.4080E-03 8.6900E+00 3.4120E-01 7.6750E-01 7.8850E-01 2.8020E-01 2.3030E-02

3.9480E-02 4.4990E-02 3.1920E-02 1.4320E-02 4.4840E-02 7.0500E-02 6.8620E-02

5.9860E-02 4.6130E-02 2.5600E-02 2.2430E-02 4.3650E-02 3.2490E-02 7.3760E-02

1.2400E-01 1.1000E-01 5.3110E-02 5.5290E-02 1.7700E-01 3.7440E-01 9.2800E-02

4.8820E-02 7.0820E-02 3.8490E-02 2.4690E-01 6.2380E-01 6.5690E-01 4.0520E-01

7.5520E-02 8.5040E-02 5.4400E-02 3.2000E-03 6.6790E-03 9.2400E-03 4.9300E-03

3.2730E-02 2.3250E-01 7.5480E-01 1.8870E-01 2.3130E-02 2.4370E-01 1.8000E+00

3.3370E-01 1.9520E-02 7.2280E-02 9.1990E-02 8.0060E-02 6.6290E-03 8.3220E-03

6.4240E-03 4.4290E-03 9.1210E-03 2.2180E-02 1.3600E-02 1.0820E-02 1.0520E-02

8.1470E-02 2.8080E-01 2.6480E-02 1.3200E-02 3.4880E-02 3.9290E-02 3.0920E-02

1.2210E-01 2.5060E+00 1.0220E+01 6.1310E-01 9.1580E-02 2.9400E+00 1.3740E+01

2.2560E+00 3.6690E-03 1.5670E+00 1.9960E+01 2.6730E+00 8.2060E-03 1.2210E-02

6.3550E-03 1.8290E-02 2.3130E-02 2.2300E-02 9.8550E-03 2.5020E-02 2.3110E-01

8.9380E-01 6.6050E-02 8.5370E-03 1.6160E-02 1.5870E-02 6.6560E-03 5.3600E-03

2.4780E-02 5.8070E-02 2.0470E-02 6.4380E-04 3.6280E-03 4.2760E-03 2.5040E-03

4.8780E-03 8.3830E-03 6.4450E-03 3.9760E-03 5.0980E-03 1.8800E-02 2.5510E-02

1.1660E-02 1.3200E-01 3.8800E-01 6.0570E-01 5.3550E-01 7.6220E-03 2.2060E-02

3.1810E-02 3.1590E-02 2.0220E-02 9.1670E-03 3.9630E-02 5.8090E-02 5.8810E-02

4.5850E-02 2.4670E-02 9.3740E-03 2.3410E-02 4.0890E-02 2.6400E-02 7.4010E-02

9.8000E-02 7.1650E-02 1.7170E-02 5.5360E-02 1.4320E-01 3.0840E-01 2.3660E-02

4.6620E-02 4.8320E-02 8.6870E-02 2.3780E-01 5.0640E-01 6.1820E-01 3.4290E-02

7.5860E-02 5.1450E-02 2.4000E-03 3.4770E-03 5.9690E-03 6.1940E-03 3.1440E-03

3.7750E-02 1.8870E-01 6.9850E-01 2.5960E-03 2.5610E-02 1.9440E-01 1.5780E+00

9.8860E-04 2.1780E-02 6.4740E-02 1.0980E-01 2.1520E-03 6.8470E-03 6.7620E-03

3.5300E-03 2.2510E-03 1.0300E-02 1.8020E-02 1.1240E-02 2.5010E-03 1.1260E-02

6.3840E-02 2.2200E-01 2.3160E-03 1.4340E-02 3.0920E-02 4.1140E-02 3.7570E-03

1.5390E-01 1.9300E+00 8.0260E+00 6.6650E-04 1.1280E-01 2.2570E+00 1.1910E+01

5.0720E-04 4.3730E-03 1.1880E+00 1.6970E+01 4.1910E-03 7.4480E-03 8.4090E-03

7.7800E-03 1.7150E-02 1.7730E-02 1.2560E-02 5.9400E-03 2.6810E-02 1.7970E-01

7.0050E-01 2.3080E-03 9.3090E-03 1.3160E-02 1.0550E-02 8.4360E-04 5.8250E-03

2.0470E-02 4.8120E-02 4.8280E-04 1.8440E-03 3.3180E-03 2.6430E-03 1.6880E-03

4.9580E-03 6.6700E-03 4.3410E-03 1.0100E-03 5.6290E-03 1.5510E-02 2.3640E-02

3.8560E+00 3.7780E-01 1.5530E-01 6.1820E-02 4.0840E-02 2.3380E-02 1.2640E-02

5.5620E-03 7.4450E-02 4.8740E-02 3.1920E-02 2.1090E-02 1.3300E-02 6.5370E-03

5.9600E-02 3.0530E-02 2.0370E-02 5.0400E-01 2.6260E-01 9.4760E-02 3.1880E-02

5.5700E-01 2.1430E-01 1.5460E-01 5.6690E-02 5.8630E-01 9.6670E-02 3.2840E-02

1.1880E+00 6.4570E-01 3.4200E-01 1.7390E-01 6.9670E-01 3.8610E-01 4.7510E-02

5.7650E-02 2.0970E-01 7.7870E-02 4.2660E-02 2.6770E-01 1.1880E-01 3.6640E-02

7.8180E-03 1.8560E-01 7.9090E-02 2.7640E-02 6.8860E-03 1.6830E-01 7.7380E-02

2.7460E-02 6.0830E-03 4.2780E-02 2.3250E-02 1.3200E-02 5.9230E-03 2.2080E+00

4.2580E-01 2.8920E-02 5.0760E-03 2.0660E+00 3.3750E-01 5.1010E-02 1.0420E-02

1.4800E-01 7.6960E-02 3.3640E-02 1.1290E-02 2.7550E+00 4.1110E-01 5.1790E-02

8.9180E-03 1.9350E-01 7.1630E-02 2.5440E-02 8.6580E-03 2.1430E-01 8.9710E-02

3.7480E-02 1.4200E-02 1.2220E+01 2.3130E-01 5.5960E-03 1.6690E+01 3.0710E+00

1.2390E-01 2.3240E-03 2.4420E+01 3.3240E+00 2.7430E-01 1.4760E-02 1.2600E-01

4.6280E-02 1.2990E-02 2.5980E-03 2.6050E-02 1.5060E-02 7.4060E-03 2.9020E-03

3.4450E-02 1.0800E-01 1.7880E-02 8.4600E-03 4.6860E-02 2.5090E-02 1.0120E-02

2.6200E-03 3.0990E-02 1.2420E-02 4.7880E-03 1.3330E-03 4.6280E+00 2.1780E-01

3.3670E-02 2.8870E-02 2.4460E-02 1.5920E-02 6.4870E-03 3.6790E-02 3.6710E-02

3.2150E-02 2.2900E-02 1.3050E-02 5.4220E-03 3.2910E-02 3.4750E-02 1.5250E-02

1.9440E-01 2.5550E-01 1.0990E-01 6.5520E-02 2.5820E-01 1.9640E-01 1.5110E-01

8.4350E-02 1.9520E-01 2.8130E-01 4.6580E-02 5.5740E-01 5.5130E-01 4.0980E-01

2.4410E-01 4.6080E-01 1.3900E-01 2.4790E-01 4.3230E-02 1.0850E-01 1.1230E-01

2.6570E-02 8.1340E-02 9.9260E-02 9.9880E-02 4.2730E-02 4.4960E-02 8.2290E-02

6.5310E-02 3.1800E-02 4.2360E-02 6.9950E-02 6.4470E-02 3.2630E-02 2.3190E-02

2.2140E-02 1.2350E-02 6.2280E-03 4.2540E-01 1.0810E+00 4.6570E-01 2.8450E-02

1.1010E-01 1.3170E+00 3.6780E-01 5.7350E-02 5.7860E-02 5.8610E-02 5.1350E-02

3.4610E-02 1.0440E-01 1.7930E+00 4.6670E-01 6.0460E-02 4.2480E-02 9.6760E-02

5.9180E-02 2.6040E-02 5.0040E-02 1.0850E-01 6.9850E-02 3.8280E-02 2.9370E+00

6.2490E+00 1.6470E-01 3.0690E+00 8.2120E+00 3.4630E+00 1.5850E-01 6.4970E-01

1.5510E+01 4.0130E+00 3.6440E-01 4.6260E-02 5.0130E-02 3.2320E-02 1.2180E-02

1.1880E-02 1.0090E-02 9.2690E-03 7.1520E-03 2.5840E-02 3.7850E-02 5.5360E-02

7.0420E-03 2.5090E-02 1.6770E-02 1.3350E-02 8.3960E-03 9.6260E-03 1.4290E-02

8.3390E-03 4.8040E-03 3.1160E+00 1.5820E-02 2.1170E-02 1.5930E-02 1.2810E-02

8.1810E-03 1.8870E-02 2.3890E-02 1.9390E-02 1.5890E-02 1.2640E-02 7.3270E-03

2.0070E-02 1.9670E-02 1.5270E-02 8.5850E-02 1.3370E-01 1.4940E-01 5.8610E-02

8.8510E-02 1.2010E-01 1.2950E-01 1.0250E-01 7.0200E-02 1.5630E-01 1.1690E-01

2.5270E-01 3.3730E-01 3.2730E-01 2.5790E-01 2.0150E-01 2.2440E-01 1.3920E-01

2.8820E-02 6.3060E-02 6.3690E-02 3.8360E-02 8.8420E-03 7.2970E-02 5.2290E-02

8.1410E-02 6.7590E-03 3.6000E-02 5.1660E-02 5.5160E-02 4.0830E-03 3.6180E-02

4.3150E-02 5.6220E-02 1.3200E-02 1.2300E-02 1.2070E-02 5.0460E-03 2.8800E-02

4.6570E-01 5.1520E-01 3.2440E-01 1.9700E-02 9.2880E-02 8.4290E-01 2.7990E-01

1.6130E-02 3.7620E-02 3.9910E-02 4.1280E-02 1.7330E-02 8.9770E-02 1.1540E+00

3.5610E-01 1.0690E-02 3.1120E-02 6.1090E-02 4.6720E-02 1.5230E-02 3.1860E-02

7.3420E-02 5.7340E-02 4.0350E-01 3.2850E+00 2.5480E+00 1.2370E-01 3.4630E+00

3.9100E+00 2.4380E+00 9.9580E-03 7.2160E-01 9.8730E+00 3.0770E+00 1.2990E-02

3.2330E-02 2.9250E-02 1.9380E-02 3.9910E-03 7.1030E-03 7.3960E-03 7.2890E-03

1.7230E-02 1.5100E-02 3.0590E-02 2.1440E-02 1.0120E-02 1.3300E-02 1.2310E-02

6.6090E-03 2.9470E-03 5.8630E-03 9.7270E-03 6.1270E-03 6.5880E-03 7.4960E-03

9.9430E-03 8.0140E-03 3.7960E-03 9.9290E-03 7.3680E-03 9.9020E-03 1.0140E-02

7.6780E-03 3.9550E-03 1.0230E-02 7.0400E-03 1.0210E-02 3.0720E-02 6.3540E-02

8.7530E-02 3.9290E-02 2.8900E-02 6.3840E-02 6.9550E-02 7.0810E-02 2.5730E-02

4.9100E-02 9.4710E-02 9.9350E-02 1.4420E-01 1.8030E-01 1.6380E-01 5.3820E-02

1.9240E-01 3.6360E-02 1.4410E-02 3.1530E-02 2.1010E-02 3.0000E-02 1.2740E-03

8.2700E-03 5.0580E-02 4.7600E-02 6.8470E-04 6.5940E-03 2.5380E-02 4.2130E-02

3.7450E-05 4.4160E-03 2.6020E-02 3.9330E-02 5.9230E-03 6.2270E-03 5.0310E-03

4.1380E-03 5.0630E-03 2.8440E-02 3.2440E-01 3.0920E-01 4.3110E-03 1.6750E-02

6.1890E-02 5.3480E-01 2.9030E-03 1.4250E-02 2.5050E-02 2.5280E-02 3.4910E-03

1.5240E-02 6.0210E-02 7.2970E-01 2.6960E-03 8.3190E-03 2.0530E-02 4.3270E-02

3.3670E-03 1.2360E-02 2.1320E-02 5.1860E-02 1.7970E-02 6.2410E-01 2.4760E+00

2.2880E-03 1.5840E-01 2.4380E+00 2.3680E+00 4.8370E-03 4.2870E-03 5.0260E-01

6.3270E+00 2.5970E-03 1.2180E-02 1.9380E-02 1.2820E-02 8.8830E-04 3.2850E-03

4.5590E-03 3.9570E-03 8.6140E-03 6.4050E-03 8.0500E-03 1.9010E-02 2.6140E-03

8.3960E-03 6.6860E-03 3.6470E-03 5.0930E-04 2.7230E-03 3.6850E-03 5.3940E-03

3.9500E+00 1.1430E+00 2.9720E-01 1.1920E-01 8.9490E+00 3.7160E+00 1.0480E+00

2.0540E-01 3.4780E-02 7.5280E-03 3.8000E+00 1.1720E+00 4.0680E-02 3.3640E+00

5.0160E-01 9.1780E-02 6.3930E-03 2.5040E+00 7.4600E-01 1.2090E-01 9.1690E-03

9.1530E-01 1.5590E-01 1.3090E-02 5.1160E-02 2.2340E-02 9.2720E-03 3.5260E-03

2.2900E-02 1.4300E-02 7.4770E-03 5.2820E-02 1.2570E-01 1.4800E-02 4.3120E-03

2.2270E-01 1.7930E-01 8.3280E-02 1.9200E-02 1.5620E-01 7.6800E-02 2.2910E-02

3.5800E-03 9.3680E-02 2.4510E-02 5.0270E-03 6.5220E-04 1.1850E-01 3.7820E-02

6.5530E-03 1.0530E-04 1.1340E-01 5.8700E-02 5.1910E-02 3.3740E-02 1.7000E-01

4.1380E-02 1.0500E-02 2.5020E-03 4.6740E-02 1.5270E-02 4.0950E-03 8.9720E-04

8.8520E-02 7.9620E-02 4.6990E-02 1.5310E-02 1.9920E-01 4.4580E-02 7.2780E-03

6.9770E-04 3.6720E-02 1.5640E-02 4.5130E-03 7.6550E-04 5.2840E-02 3.8440E-02

1.0110E-02 5.8580E-02 2.6690E-02 1.4390E-02 7.5390E-03 5.1360E-02 2.4490E-02

8.5080E-03 2.2320E-03 7.4530E-02 7.6900E-02 3.8730E-02 8.9940E-03 4.8470E-02

2.7100E-02 9.4150E-03 1.9680E-03 5.6700E-02 2.4110E-02 1.1110E-02 6.6730E-03

2.0990E-02 1.0880E-02 5.6790E-03 2.7550E-03 3.3120E-02 1.6470E-02 6.2420E-03

1.4720E-03 3.6840E+00 1.6010E+00 2.2990E-01 2.7480E+00 3.1530E+00 3.2950E+00

1.5620E+00 3.7810E-01 5.3080E-02 1.8840E+00 1.3440E+00 7.7920E-01 1.0290E+00

1.6830E+00 3.5200E-01 8.8780E-02 8.7170E-01 1.0510E+00 6.4350E-01 1.2870E-01

4.3780E-01 3.4130E-01 8.8300E-02 2.4090E-02 2.2310E-02 1.3900E-02 7.5770E-03

1.8230E-02 1.3100E-02 5.5910E-03 4.2260E-02 5.5850E-02 5.2850E-02 7.1580E-03

1.7220E-01 5.6670E-02 9.2600E-02 8.2100E-02 6.9630E-02 5.3840E-02 6.0020E-02

2.4100E-02 1.8200E-02 5.2010E-02 2.3530E-02 5.3670E-03 5.2760E-02 4.3830E-02

2.6610E-02 6.9340E-03 6.9440E-02 8.7990E-02 3.9040E-02 1.0160E-02 5.0840E-02

8.6580E-02 3.2340E-02 9.7570E-03 1.5070E-02 2.2020E-02 1.2420E-02 4.0780E-03

7.8740E-02 3.6110E-02 2.9580E-02 3.9910E-02 4.4920E-02 1.0640E-01 4.2190E-02

7.9050E-03 1.4030E-02 1.4810E-02 1.2540E-02 4.7190E-03 4.4340E-02 1.7860E-02

1.8900E-02 3.2680E-02 3.0370E-02 1.7420E-02 5.2540E-03 2.6150E-02 1.9430E-02

1.6080E-02 7.7300E-03 7.6910E-02 2.5280E-02 2.7540E-02 2.9600E-02 2.6270E-02

1.5310E-02 1.8570E-02 9.4320E-03 4.5360E-02 1.6070E-02 1.3450E-02 3.9950E-03

1.2790E-02 1.0300E-02 6.7490E-03 2.3740E-03 1.7470E-02 1.2780E-02 9.7640E-03

5.8270E-03 2.1410E+00 1.2790E+00 2.2400E-01 2.8150E+00 1.3620E+00 2.0570E+00

1.5140E+00 4.1770E-01 7.6330E-01 1.1900E+00 1.0500E+00 2.8460E-01 9.1820E-01

9.4010E-01 2.1220E-01 2.1480E-01 7.4660E-01 6.1530E-01 4.4120E-01 1.8670E-01

3.0230E-01 1.6160E-01 1.1010E-02 1.5810E-02 1.5040E-02 9.9290E-03 1.3340E-02

9.5140E-03 4.3380E-03 3.1700E-02 2.3200E-02 4.3830E-02 1.9860E-02 8.1780E-02

7.9150E-02 5.4710E-02 8.7060E-02 1.9280E-02 5.1870E-02 3.6400E-02 4.8150E-02

2.1730E-03 1.9950E-02 3.4930E-02 1.7210E-02 1.8880E-02 3.6200E-02 2.6200E-02

1.6330E-02 5.6140E-02 5.6310E-02 3.3080E-02 9.4450E-03 1.4450E-02 4.4340E-02

5.3330E-02 2.2520E-02 4.0700E-03 1.2670E-02 1.4210E-02 9.2400E-03 5.0280E-02

2.7340E-02 3.4620E-02 2.6030E-02 6.9810E-03 4.7200E-02 6.7260E-02 2.9680E-02

3.6900E-03 1.1060E-02 9.9260E-03 9.8970E-03 3.0270E-02 1.7100E-02 1.3500E-02

1.9450E-02 2.2740E-02 1.4570E-02 7.5550E-03 1.0760E-02 1.6430E-02 1.2960E-02

1.1790E-02 5.2620E-02 2.2520E-02 2.8540E-02 1.5830E-02 9.5840E-03 1.6650E-02

1.0890E-02 1.5070E-02 3.4020E-02 1.1270E-02 9.8230E-03 4.0390E-03 7.7590E-03

8.1740E-03 5.1830E-03 3.0410E-03 7.6430E-03 1.0110E-02 9.1150E-03 7.5190E-03

1.3750E+00 3.4620E-02 2.4930E-01 2.1030E+00 9.8300E-01 1.0470E+00 1.1770E+00

2.0860E-01 8.5960E-01 9.3370E-01 6.8960E-02 3.3420E-01 7.0270E-01 4.5930E-01

2.9260E-02 3.0360E-01 4.8750E-01 5.1600E-01 6.7670E-02 1.9500E-01 1.7100E-01

4.4880E-03 8.8730E-03 1.1420E-02 9.7010E-03 8.8960E-03 5.8720E-03 3.1080E-03

2.1130E-02 9.2010E-03 2.4170E-02 2.4540E-02 2.4650E-02 6.9830E-02 5.8470E-02

4.8850E-02 2.5380E-03 2.5530E-02 3.2720E-02 4.3000E-02 1.4470E-04 3.3130E-03

1.8840E-02 2.7200E-02 4.8100E-03 2.0710E-02 2.3480E-02 1.6200E-02 4.4970E-02

2.3310E-02 2.1350E-02 1.3500E-02 4.1050E-03 1.5420E-02 3.5670E-02 3.4560E-02

9.1860E-04 4.7490E-03 9.7080E-03 1.1440E-02 2.2770E-02 3.1280E-02 2.5520E-02

1.2610E-02 6.2290E-04 1.0620E-02 4.0390E-02 4.9110E-02 5.4140E-04 4.8060E-03

7.6540E-03 1.0050E-02 1.7230E-02 1.7040E-02 6.2370E-03 1.1950E-02 1.2200E-02

1.1350E-02 7.3810E-03 3.5760E-03 1.0010E-02 1.1010E-02 1.0040E-02 2.6080E-02

3.0810E-02 1.8060E-02 4.5940E-03 2.3170E-03 1.0200E-02 1.0640E-02 1.1650E-02

2.2680E-02 7.5320E-03 5.3800E-03 3.8410E-03 4.6100E-03 4.8750E-03 4.0740E-03

2.5520E-03 2.5820E-03 6.6350E-03 7.4040E-03 6.3000E-03 6.6770E-03 3.5570E-02

1.8040E-01 1.1970E+00 1.0320E+00 3.4870E-01 1.6250E-02 4.4530E-01 5.3930E-01

1.1300E-02 1.0050E-01 2.6420E-01 4.0520E-01 1.6970E-03 4.8710E-02 2.8330E-01

3.3080E-01 1.8950E-02 8.9830E-02 1.0810E-01 1.5740E-03 3.9500E-03 5.5460E-03

5.8010E-03 4.4580E-03 2.7300E-03 1.6580E-03 1.0570E-02 3.2550E-03 9.1660E-03

1.6540E-02 3.1090E-03 3.5450E-02 4.7310E-02 1.5040E-02 5.2430E-05 4.2660E-03

2.4880E-02 2.2700E-02 1.8640E-05 1.9910E-04 3.4420E-03 2.1030E-02 5.9170E-04

7.8490E-03 1.4820E-02 9.2470E-03 2.5750E-02 5.9790E-03 9.4160E-03 1.0420E-02

1.0270E-03 4.6220E-03 1.2290E-02 2.6820E-02 1.9220E-04 1.1120E-03 4.2260E-03

7.8670E-03 6.5910E-03 2.3160E-02 1.1450E-02 4.9050E-03 3.5180E-05 1.0130E-03

1.0790E-02 3.8530E-02 3.4300E-05 8.4670E-04 4.6470E-03 6.0090E-03 7.4250E-03

1.0990E-02 1.7960E-03 5.9750E-03 4.4600E-03 6.5880E-03 4.4040E-03 9.3690E-04

3.9650E-03 7.1170E-03 5.3370E-03 8.8560E-03 2.3730E-02 6.4520E-03 6.2900E-04

3.3450E-04 3.2170E-03 8.4700E-03 5.3730E-03 1.1340E-02 3.8500E-03 2.1310E-03

2.3960E-03 2.2170E-03 2.0090E-03 2.4690E-03 1.3480E-03 5.7710E-04 3.1300E-03

4.3130E-03 3.4410E-03 4.1570E+00 4.6320E-01 4.7710E-02 8.7420E-03 1.6030E-03

8.9210E+00 1.9570E-01 6.3050E-02 2.3690E+00 4.9000E-01 2.3590E-02 3.5890E-03

3.3980E+00 4.9200E-01 3.5100E-02 2.1950E-03 1.8370E+00 2.5550E-02 1.6270E-02

6.3040E-02 2.5470E-02 8.6550E-03 1.9580E-03 1.6740E-02 5.1880E-03 1.8590E-03

1.5070E-02 3.3130E-02 1.6430E-02 3.1550E-03 1.7040E-01 3.8500E-02 7.0690E-03

8.5940E-04 1.6400E-01 5.5990E-02 1.1380E-02 1.1270E-03 5.1310E-01 1.5770E-01

2.8170E-02 2.4210E-03 1.4930E-01 1.9080E-02 1.1170E-03 7.0430E-05 5.4760E-02

2.5960E-02 9.6820E-03 1.5500E-03 6.7820E-02 5.7420E-02 2.5690E-02 4.4380E-03

2.6950E-01 7.6810E-02 1.9650E-02 2.7540E-03 1.3900E-01 5.8950E-02 1.5650E-02

1.8110E-03 1.1960E-01 7.8090E-02 2.5860E-02 3.6250E-03 3.8490E-01 1.0810E-01

2.2610E-02 2.3920E-03 4.4140E-02 4.3220E-02 3.6750E-02 6.8460E-02 4.6660E-02

2.0290E-02 3.4620E-03 1.9140E-01 4.7810E-02 7.7160E-03 1.3770E-03 4.3470E-02

1.5210E-02 5.8340E-03 1.2830E-03 9.2670E-02 3.8810E-02 9.8110E-03 1.4450E-03

6.8090E-02 4.5860E-02 2.0690E-02 7.0760E-04 7.4360E-02 3.0950E-02 6.7610E-03

6.5990E-04 7.3330E-02 4.6740E-02 1.3200E-02 1.4950E-03 4.9610E+00 7.4200E-01

7.1140E-02 1.2640E-02 3.6230E+00 3.8560E+00 1.0900E-01 1.0750E+00 9.1850E-01

3.9300E-01 1.8030E-02 1.7490E+00 3.3720E+00 4.3560E-01 3.2830E-02 8.7290E-01

6.8370E-01 9.9450E-03 3.3470E-02 2.5450E-02 1.5270E-02 7.2080E-03 1.0830E-02

6.9210E-03 2.2980E-03 1.2560E-02 2.4490E-02 1.1650E-02 7.7850E-03 5.9210E-02

8.3780E-02 3.1090E-02 6.5330E-03 6.7920E-02 6.8150E-02 4.5600E-02 1.0680E-02

1.8350E-01 2.3720E-01 1.3720E-01 2.6580E-02 5.9540E-02 6.5880E-02 1.4930E-02

9.4980E-04 3.5080E-02 2.2540E-02 1.1810E-02 7.3250E-03 5.8860E-02 2.2570E-02

2.5560E-02 2.2300E-02 1.0640E-01 1.2780E-01 5.5140E-02 1.8000E-02 7.5900E-02

5.0530E-02 3.7800E-02 1.4160E-02 8.2420E-02 3.4560E-02 4.8760E-02 2.3680E-02

1.3780E-01 1.8170E-01 8.7360E-02 2.1190E-02 4.4210E-02 4.3740E-02 1.5200E-02

5.3780E-02 2.8270E-02 1.8540E-02 1.5130E-02 7.9070E-02 8.3510E-02 3.7710E-02

6.6730E-03 2.4080E-02 1.9270E-02 7.4110E-03 4.0620E-03 4.6490E-02 3.5320E-02

2.8320E-02 8.9000E-03 5.6740E-02 3.2780E-02 1.2860E-02 1.0400E-02 4.4630E-02

2.5320E-02 1.8450E-02 5.5380E-03 5.2010E-02 1.9430E-02 2.8910E-02 1.1960E-02

4.3500E+00 7.9020E-01 6.6200E-02 1.2430E+00 3.5770E+00 1.2470E+00 4.2100E-01

8.1540E-01 4.9000E-01 1.9500E-01 3.8560E-01 2.0090E+00 1.8320E+00 2.4510E-01

3.7590E-01 6.9030E-01 1.8830E-01 1.6480E-02 2.0970E-02 1.7530E-02 1.1110E-02

6.9950E-03 6.3360E-03 2.9760E-03 1.0050E-02 1.6550E-02 1.0670E-02 7.9160E-03

1.7810E-02 5.4820E-02 5.1770E-02 2.0110E-02 2.2000E-02 5.4550E-02 4.7290E-02

3.0650E-02 5.0460E-02 1.6620E-01 1.6170E-01 8.9260E-02 2.0820E-02 5.1610E-02

3.2980E-02 7.6360E-03 2.1000E-02 1.7650E-02 1.5150E-02 7.6630E-03 3.8410E-02

2.0650E-02 2.0710E-02 2.3670E-02 3.8540E-02 8.6640E-02 8.1470E-02 3.9260E-02

3.5640E-02 4.5710E-02 3.5450E-02 2.6770E-02 4.2030E-02 4.0690E-02 2.9750E-02

3.9040E-02 4.2180E-02 1.2170E-01 1.1930E-01 5.9110E-02 4.3690E-02 3.1290E-02

7.6210E-03 3.6750E-02 2.1240E-02 2.1680E-02 1.2910E-02 2.8440E-02 6.4430E-02

4.9900E-02 2.2820E-02 1.3210E-02 1.4760E-02 1.1380E-02 4.4980E-03 1.9270E-02

3.1360E-02 2.4740E-02 1.9850E-02 4.5390E-02 2.0670E-02 1.2760E-02 1.1410E-02

2.3380E-02 2.4130E-02 1.6930E-02 1.0720E-02 2.7650E-02 2.4210E-02 1.6930E-02

2.1050E-02 3.2640E+00 6.0160E-01 3.4290E-01 2.0760E+00 2.1330E+00 1.3340E-01

4.9990E-01 4.7670E-01 3.0580E-01 6.2680E-02 6.7790E-01 1.6940E+00 8.7000E-01

1.4440E-01 4.6650E-01 3.2990E-01 7.3000E-03 1.4110E-02 1.5710E-02 1.2440E-02

4.2100E-03 4.8550E-03 2.9750E-03 7.5340E-03 1.0160E-02 1.0050E-02 6.1400E-03

4.5050E-03 2.4130E-02 4.4690E-02 3.5070E-02 5.1070E-03 2.9500E-02 3.8660E-02

4.2710E-02 8.2430E-03 7.8290E-02 1.2850E-01 1.3570E-01 6.1110E-03 2.7630E-02

3.4230E-02 1.6830E-02 1.1160E-02 1.4080E-02 1.3930E-02 6.9180E-03 1.9660E-02

2.2880E-02 1.8610E-02 1.6380E-02 1.2290E-02 4.3280E-02 7.0750E-02 5.8030E-02

1.3850E-02 3.3000E-02 3.0990E-02 2.9340E-02 1.6220E-02 3.6700E-02 2.5480E-02

3.5240E-02 1.0060E-02 5.6480E-02 9.8930E-02 9.1370E-02 3.9160E-02 1.7220E-02

5.4790E-03 2.1420E-02 2.0310E-02 1.8900E-02 8.8040E-03 8.6220E-03 3.5260E-02

4.4850E-02 3.5400E-02 6.8870E-03 1.0060E-02 1.0830E-02 5.1040E-03 6.3470E-03

2.0890E-02 2.0860E-02 2.3320E-02 3.4050E-02 1.1320E-02 1.3510E-02 8.8050E-03

1.0500E-02 1.9510E-02 1.5410E-02 1.0940E-02 1.1410E-02 2.3110E-02 1.4350E-02

1.8500E-02 2.1120E+00 8.0650E-02 7.7620E-01 2.1790E+00 3.3310E-02 2.2480E-01

3.9170E-01 2.9370E-01 8.2640E-03 1.3420E-01 8.1340E-01 1.2400E+00 4.8850E-02

2.3850E-01 3.3990E-01 2.7790E-03 8.2290E-03 1.1350E-02 1.0200E-02 2.3810E-03

3.2630E-03 2.4520E-03 5.0230E-03 5.5400E-03 8.1220E-03 3.9090E-03 9.1570E-04

7.7230E-03 2.5010E-02 3.8630E-02 6.2740E-04 1.0150E-02 2.7520E-02 3.9130E-02

3.7950E-05 2.1370E-02 7.7510E-02 1.3490E-01 1.4000E-03 1.0900E-02 2.4050E-02

2.0190E-02 5.0400E-03 1.0580E-02 9.4950E-03 5.5790E-03 7.5040E-03 2.0080E-02

1.6040E-02 8.0670E-03 3.0960E-03 1.7850E-02 4.2490E-02 5.9400E-02 4.0950E-03

1.8590E-02 2.5910E-02 2.3190E-02 4.2770E-03 2.2210E-02 2.7440E-02 2.1830E-02

1.5120E-03 1.8480E-02 5.8220E-02 9.3690E-02 2.9700E-02 7.0910E-03 4.4750E-03

1.0290E-02 1.8210E-02 1.2260E-02 5.5320E-03 2.2780E-03 1.3890E-02 3.0940E-02

3.5680E-02 3.2420E-03 6.4730E-03 7.2680E-03 4.9490E-03 1.5490E-03 9.6950E-03

1.7140E-02 1.9190E-02 2.2700E-02 5.2260E-03 1.1760E-02 5.4290E-03 3.8820E-03

1.2600E-02 1.3290E-02 7.8010E-03 3.4370E-03 1.4920E-02 1.6050E-02 1.0520E-02

2.2510E-02 1.4120E-01 1.3540E+00 5.9520E-03 6.6510E-02 2.2350E-01 1.7560E-01

8.8790E-04 1.7180E-02 1.7360E-01 9.0260E-01 1.3790E-02 8.7880E-02 2.1190E-01

8.1580E-04 3.6920E-03 5.8400E-03 5.7200E-03 1.0760E-03 1.5370E-03 1.3840E-03

2.5120E-03 2.3650E-03 4.5770E-03 1.7400E-03 1.3330E-04 1.7640E-03 8.9620E-03

2.5260E-02 7.4030E-06 1.5230E-03 1.3380E-02 2.2820E-02 4.1520E-06 7.5690E-05

3.3480E-02 8.3290E-02 2.2330E-04 2.9550E-03 1.1410E-02 1.3680E-02 1.7430E-03

5.8450E-03 4.4940E-03 3.1620E-03 1.8490E-03 1.1630E-02 9.7030E-03 2.6620E-03

4.1970E-04 6.1090E-03 1.7280E-02 3.7630E-02 7.5430E-04 7.5020E-03 1.5220E-02

1.2100E-02 5.0990E-04 8.7200E-03 1.9490E-02 9.1910E-03 1.5920E-05 3.6770E-03

2.2810E-02 5.9100E-02 1.6040E-02 1.8730E-03 2.6710E-03 3.7160E-03 1.1120E-02

5.5440E-03 2.7610E-03 5.7390E-04 3.4730E-03 1.5130E-02 2.2200E-02 1.2120E-03

3.2840E-03 3.3350E-03 3.1410E-03 2.3340E-04 2.7890E-03 1.0210E-02 1.0510E-02

1.1350E-02 1.8490E-03 6.8890E-03 2.4710E-03 1.0760E-03 5.8500E-03 8.0710E-03

3.7900E-03 6.2280E-04 6.3420E-03 1.1640E-02 3.8540E-03 1.2410E+00 2.5230E-01

1.1250E+00 4.2210E-01 1.2190E-01 2.2270E-02 2.3810E+00 7.9190E-01 2.0850E-01

4.9850E-02 2.6570E+00 1.4830E-01 2.9730E-02 2.2580E-02 1.4140E-02 7.4520E-03

3.1580E-03 1.5530E-02 1.2160E-02 5.4270E-03 3.0830E-02 9.0480E-02 4.7250E-02

2.6570E-02 2.0720E-01 1.1700E-01 5.4930E-02 1.7560E-02 2.0400E-01 8.4150E-02

2.7460E-02 5.6700E-03 9.0770E-04 9.6400E-04 6.9010E-04 2.9540E-04 2.0040E-02

8.1500E-03 2.9210E-03 8.4960E-04 7.9600E-02 2.3170E-02 6.0730E-03 1.8200E-03

4.0280E-02 3.6610E-02 3.2940E-02 2.5610E-02 8.6210E-02 7.9090E-02 4.8120E-02

1.7970E-02 1.3850E-01 6.0920E-02 2.7090E-02 1.2300E-02 8.3070E-02 6.0660E-02

3.3440E-02 1.1840E-02 8.8520E-03 3.8020E-03 1.3670E-03 3.7430E-04 6.4090E-02

3.0340E-02 1.1900E-02 1.2070E-01 7.0850E-02 2.6490E-02 4.7390E-03 4.2210E-02

4.5360E-02 4.7820E-02 4.0980E-02 1.4260E-02 5.9290E-03 2.2640E-03 7.4210E-04

1.2520E-02 9.4990E-03 5.8030E-03 2.6830E-03 3.0380E-02 3.1140E-02 3.3040E-02

2.0680E-02 4.2120E-02 5.0000E-02 4.1610E-02 2.3190E-02 6.6470E-02 5.5550E-02

3.5110E-02 1.7450E-02 1.0350E+00 3.3430E-01 4.6380E-01 3.1250E-01 1.3720E-01

3.2500E-01 1.1880E+00 7.8880E-01 2.5870E-01 4.5890E-01 1.5670E+00 1.0000E-01

1.1780E-02 8.6860E-03 8.1230E-03 6.9290E-03 1.3350E-02 6.4050E-03 5.1380E-03

2.3120E-02 5.5510E-02 5.2980E-02 1.4760E-02 7.8890E-02 7.7370E-02 7.4930E-02

6.6340E-02 2.4750E-02 9.6100E-02 8.1690E-02 3.8470E-02 8.7020E-04 1.7490E-04

3.4120E-04 7.5150E-04 6.7480E-03 8.6980E-03 5.8520E-03 2.5070E-03 1.5860E-02

4.0540E-02 2.1420E-02 5.2230E-03 3.5960E-02 3.4030E-02 2.1570E-02 9.9910E-03

7.4610E-02 1.5340E-02 2.9350E-02 5.4240E-02 3.8410E-02 6.9270E-02 4.9280E-02

2.2630E-02 5.0540E-02 2.3420E-02 2.9200E-02 3.8660E-02 1.2850E-03 4.1850E-03

3.5700E-03 1.7700E-03 3.6540E-02 2.8740E-02 1.4640E-02 6.6930E-02 3.0820E-02

3.8830E-02 3.0340E-02 4.6870E-02 4.9890E-02 2.7710E-02 7.8190E-03 4.9760E-03

6.4460E-03 4.1930E-03 1.7850E-03 8.1030E-03 4.3840E-03 4.7900E-03 5.6630E-03

2.2780E-02 3.4960E-02 2.0450E-02 8.2300E-03 5.3680E-02 3.3650E-02 2.0470E-02

9.8820E-03 5.2960E-02 2.3810E-02 2.6070E-02 2.8100E-02 5.9870E-02 2.4250E-01

3.1320E-01 2.1360E-01 5.1240E-02 2.2620E-01 6.3860E-01 7.8030E-01 7.3420E-02

4.1060E-01 9.3320E-01 3.6680E-03 7.6250E-03 7.2340E-03 5.1390E-03 8.4350E-03

6.3330E-03 1.8080E-03 1.5420E-02 3.8830E-02 2.3010E-02 2.0280E-02 1.1420E-02

5.3570E-02 6.8520E-02 6.4880E-02 1.2280E-03 1.6940E-02 5.5190E-02 8.7330E-02

1.4400E-04 5.7160E-04 4.9770E-04 1.7570E-04 1.9510E-03 4.5700E-03 5.6360E-03

3.7540E-03 4.0760E-03 1.1000E-02 2.2320E-02 1.7890E-02 3.2590E-02 1.6420E-02

1.0780E-02 7.8760E-03 1.2720E-02 5.0200E-02 3.8230E-02 1.4550E-02 1.4590E-02

2.3740E-02 3.9090E-02 4.1430E-02 8.1500E-03 3.4100E-02 3.1870E-02 2.0370E-02

1.5880E-04 8.5770E-04 2.4320E-03 3.7340E-03 1.9170E-02 2.0760E-02 1.3320E-02

1.2880E-02 4.8540E-02 3.4920E-02 1.5050E-02 5.2650E-02 1.8140E-02 9.4940E-03

7.9610E-03 1.6400E-03 3.2850E-03 3.9830E-03 2.6930E-03 2.1240E-03 5.2330E-03

4.7010E-03 3.0540E-03 1.5190E-02 2.9370E-02 1.0150E-02 2.9120E-03 4.5430E-02

2.2270E-02 8.5340E-03 2.2360E-03 2.0860E-02 3.2880E-02 2.2990E-02 1.0580E-02

1.9190E+00 3.8360E-01 6.1410E-02 6.8530E+00 2.5220E+00 5.7500E-01 1.1070E-01

2.0590E+00 8.5190E-01 5.3200E-02 3.0110E-01 1.8970E-01 8.1560E-02 3.1740E-02

9.8570E-02 3.9150E-02 1.4260E-02 5.9740E-02 1.1640E-01 4.3900E-02 8.5520E-03

1.7790E-01 7.8150E-02 3.0430E-02 8.1900E-03 8.1590E-02 4.2200E-02 1.7590E-02

4.4570E-03 8.2050E-02 2.9870E-02 8.4340E-03 1.5450E-03 2.7000E-01 7.9190E-02

1.6140E-02 1.8480E-03 1.9340E-01 5.0010E-02 2.0740E-02 8.8680E-03 1.9890E-01

7.0340E-02 2.1320E-02 5.1990E-03 1.0520E-01 3.7630E-02 1.1120E-02 2.7490E-03

1.9340E-01 6.8650E-02 2.2350E-02 6.6690E-03 6.7760E-02 2.7210E-02 8.4260E-03

1.7410E-03 4.1660E-02 1.8410E-02 5.7520E-03 1.1340E-03 6.2570E-02 2.7050E-02

2.3000E-03 7.0220E-02 3.2670E-02 1.5260E-02 5.2740E-03 4.8420E-02 2.0750E-02

8.2600E-03 2.6820E-03 3.7120E-02 2.1370E-02 9.7850E-03 2.8660E-03 2.1360E-02

9.0340E-03 3.1820E-03 1.0900E-03 1.6880E-02 1.0590E-02 5.2460E-03 1.6070E-03

1.4100E-02 6.8540E-03 3.3240E-03 1.3870E-03 1.6000E-02 6.6100E-03 2.1700E-03

4.6870E-04 1.5870E+00 3.8590E-01 1.9030E+00 2.6720E+00 2.3320E+00 6.5610E-01

1.1320E+00 5.0910E-01 5.8210E-01 1.3730E-01 1.1830E-01 8.6520E-02 7.2490E-02

5.3510E-02 4.3610E-02 1.7920E-02 4.4800E-02 6.0730E-02 3.9890E-02 2.5960E-02

5.3090E-02 7.9030E-02 5.5460E-02 3.3590E-02 2.8520E-02 3.1610E-02 2.9070E-02

2.0180E-02 1.1230E-02 4.0930E-02 2.8940E-02 1.0320E-02 7.8980E-02 1.1550E-01

6.3060E-02 1.7680E-02 4.9960E-02 1.0930E-01 3.4780E-02 1.0590E-02 5.1940E-02

9.1140E-02 5.6020E-02 2.2880E-02 2.1390E-02 5.0960E-02 3.3440E-02 1.2570E-02

5.0810E-02 9.1160E-02 5.4140E-02 2.2280E-02 1.7190E-02 2.9000E-02 2.2770E-02

9.8940E-03 1.0860E-02 1.6340E-02 1.6120E-02 6.9010E-03 3.5470E-02 1.5380E-02

1.8130E-02 3.2670E-02 3.2510E-02 1.7250E-02 1.0130E-02 1.6610E-02 2.1570E-02

1.3970E-02 7.9430E-03 2.1370E-02 1.4300E-02 1.0220E-02 7.4620E-03 5.9780E-03

9.2690E-03 7.5060E-03 3.2560E-03 1.2660E-02 6.5120E-03 3.8800E-03 2.6860E-03

6.8540E-03 6.5770E-03 4.0600E-03 1.7630E-03 5.2300E-03 6.5010E-03 4.8020E-03

2.4040E-03 1.0130E+00 1.8190E-01 1.8560E+00 1.2280E+00 1.7770E+00 4.2440E-01

6.3310E-01 4.2180E-01 5.0440E-02 1.0130E-01 7.5290E-02 5.7950E-02 2.7400E-02

3.0240E-02 1.8530E-02 2.9860E-02 2.5800E-02 3.5410E-02 2.3160E-02 1.3280E-02

3.4190E-02 5.4470E-02 4.5500E-02 5.8300E-03 1.9220E-02 2.2320E-02 2.5540E-02

4.2010E-04 1.0880E-02 2.5240E-02 2.4410E-02 1.6080E-02 6.3000E-02 6.4130E-02

4.0420E-02 2.0730E-02 3.4760E-02 6.1970E-02 1.8910E-02 1.1190E-02 3.9540E-02

5.5300E-02 4.2130E-02 3.1530E-03 1.8240E-02 3.0630E-02 2.6840E-02 1.2620E-02

3.7770E-02 5.5180E-02 4.0040E-02 2.3240E-03 1.4480E-02 1.7170E-02 1.8580E-02

6.0990E-04 1.0220E-02 8.9300E-03 1.3600E-02 1.3850E-02 1.9410E-02 1.2750E-02

1.5250E-02 1.7250E-02 2.1230E-02 7.9670E-03 5.2860E-03 1.0470E-02 1.4240E-02

1.0080E-02 9.7850E-03 1.0210E-02 1.1070E-02 4.4990E-03 1.1880E-03 4.9570E-03

5.2770E-03 5.9220E-03 8.4430E-03 3.3670E-03 3.3480E-03 2.0050E-03 3.3250E-03

4.0590E-03 3.5020E-03 1.9500E-03 1.1810E-03 3.7190E-03 4.0940E-03 3.6300E-03

4.4240E-02 1.4750E-01 1.2690E+00 1.0600E+00 8.7160E-02 4.7540E-01 1.7700E-01

1.6380E-02 3.6160E-02 3.9780E-02 3.8770E-02 1.1390E-02 1.4390E-02 1.1930E-02

1.4920E-02 8.0850E-03 2.1440E-02 1.2660E-02 1.2530E-03 1.3390E-02 2.3470E-02

3.5610E-02 6.6610E-05 6.4040E-03 1.3870E-02 1.6120E-02 6.7340E-05 3.7490E-04

7.7030E-03 2.2330E-02 1.8480E-03 1.7650E-02 4.0400E-02 3.1880E-02 8.8680E-03

1.0580E-02 1.8910E-02 2.9790E-02 1.9010E-03 1.0380E-02 2.6110E-02 3.5620E-02

6.3610E-04 2.6890E-03 1.2470E-02 2.3590E-02 2.9450E-03 1.0440E-02 2.4390E-02

3.5050E-02 1.9710E-04 2.3760E-03 1.0060E-02 1.3670E-02 8.2140E-05 5.6690E-04

7.1860E-03 8.7930E-03 3.1310E-03 1.4730E-02 5.1210E-03 5.2740E-03 1.0130E-02

7.9670E-03 7.4820E-03 1.1780E-03 4.4580E-03 6.4830E-03 7.9220E-03 2.8660E-03

7.4620E-03 4.4990E-03 2.9490E-03 3.6720E-04 7.7780E-04 3.2970E-03 4.1830E-03

4.2210E-03 1.3320E-03 2.0590E-03 9.6830E-04 1.3870E-03 1.7630E-03 1.9500E-03

1.3190E-03 1.3220E-04 1.2050E-03 2.4610E-03 2.5130E-03 2.7230E+00 4.0690E-01

5.2960E-02 7.5250E+00 4.1700E-01 2.0890E-01 2.9720E-01 1.4250E-01 6.1630E-02

2.6230E-02 5.0450E-02 2.2800E-02 5.3180E-03 5.1480E-03 4.6640E-02 9.7100E-03

3.3290E-03 1.1500E-01 4.2310E-02 1.3430E-02 2.5820E-03 6.9340E-02 2.8560E-02

1.1390E-02 2.5810E-03 8.2660E-02 3.5160E-02 1.1960E-02 2.0170E-03 1.4580E-01

4.8600E-02 7.5070E-03 1.0870E-03 1.5050E-01 5.1470E-02 1.1960E-02 1.9320E-03

4.4320E-02 1.8230E-02 7.2060E-03 2.2190E-03 8.2290E-02 3.1590E-02 9.1510E-03

1.8310E-03 2.1940E-01 5.9780E-02 1.5500E-02 2.1240E-03 1.0120E-01 3.0780E-02

8.2310E-03 1.6240E-03 1.7800E-01 6.3410E-02 1.8120E-02 3.5080E-03 9.4290E-02

2.6470E-02 1.5010E-02 4.7090E-02 2.3570E-02 8.7390E-03 1.8500E-03 6.3810E-02

2.2450E-02 7.0930E-03 1.7500E-03 1.6920E-02 7.0360E-03 2.2680E-03 4.4060E-04

2.2380E-02 1.0580E-02 3.9650E-03 1.1020E-03 2.8770E-02 1.9740E-02 7.1290E-03

2.9600E-03 2.1860E-02 1.0870E-02 3.9420E-03 6.5210E-04 2.4160E-02 1.2940E-02

6.4800E-03 2.3900E-03 2.7150E+00 4.6170E-01 2.7040E+00 3.6480E+00 1.6670E-01

1.2430E-01 1.6950E-01 1.0570E-01 4.9730E-02 3.2750E-02 1.8080E-02 1.2370E-02

4.1180E-03 2.1910E-02 2.1130E-02 4.6960E-03 3.5940E-02 5.4940E-02 3.2830E-02

1.4910E-02 2.2180E-02 3.5200E-02 1.9800E-02 1.2510E-02 2.5350E-02 3.8140E-02

2.8200E-02 1.3750E-02 6.1050E-02 5.2650E-02 4.1430E-02 7.2700E-03 6.4190E-02

6.0070E-02 3.7210E-02 1.1270E-02 1.8210E-02 2.0870E-02 1.1840E-02 6.7230E-03

2.7050E-02 3.6620E-02 2.6120E-02 1.0070E-02 5.9760E-02 1.1330E-01 4.6970E-02

1.7430E-02 2.4820E-02 5.2790E-02 2.6840E-02 9.0980E-03 4.6010E-02 8.8690E-02

5.6070E-02 2.0400E-02 4.9220E-02 5.0160E-02 9.4790E-03 2.6930E-02 1.8170E-02

1.2310E-02 7.5590E-03 2.2450E-02 2.9860E-02 1.6670E-02 7.1180E-03 8.3670E-03

6.7160E-03 4.2050E-03 2.0170E-03 9.4250E-03 9.1220E-03 7.6580E-03 4.0910E-03

2.3020E-02 1.1440E-02 9.2350E-03 3.1730E-03 1.2440E-02 8.1970E-03 5.5360E-03

3.6870E-03 1.2940E-02 1.1200E-02 7.0050E-03 5.6160E-03 2.1030E+00 8.7050E-01

2.6040E+00 1.4140E+00 5.9320E-02 8.5180E-02 1.2460E-01 7.8370E-02 1.8330E-02

1.7560E-02 1.1340E-02 3.0890E-03 1.0190E-02 1.6340E-02 9.2740E-03 9.5380E-03

2.7150E-02 3.8890E-02 2.8390E-02 7.2780E-03 1.3960E-02 2.7490E-02 1.8590E-02

5.4380E-03 1.9790E-02 2.7780E-02 2.6080E-02 1.7030E-02 5.0050E-02 2.6720E-02

2.8010E-02 2.1670E-02 4.6920E-02 3.6590E-02 2.4350E-02 7.2040E-03 1.1840E-02

1.4890E-02 9.2430E-03 6.1840E-03 2.2310E-02 2.4170E-02 2.2060E-02 1.5500E-02

4.6960E-02 7.7840E-02 3.7790E-02 5.4450E-03 2.1060E-02 3.6290E-02 2.2410E-02

8.9100E-03 3.9740E-02 6.1760E-02 4.8410E-02 2.8920E-02 3.5110E-02 1.7620E-02

1.2620E-02 1.4500E-02 1.4260E-02 7.2370E-03 7.0940E-03 1.6670E-02 2.0160E-02

1.3140E-02 3.5010E-03 5.1680E-03 4.7010E-03 2.6030E-03 2.9790E-03 6.7870E-03

6.3770E-03 6.5940E-03 1.7270E-02 6.7290E-03 7.1890E-03 3.9740E-03 5.7770E-03

6.5330E-03 6.7570E-03 3.3250E-03 6.4790E-03 7.0040E-03 8.7720E-03 5.3130E-03

3.0530E-01 9.3840E-01 2.0140E+00 2.5890E-02 4.9240E-02 6.7500E-02 5.9530E-02

8.7070E-03 1.5090E-02 7.5970E-03 2.0590E-03 4.8010E-03 8.5180E-03 1.0550E-02

1.2810E-03 1.0380E-02 2.2670E-02 3.4980E-02 8.1650E-04 7.8860E-03 1.2720E-02

2.3470E-02 9.6670E-05 6.2610E-03 1.7240E-02 2.9130E-02 3.4170E-03 1.9230E-02

3.8060E-02 2.0500E-02 5.4090E-03 2.3030E-02 3.5070E-02 2.2800E-02 2.2190E-03

6.7220E-03 9.2420E-03 1.0580E-02 9.6460E-04 6.5760E-03 1.8240E-02 2.4250E-02

2.1240E-03 1.7440E-02 3.7790E-02 6.1370E-02 8.5780E-04 5.7990E-03 1.7000E-02

3.3150E-02 1.0940E-03 9.5800E-03 3.2540E-02 6.2420E-02 1.7760E-02 1.5280E-02

2.1110E-02 4.3180E-03 1.1920E-02 1.0110E-02 5.9800E-03 1.7510E-03 7.1180E-03

1.3150E-02 1.6030E-02 1.0770E-03 3.4480E-03 3.7320E-03 2.3590E-03 6.8100E-04

2.9610E-03 5.5920E-03 5.8670E-03 1.1510E-02 3.8420E-03 4.2770E-03 3.8080E-03

1.7300E-03 5.7530E-03 4.6630E-03 2.7840E-03 2.3900E-03 5.6160E-03 5.3130E-03

5.0630E-03 3.4320E-01 7.7900E-02 1.0660E-01 6.1350E-02 3.4270E-02 1.8040E-02

1.1860E-01 6.7370E-02 1.7530E-02 2.3940E-02 5.4280E-02 1.9820E-02 8.8570E-03

2.8820E-02 2.0100E-02 1.1580E-02 5.1540E-03 1.2090E-02 7.0150E-03 3.6570E-03

1.3890E-03 1.8600E-03 1.5180E-03 1.0380E-03 5.6810E-04 5.0260E-02 2.5410E-02

1.0440E-02 3.1400E-03 6.6040E-02 4.2000E-02 1.7610E-02 4.2550E-03 2.1100E-02

1.7030E-02 1.2390E-02 7.9500E-03 3.5220E-02 2.4060E-02 1.3450E-02 5.6180E-03

1.1000E-01 4.4700E-02 1.6870E-02 6.5840E-03 3.2310E-02 2.2360E-02 1.4160E-02

8.1000E-03 9.0350E-03 4.3120E-03 1.7880E-03 5.6180E-04 1.3260E-01 3.0440E-02

8.8720E-03 9.5050E-02 3.7620E-02 1.3530E-02 4.3270E-03 1.0070E-01 4.9520E-02

2.5070E-02 1.2940E-02 3.1230E-02 1.7640E-02 6.8840E-03 1.5090E-03 8.8720E-03

6.9610E-03 4.5410E-03 2.4580E-03 3.7300E-02 2.4580E-02 1.3850E-02 7.9170E-03

1.3020E-02 1.0610E-02 7.1010E-03 3.4810E-03 1.4890E-02 9.5310E-03 5.6010E-03

2.9420E-03 2.2550E-01 3.7840E-02 4.6150E-02 3.7990E-02 2.4840E-02 6.5900E-02

2.7910E-02 4.1560E-02 1.5960E-02 1.9820E-02 2.7620E-02 7.8570E-03 1.3510E-02

8.4380E-03 1.0010E-02 1.1850E-02 2.7850E-03 4.4920E-03 4.6280E-03 4.0440E-03

1.0740E-03 5.5670E-04 6.8340E-04 1.0070E-03 1.7910E-02 1.7370E-02 1.5200E-02

9.0290E-03 3.4430E-02 1.3180E-02 2.1080E-02 1.7810E-02 1.4270E-02 1.0520E-02

8.3160E-03 6.0200E-03 1.5800E-02 9.9410E-03 1.2090E-02 1.4410E-02 1.2660E-02

5.1480E-02 3.8280E-02 1.6490E-02 1.4900E-02 1.2680E-02 1.2300E-02 1.1400E-02

8.5920E-04 3.7400E-03 3.5780E-03 2.2720E-03 3.0440E-02 6.6650E-02 1.7670E-02

2.0300E-02 4.1300E-02 2.7420E-02 1.1030E-02 2.3890E-02 4.7680E-02 3.6010E-02

1.8240E-02 1.3580E-02 7.2820E-03 9.7070E-03 7.4100E-03 5.2850E-03 2.8270E-03

3.2150E-03 3.8950E-03 2.4860E-02 1.3850E-02 1.3600E-02 3.4500E-03 9.7560E-03

6.0620E-03 4.4500E-03 2.5490E-03 6.6170E-03 5.9820E-03 5.3040E-03 4.0750E-03

1.2770E-02 1.8350E-02 2.2120E-02 2.0040E-02 1.7500E-02 4.1160E-02 9.3350E-03

7.9810E-03 8.8500E-03 7.8570E-03 1.0940E-02 1.4320E-03 7.9690E-03 7.5880E-03

4.9160E-03 1.8730E-04 1.6520E-03 2.7790E-03 3.2300E-03 1.3460E-04 6.0640E-04

5.7920E-04 3.4130E-04 3.2330E-03 1.0760E-02 1.0070E-02 5.6840E-03 3.3380E-03

2.2650E-02 1.3330E-02 3.8440E-03 6.4730E-03 5.9760E-03 4.3490E-03 2.6470E-03

1.2180E-03 9.5140E-03 9.2770E-03 6.0900E-03 4.2460E-03 6.1730E-03 2.1300E-02

2.7500E-02 4.0760E-03 7.6920E-03 7.7310E-03 6.1390E-03 5.6840E-05 5.0940E-04

1.7790E-03 2.8610E-03 8.8710E-03 1.7670E-02 3.0800E-02 4.9380E-03 1.1330E-02

1.9190E-02 1.4590E-02 9.7200E-03 1.0630E-02 1.9830E-02 2.2540E-02 1.0440E-03

9.1490E-03 6.2630E-03 2.4220E-03 1.0630E-03 2.8970E-03 2.3920E-03 1.2580E-03

1.2430E-02 7.9160E-03 3.4500E-03 4.0860E-03 4.5820E-03 3.8580E-03 2.1400E-03

8.1470E-04 2.0370E-03 3.3250E-03 3.2230E-03 2.4040E-03 5.8480E+00 5.0490E-01

1.6650E-01 1.3320E+00 1.9500E-01 3.8250E-02 3.7000E-02 6.7800E-02 2.3030E-02

5.1120E-03 1.0910E+00 1.3280E-01 1.9890E-02 2.8930E-03 1.8460E-01 6.3390E-02

1.7430E-02 2.5170E-03 1.8870E-01 6.8670E-02 1.5820E-02 1.7450E-03 1.4240E-01

3.2970E-02 1.2400E-02 3.8020E-03 2.5990E-01 3.7080E-02 1.1820E-02 2.7670E-03

4.0430E-01 8.2770E-02 1.8930E-02 3.9310E-03 2.8730E-01 6.3040E-02 1.4890E-02

2.4970E-03 8.2790E-01 1.1250E-01 1.2960E-02 2.1760E-03 1.1440E+00 1.6760E-01

3.0430E-02 5.2800E-03 1.7290E-01 6.7010E-02 2.0320E-02 3.5000E-03 3.0890E-02

1.0450E-02 1.5890E-03 4.4970E-02 1.4100E-02 4.1190E-03 1.2640E-03 1.2130E-01

4.1290E-02 1.7350E-02 5.1510E-03 1.2680E+01 5.0520E-01 9.3450E-02 3.7000E-02

2.9130E+01 3.5960E+00 3.6570E-01 4.9740E-02 1.6000E-01 5.7620E-02 2.7190E-02

3.2750E-03 5.2280E+00 1.9470E-01 8.1480E-03 2.9270E-03 1.6670E+01 2.0750E+00

1.1040E-01 7.0920E-03 6.7250E+00 4.5970E-01 5.6700E-01 5.7760E-01 1.0920E-01

2.9600E-02 3.8300E-02 2.5860E-02 1.2590E-02 5.7610E-02 7.8930E-01 1.4470E-01

2.2800E-02 4.5550E-02 8.2580E-02 5.5900E-02 2.0290E-02 5.0470E-02 8.8020E-02

7.6730E-02 1.8660E-02 4.4670E-02 7.7100E-02 2.0290E-02 8.8120E-03 6.1880E-02

1.5330E-01 2.3910E-02 9.8350E-03 8.1800E-02 2.3330E-01 7.2000E-02 2.0080E-02

4.0610E-02 2.0110E-01 6.3150E-02 1.6870E-02 1.1050E-01 5.1940E-01 1.2210E-01

1.4230E-02 8.0940E-02 8.3490E-01 1.7520E-01 3.4360E-02 5.0900E-02 8.0540E-02

5.6290E-02 2.3210E-02 1.7420E-02 1.0810E-02 6.1250E-03 1.8020E-02 2.0430E-02

1.0330E-02 2.8650E-03 4.1200E-02 6.4870E-02 2.5770E-02 1.6270E-02 1.9930E+00

8.2020E+00 4.5630E-01 5.5630E-02 1.5030E+00 2.0440E+01 4.1870E+00 4.2490E-01

1.2800E-01 3.8010E-02 1.6090E-02 1.6380E-02 7.7960E-01 3.3540E+00 2.0820E-01

5.1050E-03 2.0720E+00 1.0460E+01 2.4340E+00 1.3370E-01 5.0420E+00 2.1780E-01

4.5530E-01 2.6670E-01 2.2200E-02 1.9540E-02 2.3360E-02 1.4660E-02 1.0680E-02

5.2000E-02 5.8410E-01 1.1480E-01 8.2310E-03 3.9130E-02 5.6950E-02 4.8680E-02

1.6160E-03 5.3130E-02 5.6610E-02 6.5090E-02 1.8030E-02 3.3120E-02 5.0550E-02

1.1880E-02 1.8760E-02 5.2700E-02 1.0050E-01 1.4900E-02 1.8940E-02 7.1380E-02

1.5900E-01 5.6130E-02 9.4990E-03 3.5110E-02 1.6490E-01 5.2640E-02 1.2570E-02

1.2140E-01 3.5260E-01 9.3320E-02 1.8510E-02 7.0920E-02 6.4350E-01 1.4160E-01

1.0390E-02 4.2170E-02 5.5960E-02 4.9680E-02 8.4690E-03 1.0430E-02 6.8650E-03

6.7480E-03 1.3750E-02 1.2020E-02 6.4130E-03 1.7330E-02 2.5760E-02 4.7970E-02

2.0250E-02 2.5850E-01 2.2240E+00 5.2280E+00 2.9920E-01 1.3030E-01 1.6430E+00

1.4840E+01 3.2590E+00 9.6030E-02 1.9910E-02 1.9130E-02 1.3830E-02 7.6120E-02

9.1870E-01 2.1210E+00 1.4400E-01 1.0970E-01 2.4340E+00 6.9380E+00 1.8430E+00

7.5850E-02 2.3430E-01 3.1570E-01 1.4800E-02 8.7090E-03 1.7290E-02 1.2360E-02

1.3660E-03 1.1740E-02 4.1850E-02 4.5240E-01 1.8470E-04 9.4780E-03 3.2460E-02

6.4900E-02 9.6270E-05 1.8520E-03 4.1500E-02 6.9460E-02 7.3240E-03 1.5530E-02

2.3740E-02 2.8910E-02 5.9980E-03 1.8670E-02 3.9490E-02 6.0770E-02 3.9300E-03

2.0080E-02 5.5900E-02 1.2440E-01 1.1490E-03 1.0590E-02 2.8790E-02 1.4160E-01

2.1480E-03 1.4200E-02 9.2960E-02 2.7610E-01 2.6440E-03 2.0230E-02 5.7660E-02

5.0780E-01 8.4550E-04 1.1630E-02 3.5220E-02 5.7840E-02 3.3390E-03 8.3770E-03

5.4580E-03 2.4910E-03 5.9520E-03 9.8220E-03 7.4670E-03 5.1490E-03 1.6270E-02

2.0250E-02 3.2630E-02 7.0560E-02 2.7340E-01 1.6820E+00 3.3110E+00 2.7900E-02

1.3180E-01 1.2520E+00 1.1830E+01 6.4000E-02 7.7950E-03 1.9830E-02 7.6340E-03

7.1760E-03 9.6670E-02 7.0360E-01 1.3710E+00 6.9080E-03 1.3360E-01 1.8430E+00

5.5640E+00 1.9710E+00 1.5360E-01 4.5080E-01 3.7230E-01 1.7590E-01 1.6340E-02

6.3480E-02 3.1150E-02 1.3940E-02 5.5800E-03 1.6190E-02 8.9510E-03 4.3870E-03

1.7170E-03 1.8310E-02 9.4930E-03 4.2770E-03 1.4420E-03 7.7450E-02 7.0340E-02

5.7890E-02 3.3300E-02 2.0530E-01 6.6560E-02 2.1830E-02 8.0630E-03 7.0640E-02

3.8080E-02 1.8540E-02 7.8500E-03 4.9010E-02 2.5120E-02 1.2320E-02 5.4810E-03

6.0090E-02 3.1590E-02 1.4460E-02 5.4280E-03 8.7860E-02 4.2980E-02 1.8660E-02

6.7330E-03 4.0710E-02 2.3510E-02 1.2110E-02 5.2260E-03 8.0310E-01 3.5150E-01

9.8820E-03 5.3250E-01 1.4540E-01 3.0250E-02 6.0460E-03 7.9180E-02 5.7700E-02

3.3290E-02 1.5050E-02 1.0110E+01 2.5920E+00 4.9910E-01 1.0790E-01 6.4400E-01

3.2050E-01 1.5720E-01 7.9690E-02 5.0270E+00 8.0980E+00 3.4670E+00 1.0380E-01

8.9000E+00 2.1810E+00 3.1670E-01 1.8990E-02 6.2410E-02 2.6090E-02 9.9620E-03

3.6000E-03 1.6420E+00 2.9990E-01 1.7460E-01 6.3410E-02 1.3980E-01 1.0680E-02

2.6310E-02 2.3760E-02 1.5350E-02 3.4220E-03 6.0960E-03 6.2070E-03 5.1250E-03

2.2560E-03 7.2090E-03 7.4230E-03 5.4630E-03 6.7050E-02 5.7350E-02 2.7500E-02

7.6690E-03 2.5400E-02 1.0400E-01 5.7730E-02 1.4840E-02 2.1500E-02 2.7130E-02

2.4180E-02 1.7270E-02 9.5030E-03 2.1100E-02 1.8680E-02 1.1950E-02 1.7080E-02

2.2140E-02 2.0290E-02 1.4870E-02 1.4580E-02 3.5270E-02 3.2490E-02 2.1800E-02

1.0030E-02 1.5240E-02 1.5630E-02 1.3490E-02 3.5090E-01 1.1180E-01 3.1360E-01

3.1660E-02 2.6540E-01 1.4580E-01 3.4060E-02 4.4940E-02 2.2760E-02 2.6920E-02

2.9070E-02 3.7540E-01 5.1950E+00 2.7270E+00 5.2870E-01 1.1490E-01 2.9220E-01

2.4980E-01 1.4410E-01 3.3510E+00 3.4650E+00 1.2330E+00 3.0840E+00 2.1810E-01

4.5020E+00 2.3910E+00 4.7640E-01 8.5070E-03 2.7620E-02 2.1410E-02 1.0510E-02

1.4960E-01 1.6320E-02 1.3930E-01 3.0330E-02 1.8850E-03 5.9520E-03 1.3030E-02

1.7130E-02 2.2870E-04 2.0160E-03 3.6110E-03 4.5330E-03 4.6560E-05 1.3010E-03

3.7740E-03 5.9900E-03 4.6580E-02 1.5900E-02 1.0330E-02 6.6510E-03 1.0370E-02

1.1160E-02 4.1780E-02 3.7790E-02 4.3730E-03 1.2000E-02 1.5170E-02 1.3490E-02

2.3300E-03 5.0190E-03 1.0030E-02 1.2970E-02 2.2460E-03 1.0060E-02 1.3040E-02

1.1600E-02 1.6940E-03 8.5370E-03 1.8280E-02 2.3570E-02 1.1500E-03 5.7690E-03

9.3090E-03 1.0940E-02 9.8790E-03 3.1330E-01 6.4780E-02 6.5090E-03 1.8470E-02

1.1040E-01 1.0290E-01 8.1770E-03 2.5600E-02 1.9170E-02 8.7200E-03 1.3510E-01

1.7810E-01 2.0770E+00 2.0080E+00 4.1990E-02 5.4720E-02 1.2710E-01 1.7670E-01

1.6750E+00 1.0380E-01 3.0800E+00 7.0230E-01 8.5700E-03 1.5300E-01 1.8490E+00

1.7910E+00 1.9750E-03 4.6120E-03 1.2370E-02 1.5060E-02 2.3340E+00 1.5560E+00

7.7820E-01 6.1780E-02 5.1480E-02 4.1180E-02 3.0890E-02 2.6470E-04 2.2690E-04

1.8910E-04 1.5130E-04 8.5460E-04 7.4780E-04 6.4100E-04 5.3410E-04 3.6680E+00

2.7580E+00 1.8420E+00 9.2210E-01 1.0630E-01 7.9720E-02 5.3180E-02 2.6600E-02

4.5520E-03 3.6430E-03 2.7320E-03 1.8210E-03 2.0550E-02 1.7120E-02 1.3700E-02

1.0280E-02 2.0700E-02 1.6560E-02 1.2420E-02 8.2810E-03 1.4980E-02 1.2470E-02

9.9780E-03 7.4860E-03 2.3560E-04 2.0190E-04 1.6820E-04 1.3460E-04 3.0050E-02

2.0030E-02 1.0010E-02 2.7950E-02 2.0990E-02 1.4000E-02 7.0040E-03 1.8930E-02

1.5140E-02 1.1360E-02 7.5740E-03 5.5130E-02 4.1360E-02 2.7570E-02 1.3790E-02

9.3570E-03 7.7970E-03 6.2400E-03 4.6800E-03 3.0050E-02 1.5140E-02 1.0080E-02

5.0430E-03 4.3590E-02 3.2760E-02 2.1840E-02 1.0920E-02 3.2210E-03 2.5770E-03

1.9330E-03 1.2890E-03 2.7350E+00 1.2770E+00 2.7870E-02 1.9850E-02 1.1260E-02

5.0840E-03 4.8700E-02 2.2440E-02 8.4260E-03 2.3270E-03 1.0030E-03 8.2330E-04

5.5250E-04 2.9530E-04 6.5650E+00 4.2420E+00 1.6950E+00 3.4680E-01 8.0730E-02

4.6380E-02 2.0870E-02 6.7510E-03 1.0110E-01 8.0970E-02 6.7900E-02 5.1200E-02

5.7290E-02 4.3440E-02 2.8770E-02 1.6600E-02 3.6930E-02 2.2670E-02 1.2860E-02

6.5330E-03 2.5230E-02 1.1650E-02 4.6610E-03 1.4720E-03 1.4760E-02 6.6610E-03

2.6570E-03 8.4380E-04 3.1250E-02 3.1530E-02 1.9900E-02 5.8260E-02 3.4100E-02

1.6860E-02 6.3990E-03 5.9420E-02 3.1730E-02 1.5360E-02 6.4780E-03 7.4910E-02

4.6970E-02 2.2020E-02 7.2440E-03 7.0420E-03 5.1970E-03 2.9490E-03 1.2920E-03

1.9480E-02 3.3560E-02 3.3330E-02 2.1350E-02 5.8110E-02 4.2890E-02 1.9820E-02

5.5250E-03 3.7350E-02 1.5270E-02 5.7340E-03 2.0600E-03 1.0190E+00 1.2710E-02

6.0540E-03 9.1590E-03 1.1400E-02 2.7990E-03 2.0320E-02 1.9380E-02 1.1360E-02

5.7800E-04 2.8500E-04 3.6040E-04 5.5510E-04 3.4910E+00 1.0620E+00 2.1070E+00

1.9030E+00 3.5730E-02 2.5060E-02 2.5150E-02 1.6790E-02 6.7530E-02 7.0890E-02

4.4070E-02 1.8290E-02 3.1950E-02 2.0990E-02 2.1560E-02 2.2910E-02 1.5120E-02

1.4680E-02 1.3010E-02 9.7940E-03 3.1780E-03 1.0340E-02 9.3540E-03 5.8010E-03

1.1610E-03 5.9750E-03 5.6800E-03 3.4700E-03 3.1470E-02 1.7970E-02 5.6210E-03

2.6560E-02 2.1300E-02 1.8220E-02 1.1000E-02 1.7700E-02 2.2950E-02 2.0480E-02

1.4360E-02 3.8230E-02 2.1340E-02 2.3800E-02 1.7380E-02 3.1910E-03 2.1450E-03

2.4750E-03 2.9530E-03 1.2990E-02 3.3320E-02 1.9950E-02 5.5580E-03 3.7860E-02

8.8970E-03 1.9280E-02 1.8130E-02 4.7270E-03 1.6550E-02 1.2720E-02 6.0750E-03

1.1550E-03 7.4170E-03 7.5290E-03 3.4160E-03 1.3310E-04 1.6670E-03 9.3860E-03

1.5770E-02 5.9480E-05 3.2990E-04 3.1780E-04 1.6940E-04 2.0320E-01 2.4070E+00

1.3470E+00 3.2570E-01 7.2140E-03 2.0990E-02 1.5950E-02 7.1910E-03 4.6480E-02

2.0230E-02 1.7110E-02 1.6570E-02 8.1640E-03 1.6740E-02 1.4600E-02 9.1910E-03

4.4020E-03 7.7300E-03 7.9750E-03 6.2240E-03 2.6510E-04 1.9070E-03 5.1010E-03

7.0650E-03 8.0150E-05 6.8800E-04 2.7670E-03 4.6080E-03 1.9830E-02 5.6190E-03

2.0220E-03 7.5690E-03 1.4040E-02 1.1190E-02 5.6960E-03 3.6040E-03 9.8820E-03

1.2720E-02 1.1490E-02 7.7670E-03 2.2380E-02 1.4640E-02 5.5610E-03 3.9500E-04

1.8580E-03 1.8840E-03 1.2270E-03 6.4920E-03 2.1340E-02 5.5570E-03 2.5090E-03

5.0560E-03 2.3960E-02 1.1470E-02 1.5540E-03 1.1490E-03 2.5280E-03 7.3640E-03

9.0640E-03 1.7880E+00 6.0630E-02 7.6040E-03 2.9930E+00 1.1830E+00 1.2570E-01

6.7110E-03 5.2030E+00 1.3210E+00 1.8390E-01 9.5800E-03 5.5840E-02 1.2300E-02

3.1470E-03 7.4380E-04 2.5240E+00 2.8200E-01 5.2790E-03 8.0210E-04 2.3270E+00

4.8090E-01 4.6760E-02 1.9690E-03 9.3280E-01 4.3470E-01 4.7180E-02 2.0310E-03

4.3940E-01 1.2900E-01 3.4670E-02 6.9250E-03 6.8400E-01 1.8690E-01 4.6680E-02

7.8790E-03 3.2200E-01 1.9900E-01 2.1910E-02 1.6240E-03 3.9140E-02 6.7710E-03

1.8010E-04 1.9410E-01 2.2920E-02 1.7030E-03 9.3660E-05 2.0390E-01 3.9870E-02

3.4860E-03 3.8680E-04 1.8790E-01 2.8140E-02 8.6350E-03 8.8380E-04 9.5810E-02

3.3600E-02 7.0990E-03 1.2110E-03 3.1150E-02 9.8260E-03 5.9950E-03 4.4000E-04

6.9550E-02 8.0750E-03 1.8450E-03 1.5010E-04 1.1340E-01 3.2090E-02 8.2190E-03

1.5190E-03 3.7700E+00 7.0390E-02 9.2750E-01 3.7320E+00 1.3650E+00 1.4910E-01

1.0710E+00 5.1730E+00 2.3320E+00 2.1920E-01 2.0700E-02 2.8020E-02 8.7420E-03

2.5210E-03 6.9640E-01 1.3430E+00 2.9350E-01 4.8090E-03 6.2010E-01 1.2080E+00

4.9870E-01 5.5200E-02 4.3460E-01 9.9160E-01 4.7600E-01 5.6260E-02 1.5190E-01

2.2000E-01 9.9840E-02 3.4800E-02 1.8660E-01 3.7160E-01 1.6270E-01 5.1000E-02

1.7210E-01 3.2550E-01 2.2810E-01 2.5580E-02 1.9310E-02 1.4870E-02 4.2310E-03

5.4600E-02 1.0440E-01 2.1400E-02 1.8130E-03 5.2150E-02 1.0790E-01 4.2590E-02

3.8750E-03 5.8130E-02 1.0570E-01 1.5570E-02 8.6070E-03 3.3590E-02 9.1830E-02

3.1510E-02 7.7420E-03 2.5960E-02 7.8630E-03 2.0710E-03 3.6150E-03 1.9500E-02

3.9350E-02 5.4290E-03 1.8810E-03 3.8660E-02 5.6630E-02 2.5730E-02 8.5150E-03

2.0100E+00 5.3080E-02 1.0800E+00 2.7180E+00 1.0890E+00 1.0530E-02 1.3210E+00

6.1910E+00 1.8430E+00 7.3870E-03 1.6910E-02 1.7930E-02 5.7580E-03 1.3780E-01

7.2450E-01 8.0350E-01 2.0540E-01 1.0330E-01 6.3680E-01 7.7560E-01 3.8820E-01

4.7160E-02 4.7600E-01 6.6420E-01 3.7970E-01 4.7940E-02 1.2290E-01 1.5360E-01

8.1190E-02 4.6540E-02 1.6260E-01 2.7000E-01 1.3930E-01 8.3600E-03 2.0310E-01

2.0690E-01 1.8190E-01 8.1350E-03 1.4200E-02 8.3620E-03 1.2050E-02 5.4560E-02

6.4240E-02 1.4970E-02 8.2380E-03 5.4960E-02 6.9200E-02 3.2780E-02 1.9400E-02

4.7820E-02 7.2650E-02 1.0550E-02 7.0980E-03 3.1510E-02 6.6920E-02 2.6240E-02

2.0760E-02 4.7140E-03 3.2240E-03 2.9110E-03 5.3680E-03 1.7860E-02 2.5980E-02

3.7480E-03 1.1650E-02 3.1740E-02 3.9210E-02 2.0940E-02 1.7230E-03 6.2160E-02

8.4390E-01 2.7970E+00 4.8470E-04 1.2200E-02 1.0120E+00 6.0240E+00 2.4780E-03

7.6010E-03 1.3350E-02 1.2490E-02 1.5720E-02 1.7620E-01 5.8170E-01 6.3000E-01

8.9360E-03 1.2470E-01 5.1530E-01 7.8050E-01 2.0260E-03 5.6250E-02 3.7970E-01

7.3830E-01 1.1740E-02 5.0920E-02 1.0370E-01 1.3760E-01 7.8600E-03 5.0980E-02

1.3930E-01 2.6570E-01 7.6590E-04 9.4240E-03 1.5750E-01 2.8290E-01 2.4950E-03

1.0260E-02 1.0280E-02 1.7370E-03 1.4990E-02 4.3910E-02 4.8730E-02 9.3320E-04

9.7720E-03 4.4040E-02 6.9150E-02 5.2460E-03 2.1390E-02 3.8530E-02 4.7660E-02

1.2110E-03 7.7410E-03 2.6230E-02 6.3610E-02 1.5570E-02 2.0700E-03 4.8870E-03

1.1190E-03 1.1820E-03 6.1970E-03 1.4360E-02 1.7990E-02 2.6730E-03 1.2540E-02

2.6760E-02 3.5640E-02 2.7450E+00 2.4320E-01 7.0300E-03 5.5540E+00 1.0240E+00

1.6530E-01 8.1600E-03 3.5300E-02 8.4550E-03 2.7140E-03 5.4210E-05 5.8890E-02

1.9290E-02 2.3060E-04 6.6420E-06 1.7380E-01 3.2940E-02 2.5890E-03 7.3710E-05

1.0400E+00 3.5710E-01 2.2780E-02 2.1120E-04 1.2760E+00 1.7800E-01 3.0030E-02

3.4100E-03 3.3780E-01 2.5770E-01 2.9950E-02 3.8220E-03 1.0880E+00 4.5350E-01

5.9750E-02 3.5370E-03 1.1830E-02 6.6010E-04 2.5120E-05 6.3430E-02 1.2600E-02

3.5670E-03 3.3960E-05 2.2020E-01 1.3750E-02 1.6530E-03 1.9670E-04 3.4940E-02

1.0380E-02 2.9540E-04 4.2960E-05 2.1490E-01 4.2370E-02 4.6780E-03 2.8170E-04

2.6040E-04 2.5170E-02 3.6410E-03 2.1410E-05 3.4630E-02 1.1250E-02 3.7370E-03

1.9440E-05 3.6050E-01 3.3240E-02 3.4700E-03 5.5040E-05 4.8670E+00 2.8480E-01

7.9840E-01 5.2790E+00 2.2580E+00 2.9500E-01 1.4960E-02 1.8020E-02 3.9940E-03

2.9490E-03 2.9370E-02 1.7980E-02 1.9630E-02 2.4790E-04 5.0250E-02 9.1150E-02

3.4480E-02 3.0090E-03 4.3600E-01 1.1710E+00 4.1320E-01 2.6980E-02 3.1190E-01

7.6880E-01 1.6030E-01 3.2230E-02 3.0390E-01 6.3070E-01 2.7460E-01 3.2980E-02

2.8540E-01 1.2490E+00 4.8940E-01 6.8810E-02 5.3090E-03 5.0500E-03 3.9900E-04

2.4650E-02 3.2960E-02 6.6560E-03 3.9280E-03 3.7890E-02 1.4890E-01 1.3590E-02

1.7830E-03 1.6510E-02 1.2040E-02 1.0330E-02 2.6930E-04 5.1600E-02 1.2070E-01

4.5170E-02 5.3670E-03 2.2320E-04 1.2790E-02 9.6810E-03 2.2450E-03 1.7170E-02

1.6270E-02 4.9550E-03 4.1350E-03 7.2100E-02 2.3060E-01 3.3130E-02 4.0580E-03

3.8100E+00 1.1710E-01 1.8990E+00 6.8040E+00 2.8160E+00 6.4190E-03 1.0280E-02

1.3590E-02 2.9480E-03 8.9380E-03 2.5610E-02 7.6150E-03 1.3850E-02 9.7620E-03

5.1640E-02 6.0680E-02 2.6910E-02 5.0020E-02 4.9780E-01 8.4490E-01 3.2480E-01

7.0860E-02 3.0750E-01 5.5360E-01 1.2970E-01 4.9590E-02 3.2100E-01 4.4130E-01

2.2110E-01 5.9520E-02 4.8560E-01 9.4010E-01 4.0320E-01 1.9920E-03 4.7220E-03

2.2260E-03 9.5360E-03 1.8640E-02 2.3770E-02 4.8960E-03 5.7710E-03 4.2370E-02

1.0970E-01 1.0720E-02 5.0750E-03 1.4470E-02 5.7670E-03 7.2710E-03 7.9600E-03

5.5710E-02 8.7310E-02 3.6470E-02 1.8600E-04 5.5890E-03 9.6970E-03 5.3120E-03

8.2320E-03 1.0100E-02 1.3410E-02 3.7070E-03 1.2130E-02 7.7740E-02 1.6700E-01

2.6250E-02 1.0410E-03 1.3600E-01 2.3940E+00 7.7370E+00 1.8150E-03 7.1710E-03

8.9700E-03 8.6790E-03 1.4230E-03 1.1080E-02 2.1790E-02 1.0520E-02 1.0170E-03

1.1690E-02 4.2770E-02 6.3520E-02 2.3630E-03 5.9850E-02 4.0210E-01 9.1550E-01

1.2140E-02 8.1030E-02 2.5650E-01 5.0190E-01 6.3970E-03 5.6350E-02 2.6430E-01

5.0300E-01 3.5370E-03 6.8640E-02 4.0130E-01 1.0420E+00 5.5700E-04 2.7100E-03

3.9070E-03 2.4640E-03 1.0890E-02 1.6010E-02 1.6140E-02 7.5050E-04 6.7960E-03

3.3940E-02 9.2990E-02 9.0540E-04 6.1930E-03 1.2260E-02 6.7530E-03 6.7930E-04

9.2580E-03 4.5120E-02 9.4030E-02 1.4880E-04 1.7650E-03 7.1890E-03 7.5230E-03

2.3600E-03 9.1640E-03 9.1030E-03 7.7300E-03 1.2110E-03 1.4570E-02 6.3300E-02

1.4780E-01 1.0910E+00 3.8360E-02 1.0430E-03 1.6840E-01 2.9030E-02 1.0680E-04

1.6690E-05 1.3230E-02 9.1740E-04 2.4400E-05 1.6560E-06 2.9390E-02 7.5370E-03

4.7850E-04 9.8380E-06 1.8870E+00 1.9060E-01 2.7410E-03 3.1360E-05 1.0520E-01

2.3570E-02 3.2650E-03 3.6450E-05 3.4600E-01 1.0390E-01 1.0180E-02 8.0510E-04

1.0520E+00 2.2030E-01 5.6470E-02 3.7760E-03 4.8790E-04 1.5770E-04 2.4450E-05

1.5750E-02 2.4060E-03 1.9130E-04 3.4730E-05 8.7380E-02 1.4180E-02 2.3420E-03

1.6880E-04 3.3940E-02 6.4320E-03 2.6260E-04 5.0660E-05 4.4480E-01 5.7650E-02

6.1110E-03 1.9410E-04 1.1830E-03 6.9050E-04 3.7860E-04 8.2900E-05 3.1900E-02

3.5320E-03 1.2120E-04 1.7620E-06 3.5000E-02 9.8190E-03 1.3310E-03 3.1930E-05

2.2530E+00 7.1750E-02 6.6350E-02 7.7000E-02 2.9610E-02 9.4840E-05 4.0910E-03

7.3380E-03 8.9720E-04 2.4520E-05 1.1150E-02 1.3080E-02 7.9610E-03 5.4970E-04

3.1880E-01 1.9030E+00 2.3340E-01 3.1450E-03 3.6850E-02 5.3400E-02 2.1500E-02

3.7760E-03 1.0190E-01 4.4590E-01 1.1270E-01 1.1420E-02 2.6080E-01 1.3560E+00

3.9840E-01 6.3680E-02 3.2020E-04 1.8600E-04 8.7490E-05 5.9510E-03 7.7630E-03

2.1820E-03 1.6340E-04 2.5660E-02 5.0410E-02 1.2410E-02 2.5850E-03 1.3900E-02

1.5240E-02 6.2030E-03 2.2070E-04 1.1150E-01 4.8110E-01 5.9870E-02 7.0530E-03

1.0350E-03 5.5040E-04 2.5560E-04 2.0170E-04 1.1100E-02 1.6630E-02 3.3970E-03

1.3030E-04 1.4040E-02 1.5800E-02 9.0240E-03 1.5260E-03 2.5980E+00 1.9070E-02

6.3050E-02 4.5200E-02 2.0990E-02 9.8270E-04 4.2860E-03 4.6930E-03 6.3750E-04

2.5720E-03 1.1080E-02 8.1870E-03 6.2200E-03 4.0650E-02 6.1930E-01 2.3710E+00

1.7900E-01 9.8960E-03 3.4040E-02 3.7380E-02 1.7760E-02 2.5160E-02 1.6870E-01

3.3870E-01 9.0520E-02 7.6170E-02 4.6710E-01 1.0630E+00 3.3480E-01 1.8870E-04

1.9440E-04 1.2130E-04 1.8110E-03 5.5840E-03 4.8250E-03 1.5420E-03 6.6750E-03

2.4470E-02 3.6680E-02 1.0280E-02 4.2840E-03 1.2810E-02 9.0210E-03 4.3870E-03

1.5530E-02 1.2460E-01 3.7640E-01 4.9360E-02 8.8720E-04 3.8960E-04 2.7570E-04

1.9840E-04 2.9330E-03 1.1030E-02 1.0460E-02 2.4200E-03 3.9940E-03 1.2660E-02

1.0630E-02 7.3890E-03 3.1300E-03 2.3650E-02 5.3610E-02 4.3220E-02 1.4630E-04

1.2280E-03 3.5520E-03 3.9120E-03 3.1060E-04 3.0480E-03 9.4350E-03 1.0590E-02

1.8680E-03 4.9270E-02 4.8910E-01 2.1480E+00 1.4060E-03 1.1560E-02 2.9850E-02

3.9700E-02 2.6670E-03 2.9060E-02 1.3990E-01 3.4920E-01 6.7910E-03 8.6380E-02

3.9610E-01 1.1320E+00 9.7050E-05 1.9390E-04 1.3230E-04 3.9840E-04 2.1560E-03

4.7190E-03 4.2160E-03 1.1250E-03 7.6760E-03 2.1020E-02 3.5220E-02 8.5650E-04

5.1730E-03 1.0910E-02 8.5230E-03 1.2770E-03 1.8120E-02 1.0160E-01 3.5170E-01

7.3940E-04 2.4120E-04 3.3790E-04 1.4080E-04 4.8410E-04 3.6360E-03 9.2660E-03

8.9810E-03 5.9800E-04 4.6450E-03 1.1170E-02 1.2470E-02 3.6270E+00 5.4390E-01

3.5330E-02 1.2870E-01 5.2950E-02 3.2880E-02 1.6600E-02 8.5280E-02 5.7640E-02

3.2150E-02 1.7160E-02 7.8670E-02 3.6580E-02 1.3360E-02 3.3130E-03 4.6130E-02

2.6350E-02 1.1490E-02 3.3200E-03 4.3320E-02 2.4470E-02 1.1450E-02 3.7980E-03

8.4010E-02 3.1790E-02 8.6290E-03 1.3710E-03 9.0850E-02 5.8530E-02 9.9210E-03

3.1260E-02 1.8220E-02 8.8580E-03 3.4250E-03 8.6070E-02 3.9550E-02 1.2770E-02

3.6580E-03 6.0360E-02 3.0980E-02 1.3760E-02 6.1160E-03 4.8810E-02 1.6770E-02

6.1870E-03 2.9910E-03 9.7240E-02 1.0220E-01 6.7290E-02 4.1340E-03 5.3070E-02

2.6930E-02 9.4010E-03 2.7530E-03 3.7430E-02 1.7060E-02 5.5060E-03 1.0960E-03

3.2340E+00 6.4800E-01 5.2950E-02 8.0480E-02 2.9720E-02 1.2040E-02 5.2340E-02

3.4280E-02 3.6010E-02 2.1830E-02 2.5980E-02 3.0850E-02 2.7210E-02 1.5060E-02

2.3420E-02 1.5610E-02 1.5010E-02 1.1610E-02 1.9530E-02 1.4840E-02 1.4780E-02

1.1830E-02 1.5640E-02 3.7960E-02 3.0050E-02 1.0710E-02 6.6390E-02 1.7460E-02

3.5490E-02 1.8210E-02 1.2930E-02 1.0040E-02 5.2000E-03 3.2430E-02 3.0280E-02

3.1030E-02 1.2940E-02 3.0970E-02 2.4870E-02 2.0620E-02 7.0260E-03 9.2530E-03

2.6390E-02 1.4990E-02 5.4920E-03 7.2920E-02 7.5950E-02 8.0360E-03 4.6130E-02

2.6930E-02 1.7360E-02 1.7640E-02 7.1760E-03 1.4030E-02 1.2780E-02 1.2590E-02

6.2130E-03 2.1560E+00 3.2880E-02 2.9720E-02 4.1740E-02 1.1400E-02 2.3930E-02

3.3040E-02 1.7510E-02 2.1810E-02 4.9720E-03 1.9190E-02 1.9460E-02 2.2350E-02

7.5100E-03 1.3240E-02 1.1950E-02 1.0900E-02 5.7450E-03 1.1830E-02 1.1030E-02

1.1990E-02 3.8620E-04 1.5640E-02 2.1770E-02 2.5100E-02 3.1920E-02 3.0060E-02

1.7670E-02 8.8540E-03 1.0030E-02 7.3160E-03 4.6340E-03 6.6130E-03 2.6410E-02

1.4970E-02 2.3030E-02 1.3750E-02 2.0630E-02 1.0730E-02 1.0590E-02 3.1090E-03

6.8730E-03 1.6380E-02 1.1090E-02 4.8610E-02 3.2050E-02 3.3970E-02 2.0760E-02

9.4010E-03 1.7650E-02 9.0700E-03 9.9230E-03 2.8360E-03 1.0620E-02 7.5370E-03

9.4380E-03 1.6600E-02 1.2040E-02 1.1400E-02 1.7490E-02 1.0040E-02 1.2650E-02

1.7550E-02 7.7470E-03 4.8240E-04 4.9940E-03 1.3260E-02 1.4260E-02 1.2420E-03

7.1710E-03 8.2340E-03 5.2670E-03 9.0160E-04 5.2840E-03 7.8890E-03 6.2080E-03

3.5350E-05 3.8180E-04 1.1040E-02 2.0010E-02 9.8350E-03 2.6640E-02 3.1570E-03

3.4250E-03 5.1970E-03 4.6320E-03 2.1680E-03 1.6340E-03 5.3220E-03 1.7380E-02

1.1180E-02 6.1160E-03 7.0220E-03 1.0590E-02 4.2120E-03 1.1930E-03 1.4330E-03

4.0020E-03 1.1230E-02 2.4310E-02 6.8000E-03 3.5300E-02 1.2640E-03 2.7530E-03

7.1750E-03 9.9220E-03 3.1720E-03 2.8330E-04 2.9490E-03 7.0780E-03 4.8960E-03

1.3060E+00 7.3760E-02 7.4300E-03 4.5330E+00 1.5170E+00 3.2130E-01 3.5170E-02

8.9320E+00 2.0290E+00 3.3200E-01 3.1570E-02 1.3730E-01 5.3000E-02 2.0730E-02

5.5000E-03 1.6550E-01 5.7770E-02 1.7940E-02 4.1120E-03 4.0240E-02 1.7890E-02

8.1070E-03 2.3140E-03 3.2970E-01 1.2910E-01 2.2640E-02 6.3970E-01 2.9230E-01

8.3340E-02 1.2820E-02 4.7710E-01 1.4820E-01 3.1930E-02 5.4340E-03 1.5120E-01

7.2830E-02 2.3070E-02 6.9600E-03 3.5620E-02 1.6280E-02 6.5150E-03 2.4090E-03

1.9010E-02 1.8780E-02 1.4140E-02 7.9810E-03 5.8660E-02 3.4730E-02 1.7220E-02

6.2530E-03 6.4190E-02 3.3960E-02 1.4370E-02 5.3120E-03 1.4430E+00 8.2910E-02

1.0930E+00 1.9180E+00 1.3980E+00 4.0280E-01 4.9770E-01 5.2930E+00 2.2630E+00

4.3400E-01 4.0810E-02 6.6040E-02 3.3740E-02 2.1590E-02 2.5960E-02 1.0370E-01

6.1320E-02 2.1280E-02 1.0360E-02 2.0660E-02 1.1120E-02 9.0340E-03 1.7590E-01

1.0700E-01 7.7960E-02 2.9130E-01 2.0250E-01 1.9200E-01 8.5240E-02 1.0180E-01

2.1890E-01 1.3950E-01 3.7330E-02 7.2820E-02 4.8380E-02 5.2120E-02 1.7230E-02

1.1980E-02 1.5550E-02 1.2780E-02 6.6650E-03 1.4260E-02 1.5290E-02 1.0370E-02

4.7110E-03 3.4730E-02 2.4370E-02 1.7680E-02 1.0840E-02 2.9130E-02 2.3880E-02

2.2520E-02 1.3000E-02 1.0090E+00 9.1660E-02 1.0410E+00 9.9800E-01 1.0800E+00

3.0480E-03 5.2650E-01 3.3260E+00 1.8030E+00 1.3340E-02 2.2160E-02 4.7390E-02

2.4930E-02 5.3800E-03 2.1300E-02 7.8500E-02 3.4930E-02 3.7470E-03 3.9580E-03

1.6550E-02 9.8800E-03 7.4170E-02 1.0090E-01 6.5830E-02 8.3060E-02 1.9150E-01

1.2610E-01 1.1330E-01 1.0220E-02 9.7460E-02 1.1710E-01 1.0660E-01 2.3060E-02

5.2110E-02 2.0530E-02 3.0640E-02 2.9040E-03 8.0650E-03 9.9500E-03 1.0190E-02

9.5050E-03 1.1340E-02 6.4650E-03 2.8870E-03 1.7220E-02 1.7680E-02 1.5740E-02

7.7070E-03 9.2930E-03 1.9410E-02 1.4180E-02 1.5850E-02 2.6000E-03 1.0570E-01

7.2110E-01 7.7660E-01 2.7940E-04 3.0960E-03 3.6920E-01 2.4530E+00 1.8500E-03

1.3060E-02 1.4030E-02 2.5220E-02 4.2680E-04 5.3630E-03 1.4780E-02 3.9760E-02

9.9000E-06 4.1570E-03 3.0210E-03 9.8020E-03 2.2210E-02 6.4000E-02 3.3850E-02

1.2820E-02 8.5030E-02 1.1320E-01 4.5970E-02 1.8080E-03 9.3590E-03 6.6870E-02

8.7930E-02 6.9600E-03 1.7220E-02 3.0640E-02 8.2270E-03 6.7000E-04 2.3930E-03

5.3400E-03 6.9310E-03 4.7520E-03 5.8940E-03 2.9580E-03 1.4000E-03 6.2530E-03

1.0810E-02 7.7070E-03 4.3930E-03 2.6400E-03 6.9800E-03 1.1890E-02 7.8640E-03

3.2990E+00 3.0110E-01 1.6810E-02 8.1280E+00 2.1290E+00 3.2830E-01 2.2900E-02

4.8530E-01 1.5280E-01 3.1790E-02 5.4680E-03 7.7530E-01 2.5040E-01 5.5150E-02

6.9990E-03 4.1480E-01 1.1730E-01 1.8640E-02 1.4760E-03 4.0870E-01 2.0720E-02

3.2490E-03 6.1940E-01 1.2640E-01 1.4710E-02 8.1970E-04 7.4290E-01 2.5200E-01

5.8340E-02 6.2470E-03 1.3730E-01 4.7060E-02 9.4700E-03 3.0470E-03 8.2220E-02

3.4630E-02 1.3060E-02 3.6900E-03 2.7670E-02 5.8970E-02 1.1810E-02 7.5820E-03

6.1710E-02 2.8020E-02 1.1240E-02 2.4280E-03 8.9930E-02 3.2610E-02 7.6690E-03

1.2820E-03 3.6180E+00 3.6680E-01 1.6410E+00 4.2260E+00 2.2400E+00 4.0180E-01

1.5200E-01 2.1680E-01 1.3780E-01 3.4500E-02 2.0010E-01 3.8000E-01 2.4240E-01

6.5080E-02 7.4460E-02 2.2190E-01 1.2830E-01 2.2670E-02 1.4560E-01 1.8830E-01

1.2060E-02 1.8640E-01 2.9380E-01 1.1270E-01 1.6290E-02 2.5080E-01 3.2250E-01

2.0740E-01 6.8180E-02 5.8580E-02 5.1330E-02 4.0460E-02 6.5570E-03 3.0210E-02

3.8290E-02 2.5280E-02 1.3330E-02 2.2140E-02 2.7400E-02 3.1480E-02 3.8310E-03

3.2780E-02 2.6570E-02 1.3910E-02 9.6270E-03 3.2950E-02 3.5980E-02 2.7560E-02

8.3810E-03 2.7740E+00 1.3190E-01 1.7550E+00 2.6950E+00 1.8040E+00 3.1680E-02

1.3720E-01 1.3010E-01 1.0780E-01 2.9630E-02 1.9360E-01 2.4850E-01 2.0310E-01

1.8530E-03 8.5120E-02 1.4460E-01 1.0430E-01 4.1830E-02 1.3920E-01 7.8460E-02

4.1560E-02 1.6900E-01 1.6830E-01 7.7390E-02 5.8170E-02 2.0660E-01 2.0530E-01

1.6650E-01 1.8440E-02 4.8740E-02 2.4440E-02 2.6440E-02 9.8150E-03 2.1510E-02

2.7380E-02 2.1640E-02 1.6610E-02 1.4560E-02 2.1650E-02 1.0840E-02 1.5960E-02

1.7520E-02 2.0740E-02 7.9490E-03 7.6670E-03 2.7550E-02 2.1410E-02 2.1770E-02

2.2500E-03 1.5880E-01 1.3580E+00 2.7390E+00 5.4680E-03 3.4410E-02 1.0750E-01

1.2340E-01 2.4520E-03 3.5070E-02 1.5640E-01 2.5970E-01 9.4680E-05 2.1150E-03

6.4750E-02 1.5720E-01 9.4660E-03 5.5430E-02 1.0800E-01 5.5790E-03 5.0560E-02

1.2990E-01 1.1860E-01 6.2480E-03 6.8060E-02 1.6610E-01 1.8440E-01 5.9870E-03

1.7760E-02 3.5840E-02 1.8880E-02 2.2860E-03 9.6990E-03 1.7720E-02 2.3870E-02

1.1070E-02 8.8440E-03 8.2050E-03 1.4320E-02 5.5500E-03 1.4820E-02 1.2070E-02

9.0400E-03 1.2820E-03 8.3800E-03 2.1770E-02 2.0840E-02 3.0890E+00 1.1910E-01

4.9110E-03 5.0140E-01 1.2060E-01 2.5490E-02 5.3210E-03 3.3910E-01 8.9060E-02

1.3240E-02 6.0490E-04 2.5740E-01 7.9480E-02 1.9490E-02 2.5680E-03 2.1850E-02

8.6940E-03 1.1140E-03 7.3200E-01 5.7420E-02 1.0850E-02 1.9790E-03 4.9680E-01

1.0190E-01 1.1700E-02 1.3750E-03 6.7490E-02 1.7250E-02 2.6770E-03 8.5670E-04

2.4500E-01 5.8530E-02 9.6940E-03 1.8550E-03 5.4290E-02 3.1100E-02 1.5980E-02

3.4860E-03 8.7440E-02 2.0630E-02 6.7000E-03 5.5480E-04 1.5670E-01 4.5880E-02

1.1380E-02 1.4320E-03 3.8070E+00 1.4240E-01 1.4980E-01 2.6300E-01 1.0610E-01

2.5930E-02 8.8800E-02 1.7290E-01 9.1800E-02 1.5740E-02 6.9290E-02 1.3620E-01

7.2330E-02 2.2050E-02 1.4120E-02 7.1020E-03 5.0440E-03 1.8180E-01 4.3170E-01

4.5980E-02 9.5640E-03 1.3140E-01 2.6170E-01 1.0390E-01 1.2940E-02 2.7120E-02

2.9360E-02 1.5280E-02 1.8230E-03 5.8420E-02 1.3720E-01 5.9580E-02 1.0380E-02

4.5250E-02 2.2650E-02 1.0850E-02 8.6430E-03 3.3900E-02 4.5160E-02 1.0480E-02

6.8680E-03 5.4670E-02 7.6560E-02 3.5830E-02 1.2460E-02 2.9170E+00 3.9110E-02

1.3490E-01 1.7790E-01 8.4200E-02 1.3210E-02 9.1510E-02 1.1680E-01 7.5300E-02

1.4460E-02 6.2530E-02 9.9390E-02 6.3310E-02 7.8910E-03 7.7300E-03 5.3910E-03

4.1110E-02 1.8490E-01 2.7790E-01 3.1310E-02 2.3420E-02 1.3360E-01 1.7030E-01

8.0390E-02 8.6860E-03 2.3610E-02 1.6260E-02 1.0300E-02 9.6810E-03 5.9510E-02

9.9480E-02 4.8180E-02 3.6190E-02 1.4330E-02 1.1460E-02 7.9170E-03 1.3610E-02

2.3340E-02 3.2890E-02 7.1330E-03 1.6430E-02 4.3900E-02 5.3650E-02 2.9700E-02

8.9580E-03 4.2140E-02 1.1100E-01 1.6490E-01 6.0430E-04 1.5720E-02 7.5130E-02

1.3110E-01 1.4010E-03 1.6250E-02 5.3940E-02 1.0830E-01 3.5580E-03 7.9920E-03

4.2090E-03 8.9540E-03 4.7780E-02 1.4690E-01 1.9790E-01 3.0580E-03 2.7540E-02

1.0800E-01 1.6740E-01 2.6480E-03 9.2300E-03 1.8750E-02 1.3510E-02 1.8530E-03

1.0370E-02 4.8130E-02 1.0400E-01 2.7140E-02 7.7700E-03 1.2280E-02 5.2420E-03

3.8340E-03 1.4730E-02 1.9090E-02 2.0040E-02 2.9830E-03 1.8390E-02 3.7660E-02

4.8720E-02 1.9640E+00 6.8650E-02 3.6630E-03 6.0090E+00 1.4980E+00 2.0670E-01

1.2660E-02 1.1710E+01 2.1230E+00 2.5140E-01 1.4810E-02 4.5880E-01 5.7070E-02

1.9630E-02 5.7350E-01 1.8620E-01 3.0920E-02 8.1330E-03 6.3300E-01 1.4650E-01

2.3510E-02 3.2610E-03 1.8200E-01 5.7050E-02 8.1610E-03 2.3030E-03 7.7400E-02

2.4060E-02 6.6660E-03 1.3750E-03 2.2040E-02 2.7780E-02 1.0240E-02 4.6470E-03

4.5080E-02 2.1280E-02 7.0690E-03 1.1620E-03 9.4980E-02 2.7750E-02 7.4030E-03

1.3730E-03 2.3840E+00 8.3790E-02 1.1330E+00 3.1840E+00 1.6210E+00 2.5420E-01

8.4150E-01 7.6750E+00 2.4940E+00 3.1050E-01 1.8810E-01 2.1440E-01 2.7520E-02

2.3460E-01 2.1730E-01 1.6350E-01 2.3820E-02 1.4630E-01 3.2710E-01 1.4320E-01

2.6290E-02 7.3150E-02 6.8600E-02 5.1910E-02 6.2180E-03 1.8360E-02 4.2410E-02

2.1280E-02 7.3280E-03 1.7630E-02 1.6270E-02 1.3590E-02 4.2830E-03 2.4600E-02

1.6600E-02 1.1830E-02 6.6190E-03 2.7740E-02 4.7400E-02 2.2070E-02 7.9330E-03

1.7960E+00 6.9200E-02 1.2530E+00 2.0200E+00 1.2950E+00 5.8050E-03 9.9460E-01

5.5140E+00 1.9830E+00 7.3410E-02 1.5910E-01 8.8890E-02 6.7030E-02 1.9900E-01

1.0360E-01 1.0900E-01 2.3500E-02 1.4320E-01 2.0470E-01 1.1100E-01 2.0050E-02

6.3460E-02 3.1540E-02 3.4790E-02 4.2170E-03 1.6150E-02 2.9250E-02 1.7860E-02

1.3230E-02 9.8760E-03 1.0270E-02 5.4930E-03 1.0750E-02 1.3940E-02 1.2770E-02

7.2880E-03 7.4030E-03 2.2070E-02 3.1750E-02 1.7530E-02 9.9970E-04 8.3560E-02

9.6090E-01 2.0520E+00 4.9700E-04 6.4400E-03 7.4980E-01 4.9210E+00 2.9760E-02

7.0580E-02 1.1360E-01 1.8010E-02 6.9720E-02 1.4900E-01 8.2920E-02 3.2610E-03

2.6280E-02 1.1100E-01 1.8210E-01 5.0250E-03 2.0710E-02 4.7660E-02 2.6380E-02

7.4420E-04 4.5830E-03 1.3580E-02 2.6750E-02 8.8170E-03 5.8250E-03 5.7740E-03

5.4240E-03 3.1170E-03 1.0850E-02 1.0080E-02 5.7700E-03 1.3730E-03 7.9330E-03

1.7530E-02 2.5760E-02 3.7880E+00 2.5750E-01 1.1570E-02 6.9110E+00 1.7120E+00

3.1850E-01 1.4110E-02 7.9400E-02 4.5150E-02 1.2500E-02 2.6190E-01 1.8370E-02

4.1940E-03 7.0350E-04 7.3290E-01 1.7200E-01 3.7120E-02 7.9390E-03 1.0880E-01

1.5120E-02 4.0730E-03 8.0490E-04 2.6670E-01 6.6690E-02 1.1430E-02 1.7750E-03

7.6610E-03 3.0900E-02 6.4700E-03 4.1050E-04 1.0040E-01 2.3630E-02 8.3260E-03

1.3820E-03 1.8930E-01 6.2590E-02 4.8670E-03 3.7660E-04 4.4520E+00 3.0860E-01

1.3580E+00 7.4790E+00 3.1150E+00 3.7970E-01 6.0810E-02 3.0140E-02 2.3250E-02

6.2290E-02 1.5790E-01 1.3250E-02 3.7870E-03 2.1450E-01 3.9030E-01 1.5000E-01

3.7530E-02 3.2680E-02 6.0700E-02 1.0210E-02 3.4870E-03 6.6660E-02 1.4460E-01

6.4640E-02 1.2710E-02 6.3830E-03 1.6040E-02 1.1520E-02 3.9350E-03 3.8810E-02

5.2740E-02 1.2480E-02 7.5250E-03 7.9780E-02 1.4310E-01 6.7690E-02 5.5710E-03

3.4670E+00 1.4630E-01 2.5460E+00 5.3520E+00 2.5040E+00 4.1000E-02 3.0280E-02

2.0080E-02 1.4130E-02 6.3540E-02 1.0290E-01 8.9730E-03 5.6260E-02 1.9270E-01

2.6620E-01 1.1920E-01 1.0110E-02 2.9080E-02 3.9660E-02 6.7860E-03 1.1410E-02

6.4630E-02 1.0140E-01 5.3420E-02 5.1060E-03 7.2320E-03 1.1190E-02 6.7660E-03

1.6060E-02 2.7520E-02 3.7500E-02 8.1200E-03 1.2320E-02 8.4140E-02 8.8300E-02

5.2050E-02 3.6700E-04 1.7420E-01 2.0030E+00 5.7410E+00 2.4350E-02 3.1470E-02

1.2700E-02 3.1750E-03 1.6340E-02 5.0480E-02 7.2110E-02 1.3160E-02 6.0480E-02

1.5860E-01 2.4330E-01 3.0300E-03 1.0800E-02 2.3080E-02 2.7390E-02 1.7740E-03

1.2700E-02 5.3400E-02 1.0490E-01 3.8290E-03 2.5140E-03 8.6040E-03 7.7770E-03

5.4840E-03 1.6410E-02 2.1940E-02 2.3010E-02 1.1620E-03 1.4780E-02 6.7490E-02

9.4360E-02 1.4830E+00 1.1540E-01 4.2500E-03 1.6530E-02 2.0160E-03 1.0580E-04

7.1780E-02 2.4720E-02 7.7770E-03 1.7350E-04 1.9560E+00 1.5080E-01 2.0350E-02

2.6370E-03 3.3470E-02 8.6760E-03 1.2600E-03 1.7220E-04 5.0180E-01 8.8720E-02

1.0290E-02 9.1550E-04 4.4900E-04 2.4260E-02 3.6020E-03 1.1100E-04 3.8920E-02

8.3480E-03 6.4850E-04 5.2060E-05 2.5730E-01 2.3030E-02 4.1430E-03 2.4760E-04

2.9820E+00 1.3460E-01 8.1510E-03 6.6270E-03 1.2080E-03 3.6810E-02 3.2830E-02

1.1960E-02 8.4280E-03 3.6330E-01 1.2990E+00 1.4460E-01 2.1770E-02 1.4750E-02

1.4330E-02 7.1180E-03 1.1670E-03 1.0890E-01 2.9480E-01 9.4390E-02 1.1700E-02

3.8480E-04 1.2410E-02 9.3770E-03 2.1910E-03 1.5820E-02 1.6990E-02 7.6140E-03

6.4670E-04 5.0440E-02 1.6410E-01 1.9970E-02 4.6930E-03 3.5830E+00 3.4940E-03

6.4670E-03 3.3650E-03 1.7570E-02 2.1990E-02 2.6230E-02 8.8100E-03 6.2000E-02

3.9520E-01 9.5200E-01 1.1490E-01 5.2140E-03 1.2140E-02 8.7840E-03 4.9910E-03

1.7080E-02 1.1600E-01 2.1630E-01 7.6160E-02 3.2070E-04 5.5020E-03 9.3690E-03

5.1270E-03 4.8430E-03 1.4060E-02 9.9790E-03 5.3740E-03 1.0080E-02 5.1610E-02

1.2130E-01 1.6470E-02 1.1410E-03 4.4260E-03 5.0880E-03 5.1540E-03 1.9450E-02

1.9670E-02 1.5420E-02 9.1020E-03 7.2200E-02 3.2100E-01 8.1770E-01 1.3540E-03

5.9490E-03 1.0240E-02 7.3690E-03 1.7950E-03 1.9750E-02 9.5540E-02 2.2390E-01

2.5660E-04 1.8060E-03 6.9520E-03 7.2270E-03 9.6380E-04 5.8190E-03 1.1820E-02

8.9130E-03 1.4010E-03 1.1780E-02 4.2640E-02 1.0440E-01 6.7700E-01 4.7140E-02

2.4850E+00 1.1880E+00 4.0170E-01 7.0150E-02 7.7050E+00 2.7110E+00 7.3740E-01

1.3280E-01 5.3180E-02 2.9740E-02 1.4530E-02 5.6600E-03 2.1640E-02 1.5800E-02

9.4470E-03 4.4170E-03 3.6560E-02 1.0710E-01 8.8670E-02 5.3970E-02 9.1050E-02

5.4390E-02 3.0830E-02 1.4030E-02 4.0990E-02 2.5900E-02 1.7420E-02 1.1390E-02

5.7110E-01 7.9820E-01 7.4080E-01 7.4310E-01 4.8280E-01 3.3350E-01 3.5400E+00

2.6260E+00 1.0440E+00 2.2470E-02 2.0550E-02 1.6420E-02 9.1570E-03 1.1220E-02

6.1550E-03 7.5160E-03 9.3300E-03 2.4380E-02 8.8670E-02 5.9760E-02 1.8130E-02

4.3050E-02 4.1140E-02 2.8660E-02 1.3980E-02 1.7740E-02 2.2080E-02 1.5760E-02

8.2020E-03 3.2380E-02 5.5950E-01 5.1420E-01 2.7670E-01 1.9330E-02 2.1180E-01

1.4870E+00 2.0570E+00 6.6220E-03 1.1500E-02 1.0230E-02 5.7750E-03 1.2470E-03

6.5420E-03 5.8250E-03 3.3630E-03 1.2190E-02 5.3960E-02 1.8140E-02 1.1150E-02

1.8140E-02 1.8530E-02 1.6680E-02 9.9950E-03 9.6140E-03 6.7040E-03 7.8460E-03

7.7530E-03 3.0200E+00 4.5490E-01 3.2710E-02 8.2230E+00 3.0130E+00 6.6440E-01

7.7310E-02 1.1560E-01 5.6730E-02 1.5690E-02 2.7450E-03 5.9870E-02 3.1970E-02

1.5220E-02 5.6580E-03 1.5520E-01 1.4090E-01 3.8550E-02 1.6180E-02 1.3890E-01

7.2670E-02 2.8150E-02 1.0450E-02 1.2860E-01 5.1690E-02 1.4150E-02 2.1570E-03

2.7020E+00 5.3560E-01 2.2660E+00 3.1890E+00 2.7310E+00 8.2550E-01 5.6730E-02

3.1760E-02 3.9660E-02 1.4450E-02 2.4450E-02 2.4680E-02 2.1130E-02 1.4400E-02

1.1630E-01 6.2140E-02 6.8060E-02 1.6630E-02 7.2670E-02 4.8630E-02 4.8830E-02

1.7370E-02 4.0490E-02 4.8640E-02 4.1520E-02 1.6880E-02 1.8020E+00 1.9510E-01

2.1600E+00 1.5530E+00 2.1090E+00 1.5690E-02 3.9660E-02 1.6330E-02 2.3440E-02

7.5990E-03 1.5550E-02 1.6560E-02 1.6380E-02 7.7520E-02 2.9080E-02 4.1440E-02

2.7320E-02 2.8160E-02 4.8830E-02 2.1180E-02 2.6820E-02 6.1440E-03 3.3210E-02

2.7110E-02 3.1930E-02 8.6550E-03 2.1940E-01 1.4950E+00 1.2870E+00 2.7450E-03

1.4450E-02 2.3450E-02 5.9020E-03 1.5820E-03 6.1730E-03 9.8920E-03 1.0130E-02

3.8740E-02 1.2520E-02 1.5020E-02 2.1340E-02 1.0450E-02 1.7370E-02 2.6830E-02

7.8300E-03 3.1390E-04 6.8710E-03 2.2610E-02 1.9300E-02 3.0660E+00 2.2360E-01

1.1960E-02 1.7850E-01 7.4590E-02 2.0690E-02 5.1200E-03 1.2400E-01 5.9980E-02

2.0120E-02 5.4310E-03 4.3120E-02 3.5850E-01 3.5330E-02 5.4590E-03 3.6810E-01

1.1750E-01 1.5290E-02 3.9730E-03 1.1630E-01 5.9350E-02 2.0860E-02 3.5670E-03

3.4800E+00 2.7320E-01 8.8500E-02 6.5210E-02 5.2780E-02 1.6640E-02 5.3720E-02

4.8500E-02 4.3440E-02 2.0890E-02 3.4490E-02 1.4020E-01 1.5870E-01 2.0610E-02

1.4990E-01 1.3270E-01 1.0920E-01 1.1980E-02 5.9320E-02 4.0290E-02 3.7210E-02

2.2740E-02 2.6530E+00 3.4080E-02 6.1860E-02 3.7950E-02 3.3440E-02 1.4290E-02

3.8780E-02 3.0350E-02 3.7010E-02 2.5870E-02 4.7090E-02 1.2200E-01 7.0600E-02

3.8780E-02 1.3130E-01 5.8110E-02 7.4170E-02 2.0850E-02 3.7190E-02 3.0530E-02

3.0980E-02 1.1170E-02 3.2660E-02 4.4830E-02 2.2940E-02 3.3720E-03 1.4120E-02

3.1580E-02 3.2750E-02 1.7250E-02 1.3440E-02 5.6680E-02 8.9630E-02 9.1380E-03

4.1900E-02 9.9640E-02 5.1340E-02 3.5670E-03 2.2740E-02 3.0970E-02 2.2510E-02

1.8370E+00 3.0790E-01 1.0380E-01 6.3590E+00 1.6250E+00 3.5460E-01 7.3710E-02

1.1590E+00 2.1110E+00 1.1730E+00 1.0210E-01 1.8540E+00 5.9320E-01 1.0600E-01

6.4140E-03 2.2940E+00 7.0690E-01 1.4320E-01 1.7880E-02 1.7390E+00 2.0960E-01

5.3050E-01 3.6340E+00 1.6860E+00 4.0090E-01 8.6810E-01 1.3980E+00 3.5740E-01

7.8230E-01 5.9180E-01 7.1130E-01 4.8920E-01 1.2710E-01 4.8020E-01 1.0470E+00

6.7120E-01 1.7640E-01 1.1540E+00 6.4880E-02 4.7030E-01 2.2630E+00 1.3310E+00

5.7840E-01 5.8530E-01 6.8010E-01 4.2720E-01 1.0560E-01 4.8860E-01 3.6630E-01

3.1910E-01 3.9360E-02 4.6800E-01 5.6200E-01 5.1640E-01 1.9620E-02 4.5830E-02

3.1670E-01 1.6770E+00 2.8920E-01 1.3730E-01 6.0960E-01 9.8490E-02 6.4140E-03

1.2680E-01 3.1890E-01 1.8770E-01 3.4540E-03 4.1710E-02 3.2430E-01 4.2410E-01

4.4840E+00 3.3660E-01 3.7590E-02 1.5500E-01 7.7140E-02 2.7440E-02 5.9820E-03

5.1440E+00 2.5210E-01 5.5480E-03 1.1500E-03 1.0590E+01 2.1180E+00 1.8070E-01

7.4360E-03 5.2420E+00 3.8440E-01 1.2910E-01 4.7790E-02 2.9440E-02 1.4820E-02

1.1410E+00 3.0940E+00 2.6150E-01 4.6910E-03 2.7510E+00 5.5340E+00 2.2500E+00

2.1330E-01 4.0790E+00 1.0330E-01 2.7170E-02 2.8750E-02 1.7820E-02 1.8380E-01

1.2790E+00 1.9560E+00 1.8290E-01 4.3020E-01 2.8880E+00 3.5450E+00 1.7410E+00

7.7460E-02 1.3800E-02 2.4860E-02 1.6580E-02 1.7830E-02 2.3850E-01 1.0160E+00

1.4300E+00 3.4770E-02 5.2520E-01 2.3250E+00 3.5710E+00 7.1820E-01 4.7880E-01

2.3940E-01 2.0930E+00 1.5740E+00 1.0510E+00 5.2640E-01 1.8610E-02 1.4880E-02

1.1170E-02 7.4430E-03 2.3080E+00 1.0530E+00 4.4370E+00 3.0180E+00 1.2280E+00

2.5100E-01 3.6400E-01 1.4910E-01 6.1760E-02 2.9030E-02 8.9010E-01 2.5660E+00

5.7120E-01 1.4440E+00 1.3780E+00 4.5160E-02 1.7780E-01 1.2830E-01 5.1750E-02

1.4410E-01 1.7690E+00 9.0870E-01 1.5810E-01 2.1970E-02 1.8400E-02 6.9110E-02

9.1970E-02 2.2980E+00 2.9020E-01 3.4040E-02 2.1630E+00 7.1280E-01 1.8810E-01

4.6520E-02 2.2100E+00 3.1740E-01 5.0890E-01 1.0000E+00 6.2670E-01 2.0000E-01

1.4960E+00 8.4800E-02 4.4140E-01 5.5940E-01 4.7220E-01 1.9610E-02 7.0220E-02

2.9500E-01 3.9390E-01 4.4130E+00 4.4460E-01 2.4960E-02 4.7620E+00 5.4210E-01

3.6640E+00

12000.00

5.4710E+00 1.5010E+00 6.7080E-01 2.8060E-01 3.4180E+00 1.4300E+00 4.6710E-01

1.2790E-01 1.0360E+01 5.8460E-01 1.9980E-01 6.4940E-02 9.5420E-01 5.0850E-01

3.5710E-02 3.0290E-01 9.6950E-02 8.0770E-03 6.3050E-01 3.1100E-01 9.5380E-02

1.6690E-02 4.0960E-01 2.1580E-01 1.1290E-01 3.8460E-02 3.6970E-01 2.1810E-01

8.0560E-02 1.9750E-02 2.7960E-01 1.5570E-01 7.3850E-02 3.7310E-02 2.3570E+01

6.9550E+00 8.4290E-01 3.5000E-01 1.3220E-01 2.9890E+01 5.1720E+00 5.9400E-01

6.8650E-02 2.7860E-02 1.2600E-02 1.2740E+01 1.8880E-01 4.4680E-02 1.4380E+00

2.6090E-01 1.1640E-02 2.2960E-03 2.3520E+00 3.0090E-01 3.2080E-02 1.0360E-02

8.5320E-01 1.5960E-02 8.5840E-03 1.3160E-01 9.4490E-02 4.1040E-02 9.8970E-03

7.6440E-02 4.9970E-02 2.0210E-02 9.1190E-03 2.7830E-02 8.9390E-03 2.7230E-03

7.7330E-02 3.7660E-02 1.5230E-02 4.8380E-03 2.8990E-02 1.7440E-02 7.4480E-03

1.8420E-03 7.0200E-02 3.9490E-02 1.3450E-02 2.4270E-03 5.2140E-02 2.1060E-02

4.8110E-03 5.3140E-04 3.9090E-02 1.5510E-02 6.0430E-03 1.7650E-03 3.4760E-02

1.1450E-02 3.4760E-03 1.0930E-03 5.7890E-02 2.6360E-02 1.1380E-02 3.9220E-03

7.6210E-02 2.8430E-02 7.4940E-03 1.1230E-03 4.9090E-02 1.5330E-02 3.8600E-03

7.0010E-04 4.9980E-02 2.3500E-02 8.5910E-03 1.8940E-03 3.7970E-02 1.3440E-02

6.3840E-03 3.2470E-02 2.0750E-02 7.3790E-03 1.6140E-03 2.9480E-02 1.6560E-02

1.0140E-02 7.0970E-03 1.3560E-02 1.0050E-02 3.8900E-03 9.1950E-04 1.1250E-02

8.6940E-03 4.6420E-03 1.5050E-03 2.4400E-02 9.7830E-03 7.7390E-03 4.4700E-03

1.5500E-02 1.0490E-02 5.5660E-03 2.5220E-03 1.9780E-02 1.3620E-02 6.2200E-03

1.8320E-03 5.4160E+00 1.2230E+00 4.2240E-01 1.5520E+00 1.4060E+00 9.8040E-01

4.1970E-01 2.3910E+00 6.1700E+00 3.7290E-01 1.2710E-01 6.8730E-01 2.3090E-01

2.8960E-01 1.7450E-01 9.8110E-02 5.5020E-02 2.7900E-01 2.2770E-01 2.4150E-01

9.9150E-02 2.1610E-01 2.2710E-01 1.0290E-01 9.4120E-02 1.6450E-01 2.2080E-01

1.4740E-01 7.8420E-02 1.7470E-01 1.3730E-01 1.0600E-01 2.8400E-02 6.1220E+00

1.1150E+01 8.3130E+00 7.7820E-01 2.5150E-01 5.8720E-01 1.9800E+01 7.0760E+00

1.1370E+00 8.6040E-02 1.5770E-02 3.7610E+00 6.4830E+00 1.1700E-01 4.7840E-01

6.3600E-01 2.4700E-01 9.4420E-03 4.5900E-01 1.3650E+00 3.0520E-01 2.7290E-02

3.2440E-01 3.7170E-01 6.1450E-03 9.5590E-02 3.9350E-02 4.8640E-02 3.8090E-02

6.0510E-02 3.4890E-02 2.1890E-02 7.2970E-03 1.6030E-02 1.1280E-02 4.2750E-03

3.6620E-02 3.2430E-02 2.4960E-02 1.4030E-02 1.6320E-02 1.0360E-02 1.0870E-02

7.4010E-03 3.4500E-02 2.2170E-02 2.9770E-02 1.4010E-02 2.6850E-02 1.7730E-02

1.3770E-02 4.4690E-03 1.9900E-02 1.7270E-02 8.6160E-03 4.1270E-03 1.3090E-02

1.5980E-02 8.5830E-03 2.9910E-03 2.5690E-02 2.6760E-02 1.6940E-02 1.0260E-02

3.1690E-02 3.0760E-02 2.0610E-02 7.5850E-03 1.5160E-02 2.3470E-02 1.2600E-02

3.9480E-03 2.1250E-02 2.0700E-02 1.6560E-02 8.6790E-03 2.2750E-02 1.8110E-02

5.5100E-03 2.3000E-02 9.8030E-03 1.1180E-02 5.7730E-03 1.7260E-02 1.6020E-02

1.2210E-02 5.0960E-03 1.0750E-02 3.9250E-03 5.1210E-03 2.9500E-03 8.3580E-03

4.0400E-03 4.2260E-03 4.2540E-03 1.9520E-02 8.6150E-03 6.1220E-03 2.8560E-03

1.1460E-02 7.1490E-03 6.0600E-03 2.5720E-03 1.3840E-02 6.7200E-03 7.1390E-03

5.4660E-03 4.2800E+00 7.5060E-01 6.0160E-01 1.0610E+00 9.0580E-01 7.0350E-01

5.0800E-01 2.7110E+00 3.3810E+00 2.0460E-01 3.8990E-01 2.7060E-01 2.4650E-01

8.7560E-02 9.4970E-02 6.3730E-02 7.9640E-02 2.0930E-01 1.5420E-01 1.9380E-01

1.2140E-01 1.2260E-01 1.6400E-01 8.0870E-02 7.2460E-02 1.4420E-01 1.5300E-01

1.1920E-01 1.0390E-01 1.2170E-01 6.4510E-02 4.8650E-02 5.4500E-01 8.0690E+00

3.8520E+00 7.3240E+00 5.1950E-01 7.5030E-02 5.9720E-01 1.2360E+01 6.9590E+00

1.4390E+00 8.5470E-02 7.1270E-01 4.6360E+00 2.4210E+00 1.1840E-01 4.3970E-01

3.2560E-01 1.4230E-01 6.0670E-02 5.4720E-01 8.1440E-01 1.9510E-01 1.0430E-01

3.0170E-01 1.2070E-01 4.8360E-02 4.3910E-02 3.4390E-02 3.9590E-02 4.3130E-02

2.8210E-02 1.6620E-02 5.4720E-03 8.8650E-03 9.5980E-03 5.2250E-03 1.4810E-02

2.3770E-02 2.2530E-02 1.9920E-02 6.2710E-03 9.4440E-03 8.0620E-03 9.8420E-03

9.9020E-03 2.4670E-02 1.5720E-02 2.5040E-02 1.1050E-02 1.6440E-02 1.1280E-02

8.3580E-03 9.8350E-03 1.2190E-02 1.0640E-02 4.7740E-03 4.5500E-03 1.0170E-02

9.8660E-03 5.9380E-03 1.0850E-02 1.6690E-02 1.8620E-02 1.3580E-02 1.0530E-02

2.2750E-02 1.9660E-02 1.5050E-02 3.8420E-03 1.3010E-02 1.5150E-02 9.3880E-03

7.1170E-03 1.4680E-02 1.4670E-02 1.3930E-02 1.3920E-02 1.4230E-02 6.6530E-03

1.2340E-02 1.0790E-02 7.6560E-03 6.5370E-03 1.0620E-02 1.2610E-02 8.3670E-03

6.3470E-03 6.1400E-03 4.6050E-03 3.3430E-03 2.9520E-03 4.4310E-03 3.7710E-03

3.5230E-03 3.9330E-03 1.4640E-02 7.0200E-03 4.2890E-03 1.8860E-03 7.4470E-03

6.3920E-03 3.8280E-03 2.7650E-03 7.1900E-03 6.6490E-03 5.4330E-03 5.6000E-03

2.6150E+00 1.9730E-01 5.7840E-01 7.2590E-01 6.8060E-01 1.5430E-01 6.1570E-01

2.3130E+00 1.4520E+00 1.7410E-01 2.9900E-01 1.3250E-01 3.6280E-02 7.7140E-02

5.0690E-02 1.2070E-02 1.0260E-01 1.3470E-01 1.7540E-01 5.5030E-02 8.2220E-02

1.0950E-01 8.0220E-02 2.2730E-02 7.4450E-02 1.1260E-01 1.1990E-01 6.1360E-02

7.1460E-02 5.5930E-02 3.8090E-02 1.8100E-01 7.0510E-01 7.1540E+00 8.9300E-01

4.6600E+00 3.1890E-02 6.3940E-02 4.3400E-01 6.9750E+00 5.5690E+00 1.2840E+00

5.5100E-02 1.5840E+00 3.5410E+00 1.9020E-02 1.7170E-01 2.7910E-01 2.0630E-01

1.1080E-02 9.1610E-02 4.8290E-01 4.7930E-01 2.8230E-02 1.4560E-01 1.7730E-01

1.7410E-02 3.8610E-02 3.1680E-02 2.3130E-02 2.7020E-02 2.1570E-02 1.0060E-02

3.6480E-03 4.5780E-03 6.4870E-03 4.7280E-03 4.9880E-03 1.3390E-02 1.7450E-02

1.8190E-02 1.6590E-03 5.9770E-03 7.1020E-03 7.5510E-03 1.2900E-03 1.2900E-02

1.5280E-02 2.0750E-02 3.4640E-03 1.0790E-02 1.0280E-02 6.8780E-03 4.4400E-03

7.5180E-03 8.1600E-03 4.8450E-03 1.5260E-03 4.5230E-03 7.2530E-03 7.0110E-03

4.0070E-03 9.0580E-03 1.3280E-02 1.3480E-02 2.5570E-03 1.1510E-02 1.5840E-02

1.5410E-02 7.6720E-04 4.6230E-03 1.0170E-02 1.2010E-02 1.6440E-03 7.4130E-03

1.1170E-02 1.3360E-02 8.2470E-03 8.4900E-03 6.4380E-03 5.2050E-03 9.4310E-03

6.5700E-03 3.6830E-03 6.8490E-03 6.7450E-03 6.1830E-03 5.5320E-03 2.7380E-03

4.4230E-03 2.7810E-03 1.4210E-03 1.6690E-03 3.3160E-03 3.0700E-03 2.3850E-03

9.7610E-03 4.9810E-03 2.6210E-03 1.1950E-03 4.4110E-03 4.4880E-03 3.0010E-03

1.7310E-03 2.8270E-03 5.5360E-03 4.7320E-03 3.4870E-03 5.4050E-02 2.0940E-01

4.2740E-01 4.0260E-01 5.7560E-02 1.2200E-01 5.3630E-01 1.5500E+00 5.5000E-02

1.9790E-01 4.7810E-02 1.1250E-02 4.3180E-02 2.7380E-02 8.6350E-04 1.8640E-02

9.8520E-02 9.4330E-02 1.6850E-02 5.3270E-02 3.6660E-02 5.6720E-02 4.0680E-03

2.9350E-02 5.6530E-02 7.4870E-02 2.9970E-02 2.5840E-02 4.0870E-02 1.6830E-02

5.0010E-02 2.5120E-01 5.1900E-01 4.6550E+00 1.4440E+00 1.4940E-02 1.4590E-02

3.9240E-02 2.4270E-01 3.1370E+00 3.7330E+00 1.7870E-02 6.0810E-02 2.5110E+00

2.4010E-03 3.0410E-02 1.5860E-01 1.4620E-01 5.0800E-03 5.7820E-03 9.1250E-02

4.2890E-01 6.7210E-03 4.2790E-02 1.2600E-01 3.8490E-03 2.1130E-02 2.2380E-02

8.0150E-03 1.2850E-02 1.1970E-02 4.5040E-03 1.8240E-03 1.9250E-03 3.1800E-03

2.7940E-03 1.3150E-03 5.3000E-03 9.8540E-03 1.0540E-02 1.9800E-04 2.3590E-03

4.7340E-03 3.7170E-03 9.2120E-06 2.1720E-03 1.2710E-02 1.0220E-02 7.2610E-04

4.6520E-03 7.0000E-03 3.3290E-03 1.6130E-03 3.6890E-03 3.9720E-03 3.2050E-03

4.8580E-04 1.4280E-03 3.5040E-03 4.7510E-03 1.1160E-03 4.0930E-03 6.1610E-03

8.5430E-03 3.5830E-04 3.7130E-03 9.2130E-03 9.3850E-03 1.1680E-04 1.0480E-03

4.1760E-03 8.4310E-03 1.6950E-04 2.4060E-03 6.2780E-03 7.9280E-03 3.9170E-03

3.6880E-03 3.9660E-03 1.6230E-03 5.2170E-03 4.5490E-03 1.0620E-03 3.5840E-03

2.2710E-03 3.7560E-03 3.0440E-03 8.9970E-04 2.6030E-03 1.9120E-03 2.6850E-04

3.8390E-04 1.9270E-03 1.9380E-03 9.7140E-04 4.8800E-03 2.5880E-03 1.2200E-03

5.9000E-04 2.0600E-03 2.1320E-03 1.9930E-03 6.3130E-04 7.7370E-04 3.0080E-03

3.1270E-03 1.3820E-03 7.9270E+00 2.1210E+00 6.7200E-01 2.1100E+00 7.3410E-01

1.5510E-01 2.4390E-02 1.2460E+00 4.2840E-01 1.4620E-01 5.8960E-01 1.1770E-01

2.9720E-02 1.2050E+00 4.4790E-01 1.0310E-01 1.7200E-02 1.2910E+00 4.0320E-01

1.0980E-01 2.2540E-02 9.0730E-01 4.0610E-01 1.2220E-01 2.6240E-02 6.0340E-01

2.9660E-01 1.1510E-01 3.8340E-02 8.2260E-01 3.7140E-01 1.3520E-01 4.3800E-02

1.0550E-02 7.4970E-01 3.7420E-01 1.6090E-01 5.6560E-02 1.5840E-02 3.3150E-03

2.9780E-01 1.1900E-01 2.5680E-02 8.3950E+00 3.8000E-01 1.1250E-01 2.5830E-02

4.3200E+00 7.1060E-01 1.2680E-01 3.4660E-02 4.6000E-01 1.7550E-01 3.1800E-02

1.6490E+00 7.3380E-01 3.5880E-01 1.9880E-01 1.1070E-01 4.9460E-02 2.0160E-02

1.8360E-01 2.5010E-01 1.5270E-01 2.3430E-02 3.6130E+00 3.9500E-01 4.1730E-02

5.7060E-03 2.0660E-01 1.0090E-01 2.4890E-02 3.3680E-03 2.7690E-01 1.9000E-01

3.5850E-02 3.6720E-03 1.7180E+00 4.1040E-02 8.0560E-03 1.0950E-03 7.7130E-01

2.6420E-02 6.1020E-03 1.5340E-03 8.8270E-01 1.2460E-01 1.5960E-02 2.4500E-03

1.3740E+00 1.6410E-01 2.3420E-02 3.4170E-03 2.9070E+00 3.4410E-01 1.7940E-02

2.5340E-03 7.0930E-01 1.1350E-01 2.4480E-02 3.4230E-03 2.7790E-01 1.0120E-01

2.5800E-02 3.1090E-03 3.1000E-02 1.2820E-02 2.6390E-03 2.6630E-01 3.3510E-02

1.1540E-02 2.3390E-03 5.5850E-02 2.0850E-02 7.1110E-03 1.5830E-03 1.0070E-01

1.7020E-02 4.3330E-03 7.6990E-04 7.2380E-02 2.5010E-02 7.3860E-03 1.2570E-03

2.7180E-02 8.7860E-03 4.9050E-03 8.4510E-04 6.8450E-02 8.6800E-03 2.1050E-03

3.6100E-04 1.6560E-01 3.0530E-02 5.5250E-03 9.3220E-04 7.0540E+00 1.9710E+00

8.9970E-01 8.5410E-01 5.5880E-01 1.5020E-01 7.0470E-01 5.5770E-01 2.0710E-01

2.7640E-01 2.5390E-01 6.2590E-02 3.2360E-01 6.0460E-01 4.6480E-01 1.1810E-01

3.9040E-01 6.9170E-01 3.4140E-01 1.1420E-01 3.1600E-01 4.8450E-01 3.4610E-01

1.3270E-01 3.0980E-01 3.1190E-01 1.7950E-01 7.6510E-02 2.8850E-01 4.4750E-01

2.7200E-01 1.2840E-01 4.9610E-02 2.7180E-01 2.9100E-01 2.5440E-01 1.6760E-01

8.1930E-02 2.7120E-02 1.5870E-01 1.1450E-01 8.0060E-02 1.3070E+00 5.4760E+00

2.5370E-01 9.3650E-02 7.1010E-01 2.6140E+00 7.0240E-01 1.2350E-01 2.7410E-01

1.6050E-01 1.0010E-01 7.3370E-01 8.4330E-01 5.3810E-01 2.3650E-01 7.1140E-02

5.1170E-02 2.2200E-02 1.4690E-01 1.8990E-01 6.1740E-02 8.9280E-02 1.2790E-01

2.5420E+00 4.5930E-01 4.8430E-02 7.0230E-02 1.5940E-01 9.4270E-02 2.9150E-02

1.0660E-01 3.3960E-01 2.0360E-01 4.2950E-02 2.3360E-01 1.1400E+00 3.1560E-02

7.8780E-03 1.1600E-01 5.0590E-01 2.0530E-02 4.8660E-03 1.2460E-01 5.4830E-01

1.3000E-01 1.7700E-02 7.1680E-02 9.6690E-01 1.7920E-01 2.6980E-02 3.2210E-01

2.0230E+00 3.8040E-01 2.0140E-02 6.9090E-02 4.7590E-01 1.0920E-01 2.8360E-02

7.4630E-02 1.2870E-01 9.2040E-02 3.0550E-02 1.9140E-02 1.0940E-02 7.1170E-03

6.0700E-02 1.6070E-01 1.9040E-02 1.0110E-02 2.0850E-02 2.6180E-02 1.4190E-02

7.3290E-03 2.7070E-02 5.5360E-02 1.2000E-02 3.8990E-03 2.0930E-02 3.5450E-02

2.0170E-02 8.3460E-03 2.1750E-02 6.3150E-03 2.4290E-03 2.8180E-03 1.5820E-02

3.9750E-02 6.1960E-03 1.9460E-03 3.0160E-02 9.7140E-02 2.8840E-02 6.0320E-03

5.3780E+00 3.0060E-01 6.8910E-01 5.0230E-01 3.6820E-01 3.9100E-01 4.5390E-01

2.6340E-01 1.1990E-01 2.0370E-01 1.2010E-01 3.1540E-02 3.4780E-01 3.8540E-01

3.9020E-01 1.0480E-01 3.3130E-01 4.7210E-01 2.6890E-01 8.1060E-02 2.8520E-01

3.3380E-01 2.9110E-01 1.5570E-01 2.2350E-01 1.9490E-01 1.0230E-01 9.7420E-02

2.2550E-01 2.8890E-01 2.0830E-01 9.2530E-02 5.8200E-02 1.9490E-01 1.8850E-01

1.6480E-01 1.3270E-01 7.6760E-02 7.0700E-02 1.0170E-01 9.2140E-02 2.2290E-01

1.3980E+00 3.5680E+00 1.5930E-01 1.2670E-01 7.0220E-01 1.7490E+00 5.3460E-01

1.4180E-01 1.5660E-01 1.0300E-01 3.5880E-01 5.3810E-01 5.0750E-01 3.5940E-01

4.4600E-02 4.0810E-02 2.2110E-02 1.1020E-01 1.0930E-01 8.3770E-02 6.2680E-02

2.0210E-02 1.2180E-01 2.1330E+00 3.5790E-01 1.0320E-02 6.4860E-02 1.0930E-01

8.0470E-02 2.7810E-03 1.2020E-01 2.2820E-01 1.6850E-01 2.4950E-02 2.7250E-01

7.4160E-01 2.1040E-02 1.5210E-02 1.2730E-01 3.2710E-01 1.3330E-02 1.5940E-02

1.2990E-01 3.6990E-01 9.9720E-02 1.3070E-02 6.4300E-02 7.1410E-01 1.4190E-01

1.7840E-02 3.8010E-01 1.3650E+00 2.8700E-01 1.5920E-02 5.4910E-02 3.5120E-01

8.9870E-02 1.0730E-02 6.8450E-02 8.5560E-02 7.9530E-02 1.0290E-02 1.0660E-02

6.9570E-03 1.8370E-02 5.0490E-02 1.0710E-01 1.1620E-02 7.1110E-03 1.4190E-02

1.8520E-02 1.1430E-02 7.7770E-03 2.2540E-02 3.5450E-02 7.7620E-03 5.0890E-03

1.6420E-02 2.4840E-02 1.7330E-02 1.6310E-02 3.6090E-03 2.9750E-03 2.1340E-03

3.9680E-03 1.4250E-02 2.5550E-02 4.0400E-03 5.5240E-03 2.8830E-02 6.5300E-02

2.2380E-02 7.0080E-02 3.1890E-01 5.1930E-01 3.2730E-01 2.0490E-01 2.8770E-01

2.4710E-01 4.9470E-02 1.1430E-01 1.3020E-01 5.7760E-03 3.2100E-02 2.7270E-01

4.6660E-01 2.2160E-02 1.1280E-01 2.6760E-01 3.8890E-01 1.4160E-02 8.6460E-02

2.3420E-01 3.2290E-01 7.0990E-02 1.3210E-01 1.4980E-01 1.0220E-01 2.5390E-02

9.7140E-02 1.6140E-01 1.8920E-01 1.3020E-01 7.9830E-03 5.1830E-02 1.2560E-01

1.5280E-01 1.2970E-01 7.2540E-02 2.3430E-02 7.6780E-02 7.5770E-02 5.8220E-02

2.3350E-01 1.0570E+00 2.1920E+00 3.4650E-02 1.2350E-01 5.3460E-01 1.3830E+00

5.9990E-02 1.3060E-01 7.6400E-02 1.9880E-01 2.3640E-01 3.5940E-01 3.8110E-01

2.6130E-02 2.6670E-02 1.7930E-02 7.3440E-02 4.7310E-02 9.9620E-02 2.3520E-02

2.7750E-03 2.1950E-02 9.6100E-02 1.6360E+00 4.3770E-04 1.1870E-02 5.2530E-02

1.1170E-01 2.0380E-04 3.0670E-03 9.1900E-02 2.5120E-01 3.4580E-03 3.0270E-02

2.0700E-01 4.6470E-01 3.3520E-03 1.6810E-02 9.7640E-02 2.0760E-01 2.4460E-03

1.7680E-02 9.9700E-02 2.9060E-01 1.5530E-03 1.4420E-02 5.1530E-02 5.5430E-01

2.5120E-03 2.0100E-02 3.0650E-01 1.0670E+00 1.2780E-03 1.8190E-02 4.5700E-02

2.7650E-01 9.0000E-05 1.2650E-02 5.5760E-02 9.4360E-02 4.6520E-03 8.9970E-03

4.9540E-03 5.5620E-03 1.8210E-02 3.7910E-02 6.3750E-02 1.5830E-03 7.3290E-03

1.1420E-02 1.3980E-02 2.0130E-03 8.1040E-03 1.7060E-02 2.1940E-02 5.1840E-04

5.6550E-03 1.3640E-02 2.2590E-02 1.0870E-02 1.6030E-03 3.2440E-03 9.7110E-04

9.6930E-04 4.2520E-03 1.0730E-02 1.5920E-02 9.2620E-04 6.0350E-03 2.2390E-02

5.1840E-02 2.3200E+00 8.5300E-01 3.7860E-01 1.0660E+00 4.9070E-01 8.0600E-02

3.4140E-01 1.4020E-01 3.3130E-02 5.8930E-01 3.0800E-01 1.3710E-01 3.7250E-02

4.5580E-01 2.3950E-01 1.1920E-01 5.5390E-02 5.2810E-01 2.8120E-01 1.2830E-01

4.9550E-02 4.0820E-01 2.5690E-01 1.4760E-01 6.3680E-02 2.8750E+00 1.3040E+00

4.0870E-01 1.0980E-01 2.8930E-02 4.1100E+00 1.3990E+00 4.2200E-01 1.1830E-01

3.6300E-02 1.2220E-02 1.9040E+00 2.7790E-01 3.6680E-02 1.8750E+01 3.3580E+00

1.1150E-01 1.9670E-02 2.8290E+01 3.7820E+00 3.9870E-01 1.1480E-01 1.1690E+01

1.1170E-01 3.2130E-02 1.4590E-01 8.6780E-02 4.6920E-02 2.1480E-02 6.8470E-02

3.9480E-02 1.5900E-02 7.3040E-03 1.7270E-02 6.4610E-03 2.9500E-03 1.3720E-01

6.8150E-02 2.8710E-02 7.7840E-03 1.2010E-02 7.1310E-03 3.5250E-03 1.2810E-03

3.1080E-02 1.7520E-02 8.3160E-03 2.4300E-03 1.7710E-01 3.9210E-02 5.2420E-03

1.0580E-03 1.9920E-01 4.8250E-02 1.0330E-02 3.3370E-03 2.9800E-02 1.2520E-02

4.9050E-03 1.4280E-03 5.7210E-02 2.9040E-02 1.2740E-02 4.0150E-03 1.9260E-01

4.7240E-02 1.3240E-02 3.1230E-03 2.8440E-02 1.2820E-02 4.9340E-03 1.2240E-03

2.4080E-02 1.0890E-02 4.6110E-03 1.5400E-03 1.0390E-01 2.0690E-02 1.1120E-02

3.2590E-02 1.8570E-02 7.8870E-03 2.2470E-03 1.2950E-02 7.9490E-03 4.9520E-03

2.9630E-03 3.6090E-02 2.5160E-02 1.2280E-02 4.0780E-03 4.7280E-03 3.2630E-03

1.9630E-03 9.3460E-04 1.7680E-02 8.8140E-03 2.5140E-03 1.3070E-03 4.3250E-03

3.1960E-03 1.8120E-03 7.5630E-04 6.1320E-03 2.2920E-03 1.0680E-03 4.4060E-04

1.8240E+00 4.0600E-01 6.1740E-01 3.1030E-01 3.0030E-01 1.8700E-01 1.2170E-01

7.8270E-02 2.0730E-01 2.4670E-01 2.0150E-01 1.5330E-01 2.0410E-01 2.0680E-01

1.5340E-01 9.1850E-02 1.9980E-01 2.5100E-01 1.9240E-01 1.2520E-01 2.2500E-01

2.6500E-01 1.4010E-01 6.5230E-02 6.7540E-01 1.4830E+00 1.0850E+00 4.9180E-01

1.2400E-01 1.7900E-01 2.0900E+00 1.4430E+00 6.2870E-01 1.9430E-01 4.2620E-02

4.6960E-01 9.8590E-01 2.0920E-01 3.3550E+00 9.3380E+00 3.8750E+00 1.0940E-01

4.9460E-01 1.8960E+01 4.4790E+00 4.0330E-01 2.7500E+00 6.0780E+00 5.8660E-02

7.6680E-02 6.3790E-02 4.8670E-02 3.6690E-02 4.6640E-02 2.9030E-02 1.7480E-02

5.4790E-03 8.9430E-03 8.4130E-03 2.6210E-03 4.9960E-02 5.5810E-02 4.4020E-02

3.1610E-02 5.2820E-03 4.5790E-03 4.4400E-03 3.6600E-03 1.1690E-02 1.2350E-02

1.1130E-02 9.3360E-03 3.9580E-02 8.5200E-02 3.8640E-02 4.8950E-03 4.8540E-02

9.5380E-02 4.3030E-02 7.3090E-03 9.9680E-03 1.3360E-02 8.2180E-03 4.9410E-03

2.1550E-02 2.3520E-02 1.8890E-02 1.3330E-02 2.7410E-02 1.1280E-01 3.9530E-02

1.4310E-02 8.8660E-03 1.2130E-02 9.0150E-03 5.5620E-03 6.5740E-03 1.1350E-02

7.9970E-03 4.9170E-03 3.9550E-02 5.4920E-02 7.2120E-03 1.8560E-02 1.1410E-02

9.7170E-03 6.1390E-03 7.0710E-03 6.7190E-03 4.8880E-03 2.9370E-03 2.5160E-02

1.2520E-02 1.2050E-02 8.4680E-03 2.7650E-03 1.9460E-03 1.7160E-03 1.6860E-03

1.3260E-02 3.9630E-03 4.6050E-03 9.0690E-04 3.1960E-03 1.8640E-03 1.5490E-03

9.6100E-04 1.8490E-03 2.8170E-03 1.6620E-03 9.0020E-04 1.0560E+00 2.6930E-01

3.3550E-01 2.1470E-01 8.5560E-02 1.0530E-01 6.7150E-02 5.1280E-02 1.2530E-01

1.8460E-01 1.7700E-01 8.5310E-02 1.2510E-01 1.2710E-01 1.0050E-01 6.5620E-02

1.3090E-01 1.6980E-01 1.5120E-01 1.3370E-01 1.4010E-01 1.4000E-01 5.8480E-02

1.1370E-01 6.7970E-01 7.8340E-01 6.7320E-01 3.9410E-01 4.8930E-02 1.1380E-01

9.8220E-01 1.0590E+00 6.2540E-01 2.1630E-01 7.8770E-02 4.9430E-01 5.3050E-01

1.1110E-01 3.8750E+00 4.3950E+00 2.7320E+00 1.4830E-01 4.1080E-01 1.2220E+01

3.3650E+00 3.7750E-01 3.1180E+00 2.4170E+00 3.4740E-02 4.1210E-02 4.3790E-02

3.0810E-02 2.7490E-02 2.2200E-02 1.2260E-02 3.6520E-03 4.8570E-03 5.2520E-03

3.2290E-03 1.3300E-02 3.0300E-02 4.0790E-02 3.6530E-02 1.5280E-03 3.2320E-03

3.4090E-03 3.8080E-03 2.8560E-03 6.9690E-03 9.5920E-03 1.0260E-02 5.2410E-03

3.8630E-02 4.1580E-02 2.6080E-02 1.0340E-02 4.3010E-02 4.7480E-02 2.8860E-02

3.1160E-03 6.0210E-03 9.1780E-03 6.0160E-03 6.1700E-03 1.3250E-02 1.6740E-02

1.5330E-02 7.5530E-03 1.7450E-02 7.3380E-02 2.9820E-02 2.0760E-03 5.8000E-03

8.3760E-03 7.4590E-03 1.7950E-03 4.1590E-03 7.8660E-03 6.7370E-03 1.7830E-02

2.9840E-02 2.0200E-02 7.8870E-03 9.7170E-03 8.3570E-03 4.6870E-03 3.9070E-03

4.0990E-03 3.6840E-03 2.7130E-03 1.2280E-02 1.2050E-02 9.3620E-03 5.1040E-03

1.2140E-03 1.3930E-03 1.5100E-03 1.2480E-03 8.8400E-03 2.0720E-03 2.6460E-03

1.6440E-03 1.8130E-03 1.5490E-03 1.0900E-03 5.8890E-04 7.5400E-04 1.0440E-03

1.9290E-03 1.0640E-03 8.0940E-02 2.3680E-01 9.2230E-02 2.9420E-02 6.3110E-02

3.6010E-02 1.1900E-03 5.5340E-02 9.0420E-02 1.2150E-01 3.0420E-02 5.3630E-02

6.9780E-02 6.5070E-02 1.4250E-02 5.3010E-02 8.4610E-02 1.0590E-01 6.3570E-02

6.5220E-02 5.8480E-02 5.1270E-02 3.0200E-02 8.6840E-02 3.9450E-01 4.8820E-01

3.1960E-01 1.5000E-02 2.9840E-02 5.9650E-02 3.7190E-01 5.9510E-01 4.4730E-01

1.3040E-02 9.1600E-02 4.4210E-01 1.9620E-02 1.0930E-01 2.7330E+00 2.6880E+00

6.7880E-02 6.9580E-02 2.5110E-01 7.6300E+00 2.7010E-02 5.2650E-01 2.3870E+00

1.1490E-02 2.3290E-02 2.1930E-02 1.8560E-02 1.2400E-02 1.2630E-02 5.9490E-03

1.8260E-03 2.2480E-03 2.0990E-03 2.3150E-03 1.0400E-03 1.3730E-02 2.0850E-02

2.4840E-02 2.2990E-04 1.3840E-03 2.2320E-03 2.1410E-03 1.3260E-05 3.1060E-03

5.2050E-03 6.5090E-03 1.0580E-03 4.8950E-03 2.6080E-02 2.4010E-02 3.3370E-03

7.3090E-03 2.8850E-02 2.6040E-02 5.5460E-04 2.8480E-03 3.7650E-03 4.9950E-03

8.5280E-04 5.7750E-03 8.8730E-03 1.0190E-02 1.0160E-03 7.4370E-03 1.1240E-02

4.5070E-02 1.3000E-04 2.1880E-03 4.0210E-03 5.5160E-03 2.5930E-04 1.6410E-03

2.8830E-03 5.4930E-03 8.2390E-03 7.7060E-03 1.8030E-02 2.2470E-03 6.1390E-03

4.6870E-03 2.2190E-03 1.7960E-03 1.8160E-03 1.9090E-03 1.6800E-03 4.0780E-03

8.4680E-03 5.1040E-03 1.7490E-03 3.4560E-04 8.9630E-04 8.0840E-04 6.4050E-04

4.4190E-03 9.7420E-04 8.8220E-04 1.2970E-03 7.5630E-04 9.6100E-04 5.8890E-04

2.1430E-04 2.2370E-04 5.4440E-04 5.8750E-04 9.4870E-04 1.2500E+00 4.7680E-01

3.6260E+00 2.6380E-01 8.2180E-02 9.7430E-02 5.4720E-02 2.9500E-02 1.5740E-02

5.2790E-01 2.7130E-01 1.3000E-01 5.8280E-02 1.7190E-01 1.2020E-01 7.2640E-02

3.8110E-02 7.4310E-01 4.8180E-01 2.4330E-01 8.7200E-02 4.1840E-01 3.0720E-01

1.7590E-01 8.6400E-02 3.3160E-02 3.6660E-01 2.8030E-01 1.8380E-01 1.0290E-01

4.7900E-02 1.6640E-02 3.0680E-01 1.8870E-01 6.3320E-02 2.8100E+00 8.3790E-01

2.3060E-01 7.2520E-02 8.2540E-01 6.2970E-01 3.4390E-01 1.2860E-01 5.5600E+00

2.4280E+00 5.0100E-02 4.0040E-01 1.8370E-01 7.6970E-02 3.0010E-02 3.6530E-01

2.0300E-01 1.1320E-01 4.3760E-01 4.8640E-01 2.3720E-01 3.8120E-02 2.8590E-01

1.2500E-01 4.7610E-02 1.5340E-02 4.8460E-02 2.6410E-02 1.2870E-02 5.1420E-03

5.8460E-02 2.8090E-02 1.1440E-02 3.3280E-03 6.7080E-01 1.8740E-01 3.5420E-02

5.8090E-03 1.4400E+00 3.4310E-01 5.0080E-02 5.6660E-03 6.9290E-02 3.0920E-02

1.2100E-02 3.9310E-03 1.1840E-01 5.5870E-02 2.3450E-02 8.3470E-03 3.4800E-02

2.2460E-02 1.2720E-02 6.1610E-03 1.0390E-02 6.2590E-03 4.0070E-03 2.5840E-03

8.1990E-03 4.1860E-03 1.8960E-03 6.9980E-04 1.3430E+00 5.8510E-01 1.4490E-02

7.2000E-01 1.9590E-01 3.9490E-02 9.5770E-03 1.2600E-01 1.0070E-01 5.9320E-02

2.6120E-02 8.8160E-01 2.3740E-01 5.7620E-02 1.8770E-02 1.9260E-01 8.5380E-02

3.3890E-02 1.0770E-02 3.6910E-01 1.6350E-01 8.4490E-02 1.5560E-02 2.5110E-01

9.4030E-02 4.4170E-02 2.1780E-02 6.5940E-02 2.9580E-02 1.1320E-02 3.3150E-03

6.0820E-01 2.6360E-01 2.2410E+00 1.4540E-01 2.1200E-02 4.3220E-02 3.9890E-02

2.7670E-02 1.2740E-01 2.3990E-01 1.9100E-01 1.0800E-01 7.8250E-02 6.4290E-02

6.5650E-02 6.4430E-02 3.7840E-01 2.8770E-01 2.5320E-01 1.5740E-01 1.8280E-01

1.6340E-01 1.5390E-01 1.2770E-01 7.1900E-02 1.9840E-01 9.5190E-02 9.4160E-02

1.1100E-01 1.0390E-01 6.1630E-02 1.6070E-01 7.2450E-02 1.3850E-01 2.5810E-01

1.4110E+00 7.7630E-01 1.9020E-01 5.0730E-01 1.5700E-01 2.6670E-01 3.5370E-01

2.4260E+00 7.4490E-01 2.1870E+00 7.5820E-02 1.6930E-01 1.3730E-01 7.7610E-02

2.0300E-01 1.9850E-01 5.3180E-02 2.9140E-01 2.3590E-01 9.8040E-02 2.0560E-01

2.5800E-02 1.2360E-01 1.0770E-01 5.8730E-02 9.6990E-03 1.8600E-02 1.8720E-02

1.4880E-02 3.8620E-03 2.4120E-02 2.4160E-02 1.5390E-02 3.0310E-02 3.4800E-01

1.8940E-01 4.1890E-02 2.4140E-02 7.4760E-01 3.8480E-01 7.0960E-02 1.2050E-02

2.8230E-02 2.3450E-02 1.3580E-02 1.6740E-02 4.8970E-02 4.4130E-02 2.7570E-02

1.5630E-02 1.2450E-02 1.2140E-02 1.0220E-02 3.4130E-03 5.3290E-03 4.3130E-03

2.5220E-03 1.2140E-03 3.2810E-03 3.2120E-03 2.2820E-03 5.8480E-01 1.8630E-01

5.2430E-01 3.5340E-02 3.6610E-01 1.9560E-01 4.0290E-02 8.3550E-02 2.8840E-02

4.2220E-02 5.3090E-02 4.5260E-02 4.6790E-01 2.4020E-01 4.3130E-02 1.6230E-02

8.4410E-02 7.2980E-02 3.9560E-02 2.4610E-01 8.4460E-02 3.1650E-02 5.9940E-02

4.7820E-02 1.3920E-01 7.1800E-02 1.5560E-02 1.1780E-02 2.6040E-02 2.2150E-02

1.3480E-02 8.1900E-02 1.4540E-01 1.0950E+00 6.3140E-03 1.1360E-02 2.0170E-02

2.7270E-02 3.7500E-02 6.6470E-02 1.0890E-01 1.1680E-01 1.7300E-02 4.2430E-02

4.3400E-02 3.3700E-02 9.6230E-02 2.0020E-01 1.5300E-01 7.4530E-02 3.7390E-02

1.0580E-01 1.0170E-01 7.2380E-02 3.6170E-02 4.8430E-03 1.0000E-01 1.0260E-01

7.1390E-02 3.8060E-02 1.4830E-02 2.9220E-02 1.1140E-01 4.5650E-02 9.0220E-02

1.2430E-01 5.7490E-01 5.2810E-01 4.3700E-02 3.1470E-01 2.1550E-01 6.8180E-02

4.9950E-02 2.1870E+00 4.4180E-01 1.5930E-02 4.1880E-02 8.1690E-02 8.9990E-02

1.1320E-01 5.3180E-02 5.9750E-02 1.4570E-01 3.8050E-02 1.9870E-01 4.3400E-02

4.1580E-03 1.4600E-02 5.5270E-02 8.3870E-02 9.6030E-04 5.6380E-03 1.0610E-02

1.3740E-02 4.7800E-05 2.3300E-03 1.1150E-02 2.0240E-02 5.9800E-03 1.8040E-02

1.4880E-01 1.4650E-01 6.6460E-03 1.2890E-02 3.1430E-01 2.9420E-01 1.5960E-03

7.3180E-03 1.4280E-02 1.5590E-02 2.2720E-03 9.6300E-03 2.4010E-02 3.2810E-02

3.7830E-03 8.3360E-03 7.7680E-03 5.1680E-03 1.6210E-03 1.4050E-03 2.0650E-03

2.5160E-03 1.1910E-04 7.0630E-04 1.7030E-03 2.4670E-03 1.4480E-02 5.2410E-01

1.0880E-01 1.1800E-02 1.7410E-02 1.4770E-01 1.5050E-01 1.3120E-02 4.8680E-02

3.2230E-02 9.8040E-03 2.5510E-02 1.4680E-02 1.8010E-01 1.7560E-01 3.1620E-03

8.3740E-03 3.7180E-02 5.6250E-02 1.2300E-01 1.5540E-02 5.9940E-02 1.2610E-02

3.0070E-02 1.3520E-02 4.8590E-02 4.4950E-02 9.6390E-04 7.3330E-03 1.3750E-02

1.4680E-02 2.6460E+00 2.4660E-01 4.3980E-01 2.1540E-01 1.0720E-01 4.9450E-02

7.6760E-01 5.4570E-01 3.9620E-01 2.6120E-01 4.3430E-01 2.9650E-01 1.7530E-01

8.5920E-02 7.4770E-01 5.6650E-01 3.8260E-01 1.4150E-01 1.0140E-01 6.8810E-02

3.9180E-02 2.0540E-02 8.6240E-03 1.4770E-01 8.6700E-02 4.8070E-02 2.4860E-02

1.1650E-02 4.3670E-03 7.6420E-02 5.3050E-02 2.4130E-02 5.1790E-01 2.4000E-01

1.0840E-01 4.2640E-02 2.2830E-01 1.4510E-01 8.2440E-02 4.0760E-02 2.5220E-01

1.2520E-01 2.1640E-02 2.6220E-01 1.4850E-01 8.2390E-02 4.3430E-02 3.4830E-01

2.9880E-01 1.8050E-01 5.5330E+00 1.0740E+01 4.6770E+00 2.1440E-01 7.7260E-02

3.9530E-02 2.0080E-02 1.0520E-02 3.4680E-02 1.8370E-02 8.5240E-03 3.0470E-03

5.5470E-02 2.8290E-02 1.2450E-02 4.0170E-03 2.0120E+01 4.8320E+00 6.6380E-01

2.6520E-02 5.4260E-02 3.4600E-02 2.4880E-02 1.3820E-02 3.0900E-02 1.8900E-02

1.1950E-02 7.2980E-03 2.6630E-02 2.0490E-02 1.6750E-02 1.3470E-02 2.4740E-02

1.5390E-02 8.0390E-03 3.3540E-03 9.2670E-03 5.8380E-03 3.5010E-03 1.9780E-03

1.2670E-02 8.4800E-03 4.8830E-03 2.2020E-03 2.7820E-01 1.1820E-01 4.3710E-03

2.8780E-02 1.6200E-02 1.0230E-02 5.3530E-03 2.2560E-02 1.7960E-02 1.2920E-02

8.1830E-03 1.0140E-01 2.9390E-02 1.0450E-02 4.1080E-03 2.0750E-02 1.0050E-02

4.5630E-03 1.9580E-03 5.7870E-02 2.8310E-02 1.6360E-02 3.9580E-03 2.2990E-02

1.1250E-02 6.5560E-03 3.3420E-03 8.9780E-03 5.1740E-03 2.4910E-03 9.1940E-04

2.1470E+00 7.2150E-02 1.8440E-01 1.7670E-01 1.1310E-01 4.0040E-01 4.5810E-01

3.1160E-01 1.5470E-01 1.8110E-01 1.6480E-01 1.6810E-01 1.6590E-01 4.7810E-01

3.7950E-01 2.7680E-01 1.4820E-01 4.0020E-02 4.5820E-02 3.9440E-02 2.7710E-02

1.3860E-02 3.2180E-02 5.1910E-02 5.0950E-02 4.0500E-02 2.6870E-02 1.3120E-02

4.6450E-02 2.2410E-02 3.3440E-02 1.5620E-01 2.2960E-01 1.5450E-01 6.6980E-02

1.0010E-01 8.5970E-02 7.9990E-02 6.5020E-02 1.2390E-01 5.1200E-02 9.0400E-02

8.9380E-02 1.1600E-01 9.3780E-02 5.9360E-02 2.9880E-01 1.9650E-01 5.8110E-02

3.6890E+00 4.6750E+00 1.7220E+00 4.2380E+00 1.5370E-02 3.5060E-02 3.0020E-02

1.7820E-02 6.1380E-03 1.3190E-02 1.3330E-02 1.0420E-02 6.1220E-03 2.1980E-02

2.2540E-02 1.6160E-02 3.7160E-01 1.0770E+01 5.4080E+00 1.0280E+00 2.8760E-02

3.3850E-02 1.7440E-02 4.6800E-03 1.2470E-02 1.5440E-02 1.1620E-02 6.6270E-03

1.5270E-02 1.7020E-02 1.2460E-02 6.8150E-03 1.0390E-02 8.0170E-03 8.3560E-03

7.5840E-03 3.2660E-03 4.2020E-03 3.6630E-03 2.6670E-03 4.8850E-03 4.0550E-03

4.6290E-03 5.2550E-03 1.1690E-01 3.7680E-02 1.0260E-01 1.2310E-02 1.6450E-02

8.9330E-03 2.7800E-03 1.4900E-02 1.0810E-02 8.7540E-03 6.6080E-03 1.0380E-02

4.8040E-02 2.6090E-02 6.1990E-03 3.3090E-03 8.9540E-03 7.8760E-03 4.7620E-03

3.5740E-02 1.6360E-02 6.7780E-03 9.8630E-03 7.8480E-03 1.2830E-02 7.0000E-03

2.0670E-03 3.1950E-03 2.9250E-03 2.9900E-03 2.5800E-03 1.6410E-02 3.8580E-02

8.3810E-02 1.3040E-01 2.2190E-01 1.4860E-01 1.4230E-01 1.3470E-01 3.2290E-02

1.0050E-01 1.1020E-01 9.1780E-02 1.6740E-01 2.0380E-01 1.5420E-01 8.0870E-02

1.1890E-02 1.9490E-02 2.1940E-02 1.8740E-02 1.0610E-02 4.5850E-03 1.5480E-02

2.4210E-02 2.7230E-02 2.2860E-02 1.3000E-02 1.3680E-02 2.6930E-02 1.0710E-02

5.2440E-02 7.6680E-02 1.0180E-01 7.2850E-02 2.6290E-02 5.2690E-02 5.0410E-02

3.6100E-02 2.1450E-02 8.9730E-02 2.1490E-02 3.1640E-02 4.2870E-02 5.4090E-02

5.0820E-02 1.8040E-01 5.8110E-02 3.5350E-02 1.8440E+00 2.1410E-01 4.1150E+00

9.2290E-01 5.6300E-03 7.3050E-03 1.5400E-02 2.0770E-02 3.0740E-04 3.6830E-03

7.5170E-03 1.0030E-02 8.1590E-05 3.6940E-03 1.1260E-02 1.8370E-02 4.9560E-03

2.6810E-01 4.3840E+00 4.2700E+00 1.9230E-02 7.3780E-03 8.8840E-03 7.0510E-03

5.8940E-03 5.1680E-03 6.1000E-03 5.7930E-03 9.6670E-03 5.4650E-03 5.1610E-03

5.4810E-03 1.6790E-03 6.0270E-03 5.6830E-03 3.7810E-03 1.0490E-03 1.6210E-03

1.9970E-03 2.0730E-03 4.0650E-04 2.8670E-03 3.3230E-03 2.8100E-03 4.3560E-03

1.0290E-01 2.1350E-02 7.3320E-03 3.7730E-03 5.0930E-03 4.0700E-03 6.5450E-03

6.4550E-03 4.7290E-03 2.8070E-03 5.5310E-03 3.6690E-03 1.8920E-02 1.7750E-02

7.3930E-04 1.7390E-03 4.1620E-03 5.7140E-03 1.7740E-02 3.9520E-03 9.8620E-03

2.2550E-03 4.5630E-03 2.4910E-03 4.2400E-03 3.4620E-03 3.7210E-04 1.9320E-03

2.0350E-03 1.5080E-03 7.3210E+00 3.7920E-01 4.4140E-02 1.7380E+00 5.1110E-01

8.9230E-02 1.0530E-02 2.6670E+00 8.8620E-01 2.7410E-01 2.8270E-02 4.5670E-01

3.8170E-01 8.5510E-02 1.4610E-02 2.2620E-01 1.2020E-01 4.7660E-02 1.3820E-02

1.8140E-03 2.9510E-01 1.4100E-01 5.7540E-02 1.8770E-02 4.4740E-03 5.4870E-04

2.5040E-01 7.6090E-02 1.0240E-02 4.0190E-01 1.1070E-01 2.7710E-02 4.9790E-03

4.3450E-01 1.4440E-01 3.6040E-02 6.5210E-03 1.0740E-01 4.3070E-02 5.4770E-03

1.6690E+00 4.7780E-01 2.4190E-01 4.8880E-02 2.2280E-01 3.6600E-02 5.5650E-03

1.3040E-02 2.5860E-02 1.5200E-02 1.5980E-03 1.6450E+01 8.7310E-01 1.6330E-02

1.7810E-03 2.7880E+01 2.4070E+00 8.5200E-02 1.2110E-03 3.6660E+01 3.0790E+00

1.2520E-01 3.3920E-03 1.9070E-02 4.7840E-03 9.5440E-04 1.2150E-04 3.9140E-02

9.3620E-03 7.4080E-04 8.0810E-05 4.8750E-02 1.6680E-02 3.5150E-03 1.7950E-04

6.3950E+00 2.4930E-01 5.9640E-03 7.9510E-04 1.3170E-01 4.1950E-02 9.6940E-03

1.2200E-03 6.9680E-01 8.2450E-02 1.7400E-02 2.9990E-03 2.1390E+00 2.0570E-01

2.3520E-02 3.3270E-03 9.0780E-03 8.1880E-04 4.1930E-05 2.0120E-02 5.5360E-03

7.7990E-04 5.6250E-05 2.7790E-02 6.9280E-03 1.2580E-03 1.5200E-04 4.2490E-02

7.3930E-03 8.2080E-04 1.9260E-04 1.5860E-01 1.8190E-02 2.3520E-03 2.4420E-04

5.1040E-03 4.5340E-03 2.1530E-03 4.7600E-04 2.2800E-02 3.8480E-03 9.8650E-04

2.2060E-05 4.4740E-02 9.7880E-03 1.5690E-03 1.6440E-04 1.2300E+01 4.7610E-01

6.6470E-01 8.7620E-01 4.6340E-01 9.5430E-02 8.9960E-01 1.9280E+00 1.2370E+00

3.0650E-01 3.9800E-01 5.1740E-01 2.7380E-01 7.5250E-02 1.2640E-01 1.1390E-01

7.3970E-02 4.2180E-02 1.9220E-02 1.2530E-01 1.2270E-01 9.7810E-02 5.9920E-02

2.7760E-02 8.7680E-03 1.3560E-01 1.0230E-01 5.0850E-02 1.8340E-01 1.8410E-01

7.5720E-02 2.4000E-02 1.8370E-01 1.9780E-01 1.1450E-01 3.6800E-02 7.3150E-02

3.6130E-02 2.4570E-02 6.4530E-01 1.0940E+00 7.5570E-01 2.4230E-01 1.1650E-01

9.1110E-02 2.0230E-02 1.1180E-02 2.0800E-02 6.9620E-03 8.8000E-03 1.7920E+00

1.1840E+01 1.0840E+00 1.8130E-02 2.3690E+00 2.4020E+01 2.9760E+00 1.0050E-01

3.1900E-01 3.2390E+01 3.9400E+00 1.4610E-01 8.2630E-03 8.7020E-03 3.4890E-03

8.9500E-04 1.6570E-02 1.6410E-02 8.5770E-03 7.1040E-04 2.1050E-02 2.0690E-02

1.3480E-02 4.0030E-03 5.4500E-01 4.8210E+00 3.0670E-01 6.7110E-03 5.4010E-02

6.0190E-02 3.3680E-02 1.0370E-02 1.1230E-01 4.7860E-01 7.5970E-02 1.8560E-02

2.0480E-01 1.5850E+00 2.3140E-01 2.5860E-02 4.2990E-03 3.7390E-03 4.9100E-04

9.1810E-03 8.2610E-03 4.5120E-03 7.8870E-04 9.6040E-03 1.3850E-02 6.1280E-03

1.3540E-03 1.5670E-02 2.0740E-02 6.6260E-03 6.6570E-04 2.4110E-02 1.0510E-01

1.8990E-02 2.6290E-03 4.3750E-03 3.3420E-03 1.6740E-03 1.1520E-03 8.2630E-03

1.2140E-02 2.2400E-03 1.0680E-03 1.4200E-02 2.3250E-02 8.9750E-03 1.7130E-03

1.2440E+01 1.9010E-01 6.1860E-01 5.9000E-01 3.7760E-01 2.4670E-01 1.2230E+00

1.5880E+00 1.0640E+00 1.9740E-01 4.4240E-01 3.3830E-01 1.8930E-01 5.6560E-02

8.2610E-02 8.4610E-02 6.2450E-02 3.1300E-02 3.8030E-02 8.8570E-02 8.7350E-02

7.2590E-02 5.3240E-02 2.8510E-02 6.3260E-02 9.7040E-02 8.0330E-02 7.5920E-02

1.3760E-01 1.2280E-01 5.1710E-02 6.4160E-02 1.4780E-01 1.3780E-01 9.5000E-02

4.3420E-02 4.0010E-02 2.7980E-02 2.4760E-01 6.9140E-01 1.2730E+00 6.2370E-01

5.5540E-02 8.8200E-02 4.6340E-02 9.3120E-03 1.3550E-02 9.0540E-03 7.8670E-03

9.7730E-02 2.2640E+00 9.1310E+00 8.2630E-01 4.3210E-02 2.9560E+00 1.6460E+01

2.2970E+00 8.1960E-03 1.0520E+00 2.7640E+01 3.0360E+00 3.1190E-03 6.5480E-03

5.6960E-03 2.4450E-03 5.2130E-03 1.4510E-02 9.4580E-03 6.0420E-03 6.6940E-03

1.6990E-02 1.4290E-02 1.1400E-02 2.9820E-02 6.8050E-01 3.7880E+00 2.3450E-01

1.7730E-02 4.3950E-02 4.2030E-02 2.8150E-02 2.3710E-02 1.1130E-01 3.7220E-01

6.4400E-02 2.3520E-02 2.3010E-01 1.2680E+00 1.8570E-01 1.7610E-03 3.5860E-03

1.7850E-03 3.2600E-03 7.3600E-03 5.1210E-03 3.1940E-03 2.6550E-03 8.6340E-03

9.5200E-03 4.9840E-03 4.7110E-03 1.4440E-02 1.2630E-02 4.6040E-03 3.7590E-03

2.5730E-02 8.0270E-02 1.5430E-02 3.6460E-03 2.1540E-03 1.7610E-03 1.1980E-03

2.9460E-03 6.7540E-03 8.4350E-03 1.6290E-03 3.6000E-03 1.3280E-02 1.5990E-02

7.2400E-03 3.5190E-02 2.2030E-01 5.3790E-01 6.3970E-01 4.1270E-02 4.1100E-01

1.2220E+00 1.8490E+00 7.5020E-02 2.6410E-01 3.7230E-01 2.5640E-01 1.5040E-02

5.6330E-02 7.3580E-02 6.7260E-02 4.0090E-02 6.3200E-03 3.4300E-02 6.6480E-02

7.9130E-02 6.8090E-02 3.8730E-02 2.1170E-02 7.7480E-02 9.3690E-02 2.5580E-02

8.0130E-02 1.1430E-01 8.9240E-02 1.6000E-02 6.8380E-02 1.3000E-01 1.4050E-01

2.1230E-02 4.4280E-02 2.3610E-02 1.1290E-01 4.5610E-01 9.2800E-01 1.2170E+00

2.3270E-02 6.2410E-02 6.6270E-02 7.4520E-03 6.8270E-03 1.3470E-02 4.0780E-03

4.4940E-03 1.1750E-01 1.8500E+00 1.0420E+01 1.2110E-03 1.0050E-01 2.2860E+00

1.5070E+01 1.4120E-03 2.2110E-02 1.6210E+00 2.4890E+01 8.9360E-04 3.4730E-03

5.5220E-03 4.3580E-03 1.0830E-03 6.2150E-03 1.2220E-02 8.6640E-03 1.0730E-03

7.7040E-03 1.5260E-02 1.5450E-02 1.3800E-03 3.5690E-02 5.2640E-01 3.2110E+00

3.7610E-03 1.9680E-02 3.8930E-02 4.3110E-02 4.4540E-03 2.5890E-02 9.3460E-02

3.3680E-01 3.3270E-03 2.5850E-02 1.8780E-01 1.1530E+00 5.3230E-04 2.2730E-03

2.8850E-03 7.8600E-04 3.7790E-03 6.2730E-03 4.2890E-03 4.9850E-04 3.0020E-03

7.4130E-03 9.7280E-03 1.1450E-03 5.4530E-03 1.1950E-02 1.0560E-02 4.4290E-04

4.2980E-03 2.1090E-02 7.4970E-02 2.9170E-03 1.2490E-03 1.8880E-03 9.2030E-04

7.3550E-04 3.3870E-03 5.7220E-03 5.9860E-03 6.1020E-04 4.1160E-03 1.1280E-02

1.6100E-02 6.5240E+00 2.7700E-01 5.6410E-02 1.3540E+00 6.2650E-01 1.9440E-01

4.0240E-02 1.6690E+00 9.2840E-01 2.7450E-01 5.3100E-02 1.3900E-01 7.6550E-02

3.8600E-02 1.9830E-02 8.7470E-03 2.3400E-01 1.5090E-01 9.4480E-02 5.3230E-02

2.5580E-02 9.3570E-03 1.5980E-01 7.0420E-02 2.1320E-02 9.0910E-01 1.6660E-01

4.7760E-02 1.5190E-02 4.7560E-01 1.7680E-01 6.6750E-02 2.2920E-02 2.1110E-01

9.8640E-02 1.8290E-02 1.2180E+00 8.1500E-01 2.7520E-01 9.8600E-02 2.7580E-01

1.1130E-01 4.0230E-02 2.5060E-01 2.9660E-01 1.4940E-01 6.7660E-02 8.8130E+00

1.1160E+00 1.0110E-01 8.2820E-03 5.5640E-01 2.9440E-01 7.1950E-02 1.0370E-02

8.0800E-01 2.9930E-01 8.6940E-02 8.8620E-03 1.5700E-01 2.6940E-02 1.8250E-02

9.6280E-03 1.7520E+01 4.3770E-01 5.0970E-03 7.9290E-04 2.2530E+01 2.6430E+00

1.1070E-01 9.8960E-04 2.5170E+01 2.5530E+00 1.5020E-01 5.4050E-03 7.0630E-01

1.0570E-01 9.7900E-03 1.2060E-03 5.2810E-01 7.4860E-02 1.1430E-02 1.9810E-03

6.2260E-02 2.9640E-02 1.0790E-02 2.1520E-03 4.3030E-02 1.1340E-02 1.7550E-03

7.8270E-01 5.0080E-02 6.4880E-03 1.6630E-03 3.9420E-01 6.6750E-02 9.9620E-03

2.0190E-03 4.3470E-02 1.7020E-02 4.9370E-03 1.1660E-03 5.0580E-02 2.0900E-02

6.5990E-03 1.8490E-03 1.1620E-02 7.8480E-03 4.7700E-03 1.9550E-03 1.9020E-02

8.8150E-03 3.6220E-03 1.2440E-03 4.0270E-02 1.7230E-02 5.1540E-03 1.2790E-03

8.1410E+00 3.0310E-01 4.2260E-01 8.0950E-01 5.5130E-01 2.1320E-01 9.1730E-01

1.0020E+00 6.0240E-01 2.4080E-01 6.6960E-02 7.4100E-02 5.2580E-02 2.8560E-02

1.1280E-02 1.2960E-01 1.1410E-01 8.0060E-02 5.9290E-02 4.4980E-02 2.5780E-02

9.0190E-02 6.5260E-02 4.5750E-02 2.5610E-01 4.9770E-01 1.2380E-01 3.3000E-02

1.7670E-01 2.3250E-01 1.2480E-01 5.9780E-02 1.3860E-01 6.7830E-02 5.6010E-02

8.1500E-01 6.8090E-01 6.3390E-01 2.4150E-01 1.6860E-01 1.2060E-01 5.2670E-02

2.0040E-01 2.0250E-01 1.4490E-01 6.3530E-02 5.2320E-01 6.1070E+00 1.3230E+00

1.2250E-01 2.1190E-01 4.1210E-01 2.7710E-01 8.3810E-02 1.5730E-01 9.2040E-01

5.1180E-01 1.0420E-01 4.2180E-02 1.0570E-01 1.5310E-02 6.4890E-03 2.4190E+00

1.1460E+01 4.8420E-01 3.7010E-03 2.6360E+00 1.4280E+01 3.1600E+00 1.3900E-01

7.9820E-01 1.8240E+01 3.2300E+00 1.8820E-01 1.0490E-01 4.3220E-01 1.1100E-01

1.1190E-02 3.3090E-02 3.9450E-01 8.0410E-02 1.2850E-02 2.4260E-02 2.5580E-02

2.1950E-02 1.2090E-02 2.1930E-02 1.6340E-02 6.6290E-03 1.3790E-01 4.8190E-01

4.6580E-02 5.1390E-03 6.6600E-02 2.3250E-01 6.7900E-02 1.0450E-02 2.0520E-02

1.7090E-02 1.1590E-02 4.0620E-03 1.7560E-02 2.4410E-02 1.7100E-02 6.7940E-03

9.2920E-03 5.9460E-03 3.5700E-03 2.1330E-03 1.0120E-02 8.2700E-03 5.4080E-03

2.3440E-03 1.5940E-02 1.7690E-02 1.3550E-02 5.1810E-03 6.1170E+00 1.1240E-01

4.6690E-01 5.5490E-01 4.6850E-01 4.1770E-01 7.5530E-01 6.5540E-01 3.7990E-01

3.3820E-02 4.8370E-02 4.4900E-02 3.3010E-02 1.7270E-02 6.8290E-02 6.1020E-02

7.7520E-02 6.9140E-02 4.4560E-02 1.9750E-02 4.4630E-02 5.6670E-02 4.9580E-02

8.0410E-02 2.1900E-01 3.0620E-01 7.7070E-02 6.6750E-02 1.2480E-01 1.5860E-01

9.5260E-02 7.5990E-02 7.1890E-02 4.8940E-02 2.7520E-01 6.3390E-01 7.2310E-01

4.7860E-01 9.9540E-02 9.9530E-02 5.7490E-02 1.5030E-01 1.3570E-01 1.1240E-01

6.0090E-02 2.4880E-02 6.0130E-01 4.4040E+00 1.0290E+00 2.8590E-02 2.0140E-01

2.7300E-01 2.3550E-01 6.3350E-03 2.8520E-01 6.2860E-01 4.2170E-01 2.2500E-02

3.5250E-02 6.4330E-02 5.6880E-03 1.9180E-01 2.9290E+00 7.3250E+00 3.3820E-01

1.0830E-01 3.1960E+00 9.4710E+00 2.3960E+00 7.0860E-03 9.7200E-01 1.3390E+01

2.4840E+00 9.7180E-03 1.1090E-01 2.8630E-01 8.4750E-02 6.0740E-03 3.1600E-02

3.1750E-01 6.4990E-02 6.2990E-03 1.7890E-02 1.8500E-02 2.0210E-02 9.8920E-03

1.4570E-02 9.2170E-03 2.0250E-02 1.4880E-01 3.0310E-01 3.1480E-02 9.9250E-03

6.7830E-02 1.5240E-01 5.2000E-02 7.9890E-03 1.4140E-02 1.0190E-02 7.3030E-03

4.6190E-03 1.4440E-02 1.6560E-02 1.4280E-02 6.9680E-03 4.0950E-03 2.9670E-03

1.6580E-03 5.2210E-03 6.3520E-03 5.3640E-03 2.9100E-03 4.9170E-03 1.1240E-02

1.2300E-02 1.0650E-02 2.1630E-02 1.4150E-01 3.6970E-01 5.3410E-01 1.2630E-01

4.3730E-01 5.5130E-01 3.6570E-01 1.7980E-02 2.2870E-02 3.0170E-02 2.9090E-02

1.7760E-02 2.2560E-02 5.2480E-02 5.0740E-02 4.4710E-02 3.5780E-02 2.0530E-02

1.8420E-02 4.2350E-02 3.9800E-02 2.9470E-02 7.2840E-02 1.5980E-01 1.9170E-01

2.2920E-02 5.9780E-02 9.5250E-02 1.1890E-01 3.3620E-02 6.7750E-02 2.9790E-02

9.8570E-02 2.4150E-01 4.7860E-01 5.8830E-01 5.4760E-02 6.7370E-02 4.8160E-02

1.0020E-01 8.4310E-02 7.2700E-02 4.8480E-02 3.4710E-03 2.7110E-02 4.5590E-01

3.5530E+00 1.9460E-03 3.2190E-02 1.6130E-01 2.9690E-01 5.8470E-04 6.8820E-03

2.1790E-01 6.6910E-01 1.5160E-02 1.1020E-02 2.1080E-02 3.7380E-02 6.8460E-03

2.6060E-01 2.2450E+00 4.9270E+00 9.8960E-04 1.3880E-01 2.4160E+00 7.5860E+00

1.8820E-03 6.9360E-03 7.2770E-01 1.0470E+01 1.2010E-03 1.1190E-02 8.7080E-02

2.3070E-01 1.0980E-03 6.5400E-03 2.5130E-02 2.5520E-01 5.8330E-04 6.9430E-03

1.5480E-02 1.8920E-02 3.7250E-03 1.0130E-02 8.5940E-03 3.8440E-03 2.3100E-02

1.1340E-01 1.9610E-01 2.0130E-03 1.0450E-02 5.1960E-02 1.2360E-01 2.5920E-03

7.6910E-03 1.0250E-02 6.1250E-03 1.1620E-03 4.4600E-03 1.1490E-02 1.6080E-02

4.6460E-03 2.5050E-03 2.2750E-03 1.0440E-03 2.2990E-03 4.0030E-03 4.0730E-03

2.5360E-03 1.1600E-03 5.1470E-03 9.0430E-03 9.6260E-03 6.5410E+00 2.7510E-01

3.8560E-02 1.7330E+00 6.2950E-01 1.7860E-01 4.3250E-02 1.2130E-01 6.2650E-02

2.4800E-02 8.6260E-03 2.2840E-03 2.4430E-01 1.4020E-01 7.0510E-02 2.9750E-02

9.7210E-03 2.0270E-03 1.1680E-01 2.7530E-02 7.9440E-03 3.7530E-01 1.2380E-01

3.6090E-02 6.9270E-03 8.6140E-01 1.4330E-01 3.9710E-02 1.1830E-02 1.8080E-01

3.9550E-02 1.0990E-02 1.9690E+00 6.1670E-01 1.7840E-01 6.1030E-02 2.2720E-01

7.4200E-02 1.1390E-02 4.7370E-03 2.2920E-02 5.4060E-03 1.7980E-03 1.6810E+00

2.2080E-01 3.1350E-02 3.0430E-03 3.1540E+00 3.6000E-01 4.1180E-02 4.9350E-03

1.2280E-01 9.8940E-02 2.9920E-02 4.4450E-03 2.3350E-02 1.1150E-02 3.3270E-03

4.7670E-04 6.0660E-02 1.8460E-02 2.8020E-03 4.3790E-04 5.6460E-01 3.4850E-02

5.6810E-03 1.6040E-03 1.1950E-01 4.4180E-02 1.3100E-02 2.2990E-03 1.9700E+01

6.6490E-01 5.3650E-03 8.1590E-04 2.6230E+01 2.4060E+00 9.2720E-02 6.6440E-04

3.3200E+01 2.7550E+00 1.2830E-01 3.7350E-03 3.1630E-02 6.3740E-03 2.1610E-03

6.9200E-02 2.7410E-02 1.0260E-02 2.6230E-03 1.7370E+00 8.4570E-02 1.2340E-02

3.9690E-03 5.1410E-02 1.4590E-02 3.6410E-03 3.6760E-04 1.2020E-01 2.5760E-02

5.2960E-03 8.2500E-04 9.5430E-04 1.1180E-02 3.3920E-03 8.3920E-04 2.3900E-02

8.4410E-03 2.2040E-03 4.8470E-04 7.2400E-02 1.6500E-02 3.2400E-03 5.4500E-04

1.1050E+01 3.2380E-01 8.0240E-01 1.2040E+00 4.3120E-01 1.4070E-01 5.8340E-02

6.8580E-02 4.0930E-02 2.1640E-02 9.0640E-03 1.2440E-01 9.8890E-02 8.0650E-02

5.8340E-02 3.5480E-02 1.5910E-02 5.3590E-02 5.5570E-02 1.7670E-02 1.7590E-01

1.6730E-01 8.1500E-02 2.9360E-02 1.9660E-01 5.2660E-01 1.1740E-01 3.6560E-02

9.4990E-02 7.7570E-02 2.0300E-02 7.2560E-01 9.6420E-01 5.0860E-01 1.5640E-01

1.3820E-01 8.3010E-02 4.1970E-02 3.9470E-03 1.2320E-02 1.0140E-02 2.6540E-03

2.1970E-01 1.0520E+00 2.3040E-01 3.6070E-02 2.1400E-01 2.3550E+00 4.1470E-01

4.6960E-02 8.2610E-02 1.2120E-01 8.3920E-02 3.3510E-02 1.3920E-02 8.4210E-03

6.5950E-03 3.1030E-03 2.6940E-02 2.3750E-02 1.5370E-02 2.5390E-03 7.5600E-02

3.9370E-01 3.4220E-02 5.3440E-03 4.4160E-02 5.6000E-02 3.4860E-02 1.4230E-02

2.0350E+00 1.4100E+01 8.0800E-01 5.6870E-03 2.3980E+00 1.8490E+01 2.9570E+00

1.1270E-01 5.3010E-01 2.5940E+01 3.4990E+00 1.5480E-01 1.6200E-02 1.4080E-02

3.1010E-03 3.6640E-02 3.1270E-02 1.5660E-02 8.0610E-03 2.0200E-01 1.2210E+00

8.5860E-02 1.1300E-02 2.1920E-02 2.3330E-02 9.6640E-03 3.5110E-03 2.5720E-02

8.2130E-02 2.4870E-02 5.7620E-03 7.9540E-04 6.5280E-03 4.5270E-03 1.7880E-03

1.1720E-02 9.8850E-03 6.0050E-03 1.8130E-03 2.0840E-02 3.8400E-02 1.4640E-02

3.4090E-03 8.9430E+00 3.4710E-01 7.6850E-01 7.7970E-01 2.8190E-01 2.4960E-02

4.1280E-02 4.7130E-02 3.3480E-02 1.4990E-02 4.7250E-02 7.3990E-02 7.1690E-02

6.2570E-02 4.8360E-02 2.6900E-02 2.3050E-02 4.4880E-02 3.3460E-02 7.4650E-02

1.2430E-01 1.1040E-01 5.3110E-02 5.5920E-02 1.7690E-01 3.7740E-01 9.2310E-02

4.7900E-02 6.8960E-02 3.7420E-02 2.4450E-01 6.0780E-01 6.3720E-01 3.9450E-01

7.3850E-02 8.2960E-02 5.3090E-02 3.1580E-03 6.5050E-03 8.8610E-03 4.7120E-03

3.1250E-02 2.3030E-01 7.7540E-01 1.8640E-01 2.2800E-02 2.3610E-01 1.8370E+00

3.3000E-01 1.9470E-02 6.9580E-02 9.0500E-02 7.7500E-02 6.6260E-03 8.2380E-03

6.3840E-03 4.3780E-03 8.9980E-03 2.1780E-02 1.3540E-02 1.0580E-02 1.0490E-02

8.3110E-02 2.8740E-01 2.6330E-02 1.3090E-02 3.4850E-02 4.0560E-02 3.0860E-02

1.2220E-01 2.5210E+00 1.0320E+01 6.0570E-01 9.1180E-02 2.9560E+00 1.3860E+01

2.2680E+00 3.6530E-03 1.5560E+00 2.0410E+01 2.6920E+00 8.1860E-03 1.2210E-02

6.3420E-03 1.8160E-02 2.3030E-02 2.2130E-02 9.8130E-03 2.4970E-02 2.3210E-01

9.0150E-01 6.5500E-02 8.4040E-03 1.6040E-02 1.5710E-02 6.5780E-03 5.2940E-03

2.4870E-02 5.9810E-02 2.0510E-02 6.3640E-04 3.5810E-03 4.2190E-03 2.4670E-03

4.8370E-03 8.3200E-03 6.4460E-03 3.9770E-03 5.0970E-03 1.8900E-02 2.6100E-02

1.1660E-02 1.3500E-01 3.8610E-01 6.0490E-01 5.3090E-01 8.2700E-03 2.3610E-02

3.3480E-02 3.2920E-02 2.1000E-02 9.6830E-03 4.1750E-02 6.1040E-02 6.1610E-02

4.7880E-02 2.5700E-02 9.6110E-03 2.4140E-02 4.2070E-02 2.7200E-02 7.4380E-02

9.8040E-02 7.1740E-02 1.7740E-02 5.5640E-02 1.4300E-01 3.1010E-01 2.3440E-02

4.5360E-02 4.6920E-02 8.8120E-02 2.3350E-01 4.9240E-01 5.9860E-01 3.3580E-02

7.4100E-02 5.0140E-02 2.3680E-03 3.4460E-03 5.7160E-03 5.8990E-03 3.0370E-03

3.6060E-02 1.8640E-01 7.1550E-01 2.6360E-03 2.5190E-02 1.8840E-01 1.6040E+00

1.0010E-03 2.1660E-02 6.2580E-02 1.0680E-01 2.1520E-03 6.8180E-03 6.6800E-03

3.4830E-03 2.2260E-03 1.0150E-02 1.7690E-02 1.1110E-02 2.4820E-03 1.1240E-02

6.5150E-02 2.2690E-01 2.2990E-03 1.4230E-02 3.0860E-02 4.2140E-02 3.7760E-03

1.5410E-01 1.9410E+00 8.0940E+00 6.6430E-04 1.1260E-01 2.2690E+00 1.2000E+01

5.0230E-04 4.3480E-03 1.1810E+00 1.7330E+01 4.1810E-03 7.4220E-03 8.4090E-03

7.7440E-03 1.7050E-02 1.7630E-02 1.2480E-02 5.9610E-03 2.6760E-02 1.8040E-01

7.0620E-01 2.2800E-03 9.1400E-03 1.3040E-02 1.0480E-02 8.2480E-04 5.7550E-03

2.0510E-02 4.9160E-02 4.7720E-04 1.8260E-03 3.2690E-03 2.6040E-03 1.6730E-03

4.9130E-03 6.6220E-03 4.3170E-03 1.0080E-03 5.6280E-03 1.5600E-02 2.4080E-02

4.1030E+00 4.1020E-01 1.6640E-01 6.5840E-02 4.3510E-02 2.5200E-02 1.3790E-02

6.1240E-03 8.1070E-02 5.3780E-02 3.5860E-02 2.4150E-02 1.5470E-02 7.6840E-03

6.1870E-02 3.2330E-02 2.1280E-02 5.4380E-01 2.9300E-01 1.0150E-01 3.4190E-02

5.8460E-01 2.1330E-01 1.6840E-01 6.0670E-02 6.1900E-01 1.0340E-01 3.4750E-02

1.1960E+00 6.5530E-01 3.4990E-01 1.7920E-01 6.9810E-01 3.8870E-01 4.8320E-02

5.2640E-02 2.0760E-01 7.1920E-02 3.9320E-02 2.4590E-01 1.0900E-01 3.3700E-02

7.1900E-03 1.7190E-01 7.2850E-02 2.5400E-02 6.3620E-03 1.5470E-01 7.0910E-02

2.5140E-02 5.5720E-03 4.1730E-02 2.2700E-02 1.2950E-02 5.8490E-03 2.2020E+00

4.2310E-01 2.7980E-02 4.8730E-03 2.0550E+00 3.3270E-01 4.9380E-02 9.9810E-03

1.4130E-01 7.3370E-02 3.2040E-02 1.0750E-02 2.7540E+00 4.0860E-01 5.0660E-02

8.6340E-03 1.8270E-01 6.7890E-02 2.4320E-02 8.3540E-03 2.0260E-01 8.5380E-02

3.6020E-02 1.3740E-02 1.2280E+01 2.2930E-01 5.6430E-03 1.6750E+01 3.0830E+00

1.2300E-01 2.4110E-03 2.4860E+01 3.3350E+00 2.7490E-01 1.4830E-02 1.2690E-01

4.6150E-02 1.2860E-02 2.5550E-03 2.6150E-02 1.5010E-02 7.3500E-03 2.8630E-03

3.3660E-02 1.0990E-01 1.7880E-02 8.4590E-03 4.6940E-02 2.5120E-02 1.0120E-02

2.6230E-03 3.1440E-02 1.2530E-02 4.8370E-03 1.3330E-03 4.8310E+00 2.3760E-01

3.6340E-02 3.0590E-02 2.6010E-02 1.6960E-02 6.8910E-03 4.1070E-02 4.0910E-02

3.5770E-02 2.5410E-02 1.4400E-02 5.9440E-03 3.4690E-02 3.5660E-02 1.6290E-02

1.9870E-01 2.8630E-01 1.1060E-01 7.0310E-02 2.7530E-01 1.9790E-01 1.5250E-01

8.4210E-02 2.0150E-01 2.9550E-01 4.9580E-02 5.6670E-01 5.5640E-01 4.1470E-01

2.4790E-01 4.6310E-01 1.3900E-01 2.4920E-01 3.9480E-02 1.0330E-01 1.1060E-01

2.4600E-02 7.4550E-02 9.1530E-02 9.1460E-02 3.9300E-02 4.1160E-02 7.6710E-02

6.0320E-02 2.9200E-02 3.8700E-02 6.4510E-02 5.9130E-02 2.9880E-02 2.2620E-02

2.1730E-02 1.2090E-02 6.0340E-03 4.2250E-01 1.0790E+00 4.6420E-01 2.7610E-02

1.0600E-01 1.3140E+00 3.6420E-01 5.5670E-02 5.5130E-02 5.5970E-02 4.9010E-02

3.2970E-02 1.0140E-01 1.7960E+00 4.6550E-01 5.9290E-02 4.0400E-02 9.1440E-02

5.5820E-02 2.4820E-02 4.7980E-02 1.0260E-01 6.6010E-02 3.6690E-02 2.9510E+00

6.2810E+00 1.6310E-01 3.0810E+00 8.2460E+00 3.4780E+00 1.5700E-01 6.4360E-01

1.5580E+01 4.0270E+00 3.6530E-01 4.6140E-02 5.0700E-02 3.2390E-02 1.2080E-02

1.1820E-02 1.0120E-02 9.2730E-03 7.1180E-03 2.5240E-02 3.7940E-02 5.6340E-02

7.0420E-03 2.5120E-02 1.6810E-02 1.3380E-02 8.4090E-03 9.6240E-03 1.4550E-02

8.4340E-03 4.8210E-03 3.2630E+00 1.7260E-02 2.2650E-02 1.6760E-02 1.3470E-02

8.6330E-03 2.1850E-02 2.6810E-02 2.1340E-02 1.7290E-02 1.3730E-02 7.9760E-03

2.1110E-02 2.0530E-02 1.5880E-02 8.9500E-02 1.4110E-01 1.6700E-01 5.9270E-02

9.3260E-02 1.2070E-01 1.3140E-01 1.0320E-01 7.3270E-02 1.6040E-01 1.2250E-01

2.5930E-01 3.4210E-01 3.2940E-01 2.5980E-01 2.0310E-01 2.2500E-01 1.3940E-01

2.6320E-02 5.8530E-02 6.2470E-02 3.8320E-02 8.2240E-03 6.6630E-02 4.8520E-02

7.4570E-02 6.2310E-03 3.2930E-02 4.8200E-02 5.0900E-02 3.7550E-03 3.3000E-02

3.9860E-02 5.1540E-02 1.2950E-02 1.2030E-02 1.1760E-02 4.9330E-03 2.7820E-02

4.6420E-01 5.1390E-01 3.2350E-01 1.8820E-02 8.9850E-02 8.4080E-01 2.7730E-01

1.5340E-02 3.5880E-02 3.8080E-02 3.9400E-02 1.6680E-02 8.7750E-02 1.1560E+00

3.5520E-01 1.0350E-02 2.9360E-02 5.7890E-02 4.4040E-02 1.4820E-02 3.0240E-02

6.9620E-02 5.4190E-02 4.0510E-01 3.3010E+00 2.5610E+00 1.2250E-01 3.4770E+00

3.9250E+00 2.4490E+00 1.0070E-02 7.1510E-01 9.9190E+00 3.0880E+00 1.2850E-02

3.2400E-02 2.9520E-02 1.9460E-02 3.9460E-03 7.0800E-03 7.4260E-03 7.3160E-03

1.6830E-02 1.5120E-02 3.1020E-02 2.1810E-02 1.0120E-02 1.3320E-02 1.2330E-02

6.6200E-03 2.9460E-03 5.8570E-03 9.8980E-03 6.1970E-03 7.2900E-03 8.0310E-03

1.0540E-02 8.4030E-03 3.9210E-03 1.1750E-02 8.2820E-03 1.0850E-02 1.1020E-02

8.3000E-03 4.2560E-03 1.0660E-02 7.6280E-03 1.0440E-02 3.2580E-02 6.7570E-02

9.7240E-02 3.9930E-02 3.0900E-02 6.7520E-02 6.9650E-02 7.2140E-02 2.6980E-02

5.1010E-02 9.6810E-02 1.0270E-01 1.4680E-01 1.8190E-01 1.6390E-01 5.4480E-02

1.9320E-01 3.6060E-02 1.3160E-02 2.9070E-02 2.0020E-02 3.0550E-02 1.1530E-03

7.7390E-03 4.6190E-02 4.3860E-02 6.5350E-04 6.0480E-03 2.3210E-02 3.9220E-02

3.3830E-05 4.0620E-03 2.3740E-02 3.6240E-02 5.8480E-03 6.0320E-03 4.9120E-03

4.0500E-03 4.8560E-03 2.7590E-02 3.2350E-01 3.0880E-01 4.1310E-03 1.5990E-02

5.9910E-02 5.3340E-01 2.7620E-03 1.3550E-02 2.3890E-02 2.4150E-02 3.3850E-03

1.4640E-02 5.8890E-02 7.3110E-01 2.6120E-03 8.0520E-03 1.9330E-02 4.0820E-02

3.2650E-03 1.2030E-02 2.0220E-02 4.8910E-02 1.7880E-02 6.2670E-01 2.4890E+00

2.3590E-03 1.5690E-01 2.4480E+00 2.3780E+00 4.8740E-03 4.3740E-03 4.9800E-01

6.3550E+00 2.5540E-03 1.2080E-02 1.9460E-02 1.3010E-02 8.6800E-04 3.2700E-03

4.5530E-03 3.9730E-03 8.4150E-03 6.4030E-03 8.0660E-03 1.9370E-02 2.6140E-03

8.4090E-03 6.7370E-03 3.6990E-03 5.0900E-04 2.7210E-03 3.6810E-03 5.4960E-03

3.9000E+00 1.1080E+00 2.7650E-01 1.1130E-01 8.8880E+00 3.7100E+00 1.0460E+00

2.0390E-01 3.4220E-02 7.4220E-03 3.7320E+00 1.1750E+00 4.0720E-02 3.3190E+00

4.9330E-01 9.0560E-02 6.4690E-03 2.4500E+00 7.3240E-01 1.1860E-01 8.9190E-03

8.9120E-01 1.5580E-01 1.2680E-02 4.9540E-02 2.2110E-02 9.3180E-03 3.5360E-03

2.2400E-02 1.4160E-02 7.4820E-03 5.2590E-02 1.2310E-01 1.3710E-02 4.0080E-03

2.2220E-01 1.7970E-01 8.3520E-02 1.9250E-02 1.5770E-01 7.7490E-02 2.3110E-02

3.6100E-03 9.4610E-02 2.4840E-02 5.1270E-03 6.6150E-04 1.1850E-01 3.7780E-02

6.5460E-03 1.0520E-04 1.1330E-01 5.8640E-02 5.1840E-02 3.3700E-02 1.7060E-01

4.1510E-02 1.0530E-02 2.4990E-03 4.6690E-02 1.5260E-02 4.0910E-03 9.0040E-04

8.8470E-02 7.9570E-02 4.6960E-02 1.5300E-02 1.9920E-01 4.4560E-02 7.2750E-03

6.9740E-04 3.6700E-02 1.5630E-02 4.5110E-03 7.6990E-04 5.2780E-02 3.8410E-02

1.0010E-02 5.8520E-02 2.6660E-02 1.4380E-02 7.5300E-03 5.1300E-02 2.4460E-02

8.5000E-03 2.2300E-03 7.4470E-02 7.6840E-02 3.8700E-02 8.9870E-03 4.8600E-02

2.7170E-02 9.4390E-03 1.9730E-03 5.4470E-02 2.4080E-02 1.1100E-02 6.6650E-03

2.0980E-02 1.0870E-02 5.6730E-03 2.7520E-03 3.3090E-02 1.6450E-02 6.2350E-03

1.4720E-03 3.5740E+00 1.5490E+00 2.1070E-01 2.7500E+00 3.1060E+00 3.2900E+00

1.5630E+00 3.7670E-01 5.2200E-02 1.8660E+00 1.3080E+00 7.8120E-01 1.0140E+00

1.6640E+00 3.4650E-01 8.7540E-02 8.5520E-01 1.0260E+00 6.3250E-01 1.2660E-01

4.2890E-01 3.3040E-01 8.8420E-02 2.3760E-02 2.1460E-02 1.3560E-02 7.6280E-03

1.7900E-02 1.2900E-02 5.5000E-03 4.2070E-02 5.4200E-02 5.1870E-02 6.6220E-03

1.7260E-01 5.6130E-02 9.2670E-02 8.2340E-02 7.0250E-02 5.4420E-02 6.0570E-02

2.4310E-02 1.8460E-02 5.2500E-02 2.3790E-02 5.4690E-03 5.2710E-02 4.3750E-02

2.6590E-02 6.9270E-03 6.9540E-02 8.7900E-02 3.9000E-02 1.0150E-02 5.1010E-02

8.6900E-02 3.2440E-02 9.7850E-03 1.5050E-02 2.1990E-02 1.2410E-02 4.0730E-03

7.8690E-02 3.6090E-02 2.9560E-02 3.9890E-02 4.4900E-02 1.0640E-01 4.2170E-02

7.9020E-03 1.4020E-02 1.4800E-02 1.2530E-02 4.7170E-03 4.4290E-02 1.7770E-02

1.8890E-02 3.2640E-02 3.0340E-02 1.7400E-02 5.2470E-03 2.6120E-02 1.9470E-02

1.6060E-02 7.7220E-03 7.6850E-02 2.5260E-02 2.7520E-02 2.9580E-02 2.6330E-02

1.5350E-02 1.8620E-02 9.4560E-03 4.3580E-02 1.6050E-02 1.3430E-02 3.9900E-03

1.2780E-02 1.0290E-02 6.7420E-03 2.3670E-03 1.7450E-02 1.2770E-02 9.7530E-03

5.8200E-03 2.0590E+00 1.2460E+00 2.2020E-01 2.8270E+00 1.3260E+00 2.0470E+00

1.5180E+00 4.1700E-01 7.6100E-01 1.1650E+00 1.0390E+00 2.8030E-01 9.0680E-01

9.2970E-01 2.0900E-01 2.1090E-01 7.3180E-01 6.0110E-01 4.3390E-01 1.8390E-01

2.9360E-01 1.5840E-01 1.1010E-02 1.5360E-02 1.4610E-02 9.7350E-03 1.3190E-02

9.3410E-03 4.2360E-03 3.1560E-02 2.2220E-02 4.2970E-02 1.9330E-02 8.2030E-02

7.9140E-02 5.4440E-02 8.7190E-02 1.9440E-02 5.2350E-02 3.6790E-02 4.8590E-02

2.2010E-03 2.0170E-02 3.5270E-02 1.7420E-02 1.8860E-02 3.6160E-02 2.6160E-02

1.6310E-02 5.6070E-02 5.6370E-02 3.3060E-02 9.4350E-03 1.4490E-02 4.4490E-02

5.3520E-02 2.2590E-02 4.0660E-03 1.2660E-02 1.4200E-02 9.2280E-03 5.0250E-02

2.7320E-02 3.4600E-02 2.6010E-02 6.9790E-03 4.7180E-02 6.7230E-02 2.9670E-02

3.6890E-03 1.1050E-02 9.9200E-03 9.8910E-03 3.0220E-02 1.7070E-02 1.3490E-02

1.9430E-02 2.2720E-02 1.4550E-02 7.5470E-03 1.0750E-02 1.6420E-02 1.2940E-02

1.1780E-02 5.2580E-02 2.2510E-02 2.8520E-02 1.5820E-02 9.6090E-03 1.6690E-02

1.0920E-02 1.5110E-02 3.2690E-02 1.1260E-02 9.8120E-03 4.0350E-03 7.7510E-03

8.1660E-03 5.1720E-03 3.0380E-03 7.6350E-03 1.0100E-02 9.1050E-03 7.5110E-03

1.3290E+00 3.4040E-02 2.4530E-01 2.1150E+00 9.6280E-01 1.0330E+00 1.1810E+00

2.0900E-01 8.5230E-01 9.1440E-01 6.8060E-02 3.2960E-01 6.9460E-01 4.5390E-01

2.8640E-02 2.9820E-01 4.7770E-01 5.0610E-01 6.6870E-02 1.9110E-01 1.6600E-01

4.5110E-03 8.7880E-03 1.1130E-02 9.3420E-03 8.8500E-03 5.7450E-03 3.0310E-03

2.1040E-02 8.6690E-03 2.3510E-02 2.4150E-02 2.4720E-02 7.0020E-02 5.8410E-02

4.8700E-02 2.5580E-03 2.5750E-02 3.3040E-02 4.3430E-02 1.4570E-04 3.3790E-03

1.9040E-02 2.7470E-02 4.8050E-03 2.0680E-02 2.3480E-02 1.6200E-02 4.4910E-02

2.3280E-02 2.1330E-02 1.3490E-02 4.1160E-03 1.5470E-02 3.5790E-02 3.4690E-02

9.1760E-04 4.7430E-03 9.6970E-03 1.1440E-02 2.2760E-02 3.1260E-02 2.5510E-02

1.2610E-02 6.2260E-04 1.0620E-02 4.0370E-02 4.9090E-02 5.4440E-04 4.8030E-03

7.6490E-03 1.0050E-02 1.7150E-02 1.7020E-02 6.2310E-03 1.1930E-02 1.2190E-02

1.1340E-02 7.3730E-03 3.5720E-03 9.9960E-03 1.1000E-02 1.0030E-02 2.6060E-02

3.0790E-02 1.8050E-02 4.5910E-03 2.3230E-03 1.0220E-02 1.0660E-02 1.1680E-02

2.1790E-02 7.5230E-03 5.3740E-03 3.8370E-03 4.6060E-03 4.8700E-03 4.0680E-03

2.5490E-03 2.5790E-03 6.6270E-03 7.3960E-03 6.2940E-03 6.5950E-03 3.4950E-02

1.7750E-01 1.2030E+00 1.0290E+00 3.3840E-01 1.6270E-02 4.4620E-01 5.2520E-01

1.1270E-02 9.9090E-02 2.6060E-01 4.0100E-01 1.6250E-03 4.7860E-02 2.7890E-01

3.2370E-01 1.8710E-02 8.8820E-02 1.0440E-01 1.5750E-03 3.9990E-03 5.4070E-03

5.5130E-03 4.4490E-03 2.6610E-03 1.6180E-03 1.0520E-02 3.0330E-03 8.8050E-03

1.6340E-02 3.1130E-03 3.5570E-02 4.7430E-02 1.4830E-02 5.3200E-05 4.3010E-03

2.5090E-02 2.2940E-02 1.8780E-05 2.0050E-04 3.4990E-03 2.1220E-02 5.9100E-04

7.8410E-03 1.4800E-02 9.2170E-03 2.5720E-02 5.9720E-03 9.4390E-03 1.0380E-02

1.0260E-03 4.6350E-03 1.2280E-02 2.6920E-02 1.9200E-04 1.1110E-03 4.2210E-03

7.8610E-03 6.5860E-03 2.3150E-02 1.1450E-02 4.9030E-03 3.5160E-05 1.0130E-03

1.0780E-02 3.8520E-02 3.4280E-05 8.5110E-04 4.6440E-03 6.0050E-03 7.3750E-03

1.0980E-02 1.7920E-03 5.9670E-03 4.4540E-03 6.5810E-03 4.3990E-03 9.4220E-04

3.9610E-03 7.1100E-03 5.3440E-03 8.8490E-03 2.3710E-02 6.4460E-03 6.3120E-04

3.3540E-04 3.2250E-03 8.4910E-03 5.3860E-03 1.0900E-02 3.8460E-03 2.1290E-03

2.3930E-03 2.2150E-03 2.0020E-03 2.4670E-03 1.3460E-03 5.7700E-04 3.1260E-03

4.3080E-03 3.4370E-03 4.1170E+00 4.5270E-01 4.4720E-02 8.0750E-03 1.4710E-03

8.9340E+00 1.9180E-01 6.2380E-02 2.3130E+00 4.8280E-01 2.3420E-02 3.5770E-03

3.3290E+00 4.8400E-01 3.4810E-02 2.1940E-03 1.8310E+00 2.4590E-02 1.5780E-02

6.0790E-02 2.5030E-02 8.6060E-03 1.9680E-03 1.6670E-02 5.3500E-03 1.9630E-03

1.4260E-02 3.2730E-02 1.5450E-02 2.9400E-03 1.6580E-01 3.7530E-02 6.8910E-03

8.3510E-04 1.6550E-01 5.6380E-02 1.1460E-02 1.1350E-03 5.1260E-01 1.5770E-01

2.8190E-02 2.4290E-03 1.4910E-01 1.9060E-02 1.1140E-03 7.0360E-05 5.4420E-02

2.5930E-02 9.6700E-03 1.5480E-03 6.7880E-02 5.7350E-02 2.5660E-02 4.4320E-03

2.7000E-01 7.6930E-02 1.9630E-02 2.7610E-03 1.3810E-01 5.8400E-02 1.5560E-02

1.8100E-03 1.1950E-01 7.8040E-02 2.5840E-02 3.6220E-03 3.8630E-01 1.0800E-01

2.2600E-02 2.3910E-03 4.3820E-02 4.2790E-02 3.6380E-02 6.8390E-02 4.6610E-02

2.0270E-02 3.4580E-03 1.9190E-01 4.7920E-02 7.7080E-03 1.3760E-03 4.3440E-02

1.5200E-02 5.8370E-03 1.2820E-03 9.2910E-02 3.8910E-02 9.8360E-03 1.4490E-03

6.4910E-02 4.5820E-02 2.0670E-02 7.0680E-04 7.4280E-02 3.0920E-02 6.7530E-03

6.5920E-04 7.3250E-02 4.6690E-02 1.3180E-02 1.4930E-03 4.9280E+00 7.3200E-01

6.7100E-02 1.1710E-02 3.6290E+00 3.8680E+00 1.0690E-01 1.0530E+00 8.9440E-01

3.8710E-01 1.7890E-02 1.7180E+00 3.3120E+00 4.2810E-01 3.2560E-02 8.6910E-01

6.8110E-01 9.5560E-03 3.2630E-02 2.4500E-02 1.4890E-02 7.1480E-03 1.0880E-02

6.9650E-03 2.3610E-03 1.1880E-02 2.3760E-02 1.1510E-02 7.3280E-03 5.7660E-02

8.1400E-02 3.0310E-02 6.3700E-03 6.8390E-02 6.8310E-02 4.5920E-02 1.0760E-02

1.8340E-01 2.3690E-01 1.3720E-01 2.6600E-02 5.9470E-02 6.5810E-02 1.4910E-02

9.4540E-04 3.4950E-02 2.2420E-02 1.1790E-02 7.3160E-03 5.8790E-02 2.2590E-02

2.5530E-02 2.2270E-02 1.0650E-01 1.2800E-01 5.5220E-02 1.7980E-02 7.5300E-02

5.0210E-02 3.7390E-02 1.4070E-02 8.2360E-02 3.4550E-02 4.8730E-02 2.3660E-02

1.3770E-01 1.8170E-01 8.7300E-02 2.1180E-02 4.3790E-02 4.3300E-02 1.5050E-02

5.3730E-02 2.8240E-02 1.8520E-02 1.5120E-02 7.9250E-02 8.3710E-02 3.7800E-02

6.6660E-03 2.4060E-02 1.9260E-02 7.4060E-03 4.0640E-03 4.6600E-02 3.5410E-02

2.8390E-02 8.9220E-03 5.4090E-02 3.2740E-02 1.2850E-02 1.0390E-02 4.4580E-02

2.5300E-02 1.8430E-02 5.5320E-03 5.1950E-02 1.9410E-02 2.8870E-02 1.1950E-02

4.3270E+00 7.8280E-01 6.2640E-02 1.2440E+00 3.5880E+00 1.2490E+00 4.1340E-01

7.9620E-01 4.7800E-01 1.9250E-01 3.7920E-01 1.9730E+00 1.7990E+00 2.4100E-01

3.7380E-01 6.8780E-01 1.8730E-01 1.6210E-02 2.0230E-02 1.6950E-02 1.0880E-02

7.0920E-03 6.3440E-03 2.9860E-03 9.5070E-03 1.5860E-02 1.0600E-02 7.6100E-03

1.7360E-02 5.3340E-02 5.0320E-02 1.9610E-02 2.2150E-02 5.5160E-02 4.7560E-02

3.0870E-02 5.0470E-02 1.6610E-01 1.6150E-01 8.9240E-02 2.0800E-02 5.1560E-02

3.2940E-02 7.6280E-03 2.0990E-02 1.7530E-02 1.5130E-02 7.6400E-03 3.8370E-02

2.0670E-02 2.0690E-02 2.3640E-02 3.8600E-02 8.6800E-02 8.1630E-02 3.9320E-02

3.5350E-02 4.5420E-02 3.5320E-02 2.6510E-02 4.2010E-02 4.0660E-02 2.9730E-02

3.9010E-02 4.2160E-02 1.2170E-01 1.1920E-01 5.9070E-02 4.3260E-02 3.0980E-02

7.5750E-03 3.6710E-02 2.1210E-02 2.1650E-02 1.2890E-02 2.8510E-02 6.4590E-02

5.0020E-02 2.2870E-02 1.3200E-02 1.4760E-02 1.1370E-02 4.4950E-03 1.9310E-02

3.1440E-02 2.4800E-02 1.9900E-02 4.3270E-02 2.0640E-02 1.2750E-02 1.1400E-02

2.3350E-02 2.4110E-02 1.6910E-02 1.0710E-02 2.7620E-02 2.4180E-02 1.6910E-02

2.1020E-02 3.2460E+00 5.9680E-01 3.4220E-01 2.0820E+00 2.1400E+00 1.3170E-01

4.9080E-01 4.6560E-01 3.0030E-01 6.1810E-02 6.6650E-01 1.6670E+00 8.5660E-01

1.4320E-01 4.6470E-01 3.2870E-01 7.2230E-03 1.3740E-02 1.5180E-02 1.2040E-02

4.3180E-03 4.8570E-03 2.9560E-03 7.1290E-03 9.6430E-03 9.8450E-03 6.0610E-03

4.3930E-03 2.3510E-02 4.3440E-02 3.4130E-02 5.1420E-03 2.9710E-02 3.8870E-02

4.3020E-02 8.2580E-03 7.8270E-02 1.2840E-01 1.3560E-01 6.1040E-03 2.7600E-02

3.4190E-02 1.6810E-02 1.1150E-02 1.4010E-02 1.3910E-02 6.8760E-03 1.9640E-02

2.2850E-02 1.8590E-02 1.6360E-02 1.2280E-02 4.3350E-02 7.0890E-02 5.8130E-02

1.3760E-02 3.2710E-02 3.0800E-02 2.9100E-02 1.6210E-02 3.6670E-02 2.5460E-02

3.5220E-02 1.0060E-02 5.6440E-02 9.8890E-02 9.1330E-02 3.8770E-02 1.7060E-02

5.4240E-03 2.1390E-02 2.0290E-02 1.8890E-02 8.7940E-03 8.6130E-03 3.5350E-02

4.4960E-02 3.5490E-02 6.8830E-03 1.0050E-02 1.0820E-02 5.1010E-03 6.3630E-03

2.0940E-02 2.0920E-02 2.3370E-02 3.2450E-02 1.1310E-02 1.3490E-02 8.7970E-03

1.0480E-02 1.9490E-02 1.5400E-02 1.0930E-02 1.1400E-02 2.3080E-02 1.4340E-02

1.8480E-02 2.1010E+00 7.9980E-02 7.7710E-01 2.1870E+00 3.2980E-02 2.2140E-01

3.8380E-01 2.8700E-01 8.2010E-03 1.3210E-01 8.0070E-01 1.2210E+00 4.8210E-02

2.3750E-01 3.3880E-01 2.7730E-03 8.0940E-03 1.1000E-02 9.7850E-03 2.4680E-03

3.2630E-03 2.4240E-03 4.7530E-03 5.2240E-03 7.8470E-03 3.9680E-03 8.9100E-04

7.5350E-03 2.4350E-02 3.7570E-02 6.3180E-04 1.0230E-02 2.7750E-02 3.9430E-02

3.8220E-05 2.1380E-02 7.7460E-02 1.3470E-01 1.3990E-03 1.0890E-02 2.4020E-02

2.0170E-02 5.0340E-03 1.0570E-02 9.4370E-03 5.5500E-03 7.4950E-03 2.0060E-02

1.6020E-02 8.0580E-03 3.0920E-03 1.7830E-02 4.2560E-02 5.9510E-02 4.0770E-03

1.8430E-02 2.5720E-02 2.3080E-02 4.2740E-03 2.2200E-02 2.7420E-02 2.1820E-02

1.5110E-03 1.8470E-02 5.8430E-02 9.3650E-02 2.9400E-02 7.0400E-03 4.4250E-03

1.0280E-02 1.8190E-02 1.2240E-02 5.5270E-03 2.2760E-03 1.3930E-02 3.1010E-02

3.5770E-02 3.2430E-03 6.4690E-03 7.2640E-03 4.9460E-03 1.5660E-03 9.7200E-03

1.7180E-02 1.9240E-02 2.1640E-02 5.2200E-03 1.1750E-02 5.4240E-03 3.8780E-03

1.2590E-02 1.3280E-02 7.7930E-03 3.4330E-03 1.4900E-02 1.6030E-02 1.0510E-02

2.2250E-02 1.4060E-01 1.3590E+00 5.9190E-03 6.5700E-02 2.1980E-01 1.7100E-01

8.9100E-04 1.7100E-02 1.7110E-01 8.8870E-01 1.3510E-02 8.7410E-02 2.1130E-01

8.1990E-04 3.6570E-03 5.6830E-03 5.4620E-03 1.1240E-03 1.5390E-03 1.3640E-03

2.3770E-03 2.2200E-03 4.3870E-03 1.7590E-03 1.2880E-04 1.7200E-03 8.7460E-03

2.4550E-02 7.4570E-06 1.5340E-03 1.3470E-02 2.2890E-02 4.1820E-06 7.6230E-05

3.3490E-02 8.3180E-02 2.2370E-04 2.9510E-03 1.1390E-02 1.3670E-02 1.7410E-03

5.8370E-03 4.4390E-03 3.1360E-03 1.8470E-03 1.1620E-02 9.6910E-03 2.6600E-03

4.2110E-04 6.1020E-03 1.7300E-02 3.7710E-02 7.5420E-04 7.4530E-03 1.5050E-02

1.2010E-02 5.0950E-04 8.7150E-03 1.9480E-02 9.1930E-03 1.5910E-05 3.6740E-03

2.2800E-02 5.9080E-02 1.5880E-02 1.8520E-03 2.6410E-03 3.7120E-03 1.1110E-02

5.5380E-03 2.7580E-03 5.7330E-04 3.4690E-03 1.5160E-02 2.2260E-02 1.2130E-03

3.2820E-03 3.3330E-03 3.1440E-03 2.2770E-04 2.7960E-03 1.0240E-02 1.0540E-02

1.0820E-02 1.8470E-03 6.8820E-03 2.4690E-03 1.0750E-03 5.8440E-03 8.0630E-03

3.7860E-03 6.2210E-04 6.3350E-03 1.1630E-02 3.8500E-03 1.2210E+00 2.5090E-01

1.0900E+00 4.1390E-01 1.2100E-01 2.2270E-02 2.3570E+00 7.8430E-01 2.0710E-01

4.9960E-02 2.6240E+00 1.4630E-01 3.0790E-02 2.2750E-02 1.4290E-02 7.5390E-03

3.1930E-03 1.5450E-02 1.2140E-02 5.4480E-03 3.1270E-02 8.7240E-02 4.7160E-02

2.6390E-02 2.0510E-01 1.1530E-01 5.3880E-02 1.7170E-02 2.0590E-01 8.4910E-02

2.7690E-02 5.7080E-03 9.2800E-04 9.8260E-04 7.0260E-04 2.9870E-04 2.0000E-02

8.1760E-03 2.9320E-03 8.4480E-04 7.9510E-02 2.3150E-02 6.0660E-03 1.8140E-03

4.0230E-02 3.6560E-02 3.2900E-02 2.5580E-02 8.6110E-02 7.8990E-02 4.8060E-02

1.7950E-02 1.3840E-01 6.0900E-02 2.7110E-02 1.2150E-02 8.3010E-02 6.0620E-02

3.3410E-02 1.1840E-02 8.7550E-03 3.7720E-03 1.3640E-03 3.7420E-04 6.4030E-02

3.0300E-02 1.1890E-02 1.2080E-01 7.0910E-02 2.6510E-02 4.7450E-03 4.2160E-02

4.5320E-02 4.7770E-02 4.0930E-02 1.4320E-02 5.9390E-03 2.2640E-03 7.4170E-04

1.2560E-02 9.5240E-03 5.8180E-03 2.7060E-03 2.9270E-02 3.1110E-02 3.3010E-02

2.0660E-02 4.2080E-02 4.9950E-02 4.1570E-02 2.3160E-02 6.6390E-02 5.5480E-02

3.5070E-02 1.7440E-02 1.0160E+00 3.3020E-01 4.4730E-01 3.0450E-01 1.3600E-01

3.2230E-01 1.1760E+00 7.8240E-01 2.5660E-01 4.5320E-01 1.5510E+00 9.7250E-02

1.1930E-02 8.7440E-03 8.1860E-03 7.0140E-03 1.3320E-02 6.3990E-03 5.1040E-03

2.3460E-02 5.5030E-02 5.0770E-02 1.4830E-02 7.7300E-02 7.6890E-02 7.4200E-02

6.5160E-02 2.4960E-02 9.6980E-02 8.2440E-02 3.8810E-02 8.8120E-04 1.8010E-04

3.5490E-04 7.6540E-04 6.7770E-03 8.5770E-03 5.8540E-03 2.5210E-03 1.5840E-02

4.0490E-02 2.1400E-02 5.2380E-03 3.5910E-02 3.3990E-02 2.1550E-02 9.9790E-03

7.4520E-02 1.5320E-02 2.9310E-02 5.4170E-02 3.8390E-02 6.9450E-02 4.9260E-02

2.2610E-02 5.0500E-02 2.3440E-02 2.9180E-02 3.8640E-02 1.2850E-03 4.1390E-03

3.5320E-03 1.7590E-03 3.6590E-02 2.8710E-02 1.4620E-02 6.6980E-02 3.0790E-02

3.8870E-02 3.0360E-02 4.6810E-02 4.9840E-02 2.7690E-02 7.8110E-03 4.9790E-03

6.4770E-03 4.2060E-03 1.7860E-03 8.1240E-03 4.3950E-03 4.8020E-03 5.6770E-03

2.1950E-02 3.4920E-02 2.0430E-02 8.2220E-03 5.3620E-02 3.3620E-02 2.0450E-02

9.8720E-03 5.2900E-02 2.3790E-02 2.6040E-02 2.8070E-02 5.9710E-02 2.3950E-01

3.0440E-01 2.0600E-01 5.1510E-02 2.2410E-01 6.3330E-01 7.7380E-01 7.4100E-02

4.0410E-01 9.2250E-01 3.7090E-03 7.7200E-03 7.2850E-03 5.1730E-03 8.4470E-03

6.2900E-03 1.7910E-03 1.5640E-02 3.8590E-02 2.2700E-02 1.9050E-02 1.1140E-02

5.2490E-02 6.7630E-02 6.4450E-02 1.2270E-03 1.7080E-02 5.5690E-02 8.8130E-02

1.4610E-04 5.7890E-04 5.0760E-04 1.8080E-04 1.9500E-03 4.5910E-03 5.6290E-03

3.7100E-03 4.0430E-03 1.0990E-02 2.2290E-02 1.7870E-02 3.2550E-02 1.6400E-02

1.0760E-02 7.8490E-03 1.2700E-02 5.0130E-02 3.8180E-02 1.4540E-02 1.4390E-02

2.3730E-02 3.9070E-02 4.1410E-02 8.1440E-03 3.4080E-02 3.1850E-02 2.0360E-02

1.5880E-04 8.5670E-04 2.4090E-03 3.6890E-03 1.9150E-02 2.0780E-02 1.3300E-02

1.2890E-02 4.8570E-02 3.4950E-02 1.5070E-02 5.2590E-02 1.8120E-02 9.4840E-03

7.9870E-03 1.6390E-03 3.2880E-03 3.9990E-03 2.7070E-03 2.1120E-03 5.2460E-03

4.7130E-03 3.0620E-03 1.4630E-02 2.9340E-02 1.0140E-02 2.9090E-03 4.5380E-02

2.2250E-02 8.5250E-03 2.2340E-03 2.0830E-02 3.2840E-02 2.2970E-02 1.0560E-02

1.9080E+00 3.8120E-01 6.0760E-02 6.8120E+00 2.5060E+00 5.6830E-01 1.0860E-01

2.0550E+00 8.5550E-01 5.3090E-02 2.9850E-01 1.9270E-01 8.2720E-02 3.2510E-02

9.5860E-02 3.7930E-02 1.3770E-02 5.8230E-02 1.1530E-01 4.3440E-02 8.1960E-03

1.7620E-01 7.7190E-02 2.9940E-02 8.0280E-03 8.0210E-02 4.1580E-02 1.7420E-02

4.4330E-03 7.9630E-02 2.9010E-02 8.2180E-03 1.5200E-03 2.6980E-01 7.9110E-02

1.6090E-02 1.8390E-03 1.9310E-01 4.9840E-02 2.0630E-02 8.8200E-03 1.9830E-01

7.0050E-02 2.1220E-02 5.1840E-03 1.0470E-01 3.7430E-02 1.1090E-02 2.7470E-03

1.9220E-01 6.8280E-02 2.2180E-02 6.6090E-03 6.7740E-02 2.7170E-02 8.4200E-03

1.7410E-03 4.1290E-02 1.8280E-02 5.7310E-03 1.1330E-03 6.2330E-02 2.7030E-02

2.2970E-03 6.9670E-02 3.2400E-02 1.5150E-02 5.2490E-03 4.7910E-02 2.0430E-02

8.0970E-03 2.6210E-03 3.6430E-02 2.1120E-02 9.6880E-03 2.8240E-03 2.0600E-02

8.7540E-03 3.0900E-03 1.0550E-03 1.6150E-02 1.0450E-02 5.2010E-03 1.6010E-03

1.4000E-02 6.8020E-03 3.2960E-03 1.3750E-03 1.5920E-02 6.5780E-03 2.1570E-03

4.6650E-04 1.5780E+00 3.8410E-01 1.8900E+00 2.6530E+00 2.3210E+00 6.4950E-01

1.1340E+00 5.0380E-01 5.8500E-01 1.3720E-01 1.1550E-01 8.4270E-02 7.2980E-02

5.1920E-02 4.2320E-02 1.7430E-02 4.3660E-02 6.0130E-02 3.9190E-02 2.5870E-02

5.2310E-02 7.8400E-02 5.4960E-02 3.3080E-02 2.8150E-02 3.1120E-02 2.8510E-02

1.9950E-02 1.0930E-02 3.9740E-02 2.8080E-02 1.0040E-02 7.8870E-02 1.1530E-01

6.3020E-02 1.7630E-02 4.9790E-02 1.0910E-01 3.4720E-02 1.0530E-02 5.1680E-02

9.0970E-02 5.5840E-02 2.2770E-02 2.1270E-02 5.0800E-02 3.3230E-02 1.2530E-02

5.0540E-02 9.0490E-02 5.3910E-02 2.2130E-02 1.7120E-02 2.9020E-02 2.2720E-02

9.8870E-03 1.0800E-02 1.6200E-02 1.5980E-02 6.8660E-03 3.5430E-02 1.5230E-02

1.8130E-02 3.2400E-02 3.2300E-02 1.7120E-02 1.0040E-02 1.6320E-02 2.1380E-02

1.3800E-02 7.7980E-03 2.1120E-02 1.3970E-02 1.0040E-02 7.4010E-03 5.8110E-03

8.9220E-03 7.2350E-03 3.1720E-03 1.2110E-02 6.4470E-03 3.8350E-03 2.6590E-03

6.8020E-03 6.5160E-03 4.0350E-03 1.7480E-03 5.2040E-03 6.4630E-03 4.7830E-03

2.3900E-03 1.0090E+00 1.7730E-01 1.8490E+00 1.2140E+00 1.7690E+00 4.2560E-01

6.3270E-01 4.2120E-01 5.0890E-02 1.0230E-01 7.3130E-02 5.6030E-02 2.6500E-02

2.9380E-02 1.7970E-02 2.9100E-02 2.5360E-02 3.5090E-02 2.2990E-02 1.3010E-02

3.3810E-02 5.3930E-02 4.5080E-02 5.8290E-03 1.8840E-02 2.2080E-02 2.5070E-02

4.3150E-04 1.0550E-02 2.4530E-02 2.3680E-02 1.6020E-02 6.2960E-02 6.4040E-02

4.0410E-02 2.0610E-02 3.4710E-02 6.1760E-02 1.8900E-02 1.1140E-02 3.9380E-02

5.5240E-02 4.1990E-02 3.1510E-03 1.8070E-02 3.0610E-02 2.6660E-02 1.2500E-02

3.7660E-02 5.4700E-02 3.9890E-02 2.3230E-03 1.4400E-02 1.7170E-02 1.8530E-02

6.0950E-04 1.0110E-02 8.8610E-03 1.3480E-02 1.3840E-02 1.9340E-02 1.2700E-02

1.5140E-02 1.7120E-02 2.1060E-02 7.9010E-03 5.1690E-03 1.0320E-02 1.4090E-02

9.9720E-03 9.6880E-03 1.0030E-02 1.0900E-02 4.4020E-03 1.1650E-03 4.7870E-03

5.1030E-03 5.7130E-03 8.0770E-03 3.3420E-03 3.3090E-03 1.9780E-03 3.2970E-03

4.0340E-03 3.4640E-03 1.9410E-03 1.1730E-03 3.7060E-03 4.0640E-03 3.6160E-03

4.3390E-02 1.4330E-01 1.2640E+00 1.0530E+00 8.7210E-02 4.7740E-01 1.7490E-01

1.6910E-02 3.5950E-02 3.8470E-02 3.7460E-02 1.1010E-02 1.4000E-02 1.1610E-02

1.4550E-02 7.8320E-03 2.1390E-02 1.2500E-02 1.2210E-03 1.3130E-02 2.3210E-02

3.5350E-02 6.7250E-05 6.4010E-03 1.3600E-02 1.5840E-02 6.8610E-05 3.9080E-04

7.4690E-03 2.1670E-02 1.8390E-03 1.7590E-02 4.0380E-02 3.1850E-02 8.8200E-03

1.0520E-02 1.8910E-02 2.9700E-02 1.8980E-03 1.0310E-02 2.6000E-02 3.5560E-02

6.3580E-04 2.6870E-03 1.2350E-02 2.3510E-02 2.9180E-03 1.0340E-02 2.4330E-02

3.4800E-02 1.9710E-04 2.3740E-03 1.0000E-02 1.3670E-02 8.2070E-05 5.6650E-04

7.1100E-03 8.7090E-03 3.1290E-03 1.4720E-02 5.0610E-03 5.2490E-03 1.0040E-02

7.9010E-03 7.4300E-03 1.1490E-03 4.3640E-03 6.3990E-03 7.8650E-03 2.8240E-03

7.4010E-03 4.4020E-03 2.8700E-03 3.5160E-04 7.7150E-04 3.1860E-03 4.0260E-03

4.0380E-03 1.3250E-03 2.0360E-03 9.5320E-04 1.3750E-03 1.7480E-03 1.9410E-03

1.3050E-03 1.3180E-04 1.1960E-03 2.4540E-03 2.4990E-03 2.6810E+00 3.9580E-01

5.1260E-02 7.5210E+00 4.1030E-01 2.0470E-01 3.0230E-01 1.4630E-01 6.2950E-02

2.7140E-02 5.2340E-02 2.3880E-02 5.4950E-03 4.9370E-03 4.4870E-02 9.3550E-03

3.1060E-03 1.1270E-01 4.1870E-02 1.3370E-02 2.5600E-03 6.8480E-02 2.8400E-02

1.1410E-02 2.5990E-03 8.1000E-02 3.4380E-02 1.1690E-02 1.9770E-03 1.4550E-01

4.8380E-02 7.4240E-03 1.0830E-03 1.4970E-01 5.1320E-02 1.1930E-02 1.9270E-03

4.4180E-02 1.8220E-02 7.2100E-03 2.2160E-03 8.2150E-02 3.1530E-02 9.1330E-03

1.8290E-03 2.1770E-01 5.9200E-02 1.5410E-02 2.1210E-03 1.0040E-01 3.0380E-02

8.1230E-03 1.6040E-03 1.7810E-01 6.3090E-02 1.7980E-02 3.4810E-03 9.4050E-02

2.6310E-02 1.4860E-02 4.6590E-02 2.3390E-02 8.6400E-03 1.8360E-03 6.3500E-02

2.2340E-02 7.0610E-03 1.7490E-03 1.6930E-02 7.0360E-03 2.2660E-03 4.4020E-04

2.2450E-02 1.0550E-02 3.9310E-03 1.0810E-03 2.7400E-02 1.9610E-02 7.0640E-03

2.9230E-03 2.1720E-02 1.0800E-02 3.9120E-03 6.5050E-04 2.4060E-02 1.2860E-02

6.4210E-03 2.3650E-03 2.6820E+00 4.4950E-01 2.6980E+00 3.6450E+00 1.6440E-01

1.2540E-01 1.7530E-01 1.0980E-01 5.0480E-02 3.4140E-02 1.8600E-02 1.2990E-02

3.9500E-03 2.1090E-02 2.0190E-02 4.5780E-03 3.5650E-02 5.3550E-02 3.2330E-02

1.4850E-02 2.2120E-02 3.4720E-02 1.9550E-02 1.2530E-02 2.4760E-02 3.7460E-02

2.7590E-02 1.3440E-02 6.0810E-02 5.2550E-02 4.1350E-02 7.1760E-03 6.3950E-02

5.9700E-02 3.7070E-02 1.1240E-02 1.8200E-02 2.0840E-02 1.1800E-02 6.7230E-03

2.6990E-02 3.6610E-02 2.6030E-02 1.0040E-02 5.9190E-02 1.1270E-01 4.6440E-02

1.7320E-02 2.4450E-02 5.2550E-02 2.6490E-02 8.9770E-03 4.5690E-02 8.8480E-02

5.5880E-02 2.0240E-02 4.9030E-02 5.0100E-02 9.4070E-03 2.6710E-02 1.7950E-02

1.2190E-02 7.4700E-03 2.2350E-02 2.9700E-02 1.6600E-02 7.0790E-03 8.3680E-03

6.7120E-03 4.2030E-03 2.0150E-03 9.3890E-03 9.1480E-03 7.6670E-03 4.0670E-03

2.1920E-02 1.1360E-02 9.1630E-03 3.1490E-03 1.2360E-02 8.1350E-03 5.5160E-03

3.6520E-03 1.2870E-02 1.1120E-02 6.9820E-03 5.5700E-03 2.0760E+00 8.6450E-01

2.6020E+00 1.4130E+00 6.0430E-02 8.6230E-02 1.2930E-01 8.1260E-02 1.9120E-02

1.8200E-02 1.1800E-02 2.9620E-03 9.7590E-03 1.5690E-02 8.9470E-03 9.5130E-03

2.6810E-02 3.7960E-02 2.8000E-02 7.3260E-03 1.3810E-02 2.7210E-02 1.8400E-02

5.3210E-03 1.9320E-02 2.7290E-02 2.5510E-02 1.6910E-02 4.9960E-02 2.6590E-02

2.7960E-02 2.1640E-02 4.6700E-02 3.6370E-02 2.4240E-02 7.2080E-03 1.1800E-02

1.4880E-02 9.2110E-03 6.1730E-03 2.2210E-02 2.4160E-02 2.1970E-02 1.5410E-02

4.6430E-02 7.7500E-02 3.7360E-02 5.3770E-03 2.0730E-02 3.6180E-02 2.2110E-02

8.8270E-03 3.9510E-02 6.1630E-02 4.8230E-02 2.8770E-02 3.5010E-02 1.7570E-02

1.2480E-02 1.4350E-02 1.4120E-02 7.1660E-03 7.0620E-03 1.6600E-02 2.0040E-02

1.3090E-02 3.4990E-03 5.1660E-03 4.7000E-03 2.6020E-03 2.9470E-03 6.7800E-03

6.3950E-03 6.6020E-03 1.6440E-02 6.6670E-03 7.1390E-03 3.9490E-03 5.7360E-03

6.5110E-03 6.6870E-03 3.3140E-03 6.4200E-03 6.9810E-03 8.6900E-03 5.2970E-03

3.0070E-01 9.3700E-01 2.0140E+00 2.6750E-02 4.9910E-02 6.8580E-02 5.9030E-02

9.0520E-03 1.5800E-02 7.7990E-03 1.9750E-03 4.5390E-03 8.2680E-03 1.0120E-02

1.2640E-03 1.0360E-02 2.2410E-02 3.4140E-02 8.2240E-04 7.9340E-03 1.2610E-02

2.3130E-02 9.8470E-05 6.1220E-03 1.6840E-02 2.8570E-02 3.3920E-03 1.9100E-02

3.7990E-02 2.0470E-02 5.4020E-03 2.2960E-02 3.4890E-02 2.2640E-02 2.2160E-03

6.7220E-03 9.2090E-03 1.0550E-02 9.6360E-04 6.5540E-03 1.8200E-02 2.4240E-02

2.1210E-03 1.7320E-02 3.7360E-02 6.0980E-02 8.4800E-04 5.7260E-03 1.6740E-02

3.2960E-02 1.0930E-03 9.4860E-03 3.2340E-02 6.2250E-02 1.7590E-02 1.5200E-02

2.1100E-02 4.2880E-03 1.1780E-02 1.0000E-02 5.9010E-03 1.7490E-03 7.0790E-03

1.3100E-02 1.5940E-02 1.0760E-03 3.4470E-03 3.7300E-03 2.3470E-03 6.6520E-04

2.9380E-03 5.5890E-03 5.8840E-03 1.0960E-02 3.7990E-03 4.2500E-03 3.7860E-03

1.7220E-03 5.7060E-03 4.6460E-03 2.7610E-03 2.3650E-03 5.5690E-03 5.2970E-03

5.0350E-03 3.3960E-01 7.7260E-02 1.0760E-01 6.2140E-02 3.4850E-02 1.8440E-02

1.2140E-01 6.8130E-02 1.7140E-02 2.2860E-02 5.0930E-02 1.8960E-02 8.5290E-03

2.8020E-02 1.9250E-02 1.1000E-02 4.8640E-03 1.2180E-02 7.0650E-03 3.6990E-03

1.3880E-03 1.8470E-03 1.4980E-03 1.0210E-03 5.5420E-04 4.9610E-02 2.5040E-02

1.0280E-02 3.0970E-03 6.6020E-02 4.1970E-02 1.7590E-02 4.2180E-03 2.0920E-02

1.6940E-02 1.2330E-02 7.9140E-03 3.5210E-02 2.4030E-02 1.3440E-02 5.6170E-03

1.1000E-01 4.4610E-02 1.6700E-02 6.4320E-03 3.1960E-02 2.2070E-02 1.3960E-02

7.9770E-03 8.9620E-03 4.2880E-03 1.7860E-03 5.6220E-04 1.3220E-01 3.0210E-02

8.8150E-03 9.4550E-02 3.7430E-02 1.3420E-02 4.2930E-03 1.0020E-01 4.9250E-02

2.4920E-02 1.2820E-02 3.1420E-02 1.7650E-02 6.8840E-03 1.5040E-03 8.8360E-03

6.9140E-03 4.5020E-03 2.4320E-03 3.6050E-02 2.4460E-02 1.3740E-02 7.8550E-03

1.2970E-02 1.0590E-02 7.0950E-03 3.4800E-03 1.4760E-02 9.4650E-03 5.5620E-03

2.9160E-03 2.2290E-01 3.8480E-02 4.6730E-02 3.8410E-02 2.5080E-02 6.6640E-02

2.8080E-02 4.2730E-02 1.5240E-02 1.8950E-02 2.5870E-02 7.4450E-03 1.2710E-02

8.3900E-03 9.7670E-03 1.1300E-02 2.7930E-03 4.5230E-03 4.6610E-03 4.0730E-03

1.0510E-03 5.5110E-04 6.8030E-04 9.9140E-04 1.7630E-02 1.7190E-02 1.5000E-02

8.8850E-03 3.4420E-02 1.3110E-02 2.1070E-02 1.7810E-02 1.4230E-02 1.0470E-02

8.2650E-03 5.9530E-03 1.5780E-02 9.9350E-03 1.2080E-02 1.4410E-02 1.2460E-02

5.1480E-02 3.8290E-02 1.6420E-02 1.4670E-02 1.2550E-02 1.2170E-02 1.1250E-02

8.5970E-04 3.7090E-03 3.5500E-03 2.2600E-03 3.0210E-02 6.6550E-02 1.7520E-02

2.0110E-02 4.1090E-02 2.7270E-02 1.0930E-02 2.3730E-02 4.7490E-02 3.5850E-02

1.8130E-02 1.3580E-02 7.2920E-03 9.7670E-03 7.4120E-03 5.2370E-03 2.8160E-03

3.2010E-03 3.8690E-03 2.4030E-02 1.3740E-02 1.3540E-02 3.4200E-03 9.7390E-03

6.0530E-03 4.4350E-03 2.5370E-03 6.5810E-03 5.9120E-03 5.2560E-03 4.0590E-03

1.3120E-02 1.8590E-02 2.2320E-02 2.0200E-02 1.7110E-02 4.2300E-02 9.6090E-03

7.6220E-03 8.5200E-03 7.4450E-03 1.0170E-02 1.3450E-03 7.4980E-03 7.3010E-03

4.9430E-03 1.7500E-04 1.6610E-03 2.7990E-03 3.2530E-03 1.3120E-04 5.9350E-04

5.7170E-04 3.4390E-04 3.1920E-03 1.0590E-02 9.9380E-03 5.6250E-03 3.2720E-03

2.2640E-02 1.3320E-02 3.8320E-03 6.4650E-03 5.9310E-03 4.3000E-03 2.6180E-03

1.2160E-03 9.5050E-03 9.2710E-03 6.0810E-03 4.1030E-03 6.1180E-03 2.1310E-02

2.7510E-02 4.0120E-03 7.5750E-03 7.6390E-03 6.0870E-03 5.6960E-05 5.0930E-04

1.7670E-03 2.8340E-03 8.8140E-03 1.7520E-02 3.0740E-02 4.9130E-03 1.1230E-02

1.9090E-02 1.4520E-02 9.6190E-03 1.0550E-02 1.9730E-02 2.2450E-02 1.0320E-03

9.1480E-03 6.2650E-03 2.4270E-03 1.0490E-03 2.8720E-03 2.3790E-03 1.2590E-03

1.2010E-02 7.8540E-03 3.4200E-03 4.0780E-03 4.5770E-03 3.8440E-03 2.1290E-03

8.1130E-04 2.0150E-03 3.3130E-03 3.2000E-03 2.3740E-03 5.9000E+00 5.3620E-01

1.7390E-01 1.4880E+00 2.1800E-01 4.0230E-02 3.5560E-02 6.4350E-02 2.2100E-02

4.8570E-03 1.1040E+00 1.3360E-01 2.0030E-02 2.8830E-03 1.8040E-01 6.1220E-02

1.6810E-02 2.4450E-03 1.8400E-01 6.6640E-02 1.5510E-02 1.7160E-03 1.4290E-01

3.2190E-02 1.2110E-02 3.7570E-03 2.6090E-01 3.7120E-02 1.1830E-02 2.7720E-03

4.0480E-01 8.2010E-02 1.8630E-02 3.8760E-03 2.9000E-01 6.3120E-02 1.4840E-02

2.4970E-03 8.3110E-01 1.1290E-01 1.3010E-02 2.2000E-03 1.1470E+00 1.6780E-01

3.0000E-02 5.1850E-03 1.6800E-01 6.5030E-02 1.9700E-02 3.3930E-03 3.0550E-02

1.0310E-02 1.5690E-03 4.4890E-02 1.4060E-02 4.1020E-03 1.2410E-03 1.2090E-01

4.0760E-02 1.7170E-02 5.0630E-03 1.2760E+01 4.9250E-01 8.9340E-02 3.5630E-02

2.9250E+01 3.6100E+00 3.6030E-01 4.7930E-02 1.4720E-01 5.7340E-02 2.7070E-02

3.2720E-03 5.2410E+00 1.9290E-01 8.1220E-03 2.9310E-03 1.6700E+01 2.0800E+00

1.0970E-01 7.2920E-03 6.7370E+00 4.9140E-01 6.3360E-01 6.4240E-01 1.2330E-01

2.8450E-02 3.6520E-02 2.4420E-02 1.2060E-02 5.7270E-02 8.0050E-01 1.4570E-01

2.2920E-02 4.3730E-02 8.1190E-02 5.4060E-02 1.9560E-02 5.0580E-02 8.6510E-02

7.6910E-02 1.8260E-02 4.3650E-02 7.7280E-02 1.9890E-02 8.5160E-03 6.1980E-02

1.5380E-01 2.3960E-02 9.8370E-03 8.0930E-02 2.3370E-01 7.1490E-02 1.9810E-02

4.0170E-02 2.0200E-01 6.3270E-02 1.6800E-02 1.1060E-01 5.2170E-01 1.2260E-01

1.4280E-02 7.9190E-02 8.3740E-01 1.7550E-01 3.3890E-02 4.9360E-02 7.8340E-02

5.4660E-02 2.2500E-02 1.7210E-02 1.0710E-02 6.0400E-03 1.7970E-02 2.0430E-02

1.0290E-02 2.8630E-03 4.0670E-02 6.4820E-02 2.5550E-02 1.6090E-02 2.0180E+00

8.2530E+00 4.4680E-01 5.3280E-02 1.4740E+00 2.0560E+01 4.2050E+00 4.1970E-01

1.1770E-01 3.7830E-02 1.6040E-02 1.6310E-02 7.8150E-01 3.3640E+00 2.0610E-01

5.0790E-03 2.0760E+00 1.0470E+01 2.4390E+00 1.3270E-01 5.0540E+00 2.4220E-01

5.0820E-01 2.9860E-01 2.1340E-02 1.8670E-02 2.2160E-02 1.3920E-02 1.0570E-02

5.1600E-02 5.9280E-01 1.1550E-01 7.9570E-03 3.7500E-02 5.6160E-02 4.7050E-02

1.6190E-03 5.2950E-02 5.6030E-02 6.5300E-02 1.7540E-02 3.2620E-02 5.0720E-02

1.1640E-02 1.8790E-02 5.2810E-02 1.0080E-01 1.4930E-02 1.8640E-02 7.0770E-02

1.5930E-01 5.5680E-02 9.4280E-03 3.4860E-02 1.6560E-01 5.2740E-02 1.2620E-02

1.2190E-01 3.5490E-01 9.3690E-02 1.8010E-02 7.0440E-02 6.4560E-01 1.4180E-01

1.0070E-02 4.0920E-02 5.4420E-02 4.8220E-02 8.3600E-03 1.0320E-02 6.7870E-03

6.7380E-03 1.3700E-02 1.2120E-02 6.3820E-03 1.7160E-02 2.5550E-02 4.7860E-02

2.0080E-02 2.5410E-01 2.2420E+00 5.2620E+00 2.9350E-01 1.2580E-01 1.6170E+00

1.4930E+01 3.2730E+00 8.8330E-02 1.9830E-02 1.9040E-02 1.3780E-02 7.6280E-02

9.2060E-01 2.1270E+00 1.4260E-01 1.0870E-01 2.4390E+00 6.9490E+00 1.8470E+00

8.2930E-02 2.6340E-01 3.5220E-01 1.4220E-02 8.3100E-03 1.6490E-02 1.1650E-02

1.3660E-03 1.1590E-02 4.1580E-02 4.5860E-01 1.8390E-04 9.1500E-03 3.1110E-02

6.3730E-02 9.5810E-05 1.8660E-03 4.1440E-02 6.7920E-02 7.1880E-03 1.5050E-02

2.3440E-02 2.8990E-02 6.0050E-03 1.8680E-02 3.9600E-02 6.0980E-02 3.8760E-03

1.9810E-02 5.5420E-02 1.2460E-01 1.1500E-03 1.0510E-02 2.8560E-02 1.4260E-01

2.1700E-03 1.4240E-02 9.3290E-02 2.7730E-01 2.5950E-03 1.9710E-02 5.7180E-02

5.0950E-01 8.3320E-04 1.1270E-02 3.4170E-02 5.6230E-02 3.2950E-03 8.2710E-03

5.4090E-03 2.4610E-03 5.9390E-03 9.7870E-03 7.4660E-03 5.0600E-03 1.6090E-02

2.0070E-02 3.2630E-02 6.8360E-02 2.7120E-01 1.6960E+00 3.3270E+00 2.6740E-02

1.2760E-01 1.2330E+00 1.1890E+01 5.8870E-02 7.7770E-03 1.9750E-02 7.6000E-03

7.1520E-03 9.6820E-02 7.0500E-01 1.3760E+00 7.0160E-03 1.3260E-01 1.8470E+00

5.5730E+00 1.9840E+00 1.6260E-01 4.6820E-01 3.9020E-01 1.8340E-01 1.5790E-02

6.1450E-02 3.0180E-02 1.3530E-02 5.4450E-03 1.5820E-02 8.7210E-03 4.2580E-03

1.6580E-03 1.8410E-02 9.5440E-03 4.3000E-03 1.4490E-03 7.6100E-02 6.7760E-02

5.5370E-02 3.1790E-02 2.1310E-01 6.7780E-02 2.1520E-02 7.7910E-03 6.7600E-02

3.6650E-02 1.7950E-02 7.6530E-03 4.6980E-02 2.4310E-02 1.2090E-02 5.4380E-03

5.6670E-02 3.0100E-02 1.3920E-02 5.3060E-03 8.1850E-02 4.0070E-02 1.7440E-02

6.3500E-03 3.9050E-02 2.2550E-02 1.1540E-02 4.9730E-03 8.0340E-01 3.5160E-01

9.8400E-03 5.3230E-01 1.4540E-01 3.0200E-02 5.9620E-03 7.8500E-02 5.7150E-02

3.2940E-02 1.4860E-02 1.0160E+01 2.5970E+00 4.9490E-01 1.0270E-01 6.1940E-01

3.0820E-01 1.5100E-01 7.6520E-02 5.0280E+00 8.1150E+00 3.4760E+00 1.0260E-01

8.9150E+00 2.1850E+00 3.1680E-01 1.8830E-02 6.2220E-02 2.6000E-02 9.9370E-03

3.5990E-03 1.6430E+00 3.1130E-01 1.8180E-01 6.5320E-02 1.4720E-01 1.0380E-02

2.5470E-02 2.3000E-02 1.4870E-02 3.3050E-03 5.9820E-03 6.0670E-03 4.9900E-03

2.2680E-03 7.2480E-03 7.4630E-03 5.4930E-03 6.4140E-02 5.5790E-02 2.6870E-02

7.4890E-03 2.4670E-02 1.0820E-01 5.9790E-02 1.5010E-02 2.0860E-02 2.5930E-02

2.3160E-02 1.6620E-02 9.3950E-03 2.0300E-02 1.7950E-02 1.1520E-02 1.6460E-02

2.0890E-02 1.9160E-02 1.4140E-02 1.3630E-02 3.2910E-02 3.0290E-02 2.0300E-02

9.5360E-03 1.4630E-02 1.4990E-02 1.2930E-02 3.5100E-01 1.1180E-01 3.1370E-01

3.1490E-02 2.6540E-01 1.4580E-01 3.4050E-02 4.4480E-02 2.2590E-02 2.6680E-02

2.8820E-02 3.6290E-01 5.2060E+00 2.7330E+00 5.2970E-01 1.1040E-01 2.8090E-01

2.4020E-01 1.3850E-01 3.3520E+00 3.4730E+00 1.2350E+00 3.0930E+00 2.1560E-01

4.5030E+00 2.3930E+00 4.7660E-01 8.4790E-03 2.7550E-02 2.1340E-02 1.0470E-02

1.5520E-01 1.5770E-02 1.4660E-01 3.1740E-02 1.8120E-03 5.7820E-03 1.2620E-02

1.6570E-02 2.1350E-04 1.9490E-03 3.5220E-03 4.4560E-03 4.4620E-05 1.2980E-03

3.7950E-03 6.0220E-03 4.4460E-02 1.5290E-02 1.0290E-02 6.6470E-03 1.0010E-02

1.0860E-02 4.3480E-02 3.9590E-02 4.2940E-03 1.1620E-02 1.4540E-02 1.2840E-02

2.3260E-03 4.9500E-03 9.6300E-03 1.2360E-02 2.1450E-03 9.6470E-03 1.2300E-02

1.0860E-02 1.6320E-03 7.9580E-03 1.7020E-02 2.1950E-02 1.0930E-03 5.4870E-03

8.9260E-03 1.0500E-02 9.8360E-03 3.1350E-01 6.4810E-02 6.3900E-03 1.8440E-02

1.1040E-01 1.0290E-01 8.0470E-03 2.5370E-02 1.9020E-02 8.6350E-03 1.2800E-01

1.7390E-01 2.0820E+00 2.0140E+00 4.0290E-02 5.2580E-02 1.2220E-01 1.6990E-01

1.6760E+00 1.0260E-01 3.0870E+00 7.0380E-01 8.5540E-03 1.5120E-01 1.8500E+00

1.7960E+00 1.9750E-03 4.5920E-03 1.2330E-02 1.5030E-02 2.2170E+00 1.4780E+00

7.3920E-01 6.2210E-02 5.1840E-02 4.1470E-02 3.1110E-02 2.6110E-04 2.2390E-04

1.8650E-04 1.4920E-04 8.7310E-04 7.6390E-04 6.5480E-04 5.4570E-04 3.6650E+00

2.7560E+00 1.8400E+00 9.2140E-01 1.0610E-01 7.9570E-02 5.3080E-02 2.6550E-02

4.5470E-03 3.6380E-03 2.7290E-03 1.8190E-03 2.0530E-02 1.7100E-02 1.3690E-02

1.0270E-02 2.0690E-02 1.6550E-02 1.2420E-02 8.2750E-03 1.5050E-02 1.2530E-02

1.0020E-02 7.5210E-03 2.3650E-04 2.0270E-04 1.6890E-04 1.3510E-04 2.9940E-02

1.9960E-02 9.9750E-03 2.7900E-02 2.0950E-02 1.3980E-02 6.9910E-03 1.8820E-02

1.5060E-02 1.1300E-02 7.5290E-03 5.4070E-02 4.0570E-02 2.7050E-02 1.3530E-02

8.9790E-03 7.4820E-03 5.9880E-03 4.4910E-03 2.8930E-02 1.5130E-02 1.0080E-02

5.0420E-03 4.3550E-02 3.2760E-02 2.1840E-02 1.0920E-02 3.2180E-03 2.5740E-03

1.9310E-03 1.2870E-03 2.6900E+00 1.2620E+00 2.8120E-02 2.0070E-02 1.1390E-02

5.1380E-03 4.9460E-02 2.2620E-02 8.4880E-03 2.3440E-03 1.0140E-03 8.3340E-04

5.5840E-04 2.9880E-04 6.5470E+00 4.2350E+00 1.6920E+00 3.4580E-01 8.0740E-02

4.6410E-02 2.0880E-02 6.7530E-03 1.0050E-01 8.0490E-02 6.7450E-02 5.0830E-02

5.7240E-02 4.3390E-02 2.8740E-02 1.6580E-02 3.6960E-02 2.2660E-02 1.2850E-02

6.5310E-03 2.5210E-02 1.1640E-02 4.6580E-03 1.4710E-03 1.4920E-02 6.6590E-03

2.6560E-03 8.5670E-04 3.1270E-02 3.1540E-02 1.9910E-02 5.8210E-02 3.4040E-02

1.6780E-02 6.3460E-03 5.9490E-02 3.1660E-02 1.5320E-02 6.4590E-03 7.4360E-02

4.6480E-02 2.1780E-02 7.1780E-03 7.0620E-03 5.2980E-03 2.9900E-03 1.2970E-03

1.9560E-02 3.3560E-02 3.3340E-02 2.1360E-02 5.8210E-02 4.2970E-02 1.9850E-02

5.5030E-03 3.7560E-02 1.5290E-02 5.7400E-03 2.0620E-03 9.9530E-01 1.2880E-02

5.7980E-03 9.1540E-03 1.1540E-02 2.8190E-03 2.0710E-02 1.9750E-02 1.1450E-02

5.8400E-04 2.8810E-04 3.6450E-04 5.6210E-04 3.4880E+00 1.0530E+00 2.1020E+00

1.9020E+00 3.5770E-02 2.4880E-02 2.5150E-02 1.6820E-02 6.7130E-02 7.0360E-02

4.3790E-02 1.8230E-02 3.1910E-02 2.0960E-02 2.1540E-02 2.2890E-02 1.5110E-02

1.4670E-02 1.3010E-02 9.7900E-03 3.1760E-03 1.0330E-02 9.3480E-03 5.7970E-03

1.1600E-03 5.9730E-03 5.6780E-03 3.4690E-03 3.1480E-02 1.7980E-02 5.6270E-03

2.6500E-02 2.1220E-02 1.8200E-02 1.1000E-02 1.7650E-02 2.2940E-02 2.0510E-02

1.4330E-02 3.7770E-02 2.1320E-02 2.3610E-02 1.7170E-02 3.1930E-03 2.1510E-03

2.4820E-03 3.0000E-03 1.3040E-02 3.3340E-02 1.9950E-02 5.5570E-03 3.7930E-02

8.8600E-03 1.9310E-02 1.8170E-02 4.7300E-03 1.6570E-02 1.2730E-02 6.0810E-03

1.1260E-03 7.5180E-03 7.6130E-03 3.2550E-03 1.2970E-04 1.6790E-03 9.4740E-03

1.6080E-02 5.9920E-05 3.3320E-04 3.2170E-04 1.7030E-04 2.0180E-01 2.4060E+00

1.3430E+00 3.2250E-01 7.2120E-03 2.1020E-02 1.5950E-02 7.0900E-03 4.6120E-02

2.0150E-02 1.7030E-02 1.6450E-02 8.1460E-03 1.6720E-02 1.4590E-02 9.1840E-03

4.4000E-03 7.7270E-03 7.9800E-03 6.2230E-03 2.6500E-04 1.9060E-03 5.0970E-03

7.0610E-03 8.0110E-05 6.8760E-04 2.7660E-03 4.6060E-03 1.9840E-02 5.6250E-03

2.0180E-03 7.4900E-03 1.4050E-02 1.1190E-02 5.6790E-03 3.5920E-03 9.8590E-03

1.2690E-02 1.1470E-02 7.7060E-03 2.2090E-02 1.4530E-02 5.5510E-03 3.9530E-04

1.8590E-03 1.9040E-03 1.2310E-03 6.5180E-03 2.1360E-02 5.5560E-03 2.5060E-03

5.0130E-03 2.4010E-02 1.1490E-02 1.5500E-03 1.1470E-03 2.5260E-03 7.4030E-03

9.0900E-03 1.7870E+00 5.9650E-02 7.4490E-03 2.9940E+00 1.1750E+00 1.2470E-01

6.6470E-03 5.2190E+00 1.3240E+00 1.8400E-01 9.7170E-03 5.5820E-02 1.2340E-02

3.1440E-03 7.4300E-04 2.5180E+00 2.8030E-01 5.3130E-03 8.0330E-04 2.3220E+00

4.7900E-01 4.6730E-02 1.9770E-03 9.2700E-01 4.2700E-01 4.6530E-02 2.0300E-03

4.3920E-01 1.2950E-01 3.4840E-02 6.9200E-03 6.8440E-01 1.8700E-01 4.6700E-02

7.8750E-03 3.1790E-01 1.9470E-01 2.1710E-02 1.6280E-03 3.9100E-02 6.7850E-03

1.7990E-04 1.9400E-01 2.2900E-02 1.7020E-03 9.3730E-05 2.0420E-01 3.9920E-02

3.4830E-03 3.8670E-04 1.8550E-01 2.7850E-02 8.5460E-03 8.5840E-04 9.3730E-02

3.3000E-02 6.8410E-03 1.1520E-03 3.0640E-02 9.8520E-03 5.9700E-03 4.3960E-04

6.9640E-02 8.0680E-03 1.8390E-03 1.5000E-04 1.1340E-01 3.2020E-02 8.2200E-03

1.5130E-03 4.0080E+00 6.9350E-02 9.1850E-01 3.7530E+00 1.3560E+00 1.4800E-01

1.0740E+00 5.1930E+00 2.3360E+00 2.1930E-01 2.0700E-02 2.7940E-02 8.7370E-03

2.5190E-03 6.9390E-01 1.3400E+00 2.9170E-01 4.8070E-03 6.1780E-01 1.2080E+00

4.9620E-01 5.5150E-02 4.2690E-01 9.8460E-01 4.6720E-01 5.5450E-02 1.5180E-01

2.2000E-01 9.9810E-02 3.4790E-02 1.8670E-01 3.7160E-01 1.6270E-01 5.1030E-02

1.6810E-01 3.2360E-01 2.2280E-01 2.5320E-02 1.9290E-02 1.4850E-02 4.2410E-03

5.4540E-02 1.0440E-01 2.1340E-02 1.8120E-03 5.2220E-02 1.0800E-01 4.2640E-02

3.8710E-03 5.7430E-02 1.0430E-01 1.5370E-02 8.5430E-03 3.2990E-02 9.0970E-02

3.1160E-02 7.4730E-03 2.5530E-02 7.8860E-03 2.0680E-03 3.5950E-03 1.9520E-02

3.9360E-02 5.4230E-03 1.8670E-03 3.8650E-02 5.6630E-02 2.5730E-02 8.5160E-03

2.0140E+00 5.2730E-02 1.0690E+00 2.7380E+00 1.0820E+00 1.0600E-02 1.3240E+00

6.2390E+00 1.8460E+00 7.3800E-03 1.6910E-02 1.7890E-02 5.7510E-03 1.3720E-01

7.2220E-01 8.0210E-01 2.0420E-01 1.0290E-01 6.3420E-01 7.7520E-01 3.8640E-01

4.6520E-02 4.6720E-01 6.6110E-01 3.7270E-01 4.7920E-02 1.2280E-01 1.5370E-01

8.1160E-02 4.6550E-02 1.6260E-01 2.7020E-01 1.3940E-01 8.3560E-03 1.9790E-01

2.0650E-01 1.7780E-01 8.1280E-03 1.4190E-02 8.3540E-03 1.2030E-02 5.4530E-02

6.4210E-02 1.4930E-02 8.2480E-03 5.5030E-02 6.9300E-02 3.2830E-02 1.9190E-02

4.7170E-02 7.1730E-02 1.0430E-02 6.8390E-03 3.1150E-02 6.6240E-02 2.5890E-02

2.0420E-02 4.7030E-03 3.2320E-03 2.9190E-03 5.3740E-03 1.7880E-02 2.6010E-02

3.7450E-03 1.1600E-02 3.1730E-02 3.9210E-02 2.0930E-02 1.6930E-03 6.1770E-02

8.3570E-01 2.8070E+00 4.8090E-04 1.2280E-02 1.0160E+00 6.0660E+00 2.4750E-03

7.5930E-03 1.3340E-02 1.2440E-02 1.5680E-02 1.7550E-01 5.7980E-01 6.2850E-01

8.9230E-03 1.2420E-01 5.1330E-01 7.7960E-01 2.0240E-03 5.5440E-02 3.7270E-01

7.3250E-01 1.1740E-02 5.0900E-02 1.0360E-01 1.3760E-01 7.8560E-03 5.1010E-02

1.3940E-01 2.6580E-01 7.6810E-04 9.4200E-03 1.5360E-01 2.8020E-01 2.4930E-03

1.0250E-02 1.0270E-02 1.7390E-03 1.4970E-02 4.3870E-02 4.8700E-02 9.3270E-04

9.7850E-03 4.4100E-02 6.9250E-02 5.1720E-03 2.1180E-02 3.8020E-02 4.7020E-02

1.1520E-03 7.4720E-03 2.5880E-02 6.3050E-02 1.5320E-02 2.0770E-03 4.8620E-03

1.1100E-03 1.1810E-03 6.1970E-03 1.4380E-02 1.7970E-02 2.6660E-03 1.2490E-02

2.6760E-02 3.5640E-02 2.7550E+00 2.4430E-01 7.0850E-03 5.6000E+00 1.0210E+00

1.6480E-01 8.1950E-03 3.5260E-02 8.4460E-03 2.7110E-03 5.2070E-05 5.8780E-02

1.9260E-02 2.3040E-04 6.6360E-06 1.7420E-01 3.2910E-02 2.5870E-03 7.3640E-05

1.0280E+00 3.5300E-01 2.2630E-02 2.1150E-04 1.2760E+00 1.7700E-01 2.9950E-02

3.3780E-03 3.3760E-01 2.5580E-01 2.9940E-02 3.8210E-03 1.0860E+00 4.5210E-01

5.9720E-02 3.5350E-03 1.1820E-02 6.5930E-04 2.5100E-05 6.3360E-02 1.2590E-02

3.5630E-03 3.3930E-05 2.2040E-01 1.3730E-02 1.6510E-03 1.9670E-04 3.4930E-02

1.0370E-02 2.8860E-04 4.1440E-05 2.1340E-01 4.2240E-02 4.6910E-03 2.8020E-04

2.4240E-04 2.4800E-02 3.5990E-03 2.1390E-05 3.4530E-02 1.1200E-02 3.7120E-03

1.9430E-05 3.6120E-01 3.3060E-02 3.4670E-03 5.5000E-05 4.8770E+00 2.8610E-01

7.9410E-01 5.3100E+00 2.2270E+00 2.9390E-01 1.4940E-02 1.8020E-02 3.9900E-03

2.9490E-03 2.9320E-02 1.7970E-02 1.9570E-02 2.4760E-04 5.0200E-02 9.1310E-02

3.4450E-02 3.0060E-03 4.3140E-01 1.1680E+00 4.0830E-01 2.6790E-02 3.1130E-01

7.6940E-01 1.5910E-01 3.2050E-02 3.0180E-01 6.3040E-01 2.7150E-01 3.2960E-02

2.8430E-01 1.2490E+00 4.8770E-01 6.8780E-02 5.3040E-03 5.0590E-03 3.9860E-04

2.4600E-02 3.2920E-02 6.6290E-03 3.9240E-03 3.7920E-02 1.4910E-01 1.3580E-02

1.7810E-03 1.6500E-02 1.2040E-02 1.0320E-02 2.6310E-04 5.1430E-02 1.1970E-01

4.4930E-02 5.3820E-03 2.0780E-04 1.2610E-02 9.5380E-03 2.2180E-03 1.7080E-02

1.6210E-02 4.9480E-03 4.1060E-03 7.2050E-02 2.3100E-01 3.2930E-02 4.0500E-03

3.8180E+00 1.1760E-01 1.8670E+00 6.8500E+00 2.7900E+00 6.4110E-03 1.0280E-02

1.3560E-02 2.9450E-03 8.9300E-03 2.5540E-02 7.6100E-03 1.3810E-02 9.7530E-03

5.1600E-02 6.0770E-02 2.6880E-02 4.9540E-02 4.9270E-01 8.4450E-01 3.2110E-01

7.0720E-02 3.0690E-01 5.5410E-01 1.2890E-01 4.9560E-02 3.1780E-01 4.4120E-01

2.1900E-01 5.9490E-02 4.8390E-01 9.4080E-01 4.0200E-01 1.9900E-03 4.7180E-03

2.2230E-03 9.5250E-03 1.8620E-02 2.3740E-02 4.8770E-03 5.7660E-03 4.2400E-02

1.0980E-01 1.0710E-02 5.0730E-03 1.4470E-02 5.7490E-03 7.2680E-03 7.9820E-03

5.5480E-02 8.6590E-02 3.6320E-02 1.7320E-04 5.5140E-03 9.5540E-03 5.2360E-03

8.1930E-03 1.0060E-02 1.3360E-02 3.6920E-03 1.2100E-02 7.7720E-02 1.6730E-01

2.6100E-02 1.0510E-03 1.3650E-01 2.3670E+00 7.7540E+00 1.8130E-03 7.1630E-03

8.9800E-03 8.6770E-03 1.4220E-03 1.1070E-02 2.1730E-02 1.0510E-02 1.0160E-03

1.1680E-02 4.2730E-02 6.3470E-02 2.3500E-03 5.9300E-02 3.9810E-01 9.1270E-01

1.2130E-02 8.0860E-02 2.5600E-01 5.0230E-01 6.3950E-03 5.6320E-02 2.6210E-01

5.0190E-01 3.5350E-03 6.8600E-02 4.0000E-01 1.0420E+00 5.6710E-04 2.7070E-03

3.9030E-03 2.4610E-03 1.0880E-02 1.5990E-02 1.6120E-02 7.4960E-04 6.7900E-03

3.3920E-02 9.2940E-02 9.0350E-04 6.1900E-03 1.2250E-02 6.7500E-03 6.7940E-04

9.2860E-03 4.4930E-02 9.3310E-02 1.3850E-04 1.7450E-03 7.0890E-03 7.4090E-03

2.3480E-03 9.1220E-03 9.0660E-03 7.7040E-03 1.2100E-03 1.4530E-02 6.3280E-02

1.4800E-01 1.0830E+00 3.7170E-02 1.0390E-03 1.6820E-01 2.8960E-02 1.0660E-04

1.6670E-05 1.3200E-02 9.1640E-04 2.4380E-05 1.6550E-06 2.9360E-02 7.5290E-03

4.7800E-04 9.8260E-06 1.8810E+00 1.8920E-01 2.7470E-03 3.1320E-05 1.0520E-01

2.3580E-02 3.2630E-03 3.6430E-05 3.4490E-01 1.0380E-01 1.0190E-02 8.1100E-04

1.0540E+00 2.2030E-01 5.6510E-02 3.7770E-03 4.8740E-04 1.5700E-04 2.3920E-05

1.5740E-02 2.4040E-03 1.8760E-04 3.4300E-05 8.7290E-02 1.4170E-02 2.2990E-03

1.6020E-04 3.3560E-02 6.4210E-03 2.5650E-04 4.9120E-05 4.4690E-01 5.7850E-02

6.1430E-03 2.0730E-04 1.1580E-03 6.9420E-04 3.8080E-04 8.3570E-05 3.1750E-02

3.5280E-03 1.2110E-04 1.7610E-06 3.5080E-02 9.8430E-03 1.3210E-03 3.1900E-05

2.2560E+00 6.9790E-02 6.6280E-02 7.6980E-02 2.9590E-02 9.4720E-05 4.0920E-03

7.2940E-03 8.9620E-04 2.4500E-05 1.1140E-02 1.3070E-02 7.9530E-03 5.4910E-04

3.1700E-01 1.8990E+00 2.3140E-01 3.1520E-03 3.6850E-02 5.3390E-02 2.1460E-02

3.7740E-03 1.0190E-01 4.4610E-01 1.1280E-01 1.1420E-02 2.6130E-01 1.3590E+00

3.9820E-01 6.3730E-02 3.1990E-04 1.8770E-04 8.7280E-05 5.9510E-03 7.7380E-03

2.1790E-03 1.5980E-04 2.5640E-02 5.0360E-02 1.2400E-02 2.5420E-03 1.3840E-02

1.4960E-02 6.1890E-03 2.1620E-04 1.1260E-01 4.8500E-01 5.9870E-02 7.0880E-03

1.0140E-03 5.5340E-04 2.5720E-04 2.0290E-04 1.1150E-02 1.6520E-02 3.3940E-03

1.3020E-04 1.4080E-02 1.5820E-02 9.0520E-03 1.5170E-03 2.5830E+00 1.9060E-02

6.2980E-02 4.5190E-02 2.0980E-02 9.8330E-04 4.2860E-03 4.6610E-03 6.3680E-04

2.5700E-03 1.1070E-02 8.1780E-03 6.2140E-03 4.0470E-02 6.1920E-01 2.3700E+00

1.7760E-01 9.9030E-03 3.3970E-02 3.7390E-02 1.7770E-02 2.5160E-02 1.6870E-01

3.3890E-01 9.0490E-02 7.6130E-02 4.6710E-01 1.0640E+00 3.3470E-01 1.8760E-04

1.9420E-04 1.2120E-04 1.8090E-03 5.5800E-03 4.8020E-03 1.5400E-03 6.6540E-03

2.4440E-02 3.6650E-02 1.0260E-02 4.2760E-03 1.2720E-02 8.8290E-03 4.3770E-03

1.5600E-02 1.2570E-01 3.7950E-01 4.9480E-02 8.6890E-04 3.9190E-04 2.7730E-04

1.9950E-04 2.9300E-03 1.1070E-02 1.0390E-02 2.4170E-03 4.0000E-03 1.2700E-02

1.0640E-02 7.4110E-03 3.1260E-03 2.3640E-02 5.3560E-02 4.3210E-02 1.4620E-04

1.2270E-03 3.5490E-03 3.8920E-03 3.1030E-04 3.0450E-03 9.4250E-03 1.0580E-02

1.8740E-03 4.9240E-02 4.8910E-01 2.1470E+00 1.4050E-03 1.1570E-02 2.9850E-02

3.9660E-02 2.6730E-03 2.9060E-02 1.3990E-01 3.4950E-01 6.7950E-03 8.6340E-02

3.9600E-01 1.1330E+00 9.6730E-05 1.9360E-04 1.3370E-04 3.9700E-04 2.1550E-03

4.7160E-03 4.2050E-03 1.1060E-03 7.6630E-03 2.1000E-02 3.5180E-02 8.5290E-04

5.1660E-03 1.0850E-02 8.3870E-03 1.2940E-03 1.8190E-02 1.0260E-01 3.5460E-01

7.2410E-04 2.4280E-04 3.3960E-04 1.4150E-04 4.8370E-04 3.6330E-03 9.3040E-03

8.9220E-03 5.9770E-04 4.6520E-03 1.1200E-02 1.2490E-02 3.6080E+00 5.4060E-01

3.5020E-02 1.2750E-01 5.2900E-02 3.2850E-02 1.6580E-02 8.5120E-02 5.7490E-02

3.2020E-02 1.7090E-02 7.8590E-02 3.6550E-02 1.3350E-02 3.3100E-03 4.6250E-02

2.6350E-02 1.1490E-02 3.3190E-03 4.3930E-02 2.4460E-02 1.1430E-02 3.7820E-03

8.3980E-02 3.1780E-02 8.6260E-03 1.3710E-03 9.0890E-02 5.8630E-02 9.8830E-03

3.1250E-02 1.8200E-02 8.8420E-03 3.4200E-03 8.5970E-02 3.9500E-02 1.2700E-02

3.6140E-03 6.0030E-02 3.0860E-02 1.3530E-02 5.9960E-03 4.9610E-02 1.6920E-02

6.1210E-03 2.8680E-03 9.6760E-02 1.0240E-01 6.7430E-02 4.1300E-03 5.3110E-02

2.6960E-02 9.4120E-03 2.7560E-03 3.7750E-02 1.7090E-02 5.5160E-03 1.0930E-03

3.2190E+00 6.4420E-01 5.2900E-02 8.0270E-02 2.9770E-02 1.2020E-02 5.2180E-02

3.4260E-02 3.5980E-02 2.1760E-02 2.6030E-02 3.0820E-02 2.7180E-02 1.5040E-02

2.3520E-02 1.5650E-02 1.5010E-02 1.1600E-02 1.9520E-02 1.4830E-02 1.4770E-02

1.1820E-02 1.5640E-02 3.7940E-02 3.0040E-02 1.0710E-02 6.6480E-02 1.7410E-02

3.5510E-02 1.8190E-02 1.2940E-02 1.0030E-02 5.1890E-03 3.2390E-02 3.0280E-02

3.0980E-02 1.2910E-02 3.0840E-02 2.4380E-02 2.0670E-02 7.0150E-03 9.2800E-03

2.6660E-02 1.5210E-02 5.5350E-03 7.2560E-02 7.6110E-02 8.0290E-03 4.6240E-02

2.6960E-02 1.7370E-02 1.7660E-02 7.1840E-03 1.4050E-02 1.2790E-02 1.2690E-02

6.2250E-03 2.1460E+00 3.2850E-02 2.9770E-02 4.1270E-02 1.1270E-02 2.3830E-02

3.3010E-02 1.7490E-02 2.1770E-02 4.9670E-03 1.9170E-02 1.9440E-02 2.2330E-02

7.5070E-03 1.3240E-02 1.1980E-02 1.0900E-02 5.7210E-03 1.1830E-02 1.1020E-02

1.1990E-02 3.8600E-04 1.5640E-02 2.1770E-02 2.5090E-02 3.2010E-02 3.0080E-02

1.7670E-02 8.8380E-03 1.0020E-02 7.2960E-03 4.6300E-03 6.5480E-03 2.6360E-02

1.4940E-02 2.2990E-02 1.3520E-02 2.0680E-02 1.0490E-02 1.0620E-02 2.9920E-03

6.8920E-03 1.6650E-02 1.1270E-02 4.8370E-02 3.2120E-02 3.4040E-02 2.0810E-02

9.4110E-03 1.7670E-02 9.0610E-03 9.9310E-03 2.8330E-03 1.0700E-02 7.5470E-03

9.4540E-03 1.6580E-02 1.2020E-02 1.1270E-02 1.7210E-02 9.9970E-03 1.2590E-02

1.7530E-02 7.7070E-03 4.8190E-04 4.9890E-03 1.3250E-02 1.4240E-02 1.2420E-03

7.2190E-03 8.2350E-03 5.2720E-03 8.9910E-04 5.2650E-03 7.8860E-03 6.2040E-03

3.5340E-05 3.8170E-04 1.1030E-02 2.0000E-02 9.8150E-03 2.6650E-02 3.1360E-03

3.4200E-03 5.1860E-03 4.6280E-03 2.1710E-03 1.6080E-03 5.2860E-03 1.7350E-02

1.1180E-02 5.9970E-03 7.0080E-03 1.0620E-02 4.1090E-03 1.1180E-03 1.3870E-03

4.0130E-03 1.1360E-02 2.4190E-02 6.8120E-03 3.5380E-02 1.2570E-03 2.7560E-03

7.1840E-03 9.9310E-03 3.1670E-03 2.8300E-04 2.9460E-03 7.1260E-03 4.9020E-03

1.2950E+00 7.2510E-02 7.3880E-03 4.5070E+00 1.5050E+00 3.1870E-01 3.4910E-02

8.9290E+00 2.0240E+00 3.3070E-01 3.1510E-02 1.3730E-01 5.3020E-02 2.0700E-02

5.4710E-03 1.6580E-01 5.7930E-02 1.7990E-02 4.1560E-03 3.9840E-02 1.7800E-02

8.0630E-03 2.3050E-03 3.2910E-01 1.2870E-01 2.2500E-02 6.3730E-01 2.9170E-01

8.3220E-02 1.2810E-02 4.7440E-01 1.4700E-01 3.1720E-02 5.4340E-03 1.5030E-01

7.2190E-02 2.2920E-02 6.9580E-03 3.5100E-02 1.5970E-02 6.3820E-03 2.3600E-03

1.8830E-02 1.8790E-02 1.3970E-02 7.8910E-03 5.8690E-02 3.4750E-02 1.7230E-02

6.2470E-03 6.4220E-02 3.3900E-02 1.4310E-02 5.2800E-03 1.4320E+00 8.1370E-02

1.0840E+00 1.9100E+00 1.3880E+00 3.9940E-01 4.9330E-01 5.2900E+00 2.2590E+00

4.3230E-01 4.0850E-02 6.5780E-02 3.3720E-02 2.1590E-02 2.6080E-02 1.0390E-01

6.1500E-02 2.1340E-02 1.0310E-02 2.0410E-02 1.1010E-02 8.9830E-03 1.7540E-01

1.0660E-01 7.7670E-02 2.9060E-01 2.0150E-01 1.9160E-01 8.5050E-02 1.0080E-01

2.1840E-01 1.3820E-01 3.7030E-02 7.2170E-02 4.8340E-02 5.1670E-02 1.7040E-02

1.1760E-02 1.5430E-02 1.2600E-02 6.5450E-03 1.4130E-02 1.5130E-02 1.0280E-02

4.6700E-03 3.4750E-02 2.4350E-02 1.7700E-02 1.0840E-02 2.9050E-02 2.3960E-02

2.2470E-02 1.2970E-02 1.0020E+00 9.0860E-02 1.0330E+00 9.9400E-01 1.0730E+00

3.0390E-03 5.2180E-01 3.3240E+00 1.7990E+00 1.3300E-02 2.2150E-02 4.7170E-02

2.4930E-02 5.4150E-03 2.1410E-02 7.8700E-02 3.4940E-02 3.7320E-03 3.9300E-03

1.6380E-02 9.7920E-03 7.3940E-02 1.0060E-01 6.5710E-02 8.2930E-02 1.9100E-01

1.2550E-01 1.1300E-01 1.0220E-02 9.6300E-02 1.1680E-01 1.0570E-01 2.2920E-02

5.1660E-02 2.0430E-02 3.0360E-02 2.8440E-03 7.8540E-03 9.9300E-03 1.0060E-02

9.4170E-03 1.1320E-02 6.4740E-03 2.8870E-03 1.7230E-02 1.7700E-02 1.5700E-02

7.7150E-03 9.2420E-03 1.9340E-02 1.4170E-02 1.5830E-02 2.5970E-03 1.0470E-01

7.1530E-01 7.7350E-01 2.7930E-04 3.0880E-03 3.6590E-01 2.4520E+00 1.8310E-03

1.3030E-02 1.4130E-02 2.5130E-02 4.2650E-04 5.3770E-03 1.4850E-02 3.9530E-02

9.8950E-06 4.1390E-03 3.0010E-03 9.6770E-03 2.2100E-02 6.3780E-02 3.3720E-02

1.2810E-02 8.4840E-02 1.1290E-01 4.5670E-02 1.8060E-03 9.3580E-03 6.6050E-02

8.7700E-02 6.9580E-03 1.7030E-02 3.0360E-02 8.1920E-03 6.4720E-04 2.3600E-03

5.2040E-03 6.9010E-03 4.7090E-03 5.8340E-03 2.9600E-03 1.3990E-03 6.2470E-03

1.0800E-02 7.7150E-03 4.3910E-03 2.6370E-03 6.9510E-03 1.1850E-02 7.8600E-03

3.2840E+00 2.9940E-01 1.6660E-02 8.0960E+00 2.1160E+00 3.2640E-01 2.2860E-02

4.8360E-01 1.5280E-01 3.1820E-02 5.4650E-03 7.7540E-01 2.5050E-01 5.4950E-02

6.9910E-03 4.1330E-01 1.1730E-01 1.8650E-02 1.4750E-03 4.0880E-01 2.0670E-02

3.2470E-03 6.1580E-01 1.2520E-01 1.4650E-02 8.1270E-04 7.4120E-01 2.5140E-01

5.8060E-02 6.2440E-03 1.3760E-01 4.7030E-02 9.4210E-03 3.0450E-03 8.2480E-02

3.4740E-02 1.3100E-02 3.6850E-03 2.6880E-02 5.9080E-02 1.1800E-02 7.5750E-03

6.1780E-02 2.8000E-02 1.1230E-02 2.4140E-03 9.0350E-02 3.2600E-02 7.6640E-03

1.2810E-03 3.6020E+00 3.6480E-01 1.6300E+00 4.2170E+00 2.2260E+00 3.9950E-01

1.5200E-01 2.1560E-01 1.3790E-01 3.4520E-02 2.0050E-01 3.8000E-01 2.4240E-01

6.4880E-02 7.4460E-02 2.2190E-01 1.2820E-01 2.2680E-02 1.4560E-01 1.8840E-01

1.2030E-02 1.8490E-01 2.9280E-01 1.1130E-01 1.6220E-02 2.5010E-01 3.2190E-01

2.0680E-01 6.7990E-02 5.8530E-02 5.1270E-02 4.0570E-02 6.5190E-03 3.0300E-02

3.8430E-02 2.5370E-02 1.3370E-02 2.1510E-02 2.7430E-02 3.1540E-02 3.8270E-03

3.2830E-02 2.6590E-02 1.3930E-02 9.6430E-03 3.3120E-02 3.5970E-02 2.7550E-02

8.3760E-03 2.7620E+00 1.3130E-01 1.7420E+00 2.6910E+00 1.7930E+00 3.1710E-02

1.3730E-01 1.2920E-01 1.0790E-01 2.9460E-02 1.9360E-01 2.4860E-01 2.0310E-01

1.8520E-03 8.4950E-02 1.4460E-01 1.0420E-01 4.1840E-02 1.3920E-01 7.8490E-02

4.1320E-02 1.6750E-01 1.6780E-01 7.6420E-02 5.7890E-02 2.0600E-01 2.0500E-01

1.6610E-01 1.8380E-02 4.8860E-02 2.4400E-02 2.6510E-02 9.8290E-03 2.1580E-02

2.7480E-02 2.1710E-02 1.6130E-02 1.4570E-02 2.1690E-02 1.0860E-02 1.5990E-02

1.7540E-02 2.0770E-02 7.9600E-03 7.6610E-03 2.7540E-02 2.1400E-02 2.1760E-02

2.2680E-03 1.5810E-01 1.3490E+00 2.7310E+00 5.4650E-03 3.4430E-02 1.0760E-01

1.2280E-01 2.4670E-03 3.4840E-02 1.5650E-01 2.5970E-01 9.4650E-05 2.1140E-03

6.4630E-02 1.5720E-01 9.4580E-03 5.5460E-02 1.0810E-01 5.5570E-03 5.0230E-02

1.2870E-01 1.1820E-01 6.2450E-03 6.7870E-02 1.6560E-01 1.8410E-01 5.9610E-03

1.7760E-02 3.5920E-02 1.8840E-02 2.2740E-03 9.7280E-03 1.7780E-02 2.3970E-02

1.0750E-02 8.8470E-03 8.2180E-03 1.4350E-02 5.5450E-03 1.4840E-02 1.2090E-02

9.0800E-03 1.2810E-03 8.3740E-03 2.1760E-02 2.0840E-02 3.0680E+00 1.1780E-01

4.8810E-03 5.0240E-01 1.2080E-01 2.5490E-02 5.3200E-03 3.3820E-01 8.8700E-02

1.3240E-02 6.0500E-04 2.5730E-01 7.9450E-02 1.9480E-02 2.5670E-03 2.1900E-02

8.6860E-03 1.1130E-03 7.3220E-01 5.6980E-02 1.0850E-02 1.9790E-03 4.9740E-01

1.0210E-01 1.1690E-02 1.3760E-03 6.6960E-02 1.7090E-02 2.6130E-03 8.1710E-04

2.4690E-01 5.9040E-02 9.7230E-03 1.8510E-03 5.1110E-02 3.1070E-02 1.5970E-02

3.4820E-03 8.7180E-02 2.0610E-02 6.6930E-03 5.5420E-04 1.5690E-01 4.5940E-02

1.1370E-02 1.4310E-03 3.7820E+00 1.4090E-01 1.5000E-01 2.6350E-01 1.0630E-01

2.5940E-02 8.8440E-02 1.7250E-01 9.1550E-02 1.5740E-02 6.9260E-02 1.3620E-01

7.2300E-02 2.2040E-02 1.4110E-02 7.0950E-03 5.0400E-03 1.8180E-01 4.3180E-01

4.5740E-02 9.5630E-03 1.3170E-01 2.6200E-01 1.0410E-01 1.2930E-02 2.6880E-02

2.9110E-02 1.5120E-02 1.8110E-03 5.8910E-02 1.3890E-01 6.0100E-02 1.0410E-02

4.2600E-02 2.2630E-02 1.0840E-02 8.6350E-03 3.3980E-02 4.5020E-02 1.0470E-02

6.8600E-03 5.4740E-02 7.6660E-02 3.5890E-02 1.2450E-02 2.8970E+00 3.9200E-02

1.3510E-01 1.7820E-01 8.4340E-02 1.3210E-02 9.1260E-02 1.1660E-01 7.5140E-02

1.4450E-02 6.2500E-02 9.9340E-02 6.3290E-02 7.8830E-03 7.7230E-03 5.3860E-03

4.1080E-02 1.8500E-01 2.7800E-01 3.1130E-02 2.3400E-02 1.3380E-01 1.7050E-01

8.0330E-02 8.5760E-03 2.3390E-02 1.6160E-02 1.0210E-02 9.7090E-03 6.0010E-02

1.0160E-01 4.8600E-02 3.4080E-02 1.4320E-02 1.1450E-02 7.9080E-03 1.3640E-02

2.3290E-02 3.2770E-02 7.1260E-03 1.6450E-02 4.3970E-02 5.3730E-02 2.9740E-02

8.9560E-03 4.2220E-02 1.1120E-01 1.6530E-01 6.0440E-04 1.5720E-02 7.4970E-02

1.3080E-01 1.4010E-03 1.6240E-02 5.3920E-02 1.0820E-01 3.5550E-03 7.9840E-03

4.2050E-03 8.9510E-03 4.7750E-02 1.4700E-01 1.9800E-01 3.0570E-03 2.7530E-02

1.0820E-01 1.6750E-01 2.5720E-03 9.1580E-03 1.8600E-02 1.3420E-02 1.8490E-03

1.0400E-02 4.8550E-02 1.0630E-01 2.5560E-02 7.7620E-03 1.2270E-02 5.2360E-03

3.8430E-03 1.4720E-02 1.9040E-02 1.9980E-02 2.9800E-03 1.8410E-02 3.7720E-02

4.8790E-02 1.9440E+00 6.7400E-02 3.6510E-03 5.9820E+00 1.4820E+00 2.0450E-01

1.2560E-02 1.1710E+01 2.1140E+00 2.4970E-01 1.4680E-02 4.5720E-01 5.7000E-02

1.9610E-02 5.7260E-01 1.8610E-01 3.0880E-02 8.1240E-03 6.2910E-01 1.4480E-01

2.3390E-02 3.2570E-03 1.8230E-01 5.7170E-02 8.1570E-03 2.3010E-03 7.7000E-02

2.4310E-02 6.8030E-03 1.3980E-03 2.1310E-02 2.7840E-02 1.0270E-02 4.6290E-03

4.5120E-02 2.1300E-02 7.0490E-03 1.1610E-03 9.5050E-02 2.7800E-02 7.4140E-03

1.3730E-03 2.3610E+00 8.2220E-02 1.1190E+00 3.1820E+00 1.6050E+00 2.5140E-01

8.3320E-01 7.6790E+00 2.4850E+00 3.0840E-01 1.8770E-01 2.1420E-01 2.7450E-02

2.3430E-01 2.1720E-01 1.6350E-01 2.3680E-02 1.4460E-01 3.2510E-01 1.4140E-01

2.6080E-02 7.3400E-02 6.8750E-02 5.1930E-02 6.2540E-03 1.8100E-02 4.2920E-02

2.1510E-02 7.4930E-03 1.7040E-02 1.6310E-02 1.3620E-02 4.2780E-03 2.4630E-02

1.6610E-02 1.1840E-02 6.5920E-03 2.7780E-02 4.7390E-02 2.2110E-02 7.9440E-03

1.7780E+00 6.8620E-02 1.2370E+00 2.0220E+00 1.2820E+00 5.7110E-03 9.8480E-01

5.5170E+00 1.9750E+00 7.3340E-02 1.5870E-01 8.8570E-02 6.6970E-02 1.9880E-01

1.0310E-01 1.0890E-01 2.3380E-02 1.4140E-01 2.0380E-01 1.0960E-01 2.0190E-02

6.3490E-02 3.1530E-02 3.4780E-02 4.2170E-03 1.6180E-02 2.9590E-02 1.8120E-02

1.2780E-02 9.9000E-03 1.0290E-02 5.5060E-03 1.0740E-02 1.3950E-02 1.2770E-02

7.3000E-03 7.4140E-03 2.2110E-02 3.1670E-02 1.7560E-02 1.0020E-03 8.2840E-02

9.4860E-01 2.0480E+00 4.9280E-04 6.3320E-03 7.4240E-01 4.9230E+00 2.9730E-02

7.0330E-02 1.1320E-01 1.7990E-02 6.9700E-02 1.4880E-01 8.2860E-02 3.2570E-03

2.6070E-02 1.0950E-01 1.8140E-01 5.0230E-03 2.0730E-02 4.7660E-02 2.6420E-02

7.5190E-04 4.6390E-03 1.3830E-02 2.7120E-02 8.5230E-03 5.8040E-03 5.7910E-03

5.4340E-03 3.1160E-03 1.0840E-02 1.0090E-02 5.7730E-03 1.3730E-03 7.9440E-03

1.7560E-02 2.5770E-02 3.7730E+00 2.5630E-01 1.1720E-02 6.9140E+00 1.6940E+00

3.1610E-01 1.4140E-02 7.9130E-02 4.4940E-02 1.2470E-02 2.6240E-01 1.8370E-02

4.1960E-03 7.0610E-04 7.2940E-01 1.7100E-01 3.7040E-02 7.9330E-03 1.0880E-01

1.5040E-02 4.0480E-03 7.8170E-04 2.6340E-01 6.6280E-02 1.1330E-02 1.7240E-03

7.1550E-03 3.0460E-02 6.4230E-03 4.1000E-04 1.0050E-01 2.3490E-02 8.2740E-03

1.3730E-03 1.8910E-01 6.2440E-02 4.8490E-03 3.7690E-04 4.4350E+00 3.0720E-01

1.3410E+00 7.4720E+00 3.0910E+00 3.7680E-01 6.0570E-02 3.0080E-02 2.3130E-02

6.2260E-02 1.5820E-01 1.3260E-02 3.7870E-03 2.1330E-01 3.8930E-01 1.4870E-01

3.7490E-02 3.2630E-02 6.0730E-02 1.0120E-02 3.4840E-03 6.6250E-02 1.4240E-01

6.4130E-02 1.2620E-02 5.9610E-03 1.5850E-02 1.1350E-02 3.9030E-03 3.8860E-02

5.2770E-02 1.2410E-02 7.4790E-03 7.9670E-02 1.4330E-01 6.7540E-02 5.5460E-03

3.4530E+00 1.4540E-01 2.5220E+00 5.3530E+00 2.4840E+00 4.0840E-02 3.0190E-02

1.9990E-02 1.4130E-02 6.3520E-02 1.0310E-01 8.9770E-03 5.6200E-02 1.9120E-01

2.6580E-01 1.1820E-01 1.0070E-02 2.9060E-02 3.9680E-02 6.7310E-03 1.1290E-02

6.4100E-02 9.9840E-02 5.3050E-02 4.7690E-03 7.1620E-03 1.1040E-02 6.6780E-03

1.5980E-02 2.7540E-02 3.7520E-02 8.0770E-03 1.2280E-02 8.4070E-02 8.8420E-02

5.1930E-02 3.6690E-04 1.7310E-01 1.9840E+00 5.7280E+00 2.4270E-02 3.1310E-02

1.2670E-02 3.1790E-03 1.6340E-02 5.0460E-02 7.2260E-02 1.3150E-02 6.0330E-02

1.5740E-01 2.4240E-01 2.9910E-03 1.0770E-02 2.3080E-02 2.7400E-02 1.7220E-03

1.2610E-02 5.3030E-02 1.0350E-01 3.5770E-03 2.4980E-03 8.5040E-03 7.6540E-03

5.4510E-03 1.6340E-02 2.1960E-02 2.3030E-02 1.1610E-03 1.4740E-02 6.7430E-02

9.4490E-02 1.4800E+00 1.1430E-01 4.3110E-03 1.6530E-02 2.0140E-03 1.0570E-04

7.1710E-02 2.4690E-02 7.7680E-03 1.7330E-04 1.9570E+00 1.4990E-01 2.0320E-02

2.6340E-03 3.3110E-02 8.4630E-03 1.2310E-03 1.6700E-04 5.0600E-01 8.9230E-02

1.0350E-02 9.3250E-04 4.2910E-04 2.4320E-02 3.5990E-03 1.1570E-04 3.8640E-02

8.2500E-03 6.4870E-04 5.2010E-05 2.6090E-01 2.2940E-02 4.1180E-03 2.4730E-04

2.9620E+00 1.3320E-01 8.1530E-03 6.6270E-03 1.2070E-03 3.6770E-02 3.3040E-02

1.1950E-02 8.4180E-03 3.6300E-01 1.2990E+00 1.4320E-01 2.1760E-02 1.4480E-02

1.4280E-02 6.9380E-03 1.1410E-03 1.0940E-01 2.9620E-01 9.4950E-02 1.1800E-02

3.6780E-04 1.2450E-02 9.4020E-03 2.1890E-03 1.5740E-02 1.6860E-02 7.5060E-03

6.4490E-04 5.0540E-02 1.6450E-01 1.9920E-02 4.6610E-03 3.5520E+00 3.4960E-03

6.4670E-03 3.3660E-03 1.7550E-02 2.1970E-02 2.6200E-02 8.8020E-03 6.1940E-02

3.9450E-01 9.5270E-01 1.1390E-01 5.1000E-03 1.1960E-02 8.7700E-03 4.8650E-03

1.7180E-02 1.1650E-01 2.1740E-01 7.6580E-02 3.0650E-04 5.5190E-03 9.3950E-03

5.1410E-03 4.8260E-03 1.3970E-02 9.8940E-03 5.2960E-03 1.0060E-02 5.1720E-02

1.2160E-01 1.6420E-02 1.1400E-03 4.4270E-03 5.0870E-03 5.1490E-03 1.9430E-02

1.9660E-02 1.5400E-02 9.0920E-03 7.2130E-02 3.2100E-01 8.1720E-01 1.3220E-03

5.8280E-03 1.0080E-02 7.3360E-03 1.8250E-03 1.9860E-02 9.6030E-02 2.2510E-01

2.4520E-04 1.8040E-03 6.9730E-03 7.2460E-03 9.6730E-04 5.7950E-03 1.1750E-02

8.8380E-03 1.3980E-03 1.1760E-02 4.2720E-02 1.0500E-01 6.7220E-01 4.6470E-02

2.4680E+00 1.1800E+00 3.9920E-01 6.9740E-02 7.6970E+00 2.7080E+00 7.3590E-01

1.3190E-01 5.3180E-02 2.9800E-02 1.4510E-02 5.6430E-03 2.1410E-02 1.5610E-02

9.3400E-03 4.3860E-03 3.5710E-02 1.0720E-01 8.8930E-02 5.4160E-02 9.1050E-02

5.4390E-02 3.0830E-02 1.4020E-02 4.1010E-02 2.5910E-02 1.7420E-02 1.1390E-02

5.6750E-01 7.9320E-01 7.3530E-01 7.3800E-01 4.7970E-01 3.3160E-01 3.5380E+00

2.6240E+00 1.0430E+00 2.2500E-02 2.0480E-02 1.6430E-02 9.1760E-03 1.1110E-02

6.1020E-03 7.4410E-03 9.2240E-03 2.3810E-02 8.8930E-02 5.9840E-02 1.8140E-02

4.3050E-02 4.1060E-02 2.8710E-02 1.3980E-02 1.7740E-02 2.2080E-02 1.5770E-02

8.2050E-03 3.2220E-02 5.5600E-01 5.1070E-01 2.7460E-01 1.9330E-02 2.1050E-01

1.4850E+00 2.0560E+00 6.5590E-03 1.1520E-02 1.0240E-02 5.7650E-03 1.2370E-03

6.4760E-03 5.7500E-03 3.3270E-03 1.1900E-02 5.4150E-02 1.8150E-02 1.1100E-02

1.8140E-02 1.8530E-02 1.6670E-02 9.9620E-03 9.6140E-03 6.7060E-03 7.8590E-03

7.7550E-03 3.0090E+00 4.5480E-01 3.2580E-02 8.1960E+00 3.0020E+00 6.6160E-01

7.6990E-02 1.1450E-01 5.6340E-02 1.5710E-02 2.7440E-03 6.0240E-02 3.2070E-02

1.5260E-02 5.5970E-03 1.5770E-01 1.4030E-01 3.8550E-02 1.6170E-02 1.3890E-01

7.2670E-02 2.8140E-02 1.0450E-02 1.2880E-01 5.1780E-02 1.4170E-02 2.1550E-03

2.6920E+00 5.3560E-01 2.2570E+00 3.1800E+00 2.7220E+00 8.2180E-01 5.6340E-02

3.1590E-02 3.9310E-02 1.4280E-02 2.4520E-02 2.4760E-02 2.1200E-02 1.4440E-02

1.1810E-01 6.2090E-02 6.7770E-02 1.6630E-02 7.2670E-02 4.8540E-02 4.8830E-02

1.7380E-02 4.0600E-02 4.8720E-02 4.1610E-02 1.6910E-02 1.7950E+00 1.9420E-01

2.1510E+00 1.5490E+00 2.1010E+00 1.5710E-02 3.9300E-02 1.6260E-02 2.3120E-02

7.5520E-03 1.5590E-02 1.6620E-02 1.6440E-02 7.8740E-02 2.9070E-02 4.1300E-02

2.7190E-02 2.8150E-02 4.8830E-02 2.1140E-02 2.6820E-02 6.1380E-03 3.3270E-02

2.7180E-02 3.2030E-02 8.6460E-03 2.1810E-01 1.4890E+00 1.2840E+00 2.7440E-03

1.4280E-02 2.3130E-02 5.8550E-03 1.5080E-03 6.1910E-03 9.9230E-03 1.0170E-02

3.9350E-02 1.2520E-02 1.5010E-02 2.1210E-02 1.0450E-02 1.7380E-02 2.6830E-02

7.8000E-03 3.1360E-04 6.8640E-03 2.2630E-02 1.9330E-02 3.0450E+00 2.2140E-01

1.1840E-02 1.7720E-01 7.3110E-02 1.9900E-02 4.9450E-03 1.2440E-01 6.0160E-02

1.9690E-02 5.1840E-03 4.1530E-02 3.5900E-01 3.5330E-02 5.4130E-03 3.6970E-01

1.1770E-01 1.5240E-02 3.9550E-03 1.1660E-01 5.9400E-02 2.0880E-02 3.5900E-03

3.4570E+00 2.7040E-01 8.6970E-02 6.4800E-02 5.2360E-02 1.5980E-02 5.3870E-02

4.8360E-02 4.3570E-02 2.0560E-02 3.3220E-02 1.4040E-01 1.5900E-01 2.0610E-02

1.5050E-01 1.3330E-01 1.0940E-01 1.1960E-02 5.9360E-02 4.0260E-02 3.7180E-02

2.2760E-02 2.6360E+00 3.3060E-02 6.1470E-02 3.7260E-02 3.3280E-02 1.3820E-02

3.8890E-02 2.9890E-02 3.7120E-02 2.4920E-02 4.7130E-02 1.2220E-01 7.0700E-02

3.8810E-02 1.3160E-01 5.8190E-02 7.4530E-02 2.0860E-02 3.7160E-02 3.0500E-02

3.0950E-02 1.0770E-02 3.1770E-02 4.4630E-02 2.2910E-02 3.1910E-03 1.3730E-02

3.1670E-02 3.2850E-02 1.6610E-02 1.3430E-02 5.6730E-02 8.9780E-02 9.1140E-03

4.1950E-02 1.0010E-01 5.1580E-02 3.5890E-03 2.2760E-02 3.0940E-02 2.2490E-02

1.8220E+00 3.0270E-01 1.0050E-01 6.3670E+00 1.6260E+00 3.5210E-01 7.0820E-02

1.1640E+00 2.1090E+00 1.1720E+00 1.0150E-01 1.8420E+00 5.9030E-01 1.0530E-01

6.3850E-03 2.2880E+00 7.0510E-01 1.4280E-01 1.7830E-02 1.7170E+00 2.0890E-01

5.2930E-01 3.6310E+00 1.6870E+00 3.9980E-01 8.7180E-01 1.3970E+00 3.5520E-01

7.8220E-01 5.8880E-01 7.0560E-01 4.8730E-01 1.2620E-01 4.7860E-01 1.0450E+00

6.6980E-01 1.7590E-01 1.1400E+00 6.1180E-02 4.6970E-01 2.2590E+00 1.3320E+00

5.8080E-01 5.8500E-01 6.7950E-01 4.2690E-01 1.0490E-01 4.8670E-01 3.6240E-01

3.1800E-01 3.9180E-02 4.6680E-01 5.6060E-01 5.1530E-01 1.8210E-02 4.3650E-02

3.1650E-01 1.6770E+00 2.9030E-01 1.3700E-01 6.0960E-01 9.7810E-02 6.3850E-03

1.2590E-01 3.1780E-01 1.8600E-01 3.4500E-03 4.1520E-02 3.2350E-01 4.2320E-01

4.3390E+00 3.2760E-01 3.6160E-02 1.4710E-01 7.7230E-02 2.7490E-02 5.9730E-03

5.1440E+00 2.5020E-01 5.5570E-03 1.1560E-03 1.0590E+01 2.1140E+00 1.8010E-01

7.4510E-03 5.0690E+00 3.7450E-01 1.2260E-01 4.7860E-02 2.9420E-02 1.4840E-02

1.1410E+00 3.0930E+00 2.5930E-01 4.6960E-03 2.7480E+00 5.5330E+00 2.2470E+00

2.1230E-01 3.9460E+00 9.8050E-02 2.7220E-02 2.8780E-02 1.7840E-02 1.8370E-01

1.2790E+00 1.9560E+00 1.8130E-01 4.2890E-01 2.8870E+00 3.5450E+00 1.7390E+00

7.3530E-02 1.3830E-02 2.4890E-02 1.6570E-02 1.7830E-02 2.3840E-01 1.0160E+00

1.4300E+00 3.4760E-02 5.2370E-01 2.3240E+00 3.5710E+00 7.0630E-01 4.7090E-01

2.3540E-01 2.0930E+00 1.5740E+00 1.0510E+00 5.2640E-01 1.8630E-02 1.4900E-02

1.1180E-02 7.4510E-03 2.2990E+00 1.0520E+00 4.4330E+00 3.0170E+00 1.2280E+00

2.5040E-01 3.6450E-01 1.4930E-01 6.1820E-02 2.9050E-02 8.8260E-01 2.5650E+00

5.6540E-01 1.4430E+00 1.3780E+00 4.5120E-02 1.7800E-01 1.2850E-01 5.1820E-02

1.4300E-01 1.7690E+00 9.0810E-01 1.5610E-01 2.1950E-02 1.8390E-02 6.9200E-02

9.2100E-02 2.2840E+00 2.8910E-01 3.3890E-02 2.1440E+00 7.0740E-01 1.8730E-01

4.6470E-02 2.1960E+00 3.1620E-01 5.0550E-01 9.9150E-01 6.2160E-01 1.9860E-01

1.4860E+00 8.4610E-02 4.3800E-01 5.5450E-01 4.6820E-01 1.9590E-02 6.9900E-02

2.9250E-01 3.9030E-01 4.3960E+00 4.4250E-01 2.4800E-02 4.7450E+00 5.3950E-01

3.6520E+00

15000.00

5.4610E+00 1.5500E+00 6.8320E-01 2.8360E-01 3.1920E+00 1.3330E+00 4.3050E-01

1.1680E-01 9.6510E+00 6.1590E-01 2.1150E-01 7.0000E-02 9.5200E-01 5.1050E-01

3.8470E-02 2.9770E-01 9.4280E-02 8.1360E-03 6.3230E-01 3.1190E-01 9.5950E-02

1.6920E-02 4.1830E-01 2.1630E-01 1.1340E-01 3.8660E-02 3.9880E-01 2.2170E-01

8.1640E-02 1.9750E-02 2.8370E-01 1.5730E-01 7.4800E-02 3.7850E-02 2.4370E+01

6.8960E+00 7.1780E-01 2.8940E-01 1.0850E-01 3.0510E+01 5.2660E+00 5.9140E-01

6.4320E-02 2.6280E-02 1.1980E-02 1.3220E+01 1.8390E-01 4.3720E-02 1.4140E+00

2.5580E-01 1.0920E-02 2.1810E-03 2.3060E+00 2.9460E-01 3.1410E-02 1.0250E-02

8.4600E-01 1.5500E-02 8.2930E-03 1.3490E-01 9.7500E-02 4.2370E-02 1.0150E-02

7.7900E-02 5.1360E-02 2.0950E-02 9.0470E-03 2.6480E-02 8.4570E-03 2.5930E-03

7.5820E-02 3.6960E-02 1.4570E-02 4.4880E-03 2.9180E-02 1.7590E-02 7.5430E-03

1.8550E-03 7.0000E-02 3.9380E-02 1.3400E-02 2.4170E-03 5.2140E-02 2.1040E-02

4.8090E-03 5.3060E-04 3.9080E-02 1.5500E-02 6.0390E-03 1.7630E-03 3.4710E-02

1.1440E-02 3.4710E-03 1.0910E-03 5.7800E-02 2.6320E-02 1.1370E-02 3.9160E-03

7.6210E-02 2.8440E-02 7.4970E-03 1.1230E-03 4.9120E-02 1.5350E-02 3.8570E-03

6.9960E-04 5.0020E-02 2.3530E-02 8.6020E-03 1.8930E-03 3.7890E-02 1.3430E-02

6.3760E-03 3.2450E-02 2.0740E-02 7.3780E-03 1.6140E-03 2.9480E-02 1.6550E-02

1.0140E-02 7.0950E-03 1.3570E-02 1.0060E-02 3.8860E-03 9.1870E-04 1.1280E-02

8.7160E-03 4.6540E-03 1.5090E-03 2.3330E-02 9.7780E-03 7.7340E-03 4.4670E-03

1.5470E-02 1.0470E-02 5.5650E-03 2.5220E-03 1.9780E-02 1.3610E-02 6.2180E-03

1.8310E-03 5.4170E+00 1.2870E+00 4.3800E-01 1.4480E+00 1.3070E+00 9.2130E-01

3.8770E-01 2.2910E+00 5.7450E+00 3.9540E-01 1.3280E-01 6.8730E-01 2.3210E-01

2.8980E-01 1.7080E-01 9.7060E-02 5.3420E-02 2.8030E-01 2.2770E-01 2.4200E-01

9.9660E-02 2.1920E-01 2.2840E-01 1.0280E-01 9.4460E-02 1.7560E-01 2.2390E-01

1.4970E-01 7.9660E-02 1.7730E-01 1.3770E-01 1.0700E-01 2.8670E-02 6.1850E+00

1.1360E+01 8.4080E+00 6.7720E-01 2.0980E-01 5.5720E-01 2.0320E+01 7.2500E+00

1.1470E+00 8.0410E-02 1.4580E-02 3.8940E+00 6.7360E+00 1.1400E-01 4.7000E-01

6.2600E-01 2.4290E-01 8.8300E-03 4.4970E-01 1.3390E+00 2.9890E-01 2.6630E-02

3.2150E-01 3.6850E-01 5.9840E-03 9.8550E-02 3.9920E-02 5.0040E-02 3.9380E-02

6.1940E-02 3.5780E-02 2.2410E-02 7.2380E-03 1.5220E-02 1.0750E-02 4.0390E-03

3.5940E-02 3.1190E-02 2.4810E-02 1.3530E-02 1.6640E-02 1.0420E-02 1.0940E-02

7.5040E-03 3.4410E-02 2.2100E-02 2.9690E-02 1.3970E-02 2.6830E-02 1.7730E-02

1.3770E-02 4.4680E-03 1.9880E-02 1.7270E-02 8.6070E-03 4.1250E-03 1.3070E-02

1.5960E-02 8.5820E-03 2.9870E-03 2.5650E-02 2.6720E-02 1.6910E-02 1.0250E-02

3.1700E-02 3.0770E-02 2.0610E-02 7.5870E-03 1.5180E-02 2.3480E-02 1.2620E-02

3.9450E-03 2.1270E-02 2.0720E-02 1.6580E-02 8.6890E-03 2.2740E-02 1.8100E-02

5.5060E-03 2.2990E-02 9.7970E-03 1.1170E-02 5.7730E-03 1.7250E-02 1.6000E-02

1.2200E-02 5.0950E-03 1.0760E-02 3.9290E-03 5.1240E-03 2.9480E-03 8.3790E-03

4.0500E-03 4.2370E-03 4.2650E-03 1.8660E-02 8.6090E-03 6.1200E-03 2.8530E-03

1.1440E-02 7.1380E-03 6.0510E-03 2.5670E-03 1.3830E-02 6.7180E-03 7.1370E-03

5.4630E-03 4.2460E+00 8.0260E-01 5.5730E-01 9.9490E-01 8.4010E-01 6.6020E-01

5.1550E-01 2.5560E+00 3.1490E+00 2.1580E-01 3.9170E-01 2.7070E-01 2.4570E-01

8.5610E-02 9.3560E-02 6.2300E-02 8.0190E-02 2.0980E-01 1.5420E-01 1.9430E-01

1.2220E-01 1.2280E-01 1.6490E-01 8.0860E-02 7.4550E-02 1.4640E-01 1.5520E-01

1.2120E-01 1.0530E-01 1.2250E-01 6.4550E-02 4.9050E-02 4.7530E-01 8.1860E+00

3.8490E+00 7.4570E+00 4.5950E-01 6.9070E-02 5.7120E-01 1.2730E+01 7.1550E+00

1.4630E+00 8.0010E-02 7.3200E-01 4.8120E+00 2.5110E+00 1.1590E-01 4.3270E-01

3.2020E-01 1.4020E-01 5.9370E-02 5.3640E-01 7.9880E-01 1.9110E-01 1.0320E-01

2.9920E-01 1.1970E-01 4.9920E-02 4.5040E-02 3.5160E-02 4.0810E-02 4.4340E-02

2.8830E-02 1.6930E-02 5.4290E-03 8.4100E-03 9.1420E-03 4.9610E-03 1.4240E-02

2.3520E-02 2.1600E-02 1.9750E-02 6.3450E-03 9.5050E-03 8.1140E-03 9.9400E-03

9.8720E-03 2.4610E-02 1.5670E-02 2.4970E-02 1.1040E-02 1.6440E-02 1.1280E-02

8.3580E-03 9.8280E-03 1.2190E-02 1.0630E-02 4.7690E-03 4.5430E-03 1.0170E-02

9.8500E-03 5.9390E-03 1.0830E-02 1.6660E-02 1.8590E-02 1.3560E-02 1.0540E-02

2.2780E-02 1.9660E-02 1.5050E-02 3.8400E-03 1.3020E-02 1.5150E-02 9.3980E-03

7.1260E-03 1.4690E-02 1.4680E-02 1.3950E-02 1.3920E-02 1.4220E-02 6.6520E-03

1.2340E-02 1.0780E-02 7.6540E-03 6.5320E-03 1.0620E-02 1.2610E-02 8.3540E-03

6.3450E-03 6.1340E-03 4.6080E-03 3.3460E-03 2.9540E-03 4.4420E-03 3.7810E-03

3.5320E-03 3.9430E-03 1.4000E-02 7.0160E-03 4.2870E-03 1.8850E-03 7.4350E-03

6.3820E-03 3.8210E-03 2.7610E-03 7.1880E-03 6.6470E-03 5.4310E-03 5.5990E-03

2.5880E+00 1.8100E-01 5.4040E-01 6.7660E-01 6.3740E-01 1.6410E-01 6.0480E-01

2.1620E+00 1.3580E+00 1.7610E-01 2.9830E-01 1.3180E-01 3.5530E-02 7.5420E-02

4.9940E-02 1.2260E-02 1.0300E-01 1.3490E-01 1.7550E-01 5.5290E-02 8.2310E-02

1.1000E-01 8.0440E-02 2.2860E-02 7.5660E-02 1.1440E-01 1.2180E-01 6.2200E-02

7.2060E-02 5.6020E-02 3.8160E-02 1.5230E-01 6.1630E-01 7.3070E+00 8.2870E-01

4.7620E+00 3.0180E-02 5.7810E-02 4.1740E-01 7.1820E+00 5.7350E+00 1.3090E+00

5.3790E-02 1.6390E+00 3.6770E+00 1.8400E-02 1.6900E-01 2.7510E-01 2.0360E-01

1.0910E-02 8.9590E-02 4.7440E-01 4.7110E-01 2.7770E-02 1.4430E-01 1.7590E-01

1.7940E-02 3.9850E-02 3.2510E-02 2.3660E-02 2.7880E-02 2.2000E-02 1.0210E-02

3.6190E-03 4.3430E-03 6.1600E-03 4.5070E-03 4.6480E-03 1.3180E-02 1.6990E-02

1.7910E-02 1.6700E-03 6.0700E-03 7.1480E-03 7.6000E-03 1.2840E-03 1.2870E-02

1.5240E-02 2.0690E-02 3.4620E-03 1.0780E-02 1.0280E-02 6.8770E-03 4.4360E-03

7.5110E-03 8.1600E-03 4.8430E-03 1.5240E-03 4.5160E-03 7.2420E-03 7.0000E-03

4.0000E-03 9.0430E-03 1.3260E-02 1.3460E-02 2.5590E-03 1.1510E-02 1.5840E-02

1.5410E-02 7.6660E-04 4.6190E-03 1.0180E-02 1.2020E-02 1.6420E-03 7.4210E-03

1.1180E-02 1.3380E-02 8.2360E-03 8.4870E-03 6.4330E-03 5.2050E-03 9.4260E-03

6.5660E-03 3.6830E-03 6.8470E-03 6.7440E-03 6.1830E-03 5.5320E-03 2.7350E-03

4.4260E-03 2.7820E-03 1.4210E-03 1.6740E-03 3.3240E-03 3.0770E-03 2.3910E-03

9.3300E-03 4.9790E-03 2.6190E-03 1.1940E-03 4.4100E-03 4.4810E-03 2.9960E-03

1.7290E-03 2.8260E-03 5.5340E-03 4.7300E-03 3.4860E-03 4.9240E-02 1.9260E-01

4.0240E-01 3.7530E-01 6.1740E-02 1.2760E-01 5.1650E-01 1.4370E+00 5.6340E-02

1.9740E-01 4.7410E-02 1.1080E-02 4.2010E-02 2.7130E-02 9.1850E-04 1.8830E-02

9.8790E-02 9.4270E-02 1.6940E-02 5.3490E-02 3.6530E-02 5.7040E-02 3.9900E-03

2.9800E-02 5.7540E-02 7.5950E-02 3.0380E-02 2.6070E-02 4.1130E-02 1.6710E-02

4.2120E-02 2.0960E-01 4.5900E-01 4.7550E+00 1.4700E+00 1.4210E-02 1.3750E-02

3.5060E-02 2.3260E-01 3.2240E+00 3.8500E+00 1.7490E-02 5.9190E-02 2.6080E+00

2.2700E-03 2.9640E-02 1.5640E-01 1.4420E-01 5.0320E-03 5.6140E-03 8.9430E-02

4.2170E-01 6.5420E-03 4.2420E-02 1.2500E-01 3.9160E-03 2.1860E-02 2.3070E-02

8.0630E-03 1.3300E-02 1.2180E-02 4.5560E-03 1.8090E-03 1.8310E-03 3.0100E-03

2.6690E-03 1.1960E-03 5.0170E-03 9.9150E-03 1.0250E-02 1.9730E-04 2.3790E-03

4.8250E-03 3.7410E-03 8.0890E-06 2.1640E-03 1.2680E-02 1.0190E-02 7.2610E-04

4.6500E-03 7.0000E-03 3.3290E-03 1.6110E-03 3.6870E-03 3.9710E-03 3.2020E-03

4.8580E-04 1.4250E-03 3.5040E-03 4.7430E-03 1.1140E-03 4.0860E-03 6.1510E-03

8.5290E-03 3.5800E-04 3.7140E-03 9.2150E-03 9.4030E-03 1.1690E-04 1.0470E-03

4.1730E-03 8.4350E-03 1.6930E-04 2.4050E-03 6.2850E-03 7.9350E-03 3.9120E-03

3.6870E-03 3.9570E-03 1.6230E-03 5.2160E-03 4.5490E-03 1.0620E-03 3.5830E-03

2.2700E-03 3.7550E-03 3.0450E-03 8.9890E-04 2.6050E-03 1.9120E-03 2.6840E-04

3.8490E-04 1.9320E-03 1.9430E-03 9.7380E-04 4.6650E-03 2.5870E-03 1.2190E-03

5.8990E-04 2.0590E-03 2.1290E-03 1.9890E-03 6.3030E-04 7.7330E-04 3.0070E-03

3.1260E-03 1.3820E-03 7.5340E+00 2.0410E+00 6.5480E-01 2.1360E+00 7.5440E-01

1.6690E-01 2.9090E-02 1.2670E+00 4.5020E-01 1.5340E-01 6.0090E-01 1.2310E-01

3.1720E-02 1.3290E+00 4.8630E-01 1.1730E-01 2.2370E-02 1.4220E+00 4.3930E-01

1.2230E-01 2.8360E-02 1.0210E+00 4.4320E-01 1.3610E-01 3.2890E-02 7.2880E-01

3.4450E-01 1.3840E-01 4.8520E-02 7.9650E-01 3.5560E-01 1.2970E-01 4.1810E-02

9.8850E-03 7.3820E-01 3.6780E-01 1.5780E-01 5.5270E-02 1.5360E-02 3.1660E-03

2.8590E-01 1.1490E-01 2.4700E-02 8.5970E+00 3.7960E-01 1.1410E-01 2.7060E-02

4.4090E+00 7.1950E-01 1.3010E-01 3.7020E-02 4.5530E-01 1.7470E-01 3.1980E-02

1.6030E+00 7.1840E-01 3.5420E-01 1.9770E-01 1.0640E-01 4.7720E-02 1.9450E-02

1.6500E-01 2.2600E-01 1.3750E-01 2.0840E-02 3.6890E+00 3.9940E-01 3.9970E-02

5.3600E-03 2.0770E-01 1.0020E-01 2.4700E-02 3.2950E-03 2.6660E-01 1.8520E-01

3.4740E-02 3.5030E-03 1.7370E+00 4.1240E-02 8.0750E-03 1.1060E-03 7.7570E-01

2.6270E-02 6.0660E-03 1.5470E-03 8.9140E-01 1.2540E-01 1.5970E-02 2.4630E-03

1.3830E+00 1.6460E-01 2.3460E-02 3.4350E-03 2.9560E+00 3.5790E-01 1.8060E-02

2.5930E-03 7.3190E-01 1.1400E-01 2.4510E-02 3.4250E-03 2.7820E-01 1.0120E-01

2.5790E-02 3.1110E-03 3.0970E-02 1.2810E-02 2.6180E-03 2.7560E-01 3.3470E-02

1.1500E-02 2.3220E-03 5.5990E-02 2.0760E-02 7.0020E-03 1.5440E-03 1.0360E-01

1.6800E-02 4.3160E-03 7.6810E-04 7.2150E-02 2.4640E-02 7.2760E-03 1.2390E-03

2.6550E-02 8.7810E-03 4.8860E-03 8.3670E-04 7.0090E-02 8.6740E-03 2.1010E-03

3.6110E-04 1.6650E-01 3.0840E-02 5.5250E-03 9.3660E-04 6.8410E+00 1.9080E+00

9.2150E-01 8.6690E-01 5.6890E-01 1.5620E-01 7.2710E-01 5.6380E-01 2.1740E-01

2.8390E-01 2.5870E-01 6.5100E-02 3.5100E-01 6.6860E-01 4.9290E-01 1.3180E-01

4.2840E-01 7.5460E-01 3.6800E-01 1.2380E-01 3.4980E-01 5.3540E-01 3.7520E-01

1.4440E-01 3.7250E-01 3.6620E-01 2.0910E-01 8.8120E-02 2.8180E-01 4.2040E-01

2.5830E-01 1.2330E-01 4.7790E-02 2.6680E-01 2.8630E-01 2.5030E-01 1.6490E-01

8.0410E-02 2.6530E-02 1.5280E-01 1.0950E-01 7.7410E-02 1.3300E+00 5.6180E+00

2.5300E-01 9.3510E-02 7.1890E-01 2.6750E+00 7.1180E-01 1.2500E-01 2.7190E-01

1.5890E-01 9.9430E-02 7.1830E-01 8.2180E-01 5.2620E-01 2.3180E-01 6.8510E-02

4.9170E-02 2.1420E-02 1.3190E-01 1.7130E-01 5.5580E-02 8.0580E-02 1.2120E-01

2.5990E+00 4.6880E-01 4.6480E-02 6.9750E-02 1.5790E-01 9.3520E-02 2.8970E-02

1.0410E-01 3.2930E-01 1.9890E-01 4.1660E-02 2.3590E-01 1.1530E+00 3.1620E-02

7.8620E-03 1.1820E-01 5.0890E-01 2.0360E-02 4.8110E-03 1.2530E-01 5.5400E-01

1.3100E-01 1.7710E-02 7.1610E-02 9.6850E-01 1.7990E-01 2.7010E-02 3.2660E-01

2.1190E+00 3.8650E-01 2.0250E-02 6.9080E-02 4.9360E-01 1.1080E-01 2.8390E-02

7.4510E-02 1.2880E-01 9.2000E-02 3.0530E-02 1.9120E-02 1.0930E-02 7.1070E-03

6.1490E-02 1.6700E-01 1.8990E-02 1.0090E-02 2.0760E-02 2.6390E-02 1.4190E-02

7.2340E-03 2.7190E-02 5.7530E-02 1.1800E-02 3.8710E-03 2.0550E-02 3.5700E-02

1.9880E-02 8.2200E-03 2.1240E-02 6.2890E-03 2.4210E-03 2.8100E-03 1.6040E-02

4.0880E-02 6.1930E-03 1.9400E-03 3.0260E-02 9.7770E-02 2.9210E-02 6.0300E-03

5.2280E+00 3.1380E-01 7.0060E-01 5.1080E-01 3.7300E-01 4.0800E-01 4.6090E-01

2.6790E-01 1.2460E-01 2.0780E-01 1.2240E-01 4.0770E-02 3.6530E-01 4.3180E-01

4.1380E-01 1.1810E-01 3.5940E-01 5.0990E-01 2.8800E-01 9.2280E-02 3.1030E-01

3.6640E-01 3.1390E-01 1.8800E-01 2.6060E-01 2.2550E-01 1.1750E-01 9.4640E-02

2.1550E-01 2.7190E-01 1.9710E-01 8.8820E-02 5.6730E-02 1.9150E-01 1.8540E-01

1.6230E-01 1.3060E-01 7.5580E-02 6.8200E-02 9.7620E-02 8.8650E-02 2.2530E-01

1.4270E+00 3.6600E+00 1.5820E-01 1.2990E-01 7.1120E-01 1.7910E+00 5.4080E-01

1.4100E-01 1.5510E-01 1.0200E-01 3.5420E-01 5.2620E-01 4.9320E-01 3.5010E-01

4.3000E-02 3.9260E-02 2.1330E-02 9.8990E-02 9.8340E-02 7.5610E-02 5.6650E-02

1.8780E-02 1.1650E-01 2.2420E+00 3.6460E-01 1.0230E-02 6.4430E-02 1.0830E-01

7.9870E-02 2.4500E-03 1.1790E-01 2.2070E-01 1.6440E-01 2.5080E-02 2.7530E-01

7.5000E-01 2.1070E-02 1.5230E-02 1.2790E-01 3.2890E-01 1.3220E-02 1.5940E-02

1.3100E-01 3.7370E-01 1.0050E-01 1.3070E-02 6.4150E-02 7.1520E-01 1.4230E-01

1.7930E-02 3.8600E-01 1.4300E+00 2.9150E-01 1.5890E-02 5.4920E-02 3.6450E-01

9.1130E-02 1.0730E-02 6.8270E-02 8.5650E-02 7.9490E-02 1.0280E-02 1.0650E-02

6.9490E-03 1.8380E-02 5.1510E-02 1.1120E-01 1.1630E-02 7.0020E-03 1.4190E-02

1.8570E-02 1.1430E-02 7.7340E-03 2.2690E-02 3.6900E-02 7.6210E-03 5.0170E-03

1.6100E-02 2.5080E-02 1.7070E-02 1.5930E-02 3.5890E-03 2.9740E-03 2.1320E-03

3.9710E-03 1.4540E-02 2.6280E-02 4.0390E-03 5.5230E-03 2.9190E-02 6.5720E-02

2.2650E-02 7.8160E-02 3.2810E-01 5.2580E-01 3.3020E-01 2.1500E-01 2.9690E-01

2.4640E-01 5.2120E-02 1.1730E-01 1.3190E-01 8.5260E-03 4.0560E-02 2.8680E-01

5.0490E-01 2.8040E-02 1.2250E-01 2.8690E-01 4.1850E-01 1.9080E-02 9.4660E-02

2.5240E-01 3.5260E-01 8.8290E-02 1.5200E-01 1.7240E-01 1.1820E-01 2.4090E-02

9.3460E-02 1.5480E-01 1.7930E-01 1.2240E-01 7.6230E-03 5.0640E-02 1.2340E-01

1.5050E-01 1.2790E-01 7.1550E-02 2.2550E-02 7.4210E-02 7.2580E-02 5.9920E-02

2.3460E-01 1.0790E+00 2.2540E+00 3.7000E-02 1.2500E-01 5.4080E-01 1.4140E+00

5.9960E-02 1.2950E-01 7.5410E-02 1.9770E-01 2.3180E-01 3.5010E-01 3.6950E-01

2.5200E-02 2.5720E-02 1.7290E-02 6.5970E-02 4.2400E-02 9.0000E-02 2.1310E-02

2.6240E-03 2.0360E-02 9.1720E-02 1.7160E+00 3.9500E-04 1.1800E-02 5.2170E-02

1.1070E-01 1.8190E-04 2.7000E-03 9.0040E-02 2.4400E-01 3.4710E-03 3.0440E-02

2.0850E-01 4.7000E-01 3.3450E-03 1.6870E-02 9.8610E-02 2.1000E-01 2.4570E-03

1.7690E-02 1.0050E-01 2.9360E-01 1.5560E-03 1.4420E-02 5.1440E-02 5.5510E-01

2.5610E-03 2.0190E-02 3.1940E-01 1.1170E+00 1.2810E-03 1.8150E-02 4.5700E-02

2.8650E-01 9.0550E-05 1.2650E-02 5.5630E-02 9.4390E-02 4.6460E-03 8.9850E-03

4.9500E-03 5.5340E-03 1.8230E-02 3.8960E-02 6.6350E-02 1.5440E-03 7.2340E-03

1.1420E-02 1.4150E-02 2.0070E-03 8.0460E-03 1.7270E-02 2.2830E-02 5.0940E-04

5.5750E-03 1.3380E-02 2.2680E-02 1.0620E-02 1.5930E-03 3.2410E-03 9.7040E-04

9.6870E-04 4.2600E-03 1.0930E-02 1.6380E-02 9.2710E-04 6.0350E-03 2.2650E-02

5.2170E-02 2.5210E+00 9.2410E-01 4.0010E-01 1.1400E+00 5.1840E-01 8.5630E-02

3.4400E-01 1.4010E-01 3.3190E-02 5.7490E-01 3.0040E-01 1.3360E-01 3.6480E-02

4.6380E-01 2.4130E-01 1.1980E-01 5.5290E-02 5.2100E-01 2.7340E-01 1.2420E-01

4.8040E-02 4.0240E-01 2.4370E-01 1.3940E-01 6.1090E-02 2.7530E+00 1.2050E+00

3.7040E-01 9.6440E-02 2.4810E-02 3.8560E+00 1.3020E+00 3.8720E-01 1.0620E-01

3.1920E-02 1.0730E-02 1.8070E+00 2.5900E-01 3.2710E-02 1.9400E+01 3.4490E+00

1.0210E-01 1.7650E-02 2.9030E+01 3.8250E+00 3.8110E-01 1.0290E-01 1.2170E+01

1.0960E-01 3.1560E-02 1.4010E-01 8.4180E-02 4.5570E-02 2.0830E-02 6.8460E-02

3.9910E-02 1.6420E-02 6.7700E-03 1.6840E-02 6.0870E-03 2.7740E-03 1.3080E-01

6.4870E-02 2.7260E-02 7.3070E-03 1.1850E-02 6.9890E-03 3.4600E-03 1.2670E-03

3.0280E-02 1.7030E-02 8.0800E-03 2.3590E-03 1.8030E-01 3.9460E-02 5.1730E-03

1.0400E-03 2.0510E-01 4.8520E-02 1.0290E-02 3.3260E-03 2.9540E-02 1.2340E-02

4.8420E-03 1.4210E-03 5.6460E-02 2.8720E-02 1.2660E-02 4.0120E-03 1.9570E-01

4.7090E-02 1.3030E-02 3.0800E-03 2.7780E-02 1.2530E-02 4.8280E-03 1.1980E-03

2.4010E-02 1.0870E-02 4.6070E-03 1.5430E-03 1.0570E-01 2.0260E-02 1.0870E-02

3.2340E-02 1.8360E-02 7.7950E-03 2.2240E-03 1.2950E-02 7.9390E-03 4.9410E-03

2.9560E-03 3.4040E-02 2.3760E-02 1.1600E-02 3.8570E-03 4.7380E-03 3.2740E-03

1.9710E-03 9.3500E-04 1.6450E-02 9.4120E-03 2.5090E-03 1.3050E-03 4.3970E-03

3.1780E-03 1.7940E-03 7.5150E-04 7.1300E-03 2.3820E-03 1.0720E-03 4.3890E-04

2.0140E+00 4.6120E-01 6.5610E-01 3.3460E-01 3.1670E-01 1.8740E-01 1.2340E-01

7.8010E-02 2.0230E-01 2.4000E-01 1.9750E-01 1.4880E-01 2.0530E-01 2.1130E-01

1.5440E-01 9.2680E-02 1.9440E-01 2.4620E-01 1.8820E-01 1.2100E-01 2.1720E-01

2.5320E-01 1.3450E-01 6.0910E-02 6.2920E-01 1.3910E+00 1.0130E+00 4.5310E-01

1.1100E-01 1.5290E-01 1.9670E+00 1.3540E+00 5.8500E-01 1.7750E-01 3.7560E-02

4.4160E-01 9.3700E-01 1.9570E-01 3.4420E+00 9.6780E+00 4.0080E+00 1.0080E-01

4.5250E-01 1.9530E+01 4.5680E+00 3.9490E-01 2.8520E+00 6.3340E+00 5.7560E-02

7.4560E-02 6.0750E-02 4.7050E-02 3.5670E-02 4.6990E-02 2.9450E-02 1.7430E-02

5.0810E-03 8.5230E-03 8.2100E-03 2.4750E-03 4.7530E-02 5.3130E-02 4.1910E-02

3.0100E-02 5.1590E-03 4.5740E-03 4.3490E-03 3.5890E-03 1.1350E-02 1.2060E-02

1.0830E-02 9.0740E-03 4.0020E-02 8.7500E-02 3.9290E-02 4.8400E-03 4.8970E-02

9.8330E-02 4.3390E-02 7.2770E-03 9.8130E-03 1.3310E-02 8.1270E-03 4.8660E-03

2.1350E-02 2.3280E-02 1.8640E-02 1.3210E-02 2.6820E-02 1.1640E-01 3.9760E-02

1.4080E-02 8.6790E-03 1.1840E-02 8.8060E-03 5.4450E-03 6.5720E-03 1.1290E-02

7.9710E-03 4.9090E-03 3.9600E-02 5.5840E-02 7.0750E-03 1.8350E-02 1.1320E-02

9.6240E-03 6.0640E-03 7.0570E-03 6.7170E-03 4.8830E-03 2.9330E-03 2.3760E-02

1.1810E-02 1.1380E-02 7.9970E-03 2.7740E-03 1.9370E-03 1.7210E-03 1.6910E-03

1.2330E-02 4.0940E-03 4.9190E-03 9.0520E-04 3.1780E-03 1.9070E-03 1.5570E-03

9.4620E-04 1.8440E-03 3.2840E-03 1.8550E-03 9.0610E-04 1.1720E+00 2.8570E-01

3.5770E-01 2.2920E-01 8.5680E-02 1.0590E-01 6.7640E-02 4.9560E-02 1.2340E-01

1.7840E-01 1.7300E-01 8.5640E-02 1.2520E-01 1.3070E-01 1.0140E-01 6.3330E-02

1.2760E-01 1.6580E-01 1.4770E-01 1.2790E-01 1.3450E-01 1.3200E-01 5.6720E-02

9.7900E-02 6.2820E-01 7.3220E-01 6.3020E-01 3.6800E-01 4.2570E-02 9.7050E-02

9.2220E-01 9.9600E-01 5.8570E-01 2.0060E-01 7.2030E-02 4.6820E-01 5.0400E-01

1.0150E-01 4.0080E+00 4.5460E+00 2.8300E+00 1.3290E-01 3.8000E-01 1.2600E+01

3.4420E+00 3.8500E-01 3.2480E+00 2.5190E+00 3.3730E-02 4.0070E-02 4.1770E-02

2.9780E-02 2.7990E-02 2.2250E-02 1.2200E-02 3.3850E-03 4.5850E-03 5.1000E-03

3.1610E-03 1.2570E-02 2.8830E-02 3.8870E-02 3.4820E-02 1.5100E-03 3.1310E-03

3.4130E-03 3.7280E-03 2.7740E-03 6.7580E-03 9.3650E-03 9.9770E-03 5.1700E-03

3.9270E-02 4.2320E-02 2.6550E-02 1.0300E-02 4.3370E-02 4.8850E-02 2.9720E-02

3.0790E-03 5.9350E-03 9.1210E-03 5.9470E-03 6.1560E-03 1.3070E-02 1.6590E-02

1.5110E-02 7.4230E-03 1.7040E-02 7.5200E-02 3.0000E-02 2.0330E-03 5.6690E-03

8.1900E-03 7.2870E-03 1.7970E-03 4.1580E-03 7.8250E-03 6.7150E-03 1.7550E-02

3.0310E-02 2.0580E-02 7.7950E-03 9.6240E-03 8.2960E-03 4.6470E-03 3.8970E-03

4.0900E-03 3.6840E-03 2.7110E-03 1.1600E-02 1.1370E-02 8.8370E-03 4.8110E-03

1.2130E-03 1.3970E-03 1.4990E-03 1.2520E-03 8.2240E-03 2.1000E-03 2.8300E-03

1.7520E-03 1.7950E-03 1.5570E-03 1.0990E-03 5.9880E-04 7.5090E-04 1.0430E-03

2.2550E-03 1.1630E-03 8.5750E-02 2.5050E-01 1.0000E-01 2.9450E-02 6.3020E-02

3.6630E-02 1.4070E-03 5.3130E-02 8.8730E-02 1.1820E-01 3.0260E-02 5.4250E-02

6.9830E-02 6.6900E-02 1.3940E-02 5.0890E-02 8.2390E-02 1.0400E-01 6.1000E-02

6.0900E-02 5.6720E-02 4.8930E-02 2.5860E-02 7.4810E-02 3.6480E-01 4.5820E-01

3.0210E-01 1.3290E-02 2.5730E-02 5.0750E-02 3.4650E-01 5.5990E-01 4.2240E-01

1.1400E-02 8.5110E-02 4.2120E-01 1.7570E-02 1.0070E-01 2.8300E+00 2.7870E+00

6.0620E-02 6.2560E-02 2.3360E-01 7.8770E+00 2.6480E-02 5.4560E-01 2.4900E+00

1.1140E-02 2.2650E-02 2.1340E-02 1.7540E-02 1.2750E-02 1.2520E-02 5.9460E-03

1.6920E-03 2.1150E-03 1.9990E-03 2.2950E-03 9.3060E-04 1.3050E-02 1.9870E-02

2.3690E-02 2.2760E-04 1.3660E-03 2.1610E-03 2.1350E-03 1.1750E-05 3.0190E-03

5.0490E-03 6.3540E-03 1.0390E-03 4.8390E-03 2.6550E-02 2.4680E-02 3.3260E-03

7.2760E-03 2.9720E-02 2.6890E-02 5.5410E-04 2.8040E-03 3.7070E-03 4.9720E-03

8.5120E-04 5.7400E-03 8.7330E-03 1.0050E-02 1.0080E-03 7.2920E-03 1.0970E-02

4.6570E-02 1.2640E-04 2.1420E-03 3.9300E-03 5.3920E-03 2.5950E-04 1.6400E-03

2.8810E-03 5.4640E-03 8.0570E-03 7.7160E-03 1.8550E-02 2.2250E-03 6.0640E-03

4.6470E-03 2.2070E-03 1.7920E-03 1.8140E-03 1.9040E-03 1.6810E-03 3.8570E-03

7.9970E-03 4.8100E-03 1.6480E-03 3.4550E-04 8.9680E-04 8.1070E-04 6.3880E-04

4.1110E-03 9.7240E-04 9.4960E-04 1.3770E-03 7.5150E-04 9.4620E-04 5.9880E-04

2.2630E-04 2.2180E-04 5.4150E-04 5.8720E-04 1.1110E-03 1.2140E+00 4.6870E-01

3.6360E+00 2.7300E-01 8.3120E-02 1.1700E-01 6.5570E-02 3.5210E-02 1.8660E-02

5.5980E-01 2.8520E-01 1.3630E-01 6.1330E-02 1.8290E-01 1.2620E-01 7.6220E-02

4.0310E-02 7.4430E-01 4.7600E-01 2.3870E-01 8.5740E-02 3.8880E-01 2.8150E-01

1.6100E-01 7.8790E-02 3.0110E-02 3.4480E-01 2.6380E-01 1.7300E-01 9.6830E-02

4.4980E-02 1.5610E-02 2.9060E-01 1.7880E-01 6.0100E-02 2.8380E+00 8.3250E-01

2.2100E-01 6.7570E-02 7.5600E-01 5.7890E-01 3.1580E-01 1.1720E-01 5.6910E+00

2.4830E+00 4.8710E-02 3.9470E-01 1.8110E-01 7.6070E-02 3.0180E-02 3.6440E-01

1.9970E-01 1.1040E-01 4.5170E-01 5.0100E-01 2.4150E-01 3.4060E-02 2.5190E-01

1.1050E-01 4.2390E-02 1.3890E-02 4.2160E-02 2.3010E-02 1.1230E-02 4.4890E-03

5.3460E-02 2.5820E-02 1.0590E-02 3.1120E-03 6.9340E-01 1.9840E-01 3.7530E-02

6.0080E-03 1.4530E+00 3.4600E-01 5.0530E-02 5.6650E-03 6.9110E-02 3.0730E-02

1.1950E-02 3.8600E-03 1.1820E-01 5.5800E-02 2.3420E-02 8.3330E-03 3.5020E-02

2.2500E-02 1.2730E-02 6.1500E-03 1.0380E-02 6.1920E-03 3.8920E-03 2.4510E-03

7.9800E-03 4.0910E-03 1.8600E-03 6.8840E-04 1.3540E+00 5.8980E-01 1.4460E-02

7.2750E-01 2.0090E-01 3.9660E-02 9.5710E-03 1.2580E-01 1.0060E-01 5.9280E-02

2.6070E-02 8.9240E-01 2.4000E-01 5.7910E-02 1.8360E-02 1.9050E-01 8.4760E-02

3.3710E-02 1.0570E-02 3.9690E-01 1.6670E-01 8.5890E-02 1.5560E-02 2.5280E-01

9.4310E-02 4.4170E-02 2.1760E-02 6.5820E-02 2.9520E-02 1.1290E-02 3.3080E-03

5.8280E-01 2.7280E-01 2.2390E+00 1.5250E-01 2.5120E-02 5.1990E-02 4.7860E-02

3.3050E-02 1.3340E-01 2.5450E-01 2.0160E-01 1.1300E-01 8.1520E-02 6.8890E-02

6.9580E-02 6.7060E-02 3.7360E-01 2.8190E-01 2.5060E-01 1.5640E-01 1.6930E-01

1.4920E-01 1.4080E-01 1.1710E-01 6.6110E-02 1.8700E-01 8.9140E-02 8.8260E-02

1.0440E-01 9.7980E-02 5.8210E-02 1.5230E-01 6.8670E-02 1.3130E-01 2.4270E-01

1.4290E+00 7.8270E-01 1.8780E-01 4.6760E-01 1.4030E-01 2.4380E-01 3.2650E-01

2.4800E+00 7.6040E-01 2.2400E+00 7.4810E-02 1.6730E-01 1.3550E-01 7.6350E-02

1.9960E-01 1.9710E-01 5.3300E-02 3.0040E-01 2.3880E-01 9.7170E-02 2.1850E-01

2.3280E-02 1.0900E-01 9.4940E-02 5.1920E-02 8.4880E-03 1.6160E-02 1.6280E-02

1.2980E-02 3.7210E-03 2.1990E-02 2.2070E-02 1.4190E-02 3.0580E-02 3.6330E-01

1.9830E-01 4.4030E-02 2.4140E-02 7.5420E-01 3.8730E-01 7.3110E-02 1.1780E-02

2.8220E-02 2.3390E-02 1.3440E-02 1.6720E-02 4.8930E-02 4.4090E-02 2.7530E-02

1.5520E-02 1.2480E-02 1.2230E-02 1.0190E-02 3.2970E-03 5.2730E-03 4.2940E-03

2.5170E-03 1.2010E-03 3.1880E-03 3.1240E-03 2.2340E-03 5.8940E-01 1.8760E-01

5.2850E-01 3.5330E-02 3.6900E-01 1.9770E-01 4.0600E-02 8.3430E-02 2.8750E-02

4.2170E-02 5.3040E-02 4.4560E-02 4.7360E-01 2.4320E-01 4.3650E-02 1.6310E-02

8.3040E-02 7.2050E-02 3.9510E-02 2.6460E-01 8.5840E-02 3.2070E-02 6.1330E-02

4.7800E-02 1.4000E-01 7.2260E-02 1.5640E-02 1.1770E-02 2.5990E-02 2.2110E-02

1.3460E-02 8.2860E-02 1.5250E-01 1.0930E+00 7.4850E-03 1.3600E-02 2.4120E-02

3.2770E-02 3.9790E-02 6.9170E-02 1.1480E-01 1.2390E-01 1.8550E-02 4.3900E-02

4.5460E-02 3.6040E-02 9.5270E-02 1.9920E-01 1.5160E-01 7.3390E-02 3.3770E-02

9.7080E-02 9.3490E-02 6.6420E-02 3.3150E-02 4.3260E-03 9.4310E-02 9.6740E-02

6.7190E-02 3.5710E-02 1.3860E-02 2.7760E-02 1.0550E-01 4.3240E-02 8.3830E-02

1.1770E-01 5.8190E-01 5.3750E-01 3.8760E-02 2.9090E-01 1.9810E-01 6.1120E-02

4.8440E-02 2.2390E+00 4.5230E-01 1.6070E-02 4.1180E-02 8.0490E-02 8.8810E-02

1.1030E-01 5.3300E-02 6.0080E-02 1.5020E-01 3.3970E-02 2.0990E-01 4.5300E-02

3.9110E-03 1.3110E-02 4.8760E-02 7.3780E-02 8.3650E-04 4.9350E-03 9.2470E-03

1.1940E-02 4.8330E-05 2.2440E-03 1.0240E-02 1.8440E-02 6.1270E-03 1.8220E-02

1.5780E-01 1.5800E-01 6.6420E-03 1.2910E-02 3.2490E-01 2.9690E-01 1.5610E-03

7.1790E-03 1.4230E-02 1.5590E-02 2.2620E-03 9.6110E-03 2.3990E-02 3.2800E-02

3.7800E-03 8.2480E-03 7.7900E-03 5.1670E-03 1.5100E-03 1.3740E-03 2.0670E-03

2.5180E-03 1.1650E-04 7.0010E-04 1.6630E-03 2.3990E-03 1.4440E-02 5.2830E-01

1.0970E-01 1.1790E-02 1.7400E-02 1.4880E-01 1.5660E-01 1.3070E-02 4.8620E-02

3.2220E-02 9.7620E-03 2.4910E-02 1.4560E-02 1.8240E-01 1.7780E-01 2.9350E-03

8.3850E-03 3.6910E-02 5.5420E-02 1.3230E-01 1.5530E-02 6.1330E-02 1.2880E-02

3.0030E-02 1.3510E-02 4.8960E-02 4.5320E-02 9.6150E-04 7.3210E-03 1.3730E-02

1.4650E-02 2.8640E+00 3.1330E-01 4.6190E-01 2.2930E-01 1.1620E-01 5.5090E-02

7.5260E-01 5.3130E-01 3.8220E-01 2.4950E-01 4.2820E-01 2.9020E-01 1.7190E-01

8.5790E-02 7.1350E-01 5.3210E-01 3.5260E-01 1.3360E-01 1.0390E-01 6.9560E-02

3.9900E-02 2.1030E-02 8.8500E-03 1.4620E-01 8.5410E-02 4.7090E-02 2.4220E-02

1.1290E-02 4.2180E-03 7.3030E-02 5.0640E-02 2.2980E-02 4.9530E-01 2.2790E-01

1.0190E-01 3.9750E-02 2.1780E-01 1.3750E-01 7.7250E-02 3.7580E-02 2.5380E-01

1.2500E-01 1.9920E-02 2.4940E-01 1.3940E-01 7.6320E-02 3.9830E-02 3.2810E-01

2.8350E-01 1.7180E-01 5.6700E+00 1.0900E+01 4.7340E+00 1.9990E-01 6.9400E-02

3.5780E-02 1.8450E-02 9.8560E-03 3.0620E-02 1.6280E-02 7.5780E-03 2.7140E-03

5.0330E-02 2.5710E-02 1.1340E-02 3.6640E-03 2.0260E+01 4.8640E+00 6.6940E-01

2.6390E-02 5.5220E-02 3.4070E-02 2.4220E-02 1.3410E-02 3.0800E-02 1.8780E-02

1.1820E-02 7.1860E-03 2.6540E-02 2.0340E-02 1.6580E-02 1.3320E-02 2.4140E-02

1.4950E-02 7.7910E-03 3.2500E-03 9.2780E-03 5.8430E-03 3.4640E-03 1.9110E-03

1.2690E-02 8.4920E-03 4.8900E-03 2.2070E-03 2.8900E-01 1.2040E-01 4.3310E-03

2.8800E-02 1.6200E-02 1.0210E-02 5.3360E-03 2.2500E-02 1.7880E-02 1.2790E-02

8.0730E-03 1.0630E-01 2.9960E-02 1.0570E-02 4.0560E-03 2.0860E-02 1.0100E-02

4.5840E-03 1.9590E-03 6.0090E-02 2.9630E-02 1.7140E-02 3.9600E-03 2.3470E-02

1.1290E-02 6.5620E-03 3.3410E-03 8.9790E-03 5.1730E-03 2.4900E-03 9.1810E-04

2.2660E+00 7.9930E-02 1.9430E-01 1.8590E-01 1.2020E-01 3.8720E-01 4.4370E-01

3.0380E-01 1.5290E-01 1.7730E-01 1.6370E-01 1.6530E-01 1.6020E-01 4.4840E-01

3.5380E-01 2.5980E-01 1.4020E-01 4.1260E-02 4.5790E-02 3.9450E-02 2.7940E-02

1.4090E-02 3.1040E-02 5.1420E-02 5.0530E-02 4.0020E-02 2.6420E-02 1.2840E-02

4.4340E-02 2.1380E-02 3.1980E-02 1.4700E-01 2.1970E-01 1.4800E-01 6.3850E-02

9.4160E-02 8.1130E-02 7.6040E-02 6.2140E-02 1.2280E-01 4.9750E-02 9.2310E-02

8.2330E-02 1.1030E-01 8.9050E-02 5.5780E-02 2.8350E-01 1.8590E-01 5.4480E-02

3.7800E+00 4.7310E+00 1.7580E+00 4.4020E+00 1.4200E-02 3.1750E-02 2.7060E-02

1.6010E-02 5.5030E-03 1.1620E-02 1.1760E-02 9.2530E-03 5.6190E-03 1.9920E-02

2.0450E-02 1.4710E-02 3.6560E-01 1.1100E+01 5.4480E+00 1.0340E+00 2.7990E-02

3.3710E-02 1.7650E-02 4.7390E-03 1.2310E-02 1.5390E-02 1.1590E-02 6.6150E-03

1.5100E-02 1.6910E-02 1.2400E-02 6.7830E-03 1.0040E-02 7.8710E-03 8.1580E-03

7.3520E-03 3.2170E-03 4.2050E-03 3.6610E-03 2.6650E-03 4.8930E-03 4.0600E-03

4.6350E-03 5.2620E-03 1.1850E-01 3.8100E-02 1.0380E-01 1.2280E-02 1.6500E-02

8.9500E-03 2.7870E-03 1.4780E-02 1.0720E-02 8.7120E-03 6.6080E-03 1.0240E-02

4.9040E-02 2.6890E-02 6.5390E-03 3.3230E-03 8.9990E-03 7.9150E-03 4.7860E-03

3.6370E-02 1.7140E-02 7.2630E-03 1.0310E-02 7.8470E-03 1.3160E-02 7.1790E-03

2.1100E-03 3.1940E-03 2.9220E-03 2.9870E-03 2.5760E-03 1.9060E-02 4.2370E-02

8.8570E-02 1.3560E-01 2.1070E-01 1.4570E-01 1.4020E-01 1.3220E-01 3.3570E-02

9.7480E-02 1.0730E-01 9.0300E-02 1.5970E-01 1.9260E-01 1.4490E-01 7.5400E-02

1.2190E-02 2.0040E-02 2.2160E-02 1.8660E-02 1.0480E-02 4.3900E-03 1.4940E-02

2.3740E-02 2.6950E-02 2.2760E-02 1.2980E-02 1.3000E-02 2.5740E-02 1.0230E-02

4.8720E-02 7.2600E-02 9.7840E-02 7.0450E-02 2.3800E-02 5.0050E-02 4.8220E-02

3.4600E-02 1.9610E-02 9.1160E-02 2.1560E-02 2.8890E-02 3.9640E-02 5.1390E-02

4.9030E-02 1.7170E-01 5.4470E-02 3.3010E-02 1.8890E+00 1.9930E-01 4.1870E+00

9.3520E-01 5.3800E-03 6.6640E-03 1.3820E-02 1.8590E-02 2.7000E-04 3.3040E-03

6.6600E-03 8.8330E-03 7.1800E-05 3.3910E-03 1.0240E-02 1.6650E-02 5.0950E-03

2.6380E-01 4.5110E+00 4.3980E+00 1.8650E-02 7.2560E-03 9.1560E-03 7.3090E-03

5.7910E-03 5.1170E-03 6.0820E-03 5.7740E-03 9.5500E-03 5.4110E-03 5.1460E-03

5.4790E-03 1.6310E-03 5.8190E-03 5.5350E-03 3.7210E-03 9.8560E-04 1.6220E-03

1.9960E-03 2.0720E-03 4.0620E-04 2.8710E-03 3.3270E-03 2.8130E-03 4.3010E-03

1.0430E-01 2.1620E-02 7.3090E-03 3.7590E-03 5.1020E-03 4.1200E-03 6.4370E-03

6.4460E-03 4.7250E-03 2.7910E-03 5.4560E-03 3.6340E-03 1.9600E-02 1.8440E-02

7.1250E-04 1.7470E-03 4.1830E-03 5.7440E-03 1.8010E-02 3.9520E-03 1.0310E-02

2.4510E-03 4.5620E-03 2.4920E-03 4.3520E-03 3.5530E-03 3.7180E-04 1.9320E-03

2.0320E-03 1.5070E-03 7.9100E+00 4.0850E-01 5.1550E-02 2.1250E+00 5.8840E-01

9.6870E-02 1.2310E-02 2.9400E+00 9.5180E-01 2.7990E-01 3.0280E-02 5.6240E-01

4.1250E-01 9.5100E-02 1.8030E-02 2.3370E-01 1.2150E-01 4.8300E-02 1.4010E-02

1.8340E-03 2.9510E-01 1.3940E-01 5.6430E-02 1.8310E-02 4.3460E-03 5.3420E-04

2.3850E-01 7.4910E-02 1.0200E-02 3.8120E-01 1.0540E-01 2.6500E-02 4.8120E-03

4.2090E-01 1.4000E-01 3.5100E-02 6.3840E-03 1.0300E-01 4.0990E-02 5.2100E-03

1.5720E+00 4.4970E-01 2.3500E-01 4.7960E-02 2.1140E-01 3.4780E-02 5.1810E-03

1.2020E-02 2.3340E-02 1.3700E-02 1.4910E-03 1.6880E+01 8.4740E-01 1.5280E-02

1.5920E-03 2.8480E+01 2.4430E+00 8.3730E-02 1.1730E-03 3.7640E+01 3.1000E+00

1.2280E-01 3.2550E-03 1.9060E-02 4.7830E-03 9.5290E-04 1.2150E-04 3.8530E-02

9.1840E-03 7.3410E-04 8.0130E-05 4.8410E-02 1.6600E-02 3.5100E-03 1.7860E-04

6.4760E+00 2.4520E-01 5.9770E-03 9.1390E-04 1.3100E-01 4.1580E-02 9.6410E-03

1.2220E-03 7.0410E-01 8.2360E-02 1.7450E-02 3.0310E-03 2.1620E+00 2.0670E-01

2.3550E-02 3.3260E-03 8.9750E-03 8.1950E-04 4.1880E-05 1.9950E-02 5.4860E-03

7.7520E-04 5.6230E-05 2.7590E-02 6.8430E-03 1.2520E-03 1.5200E-04 4.1720E-02

7.1730E-03 8.0260E-04 1.8460E-04 1.6640E-01 1.8020E-02 2.3600E-03 2.4260E-04

4.8260E-03 4.4460E-03 2.1170E-03 4.7040E-04 2.2830E-02 3.8430E-03 9.7710E-04

2.2030E-05 4.4750E-02 9.7060E-03 1.5510E-03 1.6390E-04 1.2780E+01 5.0180E-01

7.8330E-01 1.0670E+00 5.4150E-01 1.0300E-01 9.8550E-01 2.0180E+00 1.2460E+00

3.1190E-01 4.8280E-01 5.6940E-01 2.9580E-01 8.1250E-02 1.2880E-01 1.1410E-01

7.4510E-02 4.2720E-02 1.9490E-02 1.2340E-01 1.2360E-01 9.7680E-02 5.9240E-02

2.7180E-02 8.5140E-03 1.3090E-01 9.6580E-02 5.0040E-02 1.7440E-01 1.7450E-01

7.2070E-02 2.2880E-02 1.7810E-01 1.9170E-01 1.1090E-01 3.5810E-02 6.9920E-02

3.4710E-02 2.3390E-02 6.0760E-01 1.0370E+00 7.2630E-01 2.3500E-01 1.1050E-01

8.6240E-02 1.9280E-02 1.0300E-02 1.8760E-02 6.3530E-03 7.9160E-03 1.8140E+00

1.2180E+01 1.0540E+00 1.6970E-02 2.3990E+00 2.5270E+01 3.0190E+00 9.8780E-02

3.1100E-01 3.3640E+01 3.9790E+00 1.4340E-01 8.2600E-03 8.6930E-03 3.4840E-03

8.9180E-04 1.6280E-02 1.6190E-02 8.4060E-03 7.0200E-04 2.0940E-02 2.0510E-02

1.3420E-02 3.9890E-03 5.4690E-01 4.8770E+00 3.0170E-01 6.7200E-03 5.3580E-02

6.0000E-02 3.3350E-02 1.0300E-02 1.1230E-01 4.8490E-01 7.5800E-02 1.8590E-02

2.0610E-01 1.6050E+00 2.3270E-01 2.5880E-02 4.2640E-03 3.6900E-03 4.9140E-04

9.1010E-03 8.1690E-03 4.4790E-03 7.8240E-04 9.4900E-03 1.3720E-02 6.0480E-03

1.3480E-03 1.5340E-02 2.0500E-02 6.4120E-03 6.6500E-04 2.4590E-02 1.1130E-01

1.8760E-02 2.6400E-03 4.1370E-03 3.2920E-03 1.6410E-03 1.1320E-03 8.2200E-03

1.2240E-02 2.2360E-03 1.0550E-03 1.4120E-02 2.3300E-02 8.9370E-03 1.6920E-03

1.2610E+01 2.1450E-01 7.3170E-01 7.1390E-01 4.3760E-01 2.6970E-01 1.2620E+00

1.6250E+00 1.0710E+00 2.2880E-01 4.8170E-01 3.7090E-01 2.0330E-01 5.7420E-02

8.3280E-02 8.4850E-02 6.2820E-02 3.1680E-02 3.7130E-02 8.7650E-02 8.7620E-02

7.2830E-02 5.2890E-02 2.8050E-02 6.1810E-02 9.2230E-02 7.7200E-02 7.2350E-02

1.3060E-01 1.1630E-01 4.9210E-02 6.2270E-02 1.4300E-01 1.3370E-01 9.2000E-02

4.1430E-02 3.8380E-02 2.6770E-02 2.3540E-01 6.5250E-01 1.2250E+00 5.9970E-01

5.2660E-02 8.3590E-02 4.4020E-02 8.5850E-03 1.2240E-02 8.2000E-03 7.0820E-03

9.5750E-02 2.2990E+00 9.4010E+00 8.0340E-01 4.2200E-02 2.9940E+00 1.6840E+01

2.3300E+00 7.7440E-03 1.0270E+00 2.8900E+01 3.0670E+00 3.1180E-03 6.5460E-03

5.7040E-03 2.4410E-03 5.1250E-03 1.4260E-02 9.3330E-03 5.9210E-03 6.6620E-03

1.6890E-02 1.4150E-02 1.1340E-02 2.9640E-02 6.8310E-01 3.8330E+00 2.3070E-01

1.7610E-02 4.3580E-02 4.1940E-02 2.7890E-02 2.3760E-02 1.1140E-01 3.7740E-01

6.4300E-02 2.3540E-02 2.3110E-01 1.2850E+00 1.8670E-01 1.7620E-03 3.5430E-03

1.7690E-03 3.2310E-03 7.3030E-03 5.0720E-03 3.1700E-03 2.6390E-03 8.5300E-03

9.4650E-03 4.9210E-03 4.5950E-03 1.4140E-02 1.2530E-02 4.4560E-03 3.7630E-03

2.6270E-02 8.5350E-02 1.5260E-02 3.4480E-03 2.1150E-03 1.7280E-03 1.1780E-03

2.9430E-03 6.7700E-03 8.4660E-03 1.6260E-03 3.5720E-03 1.3260E-02 1.6020E-02

7.2050E-03 3.9590E-02 2.4710E-01 6.3140E-01 7.7150E-01 4.5310E-02 4.1930E-01

1.2320E+00 1.8800E+00 8.6580E-02 2.8510E-01 4.0330E-01 2.8050E-01 1.5250E-02

5.7040E-02 7.4300E-02 6.7710E-02 4.0220E-02 6.1540E-03 3.3530E-02 6.5610E-02

7.8810E-02 6.8350E-02 3.9070E-02 2.0910E-02 7.5430E-02 8.8510E-02 2.4490E-02

7.6310E-02 1.0860E-01 8.4570E-02 1.5610E-02 6.6400E-02 1.2590E-01 1.3610E-01

2.0230E-02 4.2290E-02 2.2740E-02 1.1010E-01 4.4070E-01 8.9210E-01 1.1690E+00

2.1970E-02 5.9340E-02 6.2810E-02 6.8700E-03 6.2120E-03 1.2120E-02 3.6990E-03

4.4390E-03 1.1560E-01 1.8990E+00 1.1080E+01 1.1730E-03 9.8780E-02 2.3160E+00

1.5410E+01 1.3520E-03 2.0940E-02 1.5810E+00 2.6010E+01 8.9310E-04 3.4720E-03

5.5200E-03 4.3540E-03 1.0690E-03 6.1050E-03 1.2010E-02 8.5440E-03 1.0680E-03

7.6660E-03 1.5170E-02 1.5330E-02 1.4220E-03 3.5520E-02 5.2850E-01 3.2360E+00

3.7630E-03 1.9540E-02 3.8630E-02 4.2910E-02 4.4870E-03 2.5920E-02 9.3570E-02

3.4220E-01 3.3250E-03 2.5870E-02 1.8970E-01 1.1670E+00 5.3260E-04 2.2590E-03

2.8460E-03 7.8100E-04 3.7420E-03 6.2310E-03 4.2420E-03 4.9630E-04 2.9820E-03

7.3250E-03 9.6580E-03 1.1130E-03 5.3290E-03 1.1690E-02 1.0430E-02 4.4110E-04

4.3120E-03 2.1540E-02 7.9030E-02 2.7580E-03 1.2300E-03 1.8480E-03 8.9670E-04

7.3410E-04 3.3810E-03 5.7320E-03 6.0340E-03 6.0520E-04 4.0760E-03 1.1260E-02

1.6120E-02 6.8070E+00 3.0410E-01 6.4120E-02 1.4810E+00 6.5630E-01 2.0210E-01

4.3250E-02 1.8050E+00 9.2650E-01 2.7260E-01 5.4110E-02 1.4470E-01 7.8440E-02

3.9880E-02 2.0730E-02 9.2310E-03 2.4630E-01 1.5520E-01 9.5440E-02 5.3170E-02

2.5370E-02 9.2500E-03 1.6260E-01 7.4860E-02 2.1970E-02 8.7950E-01 1.6130E-01

4.6830E-02 1.5040E-02 4.7020E-01 1.7480E-01 6.6210E-02 2.2810E-02 2.0400E-01

9.4740E-02 1.7770E-02 1.1730E+00 7.9100E-01 2.6820E-01 9.6640E-02 2.6360E-01

1.0700E-01 3.9340E-02 2.1980E-01 2.6060E-01 1.3190E-01 5.9470E-02 8.7690E+00

1.0730E+00 9.3680E-02 7.5180E-03 4.8490E-01 2.5620E-01 6.2650E-02 9.0320E-03

7.0170E-01 2.6060E-01 7.5780E-02 7.7610E-03 1.6070E-01 2.6850E-02 1.8080E-02

9.5240E-03 1.7690E+01 4.3380E-01 5.8020E-03 7.6670E-04 2.2710E+01 2.6590E+00

1.1170E-01 9.7080E-04 2.5340E+01 2.5640E+00 1.5010E-01 5.3790E-03 7.2970E-01

1.0900E-01 9.6490E-03 1.1950E-03 5.5090E-01 7.8750E-02 1.1770E-02 2.0600E-03

6.2270E-02 2.9650E-02 1.0790E-02 2.1530E-03 4.2730E-02 1.1260E-02 1.7440E-03

7.8750E-01 4.9420E-02 6.5060E-03 1.6720E-03 3.9680E-01 6.6890E-02 9.9930E-03

2.0380E-03 4.3060E-02 1.6490E-02 4.7790E-03 1.1440E-03 5.1930E-02 2.1340E-02

6.6470E-03 1.8550E-03 1.1030E-02 7.8530E-03 4.7700E-03 1.9510E-03 1.9540E-02

8.8910E-03 3.6220E-03 1.2400E-03 4.1850E-02 1.8610E-02 5.3320E-03 1.3920E-03

8.4150E+00 3.2700E-01 4.6060E-01 8.5310E-01 5.7200E-01 2.2030E-01 9.4930E-01

1.0070E+00 6.0610E-01 2.3710E-01 6.9560E-02 7.5990E-02 5.3990E-02 2.9300E-02

1.1530E-02 1.3160E-01 1.1930E-01 8.4140E-02 6.1320E-02 4.5490E-02 2.5720E-02

9.4210E-02 6.4450E-02 4.8860E-02 2.4770E-01 4.8240E-01 1.1940E-01 3.2120E-02

1.7470E-01 2.3030E-01 1.2330E-01 5.9200E-02 1.3350E-01 6.6030E-02 5.3700E-02

7.9090E-01 6.5160E-01 6.1470E-01 2.3460E-01 1.6160E-01 1.1620E-01 5.0280E-02

1.7580E-01 1.7840E-01 1.2700E-01 5.6230E-02 4.7970E-01 6.1390E+00 1.2790E+00

1.1380E-01 1.8450E-01 3.5800E-01 2.4110E-01 7.2970E-02 1.3760E-01 7.9630E-01

4.4420E-01 9.0800E-02 4.2320E-02 1.0840E-01 1.5310E-02 6.4510E-03 2.4410E+00

1.1570E+01 4.7890E-01 4.0410E-03 2.6510E+00 1.4400E+01 3.1800E+00 1.3950E-01

7.8250E-01 1.8380E+01 3.2750E+00 1.8810E-01 1.0780E-01 4.4840E-01 1.1360E-01

1.1010E-02 3.3420E-02 4.1720E-01 8.4360E-02 1.3210E-02 2.4270E-02 2.5580E-02

2.1960E-02 1.2090E-02 2.1770E-02 1.6220E-02 6.5760E-03 1.3910E-01 4.8420E-01

4.5760E-02 5.1540E-03 6.6690E-02 2.3390E-01 6.8070E-02 1.0460E-02 1.9950E-02

1.7170E-02 1.1270E-02 3.9110E-03 1.7620E-02 2.5300E-02 1.7490E-02 6.8530E-03

8.8260E-03 5.9480E-03 3.5640E-03 2.1320E-03 1.0190E-02 8.5160E-03 5.5730E-03

2.3330E-03 1.6460E-02 1.8600E-02 1.5290E-02 5.2910E-03 6.3230E+00 1.2130E-01

4.8300E-01 5.8220E-01 4.8440E-01 4.1840E-01 7.6040E-01 6.5300E-01 3.8240E-01

3.5200E-02 4.9730E-02 4.5840E-02 3.3680E-02 1.7670E-02 6.7920E-02 6.3180E-02

8.0500E-02 7.1860E-02 4.6470E-02 2.0710E-02 4.6980E-02 5.7600E-02 5.1040E-02

7.8330E-02 2.1150E-01 2.9690E-01 7.4170E-02 6.6200E-02 1.2320E-01 1.5730E-01

9.4010E-02 7.3200E-02 6.9550E-02 4.7200E-02 2.6820E-01 6.1470E-01 6.9770E-01

4.6380E-01 9.6030E-02 9.5360E-02 5.4810E-02 1.3190E-01 1.1960E-01 9.8720E-02

5.2890E-02 2.2240E-02 5.5370E-01 4.4420E+00 9.9410E-01 2.4900E-02 1.7540E-01

2.3710E-01 2.0500E-01 5.6880E-03 2.4810E-01 5.4360E-01 3.6610E-01 2.2360E-02

3.5960E-02 6.6110E-02 5.6820E-03 1.9340E-01 2.9540E+00 7.3970E+00 3.3440E-01

1.0830E-01 3.2340E+00 9.5290E+00 2.4140E+00 7.1000E-03 9.5330E-01 1.3490E+01

2.5180E+00 9.5380E-03 1.1350E-01 2.9730E-01 8.6690E-02 6.1340E-03 3.2100E-02

3.4390E-01 6.8550E-02 6.2990E-03 1.7900E-02 1.8500E-02 2.0220E-02 9.8220E-03

1.4470E-02 9.1510E-03 2.0300E-02 1.4940E-01 3.0510E-01 3.0900E-02 9.9450E-03

6.7950E-02 1.5290E-01 5.2120E-02 7.7350E-03 1.3870E-02 1.0180E-02 7.0960E-03

4.6320E-03 1.4510E-02 1.7290E-02 1.4610E-02 6.6190E-03 4.0880E-03 2.9620E-03

1.6550E-03 5.3050E-03 6.4830E-03 5.5880E-03 2.9470E-03 4.9590E-03 1.1650E-02

1.2970E-02 1.1930E-02 2.3800E-02 1.4600E-01 3.8340E-01 5.5940E-01 1.2790E-01

4.3370E-01 5.5460E-01 3.6730E-01 1.8940E-02 2.3450E-02 3.0860E-02 2.9710E-02

1.8120E-02 2.2290E-02 5.2280E-02 5.1890E-02 4.6970E-02 3.8190E-02 2.2060E-02

1.9070E-02 4.5170E-02 3.9500E-02 2.9030E-02 7.0550E-02 1.5410E-01 1.8580E-01

2.2820E-02 5.9190E-02 9.3990E-02 1.1770E-01 3.2470E-02 6.5080E-02 2.9020E-02

9.6610E-02 2.3460E-01 4.6380E-01 5.6760E-01 5.3240E-02 6.4130E-02 4.6000E-02

8.7920E-02 7.4200E-02 6.4240E-02 4.2380E-02 3.1480E-03 2.4290E-02 4.1970E-01

3.5610E+00 1.6960E-03 2.8030E-02 1.4050E-01 2.5810E-01 5.1370E-04 6.1880E-03

1.8970E-01 5.7930E-01 1.5000E-02 1.1010E-02 2.1500E-02 3.8390E-02 7.0680E-03

2.6310E-01 2.2640E+00 5.0970E+00 9.7070E-04 1.3920E-01 2.4450E+00 7.6470E+00

1.8900E-03 7.0000E-03 7.1380E-01 1.0550E+01 1.1880E-03 1.1010E-02 8.9760E-02

2.3920E-01 1.1720E-03 6.5960E-03 2.5530E-02 2.7800E-01 5.8360E-04 6.9430E-03

1.5490E-02 1.8930E-02 3.7010E-03 1.0060E-02 8.5360E-03 3.8440E-03 2.3090E-02

1.1380E-01 1.9730E-01 2.0290E-03 1.0450E-02 5.2060E-02 1.2400E-01 2.5240E-03

7.4350E-03 1.0070E-02 6.1730E-03 1.1600E-03 4.4730E-03 1.1540E-02 1.6730E-02

4.4130E-03 2.5000E-03 2.2740E-03 1.0460E-03 2.2950E-03 4.0160E-03 4.1200E-03

2.6180E-03 1.2040E-03 5.2380E-03 9.3990E-03 1.0170E-02 7.0000E+00 2.9700E-01

4.3740E-02 1.8390E+00 6.2950E-01 1.7970E-01 4.5450E-02 1.2990E-01 6.5510E-02

2.6220E-02 9.2060E-03 2.4410E-03 2.4980E-01 1.4360E-01 7.2290E-02 3.0540E-02

9.9880E-03 2.0880E-03 1.1740E-01 2.7690E-02 7.9350E-03 3.6560E-01 1.2130E-01

3.5970E-02 6.9840E-03 8.5610E-01 1.3980E-01 3.9460E-02 1.2050E-02 1.7100E-01

3.7830E-02 1.0720E-02 1.8650E+00 5.8750E-01 1.7190E-01 6.0070E-02 2.1630E-01

7.0770E-02 1.0880E-02 4.6540E-03 2.1670E-02 5.2600E-03 1.8210E-03 1.7280E+00

2.1620E-01 2.9550E-02 2.9200E-03 3.2050E+00 3.5440E-01 4.0240E-02 4.9780E-03

1.1530E-01 9.5510E-02 2.9450E-02 4.5010E-03 2.2980E-02 1.1080E-02 3.3270E-03

4.7820E-04 5.9390E-02 1.7980E-02 2.7860E-03 4.2760E-04 5.8360E-01 3.4580E-02

5.6420E-03 1.5850E-03 1.2390E-01 4.4150E-02 1.2950E-02 2.2760E-03 1.9950E+01

6.5260E-01 5.5370E-03 7.9930E-04 2.6540E+01 2.4250E+00 9.2950E-02 6.6170E-04

3.4080E+01 2.7790E+00 1.2900E-01 4.1510E-03 3.1640E-02 6.3200E-03 2.1590E-03

6.8540E-02 2.7090E-02 1.0150E-02 2.6210E-03 1.7600E+00 8.3570E-02 1.2280E-02

4.0000E-03 5.0750E-02 1.4250E-02 3.5450E-03 3.6840E-04 1.2350E-01 2.5760E-02

5.1910E-03 7.9930E-04 9.4980E-04 1.0960E-02 3.3310E-03 8.3320E-04 2.3640E-02

8.3100E-03 2.1760E-03 4.7820E-04 7.4460E-02 1.6660E-02 3.2470E-03 5.4190E-04

1.1440E+01 3.4430E-01 8.2900E-01 1.1990E+00 4.3390E-01 1.3890E-01 6.2320E-02

7.0940E-02 4.2350E-02 2.2670E-02 9.6550E-03 1.2750E-01 1.0100E-01 8.2480E-02

5.9780E-02 3.6400E-02 1.6350E-02 5.3900E-02 5.5800E-02 1.7800E-02 1.7190E-01

1.6340E-01 7.9610E-02 2.8890E-02 1.9290E-01 5.2680E-01 1.1400E-01 3.6020E-02

9.0110E-02 7.3560E-02 1.9320E-02 6.9050E-01 9.1370E-01 4.8410E-01 1.4950E-01

1.3170E-01 7.9070E-02 4.0020E-02 3.8780E-03 1.1770E-02 9.6680E-03 2.5570E-03

2.1470E-01 1.0880E+00 2.2790E-01 3.3980E-02 2.0500E-01 2.4160E+00 4.0980E-01

4.5810E-02 7.9740E-02 1.1800E-01 8.0210E-02 3.2890E-02 1.3790E-02 8.3180E-03

6.5100E-03 3.0930E-03 2.6290E-02 2.3400E-02 1.4880E-02 2.5260E-03 7.8170E-02

4.0850E-01 3.3920E-02 5.3190E-03 4.4130E-02 5.9560E-02 3.4970E-02 1.4060E-02

2.0530E+00 1.4290E+01 7.9300E-01 5.9610E-03 2.4170E+00 1.8720E+01 2.9820E+00

1.1250E-01 5.2130E-01 2.6770E+01 3.5350E+00 1.5560E-01 1.6150E-02 1.4080E-02

3.0660E-03 3.6310E-02 3.0990E-02 1.5520E-02 7.9590E-03 2.0300E-01 1.2330E+00

8.4720E-02 1.1260E-02 2.1510E-02 2.3110E-02 9.5130E-03 3.3820E-03 2.5710E-02

8.5000E-02 2.5050E-02 5.6700E-03 7.9170E-04 6.4080E-03 4.4450E-03 1.7470E-03

1.1570E-02 9.7900E-03 6.0070E-03 1.7790E-03 2.1140E-02 3.9840E-02 1.4700E-02

3.4160E-03 9.1720E+00 3.5390E-01 7.6970E-01 7.7250E-01 2.8290E-01 2.6670E-02

4.2760E-02 4.8890E-02 3.4770E-02 1.5560E-02 4.8490E-02 7.5780E-02 7.3280E-02

6.3990E-02 4.9520E-02 2.7580E-02 2.3140E-02 4.5110E-02 3.3680E-02 7.3620E-02

1.2130E-01 1.0780E-01 5.1660E-02 5.5260E-02 1.7370E-01 3.7820E-01 8.9570E-02

4.5720E-02 6.5300E-02 3.5370E-02 2.3480E-01 5.7790E-01 6.0300E-01 3.7460E-01

7.0450E-02 7.9010E-02 5.0570E-02 3.1030E-03 6.2950E-03 8.4150E-03 4.4540E-03

2.9420E-02 2.2790E-01 8.0330E-01 1.8380E-01 2.2370E-02 2.2650E-01 1.8890E+00

3.2560E-01 1.9390E-02 6.6300E-02 8.8640E-02 7.4390E-02 6.6230E-03 8.1190E-03

6.3290E-03 4.3060E-03 8.8220E-03 2.1210E-02 1.3460E-02 1.0240E-02 1.0450E-02

8.5850E-02 2.9860E-01 2.6110E-02 1.2940E-02 3.4970E-02 4.3310E-02 3.0910E-02

1.2260E-01 2.5430E+00 1.0460E+01 5.9450E-01 9.0740E-02 2.9800E+00 1.4030E+01

2.2870E+00 3.6280E-03 1.5410E+00 2.1080E+01 2.7200E+00 8.1540E-03 1.2210E-02

6.3250E-03 1.7960E-02 2.2860E-02 2.1840E-02 9.7380E-03 2.4890E-02 2.3360E-01

9.1450E-01 6.4640E-02 8.2100E-03 1.5850E-02 1.5480E-02 6.4660E-03 5.1880E-03

2.5050E-02 6.2000E-02 2.0600E-02 6.3340E-04 3.5080E-03 4.1390E-03 2.4100E-03

4.7750E-03 8.2180E-03 6.4470E-03 3.9790E-03 5.1040E-03 1.9170E-02 2.7180E-02

1.1730E-02 1.3870E-01 3.8380E-01 6.0390E-01 5.2710E-01 8.8390E-03 2.4960E-02

3.4870E-02 3.4030E-02 2.1650E-02 9.9540E-03 4.2840E-02 6.2550E-02 6.3080E-02

4.8950E-02 2.6250E-02 9.6240E-03 2.4330E-02 4.2300E-02 2.7340E-02 7.2770E-02

9.5380E-02 6.9850E-02 1.7920E-02 5.4640E-02 1.4020E-01 3.0940E-01 2.2590E-02

4.2910E-02 4.4290E-02 8.6230E-02 2.2270E-01 4.6720E-01 5.6610E-01 3.2070E-02

7.0620E-02 4.7720E-02 2.3270E-03 3.4090E-03 5.4150E-03 5.5500E-03 2.9120E-03

3.3970E-02 1.8380E-01 7.3810E-01 2.6850E-03 2.4670E-02 1.8090E-01 1.6400E+00

1.0160E-03 2.1500E-02 5.9960E-02 1.0330E-01 2.1540E-03 6.7710E-03 6.5640E-03

3.4190E-03 2.1890E-03 9.9440E-03 1.7230E-02 1.0940E-02 2.4580E-03 1.1210E-02

6.7330E-02 2.3510E-01 2.2760E-03 1.4060E-02 3.0910E-02 4.4330E-02 3.8400E-03

1.5460E-01 1.9580E+00 8.1990E+00 6.6150E-04 1.1230E-01 2.2880E+00 1.2150E+01

4.9490E-04 4.3160E-03 1.1700E+00 1.7860E+01 4.1660E-03 7.3820E-03 8.4090E-03

7.6880E-03 1.6860E-02 1.7470E-02 1.2340E-02 5.9950E-03 2.6680E-02 1.8160E-01

7.1590E-01 2.2400E-03 8.9000E-03 1.2860E-02 1.0380E-02 7.9910E-04 5.6450E-03

2.0600E-02 5.0780E-02 4.7500E-04 1.8020E-03 3.1940E-03 2.5430E-03 1.6510E-03

4.8310E-03 6.5480E-03 4.2810E-03 1.0060E-03 5.6360E-03 1.5820E-02 2.4900E-02

4.3840E+00 4.4620E-01 1.7850E-01 6.9870E-02 4.6350E-02 2.7200E-02 1.5070E-02

6.7560E-03 8.7080E-02 5.8690E-02 3.9910E-02 2.7440E-02 1.7860E-02 8.9580E-03

6.4100E-02 3.4190E-02 2.2200E-02 5.9990E-01 3.3810E-01 1.1060E-01 3.7260E-02

6.1630E-01 2.0880E-01 1.8660E-01 6.5470E-02 6.6600E-01 1.1170E-01 3.6820E-02

1.1670E+00 6.4420E-01 3.4620E-01 1.7830E-01 6.9170E-01 3.8800E-01 4.8540E-02

4.6570E-02 2.0540E-01 6.4630E-02 3.5230E-02 2.1910E-01 9.6920E-02 3.0070E-02

6.4190E-03 1.5490E-01 6.5210E-02 2.2690E-02 5.7240E-03 1.3800E-01 6.3040E-02

2.2330E-02 4.9490E-03 4.0300E-02 2.1940E-02 1.2580E-02 5.7370E-03 2.2030E+00

4.2090E-01 2.6770E-02 4.6180E-03 2.0450E+00 3.2680E-01 4.7180E-02 9.3860E-03

1.3210E-01 6.8480E-02 2.9850E-02 1.0000E-02 2.7640E+00 4.0660E-01 4.9280E-02

8.2910E-03 1.6890E-01 6.3090E-02 2.2880E-02 7.9600E-03 1.8770E-01 7.9890E-02

3.4150E-02 1.3160E-02 1.2390E+01 2.2600E-01 5.7220E-03 1.6870E+01 3.1030E+00

1.2150E-01 2.5580E-03 2.5560E+01 3.3540E+00 2.7600E-01 1.4950E-02 1.2830E-01

4.6040E-02 1.2660E-02 2.4960E-03 2.6250E-02 1.4950E-02 7.2790E-03 2.8180E-03

3.2720E-02 1.1310E-01 1.7880E-02 8.4580E-03 4.7060E-02 2.5170E-02 1.0120E-02

2.6280E-03 3.2420E-02 1.2790E-02 4.9190E-03 1.3320E-03 5.0620E+00 2.6000E-01

3.9220E-02 3.2300E-02 2.7620E-02 1.8070E-02 7.3450E-03 4.5440E-02 4.5080E-02

3.9390E-02 2.7900E-02 1.5720E-02 6.4410E-03 3.6510E-02 3.6500E-02 1.7380E-02

2.0270E-01 3.3080E-01 1.0960E-01 7.7060E-02 2.9690E-01 1.9610E-01 1.5130E-01

8.2710E-02 2.0760E-01 3.1590E-01 5.3010E-02 5.5810E-01 5.4360E-01 4.0660E-01

2.4410E-01 4.6110E-01 1.3650E-01 2.4850E-01 3.4920E-02 9.6950E-02 1.0840E-01

2.2180E-02 6.6230E-02 8.1980E-02 8.1140E-02 3.5070E-02 3.6550E-02 6.9650E-02

5.4160E-02 2.6040E-02 3.4240E-02 5.7850E-02 5.2610E-02 2.6530E-02 2.1820E-02

2.1180E-02 1.1740E-02 5.7640E-03 4.2000E-01 1.0810E+00 4.6380E-01 2.6510E-02

1.0050E-01 1.3130E+00 3.6030E-01 5.3410E-02 5.1400E-02 5.2360E-02 4.5810E-02

3.0730E-02 9.7590E-02 1.8080E+00 4.6560E-01 5.7850E-02 3.7730E-02 8.4660E-02

5.1540E-02 2.3230E-02 4.5350E-02 9.5050E-02 6.1130E-02 3.4660E-02 2.9750E+00

6.3370E+00 1.6060E-01 3.1010E+00 8.3040E+00 3.5020E+00 1.5470E-01 6.3390E-01

1.5690E+01 4.0520E+00 3.6670E-01 4.6020E-02 5.1660E-02 3.2570E-02 1.1940E-02

1.1740E-02 1.0150E-02 9.2690E-03 7.0740E-03 2.4540E-02 3.8090E-02 5.8080E-02

7.0420E-03 2.5160E-02 1.6880E-02 1.3450E-02 8.4320E-03 9.6200E-03 1.5120E-02

8.6460E-03 4.8500E-03 3.4300E+00 1.8850E-02 2.4260E-02 1.7560E-02 1.4120E-02

9.0940E-03 2.5090E-02 2.9850E-02 2.3200E-02 1.8530E-02 1.4700E-02 8.5790E-03

2.2170E-02 2.1390E-02 1.6490E-02 9.3940E-02 1.5040E-01 1.9270E-01 5.9110E-02

9.8810E-02 1.1930E-01 1.3100E-01 1.0200E-01 7.6350E-02 1.6450E-01 1.3020E-01

2.5720E-01 3.3600E-01 3.2150E-01 2.5370E-01 2.0280E-01 2.2330E-01 1.3810E-01

2.3280E-02 5.2990E-02 6.1040E-02 3.8350E-02 7.4500E-03 5.8880E-02 4.3820E-02

6.6180E-02 5.5940E-03 2.9210E-02 4.3810E-02 4.5650E-02 3.3510E-03 2.9150E-02

3.5810E-02 4.5850E-02 1.2580E-02 1.1650E-02 1.1340E-02 4.7820E-03 2.6520E-02

4.6370E-01 5.1400E-01 3.2360E-01 1.7620E-02 8.5680E-02 8.4110E-01 2.7430E-01

1.4270E-02 3.3510E-02 3.5570E-02 3.6840E-02 1.5880E-02 8.5130E-02 1.1640E+00

3.5540E-01 9.9070E-03 2.7110E-02 5.3780E-02 4.0620E-02 1.4290E-02 2.8160E-02

6.4830E-02 5.0200E-02 4.0780E-01 3.3300E+00 2.5830E+00 1.2080E-01 3.5020E+00

3.9520E+00 2.4660E+00 1.0250E-02 7.0480E-01 9.9970E+00 3.1070E+00 1.2660E-02

3.2570E-02 2.9970E-02 1.9630E-02 3.8900E-03 7.0490E-03 7.4580E-03 7.3450E-03

1.6360E-02 1.5160E-02 3.1760E-02 2.2470E-02 1.0120E-02 1.3340E-02 1.2360E-02

6.6390E-03 2.9440E-03 5.8460E-03 1.0270E-02 6.3500E-03 8.0820E-03 8.6350E-03

1.1190E-02 8.7740E-03 4.0110E-03 1.3780E-02 9.2180E-03 1.1760E-02 1.1840E-02

8.8340E-03 4.4950E-03 1.1100E-02 8.2530E-03 1.0650E-02 3.4960E-02 7.3120E-02

1.1080E-01 4.0060E-02 3.3260E-02 7.2170E-02 6.8540E-02 7.2170E-02 2.8220E-02

5.3010E-02 9.9080E-02 1.0230E-01 1.4490E-01 1.7800E-01 1.5900E-01 5.4570E-02

1.9250E-01 3.4990E-02 1.1640E-02 2.6050E-02 1.8820E-02 3.1290E-02 1.0090E-03

7.0620E-03 4.0820E-02 3.9240E-02 6.1270E-04 5.3910E-03 2.0570E-02 3.5560E-02

2.9530E-05 3.6260E-03 2.0970E-02 3.2460E-02 5.7350E-03 5.7620E-03 4.7500E-03

3.9330E-03 4.5900E-03 2.6460E-02 3.2360E-01 3.0940E-01 3.8870E-03 1.4950E-02

5.7170E-02 5.3340E-01 2.5680E-03 1.2610E-02 2.2320E-02 2.2610E-02 3.2560E-03

1.3890E-02 5.7170E-02 7.3600E-01 2.5040E-03 7.6950E-03 1.7800E-02 3.7710E-02

3.1350E-03 1.1620E-02 1.8800E-02 4.5180E-02 1.7740E-02 6.3100E-01 2.5110E+00

2.4800E-03 1.5460E-01 2.4660E+00 2.3950E+00 4.9360E-03 4.5210E-03 4.9080E-01

6.4040E+00 2.4950E-03 1.1940E-02 1.9630E-02 1.3320E-02 8.4080E-04 3.2610E-03

4.5430E-03 3.9900E-03 8.1800E-03 6.4010E-03 8.0940E-03 1.9990E-02 2.6130E-03

8.4320E-03 6.8240E-03 3.7890E-03 5.0870E-04 2.7190E-03 3.6750E-03 5.7200E-03

3.8450E+00 1.0690E+00 2.5360E-01 1.0260E-01 8.8180E+00 3.7050E+00 1.0450E+00

2.0250E-01 3.3680E-02 7.3260E-03 3.6480E+00 1.1810E+00 4.0750E-02 3.2580E+00

4.8210E-01 8.8850E-02 6.5640E-03 2.3780E+00 7.1430E-01 1.1560E-01 8.6020E-03

8.5770E-01 1.5550E-01 1.2140E-02 4.7250E-02 2.1780E-02 9.3650E-03 3.5410E-03

2.1530E-02 1.3860E-02 7.4330E-03 5.2330E-02 1.2020E-01 1.2410E-02 3.6460E-03

2.2150E-01 1.8020E-01 8.3850E-02 1.9320E-02 1.5950E-01 7.8310E-02 2.3340E-02

3.6450E-03 9.6220E-02 2.5390E-02 5.2900E-03 6.7460E-04 1.1850E-01 3.7720E-02

6.5360E-03 1.0500E-04 1.1310E-01 5.8540E-02 5.1740E-02 3.3640E-02 1.7160E-01

4.1730E-02 1.0580E-02 2.4950E-03 4.6610E-02 1.5230E-02 4.0840E-03 9.0590E-04

8.8400E-02 7.9480E-02 4.6910E-02 1.5290E-02 1.9900E-01 4.4530E-02 7.2700E-03

6.9690E-04 3.6660E-02 1.5610E-02 4.5080E-03 7.7670E-04 5.2690E-02 3.8400E-02

9.8470E-03 5.8420E-02 2.6620E-02 1.4360E-02 7.5150E-03 5.1220E-02 2.4420E-02

8.4860E-03 2.2270E-03 7.4380E-02 7.6750E-02 3.8650E-02 8.9760E-03 4.8700E-02

2.7230E-02 9.4590E-03 1.9770E-03 5.1740E-02 2.4040E-02 1.1080E-02 6.6510E-03

2.0970E-02 1.0860E-02 5.6640E-03 2.7470E-03 3.3030E-02 1.6420E-02 6.2230E-03

1.4710E-03 3.4550E+00 1.4930E+00 1.8920E-01 2.7550E+00 3.0490E+00 3.2860E+00

1.5660E+00 3.7550E-01 5.1330E-02 1.8450E+00 1.2610E+00 7.8520E-01 9.9350E-01

1.6370E+00 3.3890E-01 8.5790E-02 8.3320E-01 9.9280E-01 6.1780E-01 1.2370E-01

4.1640E-01 3.1540E-01 8.8440E-02 2.3280E-02 2.0320E-02 1.3090E-02 7.6770E-03

1.7330E-02 1.2530E-02 5.3450E-03 4.1860E-02 5.2290E-02 5.0760E-02 5.9910E-03

1.7310E-01 5.5470E-02 9.2790E-02 8.2680E-02 7.0990E-02 5.5120E-02 6.1230E-02

2.4560E-02 1.8900E-02 5.3350E-02 2.4220E-02 5.6350E-03 5.2620E-02 4.3630E-02

2.6540E-02 6.9160E-03 6.9730E-02 8.7760E-02 3.8930E-02 1.0140E-02 5.1290E-02

8.7440E-02 3.2620E-02 9.8320E-03 1.5020E-02 2.1960E-02 1.2390E-02 4.0650E-03

7.8610E-02 3.6060E-02 2.9540E-02 3.9840E-02 4.4870E-02 1.0630E-01 4.2140E-02

7.8960E-03 1.4000E-02 1.4790E-02 1.2520E-02 4.7130E-03 4.4220E-02 1.7630E-02

1.8850E-02 3.2590E-02 3.0290E-02 1.7370E-02 5.2420E-03 2.6080E-02 1.9540E-02

1.6030E-02 7.7100E-03 7.6760E-02 2.5230E-02 2.7480E-02 2.9540E-02 2.6390E-02

1.5380E-02 1.8660E-02 9.4760E-03 4.1390E-02 1.6020E-02 1.3410E-02 3.9830E-03

1.2760E-02 1.0270E-02 6.7310E-03 2.3540E-03 1.7410E-02 1.2750E-02 9.7350E-03

5.8100E-03 1.9690E+00 1.2110E+00 2.1630E-01 2.8440E+00 1.2820E+00 2.0360E+00

1.5230E+00 4.1670E-01 7.5950E-01 1.1330E+00 1.0250E+00 2.7440E-01 8.9110E-01

9.1510E-01 2.0450E-01 2.0580E-01 7.1180E-01 5.8160E-01 4.2400E-01 1.7980E-01

2.8160E-01 1.5380E-01 1.1000E-02 1.4720E-02 1.3990E-02 9.4580E-03 1.2910E-02

9.0360E-03 4.0650E-03 3.1400E-02 2.1070E-02 4.1990E-02 1.8720E-02 8.2360E-02

7.9140E-02 5.4100E-02 8.7390E-02 1.9630E-02 5.2920E-02 3.7260E-02 4.9110E-02

2.2420E-03 2.0530E-02 3.5850E-02 1.7790E-02 1.8830E-02 3.6110E-02 2.6090E-02

1.6290E-02 5.5960E-02 5.6480E-02 3.3040E-02 9.4190E-03 1.4560E-02 4.4740E-02

5.3860E-02 2.2710E-02 4.0590E-03 1.2630E-02 1.4170E-02 9.2110E-03 5.0190E-02

2.7300E-02 3.4570E-02 2.5980E-02 6.9740E-03 4.7140E-02 6.7180E-02 2.9650E-02

3.6860E-03 1.1040E-02 9.9090E-03 9.8810E-03 3.0160E-02 1.7030E-02 1.3470E-02

1.9400E-02 2.2680E-02 1.4530E-02 7.5350E-03 1.0740E-02 1.6390E-02 1.2920E-02

1.1760E-02 5.2520E-02 2.2480E-02 2.8480E-02 1.5800E-02 9.6290E-03 1.6730E-02

1.0940E-02 1.5140E-02 3.1050E-02 1.1240E-02 9.7930E-03 4.0290E-03 7.7380E-03

8.1520E-03 5.1560E-03 3.0330E-03 7.6200E-03 1.0080E-02 9.0900E-03 7.4970E-03

1.2790E+00 3.3530E-02 2.4080E-01 2.1320E+00 9.3860E-01 1.0170E+00 1.1870E+00

2.0980E-01 8.4410E-01 8.9030E-01 6.6810E-02 3.2310E-01 6.8340E-01 4.4650E-01

2.7850E-02 2.9120E-01 4.6430E-01 4.9240E-01 6.5700E-02 1.8550E-01 1.5900E-01

4.5390E-03 8.6590E-03 1.0700E-02 8.8450E-03 8.7230E-03 5.5320E-03 2.8990E-03

2.0930E-02 8.0350E-03 2.2750E-02 2.3730E-02 2.4820E-02 7.0290E-02 5.8330E-02

4.8520E-02 2.5830E-03 2.6010E-02 3.3420E-02 4.3930E-02 1.4670E-04 3.4860E-03

1.9380E-02 2.7930E-02 4.7970E-03 2.0650E-02 2.3480E-02 1.6200E-02 4.4820E-02

2.3250E-02 2.1330E-02 1.3480E-02 4.1360E-03 1.5550E-02 3.6000E-02 3.4900E-02

9.1600E-04 4.7340E-03 9.6810E-03 1.1440E-02 2.2730E-02 3.1230E-02 2.5480E-02

1.2610E-02 6.2210E-04 1.0610E-02 4.0340E-02 4.9060E-02 5.4890E-04 4.7980E-03

7.6410E-03 1.0040E-02 1.7050E-02 1.7000E-02 6.2210E-03 1.1910E-02 1.2160E-02

1.1320E-02 7.3610E-03 3.5670E-03 9.9800E-03 1.0980E-02 1.0010E-02 2.6030E-02

3.0750E-02 1.8030E-02 4.6060E-03 2.3280E-03 1.0240E-02 1.0690E-02 1.1700E-02

2.0700E-02 7.5080E-03 5.3640E-03 3.8300E-03 4.5980E-03 4.8620E-03 4.0590E-03

2.5450E-03 2.5750E-03 6.6150E-03 7.3840E-03 6.2830E-03 6.5200E-03 3.4410E-02

1.7420E-01 1.2110E+00 1.0250E+00 3.2600E-01 1.6280E-02 4.4830E-01 5.0740E-01

1.1220E-02 9.7030E-02 2.5570E-01 3.9500E-01 1.5360E-03 4.6750E-02 2.7300E-01

3.1390E-01 1.8370E-02 8.7320E-02 9.9380E-02 1.5740E-03 4.0520E-03 5.2090E-03

5.1300E-03 4.4040E-03 2.5500E-03 1.5460E-03 1.0470E-02 2.7690E-03 8.3860E-03

1.6120E-02 3.1190E-03 3.5730E-02 4.7590E-02 1.4580E-02 5.4490E-05 4.3430E-03

2.5350E-02 2.3230E-02 1.8900E-05 2.0180E-04 3.5940E-03 2.1560E-02 5.9010E-04

7.8280E-03 1.4780E-02 9.1700E-03 2.5670E-02 5.9620E-03 9.4790E-03 1.0330E-02

1.0240E-03 4.6570E-03 1.2260E-02 2.7090E-02 1.9170E-04 1.1090E-03 4.2130E-03

7.8550E-03 6.5790E-03 2.3130E-02 1.1450E-02 4.9000E-03 3.5140E-05 1.0120E-03

1.0780E-02 3.8490E-02 3.4260E-05 8.5780E-04 4.6390E-03 5.9980E-03 7.3030E-03

1.0960E-02 1.7870E-03 5.9560E-03 4.4500E-03 6.5700E-03 4.3920E-03 9.5110E-04

3.9540E-03 7.0980E-03 5.3560E-03 8.8370E-03 2.3680E-02 6.4670E-03 6.3450E-04

3.3620E-04 3.2320E-03 8.5090E-03 5.3980E-03 1.0350E-02 3.8380E-03 2.1250E-03

2.3890E-03 2.2110E-03 1.9900E-03 2.4630E-03 1.3420E-03 5.7680E-04 3.1210E-03

4.3000E-03 3.4320E-03 4.0730E+00 4.4110E-01 4.1360E-02 7.3440E-03 1.3350E-03

8.9670E+00 1.8770E-01 6.1770E-02 2.2400E+00 4.7330E-01 2.3080E-02 3.5400E-03

3.2360E+00 4.7310E-01 3.4450E-02 2.2020E-03 1.8200E+00 2.3330E-02 1.5130E-02

5.7020E-02 2.4030E-02 8.4010E-03 1.9490E-03 1.6210E-02 5.4630E-03 2.0820E-03

1.3270E-02 3.2470E-02 1.4270E-02 2.6760E-03 1.6000E-01 3.6270E-02 6.6490E-03

8.0320E-04 1.6750E-01 5.6730E-02 1.1530E-02 1.1420E-03 5.1330E-01 1.5810E-01

2.8300E-02 2.4480E-03 1.4890E-01 1.9030E-02 1.1090E-03 7.0250E-05 5.3930E-02

2.5900E-02 9.6520E-03 1.5450E-03 6.7990E-02 5.7240E-02 2.5610E-02 4.4240E-03

2.7090E-01 7.7150E-02 1.9600E-02 2.7720E-03 1.3680E-01 5.7620E-02 1.5440E-02

1.8120E-03 1.1940E-01 7.7960E-02 2.5810E-02 3.6180E-03 3.8840E-01 1.0790E-01

2.2580E-02 2.3880E-03 4.3310E-02 4.2190E-02 3.5870E-02 6.8280E-02 4.6530E-02

2.0240E-02 3.4530E-03 1.9270E-01 4.8120E-02 7.6960E-03 1.3740E-03 4.3400E-02

1.5180E-02 5.8420E-03 1.2820E-03 9.3110E-02 3.8990E-02 9.8560E-03 1.4640E-03

6.1040E-02 4.5740E-02 2.0630E-02 7.0550E-04 7.4160E-02 3.0870E-02 6.7400E-03

6.5810E-04 7.3110E-02 4.6600E-02 1.3160E-02 1.4910E-03 4.8900E+00 7.2130E-01

6.2550E-02 1.0650E-02 3.6440E+00 3.8900E+00 1.0470E-01 1.0240E+00 8.6260E-01

3.7940E-01 1.7620E-02 1.6770E+00 3.2310E+00 4.1800E-01 3.2210E-02 8.6320E-01

6.7680E-01 9.0410E-03 3.1030E-02 2.2950E-02 1.4170E-02 6.9420E-03 1.0720E-02

6.8920E-03 2.3970E-03 1.1060E-02 2.2970E-02 1.1410E-02 6.7750E-03 5.5710E-02

7.8500E-02 2.9290E-02 6.1480E-03 6.8810E-02 6.8510E-02 4.6200E-02 1.0820E-02

1.8380E-01 2.3710E-01 1.3750E-01 2.6700E-02 5.9370E-02 6.5700E-02 1.4890E-02

9.3790E-04 3.4760E-02 2.2250E-02 1.1750E-02 7.3020E-03 5.8680E-02 2.2620E-02

2.5480E-02 2.2230E-02 1.0690E-01 1.2850E-01 5.5370E-02 1.7950E-02 7.4400E-02

4.9730E-02 3.6800E-02 1.3950E-02 8.2280E-02 3.4520E-02 4.8670E-02 2.3640E-02

1.3760E-01 1.8150E-01 8.7210E-02 2.1150E-02 4.3180E-02 4.2690E-02 1.4840E-02

5.3640E-02 2.8200E-02 1.8490E-02 1.5090E-02 7.9570E-02 8.4040E-02 3.7970E-02

6.6550E-03 2.4040E-02 1.9240E-02 7.3990E-03 4.0670E-03 4.6700E-02 3.5490E-02

2.8450E-02 8.9410E-03 5.0870E-02 3.2680E-02 1.2830E-02 1.0370E-02 4.4510E-02

2.5250E-02 1.8400E-02 5.5210E-03 5.1850E-02 1.9370E-02 2.8820E-02 1.1920E-02

4.3020E+00 7.7510E-01 5.8630E-02 1.2480E+00 3.6090E+00 1.2550E+00 4.0320E-01

7.7080E-01 4.6200E-01 1.8900E-01 3.7060E-01 1.9250E+00 1.7550E+00 2.3550E-01

3.7060E-01 6.8370E-01 1.8590E-01 1.5590E-02 1.8980E-02 1.5950E-02 1.0420E-02

7.0800E-03 6.2280E-03 2.9340E-03 8.8480E-03 1.5050E-02 1.0600E-02 7.2580E-03

1.6770E-02 5.1510E-02 4.8550E-02 1.8950E-02 2.2290E-02 5.5950E-02 4.7910E-02

3.1060E-02 5.0640E-02 1.6640E-01 1.6160E-01 8.9470E-02 2.0770E-02 5.1470E-02

3.2880E-02 7.6150E-03 2.0960E-02 1.7350E-02 1.5100E-02 7.6040E-03 3.8290E-02

2.0710E-02 2.0660E-02 2.3600E-02 3.8710E-02 8.7070E-02 8.1910E-02 3.9430E-02

3.4940E-02 4.4950E-02 3.5070E-02 2.6130E-02 4.1960E-02 4.0620E-02 2.9700E-02

3.8970E-02 4.2110E-02 1.2160E-01 1.1920E-01 5.9010E-02 4.2660E-02 3.0550E-02

7.4980E-03 3.6650E-02 2.1180E-02 2.1620E-02 1.2870E-02 2.8620E-02 6.4850E-02

5.0210E-02 2.2970E-02 1.3190E-02 1.4740E-02 1.1360E-02 4.4910E-03 1.9360E-02

3.1510E-02 2.4860E-02 1.9940E-02 4.0690E-02 2.0610E-02 1.2730E-02 1.1380E-02

2.3310E-02 2.4070E-02 1.6890E-02 1.0700E-02 2.7570E-02 2.4140E-02 1.6880E-02

2.0980E-02 3.2260E+00 5.9180E-01 3.4190E-01 2.0930E+00 2.1520E+00 1.2910E-01

4.7860E-01 4.5050E-01 2.9280E-01 6.0650E-02 6.5110E-01 1.6300E+00 8.3790E-01

1.4150E-01 4.6180E-01 3.2680E-01 6.9960E-03 1.3050E-02 1.4270E-02 1.1340E-02

4.3870E-03 4.7580E-03 2.8650E-03 6.6350E-03 9.0250E-03 9.6550E-03 6.0050E-03

4.2390E-03 2.2720E-02 4.1900E-02 3.2970E-02 5.1740E-03 2.9890E-02 3.9140E-02

4.3340E-02 8.3020E-03 7.8470E-02 1.2850E-01 1.3580E-01 6.0940E-03 2.7550E-02

3.4130E-02 1.6780E-02 1.1130E-02 1.3910E-02 1.3880E-02 6.8100E-03 1.9600E-02

2.2800E-02 1.8550E-02 1.6330E-02 1.2260E-02 4.3470E-02 7.1130E-02 5.8300E-02

1.3630E-02 3.2270E-02 3.0510E-02 2.8740E-02 1.6190E-02 3.6640E-02 2.5430E-02

3.5180E-02 1.0050E-02 5.6380E-02 9.8820E-02 9.1270E-02 3.8230E-02 1.6820E-02

5.3420E-03 2.1360E-02 2.0260E-02 1.8850E-02 8.7800E-03 8.5990E-03 3.5500E-02

4.5130E-02 3.5630E-02 6.8760E-03 1.0040E-02 1.0810E-02 5.0970E-03 6.3770E-03

2.0990E-02 2.0960E-02 2.3420E-02 3.0520E-02 1.1290E-02 1.3470E-02 8.7820E-03

1.0470E-02 1.9460E-02 1.5370E-02 1.0920E-02 1.1380E-02 2.3040E-02 1.4310E-02

1.8450E-02 2.0910E+00 7.9380E-02 7.7970E-01 2.2000E+00 3.2450E-02 2.1670E-01

3.7310E-01 2.7800E-01 8.1260E-03 1.2930E-01 7.8310E-01 1.1940E+00 4.7330E-02

2.3580E-01 3.3700E-01 2.7190E-03 7.7870E-03 1.0380E-02 9.1240E-03 2.5450E-03

3.1930E-03 2.3330E-03 4.4230E-03 4.8450E-03 7.5370E-03 4.0800E-03 8.5760E-04

7.2790E-03 2.3510E-02 3.6270E-02 6.3570E-04 1.0290E-02 2.8000E-02 3.9810E-02

3.8470E-05 2.1470E-02 7.7610E-02 1.3490E-01 1.3960E-03 1.0870E-02 2.3980E-02

2.0130E-02 5.0250E-03 1.0540E-02 9.3530E-03 5.5020E-03 7.4800E-03 2.0020E-02

1.5990E-02 8.0450E-03 3.0870E-03 1.7800E-02 4.2690E-02 5.9700E-02 4.0540E-03

1.8200E-02 2.5420E-02 2.2870E-02 4.2700E-03 2.2170E-02 2.7390E-02 2.1790E-02

1.5090E-03 1.8450E-02 5.8750E-02 9.3590E-02 2.8990E-02 6.9580E-03 4.3520E-03

1.0270E-02 1.8160E-02 1.2220E-02 5.5180E-03 2.2720E-03 1.3980E-02 3.1130E-02

3.5910E-02 3.2460E-03 6.4630E-03 7.2570E-03 4.9410E-03 1.5980E-03 9.7400E-03

1.7220E-02 1.9280E-02 2.0350E-02 5.2100E-03 1.1720E-02 5.4150E-03 3.8720E-03

1.2570E-02 1.3250E-02 7.7800E-03 3.4270E-03 1.4880E-02 1.6000E-02 1.0490E-02

2.2000E-02 1.4020E-01 1.3680E+00 5.8480E-03 6.4540E-02 2.1470E-01 1.6490E-01

8.9830E-04 1.6970E-02 1.6750E-01 8.6940E-01 1.3130E-02 8.6700E-02 2.1020E-01

8.1230E-04 3.5440E-03 5.3880E-03 5.0640E-03 1.1720E-03 1.5050E-03 1.3090E-03

2.2120E-03 2.0440E-03 4.1670E-03 1.7850E-03 1.2350E-04 1.6570E-03 8.4560E-03

2.3670E-02 7.5050E-06 1.5430E-03 1.3550E-02 2.2990E-02 4.2080E-06 7.6720E-05

3.3610E-02 8.3270E-02 2.2420E-04 2.9460E-03 1.1370E-02 1.3650E-02 1.7370E-03

5.8260E-03 4.3600E-03 3.0980E-03 1.8430E-03 1.1600E-02 9.6730E-03 2.6550E-03

4.2340E-04 6.0900E-03 1.7340E-02 3.7840E-02 7.5480E-04 7.3890E-03 1.4810E-02

1.1880E-02 5.0900E-04 8.7050E-03 1.9460E-02 9.1930E-03 1.5900E-05 3.6700E-03

2.2770E-02 5.9040E-02 1.5650E-02 1.8190E-03 2.5980E-03 3.7060E-03 1.1090E-02

5.5290E-03 2.7530E-03 5.7240E-04 3.4640E-03 1.5230E-02 2.2340E-02 1.2140E-03

3.2780E-03 3.3300E-03 3.1530E-03 2.2240E-04 2.8020E-03 1.0260E-02 1.0560E-02

1.0170E-02 1.8440E-03 6.8690E-03 2.4650E-03 1.0740E-03 5.8350E-03 8.0500E-03

3.7800E-03 6.2100E-04 6.3230E-03 1.1610E-02 3.8430E-03 1.1960E+00 2.4970E-01

1.0440E+00 4.0280E-01 1.1950E-01 2.2160E-02 2.3260E+00 7.7430E-01 2.0500E-01

4.9900E-02 2.5790E+00 1.4280E-01 3.1740E-02 2.2730E-02 1.4360E-02 7.5920E-03

3.2090E-03 1.5140E-02 1.1990E-02 5.4400E-03 3.1820E-02 8.3550E-02 4.7200E-02

2.6210E-02 2.0210E-01 1.1290E-01 5.2560E-02 1.6690E-02 2.0860E-01 8.6010E-02

2.8040E-02 5.7680E-03 9.5490E-04 1.0060E-03 7.1860E-04 3.0300E-04 1.9950E-02

8.2200E-03 2.9520E-03 8.3960E-04 7.9380E-02 2.3110E-02 6.0560E-03 1.8000E-03

4.0160E-02 3.6490E-02 3.2830E-02 2.5530E-02 8.5940E-02 7.8840E-02 4.7970E-02

1.7920E-02 1.3830E-01 6.0850E-02 2.7150E-02 1.1960E-02 8.2920E-02 6.0560E-02

3.3380E-02 1.1820E-02 8.6180E-03 3.7330E-03 1.3610E-03 3.7390E-04 6.3930E-02

3.0250E-02 1.1870E-02 1.2100E-01 7.1020E-02 2.6550E-02 4.7540E-03 4.2100E-02

4.5240E-02 4.7670E-02 4.0850E-02 1.4400E-02 5.9540E-03 2.2640E-03 7.4120E-04

1.2580E-02 9.5440E-03 5.8300E-03 2.7530E-03 2.7950E-02 3.1060E-02 3.2960E-02

2.0630E-02 4.2010E-02 4.9850E-02 4.1490E-02 2.3110E-02 6.6270E-02 5.5380E-02

3.5000E-02 1.7400E-02 9.9310E-01 3.2430E-01 4.2520E-01 2.9350E-01 1.3420E-01

3.1850E-01 1.1610E+00 7.7360E-01 2.5360E-01 4.4440E-01 1.5270E+00 9.3250E-02

1.2030E-02 8.7030E-03 8.1790E-03 7.0740E-03 1.3140E-02 6.3350E-03 4.9890E-03

2.3860E-02 5.4630E-02 4.8200E-02 1.4980E-02 7.5290E-02 7.6110E-02 7.3140E-02

6.3650E-02 2.5270E-02 9.8250E-02 8.3510E-02 3.9310E-02 8.9570E-04 1.8730E-04

3.7420E-04 7.8310E-04 6.8260E-03 8.3980E-03 5.8640E-03 2.5440E-03 1.5820E-02

4.0420E-02 2.1360E-02 5.2620E-03 3.5850E-02 3.3920E-02 2.1510E-02 9.9600E-03

7.4380E-02 1.5290E-02 2.9260E-02 5.4070E-02 3.8360E-02 6.9870E-02 4.9220E-02

2.2600E-02 5.0450E-02 2.3460E-02 2.9150E-02 3.8600E-02 1.2880E-03 4.0740E-03

3.4790E-03 1.7460E-03 3.6680E-02 2.8670E-02 1.4600E-02 6.7070E-02 3.0740E-02

3.8930E-02 3.0400E-02 4.6720E-02 4.9750E-02 2.7640E-02 7.7980E-03 4.9840E-03

6.5250E-03 4.2270E-03 1.7870E-03 8.1410E-03 4.4040E-03 4.8120E-03 5.6890E-03

2.0960E-02 3.4870E-02 2.0400E-02 8.2080E-03 5.3520E-02 3.3550E-02 2.0410E-02

9.8560E-03 5.2810E-02 2.3750E-02 2.6000E-02 2.8010E-02 5.9270E-02 2.3520E-01

2.9250E-01 1.9590E-01 5.1620E-02 2.2130E-01 6.2600E-01 7.6490E-01 7.4310E-02

3.9480E-01 9.0740E-01 3.7260E-03 7.7890E-03 7.2690E-03 5.1490E-03 8.4020E-03

6.1460E-03 1.7390E-03 1.5910E-02 3.8360E-02 2.2410E-02 1.7600E-02 1.0810E-02

5.1140E-02 6.6440E-02 6.3760E-02 1.2300E-03 1.7300E-02 5.6420E-02 8.9280E-02

1.4970E-04 5.8860E-04 5.2040E-04 1.8790E-04 1.9520E-03 4.6260E-03 5.6230E-03

3.6440E-03 3.9900E-03 1.0970E-02 2.2260E-02 1.7840E-02 3.2490E-02 1.6370E-02

1.0740E-02 7.8110E-03 1.2680E-02 5.0040E-02 3.8110E-02 1.4510E-02 1.4130E-02

2.3710E-02 3.9040E-02 4.1380E-02 8.1360E-03 3.4050E-02 3.1820E-02 2.0340E-02

1.5870E-04 8.5580E-04 2.3770E-03 3.6250E-03 1.9110E-02 2.0820E-02 1.3270E-02

1.2920E-02 4.8640E-02 3.5010E-02 1.5100E-02 5.2490E-02 1.8090E-02 9.4690E-03

8.0310E-03 1.6390E-03 3.2920E-03 4.0230E-03 2.7290E-03 2.1000E-03 5.2580E-03

4.7230E-03 3.0680E-03 1.3970E-02 2.9290E-02 1.0120E-02 2.9040E-03 4.5300E-02

2.2210E-02 8.5110E-03 2.2300E-03 2.0790E-02 3.2780E-02 2.2920E-02 1.0550E-02

1.8930E+00 3.7790E-01 5.9860E-02 6.7610E+00 2.4850E+00 5.5950E-01 1.0570E-01

2.0520E+00 8.6100E-01 5.2580E-02 2.9160E-01 1.9390E-01 8.2540E-02 3.2490E-02

9.1700E-02 3.6070E-02 1.3050E-02 5.6430E-02 1.1370E-01 4.2740E-02 7.7410E-03

1.7410E-01 7.5890E-02 2.9280E-02 7.8070E-03 7.8300E-02 4.0700E-02 1.7140E-02

4.3840E-03 7.6570E-02 2.7930E-02 7.9470E-03 1.4930E-03 2.6940E-01 7.8950E-02

1.6010E-02 1.8240E-03 1.9270E-01 4.9600E-02 2.0450E-02 8.7480E-03 1.9740E-01

6.9580E-02 2.1060E-02 5.1600E-03 1.0370E-01 3.7110E-02 1.1040E-02 2.7430E-03

1.9050E-01 6.7720E-02 2.1930E-02 6.5160E-03 6.7700E-02 2.7100E-02 8.4100E-03

1.7390E-03 4.0720E-02 1.8070E-02 5.6950E-03 1.1330E-03 6.1950E-02 2.6990E-02

2.2910E-03 6.8800E-02 3.1980E-02 1.4980E-02 5.2110E-03 4.7140E-02 1.9960E-02

7.8560E-03 2.5300E-03 3.5510E-02 2.0800E-02 9.5640E-03 2.7680E-03 1.9710E-02

8.4370E-03 2.9780E-03 1.0150E-03 1.5240E-02 1.0250E-02 5.1290E-03 1.5890E-03

1.3820E-02 6.7170E-03 3.2560E-03 1.3590E-03 1.5790E-02 6.5310E-03 2.1390E-03

4.6340E-04 1.5670E+00 3.8160E-01 1.8740E+00 2.6300E+00 2.3090E+00 6.4120E-01

1.1370E+00 4.9680E-01 5.8940E-01 1.3480E-01 1.0950E-01 7.9860E-02 7.2630E-02

4.9460E-02 4.0390E-02 1.6640E-02 4.2310E-02 5.9210E-02 3.8220E-02 2.5690E-02

5.1270E-02 7.7550E-02 5.4280E-02 3.2400E-02 2.7610E-02 3.0400E-02 2.7760E-02

1.9610E-02 1.0550E-02 3.8230E-02 2.6980E-02 9.6970E-03 7.8670E-02 1.1500E-01

6.2970E-02 1.7540E-02 4.9540E-02 1.0870E-01 3.4630E-02 1.0440E-02 5.1260E-02

9.0720E-02 5.5550E-02 2.2600E-02 2.1080E-02 5.0550E-02 3.2880E-02 1.2450E-02

5.0120E-02 8.9520E-02 5.3560E-02 2.1910E-02 1.7000E-02 2.9060E-02 2.2650E-02

9.8750E-03 1.0700E-02 1.5970E-02 1.5750E-02 6.8090E-03 3.5380E-02 1.4990E-02

1.8130E-02 3.1980E-02 3.1960E-02 1.6910E-02 9.8860E-03 1.5900E-02 2.1090E-02

1.3550E-02 7.5830E-03 2.0800E-02 1.3520E-02 9.7980E-03 7.3240E-03 5.6290E-03

8.4970E-03 6.9280E-03 3.0770E-03 1.1430E-02 6.3450E-03 3.7670E-03 2.6140E-03

6.7170E-03 6.4200E-03 3.9940E-03 1.7270E-03 5.1670E-03 6.4050E-03 4.7560E-03

2.3690E-03 1.0040E+00 1.7130E-01 1.8400E+00 1.1980E+00 1.7610E+00 4.2720E-01

6.3270E-01 4.2080E-01 5.0160E-02 1.0220E-01 6.9150E-02 5.2760E-02 2.5160E-02

2.8070E-02 1.7120E-02 2.8200E-02 2.4760E-02 3.4590E-02 2.2720E-02 1.2650E-02

3.3280E-02 5.3230E-02 4.4530E-02 5.7950E-03 1.8340E-02 2.1690E-02 2.4430E-02

4.4910E-04 1.0120E-02 2.3630E-02 2.2750E-02 1.5920E-02 6.2900E-02 6.3890E-02

4.0380E-02 2.0430E-02 3.4640E-02 6.1430E-02 1.8880E-02 1.1050E-02 3.9120E-02

5.5160E-02 4.1770E-02 3.1470E-03 1.7820E-02 3.0590E-02 2.6360E-02 1.2320E-02

3.7470E-02 5.4010E-02 3.9650E-02 2.3210E-03 1.4270E-02 1.7160E-02 1.8480E-02

6.0890E-04 9.9490E-03 8.7570E-03 1.3280E-02 1.3840E-02 1.9250E-02 1.2620E-02

1.4970E-02 1.6910E-02 2.0800E-02 7.8000E-03 4.9970E-03 1.0100E-02 1.3860E-02

9.8070E-03 9.5640E-03 9.7920E-03 1.0690E-02 4.2660E-03 1.1360E-03 4.6040E-03

4.8810E-03 5.4770E-03 7.6210E-03 3.3010E-03 3.2470E-03 1.9370E-03 3.2560E-03

3.9940E-03 3.4040E-03 1.9260E-03 1.1620E-03 3.6890E-03 4.0190E-03 3.5950E-03

4.2210E-02 1.3800E-01 1.2590E+00 1.0440E+00 8.7090E-02 4.8050E-01 1.7230E-01

1.6980E-02 3.5100E-02 3.6230E-02 3.5240E-02 1.0440E-02 1.3390E-02 1.1130E-02

1.4090E-02 7.5040E-03 2.1250E-02 1.2270E-02 1.1740E-03 1.2780E-02 2.2860E-02

3.5000E-02 6.7990E-05 6.3600E-03 1.3250E-02 1.5450E-02 7.0650E-05 4.1920E-04

7.1670E-03 2.0840E-02 1.8240E-03 1.7480E-02 4.0350E-02 3.1800E-02 8.7480E-03

1.0420E-02 1.8900E-02 2.9570E-02 1.8950E-03 1.0200E-02 2.5820E-02 3.5460E-02

6.3550E-04 2.6840E-03 1.2160E-02 2.3360E-02 2.8740E-03 1.0190E-02 2.4240E-02

3.4440E-02 1.9710E-04 2.3720E-03 9.9030E-03 1.3660E-02 8.1960E-05 5.6590E-04

6.9930E-03 8.5810E-03 3.1260E-03 1.4710E-02 4.9680E-03 5.2110E-03 9.8860E-03

7.8000E-03 7.3470E-03 1.1070E-03 4.2250E-03 6.2760E-03 7.7800E-03 2.7680E-03

7.3240E-03 4.2660E-03 2.7640E-03 3.3340E-04 7.6480E-04 3.0680E-03 3.8350E-03

3.8100E-03 1.3140E-03 1.9980E-03 9.3040E-04 1.3580E-03 1.7270E-03 1.9260E-03

1.2840E-03 1.3110E-04 1.1820E-03 2.4430E-03 2.4760E-03 2.6310E+00 3.8220E-01

4.9110E-02 7.5270E+00 4.0070E-01 1.9880E-01 3.0330E-01 1.4790E-01 6.2690E-02

2.7280E-02 5.3770E-02 2.4780E-02 5.6220E-03 4.6750E-03 4.2680E-02 8.9070E-03

2.8340E-03 1.0960E-01 4.1200E-02 1.3270E-02 2.5310E-03 6.7260E-02 2.8140E-02

1.1420E-02 2.6170E-03 7.8960E-02 3.3420E-02 1.1360E-02 1.9270E-03 1.4490E-01

4.8040E-02 7.2920E-03 1.0750E-03 1.4840E-01 5.1090E-02 1.1870E-02 1.9190E-03

4.3980E-02 1.8200E-02 7.2170E-03 2.2120E-03 8.1960E-02 3.1430E-02 9.1100E-03

1.8260E-03 2.1540E-01 5.8400E-02 1.5280E-02 2.1170E-03 9.9190E-02 2.9810E-02

7.9740E-03 1.5770E-03 1.7830E-01 6.2520E-02 1.7760E-02 3.4360E-03 9.3670E-02

2.6030E-02 1.4640E-02 4.5790E-02 2.3090E-02 8.4970E-03 1.8130E-03 6.2940E-02

2.2160E-02 7.0080E-03 1.7480E-03 1.6940E-02 7.0350E-03 2.2620E-03 4.3950E-04

2.2510E-02 1.0520E-02 3.8830E-03 1.0530E-03 2.5710E-02 1.9410E-02 6.9630E-03

2.8620E-03 2.1510E-02 1.0690E-02 3.8640E-03 6.4800E-04 2.3950E-02 1.2770E-02

6.3290E-03 2.3240E-03 2.6450E+00 4.3440E-01 2.6920E+00 3.6460E+00 1.6110E-01

1.2340E-01 1.7980E-01 1.1300E-01 5.0100E-02 3.5260E-02 1.8930E-02 1.3540E-02

3.7400E-03 2.0060E-02 1.9040E-02 4.4240E-03 3.5200E-02 5.1790E-02 3.1620E-02

1.4740E-02 2.1980E-02 3.4070E-02 1.9200E-02 1.2520E-02 2.4030E-02 3.6630E-02

2.6840E-02 1.3050E-02 6.0410E-02 5.2400E-02 4.1210E-02 7.0300E-03 6.3580E-02

5.9160E-02 3.6890E-02 1.1200E-02 1.8180E-02 2.0790E-02 1.1730E-02 6.7240E-03

2.6880E-02 3.6600E-02 2.5900E-02 9.9980E-03 5.8380E-02 1.1180E-01 4.5700E-02

1.7140E-02 2.3930E-02 5.2190E-02 2.5990E-02 8.8100E-03 4.5150E-02 8.8160E-02

5.5520E-02 1.9990E-02 4.8700E-02 5.0010E-02 9.2910E-03 2.6340E-02 1.7600E-02

1.2010E-02 7.3440E-03 2.2170E-02 2.9440E-02 1.6490E-02 7.0090E-03 8.3680E-03

6.7050E-03 4.2000E-03 2.0120E-03 9.3410E-03 9.1710E-03 7.6810E-03 4.0310E-03

2.0560E-02 1.1220E-02 9.0510E-03 3.1100E-03 1.2240E-02 8.0410E-03 5.4860E-03

3.5950E-03 1.2770E-02 1.1000E-02 6.9470E-03 5.4990E-03 2.0460E+00 8.5670E-01

2.6030E+00 1.4140E+00 5.9910E-02 8.5480E-02 1.3340E-01 8.3570E-02 1.9760E-02

1.8680E-02 1.2170E-02 2.8050E-03 9.2210E-03 1.4890E-02 8.5410E-03 9.4580E-03

2.6290E-02 3.6790E-02 2.7440E-02 7.3670E-03 1.3590E-02 2.6810E-02 1.8130E-02

5.1670E-03 1.8750E-02 2.6690E-02 2.4800E-02 1.6720E-02 4.9810E-02 2.6400E-02

2.7880E-02 2.1580E-02 4.6400E-02 3.6020E-02 2.4100E-02 7.2150E-03 1.1730E-02

1.4860E-02 9.1630E-03 6.1590E-03 2.2070E-02 2.4150E-02 2.1850E-02 1.5280E-02

4.5680E-02 7.7030E-02 3.6770E-02 5.2840E-03 2.0260E-02 3.6010E-02 2.1700E-02

8.6910E-03 3.9110E-02 6.1440E-02 4.7880E-02 2.8530E-02 3.4860E-02 1.7490E-02

1.2260E-02 1.4110E-02 1.3890E-02 7.0500E-03 7.0090E-03 1.6490E-02 1.9830E-02

1.2980E-02 3.4960E-03 5.1620E-03 4.6980E-03 2.6000E-03 2.9020E-03 6.7720E-03

6.4120E-03 6.6150E-03 1.5430E-02 6.5690E-03 7.0600E-03 3.9120E-03 5.6710E-03

6.4840E-03 6.5760E-03 3.2970E-03 6.3280E-03 6.9460E-03 8.5640E-03 5.2730E-03

2.9420E-01 9.3610E-01 2.0170E+00 2.6820E-02 4.9420E-02 6.8570E-02 5.7130E-02

9.3220E-03 1.6400E-02 7.9170E-03 1.8700E-03 4.2180E-03 7.9510E-03 9.5950E-03

1.2450E-03 1.0310E-02 2.2020E-02 3.3050E-02 8.2840E-04 7.9730E-03 1.2450E-02

2.2670E-02 1.0190E-04 5.9400E-03 1.6330E-02 2.7900E-02 3.3500E-03 1.8890E-02

3.7880E-02 2.0420E-02 5.3910E-03 2.2850E-02 3.4650E-02 2.2410E-02 2.2120E-03

6.7230E-03 9.1590E-03 1.0490E-02 9.6200E-04 6.5220E-03 1.8140E-02 2.4240E-02

2.1170E-03 1.7150E-02 3.6770E-02 6.0450E-02 8.3480E-04 5.6260E-03 1.6360E-02

3.2670E-02 1.0920E-03 9.3350E-03 3.1990E-02 6.1990E-02 1.7340E-02 1.5090E-02

2.1090E-02 4.2380E-03 1.1580E-02 9.8300E-03 5.7760E-03 1.7490E-03 7.0080E-03

1.2990E-02 1.5790E-02 1.0740E-03 3.4450E-03 3.7280E-03 2.3290E-03 6.4440E-04

2.9040E-03 5.5870E-03 5.8990E-03 1.0280E-02 3.7300E-03 4.2080E-03 3.7530E-03

1.7090E-03 5.6320E-03 4.6250E-03 2.7260E-03 2.3240E-03 5.4990E-03 5.2730E-03

4.9960E-03 3.3480E-01 7.6560E-02 1.0580E-01 6.1220E-02 3.4410E-02 1.8260E-02

1.2480E-01 6.8870E-02 1.6440E-02 2.1530E-02 4.6800E-02 1.7890E-02 8.1310E-03

2.7060E-02 1.8220E-02 1.0300E-02 4.5110E-03 1.2250E-02 7.1080E-03 3.7500E-03

1.3900E-03 1.8750E-03 1.5010E-03 1.0160E-03 5.4060E-04 4.8580E-02 2.4470E-02

1.0040E-02 3.0300E-03 6.5990E-02 4.1940E-02 1.7580E-02 4.1600E-03 2.0640E-02

1.6800E-02 1.2240E-02 7.8550E-03 3.5180E-02 2.4000E-02 1.3430E-02 5.6150E-03

1.1000E-01 4.4450E-02 1.6470E-02 6.2310E-03 3.1500E-02 2.1690E-02 1.3690E-02

7.8110E-03 8.8710E-03 4.2590E-03 1.7860E-03 5.6290E-04 1.3150E-01 2.9830E-02

8.7150E-03 9.3700E-02 3.7090E-02 1.3250E-02 4.2390E-03 9.9410E-02 4.8790E-02

2.4680E-02 1.2630E-02 3.1740E-02 1.7660E-02 6.8840E-03 1.4970E-03 8.7780E-03

6.8430E-03 4.4420E-03 2.3930E-03 3.4510E-02 2.4250E-02 1.3560E-02 7.7570E-03

1.2900E-02 1.0550E-02 7.0870E-03 3.4780E-03 1.4570E-02 9.3650E-03 5.5010E-03

2.8760E-03 2.1940E-01 3.8030E-02 4.5950E-02 3.7780E-02 2.4670E-02 6.7360E-02

2.8130E-02 4.4230E-02 1.4360E-02 1.7880E-02 2.3710E-02 6.9350E-03 1.1740E-02

8.3610E-03 9.4680E-03 1.0650E-02 2.8030E-03 4.5510E-03 4.6890E-03 4.0980E-03

1.0360E-03 5.5010E-04 6.9320E-04 9.9090E-04 1.7190E-02 1.6890E-02 1.4680E-02

8.6640E-03 3.4410E-02 1.2990E-02 2.1060E-02 1.7810E-02 1.4160E-02 1.0400E-02

8.1870E-03 5.8510E-03 1.5770E-02 9.9260E-03 1.2060E-02 1.4400E-02 1.2180E-02

5.1470E-02 3.8290E-02 1.6340E-02 1.4370E-02 1.2390E-02 1.1990E-02 1.1050E-02

8.6030E-04 3.6710E-03 3.5140E-03 2.2450E-03 2.9830E-02 6.6420E-02 1.7290E-02

1.9840E-02 4.0720E-02 2.7030E-02 1.0790E-02 2.3450E-02 4.7150E-02 3.5570E-02

1.7940E-02 1.3570E-02 7.3080E-03 9.8610E-03 7.4160E-03 5.1640E-03 2.7970E-03

3.1780E-03 3.8310E-03 2.3010E-02 1.3560E-02 1.3470E-02 3.3720E-03 9.7150E-03

6.0420E-03 4.4140E-03 2.5190E-03 6.5260E-03 5.8010E-03 5.1820E-03 4.0400E-03

1.3030E-02 1.8340E-02 2.1930E-02 1.9810E-02 1.6410E-02 4.3770E-02 9.9450E-03

7.1790E-03 8.1190E-03 6.9340E-03 9.2130E-03 1.2360E-03 6.9270E-03 6.9530E-03

4.9990E-03 1.6030E-04 1.6720E-03 2.8160E-03 3.2730E-03 1.2770E-04 5.8560E-04

5.7360E-04 3.5780E-04 3.1280E-03 1.0310E-02 9.7330E-03 5.5330E-03 3.1710E-03

2.2620E-02 1.3310E-02 3.8140E-03 6.4530E-03 5.8600E-03 4.2290E-03 2.5760E-03

1.2140E-03 9.4910E-03 9.2630E-03 6.0680E-03 3.9170E-03 6.0270E-03 2.1310E-02

2.7510E-02 3.9240E-03 7.4190E-03 7.5190E-03 6.0230E-03 5.7140E-05 5.0920E-04

1.7520E-03 2.7990E-03 8.7140E-03 1.7290E-02 3.0640E-02 4.8670E-03 1.1070E-02

1.8920E-02 1.4390E-02 9.4720E-03 1.0410E-02 1.9560E-02 2.2310E-02 1.0150E-03

9.1470E-03 6.2700E-03 2.4340E-03 1.0260E-03 2.8350E-03 2.3600E-03 1.2600E-03

1.1500E-02 7.7570E-03 3.3720E-03 4.0680E-03 4.5690E-03 3.8240E-03 2.1140E-03

8.0860E-04 1.9790E-03 3.2960E-03 3.1640E-03 2.3290E-03 5.9270E+00 5.6320E-01

1.7750E-01 1.6740E+00 2.4470E-01 4.2570E-02 3.3710E-02 5.9720E-02 2.0820E-02

4.5200E-03 1.1200E+00 1.3420E-01 2.0120E-02 2.8640E-03 1.7360E-01 5.8000E-02

1.5880E-02 2.3290E-03 1.7730E-01 6.3820E-02 1.5030E-02 1.6690E-03 1.4360E-01

3.1170E-02 1.1710E-02 3.6920E-03 2.6270E-01 3.7200E-02 1.1850E-02 2.7820E-03

4.0580E-01 8.0820E-02 1.8170E-02 3.7880E-03 2.9430E-01 6.3260E-02 1.4760E-02

2.4970E-03 8.3620E-01 1.1350E-01 1.3080E-02 2.2370E-03 1.1520E+00 1.6820E-01

2.9470E-02 5.0740E-03 1.6130E-01 6.2340E-02 1.8880E-02 3.2560E-03 3.0190E-02

1.0120E-02 1.5370E-03 4.4780E-02 1.4000E-02 4.0830E-03 1.2150E-03 1.2030E-01

3.9930E-02 1.6850E-02 4.9220E-03 1.2870E+01 4.7470E-01 8.3670E-02 3.3660E-02

2.9400E+01 3.6260E+00 3.5230E-01 4.5620E-02 1.3180E-01 5.6900E-02 2.6880E-02

3.2660E-03 5.2650E+00 1.9000E-01 8.0900E-03 2.9460E-03 1.6740E+01 2.0870E+00

1.0850E-01 7.6330E-03 6.7190E+00 5.2160E-01 7.1220E-01 7.2010E-01 1.3940E-01

2.6960E-02 3.4120E-02 2.2490E-02 1.1310E-02 5.6590E-02 8.1500E-01 1.4670E-01

2.2990E-02 4.1090E-02 7.9060E-02 5.1330E-02 1.8470E-02 5.0340E-02 8.4210E-02

7.6570E-02 1.7670E-02 4.2280E-02 7.7600E-02 1.9340E-02 8.1100E-03 6.2140E-02

1.5460E-01 2.4040E-02 9.8410E-03 7.9580E-02 2.3440E-01 7.0720E-02 1.9350E-02

3.9550E-02 2.0360E-01 6.3490E-02 1.6690E-02 1.1090E-01 5.2510E-01 1.2330E-01

1.4350E-02 7.6810E-02 8.4130E-01 1.7600E-01 3.3330E-02 4.7290E-02 7.5310E-02

5.2420E-02 2.1560E-02 1.6950E-02 1.0610E-02 5.9260E-03 1.7890E-02 2.0450E-02

1.0220E-02 2.8610E-03 3.9830E-02 6.4750E-02 2.5230E-02 1.5780E-02 2.0590E+00

8.3330E+00 4.3320E-01 5.0020E-02 1.4300E+00 2.0690E+01 4.2260E+00 4.1180E-01

1.0540E-01 3.7550E-02 1.5960E-02 1.6230E-02 7.8470E-01 3.3800E+00 2.0280E-01

5.0500E-03 2.0820E+00 1.0500E+01 2.4480E+00 1.3120E-01 5.0460E+00 2.7090E-01

5.7100E-01 3.3630E-01 2.0230E-02 1.7500E-02 2.0550E-02 1.2900E-02 1.0390E-02

5.0900E-02 6.0400E-01 1.1630E-01 7.5350E-03 3.5150E-02 5.4910E-02 4.4620E-02

1.6160E-03 5.2360E-02 5.5020E-02 6.5080E-02 1.6860E-02 3.1930E-02 5.1010E-02

1.1310E-02 1.8830E-02 5.2990E-02 1.0130E-01 1.4980E-02 1.8180E-02 6.9850E-02

1.5980E-01 5.5000E-02 9.3220E-03 3.4500E-02 1.6680E-01 5.2910E-02 1.2690E-02

1.2270E-01 3.5840E-01 9.4250E-02 1.7350E-02 6.9840E-02 6.4880E-01 1.4220E-01

9.6480E-03 3.9210E-02 5.2330E-02 4.6240E-02 8.2170E-03 1.0190E-02 6.7010E-03

6.7250E-03 1.3630E-02 1.2280E-02 6.3330E-03 1.6830E-02 2.5220E-02 4.7710E-02

1.9810E-02 2.4840E-01 2.2700E+00 5.3140E+00 2.8520E-01 1.1940E-01 1.5790E+00

1.5030E+01 3.2880E+00 7.9070E-02 1.9710E-02 1.8910E-02 1.3730E-02 7.6560E-02

9.2390E-01 2.1380E+00 1.4020E-01 1.0710E-01 2.4480E+00 6.9690E+00 1.8540E+00

9.1500E-02 2.9740E-01 3.9590E-01 1.3480E-02 7.7760E-03 1.5380E-02 1.0710E-02

1.3650E-03 1.1350E-02 4.1060E-02 4.6660E-01 1.8210E-04 8.6520E-03 2.9180E-02

6.1770E-02 9.4700E-05 1.8790E-03 4.1050E-02 6.5710E-02 7.0010E-03 1.4390E-02

2.3010E-02 2.9130E-02 6.0180E-03 1.8720E-02 3.9790E-02 6.1330E-02 3.7870E-03

1.9350E-02 5.4720E-02 1.2500E-01 1.1520E-03 1.0390E-02 2.8250E-02 1.4420E-01

2.2040E-03 1.4300E-02 9.3790E-02 2.7920E-01 2.5340E-03 1.9020E-02 5.6570E-02

5.1220E-01 8.1470E-04 1.0790E-02 3.2740E-02 5.4030E-02 3.2320E-03 8.1390E-03

5.3680E-03 2.4270E-03 5.9200E-03 9.7310E-03 7.4670E-03 4.9180E-03 1.5780E-02

1.9810E-02 3.2640E-02 6.5010E-02 2.6860E-01 1.7180E+00 3.3530E+00 2.5310E-02

1.2170E-01 1.2040E+00 1.1970E+01 5.2700E-02 7.7520E-03 1.9650E-02 7.5470E-03

7.1250E-03 9.7090E-02 7.0750E-01 1.3850E+00 7.2020E-03 1.3100E-01 1.8530E+00

5.5880E+00 1.9930E+00 1.7380E-01 4.9150E-01 4.1450E-01 1.9350E-01 1.5030E-02

5.8340E-02 2.8720E-02 1.2940E-02 5.2830E-03 1.5240E-02 8.3670E-03 4.0670E-03

1.5720E-03 1.8470E-02 9.5750E-03 4.3120E-03 1.4510E-03 7.4240E-02 6.4210E-02

5.1890E-02 2.9710E-02 2.2640E-01 7.0020E-02 2.1160E-02 7.4090E-03 6.3360E-02

3.4630E-02 1.7110E-02 7.3640E-03 4.4100E-02 2.3110E-02 1.1720E-02 5.3680E-03

5.2270E-02 2.8250E-02 1.3260E-02 5.1700E-03 7.4130E-02 3.6340E-02 1.5880E-02

5.8690E-03 3.6890E-02 2.1320E-02 1.0790E-02 4.6450E-03 8.0400E-01 3.5200E-01

9.8000E-03 5.3200E-01 1.4540E-01 3.0160E-02 5.8470E-03 7.7420E-02 5.6280E-02

3.2370E-02 1.4550E-02 1.0220E+01 2.6050E+00 4.8970E-01 9.5480E-02 5.8180E-01

2.8930E-01 1.4170E-01 7.1730E-02 5.0570E+00 8.1440E+00 3.4920E+00 1.0070E-01

8.9390E+00 2.1930E+00 3.1700E-01 1.8590E-02 6.1920E-02 2.5860E-02 9.8980E-03

3.5970E-03 1.6380E+00 3.2660E-01 1.9160E-01 6.7820E-02 1.5730E-01 9.9580E-03

2.4210E-02 2.1850E-02 1.4140E-02 3.1360E-03 5.8080E-03 5.8440E-03 4.7840E-03

2.2740E-03 7.2700E-03 7.4870E-03 5.5110E-03 6.0140E-02 5.3640E-02 2.6010E-02

7.2450E-03 2.3650E-02 1.1540E-01 6.3280E-02 1.5350E-02 1.9950E-02 2.4270E-02

2.1730E-02 1.5700E-02 9.2210E-03 1.9160E-02 1.6900E-02 1.0900E-02 1.5720E-02

1.9290E-02 1.7710E-02 1.3240E-02 1.2420E-02 2.9870E-02 2.7460E-02 1.8370E-02

8.9020E-03 1.3830E-02 1.4170E-02 1.2230E-02 3.5120E-01 1.1190E-01 3.1390E-01

3.1300E-02 2.6530E-01 1.4580E-01 3.4030E-02 4.3760E-02 2.2300E-02 2.6290E-02

2.8430E-02 3.4510E-01 5.2250E+00 2.7440E+00 5.3140E-01 1.0350E-01 2.6380E-01

2.2560E-01 1.3010E-01 3.3710E+00 3.4860E+00 1.2390E+00 3.1070E+00 2.1170E-01

4.5060E+00 2.3950E+00 4.7700E-01 8.4380E-03 2.7440E-02 2.1250E-02 1.0400E-02

1.6270E-01 1.5000E-02 1.5650E-01 3.3640E-02 1.7260E-03 5.5280E-03 1.1990E-02

1.5710E-02 1.9400E-04 1.8520E-03 3.3830E-03 4.3340E-03 4.2190E-05 1.2880E-03

3.8070E-03 6.0430E-03 4.1530E-02 1.4440E-02 1.0230E-02 6.6410E-03 9.5120E-03

1.0440E-02 4.6330E-02 4.2610E-02 4.1730E-03 1.1070E-02 1.3650E-02 1.1930E-02

2.3190E-03 4.8380E-03 9.0590E-03 1.1510E-02 2.0160E-03 9.1360E-03 1.1360E-02

9.9120E-03 1.5560E-03 7.2190E-03 1.5410E-02 1.9870E-02 1.0200E-03 5.1220E-03

8.4350E-03 9.9100E-03 9.7930E-03 3.1370E-01 6.4850E-02 6.2240E-03 1.8410E-02

1.1040E-01 1.0290E-01 7.8370E-03 2.4990E-02 1.8770E-02 8.5080E-03 1.1820E-01

1.6790E-01 2.0900E+00 2.0220E+00 3.7760E-02 4.9300E-02 1.1480E-01 1.5970E-01

1.6850E+00 1.0070E-01 3.0970E+00 7.0640E-01 8.5300E-03 1.4830E-01 1.8510E+00

1.8040E+00 1.9740E-03 4.5660E-03 1.2250E-02 1.5010E-02 2.0710E+00 1.3810E+00

6.9050E-01 6.2590E-02 5.2160E-02 4.1730E-02 3.1300E-02 2.5920E-04 2.2220E-04

1.8510E-04 1.4810E-04 9.0430E-04 7.9120E-04 6.7820E-04 5.6510E-04 3.6600E+00

2.7520E+00 1.8380E+00 9.2040E-01 1.0580E-01 7.9350E-02 5.2930E-02 2.6480E-02

4.5380E-03 3.6310E-03 2.7230E-03 1.8160E-03 2.0500E-02 1.7080E-02 1.3670E-02

1.0250E-02 2.0660E-02 1.6530E-02 1.2400E-02 8.2670E-03 1.5150E-02 1.2620E-02

1.0090E-02 7.5740E-03 2.3800E-04 2.0400E-04 1.7000E-04 1.3590E-04 2.9800E-02

1.9860E-02 9.9290E-03 2.7830E-02 2.0890E-02 1.3940E-02 6.9730E-03 1.8620E-02

1.4890E-02 1.1170E-02 7.4480E-03 5.3080E-02 3.9830E-02 2.6550E-02 1.3280E-02

8.5120E-03 7.0940E-03 5.6770E-03 4.2580E-03 2.7530E-02 1.5130E-02 1.0080E-02

5.0410E-03 4.3480E-02 3.2770E-02 2.1850E-02 1.0930E-02 3.2110E-03 2.5690E-03

1.9270E-03 1.2850E-03 2.6300E+00 1.2420E+00 2.8450E-02 2.0320E-02 1.1540E-02

5.1970E-03 5.0580E-02 2.2780E-02 8.5440E-03 2.3590E-03 1.0270E-03 8.4510E-04

5.6490E-04 3.0280E-04 6.5160E+00 4.2220E+00 1.6890E+00 3.4390E-01 8.0770E-02

4.6470E-02 2.0910E-02 6.7560E-03 9.9710E-02 7.9710E-02 6.6680E-02 5.0140E-02

5.7150E-02 4.3310E-02 2.8700E-02 1.6550E-02 3.7000E-02 2.2650E-02 1.2840E-02

6.5280E-03 2.5190E-02 1.1630E-02 4.6540E-03 1.4700E-03 1.5160E-02 6.6550E-03

2.6540E-03 8.7670E-04 3.1300E-02 3.1570E-02 1.9920E-02 5.8110E-02 3.3930E-02

1.6660E-02 6.2570E-03 5.9610E-02 3.1550E-02 1.5260E-02 6.4290E-03 7.3790E-02

4.5980E-02 2.1550E-02 7.1180E-03 7.0800E-03 5.4430E-03 3.0440E-03 1.3030E-03

1.9640E-02 3.3560E-02 3.3370E-02 2.1380E-02 5.8390E-02 4.3100E-02 1.9910E-02

5.4700E-03 3.7920E-02 1.5320E-02 5.7500E-03 2.0660E-03 9.6380E-01 1.3070E-02

5.4870E-03 9.1500E-03 1.1700E-02 2.8360E-03 2.1330E-02 2.0330E-02 1.1520E-02

5.9060E-04 2.9140E-04 3.6900E-04 5.7000E-04 3.4840E+00 1.0390E+00 2.0930E+00

1.9010E+00 3.5840E-02 2.4640E-02 2.5170E-02 1.6850E-02 6.6420E-02 6.9530E-02

4.3360E-02 1.8150E-02 3.1860E-02 2.0920E-02 2.1500E-02 2.2850E-02 1.5100E-02

1.4660E-02 1.3000E-02 9.7840E-03 3.1730E-03 1.0320E-02 9.3380E-03 5.7910E-03

1.1590E-03 5.9700E-03 5.6750E-03 3.4670E-03 3.1510E-02 1.7990E-02 5.6390E-03

2.6390E-02 2.1080E-02 1.8160E-02 1.1010E-02 1.7580E-02 2.2920E-02 2.0550E-02

1.4280E-02 3.7280E-02 2.1320E-02 2.3410E-02 1.6940E-02 3.1930E-03 2.1550E-03

2.4880E-03 3.0670E-03 1.3090E-02 3.3370E-02 1.9960E-02 5.5560E-03 3.8050E-02

8.8060E-03 1.9370E-02 1.8230E-02 4.7350E-03 1.6610E-02 1.2760E-02 6.0920E-03

1.0900E-03 7.6380E-03 7.7060E-03 3.0630E-03 1.2520E-04 1.6890E-03 9.5690E-03

1.6560E-02 6.0310E-05 3.3670E-04 3.2610E-04 1.7140E-04 1.9950E-01 2.4050E+00

1.3370E+00 3.1780E-01 7.2100E-03 2.1070E-02 1.5950E-02 6.9490E-03 4.5460E-02

2.0010E-02 1.6930E-02 1.6310E-02 8.1190E-03 1.6700E-02 1.4570E-02 9.1740E-03

4.3980E-03 7.7220E-03 7.9880E-03 6.2210E-03 2.6470E-04 1.9040E-03 5.0920E-03

7.0530E-03 8.0040E-05 6.8690E-04 2.7650E-03 4.6040E-03 1.9850E-02 5.6370E-03

2.0160E-03 7.3570E-03 1.4060E-02 1.1180E-02 5.6550E-03 3.5710E-03 9.8230E-03

1.2650E-02 1.1450E-02 7.6570E-03 2.1770E-02 1.4420E-02 5.5320E-03 3.9520E-04

1.8590E-03 1.9320E-03 1.2330E-03 6.5460E-03 2.1380E-02 5.5550E-03 2.5010E-03

4.9540E-03 2.4090E-02 1.1520E-02 1.5450E-03 1.1460E-03 2.5220E-03 7.4700E-03

9.1350E-03 1.7760E+00 5.8220E-02 7.2490E-03 2.9800E+00 1.1590E+00 1.2290E-01

6.5500E-03 5.2220E+00 1.3210E+00 1.8330E-01 9.8810E-03 5.5940E-02 1.2390E-02

3.1390E-03 7.4180E-04 2.5070E+00 2.7750E-01 5.3700E-03 8.0530E-04 2.3150E+00

4.7570E-01 4.6680E-02 1.9900E-03 9.1950E-01 4.1520E-01 4.5520E-02 2.0280E-03

4.3900E-01 1.3040E-01 3.5100E-02 6.9110E-03 6.8490E-01 1.8710E-01 4.6720E-02

7.8690E-03 3.1220E-01 1.8860E-01 2.1390E-02 1.6330E-03 3.9040E-02 6.8110E-03

1.7970E-04 1.9380E-01 2.2880E-02 1.7000E-03 9.3870E-05 2.0470E-01 4.0020E-02

3.4780E-03 3.8660E-04 1.8400E-01 2.7610E-02 8.4450E-03 8.2720E-04 9.1100E-02

3.2210E-02 6.5160E-03 1.0750E-03 2.9960E-02 9.8980E-03 5.9300E-03 4.3880E-04

6.9800E-02 8.0550E-03 1.8300E-03 1.4970E-04 1.1340E-01 3.1910E-02 8.2210E-03

1.5050E-03 4.3530E+00 6.7830E-02 9.0280E-01 3.7690E+00 1.3390E+00 1.4590E-01

1.0730E+00 5.2000E+00 2.3310E+00 2.1860E-01 2.0710E-02 2.7850E-02 8.7300E-03

2.5150E-03 6.8950E-01 1.3350E+00 2.8860E-01 4.8050E-03 6.1420E-01 1.2070E+00

4.9220E-01 5.5080E-02 4.1510E-01 9.7430E-01 4.5380E-01 5.4190E-02 1.5170E-01

2.1980E-01 9.9750E-02 3.4760E-02 1.8680E-01 3.7150E-01 1.6280E-01 5.1070E-02

1.6240E-01 3.2120E-01 2.1530E-01 2.4920E-02 1.9260E-02 1.4820E-02 4.2570E-03

5.4450E-02 1.0430E-01 2.1220E-02 1.8100E-03 5.2340E-02 1.0830E-01 4.2740E-02

3.8660E-03 5.6900E-02 1.0350E-01 1.5230E-02 8.4770E-03 3.2200E-02 8.9940E-02

3.0680E-02 7.1350E-03 2.4970E-02 7.9240E-03 2.0650E-03 3.5630E-03 1.9570E-02

3.9430E-02 5.4140E-03 1.8440E-03 3.8650E-02 5.6620E-02 2.5720E-02 8.5170E-03

2.0080E+00 5.2070E-02 1.0510E+00 2.7560E+00 1.0680E+00 1.0690E-02 1.3230E+00

6.2830E+00 1.8430E+00 7.3680E-03 1.6960E-02 1.7840E-02 5.7430E-03 1.3620E-01

7.1800E-01 8.0000E-01 2.0200E-01 1.0220E-01 6.3010E-01 7.7470E-01 3.8340E-01

4.5500E-02 4.5380E-01 6.5670E-01 3.6210E-01 4.7890E-02 1.2270E-01 1.5380E-01

8.1120E-02 4.6580E-02 1.6270E-01 2.7050E-01 1.3960E-01 8.3490E-03 1.9040E-01

2.0600E-01 1.7190E-01 8.1150E-03 1.4170E-02 8.3410E-03 1.2000E-02 5.4500E-02

6.4180E-02 1.4850E-02 8.2660E-03 5.5160E-02 6.9470E-02 3.2900E-02 1.9000E-02

4.6700E-02 7.1160E-02 1.0340E-02 6.5140E-03 3.0670E-02 6.5440E-02 2.5420E-02

1.9970E-02 4.6850E-03 3.2480E-03 2.9320E-03 5.3850E-03 1.7920E-02 2.6120E-02

3.7390E-03 1.1520E-02 3.1730E-02 3.9210E-02 2.0930E-02 1.6590E-03 6.1020E-02

8.2150E-01 2.8110E+00 4.7350E-04 1.2370E-02 1.0160E+00 6.1020E+00 2.4710E-03

7.5820E-03 1.3370E-02 1.2390E-02 1.5600E-02 1.7410E-01 5.7650E-01 6.2610E-01

8.9050E-03 1.2330E-01 5.1010E-01 7.7820E-01 2.0220E-03 5.4180E-02 3.6220E-01

7.2440E-01 1.1730E-02 5.0870E-02 1.0360E-01 1.3750E-01 7.8490E-03 5.1050E-02

1.3960E-01 2.6590E-01 7.7150E-04 9.4120E-03 1.4800E-01 2.7680E-01 2.4890E-03

1.0230E-02 1.0250E-02 1.7410E-03 1.4930E-02 4.3850E-02 4.8650E-02 9.3200E-04

9.8060E-03 4.4210E-02 6.9430E-02 5.0890E-03 2.1010E-02 3.7660E-02 4.6650E-02

1.0750E-03 7.1340E-03 2.5420E-02 6.2370E-02 1.4980E-02 2.0890E-03 4.8230E-03

1.0950E-03 1.1790E-03 6.1970E-03 1.4410E-02 1.7970E-02 2.6550E-03 1.2420E-02

2.6760E-02 3.5630E-02 2.7550E+00 2.4490E-01 7.1380E-03 5.6480E+00 1.0140E+00

1.6340E-01 8.2070E-03 3.5210E-02 8.4330E-03 2.7060E-03 4.9250E-05 5.8640E-02

1.9190E-02 2.2990E-04 6.6260E-06 1.7500E-01 3.2860E-02 2.5830E-03 7.3540E-05

1.0100E+00 3.4640E-01 2.2360E-02 2.1200E-04 1.2770E+00 1.7560E-01 2.9820E-02

3.3270E-03 3.3740E-01 2.5320E-01 2.9920E-02 3.8210E-03 1.0830E+00 4.4940E-01

5.9670E-02 3.5320E-03 1.1800E-02 6.5810E-04 2.5070E-05 6.3240E-02 1.2570E-02

3.5560E-03 3.3870E-05 2.2080E-01 1.3710E-02 1.6480E-03 1.9690E-04 3.4900E-02

1.0370E-02 2.8000E-04 3.9450E-05 2.1170E-01 4.2070E-02 4.7020E-03 2.7850E-04

2.2220E-04 2.4180E-02 3.5260E-03 2.1360E-05 3.4450E-02 1.1130E-02 3.6720E-03

1.9390E-05 3.6240E-01 3.2810E-02 3.4600E-03 5.4930E-05 4.8720E+00 2.8680E-01

7.8560E-01 5.3390E+00 2.1790E+00 2.9100E-01 1.4920E-02 1.8010E-02 3.9840E-03

2.9490E-03 2.9270E-02 1.7980E-02 1.9470E-02 2.4720E-04 5.0130E-02 9.1590E-02

3.4400E-02 3.0020E-03 4.2420E-01 1.1640E+00 4.0080E-01 2.6480E-02 3.1020E-01

7.7020E-01 1.5750E-01 3.1780E-02 2.9890E-01 6.3010E-01 2.6700E-01 3.2940E-02

2.8250E-01 1.2500E+00 4.8470E-01 6.8710E-02 5.2960E-03 5.0760E-03 3.9790E-04

2.4520E-02 3.2860E-02 6.5870E-03 3.9160E-03 3.7980E-02 1.4940E-01 1.3580E-02

1.7770E-03 1.6490E-02 1.2030E-02 1.0320E-02 2.5540E-04 5.1210E-02 1.1860E-01

4.4600E-02 5.3940E-03 1.9050E-04 1.2310E-02 9.2980E-03 2.1710E-03 1.6920E-02

1.6140E-02 4.9380E-03 4.0580E-03 7.2070E-02 2.3170E-01 3.2670E-02 4.0550E-03

3.8150E+00 1.1760E-01 1.8160E+00 6.8910E+00 2.7450E+00 6.3990E-03 1.0290E-02

1.3520E-02 2.9410E-03 8.9210E-03 2.5440E-02 7.6120E-03 1.3740E-02 9.7390E-03

5.1530E-02 6.0920E-02 2.6840E-02 4.8790E-02 4.8490E-01 8.4400E-01 3.1540E-01

7.0470E-02 3.0600E-01 5.5480E-01 1.2760E-01 4.9520E-02 3.1330E-01 4.4100E-01

2.1590E-01 5.9430E-02 4.8080E-01 9.4180E-01 3.9960E-01 1.9870E-03 4.7110E-03

2.2200E-03 9.5070E-03 1.8580E-02 2.3700E-02 4.8470E-03 5.7570E-03 4.2470E-02

1.1010E-01 1.0700E-02 5.0690E-03 1.4460E-02 5.7250E-03 7.2620E-03 8.0120E-03

5.5120E-02 8.5890E-02 3.6100E-02 1.5870E-04 5.3900E-03 9.3150E-03 5.1080E-03

8.1340E-03 1.0010E-02 1.3320E-02 3.6690E-03 1.2080E-02 7.7790E-02 1.6790E-01

2.5890E-02 1.0620E-03 1.3650E-01 2.3220E+00 7.7510E+00 1.8100E-03 7.1500E-03

8.9980E-03 8.6790E-03 1.4200E-03 1.1050E-02 2.1650E-02 1.0500E-02 1.0140E-03

1.1660E-02 4.2670E-02 6.3400E-02 2.3270E-03 5.8420E-02 3.9200E-01 9.0850E-01

1.2100E-02 8.0580E-02 2.5530E-01 5.0280E-01 6.3930E-03 5.6270E-02 2.5880E-01

5.0030E-01 3.5320E-03 6.8540E-02 3.9760E-01 1.0430E+00 5.8420E-04 2.7030E-03

3.8970E-03 2.4560E-03 1.0860E-02 1.5960E-02 1.6090E-02 7.4840E-04 6.7810E-03

3.3880E-02 9.2860E-02 9.0210E-04 6.1850E-03 1.2240E-02 6.7450E-03 6.7990E-04

9.3230E-03 4.4660E-02 9.2610E-02 1.2700E-04 1.7120E-03 6.9190E-03 7.2190E-03

2.3290E-03 9.0590E-03 9.0110E-03 7.6790E-03 1.2080E-03 1.4510E-02 6.3320E-02

1.4850E-01 1.0700E+00 3.5580E-02 1.0330E-03 1.6800E-01 2.8860E-02 1.0640E-04

1.6640E-05 1.3150E-02 9.1490E-04 2.4340E-05 1.6520E-06 2.9320E-02 7.5180E-03

4.7720E-04 9.8100E-06 1.8710E+00 1.8680E-01 2.7580E-03 3.1260E-05 1.0510E-01

2.3580E-02 3.2600E-03 3.6400E-05 3.4350E-01 1.0380E-01 1.0200E-02 8.2000E-04

1.0560E+00 2.2010E-01 5.6560E-02 3.7800E-03 4.8660E-04 1.5760E-04 2.3370E-05

1.5730E-02 2.4000E-03 1.8300E-04 3.3720E-05 8.7160E-02 1.4150E-02 2.2390E-03

1.4820E-04 3.3270E-02 6.4220E-03 2.4920E-04 4.7010E-05 4.4960E-01 5.8060E-02

6.1810E-03 2.2690E-04 1.1370E-03 7.0040E-04 3.8450E-04 8.4720E-05 3.1530E-02

3.5220E-03 1.2090E-04 1.7580E-06 3.5200E-02 9.8830E-03 1.3150E-03 3.1850E-05

2.2510E+00 6.7140E-02 6.6180E-02 7.6960E-02 2.9570E-02 9.4530E-05 4.0940E-03

7.2300E-03 8.9470E-04 2.4450E-05 1.1120E-02 1.3050E-02 7.9400E-03 5.4810E-04

3.1420E-01 1.8910E+00 2.2840E-01 3.1640E-03 3.6850E-02 5.3370E-02 2.1410E-02

3.7700E-03 1.0190E-01 4.4640E-01 1.1290E-01 1.1430E-02 2.6200E-01 1.3630E+00

3.9810E-01 6.3790E-02 3.1940E-04 1.9050E-04 8.7880E-05 5.9550E-03 7.7020E-03

2.1760E-03 1.5490E-04 2.5600E-02 5.0270E-02 1.2380E-02 2.4820E-03 1.3830E-02

1.4690E-02 6.1820E-03 2.1100E-04 1.1390E-01 4.9010E-01 5.9800E-02 7.1280E-03

9.9470E-04 5.5850E-04 2.5980E-04 2.0480E-04 1.1240E-02 1.6340E-02 3.3880E-03

1.3000E-04 1.4130E-02 1.5870E-02 9.1010E-03 1.5170E-03 2.5510E+00 1.9050E-02

6.2890E-02 4.5170E-02 2.0960E-02 9.8460E-04 4.2870E-03 4.6140E-03 6.3570E-04

2.5660E-03 1.1050E-02 8.1660E-03 6.2040E-03 4.0210E-02 6.1900E-01 2.3680E+00

1.7540E-01 9.9130E-03 3.3880E-02 3.7410E-02 1.7780E-02 2.5160E-02 1.6860E-01

3.3930E-01 9.0440E-02 7.6060E-02 4.6690E-01 1.0650E+00 3.3450E-01 1.8640E-04

1.9390E-04 1.2100E-04 1.8080E-03 5.5750E-03 4.7700E-03 1.5380E-03 6.6270E-03

2.4400E-02 3.6580E-02 1.0250E-02 4.2890E-03 1.2680E-02 8.6360E-03 4.3710E-03

1.5670E-02 1.2720E-01 3.8350E-01 4.9570E-02 8.5270E-04 3.9580E-04 2.7990E-04

2.0120E-04 2.9260E-03 1.1150E-02 1.0280E-02 2.4130E-03 4.0100E-03 1.2750E-02

1.0650E-02 7.4470E-03 3.1200E-03 2.3630E-02 5.3470E-02 4.3200E-02 1.4590E-04

1.2250E-03 3.5430E-03 3.8620E-03 3.0990E-04 3.0410E-03 9.4100E-03 1.0570E-02

1.8840E-03 4.9200E-02 4.8910E-01 2.1460E+00 1.4040E-03 1.1580E-02 2.9850E-02

3.9590E-02 2.6820E-03 2.9070E-02 1.3990E-01 3.4990E-01 6.8020E-03 8.6260E-02

3.9590E-01 1.1340E+00 9.7070E-05 1.9330E-04 1.3610E-04 3.9580E-04 2.1560E-03

4.7120E-03 4.1910E-03 1.0800E-03 7.6480E-03 2.0960E-02 3.5120E-02 8.5290E-04

5.1840E-03 1.0820E-02 8.2600E-03 1.3160E-03 1.8270E-02 1.0390E-01 3.5850E-01

7.1060E-04 2.4560E-04 3.4260E-04 1.4260E-04 4.8300E-04 3.6270E-03 9.3710E-03

8.8300E-03 5.9860E-04 4.6640E-03 1.1250E-02 1.2540E-02 3.5780E+00 5.3530E-01

3.4500E-02 1.2570E-01 5.2830E-02 3.2800E-02 1.6560E-02 8.4890E-02 5.7250E-02

3.1820E-02 1.6970E-02 7.8480E-02 3.6490E-02 1.3330E-02 3.3050E-03 4.6430E-02

2.6330E-02 1.1480E-02 3.3170E-03 4.4870E-02 2.4450E-02 1.1400E-02 3.7570E-03

8.3930E-02 3.1760E-02 8.6210E-03 1.3700E-03 9.0960E-02 5.8800E-02 9.8180E-03

3.1270E-02 1.8160E-02 8.8150E-03 3.4100E-03 8.5960E-02 3.9520E-02 1.2600E-02

3.5490E-03 5.9650E-02 3.0720E-02 1.3210E-02 5.8150E-03 5.0750E-02 1.7130E-02

6.0450E-03 2.7000E-03 9.6640E-02 1.0280E-01 6.7680E-02 4.1220E-03 5.3180E-02

2.7010E-02 9.4290E-03 2.7600E-03 3.8290E-02 1.7140E-02 5.5340E-03 1.0880E-03

3.1940E+00 6.3820E-01 5.2830E-02 7.9950E-02 2.9860E-02 1.2010E-02 5.1920E-02

3.4250E-02 3.5930E-02 2.1640E-02 2.6110E-02 3.0780E-02 2.7140E-02 1.5020E-02

2.3680E-02 1.5720E-02 1.5000E-02 1.1600E-02 1.9500E-02 1.4820E-02 1.4750E-02

1.1810E-02 1.5630E-02 3.7920E-02 3.0020E-02 1.0700E-02 6.6630E-02 1.7320E-02

3.5550E-02 1.8150E-02 1.2970E-02 1.0010E-02 5.1700E-03 3.2390E-02 3.0330E-02

3.0950E-02 1.2890E-02 3.0690E-02 2.3730E-02 2.0750E-02 7.0130E-03 9.3140E-03

2.7020E-02 1.5510E-02 5.5920E-03 7.2460E-02 7.6380E-02 8.0180E-03 4.6410E-02

2.7000E-02 1.7390E-02 1.7690E-02 7.2000E-03 1.4100E-02 1.2820E-02 1.2870E-02

6.2440E-03 2.1290E+00 3.2800E-02 2.9860E-02 4.0580E-02 1.1090E-02 2.3660E-02

3.2960E-02 1.7460E-02 2.1710E-02 4.9600E-03 1.9140E-02 1.9410E-02 2.2300E-02

7.5030E-03 1.3230E-02 1.2030E-02 1.0900E-02 5.6840E-03 1.1820E-02 1.1010E-02

1.1980E-02 3.8570E-04 1.5630E-02 2.1750E-02 2.5080E-02 3.2150E-02 3.0120E-02

1.7670E-02 8.8100E-03 1.0000E-02 7.2790E-03 4.6230E-03 6.4490E-03 2.6320E-02

1.4910E-02 2.2970E-02 1.3200E-02 2.0750E-02 1.0160E-02 1.0680E-02 2.8240E-03

6.9070E-03 1.7050E-02 1.1520E-02 4.8300E-02 3.2230E-02 3.4170E-02 2.0890E-02

9.4290E-03 1.7690E-02 9.0470E-03 9.9460E-03 2.8280E-03 1.0850E-02 7.5630E-03

9.4830E-03 1.6560E-02 1.2010E-02 1.1090E-02 1.6790E-02 9.9250E-03 1.2500E-02

1.7500E-02 7.6590E-03 4.8120E-04 4.9820E-03 1.3230E-02 1.4220E-02 1.2410E-03

7.2940E-03 8.2330E-03 5.2790E-03 8.9530E-04 5.2370E-03 7.8820E-03 6.1980E-03

3.5310E-05 3.8140E-04 1.1030E-02 1.9990E-02 9.7800E-03 2.6660E-02 3.1040E-03

3.4100E-03 5.1670E-03 4.6210E-03 2.1880E-03 1.5700E-03 5.2340E-03 1.7320E-02

1.1200E-02 5.8150E-03 6.9950E-03 1.0670E-02 3.9690E-03 1.0210E-03 1.3280E-03

4.0220E-03 1.1530E-02 2.4150E-02 6.8320E-03 3.5510E-02 1.2490E-03 2.7600E-03

7.1990E-03 9.9450E-03 3.1600E-03 2.8250E-04 2.9420E-03 7.2070E-03 4.9130E-03

1.2770E+00 7.0730E-02 7.3590E-03 4.4670E+00 1.4880E+00 3.1460E-01 3.4520E-02

8.9260E+00 2.0150E+00 3.2860E-01 3.1410E-02 1.3740E-01 5.3140E-02 2.0690E-02

5.4390E-03 1.6620E-01 5.8180E-02 1.8070E-02 4.2240E-03 3.9210E-02 1.7640E-02

8.0010E-03 2.2920E-03 3.2810E-01 1.2790E-01 2.2290E-02 6.3350E-01 2.9070E-01

8.3010E-02 1.2810E-02 4.7030E-01 1.4500E-01 3.1400E-02 5.4330E-03 1.4950E-01

7.1800E-02 2.2880E-02 6.9970E-03 3.4400E-02 1.5550E-02 6.2040E-03 2.2850E-03

1.8620E-02 1.8820E-02 1.3700E-02 7.7400E-03 5.8750E-02 3.4800E-02 1.7250E-02

6.2380E-03 6.4360E-02 3.3800E-02 1.4220E-02 5.2280E-03 1.4150E+00 7.9150E-02

1.0700E+00 1.8990E+00 1.3740E+00 3.9420E-01 4.8630E-01 5.2850E+00 2.2510E+00

4.2960E-01 4.0970E-02 6.5460E-02 3.3700E-02 2.1630E-02 2.6270E-02 1.0430E-01

6.1790E-02 2.1430E-02 1.0250E-02 2.0030E-02 1.0850E-02 8.9080E-03 1.7460E-01

1.0600E-01 7.7200E-02 2.8940E-01 1.9980E-01 1.9080E-01 8.4730E-02 9.9160E-02

2.1760E-01 1.3630E-01 3.6560E-02 7.1760E-02 4.8300E-02 5.1400E-02 1.6910E-02

1.1430E-02 1.5250E-02 1.2320E-02 6.3830E-03 1.3960E-02 1.4900E-02 1.0150E-02

4.6220E-03 3.4790E-02 2.4310E-02 1.7730E-02 1.0850E-02 2.8930E-02 2.4100E-02

2.2420E-02 1.2940E-02 9.9000E-01 8.9620E-02 1.0200E+00 9.8800E-01 1.0610E+00

3.0270E-03 5.1440E-01 3.3220E+00 1.7930E+00 1.3250E-02 2.2130E-02 4.6890E-02

2.4930E-02 5.4700E-03 2.1570E-02 7.9020E-02 3.4960E-02 3.7110E-03 3.8910E-03

1.6140E-02 9.6540E-03 7.3540E-02 1.0030E-01 6.5530E-02 8.2700E-02 1.9030E-01

1.2440E-01 1.1260E-01 1.0210E-02 9.4510E-02 1.1650E-01 1.0420E-01 2.2860E-02

5.1390E-02 2.0300E-02 3.0170E-02 2.7660E-03 7.5690E-03 9.9040E-03 9.8530E-03

9.3090E-03 1.1310E-02 6.4890E-03 2.8870E-03 1.7250E-02 1.7720E-02 1.5640E-02

7.7300E-03 9.1630E-03 1.9250E-02 1.4150E-02 1.5810E-02 2.5920E-03 1.0320E-01

7.0630E-01 7.6900E-01 2.7930E-04 3.0770E-03 3.6060E-01 2.4490E+00 1.8070E-03

1.3010E-02 1.4280E-02 2.5010E-02 4.2610E-04 5.3990E-03 1.4970E-02 3.9200E-02

9.8860E-06 4.1140E-03 2.9750E-03 9.4930E-03 2.1920E-02 6.3430E-02 3.3510E-02

1.2810E-02 8.4500E-02 1.1240E-01 4.5180E-02 1.8030E-03 9.3570E-03 6.4790E-02

8.7360E-02 6.9970E-03 1.6900E-02 3.0170E-02 8.1410E-03 6.1600E-04 2.3170E-03

5.0190E-03 6.8620E-03 4.6540E-03 5.7320E-03 2.9640E-03 1.3960E-03 6.2380E-03

1.0780E-02 7.7290E-03 4.3890E-03 2.6330E-03 6.9090E-03 1.1800E-02 7.8540E-03

3.2590E+00 2.9650E-01 1.6410E-02 8.0430E+00 2.0940E+00 3.2310E-01 2.2790E-02

4.8130E-01 1.5280E-01 3.1850E-02 5.4600E-03 7.7550E-01 2.5080E-01 5.4740E-02

7.0040E-03 4.1140E-01 1.1730E-01 1.8660E-02 1.4740E-03 4.0900E-01 2.0620E-02

3.2450E-03 6.1000E-01 1.2330E-01 1.4570E-02 8.0220E-04 7.3830E-01 2.5010E-01

5.7630E-02 6.2390E-03 1.3800E-01 4.7000E-02 9.3580E-03 3.0420E-03 8.2740E-02

3.4840E-02 1.3140E-02 3.6810E-03 2.5820E-02 5.9260E-02 1.1790E-02 7.5640E-03

6.1900E-02 2.7980E-02 1.1210E-02 2.3880E-03 9.1060E-02 3.2570E-02 7.6560E-03

1.2800E-03 3.5760E+00 3.6140E-01 1.6110E+00 4.2010E+00 2.2040E+00 3.9550E-01

1.5200E-01 2.1400E-01 1.3800E-01 3.4540E-02 2.0130E-01 3.8010E-01 2.4250E-01

6.4670E-02 7.4450E-02 2.2190E-01 1.2790E-01 2.2700E-02 1.4570E-01 1.8850E-01

1.1980E-02 1.8250E-01 2.9120E-01 1.0920E-01 1.6090E-02 2.4890E-01 3.2100E-01

2.0590E-01 6.7630E-02 5.8490E-02 5.1230E-02 4.0730E-02 6.4690E-03 3.0390E-02

3.8560E-02 2.5460E-02 1.3410E-02 2.0660E-02 2.7490E-02 3.1620E-02 3.8200E-03

3.2910E-02 2.6640E-02 1.3970E-02 9.6700E-03 3.3410E-02 3.5940E-02 2.7540E-02

8.3660E-03 2.7420E+00 1.3020E-01 1.7220E+00 2.6860E+00 1.7750E+00 3.1750E-02

1.3740E-01 1.2820E-01 1.0800E-01 2.9300E-02 1.9370E-01 2.4870E-01 2.0320E-01

1.8510E-03 8.4660E-02 1.4470E-01 1.0400E-01 4.1870E-02 1.3930E-01 7.8540E-02

4.0940E-02 1.6510E-01 1.6680E-01 7.4900E-02 5.7440E-02 2.0500E-01 2.0440E-01

1.6540E-01 1.8320E-02 4.9030E-02 2.4390E-02 2.6610E-02 9.8370E-03 2.1650E-02

2.7590E-02 2.1790E-02 1.5490E-02 1.4590E-02 2.1750E-02 1.0890E-02 1.6030E-02

1.7580E-02 2.0810E-02 7.9800E-03 7.6510E-03 2.7520E-02 2.1390E-02 2.1750E-02

2.2970E-03 1.5680E-01 1.3330E+00 2.7180E+00 5.4600E-03 3.4450E-02 1.0770E-01

1.2190E-01 2.4910E-03 3.4580E-02 1.5650E-01 2.5980E-01 9.4600E-05 2.1120E-03

6.4440E-02 1.5720E-01 9.4450E-03 5.5500E-02 1.0810E-01 5.5220E-03 4.9700E-02

1.2690E-01 1.1750E-01 6.2400E-03 6.7500E-02 1.6480E-01 1.8350E-01 5.9290E-03

1.7790E-02 3.6050E-02 1.8800E-02 2.2570E-03 9.7530E-03 1.7840E-02 2.4080E-02

1.0330E-02 8.8520E-03 8.2410E-03 1.4400E-02 5.5360E-03 1.4880E-02 1.2110E-02

9.1470E-03 1.2790E-03 8.3640E-03 2.1750E-02 2.0840E-02 3.0320E+00 1.1590E-01

4.8430E-03 5.0380E-01 1.2110E-01 2.5470E-02 5.3180E-03 3.3680E-01 8.8170E-02

1.3240E-02 6.0500E-04 2.5720E-01 7.9400E-02 1.9460E-02 2.5650E-03 2.1980E-02

8.6730E-03 1.1110E-03 7.3250E-01 5.6390E-02 1.0840E-02 1.9790E-03 4.9850E-01

1.0250E-01 1.1680E-02 1.3770E-03 6.6200E-02 1.6850E-02 2.5300E-03 7.6690E-04

2.4930E-01 5.9700E-02 9.7500E-03 1.8460E-03 4.7260E-02 3.1010E-02 1.5950E-02

3.4760E-03 8.6790E-02 2.0570E-02 6.6810E-03 5.5330E-04 1.5730E-01 4.6060E-02

1.1350E-02 1.4300E-03 3.7390E+00 1.3860E-01 1.5040E-01 2.6430E-01 1.0650E-01

2.5970E-02 8.7920E-02 1.7200E-01 9.1120E-02 1.5730E-02 6.9210E-02 1.3630E-01

7.2250E-02 2.2010E-02 1.4090E-02 7.0840E-03 5.0350E-03 1.8190E-01 4.3200E-01

4.5360E-02 9.5610E-03 1.3210E-01 2.6250E-01 1.0440E-01 1.2920E-02 2.6520E-02

2.8770E-02 1.4890E-02 1.7950E-03 5.9560E-02 1.4130E-01 6.0770E-02 1.0440E-02

3.9390E-02 2.2590E-02 1.0820E-02 8.6220E-03 3.4110E-02 4.4810E-02 1.0450E-02

6.8480E-03 5.4870E-02 7.6850E-02 3.5990E-02 1.2430E-02 2.8650E+00 3.9340E-02

1.3550E-01 1.7880E-01 8.4560E-02 1.3210E-02 9.0830E-02 1.1640E-01 7.4840E-02

1.4440E-02 6.2450E-02 9.9290E-02 6.3240E-02 7.8710E-03 7.7110E-03 5.3780E-03

4.1040E-02 1.8510E-01 2.7810E-01 3.0850E-02 2.3380E-02 1.3420E-01 1.7080E-01

8.0240E-02 8.4280E-03 2.3070E-02 1.6010E-02 1.0070E-02 9.7350E-03 6.0660E-02

1.0460E-01 4.9160E-02 3.1510E-02 1.4290E-02 1.1430E-02 7.8940E-03 1.3700E-02

2.3210E-02 3.2590E-02 7.1130E-03 1.6490E-02 4.4080E-02 5.3850E-02 2.9830E-02

8.9530E-03 4.2360E-02 1.1150E-01 1.6580E-01 6.0440E-04 1.5710E-02 7.4670E-02

1.3040E-01 1.4000E-03 1.6220E-02 5.3880E-02 1.0810E-01 3.5490E-03 7.9720E-03

4.1980E-03 8.9470E-03 4.7700E-02 1.4710E-01 1.9810E-01 3.0580E-03 2.7500E-02

1.0850E-01 1.6790E-01 2.4740E-03 9.0520E-03 1.8370E-02 1.3280E-02 1.8430E-03

1.0430E-02 4.9090E-02 1.0940E-01 2.3630E-02 7.7480E-03 1.2250E-02 5.2260E-03

3.8590E-03 1.4690E-02 1.8970E-02 1.9880E-02 2.9750E-03 1.8460E-02 3.7820E-02

4.8910E-02 1.9140E+00 6.5680E-02 3.6560E-03 5.9410E+00 1.4590E+00 2.0130E-01

1.2430E-02 1.1700E+01 2.0990E+00 2.4700E-01 1.4490E-02 4.5510E-01 5.6900E-02

1.9570E-02 5.7130E-01 1.8600E-01 3.0830E-02 8.1090E-03 6.2320E-01 1.4210E-01

2.3190E-02 3.2520E-03 1.8340E-01 5.7610E-02 8.1510E-03 2.3000E-03 7.6790E-02

2.4940E-02 7.0980E-03 1.4520E-03 2.0330E-02 2.7950E-02 1.0320E-02 4.5990E-03

4.5190E-02 2.1330E-02 7.0160E-03 1.1610E-03 9.5170E-02 2.7870E-02 7.4330E-03

1.3720E-03 2.3250E+00 8.0030E-02 1.0980E+00 3.1790E+00 1.5810E+00 2.4740E-01

8.2010E-01 7.6850E+00 2.4690E+00 3.0520E-01 1.8720E-01 2.1400E-01 2.7350E-02

2.3380E-01 2.1710E-01 1.6340E-01 2.3470E-02 1.4200E-01 3.2190E-01 1.3860E-01

2.5750E-02 7.4110E-02 6.9140E-02 5.2230E-02 6.3110E-03 1.7810E-02 4.4020E-02

2.2070E-02 7.8390E-03 1.6270E-02 1.6380E-02 1.3660E-02 4.2710E-03 2.4670E-02

1.6620E-02 1.1870E-02 6.5500E-03 2.7860E-02 4.7360E-02 2.2180E-02 7.9630E-03

1.7510E+00 6.7790E-02 1.2130E+00 2.0240E+00 1.2630E+00 5.5850E-03 9.6940E-01

5.5220E+00 1.9630E+00 7.3230E-02 1.5800E-01 8.8120E-02 6.6880E-02 1.9860E-01

1.0230E-01 1.0880E-01 2.3180E-02 1.3860E-01 2.0230E-01 1.0740E-01 2.0400E-02

6.3840E-02 3.1530E-02 3.4950E-02 4.2650E-03 1.6390E-02 3.0370E-02 1.8720E-02

1.2200E-02 9.9420E-03 1.0330E-02 5.5300E-03 1.0730E-02 1.3980E-02 1.2780E-02

7.3190E-03 7.4330E-03 2.2180E-02 3.1540E-02 1.7610E-02 1.0050E-03 8.1790E-02

9.3050E-01 2.0410E+00 4.8670E-04 6.1880E-03 7.3080E-01 4.9260E+00 2.9690E-02

6.9940E-02 1.1260E-01 1.7950E-02 6.9660E-02 1.4860E-01 8.2770E-02 3.2520E-03

2.5740E-02 1.0730E-01 1.8050E-01 5.0200E-03 2.0790E-02 4.7900E-02 2.6560E-02

7.7410E-04 4.7790E-03 1.4370E-02 2.7960E-02 8.1330E-03 5.7710E-03 5.8210E-03

5.4510E-03 3.1180E-03 1.0820E-02 1.0120E-02 5.7800E-03 1.3720E-03 7.9630E-03

1.7610E-02 2.5790E-02 3.7460E+00 2.5430E-01 1.1970E-02 6.9190E+00 1.6690E+00

3.1230E-01 1.4170E-02 7.8760E-02 4.4610E-02 1.2410E-02 2.6320E-01 1.8380E-02

4.1990E-03 7.1070E-04 7.2380E-01 1.6940E-01 3.6920E-02 7.9230E-03 1.0900E-01

1.4940E-02 4.0270E-03 7.5200E-04 2.5900E-01 6.5560E-02 1.1170E-02 1.6490E-03

6.5380E-03 2.9730E-02 6.3450E-03 4.0930E-04 1.0060E-01 2.3240E-02 8.1800E-03

1.3570E-03 1.8890E-01 6.2200E-02 4.8210E-03 3.7730E-04 4.4040E+00 3.0480E-01

1.3150E+00 7.4580E+00 3.0530E+00 3.7230E-01 6.0160E-02 2.9970E-02 2.2940E-02

6.2230E-02 1.5870E-01 1.3270E-02 3.7870E-03 2.1140E-01 3.8740E-01 1.4670E-01

3.7430E-02 3.2560E-02 6.0770E-02 9.9960E-03 3.4810E-03 6.5560E-02 1.3970E-01

6.3370E-02 1.2490E-02 5.4470E-03 1.5530E-02 1.1060E-02 3.8490E-03 3.8940E-02

5.2830E-02 1.2290E-02 7.3960E-03 7.9510E-02 1.4360E-01 6.7330E-02 5.5090E-03

3.4290E+00 1.4390E-01 2.4850E+00 5.3550E+00 2.4540E+00 4.0590E-02 3.0070E-02

1.9850E-02 1.4130E-02 6.3480E-02 1.0340E-01 8.9850E-03 5.6110E-02 1.8890E-01

2.6520E-01 1.1660E-01 1.0040E-02 2.9040E-02 3.9720E-02 6.6610E-03 1.1120E-02

6.3330E-02 9.7920E-02 5.2480E-02 4.3580E-03 7.0470E-03 1.0770E-02 6.5320E-03

1.5850E-02 2.7590E-02 3.7570E-02 7.9990E-03 1.2230E-02 8.3990E-02 8.8620E-02

5.1760E-02 3.6670E-04 1.7130E-01 1.9560E+00 5.7060E+00 2.4130E-02 3.1070E-02

1.2640E-02 3.1850E-03 1.6340E-02 5.0440E-02 7.2520E-02 1.3130E-02 6.0080E-02

1.5560E-01 2.4080E-01 2.9450E-03 1.0740E-02 2.3080E-02 2.7430E-02 1.6460E-03

1.2480E-02 5.2450E-02 1.0170E-01 3.2680E-03 2.4710E-03 8.3350E-03 7.4450E-03

5.3910E-03 1.6200E-02 2.2000E-02 2.3050E-02 1.1580E-03 1.4670E-02 6.7350E-02

9.4700E-02 1.4750E+00 1.1260E-01 4.3910E-03 1.6530E-02 2.0110E-03 1.0550E-04

7.1600E-02 2.4660E-02 7.7540E-03 1.7300E-04 1.9580E+00 1.4860E-01 2.0290E-02

2.6290E-03 3.2640E-02 8.2220E-03 1.2060E-03 1.6020E-04 5.1160E-01 8.9840E-02

1.0430E-02 9.6270E-04 4.0860E-04 2.4440E-02 3.5930E-03 1.2370E-04 3.8120E-02

8.1020E-03 6.5030E-04 5.1920E-05 2.6700E-01 2.2830E-02 4.0810E-03 2.4700E-04

2.9280E+00 1.3120E-01 8.1570E-03 6.6280E-03 1.2050E-03 3.6710E-02 3.3400E-02

1.1930E-02 8.4020E-03 3.6260E-01 1.3000E+00 1.4110E-01 2.1730E-02 1.4180E-02

1.4200E-02 6.7200E-03 1.1200E-03 1.1000E-01 2.9760E-01 9.5630E-02 1.1960E-02

3.5020E-04 1.2510E-02 9.4450E-03 2.1860E-03 1.5570E-02 1.6600E-02 7.3340E-03

6.4340E-04 5.0700E-02 1.6530E-01 1.9880E-02 4.6140E-03 3.5020E+00 3.4990E-03

6.4690E-03 3.3670E-03 1.7530E-02 2.1930E-02 2.6160E-02 8.7880E-03 6.1850E-02

3.9340E-01 9.5390E-01 1.1240E-01 4.9700E-03 1.1730E-02 8.7540E-03 4.7130E-03

1.7310E-02 1.1720E-01 2.1870E-01 7.7080E-02 2.9180E-04 5.5470E-03 9.4390E-03

5.1660E-03 4.7940E-03 1.3790E-02 9.7500E-03 5.1730E-03 1.0050E-02 5.1890E-02

1.2210E-01 1.6380E-02 1.1380E-03 4.4290E-03 5.0870E-03 5.1400E-03 1.9400E-02

1.9630E-02 1.5380E-02 9.0760E-03 7.2020E-02 3.2100E-01 8.1640E-01 1.2890E-03

5.6990E-03 9.8850E-03 7.2890E-03 1.8760E-03 1.9990E-02 9.6610E-02 2.2650E-01

2.3350E-04 1.8020E-03 7.0080E-03 7.2790E-03 9.7320E-04 5.7520E-03 1.1600E-02

8.7000E-03 1.3970E-03 1.1750E-02 4.2870E-02 1.0600E-01 6.6450E-01 4.5480E-02

2.4410E+00 1.1680E+00 3.9530E-01 6.9080E-02 7.6840E+00 2.7030E+00 7.3370E-01

1.3080E-01 5.3200E-02 2.9890E-02 1.4510E-02 5.6210E-03 2.1140E-02 1.5370E-02

9.2060E-03 4.3510E-03 3.4660E-02 1.0720E-01 8.9380E-02 5.4490E-02 9.1060E-02

5.4390E-02 3.0820E-02 1.4020E-02 4.1030E-02 2.5920E-02 1.7430E-02 1.1390E-02

5.6140E-01 7.8560E-01 7.2680E-01 7.3020E-01 4.7500E-01 3.2820E-01 3.5350E+00

2.6210E+00 1.0400E+00 2.2550E-02 2.0420E-02 1.6440E-02 9.2080E-03 1.1000E-02

6.0210E-03 7.3460E-03 9.1140E-03 2.3110E-02 8.9380E-02 5.9980E-02 1.8160E-02

4.3050E-02 4.0920E-02 2.8790E-02 1.3990E-02 1.7750E-02 2.2090E-02 1.5770E-02

8.2110E-03 3.1910E-02 5.5060E-01 5.0520E-01 2.7140E-01 1.9320E-02 2.0820E-01

1.4820E+00 2.0540E+00 6.4790E-03 1.1550E-02 1.0250E-02 5.7610E-03 1.2230E-03

6.4170E-03 5.6580E-03 3.2760E-03 1.1550E-02 5.4480E-02 1.8180E-02 1.1030E-02

1.8130E-02 1.8540E-02 1.6660E-02 9.9130E-03 9.6150E-03 6.7100E-03 7.8820E-03

7.7600E-03 2.9910E+00 4.5470E-01 3.2360E-02 8.1550E+00 2.9830E+00 6.5710E-01

7.6520E-02 1.1310E-01 5.5810E-02 1.5740E-02 2.7420E-03 6.0690E-02 3.2170E-02

1.5300E-02 5.5370E-03 1.6110E-01 1.3940E-01 3.8550E-02 1.6160E-02 1.3900E-01

7.2680E-02 2.8130E-02 1.0440E-02 1.2920E-01 5.1950E-02 1.4210E-02 2.1520E-03

2.6750E+00 5.3550E-01 2.2420E+00 3.1670E+00 2.7070E+00 8.1580E-01 5.5810E-02

3.1380E-02 3.8820E-02 1.4090E-02 2.4590E-02 2.4840E-02 2.1260E-02 1.4480E-02

1.2070E-01 6.2030E-02 6.7320E-02 1.6630E-02 7.2680E-02 4.8410E-02 4.8820E-02

1.7380E-02 4.0790E-02 4.8850E-02 4.1760E-02 1.6950E-02 1.7830E+00 1.9260E-01

2.1390E+00 1.5430E+00 2.0900E+00 1.5740E-02 3.8820E-02 1.6150E-02 2.2710E-02

7.4920E-03 1.5640E-02 1.6680E-02 1.6490E-02 8.0440E-02 2.9060E-02 4.1080E-02

2.6990E-02 2.8140E-02 4.8820E-02 2.1090E-02 2.6820E-02 6.1280E-03 3.3380E-02

2.7300E-02 3.2190E-02 8.6320E-03 2.1580E-01 1.4800E+00 1.2780E+00 2.7420E-03

1.4090E-02 2.2710E-02 5.7900E-03 1.4180E-03 6.2070E-03 9.9530E-03 1.0210E-02

4.0200E-02 1.2510E-02 1.5000E-02 2.1000E-02 1.0440E-02 1.7380E-02 2.6820E-02

7.7560E-03 3.1310E-04 6.8530E-03 2.2680E-02 1.9380E-02 3.0100E+00 2.1790E-01

1.1660E-02 1.7560E-01 7.1080E-02 1.8820E-02 4.7030E-03 1.2470E-01 6.0310E-02

1.9180E-02 4.8910E-03 3.9780E-02 3.5990E-01 3.5390E-02 5.3560E-03 3.7250E-01

1.1800E-01 1.5190E-02 3.9310E-03 1.1700E-01 5.9480E-02 2.0900E-02 3.6280E-03

3.4190E+00 2.6600E-01 8.4880E-02 6.4270E-02 5.1800E-02 1.5050E-02 5.4010E-02

4.8230E-02 4.3680E-02 2.0180E-02 3.1820E-02 1.4070E-01 1.5940E-01 2.0630E-02

1.5150E-01 1.3430E-01 1.0990E-01 1.1930E-02 5.9440E-02 4.0200E-02 3.7130E-02

2.2790E-02 2.6070E+00 3.1650E-02 6.0970E-02 3.6300E-02 3.3070E-02 1.3250E-02

3.9000E-02 2.9440E-02 3.7210E-02 2.3870E-02 4.7180E-02 1.2250E-01 7.0870E-02

3.8860E-02 1.3200E-01 5.8340E-02 7.5140E-02 2.0890E-02 3.7110E-02 3.0460E-02

3.0910E-02 1.0220E-02 3.0540E-02 4.4380E-02 2.2880E-02 2.9780E-03 1.3260E-02

3.1760E-02 3.2940E-02 1.5910E-02 1.3440E-02 5.6830E-02 9.0050E-02 9.0740E-03

4.2040E-02 1.0090E-01 5.2000E-02 3.6280E-03 2.2790E-02 3.0900E-02 2.2460E-02

1.7970E+00 2.9560E-01 9.6070E-02 6.3740E+00 1.6250E+00 3.4780E-01 6.7140E-02

1.1690E+00 2.1060E+00 1.1720E+00 1.0040E-01 1.8240E+00 5.8590E-01 1.0420E-01

6.3390E-03 2.2790E+00 7.0230E-01 1.4210E-01 1.7720E-02 1.6870E+00 2.0780E-01

5.2660E-01 3.6290E+00 1.6860E+00 3.9770E-01 8.7550E-01 1.3960E+00 3.5170E-01

7.8200E-01 5.8410E-01 6.9700E-01 4.8460E-01 1.2490E-01 4.7600E-01 1.0410E+00

6.6760E-01 1.7510E-01 1.1200E+00 5.6530E-02 4.6790E-01 2.2550E+00 1.3310E+00

5.8320E-01 5.8450E-01 6.7860E-01 4.2640E-01 1.0370E-01 4.8370E-01 3.5650E-01

3.1640E-01 3.8850E-02 4.6490E-01 5.5850E-01 5.1370E-01 1.6510E-02 4.0810E-02

3.1570E-01 1.6780E+00 2.9150E-01 1.3650E-01 6.0950E-01 9.6740E-02 6.3390E-03

1.2450E-01 3.1610E-01 1.8330E-01 3.4440E-03 4.1210E-02 3.2240E-01 4.2180E-01

4.1590E+00 3.1560E-01 3.4400E-02 1.3760E-01 7.7400E-02 2.7590E-02 5.9580E-03

5.1430E+00 2.4730E-01 5.5740E-03 1.1660E-03 1.0590E+01 2.1080E+00 1.7900E-01

7.4770E-03 4.8570E+00 3.6140E-01 1.1470E-01 4.7980E-02 2.9370E-02 1.4890E-02

1.1410E+00 3.0940E+00 2.5590E-01 4.7040E-03 2.7410E+00 5.5320E+00 2.2420E+00

2.1060E-01 3.7820E+00 9.1740E-02 2.7300E-02 2.8840E-02 1.7880E-02 1.8370E-01

1.2790E+00 1.9570E+00 1.7880E-01 4.2680E-01 2.8840E+00 3.5440E+00 1.7340E+00

6.8800E-02 1.3880E-02 2.4950E-02 1.6540E-02 1.7830E-02 2.3830E-01 1.0160E+00

1.4300E+00 3.4740E-02 5.2120E-01 2.3210E+00 3.5700E+00 6.8810E-01 4.5880E-01

2.2940E-01 2.0930E+00 1.5730E+00 1.0510E+00 5.2630E-01 1.8660E-02 1.4930E-02

1.1200E-02 7.4640E-03 2.2830E+00 1.0510E+00 4.4270E+00 3.0150E+00 1.2270E+00

2.4950E-01 3.6530E-01 1.4960E-01 6.1920E-02 2.9080E-02 8.7010E-01 2.5650E+00

5.5620E-01 1.4420E+00 1.3780E+00 4.5050E-02 1.7840E-01 1.2880E-01 5.1930E-02

1.4110E-01 1.7690E+00 9.0720E-01 1.5300E-01 2.1920E-02 1.8360E-02 6.9370E-02

9.2340E-02 2.2630E+00 2.8720E-01 3.3660E-02 2.1140E+00 6.9890E-01 1.8590E-01

4.6400E-02 2.1730E+00 3.1420E-01 4.9990E-01 9.7750E-01 6.1350E-01 1.9640E-01

1.4700E+00 8.4330E-02 4.3260E-01 5.4660E-01 4.6180E-01 1.9560E-02 6.9350E-02

2.8870E-01 3.8450E-01 4.3680E+00 4.3890E-01 2.4550E-02 4.7180E+00 5.3530E-01

3.6300E+00

17000.00

5.4710E+00 1.5890E+00 6.9610E-01 2.8790E-01 3.0630E+00 1.2790E+00 4.1040E-01

1.1070E-01 9.2650E+00 6.3050E-01 2.1710E-01 7.2540E-02 9.4470E-01 5.0840E-01

3.9470E-02 2.9500E-01 9.2780E-02 8.1310E-03 6.3420E-01 3.1290E-01 9.6350E-02

1.7030E-02 4.2260E-01 2.1650E-01 1.1360E-01 3.8750E-02 4.1390E-01 2.2370E-01

8.2270E-02 1.9740E-02 2.8570E-01 1.5810E-01 7.5320E-02 3.8170E-02 2.4900E+01

6.9010E+00 6.5590E-01 2.5970E-01 9.7090E-02 3.0960E+01 5.3420E+00 5.9250E-01

6.2180E-02 2.5520E-02 1.1680E-02 1.3560E+01 1.8120E-01 4.3180E-02 1.4000E+00

2.5260E-01 1.0510E-02 2.1130E-03 2.2780E+00 2.9080E-01 3.1000E-02 1.0170E-02

8.4120E-01 1.5190E-02 8.1080E-03 1.3690E-01 9.9390E-02 4.3200E-02 1.0310E-02

7.8880E-02 5.2270E-02 2.1430E-02 9.0090E-03 2.5770E-02 8.2070E-03 2.5280E-03

7.5050E-02 3.6600E-02 1.4230E-02 4.3060E-03 2.9260E-02 1.7670E-02 7.6040E-03

1.8650E-03 6.9990E-02 3.9380E-02 1.3400E-02 2.4140E-03 5.2140E-02 2.1030E-02

4.8080E-03 5.3000E-04 3.9080E-02 1.5490E-02 6.0370E-03 1.7620E-03 3.4670E-02

1.1420E-02 3.4670E-03 1.0900E-03 5.7730E-02 2.6290E-02 1.1350E-02 3.9120E-03

7.6200E-02 2.8450E-02 7.4990E-03 1.1220E-03 4.9140E-02 1.5360E-02 3.8550E-03

6.9910E-04 5.0050E-02 2.3540E-02 8.6080E-03 1.8920E-03 3.7850E-02 1.3410E-02

6.3700E-03 3.2430E-02 2.0740E-02 7.3780E-03 1.6140E-03 2.9480E-02 1.6550E-02

1.0140E-02 7.0940E-03 1.3570E-02 1.0060E-02 3.8830E-03 9.1800E-04 1.1290E-02

8.7240E-03 4.6580E-03 1.5100E-03 2.2740E-02 9.7750E-03 7.7300E-03 4.4660E-03

1.5460E-02 1.0460E-02 5.5650E-03 2.5210E-03 1.9780E-02 1.3610E-02 6.2160E-03

1.8310E-03 5.4240E+00 1.3320E+00 4.5040E-01 1.3900E+00 1.2520E+00 8.8730E-01

3.7000E-01 2.2350E+00 5.5160E+00 4.0600E-01 1.3550E-01 6.8300E-01 2.3100E-01

2.8820E-01 1.6880E-01 9.6490E-02 5.2530E-02 2.8130E-01 2.2800E-01 2.4260E-01

1.0000E-01 2.2070E-01 2.2900E-01 1.0280E-01 9.4650E-02 1.8150E-01 2.2540E-01

1.5100E-01 8.0380E-02 1.7870E-01 1.3790E-01 1.0760E-01 2.8820E-02 6.2440E+00

1.1530E+01 8.5030E+00 6.2650E-01 1.8920E-01 5.4170E-01 2.0700E+01 7.3820E+00

1.1580E+00 7.7580E-02 1.4000E-02 3.9860E+00 6.9100E+00 1.1230E-01 4.6480E-01

6.1970E-01 2.4030E-01 8.4800E-03 4.4400E-01 1.3230E+00 2.9510E-01 2.6240E-02

3.1950E-01 3.6630E-01 5.8730E-03 1.0040E-01 4.0290E-02 5.0930E-02 4.0190E-02

6.2880E-02 3.6360E-02 2.2740E-02 7.2080E-03 1.4800E-02 1.0480E-02 3.9160E-03

3.5590E-02 3.0540E-02 2.4740E-02 1.3270E-02 1.6850E-02 1.0450E-02 1.0970E-02

7.5690E-03 3.4400E-02 2.2090E-02 2.9690E-02 1.3960E-02 2.6810E-02 1.7730E-02

1.3770E-02 4.4670E-03 1.9860E-02 1.7270E-02 8.6010E-03 4.1240E-03 1.3060E-02

1.5940E-02 8.5830E-03 2.9830E-03 2.5620E-02 2.6690E-02 1.6890E-02 1.0230E-02

3.1700E-02 3.0770E-02 2.0610E-02 7.5880E-03 1.5190E-02 2.3490E-02 1.2620E-02

3.9420E-03 2.1290E-02 2.0730E-02 1.6590E-02 8.6960E-03 2.2740E-02 1.8100E-02

5.5030E-03 2.2980E-02 9.7940E-03 1.1160E-02 5.7730E-03 1.7250E-02 1.5980E-02

1.2200E-02 5.0940E-03 1.0760E-02 3.9310E-03 5.1250E-03 2.9450E-03 8.3870E-03

4.0540E-03 4.2400E-03 4.2680E-03 1.8190E-02 8.6060E-03 6.1180E-03 2.8520E-03

1.1430E-02 7.1290E-03 6.0440E-03 2.5650E-03 1.3830E-02 6.7170E-03 7.1360E-03

5.4620E-03 4.2280E+00 8.3790E-01 5.3270E-01 9.5690E-01 8.0300E-01 6.3530E-01

5.1840E-01 2.4720E+00 3.0240E+00 2.2110E-01 3.9010E-01 2.6880E-01 2.4380E-01

8.4510E-02 9.2800E-02 6.1530E-02 8.0560E-02 2.1030E-01 1.5450E-01 1.9480E-01

1.2250E-01 1.2290E-01 1.6540E-01 8.0840E-02 7.5700E-02 1.4770E-01 1.5630E-01

1.2230E-01 1.0610E-01 1.2290E-01 6.4520E-02 4.9270E-02 4.4000E-01 8.2870E+00

3.8660E+00 7.5690E+00 4.2910E-01 6.6160E-02 5.5750E-01 1.2990E+01 7.2990E+00

1.4840E+00 7.7230E-02 7.4550E-01 4.9340E+00 2.5730E+00 1.1430E-01 4.2830E-01

3.1690E-01 1.3890E-01 5.8570E-02 5.2980E-01 7.8930E-01 1.8860E-01 1.0240E-01

2.9740E-01 1.1900E-01 5.0900E-02 4.5760E-02 3.5650E-02 4.1590E-02 4.5120E-02

2.9240E-02 1.7140E-02 5.4060E-03 8.1720E-03 8.9000E-03 4.8210E-03 1.3940E-02

2.3390E-02 2.1110E-02 1.9670E-02 6.3920E-03 9.5300E-03 8.1350E-03 9.9930E-03

9.8680E-03 2.4600E-02 1.5670E-02 2.4970E-02 1.1040E-02 1.6440E-02 1.1280E-02

8.3590E-03 9.8230E-03 1.2190E-02 1.0620E-02 4.7660E-03 4.5380E-03 1.0170E-02

9.8390E-03 5.9390E-03 1.0820E-02 1.6640E-02 1.8570E-02 1.3540E-02 1.0540E-02

2.2800E-02 1.9660E-02 1.5050E-02 3.8370E-03 1.3020E-02 1.5160E-02 9.4040E-03

7.1310E-03 1.4700E-02 1.4690E-02 1.3950E-02 1.3920E-02 1.4220E-02 6.6520E-03

1.2340E-02 1.0770E-02 7.6520E-03 6.5280E-03 1.0610E-02 1.2610E-02 8.3450E-03

6.3440E-03 6.1290E-03 4.6090E-03 3.3480E-03 2.9540E-03 4.4460E-03 3.7840E-03

3.5350E-03 3.9470E-03 1.3650E-02 7.0130E-03 4.2860E-03 1.8840E-03 7.4260E-03

6.3750E-03 3.8170E-03 2.7570E-03 7.1860E-03 6.6460E-03 5.4300E-03 5.5980E-03

2.5730E+00 1.7210E-01 5.1890E-01 6.4870E-01 6.1270E-01 1.6890E-01 5.9790E-01

2.0800E+00 1.3080E+00 1.7590E-01 2.9610E-01 1.3050E-01 3.5090E-02 7.4500E-02

4.9560E-02 1.2350E-02 1.0340E-01 1.3520E-01 1.7580E-01 5.5410E-02 8.2340E-02

1.1020E-01 8.0550E-02 2.2940E-02 7.6360E-02 1.1530E-01 1.2280E-01 6.2660E-02

7.2370E-02 5.6040E-02 3.8190E-02 1.3800E-01 5.7180E-01 7.4260E+00 7.9630E-01

4.8430E+00 2.9360E-02 5.4810E-02 4.0850E-01 7.3320E+00 5.8560E+00 1.3300E+00

5.3060E-02 1.6770E+00 3.7710E+00 1.8020E-02 1.6730E-01 2.7260E-01 2.0180E-01

1.0800E-02 8.8380E-02 4.6910E-01 4.6590E-01 2.7470E-02 1.4340E-01 1.7490E-01

1.8270E-02 4.0630E-02 3.3040E-02 2.4000E-02 2.8440E-02 2.2280E-02 1.0300E-02

3.6040E-03 4.2220E-03 5.9870E-03 4.3890E-03 4.4700E-03 1.3080E-02 1.6760E-02

1.7770E-02 1.6770E-03 6.1280E-03 7.1670E-03 7.6200E-03 1.2820E-03 1.2870E-02

1.5230E-02 2.0680E-02 3.4620E-03 1.0770E-02 1.0280E-02 6.8770E-03 4.4340E-03

7.5070E-03 8.1600E-03 4.8420E-03 1.5220E-03 4.5110E-03 7.2340E-03 6.9920E-03

3.9960E-03 9.0330E-03 1.3240E-02 1.3440E-02 2.5600E-03 1.1520E-02 1.5840E-02

1.5400E-02 7.6620E-04 4.6160E-03 1.0180E-02 1.2020E-02 1.6410E-03 7.4260E-03

1.1180E-02 1.3380E-02 8.2290E-03 8.4840E-03 6.4290E-03 5.2040E-03 9.4230E-03

6.5640E-03 3.6830E-03 6.8460E-03 6.7420E-03 6.1830E-03 5.5330E-03 2.7330E-03

4.4280E-03 2.7830E-03 1.4210E-03 1.6750E-03 3.3270E-03 3.0800E-03 2.3930E-03

9.0970E-03 4.9770E-03 2.6180E-03 1.1940E-03 4.4100E-03 4.4760E-03 2.9930E-03

1.7270E-03 2.8250E-03 5.5330E-03 4.7300E-03 3.4860E-03 4.6630E-02 1.8340E-01

3.8790E-01 3.5980E-01 6.3820E-02 1.3020E-01 5.0530E-01 1.3760E+00 5.6600E-02

1.9590E-01 4.6840E-02 1.0970E-02 4.1380E-02 2.7010E-02 9.4030E-04 1.8940E-02

9.9080E-02 9.4380E-02 1.6980E-02 5.3610E-02 3.6450E-02 5.7210E-02 3.9430E-03

3.0070E-02 5.8110E-02 7.6500E-02 3.0620E-02 2.6180E-02 4.1260E-02 1.6630E-02

3.8170E-02 1.8900E-01 4.2860E-01 4.8340E+00 1.4910E+00 1.3870E-02 1.3330E-02

3.3000E-02 2.2720E-01 3.2890E+00 3.9360E+00 1.7270E-02 5.8280E-02 2.6750E+00

2.1930E-03 2.9170E-02 1.5500E-01 1.4300E-01 4.9960E-03 5.5130E-03 8.8320E-02

4.1720E-01 6.4280E-03 4.2160E-02 1.2430E-01 3.9540E-03 2.2310E-02 2.3510E-02

8.0980E-03 1.3600E-02 1.2320E-02 4.5920E-03 1.8020E-03 1.7820E-03 2.9210E-03

2.6010E-03 1.1340E-03 4.8720E-03 9.9510E-03 1.0090E-02 1.9720E-04 2.3930E-03

4.8830E-03 3.7510E-03 7.4960E-06 2.1620E-03 1.2680E-02 1.0190E-02 7.2610E-04

4.6480E-03 7.0000E-03 3.3290E-03 1.6100E-03 3.6860E-03 3.9700E-03 3.2010E-03

4.8580E-04 1.4240E-03 3.5040E-03 4.7380E-03 1.1130E-03 4.0820E-03 6.1440E-03

8.5190E-03 3.5770E-04 3.7150E-03 9.2150E-03 9.4150E-03 1.1710E-04 1.0460E-03

4.1710E-03 8.4360E-03 1.6920E-04 2.4030E-03 6.2890E-03 7.9390E-03 3.9090E-03

3.6860E-03 3.9510E-03 1.6230E-03 5.2150E-03 4.5490E-03 1.0620E-03 3.5830E-03

2.2700E-03 3.7540E-03 3.0460E-03 8.9830E-04 2.6070E-03 1.9120E-03 2.6840E-04

3.8520E-04 1.9340E-03 1.9440E-03 9.7470E-04 4.5480E-03 2.5860E-03 1.2180E-03

5.8990E-04 2.0590E-03 2.1260E-03 1.9870E-03 6.2950E-04 7.7300E-04 3.0060E-03

3.1260E-03 1.3820E-03 7.4470E+00 2.0410E+00 6.6130E-01 2.1560E+00 7.6740E-01

1.7380E-01 3.1840E-02 1.2790E+00 4.6220E-01 1.5740E-01 6.0760E-01 1.2610E-01

3.2920E-02 1.4070E+00 5.1120E-01 1.2650E-01 2.5830E-02 1.5020E+00 4.6180E-01

1.3040E-01 3.2110E-02 1.0840E+00 4.6360E-01 1.4410E-01 3.6910E-02 7.9650E-01

3.7070E-01 1.5140E-01 5.4280E-02 7.8070E-01 3.4670E-01 1.2670E-01 4.0680E-02

9.5050E-03 7.2990E-01 3.6350E-01 1.5580E-01 5.4480E-02 1.5070E-02 3.0800E-03

2.7930E-01 1.1280E-01 2.4150E-02 8.7370E+00 3.7650E-01 1.1380E-01 2.7300E-02

4.4670E+00 7.2250E-01 1.3060E-01 3.7690E-02 4.5050E-01 1.7340E-01 3.1690E-02

1.5550E+00 6.9870E-01 3.4540E-01 1.9330E-01 1.0310E-01 4.6320E-02 1.8910E-02

1.5500E-01 2.1310E-01 1.2950E-01 1.9460E-02 3.7330E+00 4.0240E-01 3.9080E-02

5.1780E-03 2.0810E-01 9.9710E-02 2.4570E-02 3.2530E-03 2.6110E-01 1.8260E-01

3.4130E-02 3.4120E-03 1.7510E+00 4.1390E-02 8.0880E-03 1.1130E-03 7.7890E-01

2.6200E-02 6.0430E-03 1.5560E-03 8.9750E-01 1.2600E-01 1.5980E-02 2.4730E-03

1.3890E+00 1.6490E-01 2.3480E-02 3.4470E-03 2.9890E+00 3.6720E-01 1.8150E-02

2.6320E-03 7.4710E-01 1.1440E-01 2.4550E-02 3.4270E-03 2.7830E-01 1.0110E-01

2.5780E-02 3.1120E-03 3.0950E-02 1.2800E-02 2.6020E-03 2.8200E-01 3.3450E-02

1.1470E-02 2.3120E-03 5.6110E-02 2.0700E-02 6.9350E-03 1.5200E-03 1.0560E-01

1.6680E-02 4.3040E-03 7.6760E-04 7.2230E-02 2.4460E-02 7.2230E-03 1.2280E-03

2.6200E-02 8.7770E-03 4.8810E-03 8.3130E-04 7.1300E-02 8.6710E-03 2.1000E-03

3.6120E-04 1.6720E-01 3.1060E-02 5.5250E-03 9.3970E-04 6.8870E+00 1.9170E+00

9.3570E-01 8.7590E-01 5.7580E-01 1.5980E-01 7.3950E-01 5.6720E-01 2.2300E-01

2.8820E-01 2.6160E-01 6.6480E-02 3.6880E-01 7.0950E-01 5.1140E-01 1.4080E-01

4.5190E-01 7.9420E-01 3.8460E-01 1.2990E-01 3.6870E-01 5.6370E-01 3.9130E-01

1.5090E-01 4.0660E-01 3.9630E-01 2.2530E-01 9.4520E-02 2.7760E-01 4.0560E-01

2.5060E-01 1.2040E-01 4.6790E-02 2.6360E-01 2.8270E-01 2.4740E-01 1.6300E-01

7.9450E-02 2.6170E-02 1.4970E-01 1.0670E-01 7.6040E-02 1.3430E+00 5.7170E+00

2.5090E-01 9.2740E-02 7.2190E-01 2.7160E+00 7.1610E-01 1.2500E-01 2.6940E-01

1.5700E-01 9.8670E-02 6.9860E-01 7.9780E-01 5.1170E-01 2.2550E-01 6.6440E-02

4.7680E-02 2.0780E-02 1.2400E-01 1.6130E-01 5.2290E-02 7.5930E-02 1.1760E-01

2.6320E+00 4.7480E-01 4.5490E-02 6.9430E-02 1.5700E-01 9.3070E-02 2.8850E-02

1.0280E-01 3.2380E-01 1.9630E-01 4.0960E-02 2.3750E-01 1.1620E+00 3.1670E-02

7.8520E-03 1.1980E-01 5.1100E-01 2.0260E-02 4.7790E-03 1.2590E-01 5.5810E-01

1.3170E-01 1.7710E-02 7.1570E-02 9.6960E-01 1.8030E-01 2.7030E-02 3.2970E-01

2.1830E+00 3.9060E-01 2.0320E-02 6.9120E-02 5.0540E-01 1.1190E-01 2.8430E-02

7.4410E-02 1.2890E-01 9.1970E-02 3.0510E-02 1.9110E-02 1.0930E-02 7.0990E-03

6.2050E-02 1.7130E-01 1.8960E-02 1.0070E-02 2.0700E-02 2.6530E-02 1.4200E-02

7.1750E-03 2.7310E-02 5.9090E-02 1.1690E-02 3.8520E-03 2.0370E-02 3.6000E-02

1.9750E-02 8.1610E-03 2.0960E-02 6.2780E-03 2.4170E-03 2.8080E-03 1.6200E-02

4.1710E-02 6.1910E-03 1.9370E-03 3.0340E-02 9.8220E-02 2.9470E-02 6.0290E-03

5.2760E+00 3.2200E-01 7.0860E-01 5.1640E-01 3.7650E-01 4.1730E-01 4.6480E-01

2.7030E-01 1.2720E-01 2.1020E-01 1.2380E-01 4.6850E-02 3.7700E-01 4.6140E-01

4.2930E-01 1.2650E-01 3.7690E-01 5.3400E-01 3.0000E-01 9.8730E-02 3.2420E-01

3.8440E-01 3.2640E-01 2.0580E-01 2.8110E-01 2.4240E-01 1.2570E-01 9.2990E-02

2.0990E-01 2.6270E-01 1.9100E-01 8.6740E-02 5.5830E-02 1.8930E-01 1.8320E-01

1.6040E-01 1.2920E-01 7.4810E-02 6.6870E-02 9.5370E-02 8.6740E-02 2.2510E-01

1.4460E+00 3.7250E+00 1.5670E-01 1.3040E-01 7.1530E-01 1.8180E+00 5.4370E-01

1.3980E-01 1.5340E-01 1.0100E-01 3.4540E-01 5.1170E-01 4.7830E-01 3.3990E-01

4.1740E-02 3.8050E-02 2.0690E-02 9.3000E-02 9.2500E-02 7.1250E-02 5.3420E-02

1.8010E-02 1.1360E-01 2.3110E+00 3.6880E-01 1.0170E-02 6.4160E-02 1.0770E-01

7.9500E-02 2.2730E-03 1.1660E-01 2.1670E-01 1.6220E-01 2.5170E-02 2.7730E-01

7.5610E-01 2.1100E-02 1.5250E-02 1.2840E-01 3.3020E-01 1.3140E-02 1.5950E-02

1.3170E-01 3.7650E-01 1.0110E-01 1.3080E-02 6.4070E-02 7.1600E-01 1.4270E-01

1.7990E-02 3.9000E-01 1.4730E+00 2.9450E-01 1.5880E-02 5.4960E-02 3.7340E-01

9.1980E-02 1.0730E-02 6.8150E-02 8.5700E-02 7.9470E-02 1.0270E-02 1.0640E-02

6.9430E-03 1.8390E-02 5.2250E-02 1.1400E-01 1.1660E-02 6.9340E-03 1.4200E-02

1.8620E-02 1.1430E-02 7.7100E-03 2.2850E-02 3.7930E-02 7.5450E-03 4.9820E-03

1.5950E-02 2.5330E-02 1.6960E-02 1.5720E-02 3.5780E-03 2.9740E-03 2.1310E-03

3.9720E-03 1.4750E-02 2.6810E-02 4.0390E-03 5.5230E-03 2.9450E-02 6.6020E-02

2.2840E-02 8.2910E-02 3.3390E-01 5.3060E-01 3.3240E-01 2.2040E-01 3.0200E-01

2.4620E-01 5.3670E-02 1.1900E-01 1.3300E-01 1.0390E-02 4.6080E-02 2.9620E-01

5.2960E-01 3.1830E-02 1.2870E-01 2.9890E-01 4.3730E-01 2.2100E-02 9.9240E-02

2.6240E-01 3.6880E-01 9.8040E-02 1.6300E-01 1.8480E-01 1.2700E-01 2.3340E-02

9.1430E-02 1.5110E-01 1.7380E-01 1.1810E-01 7.4130E-03 4.9910E-02 1.2200E-01

1.4890E-01 1.2650E-01 7.0780E-02 2.2060E-02 7.2870E-02 7.0770E-02 6.0080E-02

2.3430E-01 1.0930E+00 2.2960E+00 3.7670E-02 1.2490E-01 5.4370E-01 1.4350E+00

5.9450E-02 1.2830E-01 7.4450E-02 1.9330E-01 2.2550E-01 3.3990E-01 3.5800E-01

2.4480E-02 2.4940E-02 1.6790E-02 6.1980E-02 3.9780E-02 8.4870E-02 2.0120E-02

2.5460E-03 1.9510E-02 8.9410E-02 1.7660E+00 3.7230E-04 1.1750E-02 5.1940E-02

1.1010E-01 1.7030E-04 2.5030E-03 8.9000E-02 2.4010E-01 3.4800E-03 3.0550E-02

2.0950E-01 4.7370E-01 3.3410E-03 1.6920E-02 9.9290E-02 2.1160E-01 2.4650E-03

1.7690E-02 1.0100E-01 2.9580E-01 1.5590E-03 1.4420E-02 5.1390E-02 5.5570E-01

2.5950E-03 2.0250E-02 3.2810E-01 1.1510E+00 1.2840E-03 1.8130E-02 4.5720E-02

2.9320E-01 9.0920E-05 1.2650E-02 5.5550E-02 9.4400E-02 4.6400E-03 8.9770E-03

4.9470E-03 5.5160E-03 1.8260E-02 3.9690E-02 6.8130E-02 1.5200E-03 7.1750E-03

1.1430E-02 1.4260E-02 2.0030E-03 8.0150E-03 1.7440E-02 2.3460E-02 5.0450E-04

5.5360E-03 1.3260E-02 2.2820E-02 1.0480E-02 1.5870E-03 3.2400E-03 9.6980E-04

9.6830E-04 4.2650E-03 1.1080E-02 1.6710E-02 9.2770E-04 6.0350E-03 2.2850E-02

5.2410E-02 2.6910E+00 9.8080E-01 4.1820E-01 1.1770E+00 5.3250E-01 8.7910E-02

3.4260E-01 1.3890E-01 3.2900E-02 5.6380E-01 2.9450E-01 1.3100E-01 3.5860E-02

4.6480E-01 2.4050E-01 1.1910E-01 5.4780E-02 5.1340E-01 2.6730E-01 1.2110E-01

4.6810E-02 3.9710E-01 2.3580E-01 1.3440E-01 5.9290E-02 2.6790E+00 1.1510E+00

3.4990E-01 8.9420E-02 2.2660E-02 3.7220E+00 1.2510E+00 3.6920E-01 9.9980E-02

2.9690E-02 9.9720E-03 1.7550E+00 2.4910E-01 3.0690E-02 1.9850E+01 3.5130E+00

9.7400E-02 1.6670E-02 2.9560E+01 3.8650E+00 3.7330E-01 9.6860E-02 1.2500E+01

1.0850E-01 3.1220E-02 1.3580E-01 8.1990E-02 4.4380E-02 2.0240E-02 6.7930E-02

3.9850E-02 1.6570E-02 6.4830E-03 1.6670E-02 5.8830E-03 2.6780E-03 1.2710E-01

6.2990E-02 2.6440E-02 7.0420E-03 1.1760E-02 6.9140E-03 3.4260E-03 1.2600E-03

2.9890E-02 1.6800E-02 7.9600E-03 2.3210E-03 1.8260E-01 3.9630E-02 5.1290E-03

1.0280E-03 2.0920E-01 4.8710E-02 1.0260E-02 3.3170E-03 2.9380E-02 1.2230E-02

4.8020E-03 1.4160E-03 5.5960E-02 2.8520E-02 1.2610E-02 4.0100E-03 1.9790E-01

4.6990E-02 1.2890E-02 3.0500E-03 2.7380E-02 1.2360E-02 4.7670E-03 1.1840E-03

2.3990E-02 1.0860E-02 4.6040E-03 1.5450E-03 1.0700E-01 1.9980E-02 1.0710E-02

3.2160E-02 1.8210E-02 7.7280E-03 2.2090E-03 1.2940E-02 7.9320E-03 4.9330E-03

2.9510E-03 3.2780E-02 2.2900E-02 1.1190E-02 3.7220E-03 4.7410E-03 3.2780E-03

1.9760E-03 9.3470E-04 1.5760E-02 9.8450E-03 2.5060E-03 1.3030E-03 4.4730E-03

3.1720E-03 1.7830E-03 7.4820E-04 7.8480E-03 2.4570E-03 1.0750E-03 4.3790E-04

2.1900E+00 5.0590E-01 6.7590E-01 3.4640E-01 3.2530E-01 1.8620E-01 1.2320E-01

7.7300E-02 1.9840E-01 2.3520E-01 1.9420E-01 1.4550E-01 2.0430E-01 2.1210E-01

1.5380E-01 9.2430E-02 1.9000E-01 2.4200E-01 1.8450E-01 1.1800E-01 2.1190E-01

2.4590E-01 1.3090E-01 5.8450E-02 6.0330E-01 1.3400E+00 9.7300E-01 4.3210E-01

1.0410E-01 1.3980E-01 1.9020E+00 1.3070E+00 5.6210E-01 1.6880E-01 3.4990E-02

4.2690E-01 9.1070E-01 1.8860E-01 3.5050E+00 9.9100E+00 4.1000E+00 9.6550E-02

4.3170E-01 1.9930E+01 4.6350E+00 3.9220E-01 2.9210E+00 6.5070E+00 5.6940E-02

7.2710E-02 5.8520E-02 4.5760E-02 3.4800E-02 4.6830E-02 2.9440E-02 1.7280E-02

4.8660E-03 8.3000E-03 8.1290E-03 2.3960E-03 4.6140E-02 5.1600E-02 4.0690E-02

2.9230E-02 5.0940E-03 4.5720E-03 4.3020E-03 3.5530E-03 1.1180E-02 1.1920E-02

1.0690E-02 8.9410E-03 4.0330E-02 8.9130E-02 3.9750E-02 4.8020E-03 4.9280E-02

1.0040E-01 4.3650E-02 7.2500E-03 9.7110E-03 1.3270E-02 8.0690E-03 4.8210E-03

2.1220E-02 2.3120E-02 1.8480E-02 1.3130E-02 2.6430E-02 1.1880E-01 3.9930E-02

1.3930E-02 8.5710E-03 1.1670E-02 8.6810E-03 5.3780E-03 6.5710E-03 1.1250E-02

7.9560E-03 4.9050E-03 3.9660E-02 5.6500E-02 6.9860E-03 1.8200E-02 1.1260E-02

9.5560E-03 6.0110E-03 7.0480E-03 6.7150E-03 4.8800E-03 2.9290E-03 2.2900E-02

1.1380E-02 1.0960E-02 7.7080E-03 2.7770E-03 1.9320E-03 1.7230E-03 1.6930E-03

1.1820E-02 4.1890E-03 5.1460E-03 9.0390E-04 3.1720E-03 1.9450E-03 1.5670E-03

9.3770E-04 1.8410E-03 3.6220E-03 1.9940E-03 9.1180E-04 1.2840E+00 2.9390E-01

3.6900E-01 2.3660E-01 8.5020E-02 1.0540E-01 6.7370E-02 4.8370E-02 1.2160E-01

1.7410E-01 1.6990E-01 8.5120E-02 1.2430E-01 1.3170E-01 1.0110E-01 6.1600E-02

1.2480E-01 1.6250E-01 1.4480E-01 1.2410E-01 1.3090E-01 1.2740E-01 5.5580E-02

8.9610E-02 6.0020E-01 7.0390E-01 6.0640E-01 3.5360E-01 3.9340E-02 8.8600E-02

8.9050E-01 9.6260E-01 5.6480E-01 1.9240E-01 6.8570E-02 4.5420E-01 4.8980E-01

9.6750E-02 4.0990E+00 4.6510E+00 2.8970E+00 1.2520E-01 3.6490E-01 1.2870E+01

3.4990E+00 3.9080E-01 3.3350E+00 2.5880E+00 3.2830E-02 3.9090E-02 4.0290E-02

2.8970E-02 2.8050E-02 2.2110E-02 1.2070E-02 3.2410E-03 4.4360E-03 5.0340E-03

3.1370E-03 1.2160E-02 2.7980E-02 3.7770E-02 3.3830E-02 1.5010E-03 3.0790E-03

3.4160E-03 3.6870E-03 2.7290E-03 6.6580E-03 9.2520E-03 9.8450E-03 5.1250E-03

3.9720E-02 4.2840E-02 2.6880E-02 1.0260E-02 4.3620E-02 4.9810E-02 3.0330E-02

3.0570E-03 5.8800E-03 9.0880E-03 5.9050E-03 6.1470E-03 1.2950E-02 1.6490E-02

1.4960E-02 7.3330E-03 1.6770E-02 7.6430E-02 3.0130E-02 2.0080E-03 5.5910E-03

8.0820E-03 7.1820E-03 1.8000E-03 4.1570E-03 7.8030E-03 6.7030E-03 1.7380E-02

3.0640E-02 2.0850E-02 7.7280E-03 9.5560E-03 8.2490E-03 4.6170E-03 3.8910E-03

4.0840E-03 3.6840E-03 2.7100E-03 1.1190E-02 1.0960E-02 8.5140E-03 4.6310E-03

1.2130E-03 1.3990E-03 1.4910E-03 1.2540E-03 7.8820E-03 2.1210E-03 2.9630E-03

1.8310E-03 1.7840E-03 1.5670E-03 1.1110E-03 6.0830E-04 7.4900E-04 1.0430E-03

2.4900E-03 1.2340E-03 8.8040E-02 2.5770E-01 1.0380E-01 2.9200E-02 6.2500E-02

3.6650E-02 1.5210E-03 5.1650E-02 8.7260E-02 1.1570E-01 2.9910E-02 5.4150E-02

6.9390E-02 6.7410E-02 1.3640E-02 4.9390E-02 8.0620E-02 1.0230E-01 5.9210E-02

5.8440E-02 5.5580E-02 4.7530E-02 2.3610E-02 6.8480E-02 3.4870E-01 4.4150E-01

2.9230E-01 1.2410E-02 2.3640E-02 4.6260E-02 3.3310E-01 5.4130E-01 4.0910E-01

1.0580E-02 8.1730E-02 4.1000E-01 1.6560E-02 9.6350E-02 2.8970E+00 2.8550E+00

5.6960E-02 5.9090E-02 2.2520E-01 8.0460E+00 2.6150E-02 5.5870E-01 2.5600E+00

1.0810E-02 2.2100E-02 2.0840E-02 1.6840E-02 1.2840E-02 1.2380E-02 5.8940E-03

1.6200E-03 2.0420E-03 1.9460E-03 2.2960E-03 8.7230E-04 1.2660E-02 1.9300E-02

2.3020E-02 2.2650E-04 1.3570E-03 2.1240E-03 2.1320E-03 1.0940E-05 2.9700E-03

4.9750E-03 6.2810E-03 1.0280E-03 4.8020E-03 2.6880E-02 2.5150E-02 3.3170E-03

7.2490E-03 3.0330E-02 2.7490E-02 5.5380E-04 2.7770E-03 3.6690E-03 4.9580E-03

8.5010E-04 5.7150E-03 8.6410E-03 9.9640E-03 1.0020E-03 7.1930E-03 1.0790E-02

4.7580E-02 1.2450E-04 2.1140E-03 3.8760E-03 5.3210E-03 2.5960E-04 1.6400E-03

2.8810E-03 5.4500E-03 7.9400E-03 7.7280E-03 1.8910E-02 2.2090E-03 6.0120E-03

4.6170E-03 2.1990E-03 1.7890E-03 1.8120E-03 1.9010E-03 1.6820E-03 3.7220E-03

7.7080E-03 4.6310E-03 1.5860E-03 3.4500E-04 8.9660E-04 8.1160E-04 6.3820E-04

3.9400E-03 9.7110E-04 9.9780E-04 1.4350E-03 7.4820E-04 9.3770E-04 6.0820E-04

2.3650E-04 2.2060E-04 5.3980E-04 5.8690E-04 1.2290E-03 1.1930E+00 4.6370E-01

3.6440E+00 2.7730E-01 8.3770E-02 1.2880E-01 7.2020E-02 3.8550E-02 2.0310E-02

5.7870E-01 2.9270E-01 1.3930E-01 6.2740E-02 1.8780E-01 1.2850E-01 7.7530E-02

4.1100E-02 7.4090E-01 4.7080E-01 2.3500E-01 8.4430E-02 3.7260E-01 2.6780E-01

1.5310E-01 7.4780E-02 2.8510E-02 3.3300E-01 2.5510E-01 1.6740E-01 9.3690E-02

4.3490E-02 1.5080E-02 2.8210E-01 1.7350E-01 5.8290E-02 2.8600E+00 8.3120E-01

2.1610E-01 6.4990E-02 7.2110E-01 5.5350E-01 3.0180E-01 1.1160E-01 5.7830E+00

2.5210E+00 4.7910E-02 3.9000E-01 1.7870E-01 7.5060E-02 3.0050E-02 3.6190E-01

1.9710E-01 1.0850E-01 4.6230E-01 5.1130E-01 2.4560E-01 3.1900E-02 2.3390E-01

1.0280E-01 3.9600E-02 1.3110E-02 3.8800E-02 2.1200E-02 1.0360E-02 4.1410E-03

5.0710E-02 2.4550E-02 1.0110E-02 2.9900E-03 7.1030E-01 2.0620E-01 3.9030E-02

6.1500E-03 1.4620E+00 3.4800E-01 5.0850E-02 5.6640E-03 6.8990E-02 3.0610E-02

1.1850E-02 3.8130E-03 1.1820E-01 5.5750E-02 2.3390E-02 8.3230E-03 3.5220E-02

2.2560E-02 1.2750E-02 6.1420E-03 1.0380E-02 6.1520E-03 3.8210E-03 2.3720E-03

7.8460E-03 4.0360E-03 1.8400E-03 6.8240E-04 1.3610E+00 5.9320E-01 1.4450E-02

7.3290E-01 2.0450E-01 3.9790E-02 9.5670E-03 1.2580E-01 1.0060E-01 5.9250E-02

2.6030E-02 8.9980E-01 2.4180E-01 5.8250E-02 1.8170E-02 1.8940E-01 8.4430E-02

3.3580E-02 1.0450E-02 4.1420E-01 1.6890E-01 8.6900E-02 1.5560E-02 2.5400E-01

9.4510E-02 4.4160E-02 2.1740E-02 6.5730E-02 2.9480E-02 1.1280E-02 3.3030E-03

5.6840E-01 2.7710E-01 2.2400E+00 1.5570E-01 2.7330E-02 5.7270E-02 5.2680E-02

3.6250E-02 1.3610E-01 2.6310E-01 2.0790E-01 1.1570E-01 8.2560E-02 7.1020E-02

7.1330E-02 6.8020E-02 3.6940E-01 2.7730E-01 2.4800E-01 1.5520E-01 1.6190E-01

1.4170E-01 1.3380E-01 1.1150E-01 6.3000E-02 1.8130E-01 8.5770E-02 8.4960E-02

1.0090E-01 9.4880E-02 5.6470E-02 1.4780E-01 6.6620E-02 1.2750E-01 2.3440E-01

1.4420E+00 7.8800E-01 1.8670E-01 4.4780E-01 1.3190E-01 2.3230E-01 3.1300E-01

2.5180E+00 7.7120E-01 2.2770E+00 7.3650E-02 1.6560E-01 1.3390E-01 7.5230E-02

1.9700E-01 1.9540E-01 5.3020E-02 3.0710E-01 2.4160E-01 9.7130E-02 2.2690E-01

2.1930E-02 1.0120E-01 8.8150E-02 4.8300E-02 7.8420E-03 1.4860E-02 1.4980E-02

1.1970E-02 3.6350E-03 2.0820E-02 2.0910E-02 1.3520E-02 3.0780E-02 3.7420E-01

2.0460E-01 4.5540E-02 2.4140E-02 7.5900E-01 3.8910E-01 7.4610E-02 1.1600E-02

2.8210E-02 2.3350E-02 1.3350E-02 1.6710E-02 4.8910E-02 4.4060E-02 2.7500E-02

1.5450E-02 1.2520E-02 1.2310E-02 1.0190E-02 3.2250E-03 5.2390E-03 4.2840E-03

2.5140E-03 1.1950E-03 3.1330E-03 3.0700E-03 2.2070E-03 5.9270E-01 1.8860E-01

5.3160E-01 3.5320E-02 3.7100E-01 1.9920E-01 4.0820E-02 8.3350E-02 2.8690E-02

4.2130E-02 5.3000E-02 4.4230E-02 4.7740E-01 2.4520E-01 4.4000E-02 1.6340E-02

8.2320E-02 7.1570E-02 3.9500E-02 2.7620E-01 8.6840E-02 3.2370E-02 6.2340E-02

4.7790E-02 1.4070E-01 7.2600E-02 1.5690E-02 1.1760E-02 2.5950E-02 2.2080E-02

1.3440E-02 8.3520E-02 1.5570E-01 1.0940E+00 8.1400E-03 1.4850E-02 2.6500E-02

3.6160E-02 4.0830E-02 7.0400E-02 1.1830E-01 1.2820E-01 1.9020E-02 4.4320E-02

4.6300E-02 3.7200E-02 9.4030E-02 1.9790E-01 1.5020E-01 7.2410E-02 3.1930E-02

9.2410E-02 8.9050E-02 6.3240E-02 3.1540E-02 4.0530E-03 9.1440E-02 9.3710E-02

6.4920E-02 3.4370E-02 1.3280E-02 2.6910E-02 1.0240E-01 4.1970E-02 8.0520E-02

1.1400E-01 5.8710E-01 5.4410E-01 3.6310E-02 2.7900E-01 1.8940E-01 5.7520E-02

4.7560E-02 2.2760E+00 4.5950E-01 1.5990E-02 4.0470E-02 7.9490E-02 8.7900E-02

1.0850E-01 5.3020E-02 5.9920E-02 1.5360E-01 3.1800E-02 2.1710E-01 4.6620E-02

3.7750E-03 1.2320E-02 4.5290E-02 6.8410E-02 7.7050E-04 4.5600E-03 8.5170E-03

1.0970E-02 4.8970E-05 2.1920E-03 9.7440E-03 1.7460E-02 6.2320E-03 1.8350E-02

1.6410E-01 1.6610E-01 6.6390E-03 1.2920E-02 3.3230E-01 2.9880E-01 1.5380E-03

7.0800E-03 1.4190E-02 1.5590E-02 2.2550E-03 9.5990E-03 2.3970E-02 3.2790E-02

3.7770E-03 8.1980E-03 7.8170E-03 5.1800E-03 1.4440E-03 1.3550E-03 2.0680E-03

2.5200E-03 1.1500E-04 6.9770E-04 1.6400E-03 2.3600E-03 1.4420E-02 5.3130E-01

1.1030E-01 1.1780E-02 1.7400E-02 1.4970E-01 1.6070E-01 1.3030E-02 4.8580E-02

3.2210E-02 9.7350E-03 2.4650E-02 1.4500E-02 1.8390E-01 1.7940E-01 2.8010E-03

8.3860E-03 3.6780E-02 5.5010E-02 1.3810E-01 1.5530E-02 6.2340E-02 1.3070E-02

3.0000E-02 1.3510E-02 4.9230E-02 4.5580E-02 9.5980E-04 7.3120E-03 1.3710E-02

1.4630E-02 2.9870E+00 3.5520E-01 4.7010E-01 2.3560E-01 1.2070E-01 5.8170E-02

7.4280E-01 5.2220E-01 3.7380E-01 2.4300E-01 4.2240E-01 2.8520E-01 1.6920E-01

8.5150E-02 6.9260E-01 5.1230E-01 3.3620E-01 1.2900E-01 1.0410E-01 6.9280E-02

3.9830E-02 2.1020E-02 8.8430E-03 1.4380E-01 8.3800E-02 4.6080E-02 2.3630E-02

1.0980E-02 4.0940E-03 7.0480E-02 4.8840E-02 2.2130E-02 4.7980E-01 2.1970E-01

9.7560E-02 3.7850E-02 2.1070E-01 1.3260E-01 7.4070E-02 3.5720E-02 2.5670E-01

1.2590E-01 1.9020E-02 2.4170E-01 1.3400E-01 7.2790E-02 3.7740E-02 3.1540E-01

2.7400E-01 1.6640E-01 5.7650E+00 1.0990E+01 4.7680E+00 1.9210E-01 6.5200E-02

3.3780E-02 1.7580E-02 9.5070E-03 2.8450E-02 1.5160E-02 7.0700E-03 2.5350E-03

4.7550E-02 2.4310E-02 1.0730E-02 3.4720E-03 2.0360E+01 4.8880E+00 6.7340E-01

2.6350E-02 5.5910E-02 3.3720E-02 2.3790E-02 1.3160E-02 3.0720E-02 1.8690E-02

1.1730E-02 7.1080E-03 2.6480E-02 2.0240E-02 1.6470E-02 1.3220E-02 2.3820E-02

1.4710E-02 7.6550E-03 3.1930E-03 9.2840E-03 5.8450E-03 3.4450E-03 1.8740E-03

1.2700E-02 8.4990E-03 4.8950E-03 2.2100E-03 2.9650E-01 1.2200E-01 4.3130E-03

2.8840E-02 1.6210E-02 1.0200E-02 5.3240E-03 2.2490E-02 1.7850E-02 1.2710E-02

7.9970E-03 1.0950E-01 3.0350E-02 1.0650E-02 4.0340E-03 2.0910E-02 1.0130E-02

4.5940E-03 1.9570E-03 6.1520E-02 3.0670E-02 1.7740E-02 3.9610E-03 2.3820E-02

1.1320E-02 6.5670E-03 3.3410E-03 8.9800E-03 5.1730E-03 2.4900E-03 9.1710E-04

2.3280E+00 8.4030E-02 1.9830E-01 1.8950E-01 1.2330E-01 3.7940E-01 4.3500E-01

2.9900E-01 1.5150E-01 1.7430E-01 1.6210E-01 1.6280E-01 1.5630E-01 4.3130E-01

3.3940E-01 2.5010E-01 1.3550E-01 4.1430E-02 4.5330E-02 3.9100E-02 2.7820E-02

1.4090E-02 3.0150E-02 5.0570E-02 4.9730E-02 3.9320E-02 2.5910E-02 1.2570E-02

4.2760E-02 2.0610E-02 3.0870E-02 1.4070E-01 2.1310E-01 1.4350E-01 6.1660E-02

9.0510E-02 7.7940E-02 7.3380E-02 6.0200E-02 1.2300E-01 4.9140E-02 9.4230E-02

7.8250E-02 1.0700E-01 8.6260E-02 5.3700E-02 2.7390E-01 1.7930E-01 5.2210E-02

3.8430E+00 4.7640E+00 1.7820E+00 4.5080E+00 1.3590E-02 2.9990E-02 2.5490E-02

1.5050E-02 5.1610E-03 1.0770E-02 1.0920E-02 8.6270E-03 5.3440E-03 1.8800E-02

1.9310E-02 1.3920E-02 3.6160E-01 1.1320E+01 5.4760E+00 1.0390E+00 2.7490E-02

3.3640E-02 1.7800E-02 4.7800E-03 1.2210E-02 1.5350E-02 1.1570E-02 6.6080E-03

1.4990E-02 1.6840E-02 1.2360E-02 6.7610E-03 9.8500E-03 7.7950E-03 8.0520E-03

7.2240E-03 3.1900E-03 4.2070E-03 3.6590E-03 2.6640E-03 4.8980E-03 4.0630E-03

4.6380E-03 5.2660E-03 1.1960E-01 3.8400E-02 1.0470E-01 1.2260E-02 1.6530E-02

8.9660E-03 2.7980E-03 1.4700E-02 1.0670E-02 8.6920E-03 6.6150E-03 1.0160E-02

4.9730E-02 2.7440E-02 6.7710E-03 3.3290E-03 9.0220E-03 7.9360E-03 4.7990E-03

3.6760E-02 1.7740E-02 7.6130E-03 1.0670E-02 7.8470E-03 1.3390E-02 7.3090E-03

2.1410E-03 3.1930E-03 2.9200E-03 2.9840E-03 2.5730E-03 2.0630E-02 4.4300E-02

9.0580E-02 1.3730E-01 2.0470E-01 1.4360E-01 1.3880E-01 1.3050E-01 3.3980E-02

9.5380E-02 1.0520E-01 8.8990E-02 1.5500E-01 1.8600E-01 1.3960E-01 7.2360E-02

1.2160E-02 2.0120E-02 2.2080E-02 1.8470E-02 1.0340E-02 4.2340E-03 1.4510E-02

2.3250E-02 2.6500E-02 2.2440E-02 1.2810E-02 1.2520E-02 2.4840E-02 9.8690E-03

4.6310E-02 6.9760E-02 9.5110E-02 6.8840E-02 2.2400E-02 4.8370E-02 4.6710E-02

3.3500E-02 1.8610E-02 9.2700E-02 2.1750E-02 2.7280E-02 3.7780E-02 4.9810E-02

4.7940E-02 1.6630E-01 5.2210E-02 3.1520E-02 1.9210E+00 1.9120E-01 4.2280E+00

9.4220E-01 5.2450E-03 6.3260E-03 1.2970E-02 1.7420E-02 2.4960E-04 3.0990E-03

6.2000E-03 8.1900E-03 6.6570E-05 3.2260E-03 9.6840E-03 1.5710E-02 5.1940E-03

2.6110E-01 4.5990E+00 4.4880E+00 1.8290E-02 7.1770E-03 9.3490E-03 7.4930E-03

5.7200E-03 5.0810E-03 6.0690E-03 5.7610E-03 9.4690E-03 5.3740E-03 5.1350E-03

5.4770E-03 1.6040E-03 5.7030E-03 5.4540E-03 3.6920E-03 9.4900E-04 1.6220E-03

1.9950E-03 2.0720E-03 4.0590E-04 2.8740E-03 3.3290E-03 2.8140E-03 4.2710E-03

1.0530E-01 2.1820E-02 7.2900E-03 3.7550E-03 5.1120E-03 4.1570E-03 6.3620E-03

6.4500E-03 4.7280E-03 2.7810E-03 5.4230E-03 3.6190E-03 2.0060E-02 1.8910E-02

6.9670E-04 1.7510E-03 4.1940E-03 5.7590E-03 1.8180E-02 3.9520E-03 1.0670E-02

2.5930E-03 4.5620E-03 2.4930E-03 4.4340E-03 3.6200E-03 3.7160E-04 1.9320E-03

2.0310E-03 1.5060E-03 8.2410E+00 4.2940E-01 5.6630E-02 2.3540E+00 6.3500E-01

1.0190E-01 1.3440E-02 3.0870E+00 9.8700E-01 2.8330E-01 3.1470E-02 6.1530E-01

4.2940E-01 9.9930E-02 1.9690E-02 2.3520E-01 1.2080E-01 4.8010E-02 1.3920E-02

1.8210E-03 2.9170E-01 1.3710E-01 5.5270E-02 1.7890E-02 4.2380E-03 5.2150E-04

2.3030E-01 7.3610E-02 1.0080E-02 3.6650E-01 1.0160E-01 2.5590E-02 4.6720E-03

4.0910E-01 1.3620E-01 3.4230E-02 6.2420E-03 9.9690E-02 3.9550E-02 5.0220E-03

1.5110E+00 4.3040E-01 2.2770E-01 4.6640E-02 2.0360E-01 3.3500E-02 4.9250E-03

1.1480E-02 2.2000E-02 1.2900E-02 1.4340E-03 1.7150E+01 8.3180E-01 1.4820E-02

1.4910E-03 2.8830E+01 2.4630E+00 8.2720E-02 1.1510E-03 3.8230E+01 3.1120E+00

1.2130E-01 3.1760E-03 1.9050E-02 4.7830E-03 9.5220E-04 1.2170E-04 3.8150E-02

9.0620E-03 7.2920E-04 7.9650E-05 4.8180E-02 1.6540E-02 3.5060E-03 1.7800E-04

6.5330E+00 2.4250E-01 5.9960E-03 9.9810E-04 1.3050E-01 4.1330E-02 9.6010E-03

1.2220E-03 7.0900E-01 8.2320E-02 1.7490E-02 3.0530E-03 2.1780E+00 2.0730E-01

2.3560E-02 3.3250E-03 8.9090E-03 8.2000E-04 4.1840E-05 1.9840E-02 5.4550E-03

7.7230E-04 5.6210E-05 2.7510E-02 6.7890E-03 1.2510E-03 1.5240E-04 4.1300E-02

7.0530E-03 7.9130E-04 1.7960E-04 1.7170E-01 1.7920E-02 2.3670E-03 2.4270E-04

4.6750E-03 4.3850E-03 2.0940E-03 4.6680E-04 2.2890E-02 3.8490E-03 9.7320E-04

2.2000E-05 4.4760E-02 9.6580E-03 1.5410E-03 1.6380E-04 1.3030E+01 5.2090E-01

8.5400E-01 1.1800E+00 5.8820E-01 1.0800E-01 1.0320E+00 2.0630E+00 1.2480E+00

3.1500E-01 5.2800E-01 5.9910E-01 3.0830E-01 8.4350E-02 1.2850E-01 1.1340E-01

7.4070E-02 4.2470E-02 1.9370E-02 1.2120E-01 1.2250E-01 9.6480E-02 5.8250E-02

2.6610E-02 8.3000E-03 1.2730E-01 9.2800E-02 4.9170E-02 1.6790E-01 1.6770E-01

6.9450E-02 2.2060E-02 1.7320E-01 1.8640E-01 1.0770E-01 3.4910E-02 6.7580E-02

3.3620E-02 2.2570E-02 5.8220E-01 1.0000E+00 7.0090E-01 2.2760E-01 1.0640E-01

8.2940E-02 1.8600E-02 9.8380E-03 1.7670E-02 6.0270E-03 7.4430E-03 1.8260E+00

1.2380E+01 1.0350E+00 1.6470E-02 2.4140E+00 2.6060E+01 3.0420E+00 9.7590E-02

3.0580E-01 3.4390E+01 4.0020E+00 1.4160E-01 8.2580E-03 8.6870E-03 3.4800E-03

8.8990E-04 1.6080E-02 1.6070E-02 8.2890E-03 6.9620E-04 2.0860E-02 2.0390E-02

1.3370E-02 3.9800E-03 5.4820E-01 4.9170E+00 2.9830E-01 6.7350E-03 5.3300E-02

5.9900E-02 3.3160E-02 1.0260E-02 1.1240E-01 4.8920E-01 7.5710E-02 1.8610E-02

2.0690E-01 1.6180E+00 2.3360E-01 2.5900E-02 4.2410E-03 3.6590E-03 4.9180E-04

9.0450E-03 8.1070E-03 4.4570E-03 7.7870E-04 9.4170E-03 1.3640E-02 5.9980E-03

1.3470E-03 1.5180E-02 2.0390E-02 6.2960E-03 6.6450E-04 2.5050E-02 1.1560E-01

1.8620E-02 2.6480E-03 4.0070E-03 3.2560E-03 1.6190E-03 1.1190E-03 8.1930E-03

1.2340E-02 2.2330E-03 1.0490E-03 1.4080E-02 2.3340E-02 8.9260E-03 1.6800E-03

1.2680E+01 2.2940E-01 7.9900E-01 7.8810E-01 4.7360E-01 2.8220E-01 1.2790E+00

1.6430E+00 1.0740E+00 2.4520E-01 5.0420E-01 3.8940E-01 2.1130E-01 5.7130E-02

8.2790E-02 8.4300E-02 6.2430E-02 3.1510E-02 3.6290E-02 8.6220E-02 8.6710E-02

7.2090E-02 5.2120E-02 2.7510E-02 6.0510E-02 8.8970E-02 7.4910E-02 6.9740E-02

1.2560E-01 1.1180E-01 4.7420E-02 6.0610E-02 1.3900E-01 1.3000E-01 8.9420E-02

4.0010E-02 3.7150E-02 2.5880E-02 2.2610E-01 6.2590E-01 1.1870E+00 5.7870E-01

5.0680E-02 8.0450E-02 4.2410E-02 8.1980E-03 1.1540E-02 7.7430E-03 6.6630E-03

9.4720E-02 2.3190E+00 9.5680E+00 7.8940E-01 4.1550E-02 3.0150E+00 1.7080E+01

2.3480E+00 7.4950E-03 1.0100E+00 2.9680E+01 3.0860E+00 3.1170E-03 6.5440E-03

5.7120E-03 2.4390E-03 5.0650E-03 1.4100E-02 9.2580E-03 5.8380E-03 6.6370E-03

1.6820E-02 1.4060E-02 1.1300E-02 2.9530E-02 6.8500E-01 3.8640E+00 2.2820E-01

1.7540E-02 4.3350E-02 4.1900E-02 2.7730E-02 2.3790E-02 1.1150E-01 3.8100E-01

6.4260E-02 2.3560E-02 2.3180E-01 1.2960E+00 1.8730E-01 1.7630E-03 3.5160E-03

1.7590E-03 3.2120E-03 7.2700E-03 5.0440E-03 3.1540E-03 2.6330E-03 8.4650E-03

9.4450E-03 4.8810E-03 4.5300E-03 1.3970E-02 1.2500E-02 4.3770E-03 3.7680E-03

2.6780E-02 8.8760E-02 1.5170E-02 3.3400E-03 2.0900E-03 1.7040E-03 1.1640E-03

2.9490E-03 6.7940E-03 8.5130E-03 1.6240E-03 3.5560E-03 1.3270E-02 1.6050E-02

7.1940E-03 4.2400E-02 2.6370E-01 6.8750E-01 8.4990E-01 4.7570E-02 4.2370E-01

1.2360E+00 1.8930E+00 9.2420E-02 2.9670E-01 4.2130E-01 2.9440E-01 1.5150E-02

5.6700E-02 7.3880E-02 6.7370E-02 4.0010E-02 6.0070E-03 3.2800E-02 6.4450E-02

7.7750E-02 6.7670E-02 3.8770E-02 2.0580E-02 7.3700E-02 8.5100E-02 2.3670E-02

7.3530E-02 1.0440E-01 8.1260E-02 1.5240E-02 6.4650E-02 1.2240E-01 1.3220E-01

1.9520E-02 4.0860E-02 2.2050E-02 1.0680E-01 4.2620E-01 8.6160E-01 1.1310E+00

2.1070E-02 5.7200E-02 6.0460E-02 6.5600E-03 5.8840E-03 1.1390E-02 3.4960E-03

4.4750E-03 1.1470E-01 1.9290E+00 1.1490E+01 1.1510E-03 9.7590E-02 2.3320E+00

1.5610E+01 1.3180E-03 2.0290E-02 1.5530E+00 2.6710E+01 8.9280E-04 3.4710E-03

5.5190E-03 4.3510E-03 1.0590E-03 6.0330E-03 1.1870E-02 8.4730E-03 1.0660E-03

7.6380E-03 1.5110E-02 1.5250E-02 1.4580E-03 3.5420E-02 5.3010E-01 3.2540E+00

3.7630E-03 1.9450E-02 3.8440E-02 4.2800E-02 4.5100E-03 2.5950E-02 9.3630E-02

3.4590E-01 3.3240E-03 2.5890E-02 1.9090E-01 1.1770E+00 5.3280E-04 2.2490E-03

2.8210E-03 7.7760E-04 3.7190E-03 6.2120E-03 4.2140E-03 4.9570E-04 2.9750E-03

7.2700E-03 9.6280E-03 1.0930E-03 5.2650E-03 1.1550E-02 1.0370E-02 4.4130E-04

4.3250E-03 2.1960E-02 8.1820E-02 2.6720E-03 1.2170E-03 1.8230E-03 8.8060E-04

7.3570E-04 3.3850E-03 5.7500E-03 6.0880E-03 6.0230E-04 4.0510E-03 1.1260E-02

1.6130E-02 6.9410E+00 3.1960E-01 6.8620E-02 1.5500E+00 6.7210E-01 2.0630E-01

4.4930E-02 1.8710E+00 9.2460E-01 2.7150E-01 5.4700E-02 1.4630E-01 7.8700E-02

4.0120E-02 2.0950E-02 9.3650E-03 2.4940E-01 1.5540E-01 9.4680E-02 5.2440E-02

2.4930E-02 9.0740E-03 1.6240E-01 7.6420E-02 2.2080E-02 8.5850E-01 1.5690E-01

4.5820E-02 1.4780E-02 4.6320E-01 1.7180E-01 6.5100E-02 2.2480E-02 1.9840E-01

9.1860E-02 1.7310E-02 1.1390E+00 7.6860E-01 2.6080E-01 9.4100E-02 2.5490E-01

1.0410E-01 3.8710E-02 2.0340E-01 2.4130E-01 1.2250E-01 5.5060E-02 8.7670E+00

1.0510E+00 8.9730E-02 7.1230E-03 4.4670E-01 2.3580E-01 5.7670E-02 8.3150E-03

6.4490E-01 2.4000E-01 6.9830E-02 7.1730E-03 1.6340E-01 2.6790E-02 1.7960E-02

9.4520E-03 1.7810E+01 4.3180E-01 6.3030E-03 7.5170E-04 2.2830E+01 2.6710E+00

1.1240E-01 9.5940E-04 2.5470E+01 2.5720E+00 1.5000E-01 5.3680E-03 7.4560E-01

1.1120E-01 9.5800E-03 1.1920E-03 5.6730E-01 8.1400E-02 1.2000E-02 2.1140E-03

6.2270E-02 2.9650E-02 1.0790E-02 2.1530E-03 4.2540E-02 1.1210E-02 1.7380E-03

7.9100E-01 4.9020E-02 6.5220E-03 1.6790E-03 3.9860E-01 6.6990E-02 1.0020E-02

2.0520E-03 4.3020E-02 1.6190E-02 4.6890E-03 1.1320E-03 5.3080E-02 2.1690E-02

6.6740E-03 1.8580E-03 1.0740E-02 7.8570E-03 4.7700E-03 1.9480E-03 1.9920E-02

8.9450E-03 3.6330E-03 1.2370E-03 4.3060E-02 1.9620E-02 5.4610E-03 1.4750E-03

8.5390E+00 3.4060E-01 4.8100E-01 8.7670E-01 5.8310E-01 2.2410E-01 9.6460E-01

1.0090E+00 6.0760E-01 2.3490E-01 7.0200E-02 7.6330E-02 5.4240E-02 2.9400E-02

1.1540E-02 1.3100E-01 1.2040E-01 8.5130E-02 6.1550E-02 4.5160E-02 2.5350E-02

9.5360E-02 6.3340E-02 4.9990E-02 2.4120E-01 4.7180E-01 1.1590E-01 3.1320E-02

1.7170E-01 2.2740E-01 1.2110E-01 5.8160E-02 1.2970E-01 6.4400E-02 5.2030E-02

7.6850E-01 6.2990E-01 5.9720E-01 2.2800E-01 1.5670E-01 1.1290E-01 4.8660E-02

1.6270E-01 1.6540E-01 1.1740E-01 5.2300E-02 4.5610E-01 6.1740E+00 1.2580E+00

1.0910E-01 1.6990E-01 3.2910E-01 2.2190E-01 6.7180E-02 1.2700E-01 7.3010E-01

4.0810E-01 8.3640E-02 4.2420E-02 1.1030E-01 1.5300E-02 6.4240E-03 2.4570E+00

1.1650E+01 4.7540E-01 4.2830E-03 2.6620E+00 1.4480E+01 3.1950E+00 1.4000E-01

7.7190E-01 1.8480E+01 3.3070E+00 1.8810E-01 1.0980E-01 4.5930E-01 1.1550E-01

1.0920E-02 3.3680E-02 4.3270E-01 8.7050E-02 1.3450E-02 2.4270E-02 2.5580E-02

2.1960E-02 1.2090E-02 2.1670E-02 1.6150E-02 6.5440E-03 1.4010E-01 4.8580E-01

4.5230E-02 5.1640E-03 6.6760E-02 2.3500E-01 6.8180E-02 1.0460E-02 1.9640E-02

1.7320E-02 1.1090E-02 3.8250E-03 1.7650E-02 2.6030E-02 1.7800E-02 6.8870E-03

8.5870E-03 5.9490E-03 3.5600E-03 2.1320E-03 1.0240E-02 8.6950E-03 5.6930E-03

2.3320E-03 1.6830E-02 1.9330E-02 1.6550E-02 5.3710E-03 6.4160E+00 1.2600E-01

4.9170E-01 5.9700E-01 4.9300E-01 4.1860E-01 7.6230E-01 6.5070E-01 3.8330E-01

3.5510E-02 4.9980E-02 4.5950E-02 3.3760E-02 1.7720E-02 6.6840E-02 6.3460E-02

8.0960E-02 7.2300E-02 4.6830E-02 2.0920E-02 4.7730E-02 5.7490E-02 5.1280E-02

7.6410E-02 2.0600E-01 2.9050E-01 7.1930E-02 6.5100E-02 1.2110E-01 1.5530E-01

9.2360E-02 7.1060E-02 6.7650E-02 4.5850E-02 2.6080E-01 5.9720E-01 6.7550E-01

4.5050E-01 9.3600E-02 9.2390E-02 5.2920E-02 1.2200E-01 1.1090E-01 9.1390E-02

4.9020E-02 2.0830E-02 5.2780E-01 4.4760E+00 9.7670E-01 2.2920E-02 1.6150E-01

2.1790E-01 1.8870E-01 5.3440E-03 2.2830E-01 4.9830E-01 3.3650E-01 2.2250E-02

3.6470E-02 6.7380E-02 5.6780E-03 1.9450E-01 2.9730E+00 7.4490E+00 3.3190E-01

1.0850E-01 3.2620E+00 9.5700E+00 2.4280E+00 7.1170E-03 9.4060E-01 1.3570E+01

2.5420E+00 9.4380E-03 1.1530E-01 3.0480E-01 8.8100E-02 6.1850E-03 3.2440E-02

3.6200E-01 7.0980E-02 6.2990E-03 1.7900E-02 1.8500E-02 2.0220E-02 9.7800E-03

1.4400E-02 9.1110E-03 2.0360E-02 1.4980E-01 3.0660E-01 3.0510E-02 9.9590E-03

6.8040E-02 1.5320E-01 5.2210E-02 7.5900E-03 1.3740E-02 1.0250E-02 6.9850E-03

4.6380E-03 1.4540E-02 1.7890E-02 1.4880E-02 6.4390E-03 4.0830E-03 2.9590E-03

1.6530E-03 5.3670E-03 6.5780E-03 5.7500E-03 2.9750E-03 4.9890E-03 1.1960E-02

1.3510E-02 1.2860E-02 2.5020E-02 1.4840E-01 3.9070E-01 5.7310E-01 1.2870E-01

4.3140E-01 5.5580E-01 3.6760E-01 1.9200E-02 2.3520E-02 3.0950E-02 2.9800E-02

1.8170E-02 2.1860E-02 5.1500E-02 5.1790E-02 4.7520E-02 3.8920E-02 2.2550E-02

1.9200E-02 4.6190E-02 3.8940E-02 2.8460E-02 6.8640E-02 1.5000E-01 1.8170E-01

2.2480E-02 5.8160E-02 9.2330E-02 1.1620E-01 3.1560E-02 6.3120E-02 2.8310E-02

9.4070E-02 2.2800E-01 4.5050E-01 5.4970E-01 5.2190E-02 6.1880E-02 4.4440E-02

8.1340E-02 6.8760E-02 5.9690E-02 3.9110E-02 2.9820E-03 2.2810E-02 4.0010E-01

3.5750E+00 1.5620E-03 2.5800E-02 1.2940E-01 2.3730E-01 4.7580E-04 5.8190E-03

1.7460E-01 5.3140E-01 1.4890E-02 1.1010E-02 2.1810E-02 3.9110E-02 7.2500E-03

2.6490E-01 2.2780E+00 5.2150E+00 9.5930E-04 1.3950E-01 2.4660E+00 7.6910E+00

1.9000E-03 7.0460E-03 7.0440E-01 1.0600E+01 1.1850E-03 1.0910E-02 9.1580E-02

2.4500E-01 1.2220E-03 6.6420E-03 2.5800E-02 2.9360E-01 5.8390E-04 6.9430E-03

1.5490E-02 1.8930E-02 3.6890E-03 1.0010E-02 8.5010E-03 3.8460E-03 2.3090E-02

1.1420E-01 1.9820E-01 2.0410E-03 1.0460E-02 5.2130E-02 1.2420E-01 2.4860E-03

7.2940E-03 1.0010E-02 6.2370E-03 1.1590E-03 4.4790E-03 1.1570E-02 1.7250E-02

4.2940E-03 2.4980E-03 2.2740E-03 1.0480E-03 2.2950E-03 4.0260E-03 4.1540E-03

2.6760E-03 1.2350E-03 5.3030E-03 9.6740E-03 1.0610E-02 7.2200E+00 3.0820E-01

4.6620E-02 1.8890E+00 6.2740E-01 1.8000E-01 4.6490E-02 1.3310E-01 6.6380E-02

2.6680E-02 9.4000E-03 2.4930E-03 2.4940E-01 1.4330E-01 7.2140E-02 3.0480E-02

9.9700E-03 2.0860E-03 1.1630E-01 2.7410E-02 7.8260E-03 3.5570E-01 1.1840E-01

3.5410E-02 6.9150E-03 8.4940E-01 1.3630E-01 3.8810E-02 1.1990E-02 1.6410E-01

3.6500E-02 1.0430E-02 1.7960E+00 5.6650E-01 1.6610E-01 5.8500E-02 2.0870E-01

6.8320E-02 1.0520E-02 4.6080E-03 2.1030E-02 5.1800E-03 1.8330E-03 1.7560E+00

2.1380E-01 2.8550E-02 2.8570E-03 3.2400E+00 3.5160E-01 3.9720E-02 5.0010E-03

1.1130E-01 9.3640E-02 2.9190E-02 4.5330E-03 2.2750E-02 1.1030E-02 3.3270E-03

4.7940E-04 5.8600E-02 1.7680E-02 2.7770E-03 4.2090E-04 5.9760E-01 3.4410E-02

5.6200E-03 1.5740E-03 1.2790E-01 4.4240E-02 1.2860E-02 2.2630E-03 2.0120E+01

6.4470E-01 5.7080E-03 7.9070E-04 2.6750E+01 2.4380E+00 9.3240E-02 6.6010E-04

3.4650E+01 2.7950E+00 1.2950E-01 4.4350E-03 3.1640E-02 6.2840E-03 2.1580E-03

6.8130E-02 2.6880E-02 1.0090E-02 2.6190E-03 1.7760E+00 8.2910E-02 1.2240E-02

4.0220E-03 5.0340E-02 1.4040E-02 3.4830E-03 3.6900E-04 1.2600E-01 2.5810E-02

5.1220E-03 7.8410E-04 9.5680E-04 1.0830E-02 3.2970E-03 8.3080E-04 2.3460E-02

8.2140E-03 2.1630E-03 4.7450E-04 7.6140E-02 1.6830E-02 3.2560E-03 5.4010E-04

1.1590E+01 3.5470E-01 8.4000E-01 1.1950E+00 4.3360E-01 1.3770E-01 6.3730E-02

7.1580E-02 4.2740E-02 2.2990E-02 9.8520E-03 1.2720E-01 1.0080E-01 8.2330E-02

5.9670E-02 3.6330E-02 1.6320E-02 5.3370E-02 5.5230E-02 1.7640E-02 1.6750E-01

1.5930E-01 7.7560E-02 2.8270E-02 1.8910E-01 5.2530E-01 1.1100E-01 3.5290E-02

8.6610E-02 7.0680E-02 1.8600E-02 6.6570E-01 8.8010E-01 4.6700E-01 1.4400E-01

1.2720E-01 7.6330E-02 3.8620E-02 3.8400E-03 1.1480E-02 9.4270E-03 2.5060E-03

2.1200E-01 1.1110E+00 2.2690E-01 3.2830E-02 1.9990E-01 2.4550E+00 4.0740E-01

4.5190E-02 7.8180E-02 1.1620E-01 7.8200E-02 3.2530E-02 1.3720E-02 8.2540E-03

6.4580E-03 3.0840E-03 2.5890E-02 2.3190E-02 1.4570E-02 2.5190E-03 7.9980E-02

4.1920E-01 3.3730E-02 5.3070E-03 4.4210E-02 6.2680E-02 3.5180E-02 1.3960E-02

2.0650E+00 1.4420E+01 7.8330E-01 6.2440E-03 2.4290E+00 1.8880E+01 2.9980E+00

1.1250E-01 5.1520E-01 2.7300E+01 3.5590E+00 1.5610E-01 1.6120E-02 1.4090E-02

3.0430E-03 3.6080E-02 3.0800E-02 1.5440E-02 7.8840E-03 2.0370E-01 1.2410E+00

8.3980E-02 1.1230E-02 2.1250E-02 2.2980E-02 9.4190E-03 3.3030E-03 2.5750E-02

8.6780E-02 2.5220E-02 5.6200E-03 7.9750E-04 6.3460E-03 4.4000E-03 1.7210E-03

1.1460E-02 9.7320E-03 6.0090E-03 1.7580E-03 2.1410E-02 4.0970E-02 1.4770E-02

3.4250E-03 9.2440E+00 3.5640E-01 7.6810E-01 7.6800E-01 2.8220E-01 2.7260E-02

4.3190E-02 4.9380E-02 3.5140E-02 1.5720E-02 4.8390E-02 7.5640E-02 7.3150E-02

6.3880E-02 4.9440E-02 2.7540E-02 2.2890E-02 4.4660E-02 3.3370E-02 7.2090E-02

1.1820E-01 1.0500E-01 5.0230E-02 5.4230E-02 1.7050E-01 3.7770E-01 8.7110E-02

4.4060E-02 6.2700E-02 3.3940E-02 2.2680E-01 5.5730E-01 5.8040E-01 3.6110E-01

6.8010E-02 7.6260E-02 4.8800E-02 3.0720E-03 6.1810E-03 8.1840E-03 4.3200E-03

2.8410E-02 2.2680E-01 8.2070E-01 1.8260E-01 2.2140E-02 2.2110E-01 1.9220E+00

3.2340E-01 1.9340E-02 6.4510E-02 8.7630E-02 7.2710E-02 6.6210E-03 8.0450E-03

6.2980E-03 4.2610E-03 8.7160E-03 2.0850E-02 1.3410E-02 1.0030E-02 1.0440E-02

8.7790E-02 3.0670E-01 2.5970E-02 1.2850E-02 3.5170E-02 4.5710E-02 3.1040E-02

1.2290E-01 2.5590E+00 1.0550E+01 5.8720E-01 9.0550E-02 2.9960E+00 1.4150E+01

2.3000E+00 3.6120E-03 1.5320E+00 2.1520E+01 2.7380E+00 8.1330E-03 1.2210E-02

6.3140E-03 1.7840E-02 2.2740E-02 2.1650E-02 9.6850E-03 2.4830E-02 2.3480E-01

9.2390E-01 6.4080E-02 8.0860E-03 1.5730E-02 1.5340E-02 6.3970E-03 5.1180E-03

2.5220E-02 6.3350E-02 2.0700E-02 6.3800E-04 3.4610E-03 4.0950E-03 2.3750E-03

4.7400E-03 8.1490E-03 6.4480E-03 3.9800E-03 5.1150E-03 1.9420E-02 2.8040E-02

1.1800E-02 1.4020E-01 3.8160E-01 6.0170E-01 5.2440E-01 9.0300E-03 2.5390E-02

3.5280E-02 3.4340E-02 2.1830E-02 9.9390E-03 4.2750E-02 6.2430E-02 6.2970E-02

4.8870E-02 2.6210E-02 9.5040E-03 2.4110E-02 4.1900E-02 2.7010E-02 7.0980E-02

9.2750E-02 6.7950E-02 1.7770E-02 5.3460E-02 1.3750E-01 3.0810E-01 2.1870E-02

4.1200E-02 4.2470E-02 8.3810E-02 2.1470E-01 4.5030E-01 5.4510E-01 3.0980E-02

6.8160E-02 4.6050E-02 2.3040E-03 3.3900E-03 5.2570E-03 5.3670E-03 2.8470E-03

3.2820E-02 1.8260E-01 7.5210E-01 2.7130E-03 2.4380E-02 1.7670E-01 1.6640E+00

1.0240E-03 2.1400E-02 5.8540E-02 1.0130E-01 2.1550E-03 6.7390E-03 6.4920E-03

3.3810E-03 2.1670E-03 9.8200E-03 1.6940E-02 1.0830E-02 2.4450E-03 1.1200E-02

6.8870E-02 2.4110E-01 2.2620E-03 1.3960E-02 3.1040E-02 4.6290E-02 3.9060E-03

1.5500E-01 1.9700E+00 8.2710E+00 6.6000E-04 1.1220E-01 2.3000E+00 1.2250E+01

4.9010E-04 4.2990E-03 1.1640E+00 1.8210E+01 4.1560E-03 7.3560E-03 8.4100E-03

7.6520E-03 1.6730E-02 1.7360E-02 1.2250E-02 6.0200E-03 2.6620E-02 1.8240E-01

7.2280E-01 2.2140E-03 8.7520E-03 1.2750E-02 1.0320E-02 7.8370E-04 5.5730E-03

2.0700E-02 5.1960E-02 4.7850E-04 1.7890E-03 3.1490E-03 2.5050E-03 1.6400E-03

4.7710E-03 6.5000E-03 4.2600E-03 1.0050E-03 5.6480E-03 1.6030E-02 2.5550E-02

4.5150E+00 4.6250E-01 1.8380E-01 7.1500E-02 4.7580E-02 2.8100E-02 1.5650E-02

7.0500E-03 8.9220E-02 6.0640E-02 4.1650E-02 2.8910E-02 1.8960E-02 9.5530E-03

6.4940E-02 3.4970E-02 2.2550E-02 6.3510E-01 3.6730E-01 1.1600E-01 3.9070E-02

6.3250E-01 2.0440E-01 1.9710E-01 6.8010E-02 6.9720E-01 1.1640E-01 3.7870E-02

1.1350E+00 6.2900E-01 3.3880E-01 1.7460E-01 6.8450E-01 3.8590E-01 4.8310E-02

4.3280E-02 2.0460E-01 6.0650E-02 3.2990E-02 2.0440E-01 9.0310E-02 2.8080E-02

5.9960E-03 1.4550E-01 6.1020E-02 2.1210E-02 5.3760E-03 1.2900E-01 5.8740E-02

2.0790E-02 4.6090E-03 3.9470E-02 2.1490E-02 1.2360E-02 5.6630E-03 2.2080E+00

4.2050E-01 2.6100E-02 4.4850E-03 2.0440E+00 3.2390E-01 4.5900E-02 9.0400E-03

1.2660E-01 6.5580E-02 2.8550E-02 9.5600E-03 2.7760E+00 4.0630E-01 4.8530E-02

8.1130E-03 1.6110E-01 6.0360E-02 2.2060E-02 7.7330E-03 1.7940E-01 7.6790E-02

3.3100E-02 1.2830E-02 1.2470E+01 2.2370E-01 5.7790E-03 1.6960E+01 3.1180E+00

1.2060E-01 2.6640E-03 2.6040E+01 3.3680E+00 2.7680E-01 1.5030E-02 1.2950E-01

4.6020E-02 1.2550E-02 2.4620E-03 2.6290E-02 1.4910E-02 7.2390E-03 2.7940E-03

3.2230E-02 1.1560E-01 1.7880E-02 8.4580E-03 4.7160E-02 2.5210E-02 1.0120E-02

2.6320E-03 3.3300E-02 1.3010E-02 4.9790E-03 1.3320E-03 5.1680E+00 2.7040E-01

4.0510E-02 3.2980E-02 2.8300E-02 1.8560E-02 7.5540E-03 4.7290E-02 4.6770E-02

4.0870E-02 2.8910E-02 1.6240E-02 6.6300E-03 3.7260E-02 3.6760E-02 1.7840E-02

2.0410E-01 3.5910E-01 1.0820E-01 8.1190E-02 3.0900E-01 1.9300E-01 1.4900E-01

8.1100E-02 2.1040E-01 3.2910E-01 5.4830E-02 5.4530E-01 5.2890E-01 3.9630E-01

2.3860E-01 4.5790E-01 1.3400E-01 2.4710E-01 3.2450E-02 9.3530E-02 1.0730E-01

2.0860E-02 6.1660E-02 7.6730E-02 7.5500E-02 3.2740E-02 3.4060E-02 6.5700E-02

5.0760E-02 2.4320E-02 3.1820E-02 5.4210E-02 4.9070E-02 2.4700E-02 2.1340E-02

2.0850E-02 1.1530E-02 5.6020E-03 4.1950E-01 1.0840E+00 4.6460E-01 2.5880E-02

9.7140E-02 1.3160E+00 3.5860E-01 5.2100E-02 4.9200E-02 5.0220E-02 4.3920E-02

2.9410E-02 9.5360E-02 1.8190E+00 4.6670E-01 5.7070E-02 3.6200E-02 8.0840E-02

4.9120E-02 2.2330E-02 4.3870E-02 9.0840E-02 5.8390E-02 3.3510E-02 2.9930E+00

6.3780E+00 1.5880E-01 3.1150E+00 8.3470E+00 3.5200E+00 1.5320E-01 6.2730E-01

1.5780E+01 4.0700E+00 3.6780E-01 4.6000E-02 5.2350E-02 3.2730E-02 1.1860E-02

1.1690E-02 1.0160E-02 9.2660E-03 7.0470E-03 2.4170E-02 3.8210E-02 5.9380E-02

7.0420E-03 2.5200E-02 1.6940E-02 1.3500E-02 8.4480E-03 9.6170E-03 1.5640E-02

8.8330E-03 4.8720E-03 3.5070E+00 1.9580E-02 2.4970E-02 1.7860E-02 1.4360E-02

9.2840E-03 2.6570E-02 3.1170E-02 2.3910E-02 1.8960E-02 1.5050E-02 8.8010E-03

2.2600E-02 2.1730E-02 1.6730E-02 9.6310E-02 1.5570E-01 2.0900E-01 5.8500E-02

1.0160E-01 1.1730E-01 1.2930E-01 1.0030E-01 7.7770E-02 1.6640E-01 1.3500E-01

2.5190E-01 3.2780E-01 3.1290E-01 2.4710E-01 2.0160E-01 2.2110E-01 1.3660E-01

2.1630E-02 4.9970E-02 6.0340E-02 3.8450E-02 7.0190E-03 5.4650E-02 4.1210E-02

6.1590E-02 5.2500E-03 2.7190E-02 4.1350E-02 4.2770E-02 3.1300E-03 2.7070E-02

3.3590E-02 4.2750E-02 1.2350E-02 1.1420E-02 1.1090E-02 4.6960E-03 2.5770E-02

4.6460E-01 5.1530E-01 3.2440E-01 1.6920E-02 8.3200E-02 8.4320E-01 2.7310E-01

1.3640E-02 3.2110E-02 3.4090E-02 3.5320E-02 1.5430E-02 8.3630E-02 1.1720E+00

3.5630E-01 9.6440E-03 2.5830E-02 5.1450E-02 3.8690E-02 1.3980E-02 2.6980E-02

6.2140E-02 4.7970E-02 4.0970E-01 3.3500E+00 2.5980E+00 1.1970E-01 3.5200E+00

3.9720E+00 2.4790E+00 1.0380E-02 6.9790E-01 1.0050E+01 3.1210E+00 1.2550E-02

3.2730E-02 3.0310E-02 1.9770E-02 3.8590E-03 7.0340E-03 7.4740E-03 7.3590E-03

1.6120E-02 1.5190E-02 3.2300E-02 2.2950E-02 1.0120E-02 1.3360E-02 1.2390E-02

6.6530E-03 2.9420E-03 5.8390E-03 1.0600E-02 6.4850E-03 8.4540E-03 8.9140E-03

1.1480E-02 8.9100E-03 4.0250E-03 1.4740E-02 9.6160E-03 1.2120E-02 1.2130E-02

9.0050E-03 4.5600E-03 1.1270E-02 8.5280E-03 1.0700E-02 3.6310E-02 7.6460E-02

1.1910E-01 3.9790E-02 3.4490E-02 7.4740E-02 6.7250E-02 7.1320E-02 2.8790E-02

5.3980E-02 1.0020E-01 1.0030E-01 1.4180E-01 1.7350E-01 1.5440E-01 5.4300E-02

1.9120E-01 3.4080E-02 1.0820E-02 2.4400E-02 1.8160E-02 3.1770E-02 9.3200E-04

6.6790E-03 3.7890E-02 3.6700E-02 5.8900E-04 5.0370E-03 1.9130E-02 3.3510E-02

2.7250E-05 3.3870E-03 1.9470E-02 3.0390E-02 5.6610E-03 5.6000E-03 4.6550E-03

3.8650E-03 4.4490E-03 2.5820E-02 3.2440E-01 3.1050E-01 3.7440E-03 1.4340E-02

5.5540E-02 5.3460E-01 2.4530E-03 1.2050E-02 2.1390E-02 2.1690E-02 3.1850E-03

1.3480E-02 5.6190E-02 7.4070E-01 2.4420E-03 7.4830E-03 1.6940E-02 3.5950E-02

3.0620E-03 1.1380E-02 1.7990E-02 4.3090E-02 1.7640E-02 6.3420E-01 2.5260E+00

2.5670E-03 1.5310E-01 2.4780E+00 2.4070E+00 4.9810E-03 4.6260E-03 4.8590E-01

6.4380E+00 2.4610E-03 1.1860E-02 1.9770E-02 1.3530E-02 8.2490E-04 3.2590E-03

4.5390E-03 3.9980E-03 8.0570E-03 6.4010E-03 8.1140E-03 2.0450E-02 2.6130E-03

8.4480E-03 6.8880E-03 3.8530E-03 5.0840E-04 2.7180E-03 3.6700E-03 5.9210E-03

3.8160E+00 1.0500E+00 2.4190E-01 9.8190E-02 8.7790E+00 3.7030E+00 1.0450E+00

2.0190E-01 3.3440E-02 7.2860E-03 3.6000E+00 1.1850E+00 4.0750E-02 3.2210E+00

4.7530E-01 8.7800E-02 6.6170E-03 2.3350E+00 7.0350E-01 1.1380E-01 8.4210E-03

8.3690E-01 1.5510E-01 1.1800E-02 4.5860E-02 2.1570E-02 9.3830E-03 3.5380E-03

2.0960E-02 1.3660E-02 7.3810E-03 5.2210E-02 1.1880E-01 1.1720E-02 3.4530E-03

2.2120E-01 1.8060E-01 8.4080E-02 1.9370E-02 1.6060E-01 7.8780E-02 2.3480E-02

3.6660E-03 9.7360E-02 2.5800E-02 5.4030E-03 6.8330E-04 1.1850E-01 3.7680E-02

6.5290E-03 1.0490E-04 1.1300E-01 5.8470E-02 5.1670E-02 3.3590E-02 1.7240E-01

4.1890E-02 1.0620E-02 2.4920E-03 4.6560E-02 1.5220E-02 4.0790E-03 9.0970E-04

8.8350E-02 7.9420E-02 4.6870E-02 1.5270E-02 1.9890E-01 4.4500E-02 7.2660E-03

6.9650E-04 3.6630E-02 1.5600E-02 4.5050E-03 7.8130E-04 5.2630E-02 3.8410E-02

9.7460E-03 5.8350E-02 2.6580E-02 1.4350E-02 7.5050E-03 5.1160E-02 2.4400E-02

8.4760E-03 2.2240E-03 7.4320E-02 7.6680E-02 3.8620E-02 8.9670E-03 4.8730E-02

2.7250E-02 9.4650E-03 1.9780E-03 5.0230E-02 2.4010E-02 1.1060E-02 6.6420E-03

2.0960E-02 1.0840E-02 5.6570E-03 2.7430E-03 3.2990E-02 1.6400E-02 6.2150E-03

1.4710E-03 3.3960E+00 1.4660E+00 1.7820E-01 2.7580E+00 3.0180E+00 3.2840E+00

1.5680E+00 3.7500E-01 5.0930E-02 1.8340E+00 1.2350E+00 7.8840E-01 9.8090E-01

1.6210E+00 3.3430E-01 8.4680E-02 8.1990E-01 9.7240E-01 6.0870E-01 1.2200E-01

4.0850E-01 3.0620E-01 8.8360E-02 2.2980E-02 1.9640E-02 1.2810E-02 7.6970E-03

1.6960E-02 1.2270E-02 5.2440E-03 4.1770E-02 5.1330E-02 5.0220E-02 5.6570E-03

1.7340E-01 5.5120E-02 9.2900E-02 8.2900E-02 7.1410E-02 5.5510E-02 6.1600E-02

2.4700E-02 1.9220E-02 5.3960E-02 2.4520E-02 5.7520E-03 5.2560E-02 4.3550E-02

2.6520E-02 6.9080E-03 6.9860E-02 8.7660E-02 3.8890E-02 1.0120E-02 5.1480E-02

8.7830E-02 3.2750E-02 9.8660E-03 1.5000E-02 2.1930E-02 1.2370E-02 4.0600E-03

7.8540E-02 3.6040E-02 2.9520E-02 3.9810E-02 4.4850E-02 1.0620E-01 4.2120E-02

7.8910E-03 1.3990E-02 1.4770E-02 1.2510E-02 4.7100E-03 4.4170E-02 1.7540E-02

1.8830E-02 3.2550E-02 3.0260E-02 1.7350E-02 5.2410E-03 2.6050E-02 1.9590E-02

1.6020E-02 7.7010E-03 7.6690E-02 2.5210E-02 2.7460E-02 2.9520E-02 2.6400E-02

1.5390E-02 1.8670E-02 9.4820E-03 4.0190E-02 1.6000E-02 1.3390E-02 3.9770E-03

1.2740E-02 1.0260E-02 6.7230E-03 2.3460E-03 1.7390E-02 1.2730E-02 9.7220E-03

5.8020E-03 1.9230E+00 1.1940E+00 2.1430E-01 2.8540E+00 1.2580E+00 2.0300E+00

1.5260E+00 4.1660E-01 7.5920E-01 1.1150E+00 1.0170E+00 2.7080E-01 8.8130E-01

9.0590E-01 2.0170E-01 2.0270E-01 6.9980E-01 5.6980E-01 4.1790E-01 1.7730E-01

2.7420E-01 1.5090E-01 1.0980E-02 1.4330E-02 1.3630E-02 9.2930E-03 1.2700E-02

8.8310E-03 3.9530E-03 3.1330E-02 2.0470E-02 4.1520E-02 1.8420E-02 8.2590E-02

7.9170E-02 5.3930E-02 8.7540E-02 1.9750E-02 5.3250E-02 3.7520E-02 4.9400E-02

2.2710E-03 2.0790E-02 3.6270E-02 1.8060E-02 1.8810E-02 3.6070E-02 2.6050E-02

1.6270E-02 5.5890E-02 5.6560E-02 3.3030E-02 9.4080E-03 1.4610E-02 4.4930E-02

5.4100E-02 2.2800E-02 4.0540E-03 1.2620E-02 1.4160E-02 9.1990E-03 5.0150E-02

2.7280E-02 3.4540E-02 2.5960E-02 6.9690E-03 4.7110E-02 6.7140E-02 2.9630E-02

3.6830E-03 1.1030E-02 9.9010E-03 9.8720E-03 3.0130E-02 1.7020E-02 1.3450E-02

1.9380E-02 2.2650E-02 1.4510E-02 7.5260E-03 1.0720E-02 1.6370E-02 1.2910E-02

1.1750E-02 5.2470E-02 2.2470E-02 2.8460E-02 1.5790E-02 9.6350E-03 1.6740E-02

1.0940E-02 1.5150E-02 3.0140E-02 1.1220E-02 9.7800E-03 4.0240E-03 7.7290E-03

8.1420E-03 5.1450E-03 3.0290E-03 7.6100E-03 1.0070E-02 9.0800E-03 7.4870E-03

1.2540E+00 3.3320E-02 2.3840E-01 2.1420E+00 9.2540E-01 1.0080E+00 1.1900E+00

2.1040E-01 8.3990E-01 8.7670E-01 6.6040E-02 3.1910E-01 6.7640E-01 4.4180E-01

2.7390E-02 2.8700E-01 4.5600E-01 4.8400E-01 6.4950E-02 1.8200E-01 1.5460E-01

4.5510E-03 8.5800E-03 1.0450E-02 8.5500E-03 8.6240E-03 5.3940E-03 2.8120E-03

2.0890E-02 7.6970E-03 2.2370E-02 2.3540E-02 2.4890E-02 7.0470E-02 5.8300E-02

4.8430E-02 2.5970E-03 2.6160E-02 3.3640E-02 4.4220E-02 1.4700E-04 3.5610E-03

1.9620E-02 2.8260E-02 4.7920E-03 2.0630E-02 2.3480E-02 1.6200E-02 4.4770E-02

2.3220E-02 2.1330E-02 1.3480E-02 4.1510E-03 1.5610E-02 3.6150E-02 3.5050E-02

9.1500E-04 4.7280E-03 9.6700E-03 1.1450E-02 2.2710E-02 3.1200E-02 2.5460E-02

1.2600E-02 6.2170E-04 1.0600E-02 4.0320E-02 4.9030E-02 5.5200E-04 4.7940E-03

7.6350E-03 1.0030E-02 1.6990E-02 1.6980E-02 6.2130E-03 1.1890E-02 1.2150E-02

1.1310E-02 7.3520E-03 3.5630E-03 9.9690E-03 1.0970E-02 9.9980E-03 2.6000E-02

3.0720E-02 1.8010E-02 4.6260E-03 2.3290E-03 1.0250E-02 1.0690E-02 1.1710E-02

2.0090E-02 7.4970E-03 5.3570E-03 3.8250E-03 4.5920E-03 4.8560E-03 4.0530E-03

2.5420E-03 2.5710E-03 6.6060E-03 7.3750E-03 6.2760E-03 6.4880E-03 3.4200E-02

1.7250E-01 1.2160E+00 1.0230E+00 3.1910E-01 1.6290E-02 4.5000E-01 4.9730E-01

1.1180E-02 9.5740E-02 2.5260E-01 3.9130E-01 1.4860E-03 4.6090E-02 2.6940E-01

3.0790E-01 1.8160E-02 8.6340E-02 9.6280E-02 1.5720E-03 4.0780E-03 5.0890E-03

4.9080E-03 4.3640E-03 2.4790E-03 1.4970E-03 1.0450E-02 2.6280E-03 8.1710E-03

1.6030E-02 3.1250E-03 3.5830E-02 4.7700E-02 1.4440E-02 5.5430E-05 4.3660E-03

2.5490E-02 2.3390E-02 1.8950E-05 2.0230E-04 3.6620E-03 2.1810E-02 5.8950E-04

7.8200E-03 1.4760E-02 9.1390E-03 2.5630E-02 5.9550E-03 9.5080E-03 1.0300E-02

1.0220E-03 4.6720E-03 1.2250E-02 2.7210E-02 1.9150E-04 1.1080E-03 4.2070E-03

7.8520E-03 6.5740E-03 2.3110E-02 1.1440E-02 4.8970E-03 3.5110E-05 1.0110E-03

1.0770E-02 3.8460E-02 3.4240E-05 8.6230E-04 4.6350E-03 5.9930E-03 7.2580E-03

1.0950E-02 1.7830E-03 5.9480E-03 4.4500E-03 6.5630E-03 4.3870E-03 9.5760E-04

3.9500E-03 7.0900E-03 5.3650E-03 8.8290E-03 2.3660E-02 6.4960E-03 6.3680E-04

3.3650E-04 3.2340E-03 8.5140E-03 5.4010E-03 1.0050E-02 3.8330E-03 2.1230E-03

2.3860E-03 2.2080E-03 1.9830E-03 2.4600E-03 1.3400E-03 5.7670E-04 3.1160E-03

4.2950E-03 3.4280E-03 4.0500E+00 4.3530E-01 3.9620E-02 6.9790E-03 1.2710E-03

8.9930E+00 1.8560E-01 6.1560E-02 2.1970E+00 4.6760E-01 2.2810E-02 3.5080E-03

3.1790E+00 4.6640E-01 3.4230E-02 2.2100E-03 1.8120E+00 2.2590E-02 1.4750E-02

5.4590E-02 2.3320E-02 8.2350E-03 1.9270E-03 1.5810E-02 5.4920E-03 2.1440E-03

1.2730E-02 3.2470E-02 1.3630E-02 2.5310E-03 1.5690E-01 3.5540E-02 6.5050E-03

7.8470E-04 1.6880E-01 5.6860E-02 1.1560E-02 1.1440E-03 5.1460E-01 1.5860E-01

2.8410E-02 2.4660E-03 1.4870E-01 1.9010E-02 1.1050E-03 7.0170E-05 5.3620E-02

2.5870E-02 9.6390E-03 1.5430E-03 6.8070E-02 5.7170E-02 2.5570E-02 4.4180E-03

2.7150E-01 7.7300E-02 1.9570E-02 2.7800E-03 1.3580E-01 5.7130E-02 1.5370E-02

1.8130E-03 1.1930E-01 7.7890E-02 2.5790E-02 3.6150E-03 3.8990E-01 1.0790E-01

2.2560E-02 2.3860E-03 4.2980E-02 4.1840E-02 3.5580E-02 6.8200E-02 4.6480E-02

2.0210E-02 3.4490E-03 1.9320E-01 4.8260E-02 7.6870E-03 1.3720E-03 4.3370E-02

1.5170E-02 5.8450E-03 1.2820E-03 9.3170E-02 3.9020E-02 9.8620E-03 1.4780E-03

5.8940E-02 4.5690E-02 2.0600E-02 7.0450E-04 7.4070E-02 3.0830E-02 6.7310E-03

6.5740E-04 7.3010E-02 4.6540E-02 1.3140E-02 1.4890E-03 4.8710E+00 7.1610E-01

6.0180E-02 1.0110E-02 3.6540E+00 3.9050E+00 1.0360E-01 1.0060E+00 8.4360E-01

3.7470E-01 1.7400E-02 1.6520E+00 3.1810E+00 4.1170E-01 3.1990E-02 8.5890E-01

6.7370E-01 8.7410E-03 2.9950E-02 2.1960E-02 1.3670E-02 6.7790E-03 1.0540E-02

6.8000E-03 2.4000E-03 1.0610E-02 2.2580E-02 1.1400E-02 6.4750E-03 5.4630E-02

7.6930E-02 2.8720E-02 6.0150E-03 6.8970E-02 6.8650E-02 4.6310E-02 1.0850E-02

1.8440E-01 2.3760E-01 1.3790E-01 2.6800E-02 5.9310E-02 6.5630E-02 1.4870E-02

9.3250E-04 3.4640E-02 2.2130E-02 1.1710E-02 7.2930E-03 5.8600E-02 2.2640E-02

2.5450E-02 2.2200E-02 1.0710E-01 1.2880E-01 5.5480E-02 1.7930E-02 7.3820E-02

4.9400E-02 3.6420E-02 1.3880E-02 8.2210E-02 3.4500E-02 4.8630E-02 2.3620E-02

1.3750E-01 1.8140E-01 8.7140E-02 2.1140E-02 4.2800E-02 4.2330E-02 1.4720E-02

5.3580E-02 2.8160E-02 1.8460E-02 1.5070E-02 7.9800E-02 8.4280E-02 3.8090E-02

6.6470E-03 2.4020E-02 1.9230E-02 7.3940E-03 4.0690E-03 4.6730E-02 3.5510E-02

2.8470E-02 8.9470E-03 4.9120E-02 3.2640E-02 1.2810E-02 1.0350E-02 4.4450E-02

2.5220E-02 1.8380E-02 5.5140E-03 5.1780E-02 1.9350E-02 2.8780E-02 1.1910E-02

4.2890E+00 7.7150E-01 5.6530E-02 1.2500E+00 3.6230E+00 1.2580E+00 3.9710E-01

7.5580E-01 4.5250E-01 1.8690E-01 3.6530E-01 1.8950E+00 1.7290E+00 2.3220E-01

3.6840E-01 6.8060E-01 1.8490E-01 1.5150E-02 1.8180E-02 1.5300E-02 1.0090E-02

7.0230E-03 6.1140E-03 2.8820E-03 8.4870E-03 1.4640E-02 1.0650E-02 7.0780E-03

1.6430E-02 5.0500E-02 4.7580E-02 1.8570E-02 2.2340E-02 5.6420E-02 4.8130E-02

3.1130E-02 5.0820E-02 1.6680E-01 1.6200E-01 8.9740E-02 2.0740E-02 5.1410E-02

3.2850E-02 7.6070E-03 2.0940E-02 1.7240E-02 1.5080E-02 7.5790E-03 3.8240E-02

2.0730E-02 2.0630E-02 2.3570E-02 3.8790E-02 8.7270E-02 8.2110E-02 3.9510E-02

3.4680E-02 4.4620E-02 3.4880E-02 2.5900E-02 4.1930E-02 4.0580E-02 2.9680E-02

3.8940E-02 4.2080E-02 1.2150E-01 1.1910E-01 5.8960E-02 4.2300E-02 3.0280E-02

7.4440E-03 3.6610E-02 2.1150E-02 2.1590E-02 1.2860E-02 2.8700E-02 6.5050E-02

5.0360E-02 2.3030E-02 1.3180E-02 1.4730E-02 1.1350E-02 4.4880E-03 1.9370E-02

3.1530E-02 2.4870E-02 1.9960E-02 3.9290E-02 2.0580E-02 1.2710E-02 1.1360E-02

2.3290E-02 2.4040E-02 1.6870E-02 1.0680E-02 2.7530E-02 2.4100E-02 1.6850E-02

2.0960E-02 3.2150E+00 5.8950E-01 3.4220E-01 2.1010E+00 2.1600E+00 1.2750E-01

4.7110E-01 4.4130E-01 2.8830E-01 5.9940E-02 6.4150E-01 1.6070E+00 8.2620E-01

1.4040E-01 4.5970E-01 3.2530E-01 6.8190E-03 1.2580E-02 1.3690E-02 1.0890E-02

4.3980E-03 4.6610E-03 2.7870E-03 6.3640E-03 8.6960E-03 9.5870E-03 6.0000E-03

4.1470E-03 2.2280E-02 4.1070E-02 3.2320E-02 5.1860E-03 2.9960E-02 3.9310E-02

4.3500E-02 8.3420E-03 7.8710E-02 1.2880E-01 1.3620E-01 6.0870E-03 2.7520E-02

3.4100E-02 1.6760E-02 1.1110E-02 1.3850E-02 1.3870E-02 6.7660E-03 1.9580E-02

2.2770E-02 1.8530E-02 1.6310E-02 1.2240E-02 4.3560E-02 7.1310E-02 5.8430E-02

1.3550E-02 3.1980E-02 3.0320E-02 2.8490E-02 1.6170E-02 3.6600E-02 2.5410E-02

3.5150E-02 1.0040E-02 5.6340E-02 9.8760E-02 9.1210E-02 3.7910E-02 1.6670E-02

5.2890E-03 2.1330E-02 2.0230E-02 1.8830E-02 8.7700E-03 8.5900E-03 3.5600E-02

4.5260E-02 3.5740E-02 6.8710E-03 1.0040E-02 1.0800E-02 5.0930E-03 6.3810E-03

2.1000E-02 2.0980E-02 2.3440E-02 2.9470E-02 1.1270E-02 1.3460E-02 8.7710E-03

1.0450E-02 1.9440E-02 1.5350E-02 1.0900E-02 1.1360E-02 2.3010E-02 1.4290E-02

1.8420E-02 2.0850E+00 7.9160E-02 7.8180E-01 2.2100E+00 3.2090E-02 2.1390E-01

3.6660E-01 2.7260E-01 8.0830E-03 1.2750E-01 7.7220E-01 1.1770E+00 4.6800E-02

2.3460E-01 3.3560E-01 2.6730E-03 7.5660E-03 9.9780E-03 8.7020E-03 2.5770E-03

3.1270E-03 2.2600E-03 4.2430E-03 4.6410E-03 7.3820E-03 4.1670E-03 8.3780E-04

7.1270E-03 2.3050E-02 3.5570E-02 6.3720E-04 1.0310E-02 2.8130E-02 4.0040E-02

3.8560E-05 2.1550E-02 7.7830E-02 1.3520E-01 1.3950E-03 1.0860E-02 2.3950E-02

2.0110E-02 5.0180E-03 1.0530E-02 9.2990E-03 5.4680E-03 7.4710E-03 1.9990E-02

1.5960E-02 8.0370E-03 3.0840E-03 1.7780E-02 4.2780E-02 5.9850E-02 4.0420E-03

1.8050E-02 2.5220E-02 2.2720E-02 4.2660E-03 2.2150E-02 2.7370E-02 2.1780E-02

1.5080E-03 1.8430E-02 5.8970E-02 9.3530E-02 2.8750E-02 6.9030E-03 4.3060E-03

1.0250E-02 1.8140E-02 1.2210E-02 5.5120E-03 2.2700E-03 1.4020E-02 3.1230E-02

3.6020E-02 3.2470E-03 6.4580E-03 7.2510E-03 4.9380E-03 1.6220E-03 9.7460E-03

1.7230E-02 1.9290E-02 1.9650E-02 5.2030E-03 1.1710E-02 5.4080E-03 3.8670E-03

1.2550E-02 1.3240E-02 7.7710E-03 3.4220E-03 1.4860E-02 1.5980E-02 1.0480E-02

2.1900E-02 1.4000E-01 1.3740E+00 5.7920E-03 6.3790E-02 2.1160E-01 1.6130E-01

9.0380E-04 1.6890E-02 1.6530E-01 8.5720E-01 1.2910E-02 8.6220E-02 2.0930E-01

8.0270E-04 3.4550E-03 5.1890E-03 4.8150E-03 1.1940E-03 1.4720E-03 1.2660E-03

2.1220E-03 1.9490E-03 4.0550E-03 1.8020E-03 1.2060E-04 1.6190E-03 8.2860E-03

2.3200E-02 7.5240E-06 1.5470E-03 1.3580E-02 2.3040E-02 4.2190E-06 7.6910E-05

3.3730E-02 8.3450E-02 2.2470E-04 2.9430E-03 1.1360E-02 1.3630E-02 1.7350E-03

5.8190E-03 4.3100E-03 3.0740E-03 1.8410E-03 1.1580E-02 9.6600E-03 2.6520E-03

4.2510E-04 6.0820E-03 1.7370E-02 3.7930E-02 7.5540E-04 7.3500E-03 1.4660E-02

1.1800E-02 5.0860E-04 8.6980E-03 1.9440E-02 9.1920E-03 1.5890E-05 3.6670E-03

2.2750E-02 5.9000E-02 1.5520E-02 1.7990E-03 2.5710E-03 3.7020E-03 1.1080E-02

5.5220E-03 2.7500E-03 5.7170E-04 3.4600E-03 1.5270E-02 2.2410E-02 1.2140E-03

3.2760E-03 3.3270E-03 3.1600E-03 2.2030E-04 2.8040E-03 1.0270E-02 1.0570E-02

9.8220E-03 1.8410E-03 6.8600E-03 2.4620E-03 1.0720E-03 5.8280E-03 8.0400E-03

3.7760E-03 6.2010E-04 6.3140E-03 1.1590E-02 3.8370E-03 1.1830E+00 2.4900E-01

1.0170E+00 3.9600E-01 1.1850E-01 2.2050E-02 2.3070E+00 7.6820E-01 2.0350E-01

4.9740E-02 2.5490E+00 1.4030E-01 3.2050E-02 2.2640E-02 1.4360E-02 7.6030E-03

3.2080E-03 1.4890E-02 1.1860E-02 5.4250E-03 3.2130E-02 8.1700E-02 4.7320E-02

2.6140E-02 2.0030E-01 1.1160E-01 5.1820E-02 1.6430E-02 2.1030E-01 8.6710E-02

2.8260E-02 5.8090E-03 9.7130E-04 1.0210E-03 7.2810E-04 3.0580E-04 1.9940E-02

8.2510E-03 2.9660E-03 8.3720E-04 7.9290E-02 2.3080E-02 6.0490E-03 1.7880E-03

4.0120E-02 3.6440E-02 3.2790E-02 2.5500E-02 8.5830E-02 7.8740E-02 4.7910E-02

1.7900E-02 1.3820E-01 6.0810E-02 2.7180E-02 1.1860E-02 8.2850E-02 6.0510E-02

3.3350E-02 1.1810E-02 8.5350E-03 3.7090E-03 1.3590E-03 3.7370E-04 6.3860E-02

3.0220E-02 1.1860E-02 1.2120E-01 7.1100E-02 2.6580E-02 4.7610E-03 4.2050E-02

4.5190E-02 4.7610E-02 4.0800E-02 1.4460E-02 5.9640E-03 2.2640E-03 7.4080E-04

1.2590E-02 9.5500E-03 5.8340E-03 2.7910E-03 2.7240E-02 3.1020E-02 3.2920E-02

2.0600E-02 4.1960E-02 4.9790E-02 4.1430E-02 2.3080E-02 6.6180E-02 5.5310E-02

3.4960E-02 1.7380E-02 9.8020E-01 3.2040E-01 4.1180E-01 2.8680E-01 1.3290E-01

3.1610E-01 1.1520E+00 7.6800E-01 2.5180E-01 4.3840E-01 1.5120E+00 9.0680E-02

1.2060E-02 8.6370E-03 8.1450E-03 7.0940E-03 1.2990E-02 6.2780E-03 4.8990E-03

2.4100E-02 5.4520E-02 4.6870E-02 1.5100E-02 7.4170E-02 7.5600E-02 7.2510E-02

6.2800E-02 2.5470E-02 9.9060E-02 8.4200E-02 3.9640E-02 9.0480E-04 1.9170E-04

3.8660E-04 7.9360E-04 6.8600E-03 8.2850E-03 5.8740E-03 2.5610E-03 1.5800E-02

4.0380E-02 2.1340E-02 5.2790E-03 3.5800E-02 3.3880E-02 2.1480E-02 9.9470E-03

7.4280E-02 1.5270E-02 2.9220E-02 5.4000E-02 3.8330E-02 7.0230E-02 4.9190E-02

2.2580E-02 5.0410E-02 2.3470E-02 2.9120E-02 3.8570E-02 1.2910E-03 4.0340E-03

3.4460E-03 1.7380E-03 3.6750E-02 2.8640E-02 1.4580E-02 6.7140E-02 3.0700E-02

3.8980E-02 3.0430E-02 4.6660E-02 4.9700E-02 2.7610E-02 7.7890E-03 4.9880E-03

6.5580E-03 4.2420E-03 1.7870E-03 8.1460E-03 4.4070E-03 4.8150E-03 5.6930E-03

2.0430E-02 3.4830E-02 2.0370E-02 8.1990E-03 5.3450E-02 3.3510E-02 2.0380E-02

9.8440E-03 5.2730E-02 2.3720E-02 2.5960E-02 2.7980E-02 5.8890E-02 2.3240E-01

2.8520E-01 1.8980E-01 5.1530E-02 2.1950E-01 6.2150E-01 7.5940E-01 7.4050E-02

3.8890E-01 8.9780E-01 3.7230E-03 7.8130E-03 7.2310E-03 5.1130E-03 8.3570E-03

6.0340E-03 1.7000E-03 1.6070E-02 3.8280E-02 2.2300E-02 1.6840E-02 1.0620E-02

5.0390E-02 6.5740E-02 6.3320E-02 1.2340E-03 1.7430E-02 5.6880E-02 9.0020E-02

1.5230E-04 5.9470E-04 5.2810E-04 1.9240E-04 1.9550E-03 4.6510E-03 5.6230E-03

3.6020E-03 3.9540E-03 1.0960E-02 2.2230E-02 1.7820E-02 3.2440E-02 1.6350E-02

1.0730E-02 7.7860E-03 1.2660E-02 4.9970E-02 3.8060E-02 1.4490E-02 1.3990E-02

2.3690E-02 3.9010E-02 4.1350E-02 8.1290E-03 3.4020E-02 3.1790E-02 2.0320E-02

1.5860E-04 8.5570E-04 2.3580E-03 3.5850E-03 1.9090E-02 2.0850E-02 1.3250E-02

1.2930E-02 4.8690E-02 3.5060E-02 1.5120E-02 5.2420E-02 1.8060E-02 9.4580E-03

8.0630E-03 1.6380E-03 3.2950E-03 4.0400E-03 2.7440E-03 2.0970E-03 5.2610E-03

4.7260E-03 3.0700E-03 1.3620E-02 2.9260E-02 1.0110E-02 2.9010E-03 4.5240E-02

2.2180E-02 8.5010E-03 2.2270E-03 2.0770E-02 3.2730E-02 2.2890E-02 1.0530E-02

1.8840E+00 3.7570E-01 5.9280E-02 6.7320E+00 2.4720E+00 5.5430E-01 1.0400E-01

2.0510E+00 8.6450E-01 5.2090E-02 2.8630E-01 1.9350E-01 8.1770E-02 3.2080E-02

8.9030E-02 3.4860E-02 1.2590E-02 5.5480E-02 1.1270E-01 4.2290E-02 7.4820E-03

1.7290E-01 7.5140E-02 2.8890E-02 7.6760E-03 7.7130E-02 4.0150E-02 1.6950E-02

4.3480E-03 7.4810E-02 2.7310E-02 7.7950E-03 1.4820E-03 2.6920E-01 7.8840E-02

1.5950E-02 1.8130E-03 1.9230E-01 4.9440E-02 2.0340E-02 8.7020E-03 1.9680E-01

6.9260E-02 2.0950E-02 5.1420E-03 1.0310E-01 3.6890E-02 1.1010E-02 2.7410E-03

1.8940E-01 6.7360E-02 2.1770E-02 6.4540E-03 6.7660E-02 2.7060E-02 8.4030E-03

1.7380E-03 4.0340E-02 1.7920E-02 5.6700E-03 1.1330E-03 6.1700E-02 2.6960E-02

2.2860E-03 6.8220E-02 3.1700E-02 1.4870E-02 5.1860E-03 4.6660E-02 1.9660E-02

7.7040E-03 2.4730E-03 3.4960E-02 2.0620E-02 9.4940E-03 2.7340E-03 1.9240E-02

8.2780E-03 2.9160E-03 9.9360E-04 1.4740E-02 1.0120E-02 5.0810E-03 1.5810E-03

1.3700E-02 6.6590E-03 3.2320E-03 1.3490E-03 1.5720E-02 6.5010E-03 2.1280E-03

4.6170E-04 1.5610E+00 3.8000E-01 1.8640E+00 2.6170E+00 2.3020E+00 6.3630E-01

1.1390E+00 4.9270E-01 5.9230E-01 1.3250E-01 1.0530E-01 7.6750E-02 7.2040E-02

4.7880E-02 3.9180E-02 1.6120E-02 4.1600E-02 5.8630E-02 3.7630E-02 2.5550E-02

5.0660E-02 7.7060E-02 5.3890E-02 3.2000E-02 2.7270E-02 2.9960E-02 2.7320E-02

1.9380E-02 1.0330E-02 3.7370E-02 2.6360E-02 9.5020E-03 7.8530E-02 1.1480E-01

6.2940E-02 1.7470E-02 4.9380E-02 1.0840E-01 3.4580E-02 1.0370E-02 5.0960E-02

9.0540E-02 5.5350E-02 2.2480E-02 2.0950E-02 5.0390E-02 3.2650E-02 1.2400E-02

4.9840E-02 8.8900E-02 5.3330E-02 2.1770E-02 1.6920E-02 2.9080E-02 2.2620E-02

9.8660E-03 1.0630E-02 1.5830E-02 1.5590E-02 6.7680E-03 3.5340E-02 1.4830E-02

1.8130E-02 3.1700E-02 3.1740E-02 1.6770E-02 9.7850E-03 1.5630E-02 2.0910E-02

1.3400E-02 7.4490E-03 2.0620E-02 1.3250E-02 9.6520E-03 7.2790E-03 5.5400E-03

8.2630E-03 6.7710E-03 3.0270E-03 1.1050E-02 6.2770E-03 3.7220E-03 2.5850E-03

6.6590E-03 6.3560E-03 3.9670E-03 1.7150E-03 5.1450E-03 6.3680E-03 4.7390E-03

2.3560E-03 1.0000E+00 1.6780E-01 1.8350E+00 1.1890E+00 1.7560E+00 4.2820E-01

6.3300E-01 4.2070E-01 4.9240E-02 1.0160E-01 6.6420E-02 5.0570E-02 2.4300E-02

2.7230E-02 1.6570E-02 2.7720E-02 2.4390E-02 3.4260E-02 2.2530E-02 1.2430E-02

3.2960E-02 5.2830E-02 4.4210E-02 5.7600E-03 1.8050E-02 2.1420E-02 2.4050E-02

4.6050E-04 9.8720E-03 2.3130E-02 2.2220E-02 1.5850E-02 6.2870E-02 6.3780E-02

4.0370E-02 2.0320E-02 3.4610E-02 6.1220E-02 1.8870E-02 1.0990E-02 3.8930E-02

5.5100E-02 4.1610E-02 3.1450E-03 1.7650E-02 3.0580E-02 2.6160E-02 1.2200E-02

3.7350E-02 5.3580E-02 3.9490E-02 2.3190E-03 1.4170E-02 1.7150E-02 1.8440E-02

6.0840E-04 9.8400E-03 8.6880E-03 1.3150E-02 1.3830E-02 1.9180E-02 1.2570E-02

1.4860E-02 1.6770E-02 2.0620E-02 7.7330E-03 4.8890E-03 9.9640E-03 1.3710E-02

9.7030E-03 9.4940E-03 9.6460E-03 1.0570E-02 4.1820E-03 1.1200E-03 4.5170E-03

4.7550E-03 5.3560E-03 7.3710E-03 3.2730E-03 3.2070E-03 1.9100E-03 3.2320E-03

3.9660E-03 3.3630E-03 1.9150E-03 1.1550E-03 3.6790E-03 3.9900E-03 3.5820E-03

4.1460E-02 1.3500E-01 1.2560E+00 1.0400E+00 8.6930E-02 4.8260E-01 1.7090E-01

1.6780E-02 3.4390E-02 3.4740E-02 3.3770E-02 1.0070E-02 1.2980E-02 1.0820E-02

1.3860E-02 7.3140E-03 2.1140E-02 1.2120E-02 1.1460E-03 1.2580E-02 2.2650E-02

3.4800E-02 6.8390E-05 6.3180E-03 1.3040E-02 1.5210E-02 7.2020E-05 4.4060E-04

6.9930E-03 2.0370E-02 1.8130E-03 1.7410E-02 4.0340E-02 3.1770E-02 8.7020E-03

1.0360E-02 1.8890E-02 2.9490E-02 1.8920E-03 1.0120E-02 2.5690E-02 3.5390E-02

6.3530E-04 2.6820E-03 1.2030E-02 2.3270E-02 2.8440E-03 1.0100E-02 2.4170E-02

3.4210E-02 1.9710E-04 2.3700E-03 9.8300E-03 1.3650E-02 8.1880E-05 5.6540E-04

6.9150E-03 8.4960E-03 3.1240E-03 1.4700E-02 4.9050E-03 5.1860E-03 9.7840E-03

7.7330E-03 7.2910E-03 1.0810E-03 4.1370E-03 6.2000E-03 7.7260E-03 2.7340E-03

7.2790E-03 4.1820E-03 2.7010E-03 3.2450E-04 7.6210E-04 3.0110E-03 3.7320E-03

3.6850E-03 1.3050E-03 1.9740E-03 9.1570E-04 1.3490E-03 1.7150E-03 1.9150E-03

1.2700E-03 1.3060E-04 1.1740E-03 2.4360E-03 2.4610E-03 2.6040E+00 3.7430E-01

4.7850E-02 7.5360E+00 3.9430E-01 1.9500E-01 3.0160E-01 1.4740E-01 6.1780E-02

2.6960E-02 5.4080E-02 2.5050E-02 5.6460E-03 4.5310E-03 4.1460E-02 8.6550E-03

2.6860E-03 1.0790E-01 4.0780E-02 1.3200E-02 2.5140E-03 6.6520E-02 2.7960E-02

1.1400E-02 2.6250E-03 7.7860E-02 3.2880E-02 1.1170E-02 1.8990E-03 1.4460E-01

4.7800E-02 7.2050E-03 1.0690E-03 1.4770E-01 5.0950E-02 1.1830E-02 1.9130E-03

4.3840E-02 1.8190E-02 7.2230E-03 2.2090E-03 8.1840E-02 3.1360E-02 9.1000E-03

1.8240E-03 2.1400E-01 5.7910E-02 1.5200E-02 2.1140E-03 9.8430E-02 2.9450E-02

7.8830E-03 1.5610E-03 1.7840E-01 6.2110E-02 1.7600E-02 3.4040E-03 9.3410E-02

2.5830E-02 1.4510E-02 4.5240E-02 2.2880E-02 8.4080E-03 1.7970E-03 6.2540E-02

2.2030E-02 6.9710E-03 1.7480E-03 1.6950E-02 7.0340E-03 2.2600E-03 4.3900E-04

2.2530E-02 1.0510E-02 3.8540E-03 1.0380E-03 2.4760E-02 1.9280E-02 6.8960E-03

2.8210E-03 2.1370E-02 1.0620E-02 3.8310E-03 6.4630E-04 2.3910E-02 1.2710E-02

6.2680E-03 2.2970E-03 2.6250E+00 4.2580E-01 2.6900E+00 3.6480E+00 1.5900E-01

1.2100E-01 1.8120E-01 1.1400E-01 4.9360E-02 3.5560E-02 1.8950E-02 1.3710E-02

3.6240E-03 1.9490E-02 1.8420E-02 4.3340E-03 3.4910E-02 5.0790E-02 3.1190E-02

1.4650E-02 2.1880E-02 3.3670E-02 1.8980E-02 1.2500E-02 2.3620E-02 3.6190E-02

2.6430E-02 1.2830E-02 6.0140E-02 5.2300E-02 4.1120E-02 6.9330E-03 6.3350E-02

5.8820E-02 3.6780E-02 1.1170E-02 1.8170E-02 2.0750E-02 1.1690E-02 6.7250E-03

2.6810E-02 3.6590E-02 2.5820E-02 9.9740E-03 5.7880E-02 1.1130E-01 4.5250E-02

1.7030E-02 2.3610E-02 5.1960E-02 2.5680E-02 8.7080E-03 4.4770E-02 8.7950E-02

5.5230E-02 1.9810E-02 4.8480E-02 4.9940E-02 9.2110E-03 2.6090E-02 1.7370E-02

1.1880E-02 7.2680E-03 2.2040E-02 2.9250E-02 1.6410E-02 6.9570E-03 8.3680E-03

6.7000E-03 4.1980E-03 2.0100E-03 9.3140E-03 9.1800E-03 7.6930E-03 4.0080E-03

1.9810E-02 1.1120E-02 8.9770E-03 3.0840E-03 1.2160E-02 7.9820E-03 5.4670E-03

3.5560E-03 1.2710E-02 1.0920E-02 6.9250E-03 5.4540E-03 2.0310E+00 8.5180E-01

2.6050E+00 1.4160E+00 5.8860E-02 8.4240E-02 1.3500E-01 8.4320E-02 1.9920E-02

1.8770E-02 1.2260E-02 2.7190E-03 8.9230E-03 1.4450E-02 8.3140E-03 9.4160E-03

2.5960E-02 3.6130E-02 2.7100E-02 7.3800E-03 1.3450E-02 2.6560E-02 1.7950E-02

5.0780E-03 1.8430E-02 2.6370E-02 2.4410E-02 1.6590E-02 4.9700E-02 2.6270E-02

2.7820E-02 2.1540E-02 4.6220E-02 3.5780E-02 2.4030E-02 7.2200E-03 1.1690E-02

1.4850E-02 9.1330E-03 6.1550E-03 2.1980E-02 2.4140E-02 2.1770E-02 1.5190E-02

4.5230E-02 7.6730E-02 3.6410E-02 5.2280E-03 1.9960E-02 3.5890E-02 2.1440E-02

8.5960E-03 3.8820E-02 6.1320E-02 4.7610E-02 2.8360E-02 3.4750E-02 1.7440E-02

1.2130E-02 1.3940E-02 1.3740E-02 6.9710E-03 6.9710E-03 1.6410E-02 1.9690E-02

1.2910E-02 3.4930E-03 5.1600E-03 4.6970E-03 2.5990E-03 2.8740E-03 6.7700E-03

6.4180E-03 6.6260E-03 1.4860E-02 6.5040E-03 7.0090E-03 3.8880E-03 5.6270E-03

6.4710E-03 6.5020E-03 3.2870E-03 6.2670E-03 6.9240E-03 8.4840E-03 5.2590E-03

2.9000E-01 9.3590E-01 2.0200E+00 2.6470E-02 4.8610E-02 6.8010E-02 5.5560E-02

9.3890E-03 1.6580E-02 7.9140E-03 1.8120E-03 4.0410E-03 7.7700E-03 9.3060E-03

1.2340E-03 1.0270E-02 2.1780E-02 3.2430E-02 8.3140E-04 7.9830E-03 1.2350E-02

2.2400E-02 1.0450E-04 5.8340E-03 1.6050E-02 2.7540E-02 3.3210E-03 1.8750E-02

3.7800E-02 2.0380E-02 5.3830E-03 2.2770E-02 3.4510E-02 2.2270E-02 2.2090E-03

6.7240E-03 9.1260E-03 1.0460E-02 9.6090E-04 6.5050E-03 1.8090E-02 2.4240E-02

2.1140E-03 1.7030E-02 3.6410E-02 6.0120E-02 8.2680E-04 5.5660E-03 1.6130E-02

3.2490E-02 1.0910E-03 9.2310E-03 3.1740E-02 6.1830E-02 1.7180E-02 1.5010E-02

2.1080E-02 4.2020E-03 1.1450E-02 9.7130E-03 5.6930E-03 1.7490E-03 6.9570E-03

1.2920E-02 1.5690E-02 1.0730E-03 3.4430E-03 3.7250E-03 2.3180E-03 6.3250E-04

2.8830E-03 5.5870E-03 5.9050E-03 9.9060E-03 3.6830E-03 4.1800E-03 3.7310E-03

1.7010E-03 5.5820E-03 4.6140E-03 2.7050E-03 2.2970E-03 5.4540E-03 5.2590E-03

4.9740E-03 3.3200E-01 7.6240E-02 1.0340E-01 5.9920E-02 3.3680E-02 1.7880E-02

1.2680E-01 6.9200E-02 1.5960E-02 2.0800E-02 4.4530E-02 1.7310E-02 7.9150E-03

2.6530E-02 1.7670E-02 9.9180E-03 4.3190E-03 1.2280E-02 7.1250E-03 3.7810E-03

1.3920E-03 1.9210E-03 1.5240E-03 1.0240E-03 5.3480E-04 4.7900E-02 2.4080E-02

9.8840E-03 2.9850E-03 6.5970E-02 4.1920E-02 1.7560E-02 4.1220E-03 2.0470E-02

1.6700E-02 1.2180E-02 7.8150E-03 3.5170E-02 2.3980E-02 1.3420E-02 5.6150E-03

1.1000E-01 4.4330E-02 1.6320E-02 6.1120E-03 3.1250E-02 2.1470E-02 1.3530E-02

7.7110E-03 8.8190E-03 4.2420E-03 1.7860E-03 5.6330E-04 1.3100E-01 2.9560E-02

8.6400E-03 9.3120E-02 3.6860E-02 1.3140E-02 4.2040E-03 9.8820E-02 4.8460E-02

2.4500E-02 1.2510E-02 3.1950E-02 1.7670E-02 6.8830E-03 1.4920E-03 8.7410E-03

6.7960E-03 4.4040E-03 2.3670E-03 3.3670E-02 2.4110E-02 1.3450E-02 7.6920E-03

1.2860E-02 1.0530E-02 7.0840E-03 3.4760E-03 1.4440E-02 9.3010E-03 5.4620E-03

2.8500E-03 2.1720E-01 3.7270E-02 4.4900E-02 3.6940E-02 2.4150E-02 6.7690E-02

2.8080E-02 4.5110E-02 1.3870E-02 1.7300E-02 2.2520E-02 6.6540E-03 1.1220E-02

8.3690E-03 9.3060E-03 1.0310E-02 2.8090E-03 4.5620E-03 4.7000E-03 4.1070E-03

1.0380E-03 5.5230E-04 7.1200E-04 1.0030E-03 1.6900E-02 1.6690E-02 1.4470E-02

8.5180E-03 3.4400E-02 1.2900E-02 2.1050E-02 1.7800E-02 1.4090E-02 1.0360E-02

8.1360E-03 5.7860E-03 1.5760E-02 9.9200E-03 1.2050E-02 1.4390E-02 1.2000E-02

5.1460E-02 3.8290E-02 1.6280E-02 1.4180E-02 1.2290E-02 1.1890E-02 1.0940E-02

8.6060E-04 3.6500E-03 3.4940E-03 2.2380E-03 2.9560E-02 6.6330E-02 1.7140E-02

1.9670E-02 4.0460E-02 2.6860E-02 1.0700E-02 2.3250E-02 4.6910E-02 3.5370E-02

1.7800E-02 1.3570E-02 7.3180E-03 9.9240E-03 7.4180E-03 5.1170E-03 2.7840E-03

3.1630E-03 3.8070E-03 2.2450E-02 1.3450E-02 1.3430E-02 3.3400E-03 9.7030E-03

6.0370E-03 4.4020E-03 2.5080E-03 6.4900E-03 5.7280E-03 5.1340E-03 4.0340E-03

1.2770E-02 1.7970E-02 2.1450E-02 1.9350E-02 1.5930E-02 4.4620E-02 1.0130E-02

6.9340E-03 7.9020E-03 6.6540E-03 8.6860E-03 1.1760E-03 6.6170E-03 6.7650E-03

5.0460E-03 1.5240E-04 1.6790E-03 2.8220E-03 3.2810E-03 1.2610E-04 5.8670E-04

5.8250E-04 3.7290E-04 3.0850E-03 1.0130E-02 9.5960E-03 5.4710E-03 3.1060E-03

2.2610E-02 1.3310E-02 3.8020E-03 6.4440E-03 5.8110E-03 4.1840E-03 2.5510E-03

1.2130E-03 9.4810E-03 9.2580E-03 6.0590E-03 3.8120E-03 5.9630E-03 2.1310E-02

2.7510E-02 3.8690E-03 7.3260E-03 7.4500E-03 5.9880E-03 5.7260E-05 5.0900E-04

1.7440E-03 2.7780E-03 8.6390E-03 1.7140E-02 3.0570E-02 4.8330E-03 1.0970E-02

1.8800E-02 1.4300E-02 9.3810E-03 1.0310E-02 1.9440E-02 2.2210E-02 1.0050E-03

9.1450E-03 6.2720E-03 2.4390E-03 1.0100E-03 2.8120E-03 2.3480E-03 1.2610E-03

1.1220E-02 7.6920E-03 3.3400E-03 4.0610E-03 4.5630E-03 3.8110E-03 2.1050E-03

8.0890E-04 1.9560E-03 3.2850E-03 3.1400E-03 2.2990E-03 5.9150E+00 5.7210E-01

1.7700E-01 1.7680E+00 2.5780E-01 4.3810E-02 3.2630E-02 5.7000E-02 2.0070E-02

4.3220E-03 1.1300E+00 1.3450E-01 2.0120E-02 2.8510E-03 1.6920E-01 5.5970E-02

1.5300E-02 2.2520E-03 1.7320E-01 6.2100E-02 1.4720E-02 1.6370E-03 1.4410E-01

3.0600E-02 1.1480E-02 3.6520E-03 2.6390E-01 3.7260E-02 1.1860E-02 2.7890E-03

4.0650E-01 8.0040E-02 1.7850E-02 3.7270E-03 2.9740E-01 6.3360E-02 1.4710E-02

2.4980E-03 8.3960E-01 1.1390E-01 1.3130E-02 2.2620E-03 1.1550E+00 1.6840E-01

2.9200E-02 5.0180E-03 1.5720E-01 6.0740E-02 1.8400E-02 3.1780E-03 3.0030E-02

1.0000E-02 1.5170E-03 4.4720E-02 1.3950E-02 4.0750E-03 1.2030E-03 1.1990E-01

3.9380E-02 1.6610E-02 4.8270E-03 1.2950E+01 4.6380E-01 8.0270E-02 3.2440E-02

2.9470E+01 3.6340E+00 3.4750E-01 4.4390E-02 1.2340E-01 5.6620E-02 2.6750E-02

3.2620E-03 5.2820E+00 1.8810E-01 8.0760E-03 2.9620E-03 1.6770E+01 2.0930E+00

1.0780E-01 7.8810E-03 6.6840E+00 5.3320E-01 7.5170E-01 7.5970E-01 1.4720E-01

2.6110E-02 3.2700E-02 2.1360E-02 1.0850E-02 5.6070E-02 8.2390E-01 1.4730E-01

2.2970E-02 3.9450E-02 7.7710E-02 4.9610E-02 1.7780E-02 4.9960E-02 8.2770E-02

7.6010E-02 1.7300E-02 4.1480E-02 7.7830E-02 1.9020E-02 7.8700E-03 6.2260E-02

1.5520E-01 2.4090E-02 9.8440E-03 7.8700E-02 2.3490E-01 7.0240E-02 1.9030E-02

3.9170E-02 2.0480E-01 6.3650E-02 1.6640E-02 1.1120E-01 5.2740E-01 1.2380E-01

1.4390E-02 7.5390E-02 8.4390E-01 1.7630E-01 3.3040E-02 4.6060E-02 7.3480E-02

5.1080E-02 2.1010E-02 1.6810E-02 1.0570E-02 5.8590E-03 1.7830E-02 2.0480E-02

1.0180E-02 2.8590E-03 3.9270E-02 6.4720E-02 2.5010E-02 1.5550E-02 2.0870E+00

8.3880E+00 4.2470E-01 4.8060E-02 1.4020E+00 2.0770E+01 4.2360E+00 4.0680E-01

9.8740E-02 3.7370E-02 1.5910E-02 1.6190E-02 7.8710E-01 3.3920E+00 2.0050E-01

5.0410E-03 2.0870E+00 1.0530E+01 2.4540E+00 1.3020E-01 5.0220E+00 2.8540E-01

6.0280E-01 3.5530E-01 1.9580E-02 1.6800E-02 1.9600E-02 1.2290E-02 1.0270E-02

5.0390E-02 6.1090E-01 1.1670E-01 7.2650E-03 3.3700E-02 5.4120E-02 4.3100E-02

1.6120E-03 5.1770E-02 5.4340E-02 6.4640E-02 1.6460E-02 3.1510E-02 5.1220E-02

1.1120E-02 1.8860E-02 5.3120E-02 1.0160E-01 1.5020E-02 1.7860E-02 6.9270E-02

1.6010E-01 5.4550E-02 9.2540E-03 3.4290E-02 1.6770E-01 5.3040E-02 1.2730E-02

1.2320E-01 3.6090E-01 9.4630E-02 1.6980E-02 6.9520E-02 6.5090E-01 1.4250E-01

9.4040E-03 3.8190E-02 5.1060E-02 4.5060E-02 8.1350E-03 1.0140E-02 6.6620E-03

6.7170E-03 1.3580E-02 1.2400E-02 6.3010E-03 1.6580E-02 2.5000E-02 4.7620E-02

1.9640E-02 2.4510E-01 2.2900E+00 5.3500E+00 2.8000E-01 1.1560E-01 1.5560E+00

1.5080E+01 3.2960E+00 7.4080E-02 1.9630E-02 1.8820E-02 1.3710E-02 7.6760E-02

9.2630E-01 2.1450E+00 1.3870E-01 1.0600E-01 2.4540E+00 6.9840E+00 1.8580E+00

9.5990E-02 3.1420E-01 4.1810E-01 1.3050E-02 7.4630E-03 1.4700E-02 1.0150E-02

1.3640E-03 1.1200E-02 4.0670E-02 4.7150E-01 1.8070E-04 8.3360E-03 2.7990E-02

6.0460E-02 9.3830E-05 1.8850E-03 4.0630E-02 6.4350E-02 6.8890E-03 1.4000E-02

2.2760E-02 2.9230E-02 6.0270E-03 1.8740E-02 3.9930E-02 6.1590E-02 3.7270E-03

1.9030E-02 5.4290E-02 1.2530E-01 1.1530E-03 1.0320E-02 2.8060E-02 1.4550E-01

2.2270E-03 1.4340E-02 9.4130E-02 2.8050E-01 2.5010E-03 1.8630E-02 5.6230E-02

5.1400E-01 8.0260E-04 1.0510E-02 3.1880E-02 5.2700E-02 3.1940E-03 8.0680E-03

5.3600E-03 2.4120E-03 5.9070E-03 9.6940E-03 7.4700E-03 4.8220E-03 1.5540E-02

1.9630E-02 3.2650E-02 6.2880E-02 2.6730E-01 1.7330E+00 3.3700E+00 2.4570E-02

1.1830E-01 1.1860E+00 1.2010E+01 4.9370E-02 7.7360E-03 1.9610E-02 7.5110E-03

7.1140E-03 9.7290E-02 7.0930E-01 1.3920E+00 7.3360E-03 1.3000E-01 1.8580E+00

5.6000E+00 1.9910E+00 1.7970E-01 5.0590E-01 4.2970E-01 1.9990E-01 1.4570E-02

5.6340E-02 2.7800E-02 1.2570E-02 5.1970E-03 1.4860E-02 8.1400E-03 3.9470E-03

1.5180E-03 1.8470E-02 9.5750E-03 4.3120E-03 1.4500E-03 7.3120E-02 6.2090E-02

4.9820E-02 2.8470E-02 2.3600E-01 7.1740E-02 2.0990E-02 7.1780E-03 6.0800E-02

3.3390E-02 1.6590E-02 7.1820E-03 4.2330E-02 2.2350E-02 1.1470E-02 5.3190E-03

4.9770E-02 2.7220E-02 1.2890E-02 5.0950E-03 6.9750E-02 3.4230E-02 1.4990E-02

5.5990E-03 3.5650E-02 2.0640E-02 1.0350E-02 4.4610E-03 8.0440E-01 3.5220E-01

9.7870E-03 5.3180E-01 1.4530E-01 3.0170E-02 5.7800E-03 7.6680E-02 5.5700E-02

3.2000E-02 1.4350E-02 1.0270E+01 2.6110E+00 4.8710E-01 9.1100E-02 5.5800E-01

2.7720E-01 1.3570E-01 6.8690E-02 5.0900E+00 8.1640E+00 3.5040E+00 9.9450E-02

8.9570E+00 2.1990E+00 3.1720E-01 1.8430E-02 6.1730E-02 2.5770E-02 9.8730E-03

3.5960E-03 1.6290E+00 3.3600E-01 1.9770E-01 6.9380E-02 1.6360E-01 9.6990E-03

2.3400E-02 2.1110E-02 1.3670E-02 3.0320E-03 5.6970E-03 5.6980E-03 4.6520E-03

2.2740E-03 7.2700E-03 7.4870E-03 5.5120E-03 5.7750E-02 5.2360E-02 2.5500E-02

7.1000E-03 2.3030E-02 1.2060E-01 6.5850E-02 1.5620E-02 1.9380E-02 2.3270E-02

2.0870E-02 1.5130E-02 9.1010E-03 1.8450E-02 1.6250E-02 1.0520E-02 1.5300E-02

1.8380E-02 1.6890E-02 1.2730E-02 1.1730E-02 2.8150E-02 2.5850E-02 1.7280E-02

8.5450E-03 1.3370E-02 1.3700E-02 1.1830E-02 3.5140E-01 1.1190E-01 3.1410E-01

3.1200E-02 2.6530E-01 1.4580E-01 3.4020E-02 4.3280E-02 2.2090E-02 2.6020E-02

2.8170E-02 3.3420E-01 5.2370E+00 2.7510E+00 5.3250E-01 9.9080E-02 2.5290E-01

2.1630E-01 1.2470E-01 3.3920E+00 3.4960E+00 1.2410E+00 3.1170E+00 2.0900E-01

4.5070E+00 2.3970E+00 4.7720E-01 8.4110E-03 2.7380E-02 2.1190E-02 1.0350E-02

1.6740E-01 1.4540E-02 1.6270E-01 3.4820E-02 1.6820E-03 5.3690E-03 1.1580E-02

1.5160E-02 1.8300E-04 1.7920E-03 3.2940E-03 4.2560E-03 4.0840E-05 1.2800E-03

3.8080E-03 6.0430E-03 3.9780E-02 1.3930E-02 1.0200E-02 6.6370E-03 9.2120E-03

1.0170E-02 4.8410E-02 4.4790E-02 4.0950E-03 1.0740E-02 1.3110E-02 1.1380E-02

2.3150E-03 4.7610E-03 8.7060E-03 1.1000E-02 1.9440E-03 8.8520E-03 1.0830E-02

9.3710E-03 1.5130E-03 6.8010E-03 1.4500E-02 1.8690E-02 9.8110E-04 4.9160E-03

8.1580E-03 9.5670E-03 9.7770E-03 3.1390E-01 6.4880E-02 6.1260E-03 1.8410E-02

1.1040E-01 1.0290E-01 7.6970E-03 2.4740E-02 1.8600E-02 8.4250E-03 1.1230E-01

1.6410E-01 2.0950E+00 2.0270E+00 3.6160E-02 4.7200E-02 1.1010E-01 1.5320E-01

1.6950E+00 9.9450E-02 3.1050E+00 7.0820E-01 8.5160E-03 1.4630E-01 1.8520E+00

1.8100E+00 1.9730E-03 4.5500E-03 1.2210E-02 1.5000E-02 1.9900E+00 1.3270E+00

6.6340E-01 6.2740E-02 5.2280E-02 4.1830E-02 3.1370E-02 2.5950E-04 2.2240E-04

1.8530E-04 1.4830E-04 9.2700E-04 8.1110E-04 6.9520E-04 5.7940E-04 3.6570E+00

2.7500E+00 1.8370E+00 9.1970E-01 1.0560E-01 7.9210E-02 5.2840E-02 2.6430E-02

4.5320E-03 3.6270E-03 2.7200E-03 1.8130E-03 2.0480E-02 1.7060E-02 1.3650E-02

1.0240E-02 2.0650E-02 1.6520E-02 1.2390E-02 8.2600E-03 1.5220E-02 1.2680E-02

1.0140E-02 7.6100E-03 2.3900E-04 2.0480E-04 1.7070E-04 1.3650E-04 2.9720E-02

1.9810E-02 9.9020E-03 2.7780E-02 2.0860E-02 1.3920E-02 6.9630E-03 1.8460E-02

1.4770E-02 1.1080E-02 7.3880E-03 5.2720E-02 3.9570E-02 2.6380E-02 1.3200E-02

8.2610E-03 6.8840E-03 5.5090E-03 4.1320E-03 2.6750E-02 1.5130E-02 1.0070E-02

5.0400E-03 4.3440E-02 3.2780E-02 2.1860E-02 1.0930E-02 3.2070E-03 2.5660E-03

1.9240E-03 1.2830E-03 2.5950E+00 1.2300E+00 2.8670E-02 2.0450E-02 1.1620E-02

5.2270E-03 5.1340E-02 2.2850E-02 8.5670E-03 2.3660E-03 1.0340E-03 8.5160E-04

5.6830E-04 3.0500E-04 6.4950E+00 4.2130E+00 1.6870E+00 3.4260E-01 8.0790E-02

4.6520E-02 2.0930E-02 6.7590E-03 9.9250E-02 7.9170E-02 6.6120E-02 4.9620E-02

5.7100E-02 4.3260E-02 2.8670E-02 1.6530E-02 3.7030E-02 2.2640E-02 1.2840E-02

6.5240E-03 2.5160E-02 1.1620E-02 4.6500E-03 1.4690E-03 1.5330E-02 6.6520E-03

2.6530E-03 8.9040E-04 3.1330E-02 3.1590E-02 1.9930E-02 5.8040E-02 3.3860E-02

1.6570E-02 6.1940E-03 5.9700E-02 3.1470E-02 1.5220E-02 6.4090E-03 7.3540E-02

4.5750E-02 2.1450E-02 7.0990E-03 7.0870E-03 5.5360E-03 3.0780E-03 1.3060E-03

1.9680E-02 3.3560E-02 3.3390E-02 2.1400E-02 5.8520E-02 4.3200E-02 1.9950E-02

5.4500E-03 3.8180E-02 1.5340E-02 5.7570E-03 2.0680E-03 9.4540E-01 1.3180E-02

5.3190E-03 9.1510E-03 1.1790E-02 2.8430E-03 2.1750E-02 2.0740E-02 1.1550E-02

5.9400E-04 2.9320E-04 3.7130E-04 5.7440E-04 3.4810E+00 1.0300E+00 2.0870E+00

1.9000E+00 3.5890E-02 2.4490E-02 2.5180E-02 1.6880E-02 6.5900E-02 6.8950E-02

4.3090E-02 1.8110E-02 3.1830E-02 2.0890E-02 2.1480E-02 2.2830E-02 1.5100E-02

1.4660E-02 1.2990E-02 9.7790E-03 3.1700E-03 1.0310E-02 9.3310E-03 5.7860E-03

1.1580E-03 5.9670E-03 5.6720E-03 3.4650E-03 3.1520E-02 1.8000E-02 5.6470E-03

2.6310E-02 2.0980E-02 1.8140E-02 1.1020E-02 1.7530E-02 2.2920E-02 2.0580E-02

1.4250E-02 3.7070E-02 2.1340E-02 2.3330E-02 1.6830E-02 3.1940E-03 2.1570E-03

2.4910E-03 3.1110E-03 1.3120E-02 3.3390E-02 1.9970E-02 5.5550E-03 3.8140E-02

8.7750E-03 1.9420E-02 1.8280E-02 4.7390E-03 1.6640E-02 1.2790E-02 6.1000E-03

1.0700E-03 7.7060E-03 7.7550E-03 2.9610E-03 1.2260E-04 1.6930E-03 9.6180E-03

1.6890E-02 6.0470E-05 3.3850E-04 3.2850E-04 1.7200E-04 1.9790E-01 2.4050E+00

1.3330E+00 3.1470E-01 7.2090E-03 2.1110E-02 1.5960E-02 6.8650E-03 4.4950E-02

1.9910E-02 1.6890E-02 1.6240E-02 8.1000E-03 1.6680E-02 1.4560E-02 9.1670E-03

4.3960E-03 7.7180E-03 7.9920E-03 6.2200E-03 2.6460E-04 1.9020E-03 5.0880E-03

7.0470E-03 7.9980E-05 6.8640E-04 2.7630E-03 4.6020E-03 1.9850E-02 5.6450E-03

2.0180E-03 7.2650E-03 1.4070E-02 1.1180E-02 5.6400E-03 3.5580E-03 9.7970E-03

1.2620E-02 1.1440E-02 7.6460E-03 2.1630E-02 1.4370E-02 5.5160E-03 3.9500E-04

1.8600E-03 1.9490E-03 1.2340E-03 6.5590E-03 2.1400E-02 5.5540E-03 2.4980E-03

4.9210E-03 2.4150E-02 1.1550E-02 1.5420E-03 1.1450E-03 2.5190E-03 7.5180E-03

9.1670E-03 1.7650E+00 5.7330E-02 7.1320E-03 2.9630E+00 1.1480E+00 1.2160E-01

6.4910E-03 5.2170E+00 1.3150E+00 1.8270E-01 9.9750E-03 5.6090E-02 1.2430E-02

3.1350E-03 7.4100E-04 2.4990E+00 2.7540E-01 5.4110E-03 8.0680E-04 2.3100E+00

4.7340E-01 4.6650E-02 1.9990E-03 9.1540E-01 4.0750E-01 4.4840E-02 2.0260E-03

4.3880E-01 1.3090E-01 3.5280E-02 6.9040E-03 6.8520E-01 1.8720E-01 4.6730E-02

7.8630E-03 3.0880E-01 1.8480E-01 2.1180E-02 1.6360E-03 3.9000E-02 6.8290E-03

1.7950E-04 1.9360E-01 2.2860E-02 1.6990E-03 9.3970E-05 2.0500E-01 4.0080E-02

3.4740E-03 3.8650E-04 1.8410E-01 2.7540E-02 8.3910E-03 8.1010E-04 8.9630E-02

3.1760E-02 6.3350E-03 1.0310E-03 2.9540E-02 9.9320E-03 5.9030E-03 4.3830E-04

6.9910E-02 8.0450E-03 1.8230E-03 1.4950E-04 1.1340E-01 3.1840E-02 8.2230E-03

1.5010E-03 4.5780E+00 6.6880E-02 8.9210E-01 3.7740E+00 1.3260E+00 1.4440E-01

1.0710E+00 5.1960E+00 2.3250E+00 2.1790E-01 2.0720E-02 2.7820E-02 8.7250E-03

2.5120E-03 6.8620E-01 1.3320E+00 2.8640E-01 4.8030E-03 6.1170E-01 1.2070E+00

4.8940E-01 5.5040E-02 4.0740E-01 9.6770E-01 4.4520E-01 5.3340E-02 1.5170E-01

2.1970E-01 9.9700E-02 3.4740E-02 1.8690E-01 3.7150E-01 1.6280E-01 5.1090E-02

1.5880E-01 3.2010E-01 2.1060E-01 2.4660E-02 1.9240E-02 1.4800E-02 4.2690E-03

5.4390E-02 1.0420E-01 2.1150E-02 1.8080E-03 5.2430E-02 1.0850E-01 4.2810E-02

3.8610E-03 5.6780E-02 1.0350E-01 1.5200E-02 8.4440E-03 3.1750E-02 8.9390E-02

3.0400E-02 6.9480E-03 2.4610E-02 7.9520E-03 2.0620E-03 3.5410E-03 1.9600E-02

3.9500E-02 5.4080E-03 1.8280E-03 3.8640E-02 5.6620E-02 2.5720E-02 8.5180E-03

2.0000E+00 5.1590E-02 1.0380E+00 2.7630E+00 1.0580E+00 1.0740E-02 1.3190E+00

6.3020E+00 1.8380E+00 7.3600E-03 1.7010E-02 1.7820E-02 5.7380E-03 1.3540E-01

7.1500E-01 7.9850E-01 2.0050E-01 1.0180E-01 6.2730E-01 7.7430E-01 3.8130E-01

4.4830E-02 4.4510E-01 6.5390E-01 3.5530E-01 4.7870E-02 1.2270E-01 1.5380E-01

8.1070E-02 4.6590E-02 1.6270E-01 2.7070E-01 1.3970E-01 8.3430E-03 1.8570E-01

2.0570E-01 1.6820E-01 8.1070E-03 1.4150E-02 8.3330E-03 1.1980E-02 5.4500E-02

6.4150E-02 1.4790E-02 8.2780E-03 5.5260E-02 6.9600E-02 3.2960E-02 1.8930E-02

4.6630E-02 7.1190E-02 1.0330E-02 6.3330E-03 3.0400E-02 6.5020E-02 2.5150E-02

1.9690E-02 4.6730E-03 3.2590E-03 2.9420E-03 5.3930E-03 1.7950E-02 2.6230E-02

3.7340E-03 1.1460E-02 3.1720E-02 3.9210E-02 2.0930E-02 1.6420E-03 6.0460E-02

8.1180E-01 2.8100E+00 4.6810E-04 1.2440E-02 1.0140E+00 6.1160E+00 2.4680E-03

7.5740E-03 1.3400E-02 1.2360E-02 1.5540E-02 1.7310E-01 5.7390E-01 6.2450E-01

8.8950E-03 1.2280E-01 5.0780E-01 7.7720E-01 2.0200E-03 5.3330E-02 3.5530E-01

7.1940E-01 1.1730E-02 5.0840E-02 1.0350E-01 1.3740E-01 7.8440E-03 5.1070E-02

1.3970E-01 2.6590E-01 7.7380E-04 9.4050E-03 1.4440E-01 2.7480E-01 2.4860E-03

1.0220E-02 1.0240E-02 1.7430E-03 1.4900E-02 4.3840E-02 4.8620E-02 9.3160E-04

9.8220E-03 4.4280E-02 6.9550E-02 5.0470E-03 2.0960E-02 3.7610E-02 4.6680E-02

1.0310E-03 6.9470E-03 2.5150E-02 6.2000E-02 1.4770E-02 2.0970E-03 4.7970E-03

1.0850E-03 1.1780E-03 6.1970E-03 1.4430E-02 1.7970E-02 2.6500E-03 1.2370E-02

2.6750E-02 3.5630E-02 2.7490E+00 2.4470E-01 7.1660E-03 5.6710E+00 1.0080E+00

1.6220E-01 8.2000E-03 3.5170E-02 8.4240E-03 2.7020E-03 4.7640E-05 5.8580E-02

1.9150E-02 2.2960E-04 6.6190E-06 1.7560E-01 3.2830E-02 2.5810E-03 7.3470E-05

9.9730E-01 3.4200E-01 2.2180E-02 2.1240E-04 1.2770E+00 1.7470E-01 2.9730E-02

3.2930E-03 3.3720E-01 2.5150E-01 2.9900E-02 3.8200E-03 1.0810E+00 4.4730E-01

5.9630E-02 3.5300E-03 1.1790E-02 6.5730E-04 2.5050E-05 6.3160E-02 1.2550E-02

3.5510E-03 3.3830E-05 2.2110E-01 1.3690E-02 1.6460E-03 1.9710E-04 3.4880E-02

1.0360E-02 2.7530E-04 3.8320E-05 2.1070E-01 4.2010E-02 4.7050E-03 2.7780E-04

2.1230E-04 2.3750E-02 3.4760E-03 2.1340E-05 3.4450E-02 1.1080E-02 3.6450E-03

1.9370E-05 3.6320E-01 3.2680E-02 3.4560E-03 5.4880E-05 4.8620E+00 2.8660E-01

7.7930E-01 5.3520E+00 2.1460E+00 2.8870E-01 1.4900E-02 1.8020E-02 3.9800E-03

2.9490E-03 2.9260E-02 1.8010E-02 1.9400E-02 2.4680E-04 5.0080E-02 9.1800E-02

3.4360E-02 2.9990E-03 4.1940E-01 1.1610E+00 3.9580E-01 2.6260E-02 3.0950E-01

7.7070E-01 1.5640E-01 3.1590E-02 2.9700E-01 6.2980E-01 2.6410E-01 3.2910E-02

2.8130E-01 1.2500E+00 4.8240E-01 6.8660E-02 5.2900E-03 5.0880E-03 3.9740E-04

2.4460E-02 3.2810E-02 6.5600E-03 3.9110E-03 3.8020E-02 1.4960E-01 1.3580E-02

1.7750E-03 1.6480E-02 1.2030E-02 1.0310E-02 2.5130E-04 5.1120E-02 1.1810E-01

4.4440E-02 5.3980E-03 1.8200E-04 1.2100E-02 9.1330E-03 2.1390E-03 1.6820E-02

1.6110E-02 4.9310E-03 4.0260E-03 7.2190E-02 2.3220E-01 3.2530E-02 4.0740E-03

3.8070E+00 1.1730E-01 1.7840E+00 6.9080E+00 2.7130E+00 6.3910E-03 1.0300E-02

1.3490E-02 2.9380E-03 8.9160E-03 2.5380E-02 7.6170E-03 1.3690E-02 9.7290E-03

5.1480E-02 6.1040E-02 2.6810E-02 4.8280E-02 4.7960E-01 8.4360E-01 3.1160E-01

7.0280E-02 3.0540E-01 5.5520E-01 1.2680E-01 4.9490E-02 3.1040E-01 4.4090E-01

2.1400E-01 5.9390E-02 4.7850E-01 9.4230E-01 3.9790E-01 1.9850E-03 4.7050E-03

2.2180E-03 9.4940E-03 1.8560E-02 2.3670E-02 4.8270E-03 5.7520E-03 4.2510E-02

1.1020E-01 1.0690E-02 5.0660E-03 1.4450E-02 5.7100E-03 7.2580E-03 8.0320E-03

5.4920E-02 8.5590E-02 3.6000E-02 1.5160E-04 5.3040E-03 9.1510E-03 5.0190E-03

8.0970E-03 9.9760E-03 1.3320E-02 3.6540E-03 1.2100E-02 7.7930E-02 1.6820E-01

2.5790E-02 1.0670E-03 1.3620E-01 2.2910E+00 7.7400E+00 1.8080E-03 7.1400E-03

9.0110E-03 8.6840E-03 1.4180E-03 1.1040E-02 2.1600E-02 1.0500E-02 1.0130E-03

1.1650E-02 4.2630E-02 6.3350E-02 2.3120E-03 5.7830E-02 3.8800E-01 9.0580E-01

1.2070E-02 8.0380E-02 2.5480E-01 5.0320E-01 6.3910E-03 5.6240E-02 2.5670E-01

4.9930E-01 3.5300E-03 6.8490E-02 3.9590E-01 1.0430E+00 5.9650E-04 2.7000E-03

3.8930E-03 2.4530E-03 1.0840E-02 1.5940E-02 1.6070E-02 7.4750E-04 6.7740E-03

3.3860E-02 9.2800E-02 9.0260E-04 6.1820E-03 1.2240E-02 6.7410E-03 6.8070E-04

9.3470E-03 4.4540E-02 9.2350E-02 1.2130E-04 1.6890E-03 6.8010E-03 7.0880E-03

2.3160E-03 9.0190E-03 8.9810E-03 7.6730E-03 1.2070E-03 1.4520E-02 6.3430E-02

1.4880E-01 1.0610E+00 3.4650E-02 1.0290E-03 1.6780E-01 2.8780E-02 1.0630E-04

1.6620E-05 1.3130E-02 9.1390E-04 2.4310E-05 1.6510E-06 2.9290E-02 7.5110E-03

4.7670E-04 9.7980E-06 1.8640E+00 1.8520E-01 2.7650E-03 3.1220E-05 1.0500E-01

2.3570E-02 3.2570E-03 3.6380E-05 3.4270E-01 1.0370E-01 1.0200E-02 8.2620E-04

1.0580E+00 2.2000E-01 5.6600E-02 3.7810E-03 4.8610E-04 1.5910E-04 2.3170E-05

1.5730E-02 2.3970E-03 1.8050E-04 3.3390E-05 8.7060E-02 1.4130E-02 2.2030E-03

1.4110E-04 3.3210E-02 6.4330E-03 2.4570E-04 4.5770E-05 4.5140E-01 5.8160E-02

6.2020E-03 2.4000E-04 1.1280E-03 7.0490E-04 3.8730E-04 8.5550E-05 3.1390E-02

3.5170E-03 1.2080E-04 1.7570E-06 3.5290E-02 9.9130E-03 1.3160E-03 3.1810E-05

2.2440E+00 6.5550E-02 6.6110E-02 7.6960E-02 2.9560E-02 9.4410E-05 4.0950E-03

7.1900E-03 8.9360E-04 2.4430E-05 1.1110E-02 1.3030E-02 7.9320E-03 5.4750E-04

3.1230E-01 1.8860E+00 2.2630E-01 3.1730E-03 3.6850E-02 5.3370E-02 2.1370E-02

3.7670E-03 1.0200E-01 4.4650E-01 1.1300E-01 1.1430E-02 2.6240E-01 1.3660E+00

3.9790E-01 6.3830E-02 3.1910E-04 1.9250E-04 8.8850E-05 5.9600E-03 7.6810E-03

2.1740E-03 1.5220E-04 2.5570E-02 5.0220E-02 1.2360E-02 2.4460E-03 1.3870E-02

1.4570E-02 6.1850E-03 2.0880E-04 1.1480E-01 4.9320E-01 5.9740E-02 7.1500E-03

9.8750E-04 5.6220E-04 2.6170E-04 2.0620E-04 1.1300E-02 1.6230E-02 3.3830E-03

1.2980E-04 1.4170E-02 1.5900E-02 9.1370E-03 1.5230E-03 2.5270E+00 1.9050E-02

6.2820E-02 4.5160E-02 2.0950E-02 9.8560E-04 4.2870E-03 4.5840E-03 6.3500E-04

2.5630E-03 1.1040E-02 8.1570E-03 6.1980E-03 4.0050E-02 6.1900E-01 2.3670E+00

1.7380E-01 9.9190E-03 3.3820E-02 3.7420E-02 1.7790E-02 2.5150E-02 1.6860E-01

3.3950E-01 9.0400E-02 7.6010E-02 4.6670E-01 1.0660E+00 3.3440E-01 1.8580E-04

1.9370E-04 1.2090E-04 1.8090E-03 5.5720E-03 4.7500E-03 1.5360E-03 6.6130E-03

2.4370E-02 3.6540E-02 1.0240E-02 4.3090E-03 1.2690E-02 8.5570E-03 4.3710E-03

1.5710E-02 1.2810E-01 3.8590E-01 4.9610E-02 8.4650E-04 3.9870E-04 2.8190E-04

2.0240E-04 2.9220E-03 1.1210E-02 1.0210E-02 2.4100E-03 4.0180E-03 1.2800E-02

1.0670E-02 7.4740E-03 3.1160E-03 2.3620E-02 5.3420E-02 4.3200E-02 1.4580E-04

1.2240E-03 3.5400E-03 3.8430E-03 3.0950E-04 3.0370E-03 9.4000E-03 1.0550E-02

1.8910E-03 4.9170E-02 4.8910E-01 2.1450E+00 1.4030E-03 1.1580E-02 2.9840E-02

3.9550E-02 2.6890E-03 2.9060E-02 1.3990E-01 3.5010E-01 6.8060E-03 8.6200E-02

3.9570E-01 1.1340E+00 9.7770E-05 1.9300E-04 1.3780E-04 3.9560E-04 2.1580E-03

4.7090E-03 4.1820E-03 1.0640E-03 7.6420E-03 2.0940E-02 3.5080E-02 8.5590E-04

5.2090E-03 1.0830E-02 8.2160E-03 1.3310E-03 1.8320E-02 1.0460E-01 3.6080E-01

7.0550E-04 2.4760E-04 3.4470E-04 1.4350E-04 4.8250E-04 3.6240E-03 9.4190E-03

8.7710E-03 6.0010E-04 4.6730E-03 1.1280E-02 1.2570E-02 3.5580E+00 5.3190E-01

3.4140E-02 1.2460E-01 5.2780E-02 3.2770E-02 1.6540E-02 8.4760E-02 5.7080E-02

3.1680E-02 1.6880E-02 7.8400E-02 3.6460E-02 1.3310E-02 3.3010E-03 4.6550E-02

2.6320E-02 1.1480E-02 3.3160E-03 4.5520E-02 2.4440E-02 1.1380E-02 3.7400E-03

8.3880E-02 3.1740E-02 8.6160E-03 1.3690E-03 9.1020E-02 5.8920E-02 9.7700E-03

3.1310E-02 1.8140E-02 8.7930E-03 3.4020E-03 8.6030E-02 3.9580E-02 1.2530E-02

3.5080E-03 5.9460E-02 3.0650E-02 1.3010E-02 5.7010E-03 5.1480E-02 1.7250E-02

6.0100E-03 2.6000E-03 9.6880E-02 1.0310E-01 6.7860E-02 4.1170E-03 5.3240E-02

2.7040E-02 9.4420E-03 2.7630E-03 3.8690E-02 1.7170E-02 5.5470E-03 1.0860E-03

3.1770E+00 6.3430E-01 5.2780E-02 7.9740E-02 2.9930E-02 1.1990E-02 5.1740E-02

3.4240E-02 3.5890E-02 2.1550E-02 2.6170E-02 3.0750E-02 2.7110E-02 1.5010E-02

2.3790E-02 1.5760E-02 1.4990E-02 1.1590E-02 1.9490E-02 1.4810E-02 1.4740E-02

1.1800E-02 1.5620E-02 3.7900E-02 3.0010E-02 1.0700E-02 6.6730E-02 1.7260E-02

3.5590E-02 1.8120E-02 1.3000E-02 1.0000E-02 5.1570E-03 3.2420E-02 3.0400E-02

3.0960E-02 1.2890E-02 3.0610E-02 2.3340E-02 2.0800E-02 7.0200E-03 9.3350E-03

2.7240E-02 1.5710E-02 5.6260E-03 7.2640E-02 7.6580E-02 8.0110E-03 4.6540E-02

2.7040E-02 1.7410E-02 1.7710E-02 7.2110E-03 1.4130E-02 1.2840E-02 1.3010E-02

6.2580E-03 2.1190E+00 3.2770E-02 2.9930E-02 4.0120E-02 1.0980E-02 2.3540E-02

3.2930E-02 1.7450E-02 2.1680E-02 4.9550E-03 1.9120E-02 1.9390E-02 2.2270E-02

7.5000E-03 1.3220E-02 1.2060E-02 1.0890E-02 5.6590E-03 1.1820E-02 1.1000E-02

1.1970E-02 3.8550E-04 1.5620E-02 2.1740E-02 2.5070E-02 3.2250E-02 3.0150E-02

1.7670E-02 8.7890E-03 9.9920E-03 7.2750E-03 4.6180E-03 6.3840E-03 2.6320E-02

1.4900E-02 2.2960E-02 1.3000E-02 2.0800E-02 9.9650E-03 1.0720E-02 2.7200E-03

6.9130E-03 1.7300E-02 1.1690E-02 4.8410E-02 3.2300E-02 3.4260E-02 2.0950E-02

9.4420E-03 1.7710E-02 9.0370E-03 9.9560E-03 2.8250E-03 1.0950E-02 7.5740E-03

9.5030E-03 1.6540E-02 1.1990E-02 1.0980E-02 1.6530E-02 9.8750E-03 1.2440E-02

1.7490E-02 7.6350E-03 4.8070E-04 4.9770E-03 1.3210E-02 1.4210E-02 1.2410E-03

7.3430E-03 8.2290E-03 5.2840E-03 8.9270E-04 5.2180E-03 7.8780E-03 6.1940E-03

3.5290E-05 3.8110E-04 1.1020E-02 1.9970E-02 9.7550E-03 2.6680E-02 3.0840E-03

3.4020E-03 5.1530E-03 4.6160E-03 2.2060E-03 1.5470E-03 5.2030E-03 1.7310E-02

1.1210E-02 5.7010E-03 6.9910E-03 1.0710E-02 3.8850E-03 9.6750E-04 1.2930E-03

4.0260E-03 1.1630E-02 2.4210E-02 6.8480E-03 3.5600E-02 1.2440E-03 2.7630E-03

7.2100E-03 9.9560E-03 3.1560E-03 2.8220E-04 2.9380E-03 7.2660E-03 4.9210E-03

1.2650E+00 6.9650E-02 7.3640E-03 4.4420E+00 1.4770E+00 3.1190E-01 3.4260E-02

8.9240E+00 2.0090E+00 3.2720E-01 3.1360E-02 1.3760E-01 5.3250E-02 2.0690E-02

5.4240E-03 1.6640E-01 5.8340E-02 1.8130E-02 4.2710E-03 3.8810E-02 1.7530E-02

7.9620E-03 2.2830E-03 3.2750E-01 1.2740E-01 2.2150E-02 6.3090E-01 2.9000E-01

8.2860E-02 1.2800E-02 4.6760E-01 1.4370E-01 3.1180E-02 5.4330E-03 1.4940E-01

7.1810E-02 2.2920E-02 7.0400E-03 3.3980E-02 1.5310E-02 6.1010E-03 2.2370E-03

1.8490E-02 1.8850E-02 1.3520E-02 7.6380E-03 5.8790E-02 3.4830E-02 1.7260E-02

6.2310E-03 6.4520E-02 3.3750E-02 1.4170E-02 5.1950E-03 1.4030E+00 7.7760E-02

1.0610E+00 1.8910E+00 1.3640E+00 3.9080E-01 4.8170E-01 5.2810E+00 2.2460E+00

4.2770E-01 4.1080E-02 6.5260E-02 3.3680E-02 2.1670E-02 2.6400E-02 1.0460E-01

6.1980E-02 2.1480E-02 1.0210E-02 1.9790E-02 1.0740E-02 8.8620E-03 1.7400E-01

1.0560E-01 7.6870E-02 2.8850E-01 1.9870E-01 1.9030E-01 8.4490E-02 9.8090E-02

2.1700E-01 1.3510E-01 3.6250E-02 7.1770E-02 4.8270E-02 5.1410E-02 1.6890E-02

1.1230E-02 1.5150E-02 1.2150E-02 6.2900E-03 1.3870E-02 1.4750E-02 1.0070E-02

4.6000E-03 3.4820E-02 2.4290E-02 1.7750E-02 1.0860E-02 2.8860E-02 2.4200E-02

2.2410E-02 1.2910E-02 9.8170E-01 8.8790E-02 1.0110E+00 9.8400E-01 1.0540E+00

3.0210E-03 5.0940E-01 3.3210E+00 1.7890E+00 1.3230E-02 2.2120E-02 4.6720E-02

2.4920E-02 5.5070E-03 2.1680E-02 7.9230E-02 3.4970E-02 3.6970E-03 3.8670E-03

1.5980E-02 9.5630E-03 7.3240E-02 1.0010E-01 6.5420E-02 8.2540E-02 1.8980E-01

1.2370E-01 1.1230E-01 1.0210E-02 9.3350E-02 1.1620E-01 1.0320E-01 2.2910E-02

5.1390E-02 2.0230E-02 3.0140E-02 2.7210E-03 7.4030E-03 9.8900E-03 9.7250E-03

9.2460E-03 1.1300E-02 6.5000E-03 2.8870E-03 1.7260E-02 1.7740E-02 1.5610E-02

7.7410E-03 9.1110E-03 1.9200E-02 1.4140E-02 1.5810E-02 2.5890E-03 1.0220E-01

7.0040E-01 7.6610E-01 2.7920E-04 3.0710E-03 3.5720E-01 2.4470E+00 1.7930E-03

1.3000E-02 1.4390E-02 2.4940E-02 4.2570E-04 5.4130E-03 1.5050E-02 3.8990E-02

9.8790E-06 4.0980E-03 2.9590E-03 9.3770E-03 2.1800E-02 6.3190E-02 3.3380E-02

1.2800E-02 8.4250E-02 1.1210E-01 4.4850E-02 1.8010E-03 9.3570E-03 6.3960E-02

8.7130E-02 7.0400E-03 1.6880E-02 3.0160E-02 8.1080E-03 5.9750E-04 2.2920E-03

4.9110E-03 6.8400E-03 4.6230E-03 5.6630E-03 2.9670E-03 1.3950E-03 6.2310E-03

1.0770E-02 7.7400E-03 4.3910E-03 2.6300E-03 6.8850E-03 1.1770E-02 7.8500E-03

3.2410E+00 2.9450E-01 1.6250E-02 8.0080E+00 2.0800E+00 3.2080E-01 2.2740E-02

4.8000E-01 1.5280E-01 3.1880E-02 5.4550E-03 7.7550E-01 2.5100E-01 5.4660E-02

7.0320E-03 4.1030E-01 1.1730E-01 1.8670E-02 1.4730E-03 4.0910E-01 2.0610E-02

3.2430E-03 6.0610E-01 1.2210E-01 1.4510E-02 7.9550E-04 7.3620E-01 2.4930E-01

5.7330E-02 6.2350E-03 1.3820E-01 4.7000E-02 9.3240E-03 3.0390E-03 8.2850E-02

3.4890E-02 1.3150E-02 3.6800E-03 2.5170E-02 5.9390E-02 1.1770E-02 7.5560E-03

6.1990E-02 2.7970E-02 1.1200E-02 2.3680E-03 9.1570E-02 3.2550E-02 7.6490E-03

1.2790E-03 3.5570E+00 3.5910E-01 1.5980E+00 4.1910E+00 2.1890E+00 3.9270E-01

1.5200E-01 2.1310E-01 1.3810E-01 3.4550E-02 2.0200E-01 3.8020E-01 2.4250E-01

6.4600E-02 7.4430E-02 2.2190E-01 1.2770E-01 2.2710E-02 1.4580E-01 1.8860E-01

1.1960E-02 1.8100E-01 2.9020E-01 1.0780E-01 1.6010E-02 2.4800E-01 3.2030E-01

2.0520E-01 6.7350E-02 5.8480E-02 5.1230E-02 4.0840E-02 6.4400E-03 3.0420E-02

3.8630E-02 2.5490E-02 1.3430E-02 2.0140E-02 2.7540E-02 3.1690E-02 3.8150E-03

3.2980E-02 2.6670E-02 1.4000E-02 9.6900E-03 3.3620E-02 3.5930E-02 2.7530E-02

8.3600E-03 2.7280E+00 1.2940E-01 1.7080E+00 2.6820E+00 1.7630E+00 3.1770E-02

1.3750E-01 1.2750E-01 1.0810E-01 2.9240E-02 1.9380E-01 2.4880E-01 2.0330E-01

1.8500E-03 8.4450E-02 1.4470E-01 1.0380E-01 4.1890E-02 1.3940E-01 7.8580E-02

4.0680E-02 1.6350E-01 1.6630E-01 7.3890E-02 5.7150E-02 2.0430E-01 2.0400E-01

1.6490E-01 1.8280E-02 4.9150E-02 2.4420E-02 2.6680E-02 9.8360E-03 2.1680E-02

2.7640E-02 2.1820E-02 1.5100E-02 1.4610E-02 2.1800E-02 1.0920E-02 1.6070E-02

1.7610E-02 2.0840E-02 7.9940E-03 7.6440E-03 2.7510E-02 2.1380E-02 2.1740E-02

2.3180E-03 1.5580E-01 1.3220E+00 2.7090E+00 5.4550E-03 3.4470E-02 1.0780E-01

1.2140E-01 2.5060E-03 3.4470E-02 1.5650E-01 2.5990E-01 9.4560E-05 2.1110E-03

6.4300E-02 1.5720E-01 9.4360E-03 5.5530E-02 1.0820E-01 5.4990E-03 4.9340E-02

1.2570E-01 1.1710E-01 6.2360E-03 6.7220E-02 1.6430E-01 1.8310E-01 5.9120E-03

1.7830E-02 3.6130E-02 1.8780E-02 2.2480E-03 9.7630E-03 1.7860E-02 2.4140E-02

1.0070E-02 8.8570E-03 8.2570E-03 1.4430E-02 5.5300E-03 1.4910E-02 1.2130E-02

9.1960E-03 1.2780E-03 8.3570E-03 2.1740E-02 2.0830E-02 3.0070E+00 1.1460E-01

4.8260E-03 5.0470E-01 1.2140E-01 2.5460E-02 5.3170E-03 3.3590E-01 8.7830E-02

1.3240E-02 6.0500E-04 2.5700E-01 7.9360E-02 1.9450E-02 2.5630E-03 2.2040E-02

8.6630E-03 1.1100E-03 7.3280E-01 5.6070E-02 1.0830E-02 1.9800E-03 4.9930E-01

1.0280E-01 1.1670E-02 1.3780E-03 6.5690E-02 1.6690E-02 2.4820E-03 7.3880E-04

2.5080E-01 6.0110E-02 9.7610E-03 1.8420E-03 4.5170E-02 3.0970E-02 1.5930E-02

3.4710E-03 8.6540E-02 2.0540E-02 6.6720E-03 5.5270E-04 1.5760E-01 4.6150E-02

1.1340E-02 1.4290E-03 3.7090E+00 1.3710E-01 1.5070E-01 2.6490E-01 1.0670E-01

2.5980E-02 8.7590E-02 1.7170E-01 9.0810E-02 1.5720E-02 6.9160E-02 1.3630E-01

7.2210E-02 2.2000E-02 1.4070E-02 7.0760E-03 5.0320E-03 1.8200E-01 4.3210E-01

4.5130E-02 9.5610E-03 1.3250E-01 2.6280E-01 1.0460E-01 1.2910E-02 2.6290E-02

2.8570E-02 1.4740E-02 1.7840E-03 5.9950E-02 1.4280E-01 6.1170E-02 1.0450E-02

3.7640E-02 2.2560E-02 1.0810E-02 8.6120E-03 3.4200E-02 4.4690E-02 1.0440E-02

6.8390E-03 5.4960E-02 7.6980E-02 3.6060E-02 1.2420E-02 2.8420E+00 3.9430E-02

1.3570E-01 1.7920E-01 8.4700E-02 1.3210E-02 9.0530E-02 1.1630E-01 7.4620E-02

1.4430E-02 6.2420E-02 9.9260E-02 6.3200E-02 7.8630E-03 7.7020E-03 5.3720E-03

4.1010E-02 1.8520E-01 2.7810E-01 3.0680E-02 2.3360E-02 1.3450E-01 1.7110E-01

8.0180E-02 8.3400E-03 2.2860E-02 1.5930E-02 9.9750E-03 9.7450E-03 6.1050E-02

1.0640E-01 4.9490E-02 3.0110E-02 1.4270E-02 1.1410E-02 7.8840E-03 1.3740E-02

2.3170E-02 3.2480E-02 7.1040E-03 1.6530E-02 4.4170E-02 5.3940E-02 2.9890E-02

8.9500E-03 4.2440E-02 1.1170E-01 1.6610E-01 6.0440E-04 1.5710E-02 7.4450E-02

1.3010E-01 1.3990E-03 1.6210E-02 5.3850E-02 1.0800E-01 3.5460E-03 7.9630E-03

4.1940E-03 8.9440E-03 4.7670E-02 1.4720E-01 1.9810E-01 3.0580E-03 2.7480E-02

1.0880E-01 1.6810E-01 2.4180E-03 8.9850E-03 1.8220E-02 1.3190E-02 1.8380E-03

1.0440E-02 4.9420E-02 1.1130E-01 2.2580E-02 7.7380E-03 1.2240E-02 5.2190E-03

3.8700E-03 1.4680E-02 1.8920E-02 1.9820E-02 2.9720E-03 1.8490E-02 3.7890E-02

4.9000E-02 1.8930E+00 6.4640E-02 3.6740E-03 5.9150E+00 1.4450E+00 1.9920E-01

1.2360E-02 1.1690E+01 2.0880E+00 2.4520E-01 1.4360E-02 4.5380E-01 5.6820E-02

1.9540E-02 5.7040E-01 1.8600E-01 3.0790E-02 8.0990E-03 6.1910E-01 1.4040E-01

2.3050E-02 3.2480E-03 1.8450E-01 5.8050E-02 8.1470E-03 2.2980E-03 7.6860E-02

2.5490E-02 7.3350E-03 1.4980E-03 1.9760E-02 2.8030E-02 1.0350E-02 4.5800E-03

4.5250E-02 2.1360E-02 6.9930E-03 1.1610E-03 9.5260E-02 2.7930E-02 7.4470E-03

1.3710E-03 2.3010E+00 7.8700E-02 1.0840E+00 3.1760E+00 1.5650E+00 2.4480E-01

8.1130E-01 7.6880E+00 2.4580E+00 3.0290E-01 1.8690E-01 2.1390E-01 2.7290E-02

2.3350E-01 2.1710E-01 1.6330E-01 2.3330E-02 1.4020E-01 3.1980E-01 1.3680E-01

2.5530E-02 7.4740E-02 6.9470E-02 5.2540E-02 6.3500E-03 1.7680E-02 4.4900E-02

2.2550E-02 8.1150E-03 1.5810E-02 1.6430E-02 1.3700E-02 4.2650E-03 2.4700E-02

1.6640E-02 1.1890E-02 6.5240E-03 2.7910E-02 4.7350E-02 2.2230E-02 7.9770E-03

1.7330E+00 6.7250E-02 1.1980E+00 2.0250E+00 1.2500E+00 5.5110E-03 9.5900E-01

5.5250E+00 1.9540E+00 7.3150E-02 1.5770E-01 8.7850E-02 6.6810E-02 1.9850E-01

1.0190E-01 1.0870E-01 2.3040E-02 1.3670E-01 2.0140E-01 1.0590E-01 2.0550E-02

6.4200E-02 3.1520E-02 3.5140E-02 4.3220E-03 1.6600E-02 3.1020E-02 1.9220E-02

1.1860E-02 9.9730E-03 1.0360E-02 5.5470E-03 1.0720E-02 1.4010E-02 1.2790E-02

7.3330E-03 7.4470E-03 2.2230E-02 3.1440E-02 1.7650E-02 1.0070E-03 8.1120E-02

9.1900E-01 2.0360E+00 4.8290E-04 6.1030E-03 7.2300E-01 4.9280E+00 2.9650E-02

6.9690E-02 1.1230E-01 1.7930E-02 6.9640E-02 1.4850E-01 8.2700E-02 3.2480E-03

2.5520E-02 1.0590E-01 1.7980E-01 5.0170E-03 2.0840E-02 4.8150E-02 2.6700E-02

7.9420E-04 4.8990E-03 1.4800E-02 2.8650E-02 7.9060E-03 5.7480E-03 5.8430E-03

5.4640E-03 3.1200E-03 1.0800E-02 1.0130E-02 5.7840E-03 1.3710E-03 7.9770E-03

1.7650E-02 2.5800E-02 3.7250E+00 2.5280E-01 1.2130E-02 6.9210E+00 1.6520E+00

3.0970E-01 1.4200E-02 7.8560E-02 4.4390E-02 1.2370E-02 2.6380E-01 1.8380E-02

4.2010E-03 7.1400E-04 7.2010E-01 1.6840E-01 3.6840E-02 7.9150E-03 1.0900E-01

1.4900E-02 4.0250E-03 7.3570E-04 2.5650E-01 6.5070E-02 1.1070E-02 1.6040E-03

6.2010E-03 2.9220E-02 6.2910E-03 4.0870E-04 1.0070E-01 2.3050E-02 8.1090E-03

1.3460E-03 1.8870E-01 6.2060E-02 4.8050E-03 3.7770E-04 4.3810E+00 3.0310E-01

1.2990E+00 7.4480E+00 3.0280E+00 3.6920E-01 5.9880E-02 2.9890E-02 2.2820E-02

6.2210E-02 1.5910E-01 1.3280E-02 3.7870E-03 2.1010E-01 3.8610E-01 1.4530E-01

3.7380E-02 3.2520E-02 6.0800E-02 9.9300E-03 3.4800E-03 6.5110E-02 1.3820E-01

6.2900E-02 1.2400E-02 5.1660E-03 1.5310E-02 1.0870E-02 3.8110E-03 3.9010E-02

5.2870E-02 1.2200E-02 7.3360E-03 7.9430E-02 1.4380E-01 6.7210E-02 5.4850E-03

3.4110E+00 1.4290E-01 2.4620E+00 5.3550E+00 2.4340E+00 4.0420E-02 3.0000E-02

1.9750E-02 1.4130E-02 6.3460E-02 1.0370E-01 8.9920E-03 5.6040E-02 1.8740E-01

2.6470E-01 1.1560E-01 1.0030E-02 2.9020E-02 3.9740E-02 6.6230E-03 1.1020E-02

6.2840E-02 9.6840E-02 5.2110E-02 4.1330E-03 6.9690E-03 1.0580E-02 6.4330E-03

1.5750E-02 2.7620E-02 3.7610E-02 7.9420E-03 1.2190E-02 8.3960E-02 8.8770E-02

5.1660E-02 3.6650E-04 1.7000E-01 1.9370E+00 5.6910E+00 2.4030E-02 3.0900E-02

1.2630E-02 3.1900E-03 1.6340E-02 5.0420E-02 7.2710E-02 1.3120E-02 5.9920E-02

1.5450E-01 2.3980E-01 2.9250E-03 1.0720E-02 2.3080E-02 2.7440E-02 1.6000E-03

1.2390E-02 5.2070E-02 1.0070E-01 3.0990E-03 2.4520E-03 8.2210E-03 7.3010E-03

5.3470E-03 1.6080E-02 2.2020E-02 2.3070E-02 1.1570E-03 1.4620E-02 6.7320E-02

9.4860E-02 1.4710E+00 1.1150E-01 4.4400E-03 1.6530E-02 2.0090E-03 1.0540E-04

7.1520E-02 2.4630E-02 7.7440E-03 1.7280E-04 1.9590E+00 1.4780E-01 2.0260E-02

2.6260E-03 3.2370E-02 8.1040E-03 1.1990E-03 1.5650E-04 5.1500E-01 9.0180E-02

1.0490E-02 9.8540E-04 3.9950E-04 2.4520E-02 3.5890E-03 1.2950E-04 3.7730E-02

8.0120E-03 6.5200E-04 5.1860E-05 2.7140E-01 2.2780E-02 4.0590E-03 2.4690E-04

2.9030E+00 1.2980E-01 8.1600E-03 6.6290E-03 1.2040E-03 3.6670E-02 3.3660E-02

1.1920E-02 8.3910E-03 3.6230E-01 1.3010E+00 1.3970E-01 2.1720E-02 1.4020E-02

1.4160E-02 6.6040E-03 1.1160E-03 1.1030E-01 2.9840E-01 9.6010E-02 1.2070E-02

3.4240E-04 1.2550E-02 9.4760E-03 2.1830E-03 1.5450E-02 1.6420E-02 7.2200E-03

6.4310E-04 5.0820E-02 1.6580E-01 1.9880E-02 4.5840E-03 3.4670E+00 3.5010E-03

6.4700E-03 3.3680E-03 1.7510E-02 2.1910E-02 2.6120E-02 8.7790E-03 6.1780E-02

3.9290E-01 9.5480E-01 1.1140E-01 4.9040E-03 1.1610E-02 8.7470E-03 4.6320E-03

1.7390E-02 1.1750E-01 2.1940E-01 7.7360E-02 2.8540E-04 5.5680E-03 9.4700E-03

5.1850E-03 4.7710E-03 1.3650E-02 9.6510E-03 5.0900E-03 1.0050E-02 5.2020E-02

1.2250E-01 1.6370E-02 1.1370E-03 4.4310E-03 5.0870E-03 5.1350E-03 1.9370E-02

1.9600E-02 1.5360E-02 9.0650E-03 7.1950E-02 3.2100E-01 8.1590E-01 1.2750E-03

5.6430E-03 9.7770E-03 7.2590E-03 1.9140E-03 2.0070E-02 9.6920E-02 2.2720E-01

2.2830E-04 1.8000E-03 7.0330E-03 7.3030E-03 9.7750E-04 5.7220E-03 1.1480E-02

8.5970E-03 1.3970E-03 1.1750E-02 4.2980E-02 1.0670E-01 6.5910E-01 4.4840E-02

2.4240E+00 1.1600E+00 3.9280E-01 6.8630E-02 7.6760E+00 2.6990E+00 7.3210E-01

1.3000E-01 5.3230E-02 2.9950E-02 1.4510E-02 5.6110E-03 2.1000E-02 1.5230E-02

9.1310E-03 4.3340E-03 3.4060E-02 1.0730E-01 8.9710E-02 5.4730E-02 9.1070E-02

5.4400E-02 3.0820E-02 1.4020E-02 4.1050E-02 2.5930E-02 1.7430E-02 1.1390E-02

5.5710E-01 7.8080E-01 7.2100E-01 7.2510E-01 4.7200E-01 3.2570E-01 3.5330E+00

2.6190E+00 1.0390E+00 2.2590E-02 2.0400E-02 1.6450E-02 9.2280E-03 1.0950E-02

5.9710E-03 7.2940E-03 9.0670E-03 2.2710E-02 8.9710E-02 6.0080E-02 1.8170E-02

4.3050E-02 4.0830E-02 2.8850E-02 1.4000E-02 1.7760E-02 2.2100E-02 1.5780E-02

8.2160E-03 3.1690E-02 5.4730E-01 5.0160E-01 2.6920E-01 1.9320E-02 2.0650E-01

1.4810E+00 2.0530E+00 6.4340E-03 1.1580E-02 1.0260E-02 5.7650E-03 1.2140E-03

6.3980E-03 5.6070E-03 3.2450E-03 1.1360E-02 5.4720E-02 1.8200E-02 1.0980E-02

1.8120E-02 1.8540E-02 1.6650E-02 9.8840E-03 9.6160E-03 6.7130E-03 7.8990E-03

7.7630E-03 2.9790E+00 4.5460E-01 3.2220E-02 8.1280E+00 2.9710E+00 6.5410E-01

7.6220E-02 1.1230E-01 5.5500E-02 1.5760E-02 2.7410E-03 6.0950E-02 3.2210E-02

1.5320E-02 5.5170E-03 1.6330E-01 1.3880E-01 3.8540E-02 1.6150E-02 1.3910E-01

7.2680E-02 2.8120E-02 1.0440E-02 1.2950E-01 5.2080E-02 1.4230E-02 2.1500E-03

2.6630E+00 5.3560E-01 2.2330E+00 3.1590E+00 2.6980E+00 8.1180E-01 5.5490E-02

3.1270E-02 3.8540E-02 1.4000E-02 2.4610E-02 2.4870E-02 2.1290E-02 1.4490E-02

1.2230E-01 6.2010E-02 6.7030E-02 1.6630E-02 7.2680E-02 4.8320E-02 4.8820E-02

1.7380E-02 4.0930E-02 4.8940E-02 4.1880E-02 1.6990E-02 1.7750E+00 1.9140E-01

2.1310E+00 1.5380E+00 2.0830E+00 1.5760E-02 3.8530E-02 1.6080E-02 2.2470E-02

7.4570E-03 1.5660E-02 1.6700E-02 1.6520E-02 8.1520E-02 2.9050E-02 4.0930E-02

2.6850E-02 2.8130E-02 4.8820E-02 2.1060E-02 2.6820E-02 6.1200E-03 3.3460E-02

2.7390E-02 3.2300E-02 8.6220E-03 2.1410E-01 1.4750E+00 1.2750E+00 2.7410E-03

1.4000E-02 2.2480E-02 5.7520E-03 1.3690E-03 6.2120E-03 9.9650E-03 1.0220E-02

4.0730E-02 1.2510E-02 1.4990E-02 2.0860E-02 1.0440E-02 1.7380E-02 2.6820E-02

7.7290E-03 3.1270E-04 6.8440E-03 2.2710E-02 1.9420E-02 2.9850E+00 2.1550E-01

1.1550E-02 1.7460E-01 6.9860E-02 1.8170E-02 4.5610E-03 1.2480E-01 6.0370E-02

1.8930E-02 4.7380E-03 3.8930E-02 3.6060E-01 3.5470E-02 5.3280E-03 3.7450E-01

1.1830E-01 1.5160E-02 3.9180E-03 1.1740E-01 5.9540E-02 2.0920E-02 3.6570E-03

3.3930E+00 2.6310E-01 8.3620E-02 6.3970E-02 5.1470E-02 1.4490E-02 5.4060E-02

4.8180E-02 4.3730E-02 2.0000E-02 3.1150E-02 1.4090E-01 1.5970E-01 2.0660E-02

1.5220E-01 1.3510E-01 1.1020E-01 1.1920E-02 5.9490E-02 4.0160E-02 3.7090E-02

2.2810E-02 2.5860E+00 3.0800E-02 6.0700E-02 3.5720E-02 3.2960E-02 1.2960E-02

3.9030E-02 2.9250E-02 3.7250E-02 2.3360E-02 4.7230E-02 1.2270E-01 7.0990E-02

3.8900E-02 1.3240E-01 5.8440E-02 7.5590E-02 2.0910E-02 3.7080E-02 3.0430E-02

3.0880E-02 9.8920E-03 2.9800E-02 4.4260E-02 2.2870E-02 2.8660E-03 1.3020E-02

3.1790E-02 3.2980E-02 1.5570E-02 1.3460E-02 5.6900E-02 9.0250E-02 9.0470E-03

4.2100E-02 1.0150E-01 5.2300E-02 3.6570E-03 2.2810E-02 3.0870E-02 2.2440E-02

1.7790E+00 2.9130E-01 9.3500E-02 6.3770E+00 1.6230E+00 3.4490E-01 6.5050E-02

1.1710E+00 2.1040E+00 1.1710E+00 9.9630E-02 1.8120E+00 5.8320E-01 1.0360E-01

6.3110E-03 2.2740E+00 7.0040E-01 1.4160E-01 1.7640E-02 1.6680E+00 2.0700E-01

5.2430E-01 3.6290E+00 1.6840E+00 3.9610E-01 8.7710E-01 1.3960E+00 3.4930E-01

7.8190E-01 5.8120E-01 6.9140E-01 4.8290E-01 1.2400E-01 4.7430E-01 1.0390E+00

6.6620E-01 1.7450E-01 1.1080E+00 5.3930E-02 4.6640E-01 2.2540E+00 1.3300E+00

5.8420E-01 5.8420E-01 6.7790E-01 4.2600E-01 1.0300E-01 4.8190E-01 3.5270E-01

3.1540E-01 3.8610E-02 4.6360E-01 5.5700E-01 5.1270E-01 1.5590E-02 3.9180E-02

3.1490E-01 1.6790E+00 2.9200E-01 1.3610E-01 6.0950E-01 9.6020E-02 6.3110E-03

1.2350E-01 3.1500E-01 1.8160E-01 3.4400E-03 4.0990E-02 3.2160E-01 4.2090E-01

4.0590E+00 3.0860E-01 3.3450E-02 1.3250E-01 7.7510E-02 2.7650E-02 5.9480E-03

5.1430E+00 2.4540E-01 5.5860E-03 1.1730E-03 1.0590E+01 2.1030E+00 1.7820E-01

7.4960E-03 4.7400E+00 3.5380E-01 1.1040E-01 4.8070E-02 2.9340E-02 1.4920E-02

1.1400E+00 3.0940E+00 2.5360E-01 4.7100E-03 2.7370E+00 5.5310E+00 2.2380E+00

2.0950E-01 3.6910E+00 8.8340E-02 2.7360E-02 2.8890E-02 1.7910E-02 1.8370E-01

1.2790E+00 1.9570E+00 1.7720E-01 4.2520E-01 2.8820E+00 3.5440E+00 1.7310E+00

6.6250E-02 1.3910E-02 2.5000E-02 1.6520E-02 1.7830E-02 2.3820E-01 1.0160E+00

1.4300E+00 3.4730E-02 5.1950E-01 2.3190E+00 3.5690E+00 6.7630E-01 4.5080E-01

2.2540E-01 2.0930E+00 1.5730E+00 1.0510E+00 5.2630E-01 1.8690E-02 1.4950E-02

1.1220E-02 7.4740E-03 2.2720E+00 1.0500E+00 4.4230E+00 3.0140E+00 1.2260E+00

2.4890E-01 3.6590E-01 1.4980E-01 6.1990E-02 2.9110E-02 8.6150E-01 2.5650E+00

5.4990E-01 1.4410E+00 1.3780E+00 4.5000E-02 1.7870E-01 1.2900E-01 5.2020E-02

1.3980E-01 1.7690E+00 9.0660E-01 1.5090E-01 2.1890E-02 1.8350E-02 6.9500E-02

9.2510E-02 2.2480E+00 2.8600E-01 3.3510E-02 2.0930E+00 6.9310E-01 1.8500E-01

4.6350E-02 2.1570E+00 3.1280E-01 4.9610E-01 9.6790E-01 6.0800E-01 1.9500E-01

1.4590E+00 8.4160E-02 4.2900E-01 5.4120E-01 4.5740E-01 1.9530E-02 6.8950E-02

2.8610E-01 3.8050E-01 4.3470E+00 4.3640E-01 2.4380E-02 4.6980E+00 5.3230E-01

3.6160E+00

20000.00

5.4830E+00 1.6420E+00 7.1530E-01 2.9470E-01 2.8940E+00 1.2080E+00 3.8470E-01

1.0310E-01 8.7720E+00 6.4340E-01 2.2250E-01 7.5130E-02 9.2820E-01 5.0190E-01

4.0110E-02 2.9150E-01 9.0810E-02 8.0680E-03 6.3740E-01 3.1440E-01 9.6890E-02

1.7150E-02 4.2730E-01 2.1670E-01 1.1380E-01 3.8820E-02 4.3200E-01 2.2620E-01

8.3060E-02 1.9730E-02 2.8800E-01 1.5910E-01 7.5970E-02 3.8580E-02 2.5700E+01

6.9530E+00 5.8350E-01 2.2550E-01 8.3920E-02 3.1690E+01 5.4670E+00 5.9690E-01

5.9670E-02 2.4640E-02 1.1340E-02 1.4070E+01 1.7760E-01 4.2460E-02 1.3800E+00

2.4830E-01 9.9720E-03 2.0220E-03 2.2390E+00 2.8550E-01 3.0420E-02 1.0040E-02

8.3380E-01 1.4740E-02 7.8480E-03 1.3990E-01 1.0210E-01 4.4370E-02 1.0540E-02

8.0340E-02 5.3610E-02 2.2110E-02 8.9650E-03 2.4900E-02 7.9090E-03 2.4530E-03

7.4140E-02 3.6200E-02 1.3830E-02 4.0890E-03 2.9330E-02 1.7790E-02 7.6900E-03

1.8790E-03 7.0070E-02 3.9420E-02 1.3410E-02 2.4150E-03 5.2150E-02 2.1020E-02

4.8070E-03 5.2910E-04 3.9080E-02 1.5480E-02 6.0340E-03 1.7600E-03 3.4610E-02

1.1400E-02 3.4610E-03 1.0880E-03 5.7630E-02 2.6250E-02 1.1330E-02 3.9050E-03

7.6160E-02 2.8450E-02 7.5000E-03 1.1210E-03 4.9160E-02 1.5380E-02 3.8510E-03

6.9840E-04 5.0090E-02 2.3560E-02 8.6170E-03 1.8900E-03 3.7800E-02 1.3400E-02

6.3610E-03 3.2410E-02 2.0730E-02 7.3770E-03 1.6140E-03 2.9480E-02 1.6550E-02

1.0130E-02 7.0930E-03 1.3570E-02 1.0070E-02 3.8790E-03 9.1690E-04 1.1290E-02

8.7290E-03 4.6610E-03 1.5110E-03 2.2020E-02 9.7690E-03 7.7240E-03 4.4630E-03

1.5430E-02 1.0440E-02 5.5650E-03 2.5200E-03 1.9770E-02 1.3600E-02 6.2130E-03

1.8300E-03 5.4260E+00 1.3930E+00 4.6750E-01 1.3140E+00 1.1790E+00 8.4260E-01

3.4730E-01 2.1580E+00 5.2250E+00 4.1570E-01 1.3770E-01 6.7230E-01 2.2740E-01

2.8410E-01 1.6620E-01 9.5750E-02 5.1390E-02 2.8290E-01 2.2870E-01 2.4370E-01

1.0060E-01 2.2240E-01 2.2970E-01 1.0260E-01 9.4870E-02 1.8860E-01 2.2720E-01

1.5250E-01 8.1300E-02 1.8040E-01 1.3800E-01 1.0830E-01 2.8990E-02 6.3470E+00

1.1810E+01 8.6790E+00 5.6680E-01 1.6520E-01 5.2260E-01 2.1290E+01 7.5920E+00

1.1780E+00 7.4200E-02 1.3310E-02 4.1250E+00 7.1750E+00 1.1010E-01 4.5750E-01

6.1090E-01 2.3670E-01 8.0200E-03 4.3600E-01 1.3010E+00 2.8980E-01 2.5690E-02

3.1660E-01 3.6300E-01 5.7090E-03 1.0310E-01 4.0830E-02 5.2220E-02 4.1330E-02

6.4260E-02 3.7210E-02 2.3230E-02 7.1730E-03 1.4290E-02 1.0140E-02 3.7690E-03

3.5200E-02 2.9760E-02 2.4670E-02 1.2970E-02 1.7140E-02 1.0470E-02 1.1000E-02

7.6610E-03 3.4440E-02 2.2120E-02 2.9730E-02 1.3980E-02 2.6790E-02 1.7730E-02

1.3780E-02 4.4650E-03 1.9850E-02 1.7270E-02 8.5920E-03 4.1230E-03 1.3040E-02

1.5910E-02 8.5830E-03 2.9780E-03 2.5570E-02 2.6640E-02 1.6860E-02 1.0220E-02

3.1700E-02 3.0760E-02 2.0610E-02 7.5870E-03 1.5200E-02 2.3490E-02 1.2630E-02

3.9380E-03 2.1300E-02 2.0740E-02 1.6600E-02 8.7040E-03 2.2730E-02 1.8090E-02

5.5010E-03 2.2970E-02 9.7880E-03 1.1150E-02 5.7720E-03 1.7250E-02 1.5950E-02

1.2200E-02 5.0920E-03 1.0770E-02 3.9340E-03 5.1270E-03 2.9420E-03 8.3910E-03

4.0560E-03 4.2430E-03 4.2710E-03 1.7610E-02 8.6000E-03 6.1150E-03 2.8490E-03

1.1410E-02 7.1170E-03 6.0330E-03 2.5600E-03 1.3820E-02 6.7160E-03 7.1330E-03

5.4600E-03 4.2000E+00 8.8460E-01 5.0110E-01 9.0710E-01 7.5530E-01 6.0270E-01

5.1880E-01 2.3610E+00 2.8640E+00 2.2570E-01 3.8490E-01 2.6430E-01 2.3960E-01

8.3060E-02 9.1830E-02 6.0560E-02 8.1060E-02 2.1120E-01 1.5500E-01 1.9570E-01

1.2290E-01 1.2290E-01 1.6600E-01 8.0770E-02 7.7120E-02 1.4920E-01 1.5760E-01

1.2370E-01 1.0710E-01 1.2340E-01 6.4410E-02 4.9540E-02 3.9810E-01 8.4620E+00

3.9090E+00 7.7600E+00 3.9300E-01 6.2780E-02 5.4030E-01 1.3400E+01 7.5280E+00

1.5170E+00 7.3890E-02 7.6620E-01 5.1180E+00 2.6680E+00 1.1220E-01 4.2210E-01

3.1220E-01 1.3700E-01 5.7460E-02 5.2060E-01 7.7590E-01 1.8510E-01 1.0130E-01

2.9480E-01 1.1800E-01 5.2290E-02 4.6810E-02 3.6360E-02 4.2690E-02 4.6260E-02

2.9850E-02 1.7440E-02 5.3790E-03 7.8880E-03 8.6060E-03 4.6520E-03 1.3600E-02

2.3250E-02 2.0520E-02 1.9580E-02 6.4600E-03 9.5530E-03 8.1540E-03 1.0060E-02

9.8770E-03 2.4630E-02 1.5680E-02 2.5000E-02 1.1030E-02 1.6440E-02 1.1280E-02

8.3600E-03 9.8160E-03 1.2190E-02 1.0610E-02 4.7610E-03 4.5300E-03 1.0170E-02

9.8230E-03 5.9400E-03 1.0800E-02 1.6610E-02 1.8530E-02 1.3520E-02 1.0540E-02

2.2830E-02 1.9650E-02 1.5050E-02 3.8330E-03 1.3030E-02 1.5160E-02 9.4110E-03

7.1380E-03 1.4710E-02 1.4700E-02 1.3960E-02 1.3920E-02 1.4220E-02 6.6510E-03

1.2330E-02 1.0760E-02 7.6500E-03 6.5230E-03 1.0610E-02 1.2600E-02 8.3310E-03

6.3430E-03 6.1220E-03 4.6110E-03 3.3500E-03 2.9540E-03 4.4480E-03 3.7860E-03

3.5380E-03 3.9490E-03 1.3220E-02 7.0080E-03 4.2840E-03 1.8820E-03 7.4130E-03

6.3630E-03 3.8100E-03 2.7520E-03 7.1830E-03 6.6440E-03 5.4290E-03 5.5960E-03

2.5490E+00 1.6080E-01 4.9090E-01 6.1240E-01 5.8020E-01 1.7360E-01 5.8660E-01

1.9740E+00 1.2420E+00 1.7420E-01 2.9110E-01 1.2790E-01 3.4480E-02 7.3320E-02

4.9070E-02 1.2450E-02 1.0390E-01 1.3570E-01 1.7650E-01 5.5540E-02 8.2350E-02

1.1040E-01 8.0640E-02 2.3030E-02 7.7240E-02 1.1650E-01 1.2400E-01 6.3250E-02

7.2740E-02 5.6020E-02 3.8210E-02 1.2120E-01 5.1930E-01 7.6200E+00 7.5830E-01

4.9760E+00 2.8420E-02 5.1320E-02 3.9710E-01 7.5690E+00 6.0480E+00 1.3630E+00

5.2100E-02 1.7350E+00 3.9130E+00 1.7520E-02 1.6490E-01 2.6900E-01 1.9920E-01

1.0640E-02 8.6690E-02 4.6160E-01 4.5850E-01 2.7030E-02 1.4220E-01 1.7340E-01

1.8740E-02 4.1740E-02 3.3800E-02 2.4500E-02 2.9250E-02 2.2700E-02 1.0450E-02

3.5860E-03 4.0770E-03 5.7770E-03 4.2440E-03 4.2600E-03 1.2970E-02 1.6480E-02

1.7600E-02 1.6890E-03 6.2100E-03 7.1840E-03 7.6380E-03 1.2820E-03 1.2880E-02

1.5250E-02 2.0710E-02 3.4610E-03 1.0760E-02 1.0280E-02 6.8770E-03 4.4310E-03

7.5000E-03 8.1610E-03 4.8410E-03 1.5190E-03 4.5030E-03 7.2210E-03 6.9800E-03

3.9890E-03 9.0170E-03 1.3220E-02 1.3420E-02 2.5610E-03 1.1520E-02 1.5830E-02

1.5400E-02 7.6540E-04 4.6110E-03 1.0190E-02 1.2030E-02 1.6400E-03 7.4330E-03

1.1190E-02 1.3390E-02 8.2180E-03 8.4810E-03 6.4240E-03 5.2030E-03 9.4170E-03

6.5600E-03 3.6840E-03 6.8450E-03 6.7410E-03 6.1830E-03 5.5330E-03 2.7300E-03

4.4300E-03 2.7840E-03 1.4200E-03 1.6760E-03 3.3290E-03 3.0820E-03 2.3950E-03

8.8070E-03 4.9730E-03 2.6160E-03 1.1930E-03 4.4090E-03 4.4680E-03 2.9880E-03

1.7230E-03 2.8240E-03 5.5310E-03 4.7280E-03 3.4850E-03 4.3350E-02 1.7170E-01

3.6880E-01 3.3960E-01 6.5910E-02 1.3240E-01 4.8950E-01 1.2990E+00 5.6350E-02

1.9270E-01 4.5710E-02 1.0800E-02 4.0570E-02 2.6860E-02 9.5690E-04 1.9070E-02

9.9570E-02 9.4660E-02 1.7010E-02 5.3760E-02 3.6330E-02 5.7380E-02 3.8770E-03

3.0420E-02 5.8840E-02 7.7140E-02 3.0920E-02 2.6310E-02 4.1420E-02 1.6500E-02

3.3540E-02 1.6500E-01 3.9250E-01 4.9630E+00 1.5270E+00 1.3470E-02 1.2850E-02

3.0600E-02 2.2040E-01 3.3910E+00 4.0700E+00 1.6990E-02 5.7090E-02 2.7760E+00

2.0920E-03 2.8520E-02 1.5300E-01 1.4120E-01 4.9380E-03 5.3730E-03 8.6750E-02

4.1070E-01 6.2640E-03 4.1760E-02 1.2330E-01 4.0070E-03 2.2960E-02 2.4140E-02

8.1570E-03 1.4030E-02 1.2520E-02 4.6510E-03 1.7930E-03 1.7260E-03 2.8130E-03

2.5180E-03 1.0590E-03 4.7010E-03 1.0000E-02 9.9000E-03 1.9720E-04 2.4130E-03

4.9660E-03 3.7600E-03 6.7770E-06 2.1630E-03 1.2690E-02 1.0200E-02 7.2620E-04

4.6460E-03 6.9990E-03 3.3290E-03 1.6090E-03 3.6840E-03 3.9690E-03 3.1980E-03

4.8590E-04 1.4210E-03 3.5040E-03 4.7300E-03 1.1110E-03 4.0750E-03 6.1330E-03

8.5050E-03 3.5730E-04 3.7150E-03 9.2130E-03 9.4330E-03 1.1740E-04 1.0450E-03

4.1660E-03 8.4370E-03 1.6910E-04 2.4010E-03 6.2940E-03 7.9440E-03 3.9030E-03

3.6850E-03 3.9450E-03 1.6230E-03 5.2140E-03 4.5490E-03 1.0620E-03 3.5820E-03

2.2690E-03 3.7530E-03 3.0470E-03 8.9720E-04 2.6090E-03 1.9120E-03 2.6820E-04

3.8550E-04 1.9350E-03 1.9450E-03 9.7530E-04 4.4030E-03 2.5840E-03 1.2170E-03

5.8980E-04 2.0590E-03 2.1220E-03 1.9830E-03 6.2840E-04 7.7250E-04 3.0050E-03

3.1250E-03 1.3820E-03 7.5400E+00 2.1070E+00 6.9570E-01 2.1790E+00 7.8290E-01

1.8190E-01 3.5200E-02 1.2930E+00 4.7650E-01 1.6220E-01 6.1540E-01 1.2960E-01

3.4370E-02 1.5090E+00 5.4380E-01 1.3900E-01 3.0580E-02 1.6040E+00 4.9060E-01

1.4100E-01 3.7130E-02 1.1580E+00 4.8730E-01 1.5370E-01 4.2010E-02 8.7400E-01

4.0080E-01 1.6670E-01 6.1120E-02 7.5950E-01 3.3540E-01 1.2270E-01 3.9220E-02

9.0080E-03 7.1720E-01 3.5720E-01 1.5290E-01 5.3360E-02 1.4670E-02 2.9600E-03

2.7090E-01 1.1010E-01 2.3430E-02 8.9530E+00 3.7010E-01 1.1220E-01 2.7150E-02

4.5550E+00 7.2430E-01 1.3000E-01 3.7880E-02 4.4220E-01 1.7070E-01 3.0940E-02

1.4750E+00 6.6420E-01 3.2910E-01 1.8450E-01 9.8080E-02 4.4130E-02 1.8080E-02

1.4270E-01 1.9720E-01 1.1960E-01 1.7770E-02 3.7950E+00 4.0710E-01 3.8040E-02

4.9600E-03 2.0840E-01 9.9050E-02 2.4420E-02 3.1970E-03 2.5430E-01 1.7940E-01

3.3370E-02 3.3000E-03 1.7720E+00 4.1620E-02 8.1090E-03 1.1250E-03 7.8390E-01

2.6160E-02 6.0110E-03 1.5690E-03 9.0720E-01 1.2690E-01 1.6000E-02 2.4880E-03

1.3980E+00 1.6540E-01 2.3530E-02 3.4660E-03 3.0390E+00 3.8090E-01 1.8280E-02

2.6930E-03 7.6940E-01 1.1500E-01 2.4610E-02 3.4310E-03 2.7840E-01 1.0110E-01

2.5760E-02 3.1140E-03 3.0920E-02 1.2770E-02 2.5790E-03 2.9150E-01 3.3420E-02

1.1430E-02 2.2970E-03 5.6320E-02 2.0640E-02 6.8430E-03 1.4870E-03 1.0890E-01

1.6520E-02 4.2850E-03 7.6750E-04 7.2560E-02 2.4270E-02 7.1650E-03 1.2130E-03

2.5740E-02 8.7720E-03 4.8850E-03 8.2350E-04 7.3260E-02 8.6650E-03 2.0990E-03

3.6130E-04 1.6830E-01 3.1420E-02 5.5250E-03 9.4480E-04 7.1990E+00 1.9980E+00

9.5280E-01 8.8660E-01 5.8430E-01 1.6380E-01 7.5440E-01 5.7100E-01 2.2970E-01

2.9310E-01 2.6520E-01 6.8020E-02 3.9220E-01 7.6360E-01 5.3570E-01 1.5290E-01

4.8180E-01 8.4510E-01 4.0590E-01 1.3780E-01 3.9100E-01 5.9710E-01 4.1010E-01

1.5850E-01 4.4580E-01 4.3100E-01 2.4400E-01 1.0180E-01 2.7190E-01 3.8690E-01

2.4090E-01 1.1680E-01 4.5520E-02 2.5900E-01 2.7700E-01 2.4290E-01 1.6030E-01

7.8070E-02 2.5660E-02 1.4580E-01 1.0290E-01 7.4350E-02 1.3610E+00 5.8710E+00

2.4660E-01 9.1120E-02 7.2380E-01 2.7780E+00 7.2090E-01 1.2390E-01 2.6480E-01

1.5360E-01 9.7310E-02 6.6410E-01 7.5690E-01 4.8630E-01 2.1440E-01 6.3240E-02

4.5420E-02 1.9760E-02 1.1420E-01 1.4910E-01 4.8260E-02 7.0230E-02 1.1320E-01

2.6790E+00 4.8350E-01 4.4350E-02 6.8980E-02 1.5580E-01 9.2460E-02 2.8680E-02

1.0110E-01 3.1710E-01 1.9300E-01 4.0080E-02 2.4000E-01 1.1770E+00 3.1750E-02

7.8380E-03 1.2220E-01 5.1440E-01 2.0130E-02 4.7360E-03 1.2680E-01 5.6450E-01

1.3290E-01 1.7720E-02 7.1540E-02 9.7130E-01 1.8110E-01 2.7070E-02 3.3440E-01

2.2780E+00 3.9670E-01 2.0430E-02 6.9220E-02 5.2280E-01 1.1350E-01 2.8510E-02

7.4270E-02 1.2900E-01 9.1950E-02 3.0490E-02 1.9090E-02 1.0920E-02 7.0860E-03

6.2920E-02 1.7790E-01 1.8920E-02 1.0050E-02 2.0640E-02 2.6770E-02 1.4230E-02

7.0940E-03 2.7550E-02 6.1520E-02 1.1560E-02 3.8250E-03 2.0160E-02 3.6560E-02

1.9630E-02 8.0970E-03 2.0590E-02 6.2700E-03 2.4160E-03 2.8130E-03 1.6450E-02

4.3050E-02 6.1870E-03 1.9330E-03 3.0450E-02 9.8940E-02 2.9890E-02 6.0270E-03

5.5370E+00 3.3180E-01 7.1860E-01 5.2270E-01 3.8080E-01 4.2850E-01 4.6920E-01

2.7310E-01 1.3040E-01 2.1310E-01 1.2530E-01 5.5120E-02 3.9230E-01 5.0080E-01

4.4970E-01 1.3760E-01 3.9910E-01 5.6540E-01 3.1530E-01 1.0650E-01 3.4040E-01

4.0550E-01 3.4060E-01 2.2660E-01 3.0460E-01 2.6170E-01 1.3510E-01 9.0750E-02

2.0270E-01 2.5110E-01 1.8330E-01 8.4070E-02 5.4550E-02 1.8610E-01 1.7980E-01

1.5750E-01 1.2710E-01 7.3680E-02 6.5200E-02 9.2480E-02 8.4320E-02 2.2370E-01

1.4750E+00 3.8250E+00 1.5390E-01 1.2970E-01 7.1960E-01 1.8600E+00 5.4700E-01

1.3740E-01 1.5060E-01 9.9260E-02 3.2910E-01 4.8630E-01 4.5330E-01 3.2270E-01

3.9790E-02 3.6220E-02 1.9700E-02 8.5660E-02 8.5330E-02 6.5890E-02 4.9460E-02

1.7070E-02 1.1020E-01 2.4080E+00 3.7510E-01 1.0090E-02 6.3790E-02 1.0700E-01

7.8990E-02 2.0560E-03 1.1490E-01 2.1190E-01 1.5950E-01 2.5300E-02 2.8040E-01

7.6550E-01 2.1140E-02 1.5280E-02 1.2910E-01 3.3230E-01 1.3050E-02 1.5950E-02

1.3290E-01 3.8080E-01 1.0190E-01 1.3090E-02 6.3990E-02 7.1740E-01 1.4320E-01

1.8070E-02 3.9600E-01 1.5380E+00 2.9900E-01 1.5870E-02 5.5030E-02 3.8640E-01

9.3260E-02 1.0720E-02 6.7990E-02 8.5760E-02 7.9430E-02 1.0260E-02 1.0630E-02

6.9340E-03 1.8420E-02 5.3410E-02 1.1820E-01 1.1700E-02 6.8420E-03 1.4230E-02

1.8710E-02 1.1450E-02 7.6800E-03 2.3150E-02 3.9530E-02 7.4500E-03 4.9420E-03

1.5790E-02 2.5790E-02 1.6850E-02 1.5440E-02 3.5660E-03 2.9720E-03 2.1290E-03

3.9750E-03 1.5080E-02 2.7670E-02 4.0380E-03 5.5220E-03 2.9870E-02 6.6510E-02

2.3150E-02 8.8650E-02 3.4060E-01 5.3650E-01 3.3490E-01 2.2700E-01 3.0790E-01

2.4560E-01 5.5510E-02 1.2080E-01 1.3430E-01 1.2970E-02 5.3520E-02 3.0850E-01

5.6210E-01 3.6890E-02 1.3680E-01 3.1420E-01 4.6140E-01 2.5980E-02 1.0460E-01

2.7390E-01 3.8770E-01 1.0950E-01 1.7560E-01 1.9890E-01 1.3710E-01 2.2330E-02

8.8840E-02 1.4630E-01 1.6690E-01 1.1270E-01 7.1240E-03 4.8890E-02 1.2000E-01

1.4650E-01 1.2440E-01 6.9520E-02 2.1420E-02 7.1240E-02 6.8420E-02 5.9500E-02

2.3310E-01 1.1160E+00 2.3620E+00 3.7860E-02 1.2390E-01 5.4700E-01 1.4670E+00

5.8300E-02 1.2640E-01 7.2870E-02 1.8450E-01 2.1440E-01 3.2270E-01 3.3920E-01

2.3380E-02 2.3720E-02 1.6020E-02 5.7090E-02 3.6570E-02 7.8580E-02 1.8670E-02

2.4540E-03 1.8470E-02 8.6630E-02 1.8390E+00 3.4470E-04 1.1680E-02 5.1610E-02

1.0930E-01 1.5630E-04 2.2630E-03 8.7680E-02 2.3530E-01 3.4940E-03 3.0730E-02

2.1120E-01 4.7960E-01 3.3340E-03 1.6990E-02 1.0040E-01 2.1430E-01 2.4770E-03

1.7690E-02 1.0190E-01 2.9920E-01 1.5620E-03 1.4430E-02 5.1340E-02 5.5670E-01

2.6460E-03 2.0340E-02 3.4090E-01 1.2010E+00 1.2890E-03 1.8120E-02 4.5770E-02

3.0300E-01 9.1460E-05 1.2640E-02 5.5430E-02 9.4410E-02 4.6300E-03 8.9640E-03

4.9420E-03 5.4920E-03 1.8300E-02 4.0790E-02 7.0790E-02 1.4870E-03 7.0940E-03

1.1440E-02 1.4450E-02 1.9990E-03 7.9750E-03 1.7740E-02 2.4450E-02 4.9860E-04

5.4940E-03 1.3130E-02 2.3110E-02 1.0290E-02 1.5810E-03 3.2370E-03 9.6900E-04

9.6760E-04 4.2740E-03 1.1310E-02 1.7260E-02 9.2870E-04 6.0350E-03 2.3160E-02

5.2790E-02 3.0000E+00 1.0790E+00 4.5130E-01 1.2160E+00 5.4780E-01 8.9960E-02

3.3780E-01 1.3620E-01 3.2200E-02 5.4650E-01 2.8520E-01 1.2680E-01 3.4850E-02

4.6220E-01 2.3740E-01 1.1730E-01 5.3640E-02 4.9990E-01 2.5770E-01 1.1620E-01

4.4890E-02 3.8760E-01 2.2470E-01 1.2740E-01 5.6610E-02 2.5810E+00 1.0840E+00

3.2440E-01 8.0860E-02 2.0060E-02 3.5550E+00 1.1880E+00 3.4720E-01 9.2490E-02

2.7020E-02 9.0650E-03 1.6890E+00 2.3690E-01 2.8280E-02 2.0540E+01 3.6120E+00

9.1960E-02 1.5550E-02 3.0370E+01 3.9350E+00 3.6520E-01 8.9770E-02 1.2990E+01

1.0700E-01 3.0760E-02 1.2930E-01 7.8570E-02 4.2470E-02 1.9280E-02 6.6680E-02

3.9430E-02 1.6600E-02 6.1280E-03 1.6540E-02 5.6270E-03 2.5560E-03 1.2210E-01

6.0510E-02 2.5370E-02 6.7030E-03 1.1670E-02 6.8260E-03 3.3850E-03 1.2550E-03

2.9480E-02 1.6530E-02 7.8190E-03 2.2760E-03 1.8610E-01 3.9910E-02 5.0660E-03

1.0140E-03 2.1550E-01 4.9010E-02 1.0200E-02 3.3000E-03 2.9170E-02 1.2060E-02

4.7480E-03 1.4100E-03 5.5230E-02 2.8230E-02 1.2520E-02 4.0080E-03 2.0120E-01

4.6850E-02 1.2690E-02 3.0070E-03 2.6830E-02 1.2130E-02 4.6860E-03 1.1650E-03

2.3980E-02 1.0850E-02 4.6010E-03 1.5490E-03 1.0900E-01 1.9600E-02 1.0480E-02

3.1870E-02 1.7970E-02 7.6270E-03 2.1870E-03 1.2940E-02 7.9200E-03 4.9200E-03

2.9430E-03 3.1070E-02 2.1720E-02 1.0630E-02 3.5360E-03 4.7430E-03 3.2820E-03

1.9810E-03 9.3390E-04 1.4910E-02 1.0530E-02 2.5000E-03 1.3010E-03 4.6240E-03

3.1720E-03 1.7680E-03 7.4350E-04 8.9760E-03 2.5880E-03 1.0830E-03 4.3650E-04

2.5280E+00 5.8430E-01 6.9700E-01 3.5800E-01 3.3480E-01 1.8300E-01 1.2180E-01

7.5780E-02 1.9210E-01 2.2760E-01 1.8880E-01 1.4050E-01 2.0140E-01 2.1140E-01

1.5180E-01 9.1330E-02 1.8310E-01 2.3490E-01 1.7860E-01 1.1320E-01 2.0390E-01

2.3550E-01 1.2580E-01 5.5190E-02 5.7000E-01 1.2760E+00 9.2260E-01 4.0590E-01

9.5620E-02 1.2420E-01 1.8210E+00 1.2490E+00 5.3390E-01 1.5830E-01 3.1920E-02

4.0860E-01 8.7750E-01 1.7980E-01 3.6010E+00 1.0260E+01 4.2410E+00 9.1550E-02

4.0780E-01 2.0530E+01 4.7410E+00 3.9070E-01 3.0270E+00 6.7660E+00 5.6170E-02

6.9790E-02 5.5210E-02 4.3770E-02 3.3410E-02 4.6220E-02 2.9140E-02 1.6950E-02

4.6030E-03 8.0280E-03 8.0680E-03 2.2980E-03 4.4310E-02 4.9570E-02 3.9080E-02

2.8100E-02 5.0190E-03 4.5710E-03 4.2470E-03 3.5090E-03 1.0970E-02 1.1770E-02

1.0540E-02 8.7890E-03 4.0820E-02 9.1630E-02 4.0460E-02 4.7470E-03 4.9760E-02

1.0360E-01 4.4060E-02 7.2010E-03 9.5630E-03 1.3240E-02 7.9910E-03 4.7630E-03

2.1030E-02 2.2880E-02 1.8240E-02 1.3010E-02 2.5850E-02 1.2240E-01 4.0200E-02

1.3700E-02 8.4350E-03 1.1430E-02 8.5100E-03 5.2910E-03 6.5690E-03 1.1220E-02

7.9360E-03 4.8980E-03 3.9790E-02 5.7540E-02 6.8610E-03 1.7960E-02 1.1180E-02

9.4510E-03 5.9350E-03 7.0340E-03 6.7130E-03 4.8760E-03 2.9240E-03 2.1720E-02

1.0790E-02 1.0390E-02 7.3120E-03 2.7810E-03 1.9250E-03 1.7250E-03 1.6950E-03

1.1180E-02 4.3400E-03 5.5070E-03 9.0190E-04 3.1720E-03 2.0140E-03 1.5880E-03

9.2680E-04 1.8370E-03 4.1540E-03 2.2140E-03 9.2260E-04 1.5030E+00 3.0250E-01

3.8080E-01 2.4430E-01 8.3410E-02 1.0380E-01 6.6430E-02 4.6590E-02 1.1850E-01

1.6770E-01 1.6480E-01 8.3720E-02 1.2220E-01 1.3180E-01 1.0000E-01 5.8950E-02

1.2040E-01 1.5720E-01 1.4010E-01 1.1850E-01 1.2580E-01 1.2110E-01 5.3880E-02

7.9550E-02 5.6510E-01 6.6810E-01 5.7620E-01 3.3540E-01 3.5490E-02 7.8590E-02

8.5100E-01 9.2110E-01 5.3890E-01 1.8240E-01 6.4390E-02 4.3670E-01 4.7180E-01

9.1200E-02 4.2400E+00 4.8100E+00 2.9990E+00 1.1620E-01 3.4770E-01 1.3280E+01

3.5890E+00 4.0000E-01 3.4670E+00 2.6920E+00 3.1380E-02 3.7560E-02 3.8100E-02

2.7750E-02 2.7880E-02 2.1750E-02 1.1810E-02 3.0640E-03 4.2510E-03 4.9730E-03

3.1260E-03 1.1630E-02 2.6860E-02 3.6320E-02 3.2510E-02 1.4910E-03 3.0160E-03

3.4210E-03 3.6380E-03 2.6720E-03 6.5510E-03 9.1240E-03 9.7030E-03 5.0590E-03

4.0440E-02 4.3660E-02 2.7410E-02 1.0200E-02 4.4020E-02 5.1280E-02 3.1260E-02

3.0270E-03 5.8040E-03 9.0470E-03 5.8490E-03 6.1330E-03 1.2780E-02 1.6350E-02

1.4740E-02 7.1980E-03 1.6390E-02 7.8290E-02 3.0340E-02 1.9760E-03 5.4870E-03

7.9420E-03 7.0400E-03 1.8040E-03 4.1560E-03 7.7800E-03 6.6870E-03 1.7130E-02

3.1170E-02 2.1280E-02 7.6270E-03 9.4500E-03 8.1730E-03 4.5710E-03 3.8810E-03

4.0750E-03 3.6850E-03 2.7080E-03 1.0630E-02 1.0390E-02 8.0720E-03 4.3870E-03

1.2110E-03 1.4010E-03 1.4810E-03 1.2550E-03 7.4530E-03 2.1540E-03 3.1730E-03

1.9560E-03 1.7680E-03 1.5890E-03 1.1380E-03 6.2620E-04 7.4650E-04 1.0420E-03

2.8590E-03 1.3480E-03 9.0260E-02 2.6570E-01 1.0760E-01 2.8590E-02 6.1360E-02

3.6320E-02 1.6500E-03 4.9490E-02 8.4830E-02 1.1190E-01 2.9200E-02 5.3570E-02

6.8290E-02 6.7470E-02 1.3130E-02 4.7160E-02 7.7800E-02 9.9380E-02 5.6540E-02

5.5190E-02 5.3880E-02 4.5590E-02 2.0890E-02 6.0780E-02 3.2840E-01 4.2030E-01

2.7970E-01 1.1360E-02 2.1170E-02 4.0950E-02 3.1670E-01 5.1810E-01 3.9260E-01

9.5950E-03 7.7600E-02 3.9580E-01 1.5400E-02 9.1290E-02 3.0000E+00 2.9580E+00

5.2600E-02 5.5060E-02 2.1580E-01 8.3020E+00 2.5700E-02 5.7830E-01 2.6650E+00

1.0270E-02 2.1210E-02 2.0080E-02 1.5820E-02 1.2830E-02 1.2100E-02 5.7740E-03

1.5320E-03 1.9520E-03 1.8820E-03 2.3120E-03 8.0080E-04 1.2140E-02 1.8540E-02

2.2130E-02 2.2530E-04 1.3460E-03 2.0800E-03 2.1290E-03 9.9440E-06 2.9100E-03

4.8940E-03 6.2040E-03 1.0130E-03 4.7460E-03 2.7400E-02 2.5870E-02 3.2990E-03

7.1990E-03 3.1260E-02 2.8410E-02 5.5340E-04 2.7430E-03 3.6160E-03 4.9420E-03

8.4840E-04 5.6770E-03 8.5060E-03 9.8320E-03 9.9280E-04 7.0420E-03 1.0540E-02

4.9070E-02 1.2230E-04 2.0780E-03 3.8030E-03 5.2290E-03 2.5980E-04 1.6390E-03

2.8790E-03 5.4360E-03 7.7730E-03 7.7510E-03 1.9460E-02 2.1870E-03 5.9350E-03

4.5710E-03 2.1890E-03 1.7840E-03 1.8090E-03 1.8960E-03 1.6840E-03 3.5370E-03

7.3120E-03 4.3870E-03 1.5010E-03 3.4380E-04 8.9580E-04 8.1230E-04 6.3800E-04

3.7260E-03 9.6910E-04 1.0720E-03 1.5290E-03 7.4350E-04 9.2680E-04 6.2620E-04

2.5470E-04 2.1880E-04 5.3750E-04 5.8650E-04 1.4150E-03 1.1650E+00 4.5630E-01

3.6540E+00 2.8120E-01 8.4380E-02 1.4380E-01 8.0080E-02 4.2670E-02 2.2300E-02

6.0210E-01 3.0150E-01 1.4250E-01 6.4050E-02 1.9230E-01 1.3020E-01 7.8330E-02

4.1600E-02 7.3160E-01 4.6150E-01 2.2910E-01 8.2150E-02 3.5200E-01 2.5070E-01

1.4320E-01 6.9860E-02 2.6570E-02 3.1810E-01 2.4450E-01 1.6070E-01 8.9930E-02

4.1710E-02 1.4460E-02 2.7160E-01 1.6690E-01 5.5940E-02 2.8950E+00 8.3140E-01

2.1030E-01 6.1840E-02 6.7990E-01 5.2360E-01 2.8530E-01 1.0490E-01 5.9200E+00

2.5790E+00 4.6900E-02 3.8250E-01 1.7480E-01 7.3310E-02 2.9660E-02 3.5690E-01

1.9300E-01 1.0590E-01 4.7940E-01 5.2750E-01 2.5350E-01 2.9260E-02 2.1180E-01

9.3390E-02 3.6180E-02 1.2150E-02 3.4660E-02 1.8970E-02 9.2790E-03 3.7130E-03

4.7190E-02 2.2930E-02 9.4940E-03 2.8300E-03 7.3780E-01 2.1840E-01 4.1380E-02

6.3720E-03 1.4760E+00 3.5120E-01 5.1340E-02 5.6630E-03 6.8800E-02 3.0430E-02

1.1710E-02 3.7440E-03 1.1800E-01 5.5680E-02 2.3360E-02 8.3080E-03 3.5540E-02

2.2670E-02 1.2790E-02 6.1270E-03 1.0370E-02 6.1000E-03 3.7240E-03 2.2650E-03

7.6660E-03 3.9670E-03 1.8180E-03 6.7610E-04 1.3730E+00 5.9850E-01 1.4440E-02

7.4150E-01 2.1000E-01 3.9990E-02 9.5600E-03 1.2560E-01 1.0060E-01 5.9210E-02

2.5980E-02 9.1100E-01 2.4440E-01 5.8900E-02 1.7980E-02 1.8810E-01 8.4000E-02

3.3390E-02 1.0290E-02 4.3900E-01 1.7250E-01 8.8500E-02 1.5560E-02 2.5590E-01

9.4840E-02 4.4160E-02 2.1710E-02 6.5590E-02 2.9420E-02 1.1250E-02 3.2960E-03

5.4930E-01 2.8100E-01 2.2430E+00 1.5850E-01 2.9960E-02 6.3940E-02 5.8780E-02

4.0260E-02 1.3870E-01 2.7350E-01 2.1550E-01 1.1900E-01 8.2930E-02 7.3060E-02

7.2890E-02 6.8590E-02 3.6200E-01 2.6960E-01 2.4340E-01 1.5300E-01 1.5270E-01

1.3240E-01 1.2520E-01 1.0440E-01 5.9100E-02 1.7460E-01 8.1430E-02 8.0710E-02

9.6490E-02 9.1120E-02 5.4400E-02 1.4220E-01 6.4030E-02 1.2280E-01 2.2410E-01

1.4640E+00 7.9690E-01 1.8560E-01 4.2460E-01 1.2190E-01 2.1860E-01 2.9700E-01

2.5760E+00 7.8770E-01 2.3320E+00 7.1610E-02 1.6280E-01 1.3140E-01 7.3420E-02

1.9290E-01 1.9240E-01 5.2300E-02 3.1760E-01 2.4670E-01 9.7700E-02 2.3920E-01

2.0270E-02 9.1670E-02 7.9850E-02 4.3870E-02 7.0470E-03 1.3260E-02 1.3370E-02

1.0720E-02 3.5130E-03 1.9330E-02 1.9440E-02 1.2660E-02 3.1090E-02 3.9130E-01

2.1440E-01 4.7900E-02 2.4130E-02 7.6650E-01 3.9180E-01 7.6910E-02 1.1340E-02

2.8200E-02 2.3290E-02 1.3220E-02 1.6690E-02 4.8870E-02 4.4020E-02 2.7460E-02

1.5360E-02 1.2600E-02 1.2440E-02 1.0190E-02 3.1240E-03 5.1950E-03 4.2700E-03

2.5090E-03 1.1890E-03 3.0600E-03 2.9970E-03 2.1740E-03 5.9780E-01 1.9020E-01

5.3640E-01 3.5310E-02 3.7430E-01 2.0160E-01 4.1170E-02 8.3220E-02 2.8600E-02

4.2070E-02 5.2940E-02 4.3860E-02 4.8330E-01 2.4820E-01 4.4530E-02 1.6390E-02

8.1430E-02 7.0980E-02 3.9480E-02 2.9270E-01 8.8420E-02 3.2850E-02 6.3930E-02

4.7770E-02 1.4170E-01 7.3130E-02 1.5780E-02 1.1740E-02 2.5900E-02 2.2030E-02

1.3410E-02 8.4150E-02 1.5850E-01 1.0950E+00 8.9090E-03 1.6340E-02 2.9490E-02

4.0520E-02 4.1770E-02 7.1540E-02 1.2260E-01 1.3390E-01 1.9340E-02 4.4380E-02

4.6950E-02 3.8380E-02 9.1640E-02 1.9520E-01 1.4750E-01 7.0680E-02 2.9730E-02

8.6580E-02 8.3510E-02 5.9280E-02 2.9550E-02 3.7150E-03 8.8100E-02 9.0070E-02

6.2080E-02 3.2610E-02 1.2470E-02 2.5770E-02 9.8630E-02 4.0430E-02 7.6510E-02

1.0930E-01 5.9530E-01 5.5400E-01 3.3430E-02 2.6510E-01 1.7910E-01 5.3240E-02

4.6400E-02 2.3310E+00 4.7050E-01 1.5750E-02 3.9280E-02 7.7890E-02 8.6470E-02

1.0580E-01 5.2300E-02 5.9370E-02 1.5900E-01 2.9140E-02 2.2770E-01 4.8690E-02

3.6080E-03 1.1340E-02 4.1040E-02 6.1840E-02 6.8980E-04 4.0990E-03 7.6210E-03

9.7870E-03 5.0230E-05 2.1170E-03 9.1000E-03 1.6200E-02 6.3950E-03 1.8550E-02

1.7410E-01 1.7890E-01 6.6350E-03 1.2950E-02 3.4350E-01 3.0180E-01 1.5060E-03

6.9290E-03 1.4140E-02 1.5590E-02 2.2460E-03 9.5800E-03 2.3940E-02 3.2780E-02

3.7730E-03 8.1310E-03 7.8660E-03 5.2130E-03 1.3570E-03 1.3280E-03 2.0690E-03

2.5210E-03 1.1290E-04 6.9690E-04 1.6110E-03 2.3110E-03 1.4390E-02 5.3610E-01

1.1120E-01 1.1770E-02 1.7390E-02 1.5090E-01 1.6680E-01 1.2980E-02 4.8510E-02

3.2200E-02 9.6960E-03 2.4380E-02 1.4420E-02 1.8630E-01 1.8170E-01 2.6250E-03

8.3800E-03 3.6620E-02 5.4520E-02 1.4630E-01 1.5520E-02 6.3930E-02 1.3380E-02

2.9960E-02 1.3500E-02 4.9650E-02 4.6010E-02 9.5700E-04 7.2970E-03 1.3680E-02

1.4610E-02 3.1320E+00 4.0970E-01 4.7620E-01 2.4170E-01 1.2540E-01 6.1690E-02

7.2800E-01 5.0900E-01 3.6240E-01 2.3440E-01 4.1250E-01 2.7720E-01 1.6460E-01

8.3640E-02 6.6300E-01 4.8560E-01 3.1510E-01 1.2260E-01 1.0330E-01 6.8210E-02

3.9250E-02 2.0710E-02 8.7000E-03 1.3920E-01 8.0910E-02 4.4350E-02 2.2660E-02

1.0490E-02 3.8990E-03 6.6670E-02 4.6170E-02 2.0880E-02 4.5760E-01 2.0800E-01

9.1420E-02 3.5200E-02 2.0020E-01 1.2560E-01 6.9730E-02 3.3270E-02 2.6310E-01

1.2850E-01 1.7970E-02 2.3160E-01 1.2700E-01 6.8170E-02 3.5000E-02 2.9830E-01

2.6120E-01 1.5930E-01 5.9110E+00 1.1120E+01 4.8150E+00 1.8230E-01 6.0070E-02

3.1340E-02 1.6530E-02 9.0810E-03 2.5790E-02 1.3780E-02 6.4440E-03 2.3150E-03

4.4090E-02 2.2570E-02 9.9800E-03 3.2330E-03 2.0520E+01 4.9240E+00 6.7960E-01

2.6380E-02 5.6990E-02 3.3250E-02 2.3190E-02 1.2830E-02 3.0620E-02 1.8570E-02

1.1600E-02 6.9910E-03 2.6390E-02 2.0080E-02 1.6290E-02 1.3070E-02 2.3460E-02

1.4430E-02 7.4950E-03 3.1260E-03 9.2930E-03 5.8480E-03 3.4260E-03 1.8300E-03

1.2710E-02 8.5080E-03 4.9020E-03 2.2140E-03 3.0780E-01 1.2450E-01 4.3030E-03

2.8910E-02 1.6230E-02 1.0190E-02 5.3050E-03 2.2520E-02 1.7820E-02 1.2580E-02

7.8820E-03 1.1420E-01 3.0940E-02 1.0780E-02 4.0210E-03 2.0980E-02 1.0160E-02

4.6060E-03 1.9540E-03 6.3640E-02 3.2470E-02 1.8760E-02 3.9640E-03 2.4380E-02

1.1360E-02 6.5740E-03 3.3400E-03 8.9810E-03 5.1730E-03 2.4890E-03 9.1550E-04

2.3960E+00 8.8610E-02 2.0160E-01 1.9240E-01 1.2620E-01 3.6850E-01 4.2280E-01

2.9190E-01 1.4920E-01 1.6930E-01 1.5890E-01 1.5880E-01 1.5070E-01 4.0830E-01

3.2050E-01 2.3710E-01 1.2890E-01 4.1090E-02 4.4290E-02 3.8280E-02 2.7400E-02

1.3950E-02 2.8770E-02 4.8940E-02 4.8160E-02 3.8030E-02 2.5000E-02 1.2110E-02

4.0410E-02 1.9470E-02 2.9210E-02 1.3180E-01 2.0380E-01 1.3720E-01 5.8470E-02

8.5500E-02 7.3420E-02 6.9560E-02 5.7410E-02 1.2430E-01 4.8640E-02 9.7930E-02

7.2920E-02 1.0240E-01 8.2570E-02 5.0970E-02 2.6110E-01 1.7030E-01 4.9140E-02

3.9400E+00 4.8100E+00 1.8170E+00 4.6660E+00 1.2840E-02 2.7850E-02 2.3550E-02

1.3870E-02 4.7390E-03 9.7340E-03 9.8870E-03 7.8570E-03 5.0010E-03 1.7420E-02

1.7890E-02 1.2940E-02 3.5580E-01 1.1660E+01 5.5200E+00 1.0450E+00 2.6770E-02

3.3580E-02 1.8030E-02 4.8460E-03 1.2050E-02 1.5290E-02 1.1540E-02 6.5960E-03

1.4810E-02 1.6720E-02 1.2290E-02 6.7270E-03 9.6220E-03 7.7140E-03 7.9330E-03

7.0740E-03 3.1590E-03 4.2080E-03 3.6570E-03 2.6620E-03 4.9050E-03 4.0680E-03

4.6430E-03 5.2720E-03 1.2130E-01 3.8870E-02 1.0600E-01 1.2250E-02 1.6580E-02

8.9970E-03 2.8260E-03 1.4580E-02 1.0610E-02 8.6740E-03 6.6370E-03 1.0070E-02

5.0770E-02 2.8270E-02 7.1260E-03 3.3370E-03 9.0500E-03 7.9610E-03 4.8140E-03

3.7320E-02 1.8750E-02 8.1680E-03 1.1290E-02 7.8470E-03 1.3770E-02 7.5150E-03

2.1890E-03 3.1920E-03 2.9170E-03 2.9810E-03 2.5690E-03 2.2520E-02 4.6400E-02

9.2370E-02 1.3810E-01 1.9690E-01 1.4040E-01 1.3640E-01 1.2810E-01 3.4120E-02

9.2190E-02 1.0190E-01 8.6820E-02 1.4810E-01 1.7680E-01 1.3240E-01 6.8380E-02

1.1910E-02 1.9980E-02 2.1780E-02 1.8080E-02 1.0070E-02 3.9930E-03 1.3860E-02

2.2410E-02 2.5650E-02 2.1780E-02 1.2460E-02 1.1800E-02 2.3500E-02 9.3310E-03

4.2960E-02 6.5620E-02 9.1190E-02 6.6580E-02 2.0580E-02 4.6000E-02 4.4490E-02

3.1830E-02 1.7410E-02 9.5740E-02 2.2210E-02 2.5180E-02 3.5340E-02 4.7710E-02

4.6480E-02 1.5920E-01 4.9140E-02 2.9490E-02 1.9690E+00 1.8090E-01 4.2840E+00

9.5180E-01 5.0760E-03 5.9150E-03 1.1940E-02 1.5990E-02 2.2430E-04 2.8470E-03

5.6340E-03 7.4000E-03 6.0170E-05 3.0190E-03 8.9940E-03 1.4560E-02 5.3490E-03

2.5710E-01 4.7330E+00 4.6230E+00 1.7810E-02 7.0660E-03 9.6510E-03 7.7790E-03

5.6140E-03 5.0290E-03 6.0500E-03 5.7410E-03 9.3460E-03 5.3180E-03 5.1190E-03

5.4750E-03 1.5730E-03 5.5630E-03 5.3630E-03 3.6600E-03 9.0090E-04 1.6220E-03

1.9930E-03 2.0710E-03 4.0540E-04 2.8780E-03 3.3320E-03 2.8160E-03 4.2370E-03

1.0680E-01 2.2130E-02 7.2590E-03 3.7570E-03 5.1310E-03 4.2150E-03 6.2470E-03

6.4720E-03 4.7410E-03 2.7680E-03 5.3980E-03 3.6090E-03 2.0770E-02 1.9620E-02

6.7690E-04 1.7550E-03 4.2080E-03 5.7790E-03 1.8410E-02 3.9520E-03 1.1290E-02

2.8170E-03 4.5610E-03 2.4950E-03 4.5640E-03 3.7240E-03 3.7130E-04 1.9310E-03

2.0280E-03 1.5040E-03 8.6310E+00 4.5840E-01 6.3630E-02 2.6400E+00 6.9380E-01

1.0850E-01 1.4900E-02 3.2530E+00 1.0260E+00 2.8680E-01 3.2910E-02 6.7230E-01

4.4780E-01 1.0490E-01 2.1430E-02 2.3440E-01 1.1850E-01 4.7020E-02 1.3620E-02

1.7790E-03 2.8400E-01 1.3280E-01 5.3280E-02 1.7200E-02 4.0640E-03 5.0080E-04

2.1840E-01 7.1290E-02 9.8380E-03 3.4490E-01 9.5890E-02 2.4210E-02 4.4490E-03

3.8990E-01 1.3000E-01 3.2790E-02 5.9940E-03 9.4650E-02 3.7420E-02 4.7450E-03

1.4280E+00 4.0290E-01 2.1550E-01 4.4260E-02 1.9230E-01 3.1640E-02 4.5650E-03

1.0810E-02 2.0350E-02 1.1910E-02 1.3630E-03 1.7520E+01 8.1070E-01 1.4390E-02

1.3670E-03 2.9310E+01 2.4890E+00 8.1270E-02 1.1250E-03 3.9050E+01 3.1290E+00

1.1920E-01 3.0740E-03 1.9040E-02 4.7830E-03 9.5140E-04 1.2190E-04 3.7650E-02

8.8800E-03 7.2120E-04 7.8930E-05 4.7880E-02 1.6450E-02 3.5000E-03 1.7740E-04

6.6220E+00 2.3880E-01 6.0390E-03 1.1300E-03 1.2990E-01 4.0970E-02 9.5360E-03

1.2230E-03 7.1650E-01 8.2290E-02 1.7530E-02 3.0850E-03 2.2020E+00 2.0820E-01

2.3580E-02 3.3220E-03 8.8170E-03 8.2090E-04 4.1770E-05 1.9740E-02 5.4140E-03

7.6840E-04 5.6190E-05 2.7480E-02 6.7140E-03 1.2540E-03 1.5350E-04 4.0780E-02

6.9150E-03 7.7620E-04 1.7240E-04 1.8070E-01 1.7800E-02 2.3800E-03 2.4490E-04

4.4870E-03 4.2930E-03 2.0610E-03 4.6170E-04 2.3050E-02 3.8720E-03 9.7170E-04

2.1960E-05 4.4790E-02 9.5980E-03 1.5270E-03 1.6400E-04 1.3280E+01 5.4760E-01

9.4290E-01 1.3220E+00 6.4680E-01 1.1470E-01 1.0850E+00 2.1070E+00 1.2450E+00

3.1800E-01 5.7900E-01 6.3280E-01 3.2220E-01 8.7530E-02 1.2660E-01 1.1160E-01

7.2760E-02 4.1620E-02 1.8960E-02 1.1710E-01 1.1970E-01 9.3870E-02 5.6400E-02

2.5630E-02 7.9580E-03 1.2180E-01 8.7470E-02 4.7610E-02 1.5830E-01 1.5770E-01

6.5560E-02 2.0830E-02 1.6530E-01 1.7760E-01 1.0270E-01 3.3420E-02 6.4080E-02

3.1950E-02 2.1360E-02 5.4630E-01 9.4960E-01 6.6080E-01 2.1520E-01 1.0060E-01

7.8240E-02 1.7610E-02 9.2690E-03 1.6320E-02 5.6260E-03 6.8640E-03 1.8430E+00

1.2680E+01 1.0100E+00 1.5990E-02 2.4340E+00 2.7180E+01 3.0730E+00 9.5870E-02

2.9850E-01 3.5450E+01 4.0340E+00 1.3920E-01 8.2550E-03 8.6780E-03 3.4750E-03

8.8730E-04 1.5790E-02 1.5920E-02 8.1150E-03 6.8730E-04 2.0730E-02 2.0230E-02

1.3310E-02 3.9690E-03 5.5030E-01 4.9790E+00 2.9350E-01 6.7700E-03 5.2900E-02

5.9770E-02 3.2900E-02 1.0200E-02 1.1240E-01 4.9570E-01 7.5620E-02 1.8640E-02

2.0820E-01 1.6380E+00 2.3480E-01 2.5910E-02 4.2090E-03 3.6160E-03 4.9230E-04

8.9650E-03 8.0190E-03 4.4250E-03 7.7380E-04 9.3150E-03 1.3530E-02 5.9300E-03

1.3500E-03 1.4990E-02 2.0270E-02 6.1610E-03 6.6360E-04 2.5970E-02 1.2250E-01

1.8440E-02 2.6620E-03 3.8460E-03 3.2000E-03 1.5840E-03 1.1000E-03 8.1590E-03

1.2560E-02 2.2290E-03 1.0430E-03 1.4030E-02 2.3400E-02 8.9280E-03 1.6650E-03

1.2690E+01 2.4850E-01 8.8350E-01 8.8110E-01 5.1880E-01 2.9670E-01 1.2940E+00

1.6590E+00 1.0720E+00 2.6330E-01 5.2970E-01 4.1020E-01 2.2030E-01 5.6030E-02

8.1320E-02 8.2900E-02 6.1330E-02 3.0900E-02 3.4900E-02 8.3500E-02 8.4540E-02

7.0300E-02 5.0580E-02 2.6560E-02 5.8330E-02 8.4250E-02 7.1440E-02 6.5860E-02

1.1830E-01 1.0510E-01 4.4760E-02 5.7910E-02 1.3250E-01 1.2400E-01 8.5250E-02

3.7900E-02 3.5280E-02 2.4550E-02 2.1240E-01 5.8820E-01 1.1280E+00 5.4570E-01

4.7820E-02 7.5960E-02 4.0100E-02 7.7240E-03 1.0680E-02 7.1800E-03 6.1480E-03

9.3580E-02 2.3450E+00 9.8040E+00 7.7040E-01 4.0600E-02 3.0410E+00 1.7400E+01

2.3710E+00 7.1870E-03 9.8590E-01 3.0780E+01 3.1140E+00 3.1160E-03 6.5420E-03

5.7270E-03 2.4350E-03 4.9780E-03 1.3870E-02 9.1600E-03 5.7140E-03 6.5980E-03

1.6720E-02 1.3930E-02 1.1240E-02 2.9370E-02 6.8800E-01 3.9140E+00 2.2470E-01

1.7430E-02 4.3030E-02 4.1840E-02 2.7510E-02 2.3830E-02 1.1160E-01 3.8640E-01

6.4230E-02 2.3570E-02 2.3280E-01 1.3120E+00 1.8830E-01 1.7650E-03 3.4770E-03

1.7450E-03 3.1880E-03 7.2350E-03 5.0150E-03 3.1320E-03 2.6350E-03 8.3780E-03

9.4450E-03 4.8280E-03 4.4520E-03 1.3760E-02 1.2480E-02 4.2840E-03 3.7810E-03

2.7790E-02 9.4240E-02 1.5040E-02 3.2050E-03 2.0540E-03 1.6690E-03 1.1420E-03

2.9720E-03 6.8460E-03 8.6190E-03 1.6210E-03 3.5390E-03 1.3300E-02 1.6100E-02

7.1920E-03 4.6050E-02 2.8490E-01 7.5800E-01 9.4800E-01 5.0240E-02 4.2770E-01

1.2350E+00 1.9010E+00 9.8640E-02 3.0940E-01 4.4160E-01 3.1040E-01 1.4830E-02

5.5560E-02 7.2540E-02 6.6340E-02 3.9460E-02 5.7680E-03 3.1560E-02 6.2330E-02

7.5550E-02 6.6000E-02 3.7910E-02 1.9970E-02 7.0880E-02 8.0250E-02 2.2410E-02

6.9400E-02 9.8390E-02 7.6420E-02 1.4600E-02 6.1780E-02 1.1670E-01 1.2600E-01

1.8470E-02 3.8730E-02 2.0970E-02 1.0120E-01 4.0270E-01 8.1400E-01 1.0740E+00

1.9800E-02 5.4110E-02 5.7100E-02 6.1800E-03 5.4810E-03 1.0510E-02 3.2460E-03

4.6120E-03 1.1370E-01 1.9710E+00 1.2070E+01 1.1240E-03 9.5870E-02 2.3530E+00

1.5900E+01 1.2750E-03 1.9490E-02 1.5130E+00 2.7700E+01 8.9240E-04 3.4700E-03

5.5170E-03 4.3470E-03 1.0440E-03 5.9270E-03 1.1670E-02 8.3870E-03 1.0630E-03

7.5930E-03 1.5020E-02 1.5150E-02 1.5190E-03 3.5300E-02 5.3250E-01 3.2820E+00

3.7640E-03 1.9330E-02 3.8210E-02 4.2640E-02 4.5430E-03 2.5970E-02 9.3710E-02

3.5140E-01 3.3210E-03 2.5900E-02 1.9280E-01 1.1910E+00 5.3320E-04 2.2360E-03

2.7860E-03 7.7250E-04 3.6880E-03 6.2010E-03 4.1800E-03 4.9630E-04 2.9770E-03

7.1980E-03 9.6150E-03 1.0680E-03 5.1970E-03 1.1380E-02 1.0310E-02 4.4340E-04

4.3500E-03 2.2790E-02 8.6390E-02 2.5640E-03 1.2000E-03 1.7860E-03 8.5700E-04

7.4230E-04 3.4030E-03 5.7900E-03 6.1950E-03 5.9910E-04 4.0170E-03 1.1270E-02

1.6140E-02 7.0710E+00 3.3800E-01 7.4180E-02 1.6280E+00 6.8870E-01 2.1070E-01

4.6880E-02 1.9370E+00 9.1830E-01 2.6890E-01 5.5220E-02 1.4670E-01 7.8160E-02

3.9920E-02 2.0940E-02 9.3920E-03 2.4930E-01 1.5340E-01 9.2450E-02 5.0850E-02

2.4080E-02 8.7440E-03 1.6030E-01 7.7320E-02 2.1920E-02 8.2790E-01 1.4990E-01

4.4060E-02 1.4300E-02 4.5040E-01 1.6600E-01 6.2910E-02 2.1770E-02 1.8940E-01

8.7450E-02 1.6550E-02 1.0880E+00 7.3240E-01 2.4850E-01 8.9590E-02 2.4220E-01

1.0000E-01 3.7810E-02 1.8310E-01 2.1760E-01 1.1080E-01 4.9610E-02 8.7950E+00

1.0250E+00 8.4900E-02 6.6580E-03 3.9970E-01 2.1080E-01 5.1560E-02 7.4340E-03

5.7530E-01 2.1470E-01 6.2510E-02 6.4520E-03 1.6750E-01 2.6690E-02 1.7780E-02

9.3400E-03 1.7990E+01 4.2970E-01 7.0840E-03 7.3270E-04 2.3030E+01 2.6890E+00

1.1370E-01 9.4430E-04 2.5660E+01 2.5840E+00 1.5000E-01 5.3610E-03 7.6990E-01

1.1460E-01 9.5110E-03 1.1940E-03 5.9380E-01 8.5440E-02 1.2360E-02 2.1950E-03

6.2260E-02 2.9650E-02 1.0790E-02 2.1530E-03 4.2290E-02 1.1150E-02 1.7330E-03

7.9660E-01 4.8510E-02 6.5500E-03 1.6920E-03 4.0150E-01 6.7150E-02 1.0050E-02

2.0740E-03 4.3350E-02 1.5820E-02 4.5740E-03 1.1180E-03 5.5200E-02 2.2290E-02

6.7090E-03 1.8630E-03 1.0390E-02 7.8630E-03 4.7700E-03 1.9440E-03 2.0530E-02

9.0320E-03 3.6650E-03 1.2340E-03 4.5100E-02 2.1210E-02 5.6650E-03 1.6050E-03

8.6510E+00 3.5680E-01 5.0390E-01 9.0190E-01 5.9460E-01 2.2790E-01 9.7780E-01

1.0050E+00 6.0670E-01 2.3120E-01 7.0140E-02 7.5940E-02 5.3970E-02 2.9200E-02

1.1430E-02 1.2830E-01 1.1990E-01 8.5030E-02 6.0930E-02 4.4120E-02 2.4570E-02

9.5560E-02 6.1300E-02 5.0710E-02 2.3110E-01 4.5660E-01 1.1050E-01 2.9980E-02

1.6590E-01 2.2210E-01 1.1720E-01 5.6140E-02 1.2360E-01 6.1680E-02 4.9490E-02

7.3240E-01 5.9760E-01 5.6920E-01 2.1720E-01 1.4970E-01 1.0820E-01 4.6330E-02

1.4650E-01 1.4940E-01 1.0550E-01 4.7440E-02 4.2660E-01 6.2420E+00 1.2340E+00

1.0350E-01 1.5190E-01 2.9360E-01 1.9830E-01 6.0050E-02 1.1410E-01 6.4880E-01

3.6380E-01 7.4860E-02 4.2570E-02 1.1330E-01 1.5300E-02 6.3840E-03 2.4820E+00

1.1780E+01 4.7060E-01 4.6600E-03 2.6790E+00 1.4610E+01 3.2170E+00 1.4090E-01

7.5620E-01 1.8630E+01 3.3570E+00 1.8810E-01 1.1280E-01 4.7590E-01 1.1850E-01

1.0800E-02 3.4110E-02 4.5630E-01 9.1150E-02 1.3820E-02 2.4270E-02 2.5570E-02

2.1960E-02 1.2090E-02 2.1530E-02 1.6060E-02 6.4990E-03 1.4150E-01 4.8850E-01

4.4500E-02 5.1810E-03 6.6880E-02 2.3660E-01 6.8370E-02 1.0480E-02 1.9280E-02

1.7700E-02 1.0880E-02 3.7190E-03 1.7670E-02 2.7370E-02 1.8340E-02 6.9340E-03

8.3120E-03 5.9510E-03 3.5540E-03 2.1310E-03 1.0310E-02 8.9810E-03 5.8820E-03

2.3400E-03 1.7410E-02 2.0620E-02 1.8550E-02 5.4970E-03 6.5010E+00 1.3120E-01

5.0040E-01 6.1270E-01 5.0160E-01 4.1700E-01 7.6120E-01 6.4470E-01 3.8270E-01

3.5440E-02 4.9740E-02 4.5620E-02 3.3520E-02 1.7610E-02 6.4640E-02 6.2860E-02

8.0330E-02 7.1770E-02 4.6580E-02 2.0870E-02 4.8010E-02 5.6690E-02 5.0960E-02

7.3230E-02 1.9770E-01 2.8140E-01 6.8500E-02 6.2900E-02 1.1710E-01 1.5180E-01

8.9340E-02 6.7730E-02 6.4620E-02 4.3740E-02 2.4840E-01 5.6920E-01 6.4020E-01

4.2940E-01 9.0110E-02 8.8050E-02 5.0150E-02 1.0990E-01 1.0020E-01 8.2360E-02

4.4260E-02 1.9120E-02 4.9570E-01 4.5380E+00 9.5730E-01 2.0490E-02 1.4440E-01

1.9430E-01 1.6860E-01 4.9230E-03 2.0400E-01 4.4260E-01 3.0000E-01 2.2100E-02

3.7260E-02 6.9360E-02 5.6710E-03 1.9620E-01 3.0020E+00 7.5300E+00 3.2830E-01

1.0920E-01 3.3040E+00 9.6350E+00 2.4480E+00 7.1500E-03 9.2200E-01 1.3690E+01

2.5810E+00 9.3140E-03 1.1820E-01 3.1610E-01 9.0390E-02 6.2730E-03 3.2960E-02

3.8950E-01 7.4670E-02 6.2980E-03 1.7910E-02 1.8490E-02 2.0220E-02 9.7280E-03

1.4320E-02 9.0560E-03 2.0460E-02 1.5050E-01 3.0880E-01 2.9960E-02 9.9820E-03

6.8180E-02 1.5370E-01 5.2360E-02 7.4040E-03 1.3630E-02 1.0470E-02 6.8510E-03

4.6430E-03 1.4580E-02 1.8980E-02 1.5330E-02 6.2330E-03 4.0760E-03 2.9530E-03

1.6510E-03 5.4640E-03 6.7290E-03 6.0070E-03 3.0180E-03 5.0370E-03 1.2490E-02

1.4440E-02 1.4340E-02 2.6450E-02 1.5080E-01 3.9810E-01 5.8740E-01 1.2910E-01

4.2660E-01 5.5460E-01 3.6620E-01 1.9240E-02 2.3330E-02 3.0750E-02 2.9630E-02

1.8070E-02 2.1060E-02 4.9860E-02 5.0940E-02 4.7450E-02 3.9200E-02 2.2790E-02

1.9110E-02 4.6840E-02 3.7830E-02 2.7420E-02 6.5610E-02 1.4390E-01 1.7600E-01

2.1770E-02 5.6130E-02 8.9300E-02 1.1350E-01 3.0110E-02 6.0100E-02 2.7130E-02

8.9560E-02 2.1720E-01 4.2940E-01 5.2160E-01 5.0680E-02 5.8620E-02 4.2140E-02

7.3250E-02 6.2040E-02 5.4080E-02 3.5090E-02 2.7900E-03 2.1020E-02 3.7570E-01

3.6070E+00 1.3970E-03 2.3060E-02 1.1570E-01 2.1180E-01 4.2940E-04 5.3690E-03

1.5610E-01 4.7250E-01 1.4730E-02 1.1000E-02 2.2280E-02 4.0240E-02 7.5630E-03

2.6770E-01 2.3000E+00 5.3960E+00 9.4410E-04 1.4020E-01 2.4990E+00 7.7600E+00

1.9190E-03 7.1170E-03 6.9060E-01 1.0690E+01 1.1860E-03 1.0790E-02 9.4350E-02

2.5380E-01 1.2980E-03 6.7200E-03 2.6210E-02 3.1740E-01 5.8450E-04 6.9410E-03

1.5490E-02 1.8930E-02 3.6770E-03 9.9470E-03 8.4530E-03 3.8530E-03 2.3120E-02

1.1470E-01 1.9960E-01 2.0590E-03 1.0470E-02 5.2250E-02 1.2460E-01 2.4360E-03

7.1230E-03 9.9990E-03 6.3900E-03 1.1560E-03 4.4840E-03 1.1600E-02 1.8190E-02

4.1560E-03 2.4930E-03 2.2740E-03 1.0500E-03 2.3010E-03 4.0410E-03 4.2070E-03

2.7700E-03 1.2850E-03 5.4080E-03 1.0140E-02 1.1410E-02 7.4410E+00 3.2040E-01

5.0010E-02 1.9340E+00 6.2100E-01 1.7940E-01 4.7460E-02 1.3550E-01 6.6710E-02

2.6910E-02 9.5090E-03 2.5220E-03 2.4540E-01 1.4090E-01 7.0860E-02 2.9930E-02

9.7910E-03 2.0510E-03 1.1340E-01 2.6710E-02 7.5900E-03 3.3910E-01 1.1320E-01

3.4230E-02 6.7260E-03 8.3790E-01 1.3050E-01 3.7490E-02 1.1730E-02 1.5400E-01

3.4460E-02 9.9290E-03 1.7000E+00 5.3590E-01 1.5700E-01 5.5630E-02 1.9780E-01

6.4720E-02 9.9800E-03 4.5520E-03 2.0280E-02 5.0810E-03 1.8490E-03 1.7960E+00

2.1120E-01 2.7300E-02 2.7860E-03 3.2920E+00 3.4850E-01 3.9100E-02 5.0340E-03

1.0650E-01 9.1350E-02 2.8840E-02 4.5770E-03 2.2440E-02 1.0970E-02 3.3270E-03

4.8110E-04 5.7510E-02 1.7260E-02 2.7710E-03 4.1130E-04 6.2020E-01 3.4200E-02

5.5940E-03 1.5620E-03 1.3550E-01 4.4560E-02 1.2740E-02 2.2440E-03 2.0380E+01

6.3340E-01 6.0400E-03 7.8060E-04 2.7060E+01 2.4570E+00 9.3830E-02 6.5820E-04

3.5470E+01 2.8180E+00 1.3020E-01 4.8690E-03 3.1650E-02 6.2310E-03 2.1570E-03

6.7580E-02 2.6590E-02 9.9990E-03 2.6170E-03 1.8020E+00 8.2000E-02 1.2190E-02

4.0570E-03 4.9810E-02 1.3750E-02 3.3950E-03 3.6980E-04 1.3010E-01 2.5960E-02

5.0260E-03 7.6400E-04 9.8380E-04 1.0710E-02 3.2630E-03 8.3060E-04 2.3230E-02

8.0650E-03 2.1550E-03 4.7040E-04 7.9110E-02 1.7200E-02 3.2750E-03 5.3770E-04

1.1670E+01 3.6540E-01 8.4760E-01 1.1850E+00 4.3000E-01 1.3560E-01 6.4660E-02

7.1670E-02 4.2820E-02 2.3120E-02 9.9620E-03 1.2500E-01 9.9260E-02 8.1010E-02

5.8660E-02 3.5690E-02 1.6030E-02 5.2040E-02 5.3840E-02 1.7200E-02 1.6000E-01

1.5210E-01 7.4040E-02 2.7130E-02 1.8270E-01 5.2250E-01 1.0600E-01 3.3950E-02

8.1450E-02 6.6450E-02 1.7530E-02 6.2980E-01 8.3300E-01 4.4260E-01 1.3570E-01

1.2050E-01 7.2360E-02 3.6580E-02 3.7930E-03 1.1170E-02 9.1540E-03 2.4470E-03

2.0880E-01 1.1430E+00 2.2590E-01 3.1380E-02 1.9350E-01 2.5130E+00 4.0510E-01

4.4420E-02 7.6250E-02 1.1400E-01 7.5710E-02 3.2080E-02 1.3630E-02 8.1650E-03

6.3850E-03 3.0700E-03 2.5320E-02 2.2890E-02 1.4150E-02 2.5120E-03 8.2820E-02

4.3640E-01 3.3470E-02 5.2940E-03 4.4530E-02 6.8520E-02 3.5680E-02 1.3830E-02

2.0830E+00 1.4610E+01 7.6920E-01 6.8090E-03 2.4480E+00 1.9110E+01 3.0230E+00

1.1250E-01 5.0600E-01 2.8080E+01 3.5940E+00 1.5680E-01 1.6080E-02 1.4090E-02

3.0120E-03 3.5740E-02 3.0560E-02 1.5310E-02 7.7710E-03 2.0480E-01 1.2550E+00

8.2950E-02 1.1190E-02 2.0910E-02 2.2800E-02 9.2880E-03 3.1940E-03 2.5900E-02

8.9520E-02 2.5560E-02 5.5690E-03 8.2000E-04 6.2920E-03 4.3550E-03 1.6870E-03

1.1290E-02 9.6590E-03 6.0110E-03 1.7350E-03 2.1890E-02 4.2930E-02 1.4920E-02

3.4430E-03 9.2630E+00 3.5720E-01 7.6190E-01 7.5980E-01 2.7940E-01 2.7620E-02

4.3290E-02 4.9490E-02 3.5220E-02 1.5760E-02 4.7510E-02 7.4350E-02 7.1980E-02

6.2870E-02 4.8620E-02 2.7060E-02 2.2290E-02 4.3560E-02 3.2570E-02 6.9240E-02

1.1270E-01 1.0030E-01 4.7840E-02 5.2280E-02 1.6530E-01 3.7630E-01 8.3120E-02

4.1560E-02 5.8910E-02 3.1870E-02 2.1440E-01 5.2800E-01 5.4870E-01 3.4180E-01

6.4440E-02 7.2270E-02 4.6230E-02 3.0350E-03 6.0400E-03 7.9200E-03 4.1660E-03

2.7130E-02 2.2590E-01 8.4570E-01 1.8140E-01 2.1840E-02 2.1420E-01 1.9700E+00

3.2080E-01 1.9260E-02 6.2300E-02 8.6370E-02 7.0670E-02 6.6170E-03 7.9440E-03

6.2630E-03 4.1990E-03 8.5770E-03 2.0370E-02 1.3340E-02 9.7510E-03 1.0420E-02

9.0820E-02 3.1970E-01 2.5770E-02 1.2730E-02 3.5680E-02 5.0200E-02 3.1410E-02

1.2360E-01 2.5820E+00 1.0700E+01 5.7680E-01 9.0410E-02 3.0210E+00 1.4330E+01

2.3180E+00 3.5920E-03 1.5190E+00 2.2150E+01 2.7650E+00 8.1030E-03 1.2220E-02

6.3000E-03 1.7690E-02 2.2550E-02 2.1360E-02 9.6050E-03 2.4740E-02 2.3660E-01

9.3870E-01 6.3310E-02 7.9140E-03 1.5560E-02 1.5160E-02 6.3030E-03 5.0200E-03

2.5560E-02 6.5420E-02 2.0910E-02 6.5600E-04 3.4000E-03 4.0520E-03 2.3320E-03

4.7020E-03 8.0470E-03 6.4500E-03 3.9820E-03 5.1400E-03 1.9900E-02 2.9500E-02

1.1940E-02 1.4130E-01 3.7680E-01 5.9560E-01 5.1890E-01 9.1400E-03 2.5610E-02

3.5410E-02 3.4420E-02 2.1860E-02 9.7620E-03 4.1980E-02 6.1340E-02 6.1950E-02

4.8130E-02 2.5820E-02 9.2330E-03 2.3530E-02 4.0890E-02 2.6220E-02 6.7880E-02

8.8340E-02 6.4750E-02 1.7310E-02 5.1380E-02 1.3310E-01 3.0570E-01 2.0720E-02

3.8700E-02 3.9840E-02 7.9570E-02 2.0260E-01 4.2630E-01 5.1590E-01 2.9370E-02

6.4570E-02 4.3640E-02 2.2760E-03 3.3660E-03 5.0690E-03 5.1540E-03 2.7720E-03

3.1390E-02 1.8130E-01 7.7210E-01 2.7520E-03 2.4030E-02 1.7140E-01 1.6990E+00

1.0350E-03 2.1260E-02 5.6800E-02 9.8850E-02 2.1560E-03 6.6940E-03 6.3930E-03

3.3350E-03 2.1380E-03 9.6590E-03 1.6550E-02 1.0680E-02 2.4310E-03 1.1190E-02

7.1280E-02 2.5080E-01 2.2440E-03 1.3830E-02 3.1410E-02 4.9960E-02 4.0420E-03

1.5580E-01 1.9870E+00 8.3790E+00 6.5790E-04 1.1220E-01 2.3190E+00 1.2400E+01

4.8350E-04 4.2780E-03 1.1550E+00 1.8710E+01 4.1410E-03 7.3200E-03 8.4130E-03

7.6000E-03 1.6540E-02 1.7190E-02 1.2140E-02 6.0590E-03 2.6530E-02 1.8380E-01

7.3380E-01 2.1800E-03 8.5490E-03 1.2600E-02 1.0230E-02 7.6350E-04 5.4730E-03

2.0910E-02 5.3920E-02 4.9200E-04 1.7770E-03 3.0940E-03 2.4550E-03 1.6300E-03

4.6780E-03 6.4350E-03 4.2350E-03 1.0040E-03 5.6740E-03 1.6430E-02 2.6680E-02

4.6410E+00 4.7770E-01 1.8850E-01 7.2820E-02 4.8670E-02 2.8950E-02 1.6220E-02

7.3420E-03 9.0590E-02 6.2210E-02 4.3220E-02 3.0330E-02 2.0050E-02 1.0160E-02

6.5480E-02 3.5620E-02 2.2800E-02 6.8560E-01 4.0960E-01 1.2350E-01 4.1510E-02

6.5200E-01 1.9680E-01 2.1110E-01 7.1080E-02 7.4470E-01 1.2290E-01 3.9180E-02

1.0820E+00 6.0190E-01 3.2470E-01 1.6740E-01 6.7200E-01 3.8160E-01 4.7690E-02

3.9200E-02 2.0430E-01 5.5680E-02 3.0190E-02 1.8600E-01 8.2040E-02 2.5570E-02

5.4660E-03 1.3370E-01 5.5800E-02 1.9370E-02 4.9440E-03 1.1770E-01 5.3400E-02

1.8880E-02 4.1850E-03 3.8380E-02 2.0890E-02 1.2050E-02 5.5560E-03 2.2230E+00

4.2150E-01 2.5320E-02 4.3410E-03 2.0490E+00 3.2080E-01 4.4240E-02 8.5940E-03

1.1940E-01 6.1760E-02 2.6840E-02 8.9790E-03 2.8000E+00 4.0700E-01 4.7600E-02

7.9120E-03 1.5110E-01 5.6840E-02 2.0990E-02 7.4350E-03 1.6880E-01 7.2830E-02

3.1740E-02 1.2420E-02 1.2590E+01 2.2040E-01 5.8680E-03 1.7090E+01 3.1410E+00

1.1940E-01 2.8300E-03 2.6750E+01 3.3900E+00 2.7800E-01 1.5160E-02 1.3140E-01

4.6060E-02 1.2390E-02 2.4160E-03 2.6340E-02 1.4850E-02 7.1880E-03 2.7650E-03

3.1630E-02 1.1950E-01 1.7890E-02 8.4600E-03 4.7310E-02 2.5260E-02 1.0120E-02

2.6370E-03 3.4950E-02 1.3420E-02 5.0740E-03 1.3310E-03 5.2620E+00 2.8020E-01

4.1730E-02 3.3500E-02 2.8870E-02 1.8990E-02 7.7560E-03 4.8930E-02 4.8190E-02

4.2120E-02 2.9770E-02 1.6670E-02 6.7740E-03 3.7880E-02 3.6820E-02 1.8250E-02

2.0520E-01 3.9970E-01 1.0530E-01 8.6930E-02 3.2420E-01 1.8680E-01 1.4430E-01

7.8190E-02 2.1360E-01 3.4920E-01 5.7110E-02 5.2220E-01 5.0380E-01 3.7840E-01

2.2880E-01 4.5170E-01 1.2980E-01 2.4440E-01 2.9390E-02 8.9360E-02 1.0600E-01

1.9210E-02 5.5950E-02 7.0120E-02 6.8440E-02 2.9810E-02 3.0960E-02 6.0690E-02

4.6510E-02 2.2170E-02 2.8810E-02 4.9660E-02 4.4640E-02 2.2430E-02 2.0700E-02

2.0420E-02 1.1260E-02 5.3870E-03 4.2010E-01 1.0920E+00 4.6750E-01 2.5120E-02

9.2720E-02 1.3240E+00 3.5740E-01 5.0410E-02 4.6290E-02 4.7400E-02 4.1430E-02

2.7660E-02 9.2440E-02 1.8400E+00 4.6950E-01 5.6110E-02 3.4220E-02 7.5970E-02

4.6030E-02 2.1150E-02 4.1980E-02 8.5500E-02 5.4890E-02 3.2040E-02 3.0200E+00

6.4410E+00 1.5620E-01 3.1370E+00 8.4130E+00 3.5480E+00 1.5110E-01 6.1750E-01

1.5910E+01 4.0980E+00 3.6950E-01 4.6030E-02 5.3490E-02 3.3040E-02 1.1750E-02

1.1630E-02 1.0170E-02 9.2650E-03 7.0100E-03 2.3720E-02 3.8380E-02 6.1480E-02

7.0420E-03 2.5250E-02 1.7020E-02 1.3570E-02 8.4750E-03 9.6130E-03 1.6630E-02

9.1790E-03 4.9060E-03 3.5760E+00 2.0290E-02 2.5630E-02 1.8060E-02 1.4530E-02

9.4400E-03 2.8030E-02 3.2370E-02 2.4450E-02 1.9200E-02 1.5260E-02 8.9580E-03

2.2940E-02 2.1970E-02 1.6890E-02 9.9230E-02 1.6260E-01 2.3240E-01 5.7190E-02

1.0490E-01 1.1340E-01 1.2550E-01 9.6950E-02 7.9370E-02 1.6850E-01 1.4220E-01

2.4160E-01 3.1330E-01 2.9840E-01 2.3580E-01 1.9920E-01 2.1740E-01 1.3410E-01

1.9600E-02 4.6200E-02 5.9600E-02 3.8700E-02 6.4740E-03 4.9370E-02 3.7910E-02

5.5840E-02 4.8240E-03 2.4680E-02 3.8230E-02 3.9150E-02 2.8530E-03 2.4470E-02

3.0810E-02 3.8890E-02 1.2030E-02 1.1130E-02 1.0780E-02 4.5880E-03 2.4840E-02

4.6730E-01 5.1870E-01 3.2670E-01 1.6010E-02 7.9940E-02 8.4900E-01 2.7230E-01

1.2800E-02 3.0270E-02 3.2110E-02 3.3320E-02 1.4880E-02 8.1720E-02 1.1860E+00

3.5850E-01 9.2970E-03 2.4190E-02 4.8470E-02 3.6220E-02 1.3590E-02 2.5460E-02

5.8720E-02 4.5120E-02 4.1280E-01 3.3820E+00 2.6240E+00 1.1800E-01 3.5470E+00

4.0020E+00 2.4990E+00 1.0590E-02 6.8780E-01 1.0140E+01 3.1430E+00 1.2390E-02

3.3040E-02 3.0870E-02 2.0020E-02 3.8200E-03 7.0190E-03 7.4920E-03 7.3730E-03

1.5820E-02 1.5230E-02 3.3150E-02 2.3740E-02 1.0120E-02 1.3390E-02 1.2420E-02

6.6750E-03 2.9400E-03 5.8270E-03 1.1240E-02 6.7350E-03 8.8260E-03 9.1870E-03

1.1740E-02 8.9970E-03 4.0000E-03 1.5720E-02 9.9730E-03 1.2400E-02 1.2330E-02

9.0850E-03 4.5700E-03 1.1380E-02 8.7870E-03 1.0700E-02 3.8080E-02 8.1020E-02

1.3080E-01 3.9090E-02 3.5950E-02 7.7980E-02 6.4850E-02 6.9310E-02 2.9450E-02

5.5130E-02 1.0160E-01 9.6080E-02 1.3620E-01 1.6570E-01 1.4670E-01 5.3650E-02

1.8900E-01 3.2640E-02 9.7980E-03 2.2340E-02 1.7360E-02 3.2490E-02 8.3740E-04

6.1900E-03 3.4240E-02 3.3510E-02 5.5790E-04 4.6000E-03 1.7350E-02 3.0920E-02

2.4490E-05 3.0880E-03 1.7600E-02 2.7820E-02 5.5530E-03 5.3830E-03 4.5320E-03

3.7780E-03 4.2890E-03 2.5020E-02 3.2660E-01 3.1300E-01 3.5590E-03 1.3560E-02

5.3390E-02 5.3810E-01 2.3010E-03 1.1310E-02 2.0160E-02 2.0470E-02 3.0990E-03

1.2980E-02 5.4940E-02 7.4930E-01 2.3600E-03 7.1990E-03 1.5830E-02 3.3720E-02

2.9680E-03 1.1070E-02 1.6950E-02 4.0450E-02 1.7500E-02 6.3920E-01 2.5510E+00

2.7030E-03 1.5100E-01 2.4980E+00 2.4260E+00 5.0520E-03 4.7920E-03 4.7880E-01

6.4930E+00 2.4150E-03 1.1740E-02 2.0020E-02 1.3870E-02 8.0410E-04 3.2600E-03

4.5350E-03 4.0080E-03 7.9060E-03 6.4000E-03 8.1460E-03 2.1180E-02 2.6120E-03

8.4740E-03 6.9880E-03 3.9560E-03 5.0810E-04 2.7160E-03 3.6630E-03 6.3070E-03

3.7820E+00 1.0260E+00 2.2780E-01 9.2920E-02 8.7290E+00 3.7010E+00 1.0450E+00

2.0120E-01 3.3190E-02 7.2480E-03 3.5400E+00 1.1930E+00 4.0770E-02 3.1680E+00

4.6580E-01 8.6330E-02 6.6870E-03 2.2750E+00 6.8850E-01 1.1140E-01 8.1830E-03

8.0790E-01 1.5450E-01 1.1350E-02 4.4030E-02 2.1290E-02 9.3980E-03 3.5300E-03

2.0160E-02 1.3370E-02 7.2930E-03 5.2110E-02 1.1730E-01 1.0890E-02 3.2150E-03

2.2090E-01 1.8120E-01 8.4420E-02 1.9440E-02 1.6200E-01 7.9420E-02 2.3660E-02

3.6940E-03 9.9110E-02 2.6450E-02 5.5780E-03 6.9620E-04 1.1850E-01 3.7620E-02

6.5180E-03 1.0470E-04 1.1280E-01 5.8370E-02 5.1570E-02 3.3520E-02 1.7360E-01

4.2130E-02 1.0680E-02 2.4880E-03 4.6470E-02 1.5190E-02 4.0720E-03 9.1580E-04

8.8240E-02 7.9300E-02 4.6800E-02 1.5250E-02 1.9870E-01 4.4460E-02 7.2580E-03

6.9570E-04 3.6580E-02 1.5580E-02 4.4990E-03 7.8820E-04 5.2540E-02 3.8440E-02

9.6020E-03 5.8250E-02 2.6540E-02 1.4340E-02 7.4900E-03 5.1070E-02 2.4350E-02

8.4610E-03 2.2200E-03 7.4200E-02 7.6560E-02 3.8560E-02 8.9530E-03 4.8740E-02

2.7250E-02 9.4660E-03 1.9790E-03 4.8330E-02 2.3960E-02 1.1040E-02 6.6260E-03

2.0940E-02 1.0820E-02 5.6460E-03 2.7370E-03 3.2930E-02 1.6360E-02 6.2020E-03

1.4700E-03 3.3270E+00 1.4350E+00 1.6510E-01 2.7630E+00 2.9790E+00 3.2820E+00

1.5710E+00 3.7450E-01 5.0500E-02 1.8210E+00 1.2000E+00 7.9330E-01 9.6330E-01

1.5970E+00 3.2770E-01 8.3110E-02 8.0170E-01 9.4430E-01 5.9620E-01 1.1960E-01

3.9740E-01 2.9340E-01 8.8140E-02 2.2600E-02 1.8760E-02 1.2450E-02 7.7160E-03

1.6450E-02 1.1910E-02 5.1070E-03 4.1690E-02 5.0200E-02 4.9630E-02 5.2520E-03

1.7400E-01 5.4690E-02 9.3100E-02 8.3250E-02 7.1990E-02 5.6050E-02 6.2110E-02

2.4900E-02 1.9720E-02 5.4900E-02 2.4990E-02 5.9320E-03 5.2480E-02 4.3430E-02

2.6470E-02 6.8970E-03 7.0070E-02 8.7510E-02 3.8820E-02 1.0110E-02 5.1800E-02

8.8440E-02 3.2950E-02 9.9200E-03 1.4970E-02 2.1890E-02 1.2350E-02 4.0520E-03

7.8430E-02 3.6000E-02 2.9490E-02 3.9750E-02 4.4800E-02 1.0610E-01 4.2070E-02

7.8830E-03 1.3970E-02 1.4750E-02 1.2490E-02 4.7040E-03 4.4090E-02 1.7420E-02

1.8800E-02 3.2490E-02 3.0200E-02 1.7320E-02 5.2450E-03 2.6010E-02 1.9670E-02

1.5990E-02 7.6870E-03 7.6570E-02 2.5170E-02 2.7410E-02 2.9470E-02 2.6410E-02

1.5400E-02 1.8670E-02 9.4840E-03 3.8670E-02 1.5970E-02 1.3360E-02 3.9690E-03

1.2720E-02 1.0240E-02 6.7110E-03 2.3350E-03 1.7350E-02 1.2710E-02 9.7020E-03

5.7890E-03 1.8700E+00 1.1750E+00 2.1200E-01 2.8670E+00 1.2270E+00 2.0230E+00

1.5310E+00 4.1650E-01 7.5950E-01 1.0920E+00 1.0080E+00 2.6580E-01 8.6730E-01

8.9270E-01 1.9780E-01 1.9860E-01 6.8320E-01 5.5340E-01 4.0950E-01 1.7360E-01

2.6390E-01 1.4680E-01 1.0940E-02 1.3810E-02 1.3150E-02 9.0770E-03 1.2420E-02

8.5420E-03 3.7990E-03 3.1270E-02 1.9750E-02 4.0990E-02 1.8070E-02 8.2940E-02

7.9270E-02 5.3740E-02 8.7790E-02 1.9900E-02 5.3700E-02 3.7880E-02 4.9810E-02

2.3150E-03 2.1180E-02 3.6910E-02 1.8500E-02 1.8770E-02 3.6010E-02 2.5980E-02

1.6240E-02 5.5780E-02 5.6690E-02 3.3030E-02 9.3920E-03 1.4700E-02 4.5210E-02

5.4470E-02 2.2940E-02 4.0470E-03 1.2600E-02 1.4130E-02 9.1800E-03 5.0080E-02

2.7250E-02 3.4490E-02 2.5930E-02 6.9620E-03 4.7060E-02 6.7070E-02 2.9600E-02

3.6790E-03 1.1010E-02 9.8860E-03 9.8580E-03 3.0110E-02 1.7000E-02 1.3430E-02

1.9340E-02 2.2610E-02 1.4490E-02 7.5120E-03 1.0700E-02 1.6340E-02 1.2890E-02

1.1730E-02 5.2390E-02 2.2440E-02 2.8410E-02 1.5760E-02 9.6360E-03 1.6740E-02

1.0950E-02 1.5150E-02 2.9000E-02 1.1200E-02 9.7600E-03 4.0160E-03 7.7140E-03

8.1270E-03 5.1290E-03 3.0230E-03 7.5940E-03 1.0050E-02 9.0620E-03 7.4710E-03

1.2240E+00 3.3140E-02 2.3550E-01 2.1550E+00 9.0850E-01 9.9660E-01 1.1950E+00

2.1140E-01 8.3510E-01 8.5920E-01 6.4970E-02 3.1340E-01 6.6620E-01 4.3510E-01

2.6760E-02 2.8110E-01 4.4460E-01 4.7230E-01 6.3850E-02 1.7700E-01 1.4860E-01

4.5630E-03 8.4750E-03 1.0110E-02 8.1650E-03 8.4740E-03 5.2050E-03 2.6910E-03

2.0840E-02 7.2850E-03 2.1940E-02 2.3360E-02 2.5000E-02 7.0750E-02 5.8280E-02

4.8320E-02 2.6160E-03 2.6370E-02 3.3930E-02 4.4610E-02 1.4740E-04 3.6760E-03

1.9980E-02 2.8760E-02 4.7840E-03 2.0590E-02 2.3480E-02 1.6200E-02 4.4680E-02

2.3180E-02 2.1330E-02 1.3470E-02 4.1730E-03 1.5700E-02 3.6390E-02 3.5290E-02

9.1340E-04 4.7180E-03 9.6530E-03 1.1470E-02 2.2680E-02 3.1160E-02 2.5430E-02

1.2590E-02 6.2100E-04 1.0590E-02 4.0280E-02 4.8980E-02 5.5660E-04 4.7870E-03

7.6240E-03 1.0020E-02 1.6910E-02 1.6940E-02 6.2020E-03 1.1870E-02 1.2130E-02

1.1290E-02 7.3390E-03 3.5560E-03 9.9510E-03 1.0950E-02 9.9810E-03 2.5960E-02

3.0680E-02 1.7980E-02 4.6650E-03 2.3300E-03 1.0250E-02 1.0700E-02 1.1710E-02

1.9340E-02 7.4800E-03 5.3460E-03 3.8170E-03 4.5840E-03 4.8470E-03 4.0440E-03

2.5370E-03 2.5660E-03 6.5920E-03 7.3610E-03 6.2640E-03 6.4540E-03 3.4040E-02

1.7030E-01 1.2220E+00 1.0210E+00 3.1020E-01 1.6290E-02 4.5280E-01 4.8400E-01

1.1120E-02 9.3920E-02 2.4820E-01 3.8580E-01 1.4230E-03 4.5180E-02 2.6430E-01

2.9940E-01 1.7850E-02 8.4900E-02 9.2000E-02 1.5670E-03 4.1060E-03 4.9290E-03

4.6200E-03 4.3020E-03 2.3810E-03 1.4280E-03 1.0420E-02 2.4560E-03 7.9160E-03

1.5960E-02 3.1340E-03 3.5990E-02 4.7880E-02 1.4270E-02 5.6930E-05 4.3990E-03

2.5690E-02 2.3620E-02 1.8990E-05 2.0280E-04 3.7670E-03 2.2180E-02 5.8850E-04

7.8070E-03 1.4740E-02 9.0930E-03 2.5580E-02 5.9450E-03 9.5530E-03 1.0260E-02

1.0200E-03 4.6970E-03 1.2230E-02 2.7400E-02 1.9120E-04 1.1050E-03 4.1990E-03

7.8500E-03 6.5650E-03 2.3070E-02 1.1430E-02 4.8920E-03 3.5080E-05 1.0090E-03

1.0760E-02 3.8420E-02 3.4200E-05 8.6910E-04 4.6290E-03 5.9850E-03 7.1960E-03

1.0930E-02 1.7780E-03 5.9360E-03 4.4520E-03 6.5510E-03 4.3780E-03 9.6790E-04

3.9430E-03 7.0780E-03 5.3790E-03 8.8150E-03 2.3620E-02 6.5540E-03 6.4020E-04

3.3660E-04 3.2350E-03 8.5160E-03 5.4020E-03 9.6690E-03 3.8240E-03 2.1190E-03

2.3810E-03 2.2030E-03 1.9720E-03 2.4550E-03 1.3370E-03 5.7650E-04 3.1100E-03

4.2860E-03 3.4210E-03 4.0220E+00 4.2830E-01 3.7530E-02 6.5570E-03 1.2020E-03

9.0320E+00 1.8310E-01 6.1450E-02 2.1370E+00 4.5950E-01 2.2370E-02 3.4520E-03

3.0990E+00 4.5700E-01 3.3900E-02 2.2260E-03 1.7980E+00 2.1630E-02 1.4260E-02

5.1240E-02 2.2300E-02 7.9840E-03 1.8860E-03 1.5180E-02 5.5000E-03 2.2200E-03

1.2050E-02 3.2640E-02 1.2840E-02 2.3510E-03 1.5310E-01 3.4590E-02 6.3110E-03

7.6060E-04 1.7040E-01 5.6980E-02 1.1580E-02 1.1460E-03 5.1710E-01 1.5950E-01

2.8610E-02 2.4970E-03 1.4840E-01 1.8980E-02 1.0990E-03 7.0050E-05 5.3200E-02

2.5830E-02 9.6200E-03 1.5400E-03 6.8200E-02 5.7050E-02 2.5520E-02 4.4090E-03

2.7250E-01 7.7540E-02 1.9540E-02 2.7930E-03 1.3430E-01 5.6440E-02 1.5280E-02

1.8160E-03 1.1910E-01 7.7780E-02 2.5750E-02 3.6100E-03 3.9200E-01 1.0770E-01

2.2530E-02 2.3830E-03 4.2490E-02 4.1400E-02 3.5210E-02 6.8080E-02 4.6390E-02

2.0170E-02 3.4420E-03 1.9410E-01 4.8480E-02 7.6730E-03 1.3700E-03 4.3310E-02

1.5150E-02 5.8490E-03 1.2810E-03 9.3190E-02 3.9020E-02 9.8640E-03 1.5040E-03

5.6310E-02 4.5600E-02 2.0550E-02 7.0300E-04 7.3930E-02 3.0770E-02 6.7170E-03

6.5610E-04 7.2860E-02 4.6440E-02 1.3110E-02 1.4860E-03 4.8480E+00 7.1010E-01

5.7300E-02 9.4580E-03 3.6710E+00 3.9270E+00 1.0230E-01 9.8250E-01 8.1780E-01

3.6830E-01 1.7050E-02 1.6160E+00 3.1120E+00 4.0300E-01 3.1670E-02 8.5210E-01

6.6860E-01 8.3470E-03 2.8420E-02 2.0600E-02 1.2970E-02 6.5330E-03 1.0240E-02

6.6410E-03 2.3900E-03 1.0040E-02 2.2170E-02 1.1460E-02 6.1030E-03 5.3270E-02

7.5000E-02 2.7990E-02 5.8360E-03 6.9110E-02 6.8850E-02 4.6400E-02 1.0870E-02

1.8540E-01 2.3870E-01 1.3870E-01 2.6990E-02 5.9200E-02 6.5510E-02 1.4840E-02

9.2430E-04 3.4470E-02 2.1970E-02 1.1660E-02 7.2780E-03 5.8480E-02 2.2670E-02

2.5390E-02 2.2150E-02 1.0740E-01 1.2930E-01 5.5640E-02 1.7900E-02 7.2960E-02

4.8910E-02 3.5890E-02 1.3780E-02 8.2090E-02 3.4460E-02 4.8560E-02 2.3580E-02

1.3730E-01 1.8120E-01 8.7020E-02 2.1110E-02 4.2290E-02 4.1860E-02 1.4560E-02

5.3480E-02 2.8110E-02 1.8430E-02 1.5040E-02 8.0170E-02 8.4660E-02 3.8270E-02

6.6350E-03 2.3990E-02 1.9200E-02 7.3850E-03 4.0710E-03 4.6740E-02 3.5520E-02

2.8470E-02 8.9480E-03 4.6930E-02 3.2570E-02 1.2790E-02 1.0330E-02 4.4370E-02

2.5180E-02 1.8340E-02 5.5020E-03 5.1670E-02 1.9310E-02 2.8720E-02 1.1880E-02

4.2740E+00 7.6750E-01 5.3960E-02 1.2550E+00 3.6440E+00 1.2640E+00 3.8860E-01

7.3530E-01 4.3960E-01 1.8390E-01 3.5790E-01 1.8540E+00 1.6910E+00 2.2740E-01

3.6510E-01 6.7560E-01 1.8330E-01 1.4510E-02 1.7060E-02 1.4400E-02 9.6190E-03

6.9080E-03 5.9260E-03 2.7960E-03 8.0340E-03 1.4140E-02 1.0780E-02 6.8670E-03

1.5980E-02 4.9260E-02 4.6400E-02 1.8080E-02 2.2380E-02 5.7070E-02 4.8430E-02

3.1190E-02 5.1150E-02 1.6760E-01 1.6280E-01 9.0270E-02 2.0710E-02 5.1320E-02

3.2790E-02 7.5930E-03 2.0910E-02 1.7090E-02 1.5050E-02 7.5430E-03 3.8170E-02

2.0770E-02 2.0600E-02 2.3520E-02 3.8920E-02 8.7580E-02 8.2420E-02 3.9630E-02

3.4310E-02 4.4110E-02 3.4570E-02 2.5560E-02 4.1870E-02 4.0530E-02 2.9640E-02

3.8880E-02 4.2020E-02 1.2140E-01 1.1900E-01 5.8880E-02 4.1830E-02 2.9940E-02

7.3650E-03 3.6540E-02 2.1120E-02 2.1550E-02 1.2830E-02 2.8830E-02 6.5350E-02

5.0580E-02 2.3140E-02 1.3160E-02 1.4710E-02 1.1340E-02 4.4820E-03 1.9370E-02

3.1530E-02 2.4880E-02 1.9960E-02 3.7540E-02 2.0530E-02 1.2690E-02 1.1340E-02

2.3240E-02 2.4000E-02 1.6830E-02 1.0660E-02 2.7470E-02 2.4050E-02 1.6820E-02

2.0910E-02 3.2030E+00 5.8700E-01 3.4280E-01 2.1120E+00 2.1730E+00 1.2520E-01

4.6080E-01 4.2870E-01 2.8200E-01 5.8940E-02 6.2800E-01 1.5740E+00 8.0950E-01

1.3880E-01 4.5620E-01 3.2300E-01 6.5530E-03 1.1920E-02 1.2880E-02 1.0260E-02

4.3920E-03 4.5040E-03 2.6670E-03 6.0250E-03 8.2950E-03 9.5470E-03 6.0260E-03

4.0240E-03 2.1710E-02 4.0040E-02 3.1510E-02 5.1960E-03 3.0020E-02 3.9540E-02

4.3700E-02 8.4110E-03 7.9170E-02 1.2940E-01 1.3690E-01 6.0760E-03 2.7470E-02

3.4040E-02 1.6730E-02 1.1090E-02 1.3770E-02 1.3840E-02 6.7010E-03 1.9540E-02

2.2730E-02 1.8500E-02 1.6280E-02 1.2220E-02 4.3700E-02 7.1580E-02 5.8630E-02

1.3440E-02 3.1570E-02 3.0020E-02 2.8130E-02 1.6150E-02 3.6550E-02 2.5380E-02

3.5100E-02 1.0020E-02 5.6260E-02 9.8660E-02 9.1120E-02 3.7510E-02 1.6480E-02

5.2150E-03 2.1290E-02 2.0190E-02 1.8800E-02 8.7540E-03 8.5740E-03 3.5770E-02

4.5460E-02 3.5910E-02 6.8630E-03 1.0020E-02 1.0790E-02 5.0870E-03 6.3820E-03

2.1010E-02 2.0980E-02 2.3440E-02 2.8160E-02 1.1250E-02 1.3430E-02 8.7550E-03

1.0440E-02 1.9400E-02 1.5330E-02 1.0880E-02 1.1340E-02 2.2960E-02 1.4260E-02

1.8380E-02 2.0790E+00 7.9000E-02 7.8510E-01 2.2230E+00 3.1550E-02 2.0980E-01

3.5770E-01 2.6510E-01 8.0210E-03 1.2510E-01 7.5650E-01 1.1530E+00 4.6050E-02

2.3270E-01 3.3330E-01 2.6020E-03 7.2500E-03 9.4150E-03 8.1240E-03 2.6070E-03

3.0220E-03 2.1490E-03 4.0170E-03 4.3900E-03 7.2040E-03 4.3070E-03 8.1130E-04

6.9250E-03 2.2470E-02 3.4700E-02 6.3840E-04 1.0330E-02 2.8290E-02 4.0370E-02

3.8650E-05 2.1700E-02 7.8250E-02 1.3590E-01 1.3920E-03 1.0840E-02 2.3910E-02

2.0070E-02 5.0080E-03 1.0500E-02 9.2260E-03 5.4180E-03 7.4550E-03 1.9950E-02

1.5930E-02 8.0230E-03 3.0780E-03 1.7750E-02 4.2930E-02 6.0070E-02 4.0270E-03

1.7850E-02 2.4930E-02 2.2480E-02 4.2600E-03 2.2120E-02 2.7330E-02 2.1740E-02

1.5060E-03 1.8400E-02 5.9300E-02 9.3430E-02 2.8450E-02 6.8220E-03 4.2420E-03

1.0240E-02 1.8100E-02 1.2190E-02 5.5020E-03 2.2660E-03 1.4080E-02 3.1370E-02

3.6180E-02 3.2490E-03 6.4500E-03 7.2420E-03 4.9320E-03 1.6610E-03 9.7480E-03

1.7230E-02 1.9300E-02 1.8770E-02 5.1920E-03 1.1680E-02 5.3980E-03 3.8600E-03

1.2530E-02 1.3210E-02 7.7560E-03 3.4150E-03 1.4830E-02 1.5950E-02 1.0460E-02

2.1830E-02 1.4000E-01 1.3820E+00 5.6990E-03 6.2700E-02 2.0730E-01 1.5620E-01

9.1260E-04 1.6750E-02 1.6200E-01 8.3990E-01 1.2610E-02 8.5460E-02 2.0790E-01

7.8600E-04 3.3200E-03 4.9120E-03 4.4780E-03 1.2180E-03 1.4190E-03 1.2000E-03

2.0080E-03 1.8300E-03 3.9240E-03 1.8280E-03 1.1700E-04 1.5670E-03 8.0620E-03

2.2620E-02 7.5420E-06 1.5500E-03 1.3610E-02 2.3130E-02 4.2280E-06 7.7090E-05

3.3940E-02 8.3840E-02 2.2530E-04 2.9380E-03 1.1340E-02 1.3610E-02 1.7320E-03

5.8070E-03 4.2400E-03 3.0410E-03 1.8370E-03 1.1560E-02 9.6400E-03 2.6480E-03

4.2770E-04 6.0700E-03 1.7420E-02 3.8080E-02 7.5650E-04 7.2980E-03 1.4430E-02

1.1660E-02 5.0790E-04 8.6860E-03 1.9410E-02 9.1860E-03 1.5870E-05 3.6620E-03

2.2720E-02 5.8940E-02 1.5360E-02 1.7690E-03 2.5340E-03 3.6950E-03 1.1060E-02

5.5120E-03 2.7460E-03 5.7070E-04 3.4530E-03 1.5350E-02 2.2510E-02 1.2150E-03

3.2720E-03 3.3230E-03 3.1720E-03 2.1880E-04 2.8040E-03 1.0270E-02 1.0570E-02

9.3840E-03 1.8370E-03 6.8450E-03 2.4570E-03 1.0700E-03 5.8170E-03 8.0250E-03

3.7680E-03 6.1880E-04 6.3010E-03 1.1570E-02 3.8290E-03 1.1650E+00 2.4810E-01

9.7890E-01 3.8630E-01 1.1700E-01 2.1830E-02 2.2800E+00 7.5930E-01 2.0140E-01

4.9380E-02 2.5060E+00 1.3620E-01 3.2190E-02 2.2460E-02 1.4340E-02 7.6050E-03

3.1990E-03 1.4520E-02 1.1670E-02 5.3990E-03 3.2550E-02 7.9560E-02 4.7590E-02

2.6080E-02 1.9780E-01 1.0990E-01 5.0900E-02 1.6100E-02 2.1280E-01 8.7730E-02

2.8590E-02 5.8700E-03 9.9460E-04 1.0410E-03 7.4130E-04 3.1000E-04 1.9930E-02

8.3010E-03 2.9880E-03 8.3480E-04 7.9150E-02 2.3040E-02 6.0390E-03 1.7670E-03

4.0050E-02 3.6370E-02 3.2720E-02 2.5440E-02 8.5660E-02 7.8580E-02 4.7810E-02

1.7860E-02 1.3800E-01 6.0740E-02 2.7220E-02 1.1720E-02 8.2740E-02 6.0420E-02

3.3300E-02 1.1800E-02 8.4210E-03 3.6790E-03 1.3580E-03 3.7330E-04 6.3750E-02

3.0160E-02 1.1830E-02 1.2140E-01 7.1220E-02 2.6630E-02 4.7720E-03 4.1980E-02

4.5110E-02 4.7510E-02 4.0710E-02 1.4550E-02 5.9780E-03 2.2630E-03 7.4010E-04

1.2590E-02 9.5520E-03 5.8350E-03 2.8550E-03 2.6380E-02 3.0960E-02 3.2860E-02

2.0570E-02 4.1880E-02 4.9680E-02 4.1350E-02 2.3030E-02 6.6040E-02 5.5190E-02

3.4880E-02 1.7340E-02 9.6330E-01 3.1480E-01 3.9340E-01 2.7740E-01 1.3110E-01

3.1250E-01 1.1390E+00 7.5990E-01 2.4900E-01 4.2950E-01 1.4900E+00 8.6990E-02

1.2090E-02 8.5190E-03 8.0820E-03 7.1140E-03 1.2770E-02 6.1930E-03 4.7640E-03

2.4410E-02 5.4510E-02 4.5290E-02 1.5310E-02 7.2780E-02 7.4880E-02 7.1650E-02

6.1730E-02 2.5760E-02 1.0020E-01 8.5190E-02 4.0100E-02 9.1820E-04 1.9820E-04

4.0470E-04 8.0840E-04 6.9150E-03 8.1270E-03 5.8940E-03 2.5880E-03 1.5770E-02

4.0310E-02 2.1300E-02 5.3070E-03 3.5730E-02 3.3810E-02 2.1430E-02 9.9270E-03

7.4130E-02 1.5240E-02 2.9160E-02 5.3890E-02 3.8290E-02 7.0840E-02 4.9140E-02

2.2560E-02 5.0340E-02 2.3480E-02 2.9080E-02 3.8510E-02 1.2960E-03 3.9780E-03

3.4020E-03 1.7300E-03 3.6850E-02 2.8590E-02 1.4560E-02 6.7260E-02 3.0650E-02

3.9060E-02 3.0480E-02 4.6570E-02 4.9610E-02 2.7560E-02 7.7750E-03 4.9920E-03

6.6060E-03 4.2630E-03 1.7880E-03 8.1480E-03 4.4080E-03 4.8160E-03 5.6940E-03

1.9780E-02 3.4760E-02 2.0340E-02 8.1830E-03 5.3340E-02 3.3440E-02 2.0340E-02

9.8250E-03 5.2620E-02 2.3680E-02 2.5910E-02 2.7920E-02 5.8240E-02 2.2830E-01

2.7510E-01 1.8140E-01 5.1230E-02 2.1690E-01 6.1490E-01 7.5140E-01 7.3270E-02

3.8030E-01 8.8380E-01 3.7090E-03 7.8370E-03 7.1600E-03 5.0510E-03 8.2870E-03

5.8650E-03 1.6410E-03 1.6280E-02 3.8220E-02 2.2240E-02 1.5910E-02 1.0400E-02

4.9440E-02 6.4830E-02 6.2690E-02 1.2420E-03 1.7630E-02 5.7550E-02 9.1080E-02

1.5650E-04 6.0360E-04 5.3900E-04 1.9880E-04 1.9620E-03 4.6900E-03 5.6270E-03

3.5430E-03 3.9000E-03 1.0940E-02 2.2190E-02 1.7790E-02 3.2380E-02 1.6320E-02

1.0710E-02 7.7520E-03 1.2630E-02 4.9870E-02 3.7980E-02 1.4460E-02 1.3810E-02

2.3660E-02 3.8970E-02 4.1300E-02 8.1170E-03 3.3970E-02 3.1750E-02 2.0290E-02

1.5840E-04 8.5620E-04 2.3320E-03 3.5300E-03 1.9060E-02 2.0900E-02 1.3210E-02

1.2960E-02 4.8770E-02 3.5130E-02 1.5160E-02 5.2310E-02 1.8030E-02 9.4420E-03

8.1140E-03 1.6370E-03 3.3000E-03 4.0640E-03 2.7670E-03 2.0950E-03 5.2620E-03

4.7270E-03 3.0710E-03 1.3190E-02 2.9210E-02 1.0090E-02 2.8960E-03 4.5140E-02

2.2140E-02 8.4850E-03 2.2230E-03 2.0720E-02 3.2660E-02 2.2840E-02 1.0510E-02

1.8720E+00 3.7260E-01 5.8400E-02 6.6950E+00 2.4560E+00 5.4710E-01 1.0150E-01

2.0500E+00 8.6970E-01 5.1210E-02 2.7820E-01 1.9200E-01 8.0190E-02 3.1220E-02

8.5250E-02 3.3160E-02 1.1960E-02 5.4360E-02 1.1120E-01 4.1660E-02 7.1460E-03

1.7130E-01 7.4160E-02 2.8390E-02 7.5030E-03 7.5520E-02 3.9390E-02 1.6670E-02

4.2930E-03 7.2510E-02 2.6500E-02 7.5980E-03 1.4730E-03 2.6890E-01 7.8670E-02

1.5850E-02 1.7970E-03 1.9190E-01 4.9230E-02 2.0180E-02 8.6380E-03 1.9580E-01

6.8760E-02 2.0770E-02 5.1130E-03 1.0220E-01 3.6560E-02 1.0960E-02 2.7370E-03

1.8770E-01 6.6830E-02 2.1540E-02 6.3640E-03 6.7600E-02 2.7010E-02 8.3900E-03

1.7360E-03 3.9770E-02 1.7700E-02 5.6310E-03 1.1320E-03 6.1340E-02 2.6910E-02

2.2800E-03 6.7350E-02 3.1290E-02 1.4700E-02 5.1490E-03 4.5980E-02 1.9240E-02

7.4930E-03 2.3940E-03 3.4250E-02 2.0390E-02 9.4090E-03 2.6880E-03 1.8670E-02

8.0930E-03 2.8380E-03 9.6860E-04 1.4130E-02 9.9280E-03 5.0100E-03 1.5680E-03

1.3530E-02 6.5740E-03 3.2030E-03 1.3380E-03 1.5610E-02 6.4620E-03 2.1140E-03

4.5960E-04 1.5510E+00 3.7770E-01 1.8500E+00 2.6010E+00 2.2920E+00 6.2960E-01

1.1430E+00 4.8740E-01 5.9640E-01 1.2880E-01 9.9130E-02 7.2230E-02 7.0900E-02

4.5650E-02 3.7490E-02 1.5370E-02 4.0750E-02 5.7810E-02 3.6850E-02 2.5330E-02

4.9900E-02 7.6410E-02 5.3390E-02 3.1490E-02 2.6790E-02 2.9330E-02 2.6740E-02

1.9050E-02 1.0050E-02 3.6250E-02 2.5540E-02 9.2510E-03 7.8310E-02 1.1440E-01

6.2900E-02 1.7380E-02 4.9160E-02 1.0810E-01 3.4490E-02 1.0290E-02 5.0520E-02

9.0290E-02 5.5050E-02 2.2300E-02 2.0770E-02 5.0150E-02 3.2300E-02 1.2320E-02

4.9450E-02 8.8010E-02 5.2990E-02 2.1580E-02 1.6800E-02 2.9100E-02 2.2570E-02

9.8510E-03 1.0510E-02 1.5620E-02 1.5360E-02 6.7050E-03 3.5280E-02 1.4590E-02

1.8130E-02 3.1280E-02 3.1420E-02 1.6570E-02 9.6350E-03 1.5250E-02 2.0650E-02

1.3190E-02 7.2660E-03 2.0390E-02 1.2890E-02 9.4530E-03 7.2210E-03 5.4430E-03

7.9710E-03 6.5880E-03 2.9700E-03 1.0590E-02 6.1790E-03 3.6580E-03 2.5430E-03

6.5740E-03 6.2630E-03 3.9250E-03 1.7000E-03 5.1150E-03 6.3170E-03 4.7160E-03

2.3380E-03 9.9560E-01 1.6290E-01 1.8280E+00 1.1770E+00 1.7490E+00 4.2950E-01

6.3390E-01 4.2090E-01 4.7600E-02 1.0030E-01 6.2490E-02 4.7480E-02 2.3090E-02

2.6040E-02 1.5800E-02 2.7160E-02 2.3890E-02 3.3810E-02 2.2270E-02 1.2160E-02

3.2550E-02 5.2320E-02 4.3800E-02 5.6950E-03 1.7660E-02 2.1010E-02 2.3540E-02

4.7660E-04 9.5460E-03 2.2470E-02 2.1520E-02 1.5740E-02 6.2810E-02 6.3600E-02

4.0350E-02 2.0160E-02 3.4580E-02 6.0900E-02 1.8850E-02 1.0890E-02 3.8650E-02

5.5010E-02 4.1390E-02 3.1420E-03 1.7410E-02 3.0560E-02 2.5870E-02 1.2040E-02

3.7150E-02 5.2960E-02 3.9250E-02 2.3160E-03 1.4020E-02 1.7130E-02 1.8400E-02

6.0750E-04 9.6770E-03 8.5880E-03 1.2960E-02 1.3820E-02 1.9090E-02 1.2500E-02

1.4690E-02 1.6560E-02 2.0340E-02 7.6370E-03 4.7380E-03 9.7710E-03 1.3500E-02

9.5600E-03 9.4090E-03 9.4480E-03 1.0420E-02 4.0690E-03 1.1020E-03 4.4190E-03

4.5940E-03 5.2150E-03 7.0640E-03 3.2320E-03 3.1490E-03 1.8730E-03 3.2040E-03

3.9250E-03 3.3050E-03 1.8990E-03 1.1460E-03 3.6650E-03 3.9490E-03 3.5650E-03

4.0350E-02 1.3090E-01 1.2520E+00 1.0340E+00 8.6590E-02 4.8570E-01 1.6910E-01

1.6320E-02 3.3250E-02 3.2620E-02 3.1680E-02 9.5640E-03 1.2400E-02 1.0400E-02

1.3570E-02 7.0660E-03 2.0970E-02 1.1920E-02 1.1060E-03 1.2320E-02 2.2380E-02

3.4530E-02 6.8870E-05 6.2400E-03 1.2760E-02 1.4880E-02 7.4010E-05 4.7510E-04

6.7620E-03 1.9760E-02 1.7970E-03 1.7300E-02 4.0310E-02 3.1720E-02 8.6380E-03

1.0270E-02 1.8880E-02 2.9370E-02 1.8880E-03 9.9970E-03 2.5500E-02 3.5280E-02

6.3490E-04 2.6790E-03 1.1850E-02 2.3130E-02 2.8000E-03 9.9760E-03 2.4070E-02

3.3880E-02 1.9710E-04 2.3670E-03 9.7170E-03 1.3640E-02 8.1730E-05 5.6460E-04

6.7980E-03 8.3730E-03 3.1210E-03 1.4690E-02 4.8140E-03 5.1490E-03 9.6350E-03

7.6360E-03 7.2070E-03 1.0440E-03 4.0140E-03 6.0980E-03 7.6530E-03 2.6880E-03

7.2210E-03 4.0690E-03 2.6180E-03 3.1480E-04 7.6050E-04 2.9490E-03 3.6040E-03

3.5320E-03 1.2930E-03 1.9390E-03 8.9500E-04 1.3380E-03 1.7000E-03 1.8990E-03

1.2490E-03 1.2990E-04 1.1630E-03 2.4270E-03 2.4410E-03 2.5690E+00 3.6390E-01

4.6140E-02 7.5520E+00 3.8500E-01 1.8940E-01 2.9770E-01 1.4570E-01 5.9940E-02

2.6220E-02 5.3890E-02 2.5110E-02 5.6260E-03 4.3510E-03 3.9930E-02 8.3330E-03

2.5010E-03 1.0560E-01 4.0200E-02 1.3100E-02 2.4900E-03 6.5500E-02 2.7690E-02

1.1370E-02 2.6310E-03 7.6490E-02 3.2200E-02 1.0920E-02 1.8640E-03 1.4400E-01

4.7440E-02 7.0770E-03 1.0580E-03 1.4660E-01 5.0760E-02 1.1780E-02 1.9030E-03

4.3650E-02 1.8180E-02 7.2310E-03 2.2050E-03 8.1680E-02 3.1270E-02 9.0980E-03

1.8210E-03 2.1200E-01 5.7220E-02 1.5070E-02 2.1090E-03 9.7350E-02 2.8960E-02

7.7580E-03 1.5390E-03 1.7850E-01 6.1460E-02 1.7350E-02 3.3550E-03 9.3050E-02

2.5550E-02 1.4330E-02 4.4440E-02 2.2580E-02 8.2890E-03 1.7730E-03 6.1920E-02

2.1830E-02 6.9140E-03 1.7500E-03 1.6960E-02 7.0320E-03 2.2560E-03 4.3810E-04

2.2550E-02 1.0490E-02 3.8140E-03 1.0170E-03 2.3560E-02 1.9100E-02 6.8030E-03

2.7600E-03 2.1190E-02 1.0520E-02 3.7840E-03 6.4380E-04 2.3900E-02 1.2640E-02

6.1820E-03 2.2580E-03 2.6010E+00 4.1440E-01 2.6870E+00 3.6520E+00 1.5570E-01

1.1670E-01 1.8210E-01 1.1450E-01 4.7940E-02 3.5560E-02 1.8790E-02 1.3770E-02

3.4810E-03 1.8770E-02 1.7630E-02 4.2140E-03 3.4520E-02 4.9520E-02 3.0600E-02

1.4540E-02 2.1720E-02 3.3130E-02 1.8690E-02 1.2450E-02 2.3090E-02 3.5660E-02

2.5920E-02 1.2540E-02 5.9740E-02 5.2170E-02 4.0970E-02 6.7920E-03 6.3030E-02

5.8330E-02 3.6660E-02 1.1120E-02 1.8160E-02 2.0680E-02 1.1630E-02 6.7270E-03

2.6700E-02 3.6580E-02 2.5730E-02 9.9490E-03 5.7190E-02 1.1050E-01 4.4630E-02

1.6860E-02 2.3180E-02 5.1630E-02 2.5250E-02 8.5680E-03 4.4190E-02 8.7650E-02

5.4780E-02 1.9530E-02 4.8150E-02 4.9840E-02 9.0930E-03 2.5720E-02 1.7030E-02

1.1690E-02 7.1660E-03 2.1830E-02 2.8980E-02 1.6280E-02 6.8770E-03 8.3670E-03

6.6890E-03 4.1940E-03 2.0060E-03 9.2840E-03 9.1860E-03 7.7150E-03 3.9770E-03

1.8850E-02 1.0990E-02 8.8720E-03 3.0480E-03 1.2050E-02 7.9010E-03 5.4410E-03

3.4990E-03 1.2640E-02 1.0820E-02 6.8950E-03 5.3920E-03 2.0110E+00 8.4480E-01

2.6080E+00 1.4190E+00 5.6860E-02 8.1950E-02 1.3630E-01 8.4770E-02 1.9920E-02

1.8700E-02 1.2240E-02 2.6110E-03 8.5470E-03 1.3890E-02 8.0270E-03 9.3510E-03

2.5480E-02 3.5290E-02 2.6630E-02 7.3840E-03 1.3260E-02 2.6210E-02 1.7710E-02

4.9600E-03 1.8040E-02 2.5980E-02 2.3920E-02 1.6400E-02 4.9540E-02 2.6110E-02

2.7730E-02 2.1480E-02 4.5990E-02 3.5430E-02 2.3930E-02 7.2290E-03 1.1630E-02

1.4830E-02 9.0920E-03 6.1610E-03 2.1870E-02 2.4130E-02 2.1680E-02 1.5070E-02

4.4610E-02 7.6310E-02 3.5910E-02 5.1510E-03 1.9560E-02 3.5720E-02 2.1080E-02

8.4540E-03 3.8370E-02 6.1160E-02 4.7190E-02 2.8110E-02 3.4600E-02 1.7360E-02

1.1950E-02 1.3700E-02 1.3510E-02 6.8550E-03 6.9140E-03 1.6280E-02 1.9470E-02

1.2790E-02 3.4890E-03 5.1540E-03 4.6940E-03 2.5960E-03 2.8360E-03 6.7720E-03

6.4230E-03 6.6450E-03 1.4140E-02 6.4130E-03 6.9360E-03 3.8540E-03 5.5640E-03

6.4600E-03 6.3960E-03 3.2730E-03 6.1810E-03 6.8940E-03 8.3710E-03 5.2390E-03

2.8390E-01 9.3590E-01 2.0250E+00 2.5680E-02 4.7110E-02 6.6800E-02 5.3090E-02

9.3790E-03 1.6610E-02 7.8310E-03 1.7400E-03 3.8190E-03 7.5360E-03 8.9440E-03

1.2220E-03 1.0200E-02 2.1420E-02 3.1630E-02 8.3500E-04 7.9810E-03 1.2200E-02

2.2020E-02 1.0890E-04 5.6930E-03 1.5700E-02 2.7110E-02 3.2780E-03 1.8540E-02

3.7680E-02 2.0340E-02 5.3720E-03 2.2650E-02 3.4330E-02 2.2060E-02 2.2050E-03

6.7260E-03 9.0790E-03 1.0400E-02 9.5930E-04 6.4900E-03 1.8030E-02 2.4230E-02

2.1090E-03 1.6870E-02 3.5900E-02 5.9660E-02 8.1620E-04 5.4830E-03 1.5810E-02

3.2220E-02 1.0890E-03 9.0740E-03 3.1350E-02 6.1610E-02 1.6980E-02 1.4890E-02

2.1060E-02 4.1490E-03 1.1280E-02 9.5420E-03 5.5730E-03 1.7500E-03 6.8770E-03

1.2800E-02 1.5530E-02 1.0710E-03 3.4390E-03 3.7220E-03 2.3010E-03 6.1730E-04

2.8530E-03 5.5910E-03 5.9090E-03 9.4270E-03 3.6150E-03 4.1420E-03 3.7010E-03

1.6890E-03 5.5090E-03 4.6030E-03 2.6750E-03 2.2580E-03 5.3920E-03 5.2390E-03

4.9440E-03 3.2830E-01 7.5930E-02 9.9190E-02 5.7560E-02 3.2330E-02 1.7160E-02

1.2920E-01 6.9560E-02 1.5250E-02 1.9870E-02 4.1680E-02 1.6580E-02 7.6470E-03

2.5880E-02 1.6980E-02 9.4500E-03 4.0800E-03 1.2310E-02 7.1390E-03 3.8230E-03

1.3970E-03 2.0260E-03 1.5820E-03 1.0530E-03 5.2900E-04 4.6890E-02 2.3530E-02

9.6530E-03 2.9210E-03 6.5940E-02 4.1880E-02 1.7550E-02 4.0670E-03 2.0220E-02

1.6560E-02 1.2080E-02 7.7520E-03 3.5150E-02 2.3940E-02 1.3410E-02 5.6150E-03

1.1000E-01 4.4140E-02 1.6110E-02 5.9540E-03 3.0910E-02 2.1180E-02 1.3310E-02

7.5740E-03 8.7510E-03 4.2210E-03 1.7880E-03 5.6390E-04 1.3040E-01 2.9150E-02

8.5220E-03 9.2250E-02 3.6510E-02 1.2990E-02 4.1530E-03 9.7910E-02 4.7970E-02

2.4240E-02 1.2340E-02 3.2260E-02 1.7680E-02 6.8810E-03 1.4860E-03 8.6880E-03

6.7310E-03 4.3490E-03 2.3300E-03 3.2620E-02 2.3910E-02 1.3280E-02 7.5990E-03

1.2810E-02 1.0510E-02 7.0830E-03 3.4720E-03 1.4260E-02 9.2120E-03 5.4070E-03

2.8120E-03 2.1420E-01 3.5860E-02 4.2990E-02 3.5440E-02 2.3210E-02 6.8060E-02

2.7940E-02 4.6280E-02 1.3250E-02 1.6570E-02 2.1030E-02 6.3040E-03 1.0580E-02

8.4170E-03 9.1060E-03 9.8800E-03 2.8170E-03 4.5710E-03 4.7100E-03 4.1150E-03

1.0520E-03 5.5790E-04 7.5360E-04 1.0380E-03 1.6480E-02 1.6390E-02 1.4160E-02

8.3050E-03 3.4390E-02 1.2780E-02 2.1040E-02 1.7800E-02 1.3990E-02 1.0290E-02

8.0620E-03 5.6920E-03 1.5740E-02 9.9110E-03 1.2030E-02 1.4390E-02 1.1740E-02

5.1440E-02 3.8280E-02 1.6210E-02 1.3940E-02 1.2170E-02 1.1760E-02 1.0790E-02

8.6100E-04 3.6210E-03 3.4670E-03 2.2280E-03 2.9150E-02 6.6200E-02 1.6910E-02

1.9430E-02 4.0090E-02 2.6610E-02 1.0580E-02 2.2940E-02 4.6560E-02 3.5070E-02

1.7590E-02 1.3560E-02 7.3330E-03 1.0020E-02 7.4200E-03 5.0520E-03 2.7650E-03

3.1410E-03 3.7730E-03 2.1740E-02 1.3280E-02 1.3380E-02 3.2920E-03 9.6880E-03

6.0330E-03 4.3870E-03 2.4940E-03 6.4370E-03 5.6240E-03 5.0660E-03 4.0340E-03

1.2250E-02 1.7300E-02 2.0590E-02 1.8530E-02 1.5220E-02 4.5770E-02 1.0370E-02

6.6250E-03 7.6330E-03 6.3030E-03 8.0210E-03 1.0990E-03 6.2340E-03 6.5320E-03

5.1320E-03 1.4290E-04 1.6860E-03 2.8280E-03 3.2870E-03 1.2430E-04 5.9550E-04

6.0550E-04 4.0330E-04 3.0240E-03 9.8750E-03 9.3940E-03 5.3780E-03 3.0120E-03

2.2600E-02 1.3300E-02 3.7830E-03 6.4310E-03 5.7390E-03 4.1210E-03 2.5180E-03

1.2100E-03 9.4670E-03 9.2510E-03 6.0450E-03 3.6740E-03 5.8660E-03 2.1310E-02

2.7510E-02 3.7910E-03 7.2010E-03 7.3600E-03 5.9450E-03 5.7440E-05 5.0870E-04

1.7340E-03 2.7520E-03 8.5220E-03 1.6910E-02 3.0460E-02 4.7800E-03 1.0840E-02

1.8630E-02 1.4160E-02 9.2590E-03 1.0150E-02 1.9250E-02 2.2050E-02 9.9220E-04

9.1410E-03 6.2750E-03 2.4460E-03 9.8740E-04 2.7800E-03 2.3310E-03 1.2610E-03

1.0870E-02 7.5980E-03 3.2920E-03 4.0540E-03 4.5540E-03 3.7950E-03 2.0930E-03

8.1260E-04 1.9210E-03 3.2700E-03 3.1070E-03 2.2560E-03 5.8630E+00 5.7680E-01

1.7410E-01 1.8710E+00 2.7200E-01 4.5340E-02 3.1210E-02 5.3410E-02 1.9060E-02

4.0610E-03 1.1450E+00 1.3480E-01 2.0080E-02 2.8330E-03 1.6310E-01 5.3180E-02

1.4500E-02 2.1430E-03 1.6760E-01 5.9780E-02 1.4300E-02 1.5930E-03 1.4490E-01

2.9920E-02 1.1190E-02 3.5990E-03 2.6590E-01 3.7350E-02 1.1880E-02 2.8000E-03

4.0760E-01 7.8950E-02 1.7370E-02 3.6370E-03 3.0250E-01 6.3520E-02 1.4650E-02

2.4980E-03 8.4460E-01 1.1450E-01 1.3210E-02 2.3000E-03 1.1600E+00 1.6870E-01

2.8900E-02 4.9570E-03 1.5180E-01 5.8590E-02 1.7760E-02 3.0760E-03 2.9870E-02

9.8510E-03 1.4890E-03 4.4630E-02 1.3890E-02 4.0680E-03 1.1920E-03 1.1940E-01

3.8580E-02 1.6230E-02 4.6880E-03 1.3070E+01 4.4890E-01 7.5740E-02 3.0810E-02

2.9560E+01 3.6430E+00 3.4110E-01 4.2970E-02 1.1310E-01 5.6210E-02 2.6580E-02

3.2560E-03 5.3090E+00 1.8550E-01 8.0670E-03 2.9940E-03 1.6820E+01 2.1010E+00

1.0690E-01 8.2740E-03 6.6030E+00 5.4180E-01 7.9500E-01 8.0420E-01 1.5540E-01

2.4970E-02 3.0830E-02 1.9880E-02 1.0230E-02 5.5240E-02 8.3680E-01 1.4800E-01

2.2890E-02 3.7200E-02 7.5840E-02 4.7250E-02 1.6850E-02 4.9170E-02 8.0760E-02

7.4820E-02 1.6790E-02 4.0450E-02 7.8190E-02 1.8610E-02 7.5560E-03 6.2450E-02

1.5610E-01 2.4180E-02 9.8490E-03 7.7430E-02 2.3580E-01 6.9610E-02 1.8550E-02

3.8660E-02 2.0650E-01 6.3890E-02 1.6570E-02 1.1160E-01 5.3090E-01 1.2460E-01

1.4460E-02 7.3520E-02 8.4770E-01 1.7680E-01 3.2710E-02 4.4420E-02 7.1000E-02

4.9270E-02 2.0270E-02 1.6650E-02 1.0550E-02 5.7720E-03 1.7760E-02 2.0540E-02

1.0110E-02 2.8560E-03 3.8450E-02 6.4680E-02 2.4710E-02 1.5190E-02 2.1300E+00

8.4700E+00 4.1300E-01 4.5420E-02 1.3630E+00 2.0870E+01 4.2490E+00 4.0020E-01

9.0480E-02 3.7120E-02 1.5830E-02 1.6170E-02 7.9080E-01 3.4100E+00 1.9710E-01

5.0400E-03 2.0940E+00 1.0560E+01 2.4640E+00 1.2890E-01 4.9650E+00 3.0140E-01

6.3800E-01 3.7600E-01 1.8730E-02 1.5890E-02 1.8360E-02 1.1480E-02 1.0100E-02

4.9620E-02 6.2090E-01 1.1730E-01 6.8900E-03 3.1730E-02 5.3020E-02 4.1020E-02

1.6030E-03 5.0680E-02 5.3360E-02 6.3660E-02 1.5930E-02 3.0960E-02 5.1540E-02

1.0890E-02 1.8910E-02 5.3330E-02 1.0220E-01 1.5070E-02 1.7380E-02 6.8450E-02

1.6070E-01 5.3920E-02 9.1560E-03 3.4030E-02 1.6900E-01 5.3230E-02 1.2800E-02

1.2400E-01 3.6510E-01 9.5200E-02 1.6500E-02 6.9140E-02 6.5410E-01 1.4290E-01

9.0820E-03 3.6820E-02 4.9340E-02 4.3460E-02 8.0320E-03 1.0090E-02 6.6260E-03

6.7060E-03 1.3500E-02 1.2590E-02 6.2560E-03 1.6200E-02 2.4700E-02 4.7520E-02

1.9400E-02 2.4100E-01 2.3190E+00 5.4030E+00 2.7280E-01 1.1080E-01 1.5240E+00

1.5160E+01 3.3050E+00 6.7880E-02 1.9520E-02 1.8690E-02 1.3710E-02 7.7090E-02

9.3020E-01 2.1570E+00 1.3630E-01 1.0450E-01 2.4630E+00 7.0070E+00 1.8660E+00

1.0120E-01 3.3230E-01 4.4280E-01 1.2490E-02 7.0480E-03 1.3800E-02 9.4310E-03

1.3630E-03 1.0980E-02 4.0060E-02 4.7870E-01 1.7860E-04 7.8980E-03 2.6360E-02

5.8600E-02 9.2440E-05 1.8900E-03 3.9830E-02 6.2490E-02 6.7430E-03 1.3490E-02

2.2410E-02 2.9380E-02 6.0410E-03 1.8770E-02 4.0140E-02 6.1990E-02 3.6370E-03

1.8550E-02 5.3700E-02 1.2570E-01 1.1550E-03 1.0220E-02 2.7800E-02 1.4730E-01

2.2620E-03 1.4400E-02 9.4630E-02 2.8240E-01 2.4630E-03 1.8130E-02 5.5830E-02

5.1670E-01 7.8520E-04 1.0150E-02 3.0730E-02 5.0890E-02 3.1430E-03 7.9810E-03

5.3690E-03 2.3960E-03 5.8900E-03 9.6420E-03 7.4780E-03 4.6830E-03 1.5180E-02

1.9390E-02 3.2660E-02 5.9940E-02 2.6580E-01 1.7550E+00 3.3960E+00 2.3740E-02

1.1400E-01 1.1620E+00 1.2070E+01 4.5240E-02 7.7140E-03 1.9580E-02 7.4600E-03

7.1100E-03 9.7600E-02 7.1220E-01 1.4030E+00 7.5500E-03 1.2870E-01 1.8660E+00

5.6180E+00 1.9770E+00 1.8640E-01 5.2640E-01 4.5160E-01 2.0910E-01 1.3960E-02

5.3550E-02 2.6510E-02 1.2070E-02 5.0890E-03 1.4320E-02 7.8240E-03 3.7810E-03

1.4450E-03 1.8440E-02 9.5540E-03 4.3020E-03 1.4470E-03 7.1620E-02 5.9260E-02

4.7060E-02 2.6820E-02 2.5150E-01 7.4640E-02 2.0840E-02 6.8670E-03 5.7350E-02

3.1690E-02 1.5870E-02 6.9290E-03 3.9930E-02 2.1290E-02 1.1090E-02 5.2450E-03

4.6550E-02 2.5890E-02 1.2410E-02 4.9920E-03 6.4120E-02 3.1510E-02 1.3860E-02

5.2530E-03 3.4050E-02 1.9760E-02 9.8030E-03 4.2290E-03 8.0510E-01 3.5260E-01

9.7820E-03 5.3150E-01 1.4530E-01 3.0220E-02 5.6930E-03 7.5600E-02 5.4860E-02

3.1460E-02 1.4060E-02 1.0330E+01 2.6190E+00 4.8430E-01 8.5170E-02 5.2490E-01

2.6050E-01 1.2740E-01 6.4480E-02 5.1520E+00 8.1980E+00 3.5220E+00 9.7520E-02

8.9860E+00 2.2080E+00 3.1750E-01 1.8200E-02 6.1480E-02 2.5640E-02 9.8370E-03

3.5940E-03 1.6090E+00 3.4950E-01 2.0650E-01 7.1670E-02 1.7280E-01 9.3470E-03

2.2270E-02 2.0080E-02 1.3020E-02 2.8880E-03 5.5410E-03 5.4920E-03 4.4690E-03

2.2700E-03 7.2550E-03 7.4730E-03 5.5000E-03 5.4570E-02 5.0640E-02 2.4810E-02

6.9060E-03 2.2190E-02 1.2890E-01 6.9960E-02 1.6080E-02 1.8590E-02 2.1910E-02

1.9700E-02 1.4370E-02 8.9180E-03 1.7480E-02 1.5370E-02 9.9840E-03 1.4770E-02

1.7210E-02 1.5820E-02 1.2080E-02 1.0850E-02 2.5930E-02 2.3780E-02 1.5880E-02

8.0950E-03 1.2770E-02 1.3080E-02 1.1330E-02 3.5170E-01 1.1200E-01 3.1450E-01

3.1090E-02 2.6520E-01 1.4580E-01 3.4000E-02 4.2580E-02 2.1780E-02 2.5630E-02

2.7780E-02 3.1910E-01 5.2560E+00 2.7610E+00 5.3410E-01 9.2960E-02 2.3780E-01

2.0330E-01 1.1710E-01 3.4320E+00 3.5120E+00 1.2450E+00 3.1330E+00 2.0510E-01

4.5100E+00 2.3990E+00 4.7770E-01 8.3740E-03 2.7280E-02 2.1110E-02 1.0280E-02

1.7400E-01 1.3920E-02 1.7160E-01 3.6520E-02 1.6280E-03 5.1500E-03 1.1010E-02

1.4370E-02 1.6870E-04 1.7100E-03 3.1690E-03 4.1440E-03 3.9110E-05 1.2650E-03

3.7990E-03 6.0320E-03 3.7460E-02 1.3260E-02 1.0160E-02 6.6310E-03 8.8100E-03

9.8120E-03 5.1710E-02 4.8240E-02 3.9840E-03 1.0270E-02 1.2380E-02 1.0650E-02

2.3090E-03 4.6440E-03 8.2250E-03 1.0310E-02 1.8520E-03 8.4880E-03 1.0140E-02

8.6750E-03 1.4560E-03 6.2640E-03 1.3320E-02 1.7180E-02 9.3300E-04 4.6560E-03

7.8030E-03 9.1160E-03 9.7690E-03 3.1420E-01 6.4930E-02 5.9960E-03 1.8410E-02

1.1040E-01 1.0290E-01 7.4910E-03 2.4370E-02 1.8360E-02 8.3070E-03 1.0430E-01

1.5870E-01 2.1030E+00 2.0360E+00 3.3970E-02 4.4290E-02 1.0350E-01 1.4420E-01

1.7150E+00 9.7520E-02 3.1170E+00 7.1120E-01 8.4960E-03 1.4330E-01 1.8540E+00

1.8200E+00 1.9730E-03 4.5310E-03 1.2140E-02 1.5020E-02 1.8860E+00 1.2570E+00

6.2890E-01 6.2870E-02 5.2390E-02 4.1910E-02 3.1430E-02 2.6130E-04 2.2400E-04

1.8660E-04 1.4930E-04 9.6330E-04 8.4290E-04 7.2250E-04 6.0210E-04 3.6520E+00

2.7470E+00 1.8350E+00 9.1860E-01 1.0540E-01 7.9040E-02 5.2720E-02 2.6370E-02

4.5230E-03 3.6190E-03 2.7140E-03 1.8100E-03 2.0450E-02 1.7040E-02 1.3630E-02

1.0230E-02 2.0620E-02 1.6500E-02 1.2380E-02 8.2490E-03 1.5330E-02 1.2770E-02

1.0210E-02 7.6640E-03 2.4040E-04 2.0610E-04 1.7170E-04 1.3730E-04 2.9610E-02

1.9740E-02 9.8650E-03 2.7720E-02 2.0820E-02 1.3890E-02 6.9500E-03 1.8220E-02

1.4580E-02 1.0940E-02 7.2910E-03 5.2530E-02 3.9430E-02 2.6300E-02 1.3150E-02

7.9610E-03 6.6340E-03 5.3080E-03 3.9810E-03 2.5750E-02 1.5120E-02 1.0070E-02

5.0380E-03 4.3370E-02 3.2800E-02 2.1870E-02 1.0940E-02 3.2000E-03 2.5600E-03

1.9200E-03 1.2800E-03 2.5500E+00 1.2150E+00 2.9000E-02 2.0620E-02 1.1720E-02

5.2650E-03 5.2500E-02 2.2910E-02 8.5890E-03 2.3710E-03 1.0440E-03 8.5990E-04

5.7250E-04 3.0780E-04 6.4630E+00 4.2000E+00 1.6830E+00 3.4050E-01 8.0830E-02

4.6590E-02 2.0960E-02 6.7630E-03 9.8670E-02 7.8370E-02 6.5260E-02 4.8780E-02

5.7010E-02 4.3180E-02 2.8620E-02 1.6500E-02 3.7060E-02 2.2620E-02 1.2830E-02

6.5190E-03 2.5130E-02 1.1600E-02 4.6430E-03 1.4670E-03 1.5580E-02 6.6450E-03

2.6500E-03 9.1120E-04 3.1370E-02 3.1620E-02 1.9940E-02 5.7920E-02 3.3740E-02

1.6430E-02 6.0980E-03 5.9840E-02 3.1360E-02 1.5170E-02 6.3800E-03 7.3280E-02

4.5540E-02 2.1370E-02 7.0950E-03 7.0920E-03 5.6740E-03 3.1230E-03 1.3100E-03

1.9720E-02 3.3560E-02 3.3430E-02 2.1430E-02 5.8720E-02 4.3350E-02 2.0010E-02

5.4240E-03 3.8590E-02 1.5380E-02 5.7690E-03 2.0720E-03 9.2120E-01 1.3320E-02

5.1090E-03 9.1570E-03 1.1900E-02 2.8490E-03 2.2390E-02 2.1370E-02 1.1580E-02

5.9820E-04 2.9540E-04 3.7440E-04 5.8020E-04 3.4770E+00 1.0160E+00 2.0780E+00

1.8990E+00 3.5970E-02 2.4300E-02 2.5200E-02 1.6930E-02 6.5080E-02 6.8090E-02

4.2700E-02 1.8050E-02 3.1780E-02 2.0850E-02 2.1440E-02 2.2800E-02 1.5080E-02

1.4640E-02 1.2980E-02 9.7690E-03 3.1660E-03 1.0300E-02 9.3170E-03 5.7780E-03

1.1570E-03 5.9620E-03 5.6670E-03 3.4620E-03 3.1550E-02 1.8020E-02 5.6610E-03

2.6190E-02 2.0820E-02 1.8090E-02 1.1020E-02 1.7450E-02 2.2910E-02 2.0630E-02

1.4210E-02 3.6860E-02 2.1370E-02 2.3240E-02 1.6710E-02 3.1940E-03 2.1570E-03

2.4920E-03 3.1780E-03 1.3150E-02 3.3420E-02 1.9980E-02 5.5540E-03 3.8270E-02

8.7340E-03 1.9490E-02 1.8350E-02 4.7450E-03 1.6690E-02 1.2820E-02 6.1130E-03

1.0440E-03 7.7970E-03 7.8170E-03 2.8370E-03 1.1920E-04 1.6970E-03 9.6790E-03

1.7390E-02 6.0610E-05 3.4070E-04 3.3160E-04 1.7280E-04 1.9530E-01 2.4040E+00

1.3270E+00 3.1010E-01 7.2080E-03 2.1170E-02 1.5970E-02 6.7520E-03 4.4130E-02

1.9760E-02 1.6840E-02 1.6150E-02 8.0700E-03 1.6650E-02 1.4540E-02 9.1560E-03

4.3920E-03 7.7100E-03 7.9980E-03 6.2160E-03 2.6430E-04 1.8990E-03 5.0810E-03

7.0370E-03 7.9880E-05 6.8550E-04 2.7610E-03 4.5980E-03 1.9870E-02 5.6580E-03

2.0270E-03 7.1230E-03 1.4090E-02 1.1190E-02 5.6190E-03 3.5380E-03 9.7590E-03

1.2580E-02 1.1430E-02 7.6540E-03 2.1470E-02 1.4310E-02 5.4890E-03 3.9470E-04

1.8600E-03 1.9730E-03 1.2340E-03 6.5740E-03 2.1420E-02 5.5530E-03 2.4930E-03

4.8860E-03 2.4250E-02 1.1590E-02 1.5380E-03 1.1430E-03 2.5150E-03 7.5950E-03

9.2180E-03 1.7450E+00 5.6110E-02 6.9780E-03 2.9340E+00 1.1310E+00 1.1970E-01

6.4170E-03 5.2040E+00 1.3040E+00 1.8150E-01 1.0100E-02 5.6420E-02 1.2500E-02

3.1300E-03 7.3970E-04 2.4850E+00 2.7220E-01 5.4750E-03 8.0910E-04 2.3020E+00

4.7000E-01 4.6610E-02 2.0140E-03 9.1070E-01 3.9660E-01 4.3860E-02 2.0240E-03

4.3840E-01 1.3170E-01 3.5550E-02 6.8910E-03 6.8550E-01 1.8730E-01 4.6740E-02

7.8540E-03 3.0430E-01 1.7940E-01 2.0890E-02 1.6410E-03 3.8930E-02 6.8590E-03

1.7920E-04 1.9340E-01 2.2830E-02 1.6970E-03 9.4130E-05 2.0560E-01 4.0190E-02

3.4690E-03 3.8640E-04 1.8530E-01 2.7520E-02 8.3240E-03 7.8910E-04 8.7810E-02

3.1170E-02 6.1090E-03 9.7510E-04 2.8920E-02 9.9850E-03 5.8640E-03 4.3750E-04

7.0090E-02 8.0310E-03 1.8130E-03 1.4930E-04 1.1340E-01 3.1740E-02 8.2240E-03

1.4990E-03 4.9120E+00 6.5580E-02 8.7660E-01 3.7760E+00 1.3080E+00 1.4210E-01

1.0660E+00 5.1820E+00 2.3140E+00 2.1650E-01 2.0730E-02 2.7780E-02 8.7160E-03

2.5080E-03 6.8100E-01 1.3270E+00 2.8290E-01 4.8000E-03 6.0780E-01 1.2070E+00

4.8540E-01 5.4970E-02 3.9650E-01 9.5850E-01 4.3280E-01 5.2110E-02 1.5150E-01

2.1950E-01 9.9610E-02 3.4710E-02 1.8700E-01 3.7130E-01 1.6270E-01 5.1120E-02

1.5370E-01 3.1880E-01 2.0390E-01 2.4290E-02 1.9210E-02 1.4770E-02 4.2880E-03

5.4310E-02 1.0410E-01 2.1030E-02 1.8050E-03 5.2570E-02 1.0880E-01 4.2930E-02

3.8550E-03 5.6840E-02 1.0430E-01 1.5240E-02 8.4020E-03 3.1160E-02 8.8720E-02

3.0050E-02 6.7130E-03 2.4100E-02 7.9970E-03 2.0580E-03 3.5090E-03 1.9650E-02

3.9650E-02 5.3980E-03 1.8040E-03 3.8640E-02 5.6620E-02 2.5710E-02 8.5200E-03

1.9830E+00 5.0870E-02 1.0200E+00 2.7690E+00 1.0440E+00 1.0840E-02 1.3130E+00

6.3210E+00 1.8290E+00 7.3480E-03 1.7110E-02 1.7800E-02 5.7330E-03 1.3420E-01

7.1000E-01 7.9630E-01 1.9800E-01 1.0120E-01 6.2310E-01 7.7380E-01 3.7830E-01

4.3840E-02 4.3280E-01 6.5020E-01 3.4550E-01 4.7820E-02 1.2260E-01 1.5390E-01

8.1000E-02 4.6600E-02 1.6260E-01 2.7090E-01 1.3980E-01 8.3330E-03 1.7910E-01

2.0520E-01 1.6300E-01 8.0940E-03 1.4130E-02 8.3190E-03 1.1950E-02 5.4520E-02

6.4110E-02 1.4700E-02 8.2990E-03 5.5410E-02 6.9800E-02 3.3050E-02 1.8890E-02

4.6760E-02 7.1650E-02 1.0360E-02 6.1060E-03 3.0050E-02 6.4520E-02 2.4800E-02

1.9280E-02 4.6570E-03 3.2770E-03 2.9580E-03 5.4060E-03 1.8000E-02 2.6460E-02

3.7280E-03 1.1380E-02 3.1720E-02 3.9210E-02 2.0920E-02 1.6260E-03 5.9620E-02

7.9760E-01 2.8040E+00 4.6020E-04 1.2560E-02 1.0100E+00 6.1270E+00 2.4640E-03

7.5610E-03 1.3460E-02 1.2330E-02 1.5440E-02 1.7150E-01 5.6990E-01 6.2200E-01

8.8830E-03 1.2210E-01 5.0450E-01 7.7560E-01 2.0170E-03 5.2110E-02 3.4560E-01

7.1260E-01 1.1710E-02 5.0790E-02 1.0340E-01 1.3730E-01 7.8340E-03 5.1100E-02

1.3980E-01 2.6600E-01 7.7710E-04 9.3940E-03 1.3950E-01 2.7230E-01 2.4820E-03

1.0200E-02 1.0220E-02 1.7460E-03 1.4860E-02 4.3850E-02 4.8570E-02 9.3090E-04

9.8470E-03 4.4400E-02 6.9750E-02 4.9980E-03 2.0960E-02 3.7730E-02 4.7040E-02

9.7470E-04 6.7120E-03 2.4790E-02 6.1570E-02 1.4460E-02 2.1110E-03 4.7580E-03

1.0720E-03 1.1760E-03 6.1980E-03 1.4470E-02 1.7970E-02 2.6480E-03 1.2300E-02

2.6750E-02 3.5630E-02 2.7330E+00 2.4420E-01 7.2080E-03 5.6990E+00 9.9920E-01

1.6040E-01 8.1740E-03 3.5110E-02 8.4100E-03 2.6970E-03 4.5610E-05 5.8560E-02

1.9090E-02 2.2920E-04 6.6080E-06 1.7650E-01 3.2770E-02 2.5770E-03 7.3360E-05

9.7870E-01 3.3560E-01 2.1910E-02 2.1290E-04 1.2770E+00 1.7340E-01 2.9570E-02

3.2420E-03 3.3690E-01 2.4940E-01 2.9870E-02 3.8180E-03 1.0770E+00 4.4410E-01

5.9550E-02 3.5250E-03 1.1770E-02 6.5600E-04 2.5020E-05 6.3030E-02 1.2520E-02

3.5440E-03 3.3770E-05 2.2150E-01 1.3660E-02 1.6430E-03 1.9750E-04 3.4850E-02

1.0350E-02 2.6960E-04 3.6910E-05 2.0960E-01 4.2040E-02 4.7070E-03 2.7720E-04

2.0140E-04 2.3120E-02 3.4010E-03 2.1300E-05 3.4560E-02 1.1020E-02 3.6050E-03

1.9330E-05 3.6460E-01 3.2520E-02 3.4490E-03 5.4810E-05 4.8410E+00 2.8600E-01

7.6970E-01 5.3680E+00 2.1000E+00 2.8500E-01 1.4880E-02 1.8020E-02 3.9740E-03

2.9490E-03 2.9310E-02 1.8090E-02 1.9290E-02 2.4630E-04 5.0010E-02 9.2120E-02

3.4310E-02 2.9950E-03 4.1230E-01 1.1570E+00 3.8850E-01 2.5930E-02 3.0840E-01

7.7140E-01 1.5490E-01 3.1310E-02 2.9450E-01 6.2940E-01 2.6020E-01 3.2880E-02

2.7940E-01 1.2500E+00 4.7890E-01 6.8580E-02 5.2810E-03 5.1070E-03 3.9660E-04

2.4370E-02 3.2750E-02 6.5190E-03 3.9030E-03 3.8080E-02 1.4990E-01 1.3580E-02

1.7710E-03 1.6470E-02 1.2020E-02 1.0300E-02 2.4680E-04 5.1130E-02 1.1760E-01

4.4290E-02 5.4010E-03 1.7260E-04 1.1790E-02 8.8900E-03 2.0910E-03 1.6670E-02

1.6110E-02 4.9200E-03 3.9770E-03 7.2530E-02 2.3300E-01 3.2400E-02 4.1260E-03

3.7910E+00 1.1670E-01 1.7370E+00 6.9240E+00 2.6660E+00 6.3780E-03 1.0310E-02

1.3450E-02 2.9330E-03 8.9100E-03 2.5300E-02 7.6320E-03 1.3620E-02 9.7140E-03

5.1410E-02 6.1210E-02 2.6770E-02 4.7530E-02 4.7200E-01 8.4310E-01 3.0600E-01

7.0000E-02 3.0440E-01 5.5570E-01 1.2570E-01 4.9430E-02 3.0650E-01 4.4060E-01

2.1130E-01 5.9320E-02 4.7500E-01 9.4310E-01 3.9520E-01 1.9820E-03 4.6980E-03

2.2140E-03 9.4750E-03 1.8520E-02 2.3620E-02 4.7980E-03 5.7430E-03 4.2580E-02

1.1050E-01 1.0670E-02 5.0610E-03 1.4430E-02 5.6920E-03 7.2510E-03 8.0640E-03

5.4730E-02 8.5320E-02 3.5940E-02 1.4380E-04 5.1770E-03 8.9070E-03 4.8880E-03

8.0440E-03 9.9540E-03 1.3360E-02 3.6320E-03 1.2170E-02 7.8290E-02 1.6890E-01

2.5690E-02 1.0730E-03 1.3540E-01 2.2450E+00 7.7180E+00 1.8040E-03 7.1260E-03

9.0320E-03 8.6930E-03 1.4160E-03 1.1020E-02 2.1540E-02 1.0520E-02 1.0120E-03

1.1630E-02 4.2570E-02 6.3270E-02 2.2880E-03 5.6950E-02 3.8210E-01 9.0200E-01

1.2020E-02 8.0090E-02 2.5400E-01 5.0360E-01 6.3870E-03 5.6170E-02 2.5380E-01

4.9800E-01 3.5250E-03 6.8400E-02 3.9310E-01 1.0440E+00 6.1590E-04 2.6960E-03

3.8870E-03 2.4480E-03 1.0820E-02 1.5910E-02 1.6040E-02 7.4610E-04 6.7640E-03

3.3820E-02 9.2710E-02 9.0630E-04 6.1750E-03 1.2230E-02 6.7340E-03 6.8270E-04

9.3850E-03 4.4460E-02 9.2250E-02 1.1510E-04 1.6560E-03 6.6270E-03 6.8940E-03

2.2980E-03 8.9630E-03 8.9550E-03 7.6850E-03 1.2050E-03 1.4600E-02 6.3720E-02

1.4940E-01 1.0490E+00 3.3420E-02 1.0230E-03 1.6750E-01 2.8670E-02 1.0610E-04

1.6580E-05 1.3090E-02 9.1230E-04 2.4270E-05 1.6480E-06 2.9240E-02 7.4990E-03

4.7590E-04 9.7800E-06 1.8540E+00 1.8280E-01 2.7770E-03 3.1160E-05 1.0500E-01

2.3570E-02 3.2520E-03 3.6330E-05 3.4170E-01 1.0360E-01 1.0200E-02 8.3540E-04

1.0600E+00 2.1980E-01 5.6640E-02 3.7820E-03 4.8530E-04 1.6260E-04 2.3080E-05

1.5730E-02 2.3930E-03 1.7780E-04 3.2980E-05 8.6910E-02 1.4110E-02 2.1550E-03

1.3150E-04 3.3270E-02 6.4600E-03 2.4240E-04 4.4130E-05 4.5400E-01 5.8250E-02

6.2280E-03 2.5950E-04 1.1220E-03 7.1210E-04 3.9160E-04 8.6870E-05 3.1210E-02

3.5100E-03 1.2060E-04 1.7540E-06 3.5440E-02 9.9590E-03 1.3240E-03 3.1750E-05

2.2310E+00 6.3430E-02 6.6000E-02 7.6940E-02 2.9540E-02 9.4210E-05 4.0970E-03

7.1340E-03 8.9200E-04 2.4380E-05 1.1090E-02 1.3010E-02 7.9190E-03 5.4660E-04

3.0960E-01 1.8790E+00 2.2330E-01 3.1860E-03 3.6830E-02 5.3370E-02 2.1320E-02

3.7620E-03 1.0200E-01 4.4670E-01 1.1310E-01 1.1430E-02 2.6300E-01 1.3710E+00

3.9760E-01 6.3880E-02 3.1850E-04 1.9570E-04 9.1100E-05 5.9720E-03 7.6520E-03

2.1700E-03 1.4870E-04 2.5530E-02 5.0130E-02 1.2340E-02 2.3980E-03 1.3970E-02

1.4470E-02 6.1970E-03 2.0710E-04 1.1600E-01 4.9740E-01 5.9640E-02 7.1770E-03

9.8170E-04 5.6810E-04 2.6480E-04 2.0830E-04 1.1400E-02 1.6070E-02 3.3760E-03

1.2960E-04 1.4240E-02 1.5950E-02 9.1940E-03 1.5420E-03 2.4890E+00 1.9050E-02

6.2720E-02 4.5150E-02 2.0930E-02 9.8710E-04 4.2880E-03 4.5440E-03 6.3380E-04

2.5590E-03 1.1030E-02 8.1440E-03 6.1870E-03 3.9860E-02 6.1890E-01 2.3650E+00

1.7160E-01 9.9270E-03 3.3730E-02 3.7420E-02 1.7800E-02 2.5150E-02 1.6850E-01

3.3980E-01 9.0320E-02 7.5910E-02 4.6640E-01 1.0660E+00 3.3410E-01 1.8550E-04

1.9330E-04 1.2070E-04 1.8120E-03 5.5680E-03 4.7240E-03 1.5330E-03 6.5980E-03

2.4330E-02 3.6480E-02 1.0220E-02 4.3510E-03 1.2760E-02 8.4960E-03 4.3780E-03

1.5750E-02 1.2940E-01 3.8920E-01 4.9650E-02 8.4150E-04 4.0320E-04 2.8490E-04

2.0440E-04 2.9180E-03 1.1300E-02 1.0110E-02 2.4050E-03 4.0300E-03 1.2870E-02

1.0690E-02 7.5160E-03 3.1100E-03 2.3610E-02 5.3330E-02 4.3200E-02 1.4550E-04

1.2220E-03 3.5340E-03 3.8170E-03 3.0910E-04 3.0320E-03 9.3850E-03 1.0540E-02

1.9030E-03 4.9120E-02 4.8920E-01 2.1440E+00 1.4020E-03 1.1590E-02 2.9840E-02

3.9490E-02 2.6980E-03 2.9060E-02 1.3980E-01 3.5040E-01 6.8100E-03 8.6100E-02

3.9540E-01 1.1350E+00 9.9380E-05 1.9260E-04 1.4060E-04 3.9590E-04 2.1630E-03

4.7060E-03 4.1700E-03 1.0430E-03 7.6370E-03 2.0900E-02 3.5020E-02 8.6420E-04

5.2590E-03 1.0890E-02 8.1940E-03 1.3510E-03 1.8370E-02 1.0570E-01 3.6400E-01

7.0120E-04 2.5070E-04 3.4810E-04 1.4490E-04 4.8160E-04 3.6180E-03 9.4950E-03

8.6890E-03 6.0340E-04 4.6870E-03 1.1340E-02 1.2610E-02 3.5290E+00 5.2690E-01

3.3590E-02 1.2290E-01 5.2700E-02 3.2720E-02 1.6520E-02 8.4560E-02 5.6830E-02

3.1470E-02 1.6760E-02 7.8280E-02 3.6400E-02 1.3290E-02 3.2960E-03 4.6730E-02

2.6300E-02 1.1470E-02 3.3130E-03 4.6500E-02 2.4410E-02 1.1340E-02 3.7140E-03

8.3800E-02 3.1710E-02 8.6080E-03 1.3680E-03 9.1110E-02 5.9120E-02 9.6940E-03

3.1390E-02 1.8090E-02 8.7580E-03 3.3890E-03 8.6240E-02 3.9740E-02 1.2430E-02

3.4490E-03 5.9260E-02 3.0570E-02 1.2750E-02 5.5460E-03 5.2540E-02 1.7420E-02

5.9840E-03 2.4680E-03 9.7620E-02 1.0350E-01 6.8140E-02 4.1090E-03 5.3320E-02

2.7100E-02 9.4630E-03 2.7680E-03 3.9320E-02 1.7230E-02 5.5670E-03 1.0830E-03

3.1520E+00 6.2880E-01 5.2700E-02 7.9390E-02 3.0030E-02 1.1980E-02 5.1470E-02

3.4250E-02 3.5840E-02 2.1430E-02 2.6270E-02 3.0700E-02 2.7070E-02 1.4980E-02

2.3950E-02 1.5830E-02 1.4980E-02 1.1580E-02 1.9460E-02 1.4790E-02 1.4730E-02

1.1780E-02 1.5600E-02 3.7860E-02 2.9980E-02 1.0690E-02 6.6910E-02 1.7170E-02

3.5640E-02 1.8080E-02 1.3040E-02 9.9860E-03 5.1350E-03 3.2510E-02 3.0550E-02

3.1020E-02 1.2920E-02 3.0530E-02 2.2830E-02 2.0870E-02 7.0450E-03 9.3670E-03

2.7550E-02 1.6000E-02 5.6720E-03 7.3180E-02 7.6890E-02 7.9980E-03 4.6740E-02

2.7090E-02 1.7430E-02 1.7740E-02 7.2290E-03 1.4180E-02 1.2880E-02 1.3210E-02

6.2800E-03 2.1020E+00 3.2720E-02 3.0030E-02 3.9470E-02 1.0830E-02 2.3360E-02

3.2880E-02 1.7420E-02 2.1640E-02 4.9470E-03 1.9090E-02 1.9370E-02 2.2240E-02

7.4930E-03 1.3210E-02 1.2110E-02 1.0890E-02 5.6210E-03 1.1810E-02 1.0990E-02

1.1960E-02 3.8500E-04 1.5610E-02 2.1720E-02 2.5040E-02 3.2420E-02 3.0200E-02

1.7680E-02 8.7530E-03 9.9760E-03 7.2780E-03 4.6110E-03 6.2920E-03 2.6360E-02

1.4880E-02 2.2970E-02 1.2740E-02 2.0880E-02 9.7100E-03 1.0770E-02 2.5800E-03

6.9160E-03 1.7680E-02 1.1920E-02 4.8770E-02 3.2430E-02 3.4410E-02 2.1040E-02

9.4620E-03 1.7750E-02 9.0210E-03 9.9740E-03 2.8200E-03 1.1120E-02 7.5930E-03

9.5360E-03 1.6520E-02 1.1980E-02 1.0830E-02 1.6150E-02 9.7990E-03 1.2350E-02

1.7470E-02 7.6140E-03 4.8000E-04 4.9690E-03 1.3190E-02 1.4190E-02 1.2400E-03

7.4130E-03 8.2220E-03 5.2900E-03 8.8870E-04 5.1900E-03 7.8710E-03 6.1860E-03

3.5250E-05 3.8070E-04 1.1010E-02 1.9950E-02 9.7140E-03 2.6690E-02 3.0560E-03

3.3890E-03 5.1310E-03 4.6090E-03 2.2420E-03 1.5130E-03 5.1610E-03 1.7300E-02

1.1250E-02 5.5470E-03 6.9910E-03 1.0760E-02 3.7730E-03 8.9980E-04 1.2480E-03

4.0270E-03 1.1780E-02 2.4380E-02 6.8710E-03 3.5750E-02 1.2390E-03 2.7670E-03

7.2280E-03 9.9730E-03 3.1510E-03 2.8170E-04 2.9330E-03 7.3600E-03 4.9340E-03

1.2480E+00 6.8190E-02 7.4030E-03 4.4040E+00 1.4600E+00 3.0800E-01 3.3890E-02

8.9210E+00 2.0000E+00 3.2510E-01 3.1300E-02 1.3790E-01 5.3460E-02 2.0690E-02

5.4090E-03 1.6680E-01 5.8580E-02 1.8200E-02 4.3410E-03 3.8220E-02 1.7370E-02

7.9090E-03 2.2700E-03 3.2670E-01 1.2660E-01 2.1940E-02 6.2700E-01 2.8900E-01

8.2620E-02 1.2790E-02 4.6370E-01 1.4180E-01 3.0870E-02 5.4320E-03 1.4950E-01

7.2120E-02 2.3060E-02 7.1200E-03 3.3450E-02 1.4990E-02 5.9700E-03 2.1720E-03

1.8330E-02 1.8880E-02 1.3280E-02 7.4950E-03 5.8850E-02 3.4880E-02 1.7280E-02

6.2200E-03 6.4830E-02 3.3690E-02 1.4090E-02 5.1480E-03 1.3840E+00 7.5860E-02

1.0470E+00 1.8810E+00 1.3500E+00 3.8590E-01 4.7480E-01 5.2760E+00 2.2380E+00

4.2500E-01 4.1280E-02 6.5000E-02 3.3650E-02 2.1740E-02 2.6580E-02 1.0490E-01

6.2270E-02 2.1570E-02 1.0150E-02 1.9450E-02 1.0580E-02 8.7990E-03 1.7320E-01

1.0510E-01 7.6390E-02 2.8720E-01 1.9710E-01 1.8970E-01 8.4100E-02 9.6560E-02

2.1620E-01 1.3330E-01 3.5820E-02 7.2070E-02 4.8250E-02 5.1620E-02 1.6930E-02

1.0950E-02 1.5010E-02 1.1920E-02 6.1700E-03 1.3740E-02 1.4560E-02 9.9700E-03

4.5820E-03 3.4870E-02 2.4250E-02 1.7780E-02 1.0870E-02 2.8760E-02 2.4360E-02

2.2400E-02 1.2880E-02 9.6910E-01 8.7570E-02 9.9900E-01 9.7840E-01 1.0430E+00

3.0130E-03 5.0210E-01 3.3190E+00 1.7820E+00 1.3200E-02 2.2100E-02 4.6510E-02

2.4910E-02 5.5630E-03 2.1850E-02 7.9540E-02 3.4980E-02 3.6800E-03 3.8340E-03

1.5760E-02 9.4310E-03 7.2790E-02 9.9860E-02 6.5270E-02 8.2290E-02 1.8910E-01

1.2250E-01 1.1180E-01 1.0200E-02 9.1690E-02 1.1590E-01 1.0180E-01 2.3040E-02

5.1590E-02 2.0120E-02 3.0210E-02 2.6650E-03 7.1900E-03 9.8770E-03 9.5530E-03

9.1620E-03 1.1280E-02 6.5170E-03 2.8870E-03 1.7280E-02 1.7770E-02 1.5580E-02

7.7590E-03 9.0350E-03 1.9140E-02 1.4130E-02 1.5840E-02 2.5840E-03 1.0060E-01

6.9190E-01 7.6190E-01 2.7910E-04 3.0620E-03 3.5200E-01 2.4450E+00 1.7750E-03

1.3000E-02 1.4540E-02 2.4840E-02 4.2510E-04 5.4340E-03 1.5160E-02 3.8680E-02

9.8670E-06 4.0770E-03 2.9390E-03 9.2160E-03 2.1630E-02 6.2830E-02 3.3200E-02

1.2790E-02 8.3860E-02 1.1160E-01 4.4330E-02 1.7970E-03 9.3560E-03 6.2780E-02

8.6780E-02 7.1200E-03 1.6920E-02 3.0250E-02 8.0620E-03 5.7350E-04 2.2610E-03

4.7710E-03 6.8150E-03 4.5810E-03 5.5650E-03 2.9720E-03 1.3920E-03 6.2200E-03

1.0760E-02 7.7570E-03 4.3960E-03 2.6250E-03 6.8530E-03 1.1740E-02 7.8430E-03

3.2140E+00 2.9150E-01 1.6030E-02 7.9540E+00 2.0580E+00 3.1720E-01 2.2670E-02

4.7820E-01 1.5270E-01 3.1910E-02 5.4480E-03 7.7540E-01 2.5140E-01 5.4620E-02

7.1020E-03 4.0910E-01 1.1720E-01 1.8680E-02 1.4710E-03 4.0940E-01 2.0620E-02

3.2400E-03 6.0030E-01 1.2040E-01 1.4420E-02 7.8600E-04 7.3310E-01 2.4800E-01

5.6910E-02 6.2300E-03 1.3860E-01 4.7010E-02 9.2820E-03 3.0350E-03 8.2940E-02

3.4930E-02 1.3170E-02 3.6820E-03 2.4280E-02 5.9600E-02 1.1750E-02 7.5430E-03

6.2130E-02 2.7970E-02 1.1180E-02 2.3370E-03 9.2390E-02 3.2520E-02 7.6400E-03

1.2780E-03 3.5290E+00 3.5560E-01 1.5790E+00 4.1750E+00 2.1670E+00 3.8860E-01

1.5190E-01 2.1200E-01 1.3820E-01 3.4570E-02 2.0310E-01 3.8010E-01 2.4250E-01

6.4570E-02 7.4400E-02 2.2180E-01 1.2730E-01 2.2710E-02 1.4590E-01 1.8870E-01

1.1940E-02 1.7880E-01 2.8850E-01 1.0580E-01 1.5870E-02 2.4670E-01 3.1930E-01

2.0430E-01 6.6910E-02 5.8480E-02 5.1260E-02 4.1000E-02 6.4030E-03 3.0450E-02

3.8690E-02 2.5530E-02 1.3440E-02 1.9430E-02 2.7610E-02 3.1790E-02 3.8070E-03

3.3080E-02 2.6720E-02 1.4040E-02 9.7210E-03 3.3950E-02 3.5910E-02 2.7510E-02

8.3490E-03 2.7060E+00 1.2810E-01 1.6870E+00 2.6750E+00 1.7450E+00 3.1800E-02

1.3760E-01 1.2680E-01 1.0820E-01 2.9220E-02 1.9380E-01 2.4880E-01 2.0330E-01

1.8480E-03 8.4150E-02 1.4460E-01 1.0360E-01 4.1920E-02 1.3950E-01 7.8650E-02

4.0280E-02 1.6130E-01 1.6540E-01 7.2440E-02 5.6710E-02 2.0320E-01 2.0330E-01

1.6430E-01 1.8250E-02 4.9320E-02 2.4510E-02 2.6790E-02 9.8300E-03 2.1710E-02

2.7690E-02 2.1860E-02 1.4570E-02 1.4630E-02 2.1870E-02 1.0960E-02 1.6120E-02

1.7650E-02 2.0880E-02 8.0170E-03 7.6320E-03 2.7490E-02 2.1370E-02 2.1730E-02

2.3510E-03 1.5420E-01 1.3070E+00 2.6960E+00 5.4480E-03 3.4480E-02 1.0790E-01

1.2070E-01 2.5300E-03 3.4370E-02 1.5650E-01 2.5990E-01 9.4480E-05 2.1080E-03

6.4100E-02 1.5710E-01 9.4220E-03 5.5590E-02 1.0820E-01 5.4670E-03 4.8810E-02

1.2390E-01 1.1640E-01 6.2310E-03 6.6780E-02 1.6340E-01 1.8250E-01 5.8930E-03

1.7920E-02 3.6260E-02 1.8760E-02 2.2350E-03 9.7700E-03 1.7890E-02 2.4200E-02

9.7110E-03 8.8630E-03 8.2830E-03 1.4490E-02 5.5200E-03 1.4960E-02 1.2160E-02

9.2740E-03 1.2760E-03 8.3460E-03 2.1720E-02 2.0830E-02 2.9690E+00 1.1290E-01

4.8190E-03 5.0600E-01 1.2170E-01 2.5430E-02 5.3130E-03 3.3470E-01 8.7350E-02

1.3240E-02 6.0490E-04 2.5680E-01 7.9280E-02 1.9420E-02 2.5600E-03 2.2130E-02

8.6490E-03 1.1080E-03 7.3330E-01 5.5710E-02 1.0820E-02 1.9810E-03 5.0060E-01

1.0330E-01 1.1660E-02 1.3790E-03 6.4950E-02 1.6480E-02 2.4200E-03 7.0320E-04

2.5280E-01 6.0660E-02 9.7700E-03 1.8360E-03 4.2550E-02 3.0910E-02 1.5900E-02

3.4640E-03 8.6220E-02 2.0500E-02 6.6590E-03 5.5160E-04 1.5800E-01 4.6280E-02

1.1320E-02 1.4280E-03 3.6640E+00 1.3490E-01 1.5110E-01 2.6560E-01 1.0700E-01

2.5990E-02 8.7120E-02 1.7150E-01 9.0360E-02 1.5710E-02 6.9090E-02 1.3630E-01

7.2140E-02 2.1970E-02 1.4050E-02 7.0640E-03 5.0300E-03 1.8220E-01 4.3240E-01

4.4820E-02 9.5600E-03 1.3300E-01 2.6340E-01 1.0500E-01 1.2890E-02 2.5960E-02

2.8290E-02 1.4520E-02 1.7680E-03 6.0490E-02 1.4490E-01 6.1730E-02 1.0460E-02

3.5460E-02 2.2510E-02 1.0780E-02 8.5980E-03 3.4350E-02 4.4530E-02 1.0420E-02

6.8240E-03 5.5110E-02 7.7200E-02 3.6180E-02 1.2400E-02 2.8070E+00 3.9560E-02

1.3610E-01 1.7970E-01 8.4910E-02 1.3210E-02 9.0080E-02 1.1640E-01 7.4300E-02

1.4410E-02 6.2350E-02 9.9220E-02 6.3140E-02 7.8500E-03 7.6890E-03 5.3630E-03

4.0970E-02 1.8540E-01 2.7830E-01 3.0450E-02 2.3340E-02 1.3490E-01 1.7150E-01

8.0090E-02 8.2240E-03 2.2550E-02 1.5810E-02 9.8350E-03 9.7520E-03 6.1600E-02

1.0880E-01 4.9960E-02 2.8370E-02 1.4240E-02 1.1390E-02 7.8670E-03 1.3810E-02

2.3110E-02 3.2330E-02 7.0900E-03 1.6590E-02 4.4300E-02 5.4090E-02 2.9980E-02

8.9440E-03 4.2570E-02 1.1200E-01 1.6650E-01 6.0430E-04 1.5700E-02 7.4130E-02

1.2970E-01 1.3970E-03 1.6190E-02 5.3790E-02 1.0790E-01 3.5400E-03 7.9500E-03

4.1870E-03 8.9390E-03 4.7610E-02 1.4730E-01 1.9820E-01 3.0580E-03 2.7440E-02

1.0910E-01 1.6850E-01 2.3470E-03 8.8920E-03 1.8000E-02 1.3080E-02 1.8320E-03

1.0450E-02 4.9880E-02 1.1390E-01 2.1270E-02 7.7220E-03 1.2220E-02 5.2080E-03

3.8870E-03 1.4650E-02 1.8860E-02 1.9750E-02 2.9670E-03 1.8540E-02 3.8000E-02

4.9140E-02 1.8640E+00 6.3260E-02 3.7230E-03 5.8760E+00 1.4240E+00 1.9630E-01

1.2260E-02 1.1680E+01 2.0720E+00 2.4240E-01 1.4180E-02 4.5230E-01 5.6710E-02

1.9500E-02 5.6900E-01 1.8590E-01 3.0730E-02 8.0830E-03 6.1290E-01 1.3790E-01

2.2860E-02 3.2410E-03 1.8640E-01 5.8870E-02 8.1380E-03 2.2960E-03 7.7180E-02

2.6420E-02 7.7270E-03 1.5760E-03 1.9010E-02 2.8160E-02 1.0410E-02 4.5560E-03

4.5330E-02 2.1400E-02 6.9580E-03 1.1600E-03 9.5400E-02 2.8020E-02 7.4700E-03

1.3700E-03 2.2660E+00 7.6900E-02 1.0660E+00 3.1720E+00 1.5440E+00 2.4110E-01

7.9820E-01 7.6920E+00 2.4420E+00 2.9960E-01 1.8640E-01 2.1370E-01 2.7190E-02

2.3300E-01 2.1700E-01 1.6310E-01 2.3130E-02 1.3770E-01 3.1680E-01 1.3410E-01

2.5210E-02 7.5830E-02 7.0020E-02 5.3140E-02 6.4080E-03 1.7550E-02 4.6340E-02

2.3390E-02 8.5690E-03 1.5210E-02 1.6510E-02 1.3750E-02 4.2560E-03 2.4740E-02

1.6650E-02 1.1920E-02 6.4900E-03 2.8000E-02 4.7340E-02 2.2300E-02 8.0000E-03

1.7070E+00 6.6490E-02 1.1760E+00 2.0270E+00 1.2330E+00 5.4150E-03 9.4340E-01

5.5280E+00 1.9400E+00 7.3030E-02 1.5720E-01 8.7500E-02 6.6710E-02 1.9820E-01

1.0120E-01 1.0850E-01 2.2850E-02 1.3410E-01 2.0000E-01 1.0380E-01 2.0770E-02

6.4880E-02 3.1510E-02 3.5510E-02 4.4360E-03 1.7010E-02 3.2120E-02 2.0080E-02

1.1410E-02 1.0020E-02 1.0400E-02 5.5740E-03 1.0710E-02 1.4040E-02 1.2790E-02

7.3560E-03 7.4690E-03 2.2300E-02 3.1290E-02 1.7710E-02 1.0110E-03 8.0140E-02

9.0270E-01 2.0290E+00 4.7790E-04 5.9920E-03 7.1130E-01 4.9300E+00 2.9600E-02

6.9320E-02 1.1190E-01 1.7900E-02 6.9610E-02 1.4820E-01 8.2600E-02 3.2410E-03

2.5200E-02 1.0380E-01 1.7880E-01 5.0130E-03 2.0930E-02 4.8630E-02 2.6930E-02

8.2980E-04 5.1050E-03 1.5500E-02 2.9830E-02 7.6060E-03 5.7180E-03 5.8770E-03

5.4840E-03 3.1240E-03 1.0780E-02 1.0160E-02 5.7910E-03 1.3700E-03 7.9990E-03

1.7710E-02 2.5810E-02 3.6930E+00 2.5070E-01 1.2380E-02 6.9240E+00 1.6280E+00

3.0580E-01 1.4230E-02 7.8390E-02 4.4060E-02 1.2290E-02 2.6480E-01 1.8390E-02

4.2050E-03 7.1910E-04 7.1460E-01 1.6690E-01 3.6700E-02 7.9040E-03 1.0910E-01

1.4860E-02 4.0400E-03 7.1590E-04 2.5310E-01 6.4360E-02 1.0950E-02 1.5430E-03

5.7780E-03 2.8480E-02 6.2130E-03 4.0790E-04 1.0090E-01 2.2740E-02 7.9970E-03

1.3280E-03 1.8850E-01 6.1870E-02 4.7870E-03 3.7820E-04 4.3440E+00 3.0050E-01

1.2750E+00 7.4320E+00 2.9920E+00 3.6450E-01 5.9460E-02 2.9770E-02 2.2640E-02

6.2180E-02 1.5970E-01 1.3290E-02 3.7870E-03 2.0830E-01 3.8410E-01 1.4350E-01

3.7310E-02 3.2480E-02 6.0830E-02 9.8490E-03 3.4800E-03 6.4520E-02 1.3620E-01

6.2230E-02 1.2290E-02 4.8140E-03 1.5010E-02 1.0580E-02 3.7560E-03 3.9100E-02

5.2940E-02 1.2060E-02 7.2450E-03 7.9330E-02 1.4420E-01 6.7050E-02 5.4540E-03

3.3820E+00 1.4120E-01 2.4270E+00 5.3550E+00 2.4050E+00 4.0170E-02 2.9950E-02

1.9600E-02 1.4130E-02 6.3430E-02 1.0410E-01 9.0020E-03 5.5940E-02 1.8530E-01

2.6390E-01 1.1420E-01 1.0050E-02 2.9010E-02 3.9770E-02 6.5770E-03 1.0870E-02

6.2160E-02 9.5450E-02 5.1580E-02 3.8510E-03 6.8590E-03 1.0320E-02 6.2930E-03

1.5620E-02 2.7670E-02 3.7660E-02 7.8520E-03 1.2140E-02 8.3950E-02 8.9000E-02

5.1530E-02 3.6610E-04 1.6810E-01 1.9100E+00 5.6690E+00 2.3880E-02 3.0640E-02

1.2620E-02 3.1980E-03 1.6340E-02 5.0390E-02 7.3010E-02 1.3100E-02 5.9680E-02

1.5280E-01 2.3830E-01 2.9070E-03 1.0700E-02 2.3090E-02 2.7450E-02 1.5380E-03

1.2270E-02 5.1530E-02 9.9350E-02 2.8880E-03 2.4260E-03 8.0570E-03 7.0900E-03

5.2790E-03 1.5900E-02 2.2060E-02 2.3090E-02 1.1540E-03 1.4560E-02 6.7290E-02

9.5100E-02 1.4650E+00 1.1000E-01 4.5170E-03 1.6540E-02 2.0050E-03 1.0520E-04

7.1400E-02 2.4590E-02 7.7280E-03 1.7250E-04 1.9600E+00 1.4650E-01 2.0220E-02

2.6210E-03 3.2020E-02 7.9790E-03 1.2020E-03 1.5180E-04 5.1960E-01 9.0620E-02

1.0590E-02 1.0220E-03 3.9120E-04 2.4650E-02 3.5830E-03 1.3880E-04 3.7130E-02

7.8980E-03 6.5560E-04 5.1760E-05 2.7850E-01 2.2730E-02 4.0300E-03 2.4710E-04

2.8650E+00 1.2800E-01 8.1640E-03 6.6310E-03 1.2010E-03 3.6610E-02 3.4070E-02

1.1900E-02 8.3740E-03 3.6180E-01 1.3030E+00 1.3770E-01 2.1690E-02 1.3830E-02

1.4090E-02 6.4620E-03 1.1210E-03 1.1080E-01 2.9930E-01 9.6520E-02 1.2250E-02

3.3520E-04 1.2620E-02 9.5250E-03 2.1790E-03 1.5270E-02 1.6150E-02 7.0570E-03

6.4370E-04 5.1010E-02 1.6660E-01 1.9920E-02 4.5430E-03 3.4150E+00 3.5050E-03

6.4720E-03 3.3690E-03 1.7480E-02 2.1870E-02 2.6070E-02 8.7640E-03 6.1680E-02

3.9220E-01 9.5630E-01 1.1000E-01 4.8300E-03 1.1440E-02 8.7420E-03 4.5340E-03

1.7500E-02 1.1800E-01 2.2020E-01 7.7720E-02 2.7940E-04 5.6010E-03 9.5210E-03

5.2140E-03 4.7360E-03 1.3430E-02 9.5080E-03 4.9710E-03 1.0060E-02 5.2230E-02

1.2320E-01 1.6390E-02 1.1350E-03 4.4330E-03 5.0880E-03 5.1260E-03 1.9340E-02

1.9570E-02 1.5340E-02 9.0470E-03 7.1830E-02 3.2100E-01 8.1510E-01 1.2650E-03

5.5950E-03 9.6400E-03 7.2180E-03 1.9750E-03 2.0180E-02 9.7310E-02 2.2820E-01

2.2350E-04 1.7970E-03 7.0740E-03 7.3410E-03 9.8430E-04 5.6830E-03 1.1290E-02

8.4350E-03 1.3990E-03 1.1760E-02 4.3150E-02 1.0790E-01 6.5100E-01 4.3970E-02

2.3980E+00 1.1490E+00 3.8930E-01 6.7990E-02 7.6620E+00 2.6930E+00 7.2970E-01

1.2910E-01 5.3290E-02 3.0030E-02 1.4520E-02 5.6030E-03 2.0830E-02 1.5060E-02

9.0360E-03 4.3180E-03 3.3290E-02 1.0740E-01 9.0230E-02 5.5110E-02 9.1090E-02

5.4400E-02 3.0820E-02 1.4010E-02 4.1070E-02 2.5950E-02 1.7440E-02 1.1400E-02

5.5040E-01 7.7410E-01 7.1230E-01 7.1770E-01 4.6790E-01 3.2170E-01 3.5290E+00

2.6160E+00 1.0360E+00 2.2640E-02 2.0410E-02 1.6480E-02 9.2590E-03 1.0920E-02

5.9070E-03 7.2300E-03 9.0260E-03 2.2190E-02 9.0230E-02 6.0250E-02 1.8190E-02

4.3050E-02 4.0680E-02 2.8940E-02 1.4000E-02 1.7770E-02 2.2110E-02 1.5790E-02

8.2230E-03 3.1320E-02 5.4270E-01 4.9640E-01 2.6590E-01 1.9310E-02 2.0380E-01

1.4780E+00 2.0510E+00 6.3780E-03 1.1610E-02 1.0280E-02 5.7780E-03 1.2030E-03

6.3910E-03 5.5430E-03 3.2050E-03 1.1100E-02 5.5100E-02 1.8230E-02 1.0890E-02

1.8110E-02 1.8550E-02 1.6650E-02 9.8480E-03 9.6180E-03 6.7180E-03 7.9260E-03

7.7680E-03 2.9610E+00 4.5450E-01 3.2000E-02 8.0920E+00 2.9550E+00 6.4960E-01

7.5800E-02 1.1120E-01 5.5100E-02 1.5790E-02 2.7380E-03 6.1300E-02 3.2240E-02

1.5330E-02 5.5130E-03 1.6650E-01 1.3790E-01 3.8540E-02 1.6130E-02 1.3940E-01

7.2690E-02 2.8110E-02 1.0430E-02 1.3000E-01 5.2270E-02 1.4280E-02 2.1460E-03

2.6460E+00 5.3560E-01 2.2190E+00 3.1470E+00 2.6860E+00 8.0590E-01 5.5080E-02

3.1150E-02 3.8180E-02 1.3910E-02 2.4630E-02 2.4910E-02 2.1320E-02 1.4510E-02

1.2470E-01 6.2010E-02 6.6600E-02 1.6640E-02 7.2690E-02 4.8190E-02 4.8820E-02

1.7380E-02 4.1160E-02 4.9090E-02 4.2060E-02 1.7040E-02 1.7630E+00 1.8950E-01

2.1200E+00 1.5310E+00 2.0740E+00 1.5790E-02 3.8170E-02 1.5990E-02 2.2170E-02

7.4140E-03 1.5670E-02 1.6730E-02 1.6540E-02 8.3070E-02 2.9040E-02 4.0710E-02

2.6650E-02 2.8120E-02 4.8820E-02 2.1030E-02 2.6820E-02 6.1090E-03 3.3580E-02

2.7530E-02 3.2480E-02 8.6070E-03 2.1140E-01 1.4670E+00 1.2700E+00 2.7380E-03

1.3910E-02 2.2180E-02 5.7020E-03 1.3080E-03 6.2160E-03 9.9760E-03 1.0240E-02

4.1510E-02 1.2500E-02 1.4980E-02 2.0660E-02 1.0430E-02 1.7380E-02 2.6820E-02

7.6930E-03 3.1210E-04 6.8310E-03 2.2760E-02 1.9480E-02 2.9480E+00 2.1220E-01

1.1410E-02 1.7350E-01 6.8230E-02 1.7310E-02 4.3740E-03 1.2490E-01 6.0410E-02

1.8640E-02 4.5550E-03 3.8020E-02 3.6160E-01 3.5630E-02 5.3020E-03 3.7780E-01

1.1870E-01 1.5130E-02 3.9050E-03 1.1790E-01 5.9630E-02 2.0950E-02 3.7010E-03

3.3520E+00 2.5890E-01 8.1950E-02 6.3600E-02 5.1060E-02 1.3740E-02 5.4090E-02

4.8160E-02 4.3760E-02 1.9800E-02 3.0420E-02 1.4120E-01 1.6020E-01 2.0710E-02

1.5340E-01 1.3620E-01 1.1060E-01 1.1900E-02 5.9580E-02 4.0100E-02 3.7030E-02

2.2850E-02 2.5550E+00 2.9650E-02 6.0390E-02 3.4940E-02 3.2840E-02 1.2610E-02

3.9060E-02 2.9100E-02 3.7280E-02 2.2820E-02 4.7290E-02 1.2300E-01 7.1190E-02

3.8960E-02 1.3300E-01 5.8610E-02 7.6300E-02 2.0940E-02 3.7020E-02 3.0380E-02

3.0830E-02 9.4460E-03 2.8800E-02 4.4110E-02 2.2880E-02 2.7340E-03 1.2740E-02

3.1810E-02 3.3010E-02 1.5210E-02 1.3500E-02 5.7010E-02 9.0560E-02 9.0040E-03

4.2200E-02 1.0250E-01 5.2780E-02 3.7010E-03 2.2850E-02 3.0820E-02 2.2410E-02

1.7540E+00 2.8570E-01 9.0130E-02 6.3770E+00 1.6190E+00 3.4070E-01 6.2370E-02

1.1730E+00 2.1000E+00 1.1710E+00 9.8430E-02 1.7960E+00 5.7940E-01 1.0270E-01

6.2750E-03 2.2670E+00 6.9760E-01 1.4090E-01 1.7520E-02 1.6400E+00 2.0570E-01

5.2040E-01 3.6290E+00 1.6800E+00 3.9360E-01 8.7860E-01 1.3950E+00 3.4570E-01

7.8170E-01 5.7710E-01 6.8360E-01 4.8070E-01 1.2270E-01 4.7160E-01 1.0360E+00

6.6410E-01 1.7360E-01 1.0900E+00 5.0650E-02 4.6380E-01 2.2540E+00 1.3270E+00

5.8510E-01 5.8370E-01 6.7690E-01 4.2540E-01 1.0200E-01 4.7950E-01 3.4710E-01

3.1400E-01 3.8230E-02 4.6180E-01 5.5490E-01 5.1110E-01 1.4450E-02 3.7100E-02

3.1340E-01 1.6800E+00 2.9240E-01 1.3550E-01 6.0940E-01 9.4970E-02 6.2750E-03

1.2220E-01 3.1370E-01 1.7920E-01 3.4330E-03 4.0690E-02 3.2050E-01 4.1960E-01

3.9300E+00 2.9940E-01 3.2290E-02 1.2620E-01 7.7700E-02 2.7760E-02 5.9310E-03

5.1430E+00 2.4290E-01 5.6050E-03 1.1850E-03 1.0590E+01 2.0960E+00 1.7700E-01

7.5260E-03 4.5880E+00 3.4360E-01 1.0520E-01 4.8210E-02 2.9290E-02 1.4980E-02

1.1400E+00 3.0940E+00 2.5040E-01 4.7200E-03 2.7300E+00 5.5300E+00 2.2330E+00

2.0770E-01 3.5740E+00 8.4150E-02 2.7450E-02 2.8960E-02 1.7950E-02 1.8360E-01

1.2790E+00 1.9570E+00 1.7490E-01 4.2290E-01 2.8790E+00 3.5430E+00 1.7270E+00

6.3110E-02 1.3970E-02 2.5070E-02 1.6500E-02 1.7840E-02 2.3810E-01 1.0160E+00

1.4300E+00 3.4700E-02 5.1670E-01 2.3150E+00 3.5690E+00 6.5940E-01 4.3960E-01

2.1980E-01 2.0930E+00 1.5730E+00 1.0510E+00 5.2630E-01 1.8730E-02 1.4980E-02

1.1240E-02 7.4900E-03 2.2560E+00 1.0480E+00 4.4170E+00 3.0120E+00 1.2250E+00

2.4790E-01 3.6690E-01 1.5020E-01 6.2110E-02 2.9140E-02 8.4840E-01 2.5650E+00

5.4070E-01 1.4400E+00 1.3780E+00 4.4920E-02 1.7920E-01 1.2930E-01 5.2150E-02

1.3780E-01 1.7690E+00 9.0580E-01 1.4790E-01 2.1860E-02 1.8350E-02 6.9690E-02

9.2780E-02 2.2250E+00 2.8410E-01 3.3300E-02 2.0620E+00 6.8440E-01 1.8370E-01

4.6270E-02 2.1320E+00 3.1080E-01 4.9050E-01 9.5350E-01 5.9990E-01 1.9270E-01

1.4420E+00 8.3930E-02 4.2370E-01 5.3310E-01 4.5100E-01 1.9490E-02 6.8350E-02

2.8230E-01 3.7450E-01 4.3160E+00 4.3260E-01 2.4120E-02 4.6700E+00 5.2790E-01

3.5940E+00

25000.00

5.4680E+00 1.7040E+00 7.3890E-01 3.0370E-01 2.6630E+00 1.1100E+00 3.5030E-01

9.3050E-02 8.0990E+00 6.4640E-01 2.2480E-01 7.6910E-02 8.9260E-01 4.8580E-01

3.9760E-02 2.8680E-01 8.8020E-02 7.8620E-03 6.4250E-01 3.1670E-01 9.7610E-02

1.7250E-02 4.3220E-01 2.1670E-01 1.1410E-01 3.8870E-02 4.5400E-01 2.2940E-01

8.4060E-02 1.9680E-02 2.9030E-01 1.6030E-01 7.6820E-02 3.9130E-02 2.7040E+01

7.1120E+00 4.9760E-01 1.8540E-01 6.8600E-02 3.2940E+01 5.6940E+00 6.0860E-01

5.6700E-02 2.3660E-02 1.0980E-02 1.4930E+01 1.7250E-01 4.1450E-02 1.3490E+00

2.4170E-01 9.2240E-03 1.8940E-03 2.1800E+00 2.7740E-01 2.9530E-02 9.8290E-03

8.2140E-01 1.4050E-02 7.4590E-03 1.4470E-01 1.0620E-01 4.6170E-02 1.0880E-02

8.2740E-02 5.5750E-02 2.3180E-02 8.9170E-03 2.3820E-02 7.5530E-03 2.3660E-03

7.3130E-02 3.5780E-02 1.3370E-02 3.8300E-03 2.9370E-02 1.7960E-02 7.8190E-03

1.9020E-03 7.0360E-02 3.9590E-02 1.3460E-02 2.4220E-03 5.2160E-02 2.0990E-02

4.8050E-03 5.2750E-04 3.9070E-02 1.5460E-02 6.0280E-03 1.7570E-03 3.4500E-02

1.1370E-02 3.4500E-03 1.0850E-03 5.7460E-02 2.6160E-02 1.1300E-02 3.8930E-03

7.6070E-02 2.8440E-02 7.4990E-03 1.1180E-03 4.9170E-02 1.5400E-02 3.8420E-03

6.9690E-04 5.0130E-02 2.3590E-02 8.6280E-03 1.8860E-03 3.7760E-02 1.3370E-02

6.3450E-03 3.2360E-02 2.0710E-02 7.3770E-03 1.6140E-03 2.9490E-02 1.6540E-02

1.0130E-02 7.0910E-03 1.3570E-02 1.0080E-02 3.8690E-03 9.1470E-04 1.1290E-02

8.7260E-03 4.6590E-03 1.5110E-03 2.1090E-02 9.7600E-03 7.7140E-03 4.4590E-03

1.5380E-02 1.0400E-02 5.5640E-03 2.5190E-03 1.9760E-02 1.3590E-02 6.2080E-03

1.8280E-03 5.3910E+00 1.4630E+00 4.8750E-01 1.2090E+00 1.0810E+00 7.8050E-01

3.1680E-01 2.0400E+00 4.8270E+00 4.1910E-01 1.3780E-01 6.4820E-01 2.1850E-01

2.7470E-01 1.6270E-01 9.4650E-02 4.9810E-02 2.8530E-01 2.2980E-01 2.4540E-01

1.0130E-01 2.2410E-01 2.3020E-01 1.0220E-01 9.5110E-02 1.9730E-01 2.2910E-01

1.5440E-01 8.2480E-02 1.8230E-01 1.3800E-01 1.0910E-01 2.9180E-02 6.5460E+00

1.2320E+01 9.0270E+00 4.9510E-01 1.3680E-01 4.9800E-01 2.2310E+01 7.9620E+00

1.2170E+00 7.0070E-02 1.2500E-02 4.3580E+00 7.6210E+00 1.0700E-01 4.4640E-01

5.9740E-01 2.3120E-01 7.3860E-03 4.2400E-01 1.2660E+00 2.8170E-01 2.4870E-02

3.1150E-01 3.5750E-01 5.4500E-03 1.0720E-01 4.1690E-02 5.4220E-02 4.3080E-02

6.6440E-02 3.8560E-02 2.4000E-02 7.1340E-03 1.3660E-02 9.7240E-03 3.5930E-03

3.4790E-02 2.8840E-02 2.4630E-02 1.2620E-02 1.7590E-02 1.0490E-02 1.1010E-02

7.8010E-03 3.4590E-02 2.2220E-02 2.9850E-02 1.4030E-02 2.6760E-02 1.7740E-02

1.3780E-02 4.4620E-03 1.9810E-02 1.7260E-02 8.5750E-03 4.1200E-03 1.3000E-02

1.5870E-02 8.5840E-03 2.9690E-03 2.5490E-02 2.6560E-02 1.6810E-02 1.0190E-02

3.1680E-02 3.0750E-02 2.0600E-02 7.5850E-03 1.5220E-02 2.3490E-02 1.2640E-02

3.9290E-03 2.1330E-02 2.0760E-02 1.6620E-02 8.7150E-03 2.2710E-02 1.8080E-02

5.5000E-03 2.2950E-02 9.7780E-03 1.1140E-02 5.7720E-03 1.7240E-02 1.5900E-02

1.2200E-02 5.0890E-03 1.0770E-02 3.9390E-03 5.1290E-03 2.9350E-03 8.3880E-03

4.0550E-03 4.2410E-03 4.2690E-03 1.6870E-02 8.5900E-03 6.1100E-03 2.8450E-03

1.1370E-02 7.0940E-03 6.0130E-03 2.5520E-03 1.3810E-02 6.7130E-03 7.1300E-03

5.4560E-03 4.1320E+00 9.3930E-01 4.5830E-01 8.3820E-01 6.9050E-01 5.5750E-01

5.1080E-01 2.2040E+00 2.6460E+00 2.2660E-01 3.7220E-01 2.5410E-01 2.3070E-01

8.0980E-02 9.0480E-02 5.9240E-02 8.1710E-02 2.1270E-01 1.5570E-01 1.9710E-01

1.2330E-01 1.2260E-01 1.6650E-01 8.0550E-02 7.8870E-02 1.5100E-01 1.5910E-01

1.2540E-01 1.0830E-01 1.2380E-01 6.4130E-02 4.9870E-02 3.4750E-01 8.7880E+00

4.0120E+00 8.1180E+00 3.4910E-01 5.8860E-02 5.1770E-01 1.4100E+01 7.9270E+00

1.5790E+00 6.9740E-02 8.0090E-01 5.4260E+00 2.8290E+00 1.0900E-01 4.1270E-01

3.0500E-01 1.3390E-01 5.5770E-02 5.0650E-01 7.5550E-01 1.7990E-01 9.9420E-02

2.9030E-01 1.1620E-01 5.4420E-02 4.8460E-02 3.7500E-02 4.4420E-02 4.8030E-02

3.0810E-02 1.7940E-02 5.3500E-03 7.5450E-03 8.2430E-03 4.4440E-03 1.3210E-02

2.3110E-02 1.9830E-02 1.9510E-02 6.5610E-03 9.5680E-03 8.1670E-03 1.0160E-02

9.9150E-03 2.4740E-02 1.5750E-02 2.5110E-02 1.1020E-02 1.6440E-02 1.1290E-02

8.3620E-03 9.8040E-03 1.2190E-02 1.0590E-02 4.7530E-03 4.5160E-03 1.0170E-02

9.7930E-03 5.9420E-03 1.0770E-02 1.6560E-02 1.8480E-02 1.3480E-02 1.0530E-02

2.2870E-02 1.9620E-02 1.5040E-02 3.8250E-03 1.3040E-02 1.5160E-02 9.4210E-03

7.1480E-03 1.4720E-02 1.4710E-02 1.3980E-02 1.3920E-02 1.4210E-02 6.6510E-03

1.2330E-02 1.0750E-02 7.6460E-03 6.5140E-03 1.0610E-02 1.2600E-02 8.3070E-03

6.3400E-03 6.1070E-03 4.6120E-03 3.3530E-03 2.9540E-03 4.4470E-03 3.7850E-03

3.5360E-03 3.9480E-03 1.2680E-02 7.0000E-03 4.2800E-03 1.8800E-03 7.3890E-03

6.3430E-03 3.7980E-03 2.7440E-03 7.1770E-03 6.6420E-03 5.4260E-03 5.5930E-03

2.4990E+00 1.4580E-01 4.5240E-01 5.6270E-01 5.3540E-01 1.7590E-01 5.6460E-01

1.8290E+00 1.1520E+00 1.6890E-01 2.8040E-01 1.2260E-01 3.3530E-02 7.1730E-02

4.8430E-02 1.2530E-02 1.0470E-01 1.3660E-01 1.7760E-01 5.5650E-02 8.2280E-02

1.1060E-01 8.0620E-02 2.3130E-02 7.8370E-02 1.1790E-01 1.2550E-01 6.4020E-02

7.3160E-02 5.5890E-02 3.8180E-02 1.0130E-01 4.5600E-01 7.9710E+00 7.1300E-01

5.2190E+00 2.7360E-02 4.7230E-02 3.8190E-01 7.9770E+00 6.3820E+00 1.4230E+00

5.0750E-02 1.8320E+00 4.1520E+00 1.6800E-02 1.6100E-01 2.6330E-01 1.9510E-01

1.0370E-02 8.4160E-02 4.4990E-01 4.4710E-01 2.6340E-02 1.4000E-01 1.7090E-01

1.9450E-02 4.3450E-02 3.5000E-02 2.5300E-02 3.0510E-02 2.3380E-02 1.0700E-02

3.5670E-03 3.9060E-03 5.5200E-03 4.0630E-03 4.0080E-03 1.2860E-02 1.6150E-02

1.7420E-02 1.7080E-03 6.3340E-03 7.1940E-03 7.6500E-03 1.2840E-03 1.2940E-02

1.5310E-02 2.0800E-02 3.4590E-03 1.0750E-02 1.0280E-02 6.8760E-03 4.4260E-03

7.4880E-03 8.1620E-03 4.8380E-03 1.5150E-03 4.4900E-03 7.2000E-03 6.9590E-03

3.9770E-03 8.9890E-03 1.3180E-02 1.3380E-02 2.5620E-03 1.1510E-02 1.5810E-02

1.5380E-02 7.6370E-04 4.6010E-03 1.0190E-02 1.2030E-02 1.6360E-03 7.4410E-03

1.1200E-02 1.3400E-02 8.1980E-03 8.4740E-03 6.4160E-03 5.2020E-03 9.4080E-03

6.5530E-03 3.6840E-03 6.8420E-03 6.7380E-03 6.1830E-03 5.5340E-03 2.7230E-03

4.4320E-03 2.7840E-03 1.4190E-03 1.6760E-03 3.3270E-03 3.0810E-03 2.3940E-03

8.4370E-03 4.9680E-03 2.6130E-03 1.1920E-03 4.4080E-03 4.4540E-03 2.9780E-03

1.7180E-03 2.8210E-03 5.5280E-03 4.7260E-03 3.4840E-03 3.9020E-02 1.5590E-01

3.4210E-01 3.1190E-01 6.7230E-02 1.3240E-01 4.6430E-01 1.1950E+00 5.4930E-02

1.8590E-01 4.3450E-02 1.0500E-02 3.9490E-02 2.6670E-02 9.5600E-04 1.9210E-02

1.0040E-01 9.5170E-02 1.7030E-02 5.3930E-02 3.6090E-02 5.7530E-02 3.7790E-03

3.0880E-02 5.9770E-02 7.7850E-02 3.1330E-02 2.6440E-02 4.1590E-02 1.6280E-02

2.8020E-02 1.3670E-01 3.4860E-01 5.1970E+00 1.5920E+00 1.3050E-02 1.2270E-02

2.7770E-02 2.1140E-01 3.5680E+00 4.3030E+00 1.6580E-02 5.5400E-02 2.9440E+00

1.9500E-03 2.7570E-02 1.4980E-01 1.3840E-01 4.8380E-03 5.1650E-03 8.4360E-02

4.0060E-01 6.0140E-03 4.1090E-02 1.2150E-01 4.0890E-03 2.3940E-02 2.5120E-02

8.2660E-03 1.4710E-02 1.2840E-02 4.7550E-03 1.7830E-03 1.6600E-03 2.6820E-03

2.4130E-03 9.6770E-04 4.5030E-03 1.0090E-02 9.6790E-03 1.9760E-04 2.4450E-03

5.0950E-03 3.7650E-03 5.8970E-06 2.1700E-03 1.2750E-02 1.0250E-02 7.2620E-04

4.6420E-03 6.9990E-03 3.3300E-03 1.6070E-03 3.6810E-03 3.9670E-03 3.1940E-03

4.8600E-04 1.4170E-03 3.5040E-03 4.7160E-03 1.1080E-03 4.0620E-03 6.1140E-03

8.4780E-03 3.5650E-04 3.7140E-03 9.2070E-03 9.4600E-03 1.1790E-04 1.0430E-03

4.1570E-03 8.4360E-03 1.6870E-04 2.3960E-03 6.3000E-03 7.9490E-03 3.8940E-03

3.6840E-03 3.9360E-03 1.6230E-03 5.2120E-03 4.5490E-03 1.0620E-03 3.5810E-03

2.2670E-03 3.7520E-03 3.0480E-03 8.9500E-04 2.6110E-03 1.9100E-03 2.6790E-04

3.8530E-04 1.9340E-03 1.9450E-03 9.7500E-04 4.2190E-03 2.5810E-03 1.2150E-03

5.8960E-04 2.0580E-03 2.1160E-03 1.9770E-03 6.2640E-04 7.7160E-04 3.0030E-03

3.1240E-03 1.3820E-03 8.1380E+00 2.3470E+00 8.0640E-01 2.1980E+00 7.9660E-01

1.8980E-01 3.8900E-02 1.3050E+00 4.9290E-01 1.6780E-01 6.2200E-01 1.3280E-01

3.5900E-02 1.6340E+00 5.8320E-01 1.5460E-01 3.6810E-02 1.7220E+00 5.2370E-01

1.5390E-01 4.3520E-02 1.2380E+00 5.1070E-01 1.6370E-01 4.8020E-02 9.5060E-01

4.3000E-01 1.8220E-01 6.8330E-02 7.2970E-01 3.2030E-01 1.1740E-01 3.7220E-02

8.3200E-03 6.9650E-01 3.4720E-01 1.4840E-01 5.1660E-02 1.4060E-02 2.7840E-03

2.5950E-01 1.0680E-01 2.2440E-02 9.3270E+00 3.5790E-01 1.0850E-01 2.6240E-02

4.7030E+00 7.2390E-01 1.2700E-01 3.7060E-02 4.2830E-01 1.6590E-01 2.9350E-02

1.3430E+00 6.0550E-01 3.0010E-01 1.6840E-01 9.0140E-02 4.0660E-02 1.6780E-02

1.2740E-01 1.7740E-01 1.0720E-01 1.5650E-02 3.8890E+00 4.1490E-01 3.6910E-02

4.7000E-03 2.0830E-01 9.8090E-02 2.4210E-02 3.1210E-03 2.4620E-01 1.7530E-01

3.2410E-02 3.1620E-03 1.8090E+00 4.2020E-02 8.1450E-03 1.1450E-03 7.9250E-01

2.6210E-02 5.9640E-03 1.5930E-03 9.2400E-01 1.2840E-01 1.6030E-02 2.5140E-03

1.4140E+00 1.6630E-01 2.3600E-02 3.5000E-03 3.1230E+00 4.0280E-01 1.8490E-02

2.7940E-03 8.0490E-01 1.1590E-01 2.4750E-02 3.4390E-03 2.7860E-01 1.0110E-01

2.5740E-02 3.1160E-03 3.0860E-02 1.2730E-02 2.5410E-03 3.0720E-01 3.3380E-02

1.1380E-02 2.2790E-03 5.6750E-02 2.0580E-02 6.7120E-03 1.4430E-03 1.1470E-01

1.6320E-02 4.2540E-03 7.6920E-04 7.3410E-02 2.4080E-02 7.1060E-03 1.1950E-03

2.5120E-02 8.7620E-03 4.9210E-03 8.1190E-04 7.6770E-02 8.6550E-03 2.1060E-03

3.6150E-04 1.7010E-01 3.2050E-02 5.5250E-03 9.5370E-04 8.1880E+00 2.2560E+00

9.6790E-01 8.9480E-01 5.9200E-01 1.6690E-01 7.7050E-01 5.7380E-01 2.3690E-01

2.9720E-01 2.6840E-01 6.9310E-02 4.2020E-01 8.3130E-01 5.6430E-01 1.6780E-01

5.1630E-01 9.0470E-01 4.3010E-01 1.4720E-01 4.1390E-01 6.3190E-01 4.2860E-01

1.6590E-01 4.8460E-01 4.6520E-01 2.6220E-01 1.0880E-01 2.6370E-01 3.6270E-01

2.2810E-01 1.1190E-01 4.3850E-02 2.5190E-01 2.6750E-01 2.3570E-01 1.5590E-01

7.5940E-02 2.4900E-02 1.4060E-01 9.7720E-02 7.2230E-02 1.3930E+00 6.1360E+00

2.3870E-01 8.8010E-02 7.2360E-01 2.8830E+00 7.2660E-01 1.2110E-01 2.5690E-01

1.4760E-01 9.4930E-02 6.0540E-01 6.8900E-01 4.4340E-01 1.9540E-01 5.8190E-02

4.1890E-02 1.8150E-02 1.0190E-01 1.3380E-01 4.3200E-02 6.3130E-02 1.0760E-01

2.7510E+00 4.9690E-01 4.3090E-02 6.8320E-02 1.5420E-01 9.1620E-02 2.8470E-02

9.8850E-02 3.0880E-01 1.8890E-01 3.8950E-02 2.4430E-01 1.2020E+00 3.1880E-02

7.8180E-03 1.2640E-01 5.2020E-01 1.9950E-02 4.6820E-03 1.2830E-01 5.7560E-01

1.3490E-01 1.7730E-02 7.1550E-02 9.7430E-01 1.8230E-01 2.7130E-02 3.4220E-01

2.4300E+00 4.0710E-01 2.0600E-02 6.9460E-02 5.5040E-01 1.1630E-01 2.8670E-02

7.4050E-02 1.2900E-01 9.1960E-02 3.0460E-02 1.9050E-02 1.0910E-02 7.0630E-03

6.4440E-02 1.8850E-01 1.8860E-02 1.0010E-02 2.0570E-02 2.7170E-02 1.4290E-02

6.9810E-03 2.8030E-02 6.5720E-02 1.1390E-02 3.7780E-03 1.9930E-02 3.7680E-02

1.9530E-02 8.0330E-03 2.0090E-02 6.2830E-03 2.4240E-03 2.8380E-03 1.6890E-02

4.5460E-02 6.1820E-03 1.9320E-03 3.0650E-02 1.0020E-01 3.0620E-02 6.0230E-03

6.3420E+00 3.4090E-01 7.2760E-01 5.2640E-01 3.8430E-01 4.4120E-01 4.7270E-01

2.7540E-01 1.3320E-01 2.1550E-01 1.2660E-01 6.5810E-02 4.0970E-01 5.5040E-01

4.7360E-01 1.5100E-01 4.2440E-01 6.0200E-01 3.3240E-01 1.1500E-01 3.5660E-01

4.2700E-01 3.5430E-01 2.4760E-01 3.2750E-01 2.8040E-01 1.4410E-01 8.7580E-02

1.9310E-01 2.3600E-01 1.7330E-01 8.0500E-02 5.2610E-02 1.8120E-01 1.7410E-01

1.5270E-01 1.2360E-01 7.1910E-02 6.3030E-02 8.8580E-02 8.1090E-02 2.1990E-01

1.5250E+00 3.9990E+00 1.4900E-01 1.2660E-01 7.2440E-01 1.9310E+00 5.5110E-01

1.3290E-01 1.4560E-01 9.6360E-02 3.0010E-01 4.4340E-01 4.1230E-01 2.9410E-01

3.6720E-02 3.3330E-02 1.8110E-02 7.6460E-02 7.6370E-02 5.9190E-02 4.4510E-02

1.5910E-02 1.0620E-01 2.5590E+00 3.8480E-01 9.9830E-03 6.3250E-02 1.0620E-01

7.8280E-02 1.7840E-03 1.1280E-01 2.0600E-01 1.5600E-01 2.5550E-02 2.8590E-01

7.8190E-01 2.1210E-02 1.5330E-02 1.3030E-01 3.3590E-01 1.2920E-02 1.5960E-02

1.3490E-01 3.8830E-01 1.0340E-01 1.3100E-02 6.3910E-02 7.1960E-01 1.4420E-01

1.8220E-02 4.0610E-01 1.6400E+00 3.0670E-01 1.5860E-02 5.5200E-02 4.0700E-01

9.5400E-02 1.0710E-02 6.7730E-02 8.5840E-02 7.9410E-02 1.0250E-02 1.0610E-02

6.9190E-03 1.8480E-02 5.5450E-02 1.2520E-01 1.1790E-02 6.7110E-03 1.4290E-02

1.8890E-02 1.1500E-02 7.6390E-03 2.3780E-02 4.2280E-02 7.3260E-03 4.8990E-03

1.5630E-02 2.6650E-02 1.6750E-02 1.5070E-02 3.5570E-03 2.9700E-03 2.1250E-03

3.9810E-03 1.5660E-02 2.9220E-02 4.0360E-03 5.5210E-03 3.0600E-02 6.7370E-02

2.3690E-02 9.4690E-02 3.4600E-01 5.4140E-01 3.3630E-01 2.3460E-01 3.1430E-01

2.4390E-01 5.7330E-02 1.2230E-01 1.3560E-01 1.6410E-02 6.3050E-02 3.2250E-01

6.0200E-01 4.3310E-02 1.4640E-01 3.3140E-01 4.8930E-01 3.0660E-02 1.0990E-01

2.8480E-01 4.0670E-01 1.2150E-01 1.8760E-01 2.1230E-01 1.4680E-01 2.0920E-02

8.5410E-02 1.4000E-01 1.5780E-01 1.0580E-01 6.6990E-03 4.7350E-02 1.1690E-01

1.4260E-01 1.2080E-01 6.7390E-02 2.0560E-02 6.9180E-02 6.5180E-02 5.7480E-02

2.3070E-01 1.1540E+00 2.4740E+00 3.7020E-02 1.2110E-01 5.5100E-01 1.5220E+00

5.6030E-02 1.2320E-01 7.0260E-02 1.6840E-01 1.9540E-01 2.9410E-01 3.0860E-01

2.1640E-02 2.1760E-02 1.4790E-02 5.0960E-02 3.2550E-02 7.0720E-02 1.6840E-02

2.3480E-03 1.7180E-02 8.3290E-02 1.9510E+00 3.1120E-04 1.1580E-02 5.1140E-02

1.0810E-01 1.3920E-04 1.9620E-03 8.5950E-02 2.2920E-01 3.5180E-03 3.1040E-02

2.1400E-01 4.8990E-01 3.3230E-03 1.7120E-02 1.0220E-01 2.1880E-01 2.4990E-03

1.7700E-02 1.0340E-01 3.0500E-01 1.5690E-03 1.4430E-02 5.1300E-02 5.5840E-01

2.7320E-03 2.0480E-02 3.6170E-01 1.2810E+00 1.2990E-03 1.8100E-02 4.5890E-02

3.1860E-01 9.2360E-05 1.2620E-02 5.5240E-02 9.4380E-02 4.6090E-03 8.9420E-03

4.9340E-03 5.4580E-03 1.8370E-02 4.2610E-02 7.5160E-02 1.4420E-03 6.9810E-03

1.1490E-02 1.4780E-02 1.9940E-03 7.9220E-03 1.8310E-02 2.6160E-02 4.9250E-04

5.4500E-03 1.3010E-02 2.3710E-02 1.0050E-02 1.5770E-03 3.2320E-03 9.6750E-04

9.6640E-04 4.2890E-03 1.1720E-02 1.8220E-02 9.3060E-04 6.0350E-03 2.3700E-02

5.3460E-02 3.6650E+00 1.2800E+00 5.2430E-01 1.2480E+00 5.6080E-01 9.0670E-02

3.2600E-01 1.3060E-01 3.0660E-02 5.1780E-01 2.6990E-01 1.1980E-01 3.3120E-02

4.5120E-01 2.2970E-01 1.1310E-01 5.1310E-02 4.7530E-01 2.4190E-01 1.0840E-01

4.1730E-02 3.6970E-01 2.0830E-01 1.1710E-01 5.2430E-02 2.4430E+00 9.9570E-01

2.9200E-01 7.0180E-02 1.6870E-02 3.3390E+00 1.1080E+00 3.1940E-01 8.3220E-02

2.3760E-02 7.9540E-03 1.6020E+00 2.2140E-01 2.5290E-02 2.1690E+01 3.7760E+00

8.5620E-02 1.4290E-02 3.1750E+01 4.0690E+00 3.5780E-01 8.1280E-02 1.3800E+01

1.0510E-01 3.0170E-02 1.1940E-01 7.3170E-02 3.9420E-02 1.7740E-02 6.4020E-02

3.8280E-02 1.6350E-02 5.6810E-03 1.6580E-02 5.3000E-03 2.4020E-03 1.1520E-01

5.7070E-02 2.3910E-02 6.2510E-03 1.1560E-02 6.7270E-03 3.3390E-03 1.2530E-03

2.9080E-02 1.6260E-02 7.6580E-03 2.2200E-03 1.9220E-01 4.0380E-02 4.9720E-03

9.9370E-04 2.2590E-01 4.9530E-02 1.0070E-02 3.2630E-03 2.8920E-02 1.1810E-02

4.6750E-03 1.4010E-03 5.4080E-02 2.7780E-02 1.2380E-02 4.0030E-03 2.0690E-01

4.6650E-02 1.2360E-02 2.9380E-03 2.6040E-02 1.1810E-02 4.5760E-03 1.1410E-03

2.4040E-02 1.0840E-02 4.5940E-03 1.5570E-03 1.1250E-01 1.9010E-02 1.0140E-02

3.1390E-02 1.7580E-02 7.4630E-03 2.1540E-03 1.2930E-02 7.9010E-03 4.8970E-03

2.9290E-03 2.8630E-02 2.0050E-02 9.8230E-03 3.2700E-03 4.7420E-03 3.2840E-03

1.9860E-03 9.3200E-04 1.3830E-02 1.1750E-02 2.4910E-03 1.2960E-03 4.9570E-03

3.1920E-03 1.7460E-03 7.3610E-04 1.0920E-02 2.8460E-03 1.0990E-03 4.3460E-04

3.2780E+00 7.4300E-01 7.1480E-01 3.6500E-01 3.4350E-01 1.7590E-01 1.1770E-01

7.2730E-02 1.8180E-01 2.1540E-01 1.7960E-01 1.3240E-01 1.9450E-01 2.0680E-01

1.4690E-01 8.8440E-02 1.7160E-01 2.2240E-01 1.6850E-01 1.0570E-01 1.9120E-01

2.1950E-01 1.1790E-01 5.0600E-02 5.2570E-01 1.1890E+00 8.5610E-01 3.7180E-01

8.4850E-02 1.0540E-01 1.7150E+00 1.1730E+00 4.9770E-01 1.4510E-01 2.8170E-02

3.8470E-01 8.3320E-01 1.6860E-01 3.7600E+00 1.0850E+01 4.4780E+00 8.5670E-02

3.8060E-01 2.1540E+01 4.9210E+00 3.9240E-01 3.2040E+00 7.1950E+00 5.5200E-02

6.5130E-02 5.0200E-02 4.0660E-02 3.1210E-02 4.4730E-02 2.8230E-02 1.6300E-02

4.2740E-03 7.6950E-03 8.0860E-03 2.1740E-03 4.1790E-02 4.6770E-02 3.6820E-02

2.6530E-02 4.9340E-03 4.5790E-03 4.1850E-03 3.4610E-03 1.0740E-02 1.1630E-02

1.0400E-02 8.6170E-03 4.1700E-02 9.5800E-02 4.1720E-02 4.6580E-03 5.0630E-02

1.0880E-01 4.4760E-02 7.1020E-03 9.3330E-03 1.3210E-02 7.8830E-03 4.6900E-03

2.0740E-02 2.2500E-02 1.7870E-02 1.2830E-02 2.4950E-02 1.2820E-01 4.0710E-02

1.3340E-02 8.2650E-03 1.1080E-02 8.2670E-03 5.1830E-03 6.5650E-03 1.1190E-02

7.9100E-03 4.8880E-03 4.0080E-02 5.9350E-02 6.6700E-03 1.7570E-02 1.1070E-02

9.2790E-03 5.8200E-03 7.0090E-03 6.7090E-03 4.8670E-03 2.9150E-03 2.0050E-02

9.9570E-03 9.5840E-03 6.7460E-03 2.7830E-03 1.9150E-03 1.7260E-03 1.6960E-03

1.0370E-02 4.6100E-03 6.1480E-03 8.9840E-04 3.1910E-03 2.1530E-03 1.6390E-03

9.1240E-04 1.8300E-03 5.0820E-03 2.5960E-03 9.4510E-04 1.9980E+00 3.0930E-01

3.9030E-01 2.5050E-01 7.9910E-02 1.0010E-01 6.4140E-02 4.3750E-02 1.1300E-01

1.5760E-01 1.5640E-01 8.0570E-02 1.1770E-01 1.2960E-01 9.6960E-02 5.4720E-02

1.1310E-01 1.4830E-01 1.3220E-01 1.0980E-01 1.1790E-01 1.1200E-01 5.1080E-02

6.7100E-02 5.1930E-01 6.2070E-01 5.3610E-01 3.1140E-01 3.0810E-02 6.6530E-02

7.9970E-01 8.6680E-01 5.0520E-01 1.6960E-01 5.9120E-02 4.1360E-01 4.4800E-01

8.4730E-02 4.4760E+00 5.0770E+00 3.1710E+00 1.0550E-01 3.2810E-01 1.3950E+01

3.7470E+00 4.1640E-01 3.6840E+00 2.8630E+00 2.9040E-02 3.5130E-02 3.4780E-02

2.5870E-02 2.7200E-02 2.0960E-02 1.1290E-02 2.8400E-03 4.0150E-03 4.9440E-03

3.1520E-03 1.0900E-02 2.5290E-02 3.4320E-02 3.0660E-02 1.4800E-03 2.9420E-03

3.4310E-03 3.5830E-03 2.5970E-03 6.4490E-03 8.9870E-03 9.5700E-03 4.9600E-03

4.1690E-02 4.5090E-02 2.8320E-02 1.0060E-02 4.4710E-02 5.3680E-02 3.2790E-02

2.9890E-03 5.6970E-03 9.0020E-03 5.7760E-03 6.1070E-03 1.2510E-02 1.6130E-02

1.4390E-02 6.9800E-03 1.5800E-02 8.1380E-02 3.0730E-02 1.9350E-03 5.3420E-03

7.7660E-03 6.8380E-03 1.8120E-03 4.1530E-03 7.7620E-03 6.6660E-03 1.6770E-02

3.2090E-02 2.2030E-02 7.4620E-03 9.2780E-03 8.0440E-03 4.4960E-03 3.8630E-03

4.0580E-03 3.6850E-03 2.7050E-03 9.8230E-03 9.5840E-03 7.4400E-03 4.0410E-03

1.2070E-03 1.4010E-03 1.4660E-03 1.2550E-03 6.9130E-03 2.2120E-03 3.5430E-03

2.1820E-03 1.7470E-03 1.6390E-03 1.2010E-03 6.6390E-04 7.4310E-04 1.0410E-03

3.5030E-03 1.5470E-03 9.1510E-02 2.7310E-01 1.1000E-01 2.7280E-02 5.8990E-02

3.5220E-02 1.7790E-03 4.6160E-02 8.0670E-02 1.0590E-01 2.7820E-02 5.1930E-02

6.5830E-02 6.6380E-02 1.2250E-02 4.3710E-02 7.3150E-02 9.4260E-02 5.2370E-02

5.0600E-02 5.1080E-02 4.2620E-02 1.7560E-02 5.1260E-02 3.0190E-01 3.9210E-01

2.6270E-01 1.0070E-02 1.8170E-02 3.4550E-02 2.9560E-01 4.8770E-01 3.7080E-01

8.3900E-03 7.2330E-02 3.7670E-01 1.4080E-02 8.5300E-02 3.1710E+00 3.1280E+00

4.7370E-02 5.0340E-02 2.0570E-01 8.7260E+00 2.5080E-02 6.1120E-01 2.8370E+00

9.4040E-03 1.9780E-02 1.8870E-02 1.4330E-02 1.2610E-02 1.1590E-02 5.5220E-03

1.4200E-03 1.8370E-03 1.8050E-03 2.3690E-03 7.1120E-04 1.1430E-02 1.7470E-02

2.0890E-02 2.2420E-04 1.3340E-03 2.0280E-03 2.1300E-03 8.6800E-06 2.8290E-03

4.8160E-03 6.1350E-03 9.9300E-04 4.6570E-03 2.8310E-02 2.7060E-02 3.2610E-03

7.0980E-03 3.2790E-02 2.9920E-02 5.5270E-04 2.7000E-03 3.5410E-03 4.9230E-03

8.4540E-04 5.6090E-03 8.2930E-03 9.6200E-03 9.7640E-04 6.8000E-03 1.0140E-02

5.1440E-02 1.1980E-04 2.0290E-03 3.7000E-03 5.1150E-03 2.6000E-04 1.6390E-03

2.8760E-03 5.4320E-03 7.5220E-03 7.8020E-03 2.0370E-02 2.1540E-03 5.8200E-03

4.4960E-03 2.1760E-03 1.7760E-03 1.8040E-03 1.8870E-03 1.6860E-03 3.2700E-03

6.7460E-03 4.0400E-03 1.3810E-03 3.4120E-04 8.9380E-04 8.1240E-04 6.3950E-04

3.4560E-03 9.6550E-04 1.1970E-03 1.7040E-03 7.3610E-04 9.1240E-04 6.6380E-04

2.9070E-04 2.1600E-04 5.3440E-04 5.8570E-04 1.7410E-03 1.1210E+00 4.4390E-01

3.6610E+00 2.8220E-01 8.4290E-02 1.6130E-01 8.9340E-02 4.7290E-02 2.4430E-02

6.2800E-01 3.0960E-01 1.4460E-01 6.4640E-02 1.9410E-01 1.2960E-01 7.7620E-02

4.1230E-02 7.0880E-01 4.4380E-01 2.1860E-01 7.8000E-02 3.2480E-01 2.2880E-01

1.3060E-01 6.3670E-02 2.4160E-02 2.9900E-01 2.3140E-01 1.5250E-01 8.5440E-02

3.9600E-02 1.3720E-02 2.5840E-01 1.5850E-01 5.2680E-02 2.9550E+00 8.3490E-01

2.0320E-01 5.7880E-02 6.3010E-01 4.8750E-01 2.6550E-01 9.6920E-02 6.1400E+00

2.6730E+00 4.5640E-02 3.7030E-01 1.6830E-01 7.0220E-02 2.8750E-02 3.4700E-01

1.8650E-01 1.0190E-01 5.1040E-01 5.5620E-01 2.7070E-01 2.6000E-02 1.8430E-01

8.1670E-02 3.1900E-02 1.0970E-02 2.9490E-02 1.6180E-02 7.9320E-03 3.1780E-03

4.2500E-02 2.0750E-02 8.6540E-03 2.6110E-03 7.8840E-01 2.3960E-01 4.5440E-02

6.7560E-03 1.5000E+00 3.5670E-01 5.2210E-02 5.6620E-03 6.8490E-02 3.0140E-02

1.1480E-02 3.6390E-03 1.1780E-01 5.5550E-02 2.3290E-02 8.2820E-03 3.6060E-02

2.2840E-02 1.2900E-02 6.1040E-03 1.0360E-02 6.0300E-03 3.5830E-03 2.1160E-03

7.4110E-03 3.8870E-03 1.7980E-03 6.7270E-04 1.3940E+00 6.0780E-01 1.4460E-02

7.5640E-01 2.1920E-01 4.0340E-02 9.5490E-03 1.2540E-01 1.0050E-01 5.9150E-02

2.5890E-02 9.2980E-01 2.4880E-01 6.0160E-02 1.7810E-02 1.8650E-01 8.3430E-02

3.3090E-02 1.0070E-02 4.7790E-01 1.7880E-01 9.1330E-02 1.5550E-02 2.5920E-01

9.5410E-02 4.4140E-02 2.1650E-02 6.5340E-02 2.9300E-02 1.1210E-02 3.2820E-03

5.2140E-01 2.8200E-01 2.2460E+00 1.5940E-01 3.2780E-02 7.1700E-02 6.5920E-02

4.4880E-02 1.3980E-01 2.8500E-01 2.2380E-01 1.2210E-01 8.1560E-02 7.4160E-02

7.3430E-02 6.7960E-02 3.4820E-01 2.5580E-01 2.3420E-01 1.4840E-01 1.4050E-01

1.2070E-01 1.1410E-01 9.5240E-02 5.4010E-02 1.6680E-01 7.5640E-02 7.5030E-02

9.0920E-02 8.6550E-02 5.1960E-02 1.3490E-01 6.0600E-02 1.1700E-01 2.1060E-01

1.4990E+00 8.1210E-01 1.8460E-01 3.9660E-01 1.0970E-01 2.0220E-01 2.7780E-01

2.6680E+00 8.1430E-01 2.4200E+00 6.8010E-02 1.5830E-01 1.2730E-01 7.0410E-02

1.8640E-01 1.8710E-01 5.0690E-02 3.3610E-01 2.5720E-01 9.9970E-02 2.5940E-01

1.8180E-02 7.9800E-02 6.9530E-02 3.8370E-02 6.0490E-03 1.1250E-02 1.1360E-02

9.1680E-03 3.3240E-03 1.7350E-02 1.7490E-02 1.1490E-02 3.1620E-02 4.2080E-01

2.3160E-01 5.2010E-02 2.4120E-02 7.7940E-01 3.9660E-01 8.0700E-02 1.0930E-02

2.8180E-02 2.3190E-02 1.3020E-02 1.6660E-02 4.8800E-02 4.3940E-02 2.7390E-02

1.5230E-02 1.2760E-02 1.2630E-02 1.0210E-02 2.9780E-03 5.1320E-03 4.2520E-03

2.5010E-03 1.1900E-03 2.9630E-03 2.8940E-03 2.1380E-03 6.0690E-01 1.9290E-01

5.4490E-01 3.5300E-02 3.7990E-01 2.0570E-01 4.1790E-02 8.2990E-02 2.8490E-02

4.1970E-02 5.2840E-02 4.3480E-02 4.9310E-01 2.5330E-01 4.5420E-02 1.6440E-02

8.0300E-02 7.0240E-02 3.9460E-02 3.1860E-01 9.1210E-02 3.3700E-02 6.6690E-02

4.7740E-02 1.4350E-01 7.4070E-02 1.5930E-02 1.1720E-02 2.5810E-02 2.1950E-02

1.3370E-02 8.4090E-02 1.5940E-01 1.0960E+00 9.7030E-03 1.7920E-02 3.2990E-02

4.5730E-02 4.2150E-02 7.1980E-02 1.2730E-01 1.4050E-01 1.9220E-02 4.3520E-02

4.6860E-02 3.9190E-02 8.6990E-02 1.8950E-01 1.4210E-01 6.7390E-02 2.7110E-02

7.9000E-02 7.6300E-02 5.4160E-02 2.6990E-02 3.2830E-03 8.4260E-02 8.5690E-02

5.8460E-02 3.0210E-02 1.1310E-02 2.4100E-02 9.3900E-02 3.8520E-02 7.1490E-02

1.0310E-01 6.0910E-01 5.7000E-01 2.9990E-02 2.4830E-01 1.6670E-01 4.8000E-02

4.4900E-02 2.4200E+00 4.8800E-01 1.5190E-02 3.7220E-02 7.5280E-02 8.4200E-02

1.0180E-01 5.0690E-02 5.8060E-02 1.6890E-01 2.5880E-02 2.4490E-01 5.2280E-02

3.4090E-03 1.0120E-02 3.5760E-02 5.3660E-02 5.9000E-04 3.5200E-03 6.5000E-03

8.3020E-03 5.2930E-05 2.0000E-03 8.2300E-03 1.4530E-02 6.6790E-03 1.8890E-02

1.9140E-01 2.0100E-01 6.6280E-03 1.3010E-02 3.6180E-01 3.0690E-01 1.4600E-03

6.6850E-03 1.4040E-02 1.5600E-02 2.2320E-03 9.5520E-03 2.3890E-02 3.2770E-02

3.7690E-03 8.0330E-03 7.9490E-03 5.2820E-03 1.2340E-03 1.2890E-03 2.0700E-03

2.5230E-03 1.0990E-04 7.0320E-04 1.5750E-03 2.2540E-03 1.4370E-02 5.4450E-01

1.1290E-01 1.1760E-02 1.7370E-02 1.5320E-01 1.7650E-01 1.2910E-02 4.8400E-02

3.2180E-02 9.6350E-03 2.4130E-02 1.4320E-02 1.9020E-01 1.8560E-01 2.3840E-03

8.3600E-03 3.6430E-02 5.3930E-02 1.5920E-01 1.5510E-02 6.6690E-02 1.3920E-02

2.9880E-02 1.3480E-02 5.0410E-02 4.6760E-02 9.5210E-04 7.2730E-03 1.3630E-02

1.4560E-02 3.2810E+00 4.7580E-01 4.7590E-01 2.4550E-01 1.2940E-01 6.5100E-02

7.0240E-01 4.8760E-01 3.4490E-01 2.2210E-01 3.9480E-01 2.6360E-01 1.5660E-01

8.0290E-02 6.1770E-01 4.4690E-01 2.8600E-01 1.1300E-01 1.0040E-01 6.5600E-02

3.7690E-02 1.9840E-02 8.2960E-03 1.3090E-01 7.5830E-02 4.1400E-02 2.1050E-02

9.6930E-03 3.5860E-03 6.0860E-02 4.2110E-02 1.9000E-02 4.2460E-01 1.9080E-01

8.2490E-02 3.1400E-02 1.8430E-01 1.1540E-01 6.3550E-02 2.9880E-02 2.7840E-01

1.3560E-01 1.6820E-02 2.1770E-01 1.1740E-01 6.1900E-02 3.1320E-02 2.7440E-01

2.4350E-01 1.4960E-01 6.1590E+00 1.1310E+01 4.8890E+00 1.7030E-01 5.3660E-02

2.8310E-02 1.5220E-02 8.5490E-03 2.2440E-02 1.2050E-02 5.6610E-03 2.0420E-03

3.9720E-02 2.0360E-02 9.0220E-03 2.9270E-03 2.0800E+01 4.9870E+00 6.9040E-01

2.6650E-02 5.8870E-02 3.2560E-02 2.2310E-02 1.2410E-02 3.0440E-02 1.8370E-02

1.1400E-02 6.8100E-03 2.6240E-02 1.9830E-02 1.6000E-02 1.2850E-02 2.3160E-02

1.4180E-02 7.3420E-03 3.0620E-03 9.3040E-03 5.8500E-03 3.4220E-03 1.7820E-03

1.2720E-02 8.5210E-03 4.9110E-03 2.2200E-03 3.2650E-01 1.2890E-01 4.3260E-03

2.9070E-02 1.6300E-02 1.0170E-02 5.2720E-03 2.2730E-02 1.7850E-02 1.2370E-02

7.6940E-03 1.2210E-01 3.1940E-02 1.0980E-02 4.0460E-03 2.1060E-02 1.0190E-02

4.6200E-03 1.9470E-03 6.7110E-02 3.6080E-02 2.0740E-02 3.9690E-03 2.5360E-02

1.1450E-02 6.5870E-03 3.3390E-03 8.9840E-03 5.1730E-03 2.4880E-03 9.1270E-04

2.4520E+00 9.2880E-02 2.0240E-01 1.9270E-01 1.2790E-01 3.5160E-01 4.0380E-01

2.8040E-01 1.4480E-01 1.6070E-01 1.5270E-01 1.5160E-01 1.4200E-01 3.7520E-01

2.9380E-01 2.1830E-01 1.1920E-01 3.9730E-02 4.2200E-02 3.6610E-02 2.6400E-02

1.3540E-02 2.6590E-02 4.5960E-02 4.5280E-02 3.5700E-02 2.3420E-02 1.1320E-02

3.6850E-02 1.7750E-02 2.6680E-02 1.1860E-01 1.9030E-01 1.2790E-01 5.3730E-02

7.8350E-02 6.6730E-02 6.3820E-02 5.3180E-02 1.2890E-01 4.8620E-02 1.0590E-01

6.5720E-02 9.6240E-02 7.7520E-02 4.7250E-02 2.4330E-01 1.5790E-01 4.4870E-02

4.1040E+00 4.8820E+00 1.8740E+00 4.9200E+00 1.1910E-02 2.5210E-02 2.1150E-02

1.2410E-02 4.2090E-03 8.4380E-03 8.5940E-03 6.8900E-03 4.5590E-03 1.5670E-02

1.6100E-02 1.1690E-02 3.4700E-01 1.2220E+01 5.5960E+00 1.0570E+00 2.5670E-02

3.3590E-02 1.8430E-02 4.9580E-03 1.1830E-02 1.5200E-02 1.1480E-02 6.5750E-03

1.4520E-02 1.6530E-02 1.2180E-02 6.6710E-03 9.4000E-03 7.6560E-03 7.8320E-03

6.9300E-03 3.1300E-03 4.2100E-03 3.6500E-03 2.6560E-03 4.9140E-03 4.0740E-03

4.6490E-03 5.2790E-03 1.2430E-01 3.9690E-02 1.0840E-01 1.2270E-02 1.6670E-02

9.0620E-03 2.9010E-03 1.4390E-02 1.0550E-02 8.6750E-03 6.7020E-03 9.9920E-03

5.2520E-02 2.9680E-02 7.7270E-03 3.3450E-03 9.0840E-03 7.9920E-03 4.8330E-03

3.8200E-02 2.0730E-02 9.1420E-03 1.2550E-02 7.8470E-03 1.4420E-02 7.8770E-03

2.2750E-03 3.1900E-03 2.9110E-03 2.9740E-03 2.5620E-03 2.4500E-02 4.8270E-02

9.3180E-02 1.3680E-01 1.8590E-01 1.3490E-01 1.3220E-01 1.2380E-01 3.3490E-02

8.7000E-02 9.6690E-02 8.3080E-02 1.3750E-01 1.6330E-01 1.2210E-01 6.2800E-02

1.1270E-02 1.9400E-02 2.1030E-02 1.7330E-02 9.6070E-03 3.6140E-03 1.2830E-02

2.0960E-02 2.4110E-02 2.0540E-02 1.1760E-02 1.0720E-02 2.1460E-02 8.5140E-03

3.8180E-02 5.9430E-02 8.5420E-02 6.3340E-02 1.8140E-02 4.2540E-02 4.1090E-02

2.9230E-02 1.5960E-02 1.0240E-01 2.3360E-02 2.2350E-02 3.2060E-02 4.4840E-02

4.4440E-02 1.4960E-01 4.4860E-02 2.6620E-02 2.0500E+00 1.6750E-01 4.3670E+00

9.6630E-01 4.8560E-03 5.4080E-03 1.0660E-02 1.4200E-02 1.9200E-04 2.5300E-03

4.9250E-03 6.4120E-03 5.2220E-05 2.7530E-03 8.1170E-03 1.3090E-02 5.6180E-03

2.5120E-01 4.9530E+00 4.8450E+00 1.7200E-02 6.9030E-03 1.0170E-02 8.2770E-03

5.4500E-03 4.9510E-03 6.0190E-03 5.7060E-03 9.1470E-03 5.2240E-03 5.0950E-03

5.4710E-03 1.5450E-03 5.4220E-03 5.2830E-03 3.6400E-03 8.3530E-04 1.6220E-03

1.9900E-03 2.0690E-03 4.0450E-04 2.8820E-03 3.3370E-03 2.8180E-03 4.2120E-03

1.0960E-01 2.2670E-02 7.2050E-03 3.7840E-03 5.1690E-03 4.3160E-03 6.0530E-03

6.5600E-03 4.7840E-03 2.7490E-03 5.4140E-03 3.6260E-03 2.1960E-02 2.0830E-02

6.5390E-04 1.7610E-03 4.2250E-03 5.8030E-03 1.8780E-02 3.9510E-03 1.2540E-02

3.2120E-03 4.5590E-03 2.4970E-03 4.7910E-03 3.9080E-03 3.7080E-04 1.9300E-03

2.0230E-03 1.5020E-03 9.0220E+00 4.9460E-01 7.2680E-02 2.9690E+00 7.6170E-01

1.1630E-01 1.6660E-02 3.4110E+00 1.0620E+00 2.8860E-01 3.4410E-02 7.2390E-01

4.6220E-01 1.0860E-01 2.2910E-02 2.2910E-01 1.1320E-01 4.4760E-02 1.2950E-02

1.6880E-03 2.6870E-01 1.2480E-01 4.9830E-02 1.6040E-02 3.7790E-03 4.6630E-04

2.0030E-01 6.7090E-02 9.3380E-03 3.1230E-01 8.7230E-02 2.2080E-02 4.0860E-03

3.5830E-01 1.1970E-01 3.0340E-02 5.5570E-03 8.6790E-02 3.4150E-02 4.3230E-03

1.3110E+00 3.6270E-01 1.9530E-01 4.0170E-02 1.7570E-01 2.8870E-02 4.0450E-03

9.9920E-03 1.8290E-02 1.0680E-02 1.2730E-03 1.8100E+01 7.8140E-01 1.4190E-02

1.2120E-03 3.0050E+01 2.5270E+00 7.9170E-02 1.0940E-03 4.0320E+01 3.1590E+00

1.1610E-01 2.9410E-03 1.9010E-02 4.7830E-03 9.5060E-04 1.2250E-04 3.7030E-02

8.5910E-03 7.0630E-04 7.7740E-05 4.7480E-02 1.6300E-02 3.4900E-03 1.7700E-04

6.7770E+00 2.3320E-01 6.1460E-03 1.3580E-03 1.2910E-01 4.0430E-02 9.4300E-03

1.2250E-03 7.2880E-01 8.2400E-02 1.7600E-02 3.1390E-03 2.2410E+00 2.0970E-01

2.3600E-02 3.3170E-03 8.6830E-03 8.2230E-04 4.1670E-05 1.9700E-02 5.3630E-03

7.6290E-04 5.6160E-05 2.7730E-02 6.6090E-03 1.2710E-03 1.5690E-04 4.0120E-02

6.7920E-03 7.5630E-04 1.6220E-04 1.9890E-01 1.7640E-02 2.4060E-03 2.5310E-04

4.2480E-03 4.1510E-03 2.0130E-03 4.5420E-04 2.3420E-02 3.9520E-03 9.8040E-04

2.1900E-05 4.4840E-02 9.5230E-03 1.5140E-03 1.6530E-04 1.3430E+01 5.8050E-01

1.0460E+00 1.4850E+00 7.1450E-01 1.2260E-01 1.1360E+00 2.1320E+00 1.2260E+00

3.1900E-01 6.2790E-01 6.6340E-01 3.3350E-01 8.9630E-02 1.2160E-01 1.0780E-01

6.9860E-02 3.9680E-02 1.8030E-02 1.0980E-01 1.1360E-01 8.8720E-02 5.3010E-02

2.3960E-02 7.3990E-03 1.1290E-01 7.9620E-02 4.4790E-02 1.4360E-01 1.4260E-01

5.9630E-02 1.8960E-02 1.5210E-01 1.6320E-01 9.4360E-02 3.0910E-02 5.8670E-02

2.9310E-02 1.9500E-02 4.9440E-01 8.7840E-01 5.9760E-01 1.9500E-01 9.1830E-02

7.1320E-02 1.6120E-02 8.5640E-03 1.4640E-02 5.1220E-03 6.1440E-03 1.8690E+00

1.3150E+01 9.7520E-01 1.5750E-02 2.4620E+00 2.8940E+01 3.1180E+00 9.3360E-02

2.8770E-01 3.7050E+01 4.0890E+00 1.3570E-01 8.2500E-03 8.6620E-03 3.4650E-03

8.8360E-04 1.5350E-02 1.5790E-02 7.8420E-03 6.7240E-04 2.0540E-02 2.0010E-02

1.3200E-02 3.9590E-03 5.5400E-01 5.0860E+00 2.8630E-01 6.8550E-03 5.2320E-02

5.9620E-02 3.2580E-02 1.0100E-02 1.1250E-01 5.0650E-01 7.5640E-02 1.8680E-02

2.1020E-01 1.6720E+00 2.3690E-01 2.5930E-02 4.1620E-03 3.5530E-03 4.9330E-04

8.8510E-03 7.8910E-03 4.3850E-03 7.6720E-04 9.1740E-03 1.3400E-02 5.8450E-03

1.3690E-03 1.4830E-02 2.0190E-02 6.0340E-03 6.6190E-04 2.8030E-02 1.3590E-01

1.8210E-02 2.6880E-03 3.6410E-03 3.1130E-03 1.5320E-03 1.0740E-03 8.1140E-03

1.3030E-02 2.2220E-03 1.0430E-03 1.3960E-02 2.3500E-02 8.9760E-03 1.6480E-03

1.2540E+01 2.7060E-01 9.8070E-01 9.8850E-01 5.7110E-01 3.1120E-01 1.2940E+00

1.6570E+00 1.0560E+00 2.7940E-01 5.5190E-01 4.2870E-01 2.2770E-01 5.3440E-02

7.8030E-02 7.9930E-02 5.8920E-02 2.9500E-02 3.2560E-02 7.8530E-02 8.0090E-02

6.6610E-02 4.7680E-02 2.4900E-02 5.4590E-02 7.7140E-02 6.6000E-02 5.9910E-02

1.0730E-01 9.5060E-02 4.0710E-02 5.3420E-02 1.2170E-01 1.1400E-01 7.8390E-02

3.4650E-02 3.2350E-02 2.2480E-02 1.9160E-01 5.3330E-01 1.0380E+00 4.9350E-01

4.3580E-02 6.9320E-02 3.6670E-02 7.1360E-03 9.6060E-03 6.4730E-03 5.5070E-03

9.2480E-02 2.3840E+00 1.0180E+01 7.4370E-01 3.9160E-02 3.0790E+00 1.7900E+01

2.4050E+00 6.8130E-03 9.4960E-01 3.2470E+01 3.1620E+00 3.1140E-03 6.5380E-03

5.7580E-03 2.4280E-03 4.8420E-03 1.3540E-02 9.0390E-03 5.5210E-03 6.5320E-03

1.6570E-02 1.3730E-02 1.1150E-02 2.9180E-02 6.9310E-01 4.0000E+00 2.1940E-01

1.7290E-02 4.2550E-02 4.1780E-02 2.7250E-02 2.3900E-02 1.1160E-01 3.9550E-01

6.4310E-02 2.3590E-02 2.3430E-01 1.3400E+00 1.8980E-01 1.7670E-03 3.4220E-03

1.7240E-03 3.1580E-03 7.2270E-03 5.0130E-03 3.1030E-03 2.6650E-03 8.2700E-03

9.5320E-03 4.7630E-03 4.3640E-03 1.3510E-02 1.2510E-02 4.1970E-03 3.8140E-03

3.0050E-02 1.0490E-01 1.4880E-02 3.0340E-03 2.0010E-03 1.6140E-03 1.1080E-03

3.0410E-03 6.9680E-03 8.8750E-03 1.6160E-03 3.5260E-03 1.3390E-02 1.6170E-02

7.2250E-03 5.0380E-02 3.0950E-01 8.3940E-01 1.0610E+00 5.3010E-02 4.2820E-01

1.2190E+00 1.8860E+00 1.0380E-01 3.1920E-01 4.5930E-01 3.2500E-01 1.4110E-02

5.2940E-02 6.9490E-02 6.4000E-02 3.8250E-02 5.3710E-03 2.9480E-02 5.8520E-02

7.1320E-02 6.2560E-02 3.6020E-02 1.8830E-02 6.6140E-02 7.3100E-02 2.0440E-02

6.3100E-02 8.9220E-02 6.9100E-02 1.3510E-02 5.7000E-02 1.0720E-01 1.1570E-01

1.6860E-02 3.5450E-02 1.9270E-02 9.1770E-02 3.6490E-01 7.3950E-01 9.8490E-01

1.7930E-02 4.9500E-02 5.2150E-02 5.7100E-03 4.9800E-03 9.4010E-03 2.9330E-03

5.0030E-03 1.1280E-01 2.0370E+00 1.2970E+01 1.0930E-03 9.3360E-02 2.3820E+00

1.6330E+01 1.2240E-03 1.8520E-02 1.4500E+00 2.9240E+01 8.9160E-04 3.4680E-03

5.5130E-03 4.3390E-03 1.0180E-03 5.7690E-03 1.1400E-02 8.3010E-03 1.0640E-03

7.5180E-03 1.4880E-02 1.5040E-02 1.6370E-03 3.5200E-02 5.3660E-01 3.3310E+00

3.7640E-03 1.9190E-02 3.7950E-02 4.2430E-02 4.5990E-03 2.6010E-02 9.3820E-02

3.6060E-01 3.3150E-03 2.5920E-02 1.9590E-01 1.2150E+00 5.3380E-04 2.2160E-03

2.7350E-03 7.6460E-04 3.6490E-03 6.2390E-03 4.1620E-03 5.0160E-04 3.0130E-03

7.1080E-03 9.6850E-03 1.0370E-03 5.1490E-03 1.1180E-02 1.0250E-02 4.5170E-04

4.4060E-03 2.4650E-02 9.5510E-02 2.4270E-03 1.1740E-03 1.7320E-03 8.2090E-04

7.6330E-04 3.4670E-03 5.8880E-03 6.4280E-03 5.9640E-04 3.9710E-03 1.1340E-02

1.6170E-02 7.1440E+00 3.5710E-01 8.0430E-02 1.7020E+00 7.0030E-01 2.1360E-01

4.8720E-02 1.9840E+00 8.9890E-01 2.6230E-01 5.5100E-02 1.4430E-01 7.5940E-02

3.8810E-02 2.0410E-02 9.1840E-03 2.4240E-01 1.4690E-01 8.7520E-02 4.7760E-02

2.2500E-02 8.1520E-03 1.5420E-01 7.6480E-02 2.1190E-02 7.8240E-01 1.3850E-01

4.1000E-02 1.3400E-02 4.2830E-01 1.5560E-01 5.8760E-02 2.0400E-02 1.7470E-01

8.0390E-02 1.5270E-02 1.0080E+00 6.7410E-01 2.2800E-01 8.1890E-02 2.2320E-01

9.3940E-02 3.6480E-02 1.5800E-01 1.8770E-01 9.6120E-02 4.2740E-02 8.8950E+00

9.9570E-01 7.8930E-02 6.1230E-03 3.4090E-01 1.7940E-01 4.3900E-02 6.3300E-03

4.8820E-01 1.8300E-01 5.3360E-02 5.5520E-03 1.7470E-01 2.6530E-02 1.7480E-02

9.1510E-03 1.8310E+01 4.2940E-01 8.4420E-03 7.0910E-04 2.3370E+01 2.7210E+00

1.1620E-01 9.2450E-04 2.6000E+01 2.6060E+00 1.5010E-01 5.3740E-03 8.1110E-01

1.2030E-01 9.4690E-03 1.2090E-03 6.4220E-01 9.2270E-02 1.2960E-02 2.3340E-03

6.2230E-02 2.9640E-02 1.0780E-02 2.1530E-03 4.1930E-02 1.1090E-02 1.7340E-03

8.0630E-01 4.7870E-02 6.6030E-03 1.7170E-03 4.0670E-01 6.7440E-02 1.0110E-02

2.1120E-03 4.4840E-02 1.5390E-02 4.4300E-03 1.1040E-03 5.9850E-02 2.3470E-02

6.7600E-03 1.8700E-03 1.0030E-02 7.8730E-03 4.7700E-03 1.9360E-03 2.1610E-02

9.1850E-03 3.7580E-03 1.2320E-03 4.9120E-02 2.4010E-02 6.0240E-03 1.8340E-03

8.6840E+00 3.7280E-01 5.2520E-01 9.2010E-01 6.0120E-01 2.2990E-01 9.7940E-01

9.8720E-01 5.9770E-01 2.2380E-01 6.8570E-02 7.4000E-02 5.2580E-02 2.8370E-02

1.1050E-02 1.2190E-01 1.1610E-01 8.2600E-02 5.8590E-02 4.1800E-02 2.3050E-02

9.3570E-02 5.7630E-02 5.0330E-02 2.1530E-01 4.3440E-01 1.0200E-01 2.7750E-02

1.5540E-01 2.1300E-01 1.1030E-01 5.2350E-02 1.1380E-01 5.7080E-02 4.5470E-02

6.7400E-01 5.4860E-01 5.2440E-01 1.9960E-01 1.3920E-01 1.0110E-01 4.2900E-02

1.2640E-01 1.2920E-01 9.0560E-02 4.1290E-02 3.8930E-01 6.3820E+00 1.2100E+00

9.6580E-02 1.2940E-01 2.4920E-01 1.6880E-01 5.1140E-02 9.7820E-02 5.4720E-01

3.0830E-01 6.3860E-02 4.2830E-02 1.1850E-01 1.5300E-02 6.3160E-03 2.5240E+00

1.1990E+01 4.6350E-01 5.3160E-03 2.7080E+00 1.4830E+01 3.2560E+00 1.4260E-01

7.3190E-01 1.8900E+01 3.4430E+00 1.8830E-01 1.1790E-01 5.0350E-01 1.2410E-01

1.0660E-02 3.4930E-02 4.9620E-01 9.8090E-02 1.4440E-02 2.4260E-02 2.5550E-02

2.1960E-02 1.2080E-02 2.1330E-02 1.5920E-02 6.4360E-03 1.4410E-01 4.9310E-01

4.3450E-02 5.2110E-03 6.7070E-02 2.3950E-01 6.8700E-02 1.0510E-02 1.8900E-02

1.8770E-02 1.0650E-02 3.5920E-03 1.7680E-02 3.0370E-02 1.9430E-02 7.0030E-03

8.0250E-03 5.9540E-03 3.5430E-03 2.1300E-03 1.0440E-02 9.4900E-03 6.2150E-03

2.3830E-03 1.8430E-02 2.3310E-02 2.2080E-02 5.7210E-03 6.5260E+00 1.3580E-01

5.0500E-01 6.2350E-01 5.0590E-01 4.0960E-01 7.4970E-01 6.2850E-01 3.7700E-01

3.4520E-02 4.8450E-02 4.4370E-02 3.2610E-02 1.7150E-02 6.0520E-02 6.0490E-02

7.7450E-02 6.9240E-02 4.5030E-02 2.0240E-02 4.7180E-02 5.4500E-02 4.9450E-02

6.7930E-02 1.8500E-01 2.6810E-01 6.3100E-02 5.8750E-02 1.1010E-01 1.4560E-01

8.3970E-02 6.2350E-02 5.9630E-02 4.0310E-02 2.2790E-01 5.2440E-01 5.8410E-01

3.9570E-01 8.4980E-02 8.1560E-02 4.6010E-02 9.4780E-02 8.6640E-02 7.1010E-02

3.8290E-02 1.6990E-02 4.5520E-01 4.6560E+00 9.3780E-01 1.7430E-02 1.2310E-01

1.6480E-01 1.4350E-01 4.4050E-03 1.7360E-01 3.7300E-01 2.5440E-01 2.1840E-02

3.8640E-02 7.2770E-02 5.6600E-03 1.9920E-01 3.0520E+00 7.6710E+00 3.2310E-01

1.1100E-01 3.3780E+00 9.7470E+00 2.4850E+00 7.2210E-03 8.9280E-01 1.3890E+01

2.6460E+00 9.1650E-03 1.2350E-01 3.3510E-01 9.4620E-02 6.4460E-03 3.3820E-02

4.3620E-01 8.0920E-02 6.2930E-03 1.7900E-02 1.8470E-02 2.0220E-02 9.6700E-03

1.4190E-02 8.9780E-03 2.0690E-02 1.5170E-01 3.1280E-01 2.9140E-02 1.0020E-02

6.8430E-02 1.5450E-01 5.2600E-02 7.1680E-03 1.3630E-02 1.1130E-02 6.7030E-03

4.6450E-03 1.4620E-02 2.1410E-02 1.6240E-02 6.0180E-03 4.0620E-03 2.9440E-03

1.6460E-03 5.6350E-03 6.9940E-03 6.4590E-03 3.0950E-03 5.1220E-03 1.3510E-02

1.6410E-02 1.6940E-02 2.7920E-02 1.5200E-01 4.0220E-01 5.9690E-01 1.2790E-01

4.1540E-01 5.4580E-01 3.5940E-01 1.8800E-02 2.2610E-02 2.9910E-02 2.8880E-02

1.7620E-02 1.9630E-02 4.6730E-02 4.8620E-02 4.6070E-02 3.8420E-02 2.2420E-02

1.8550E-02 4.6470E-02 3.5740E-02 2.5580E-02 6.0680E-02 1.3470E-01 1.6760E-01

2.0400E-02 5.2350E-02 8.3910E-02 1.0890E-01 2.7730E-02 5.5280E-02 2.5130E-02

8.1860E-02 1.9960E-01 3.9570E-01 4.7710E-01 4.8460E-02 5.3770E-02 3.8680E-02

6.3180E-02 5.3550E-02 4.7040E-02 3.0050E-02 2.5750E-03 1.8860E-02 3.4510E-01

3.6780E+00 1.1900E-03 1.9620E-02 9.8600E-02 1.7990E-01 3.7130E-04 4.8140E-03

1.3290E-01 3.9890E-01 1.4460E-02 1.0990E-02 2.3110E-02 4.2190E-02 8.1650E-03

2.7260E-01 2.3380E+00 5.6980E+00 9.2430E-04 1.4170E-01 2.5560E+00 7.8790E+00

1.9630E-03 7.2410E-03 6.6910E-01 1.0840E+01 1.2000E-03 1.0650E-02 9.9040E-02

2.6850E-01 1.4270E-03 6.8690E-03 2.6900E-02 3.5770E-01 5.8580E-04 6.9350E-03

1.5490E-02 1.8910E-02 3.6750E-03 9.8580E-03 8.3850E-03 3.8720E-03 2.3190E-02

1.1560E-01 2.0200E-01 2.0910E-03 1.0500E-02 5.2440E-02 1.2530E-01 2.3710E-03

6.9350E-03 1.0170E-02 6.7960E-03 1.1520E-03 4.4870E-03 1.1630E-02 2.0270E-02

4.0130E-03 2.4850E-03 2.2740E-03 1.0530E-03 2.3250E-03 4.0690E-03 4.3020E-03

2.9340E-03 1.3720E-03 5.5910E-03 1.1060E-02 1.3120E-02 7.5890E+00 3.3030E-01

5.3480E-02 1.9570E+00 6.0390E-01 1.7640E-01 4.7870E-02 1.3590E-01 6.5810E-02

2.6600E-02 9.4180E-03 2.4960E-03 2.3480E-01 1.3440E-01 6.7490E-02 2.8480E-02

9.3130E-03 1.9520E-03 1.0760E-01 2.5250E-02 7.1280E-03 3.1110E-01 1.0440E-01

3.1930E-02 6.3170E-03 8.2000E-01 1.2060E-01 3.4980E-02 1.1100E-02 1.3910E-01

3.1280E-02 9.0820E-03 1.5610E+00 4.9040E-01 1.4240E-01 5.0630E-02 1.8140E-01

5.9300E-02 9.1610E-03 4.4870E-03 1.9510E-02 4.9560E-03 1.8710E-03 1.8590E+00

2.0860E-01 2.5690E-02 2.7090E-03 3.3830E+00 3.4550E-01 3.8350E-02 5.0840E-03

1.0060E-01 8.8570E-02 2.8380E-02 4.6430E-03 2.1970E-02 1.0900E-02 3.3270E-03

4.8410E-04 5.5960E-02 1.6630E-02 2.7830E-03 3.9690E-04 6.6120E-01 3.3940E-02

5.5650E-03 1.5480E-03 1.5250E-01 4.5570E-02 1.2570E-02 2.2180E-03 2.0810E+01

6.1680E-01 6.7670E-03 7.6970E-04 2.7590E+01 2.4890E+00 9.5180E-02 6.5560E-04

3.6760E+01 2.8540E+00 1.3140E-01 5.6040E-03 3.1670E-02 6.1510E-03 2.1550E-03

6.6910E-02 2.6170E-02 9.8960E-03 2.6140E-03 1.8470E+00 8.0770E-02 1.2130E-02

4.1180E-03 4.9150E-02 1.3330E-02 3.2640E-03 3.7100E-04 1.3850E-01 2.6410E-02

4.8870E-03 7.3740E-04 1.0720E-03 1.0710E-02 3.2590E-03 8.4080E-04 2.2920E-02

7.8210E-03 2.1700E-03 4.6850E-04 8.5100E-02 1.8030E-02 3.3160E-03 5.3470E-04

1.1570E+01 3.7280E-01 8.4300E-01 1.1580E+00 4.1840E-01 1.3160E-01 6.4430E-02

7.0530E-02 4.2190E-02 2.2810E-02 9.8670E-03 1.1910E-01 9.5090E-02 7.7500E-02

5.5980E-02 3.3980E-02 1.5250E-02 4.9290E-02 5.1030E-02 1.6270E-02 1.4720E-01

1.3990E-01 6.8050E-02 2.5130E-02 1.7200E-01 5.1830E-01 9.7720E-02 3.1530E-02

7.3640E-02 6.0080E-02 1.5880E-02 5.7680E-01 7.6540E-01 4.0670E-01 1.2300E-01

1.1050E-01 6.6460E-02 3.3500E-02 3.7390E-03 1.0870E-02 8.8940E-03 2.3830E-03

2.0500E-01 1.1940E+00 2.2580E-01 2.9510E-02 1.8520E-01 2.6060E+00 4.0360E-01

4.3500E-02 7.3880E-02 1.1120E-01 7.2630E-02 3.1490E-02 1.3530E-02 8.0350E-03

6.2790E-03 3.0410E-03 2.4480E-02 2.2460E-02 1.3540E-02 2.5130E-03 8.7710E-02

4.6720E-01 3.3120E-02 5.2860E-03 4.5530E-02 8.1150E-02 3.7040E-02 1.3640E-02

2.1130E+00 1.4940E+01 7.4770E-01 8.0670E-03 2.4790E+00 1.9500E+01 3.0640E+00

1.1260E-01 4.9110E-01 2.9280E+01 3.6480E+00 1.5810E-01 1.6020E-02 1.4100E-02

2.9700E-03 3.5210E-02 3.0270E-02 1.5120E-02 7.5870E-03 2.0680E-01 1.2780E+00

8.1550E-02 1.1130E-02 2.0440E-02 2.2610E-02 9.1040E-03 3.0390E-03 2.6330E-02

9.4620E-02 2.6330E-02 5.5530E-03 8.9350E-04 6.3230E-03 4.3510E-03 1.6480E-03

1.1010E-02 9.5810E-03 6.0160E-03 1.7200E-03 2.2870E-02 4.6780E-02 1.5230E-02

3.4820E-03 9.1300E+00 3.5280E-01 7.4300E-01 7.4120E-01 2.7130E-01 2.7430E-02

4.2660E-02 4.8730E-02 3.4690E-02 1.5530E-02 4.5200E-02 7.0950E-02 6.8880E-02

6.0170E-02 4.6440E-02 2.5810E-02 2.1050E-02 4.1290E-02 3.0890E-02 6.4120E-02

1.0360E-01 9.2240E-02 4.3840E-02 4.8730E-02 1.5660E-01 3.7450E-01 7.6550E-02

3.7680E-02 5.3220E-02 2.8780E-02 1.9510E-01 4.8540E-01 5.0310E-01 3.1390E-01

5.9050E-02 6.6350E-02 4.2380E-02 2.9910E-03 5.8600E-03 7.6580E-03 4.0070E-03

2.5500E-02 2.2570E-01 8.8550E-01 1.8060E-01 2.1460E-02 2.0530E-01 2.0480E+00

3.1800E-01 1.9130E-02 5.9550E-02 8.4810E-02 6.8210E-02 6.6110E-03 7.7980E-03

6.2300E-03 4.1090E-03 8.4060E-03 1.9680E-02 1.3280E-02 9.3490E-03 1.0410E-02

9.6040E-02 3.4290E-01 2.5510E-02 1.2560E-02 3.7040E-02 5.9880E-02 3.2440E-02

1.2490E-01 2.6200E+00 1.0940E+01 5.6090E-01 9.0540E-02 3.0610E+00 1.4640E+01

2.3490E+00 3.5710E-03 1.5000E+00 2.3130E+01 2.8080E+00 8.0560E-03 1.2220E-02

6.2800E-03 1.7510E-02 2.2260E-02 2.0920E-02 9.4760E-03 2.4610E-02 2.3970E-01

9.6460E-01 6.2280E-02 7.6600E-03 1.5320E-02 1.4940E-02 6.1690E-03 4.8780E-03

2.6320E-02 6.9240E-02 2.1400E-02 7.1480E-04 3.3290E-03 4.0510E-03 2.2890E-03

4.6940E-03 7.8900E-03 6.4530E-03 3.9860E-03 5.1970E-03 2.0930E-02 3.2360E-02

1.2250E-02 1.4050E-01 3.6580E-01 5.7940E-01 5.0590E-01 9.0570E-03 2.5320E-02

3.4910E-02 3.3950E-02 2.1560E-02 9.2870E-03 3.9950E-02 5.8470E-02 5.9210E-02

4.6120E-02 2.4790E-02 8.6910E-03 2.2300E-02 3.8800E-02 2.4560E-02 6.2540E-02

8.0980E-02 5.9390E-02 1.6300E-02 4.7750E-02 1.2590E-01 3.0220E-01 1.8870E-02

3.4960E-02 3.5940E-02 7.2360E-02 1.8440E-01 3.9170E-01 4.7440E-01 2.6930E-02

5.9190E-02 4.0080E-02 2.2430E-03 3.3370E-03 4.8560E-03 4.9300E-03 2.6910E-03

2.9560E-02 1.8060E-01 8.0370E-01 2.8110E-03 2.3590E-02 1.6450E-01 1.7570E+00

1.0510E-03 2.1060E-02 5.4700E-02 9.5710E-02 2.1590E-03 6.6250E-03 6.2500E-03

3.2830E-03 2.1050E-03 9.4600E-03 1.5990E-02 1.0470E-02 2.4190E-03 1.1170E-02

7.5440E-02 2.6810E-01 2.2180E-03 1.3640E-02 3.2440E-02 5.7970E-02 4.3540E-03

1.5730E-01 2.0160E+00 8.5600E+00 6.5530E-04 1.1230E-01 2.3510E+00 1.2640E+01

4.7460E-04 4.2610E-03 1.1430E+00 1.9480E+01 4.1200E-03 7.2680E-03 8.4170E-03

7.5220E-03 1.6230E-02 1.6930E-02 1.1980E-02 6.1280E-03 2.6390E-02 1.8620E-01

7.5300E-01 2.1330E-03 8.2570E-03 1.2380E-02 1.0110E-02 7.3650E-04 5.3290E-03

2.1400E-02 5.7730E-02 5.3610E-04 1.7840E-03 3.0450E-03 2.3980E-03 1.6340E-03

4.5270E-03 6.3510E-03 4.2130E-03 1.0040E-03 5.7380E-03 1.7290E-02 2.8930E-02

4.7130E+00 4.8580E-01 1.9030E-01 7.3110E-02 4.9150E-02 2.9460E-02 1.6610E-02

7.5510E-03 9.0020E-02 6.2620E-02 4.4090E-02 3.1320E-02 2.0890E-02 1.0630E-02

6.5200E-02 3.5830E-02 2.2740E-02 7.6640E-01 4.7690E-01 1.3460E-01 4.5100E-02

6.7790E-01 1.8320E-01 2.3070E-01 7.4970E-02 8.2810E-01 1.3320E-01 4.1080E-02

9.9470E-01 5.5560E-01 2.9990E-01 1.5410E-01 6.5040E-01 3.7350E-01 4.6360E-02

3.4080E-02 2.0550E-01 4.9330E-02 2.6600E-02 1.6230E-01 7.1410E-02 2.2350E-02

4.7870E-03 1.1850E-01 4.9180E-02 1.7030E-02 4.3960E-03 1.0340E-01 4.6590E-02

1.6440E-02 3.6450E-03 3.6930E-02 2.0090E-02 1.1590E-02 5.3880E-03 2.2610E+00

4.2640E-01 2.4530E-02 4.2350E-03 2.0700E+00 3.1870E-01 4.2090E-02 8.0240E-03

1.0960E-01 5.6570E-02 2.4510E-02 8.1940E-03 2.8500E+00 4.1050E-01 4.6470E-02

7.7260E-03 1.3790E-01 5.2180E-02 1.9550E-02 7.0290E-03 1.5500E-01 6.7640E-02

2.9940E-02 1.1880E-02 1.2800E+01 2.1520E-01 6.0260E-03 1.7320E+01 3.1810E+00

1.1780E-01 3.1210E-03 2.7900E+01 3.4280E+00 2.8020E-01 1.5400E-02 1.3510E-01

4.6310E-02 1.2180E-02 2.3550E-03 2.6390E-02 1.4770E-02 7.1190E-03 2.7330E-03

3.0890E-02 1.2650E-01 1.7900E-02 8.4650E-03 4.7570E-02 2.5360E-02 1.0130E-02

2.6470E-03 3.8640E-02 1.4260E-02 5.2410E-03 1.3290E-03 5.2920E+00 2.8580E-01

4.2470E-02 3.3490E-02 2.9060E-02 1.9190E-02 7.8850E-03 4.9770E-02 4.8690E-02

4.2610E-02 3.0100E-02 1.6790E-02 6.7870E-03 3.8020E-02 3.6380E-02 1.8460E-02

2.0550E-01 4.6340E-01 9.9770E-02 9.5570E-02 3.4480E-01 1.7490E-01 1.3510E-01

7.2890E-02 2.1740E-01 3.8400E-01 6.0280E-02 4.8230E-01 4.6190E-01 3.4800E-01

2.1200E-01 4.4050E-01 1.2270E-01 2.3940E-01 2.5550E-02 8.4280E-02 1.0450E-01

1.7110E-02 4.8610E-02 6.1610E-02 5.9400E-02 2.6040E-02 2.7050E-02 5.4180E-02

4.1070E-02 1.9450E-02 2.4980E-02 4.3870E-02 3.9010E-02 1.9540E-02 1.9810E-02

1.9850E-02 1.0910E-02 5.0890E-03 4.2440E-01 1.1130E+00 4.7530E-01 2.4260E-02

8.6660E-02 1.3460E+00 3.5820E-01 4.8250E-02 4.2340E-02 4.3570E-02 3.8050E-02

2.5280E-02 8.8520E-02 1.8800E+00 4.7640E-01 5.4960E-02 3.1580E-02 6.9630E-02

4.1970E-02 1.9600E-02 3.9570E-02 7.8590E-02 5.0300E-02 3.0080E-02 3.0670E+00

6.5530E+00 1.5210E-01 3.1770E+00 8.5300E+00 3.5970E+00 1.4770E-01 6.0250E-01

1.6150E+01 4.1480E+00 3.7240E-01 4.6260E-02 5.5580E-02 3.3700E-02 1.1590E-02

1.1550E-02 1.0180E-02 9.2800E-03 6.9530E-03 2.3170E-02 3.8690E-02 6.5240E-02

7.0420E-03 2.5350E-02 1.7170E-02 1.3700E-02 8.5220E-03 9.6060E-03 1.8900E-02

9.9150E-03 4.9700E-03 3.6040E+00 2.0770E-02 2.5980E-02 1.7980E-02 1.4490E-02

9.4740E-03 2.9100E-02 3.3080E-02 2.4490E-02 1.9020E-02 1.5140E-02 8.9390E-03

2.2980E-02 2.1940E-02 1.6840E-02 1.0300E-01 1.7280E-01 2.6910E-01 5.4540E-02

1.0870E-01 1.0600E-01 1.1780E-01 9.0550E-02 8.1340E-02 1.7080E-01 1.5440E-01

2.2320E-01 2.8850E-01 2.7460E-01 2.1710E-01 1.9470E-01 2.1080E-01 1.2970E-01

1.7040E-02 4.1410E-02 5.9040E-02 3.9340E-02 5.7700E-03 4.2630E-02 3.3620E-02

4.8480E-02 4.2930E-03 2.1460E-02 3.4180E-02 3.4540E-02 2.4980E-03 2.1180E-02

2.7270E-02 3.3970E-02 1.1560E-02 1.0720E-02 1.0370E-02 4.4530E-03 2.3680E-02

4.7510E-01 5.2760E-01 3.3260E-01 1.4830E-02 7.5580E-02 8.6390E-01 2.7300E-01

1.1660E-02 2.7760E-02 2.9420E-02 3.0600E-02 1.4220E-02 7.9290E-02 1.2120E+00

3.6380E-01 8.8200E-03 2.2020E-02 4.4520E-02 3.2970E-02 1.3050E-02 2.3440E-02

5.4270E-02 4.1420E-02 4.1810E-01 3.4380E+00 2.6680E+00 1.1560E-01 3.5960E+00

4.0560E+00 2.5330E+00 1.0960E-02 6.7260E-01 1.0300E+01 3.1800E+00 1.2180E-02

3.3700E-02 3.1930E-02 2.0510E-02 3.7690E-03 7.0220E-03 7.5130E-03 7.3890E-03

1.5450E-02 1.5300E-02 3.4640E-02 2.5130E-02 1.0120E-02 1.3450E-02 1.2490E-02

6.7140E-03 2.9360E-03 5.8070E-03 1.2710E-02 7.2680E-03 9.1000E-03 9.3700E-03

1.1870E-02 8.9470E-03 3.8940E-03 1.6520E-02 1.0160E-02 1.2460E-02 1.2280E-02

8.9540E-03 4.4600E-03 1.1340E-02 8.9500E-03 1.0560E-02 4.0610E-02 8.7780E-02

1.4860E-01 3.7580E-02 3.7750E-02 8.2240E-02 6.0420E-02 6.5110E-02 3.0310E-02

5.6630E-02 1.0340E-01 8.8310E-02 1.2650E-01 1.5280E-01 1.3440E-01 5.2340E-02

1.8480E-01 3.0300E-02 8.5180E-03 1.9700E-02 1.6360E-02 3.3740E-02 7.1910E-04

5.5470E-03 2.9570E-02 2.9400E-02 5.1540E-04 4.0520E-03 1.5080E-02 2.7560E-02

2.1110E-05 2.7050E-03 1.5230E-02 2.4560E-02 5.3830E-03 5.0820E-03 4.3660E-03

3.6690E-03 4.1480E-03 2.4090E-02 3.3250E-01 3.1900E-01 3.3190E-03 1.2550E-02

5.0500E-02 5.4720E-01 2.0920E-03 1.0320E-02 1.8500E-02 1.8820E-02 2.9950E-03

1.2370E-02 5.3340E-02 7.6600E-01 2.2440E-03 6.8040E-03 1.4370E-02 3.0810E-02

2.8450E-03 1.0650E-02 1.5570E-02 3.7030E-02 1.7280E-02 6.4790E-01 2.5950E+00

2.9430E-03 1.4780E-01 2.5330E+00 2.4600E+00 5.1750E-03 5.0830E-03 4.6800E-01

6.5890E+00 2.3540E-03 1.1590E-02 2.0510E-02 1.4480E-02 7.7580E-04 3.2650E-03

4.5410E-03 4.0180E-03 7.7220E-03 6.4000E-03 8.2020E-03 2.2480E-02 2.6110E-03

8.5200E-03 7.1650E-03 4.1370E-03 5.0740E-04 2.7120E-03 3.6500E-03 7.1960E-03

3.7400E+00 9.9740E-01 2.1060E-01 8.6450E-02 8.6600E+00 3.6970E+00 1.0450E+00

2.0050E-01 3.2950E-02 7.2230E-03 3.4590E+00 1.2050E+00 4.0850E-02 3.0860E+00

4.5150E-01 8.4110E-02 6.7870E-03 2.1860E+00 6.6630E-01 1.0790E-01 7.8550E-03

7.6450E-01 1.5300E-01 1.0700E-02 4.1520E-02 2.0930E-02 9.4050E-03 3.5090E-03

1.9010E-02 1.2960E-02 7.1440E-03 5.2060E-02 1.1570E-01 9.8520E-03 2.9220E-03

2.2050E-01 1.8230E-01 8.5000E-02 1.9570E-02 1.6410E-01 8.0410E-02 2.3940E-02

3.7370E-03 1.0200E-01 2.7580E-02 5.8740E-03 7.1820E-04 1.1860E-01 3.7510E-02

6.4980E-03 1.0440E-04 1.1240E-01 5.8190E-02 5.1390E-02 3.3410E-02 1.7560E-01

4.2560E-02 1.0780E-02 2.4800E-03 4.6330E-02 1.5140E-02 4.0590E-03 9.2640E-04

8.8040E-02 7.9080E-02 4.6670E-02 1.5210E-02 1.9830E-01 4.4360E-02 7.2430E-03

6.9420E-04 3.6470E-02 1.5530E-02 4.4890E-03 7.9960E-04 5.2370E-02 3.8570E-02

9.3820E-03 5.8060E-02 2.6450E-02 1.4340E-02 7.4620E-03 5.0920E-02 2.4280E-02

8.4350E-03 2.2130E-03 7.3990E-02 7.6340E-02 3.8450E-02 8.9270E-03 4.8690E-02

2.7220E-02 9.4560E-03 1.9770E-03 4.5870E-02 2.3870E-02 1.1000E-02 6.6000E-03

2.0910E-02 1.0790E-02 5.6270E-03 2.7270E-03 3.2820E-02 1.6300E-02 6.1780E-03

1.4690E-03 3.2440E+00 1.3980E+00 1.4900E-01 2.7680E+00 2.9260E+00 3.2790E+00

1.5750E+00 3.7390E-01 5.0070E-02 1.8050E+00 1.1520E+00 8.0150E-01 9.3640E-01

1.5600E+00 3.1790E-01 8.0690E-02 7.7450E-01 9.0260E-01 5.7720E-01 1.1610E-01

3.8050E-01 2.7450E-01 8.7540E-02 2.2100E-02 1.7580E-02 1.1960E-02 7.7330E-03

1.5730E-02 1.1380E-02 4.9200E-03 4.1640E-02 4.8940E-02 4.9040E-02 4.7550E-03

1.7500E-01 5.4210E-02 9.3490E-02 8.3830E-02 7.2880E-02 5.6870E-02 6.2900E-02

2.5200E-02 2.0590E-02 5.6440E-02 2.5740E-02 6.2380E-03 5.2320E-02 4.3240E-02

2.6390E-02 6.8760E-03 7.0430E-02 8.7250E-02 3.8700E-02 1.0070E-02 5.2340E-02

8.9500E-02 3.3290E-02 1.0010E-02 1.4920E-02 2.1820E-02 1.2310E-02 4.0370E-03

7.8210E-02 3.5910E-02 2.9420E-02 3.9640E-02 4.4700E-02 1.0590E-01 4.1980E-02

7.8660E-03 1.3930E-02 1.4710E-02 1.2460E-02 4.6940E-03 4.3950E-02 1.7260E-02

1.8740E-02 3.2390E-02 3.0100E-02 1.7270E-02 5.2580E-03 2.5930E-02 1.9810E-02

1.5940E-02 7.6640E-03 7.6350E-02 2.5100E-02 2.7330E-02 2.9380E-02 2.6380E-02

1.5380E-02 1.8650E-02 9.4740E-03 3.6690E-02 1.5910E-02 1.3310E-02 3.9540E-03

1.2670E-02 1.0200E-02 6.6880E-03 2.3160E-03 1.7290E-02 1.2660E-02 9.6660E-03

5.7680E-03 1.8040E+00 1.1530E+00 2.0920E-01 2.8840E+00 1.1850E+00 2.0130E+00

1.5370E+00 4.1640E-01 7.6120E-01 1.0610E+00 9.9710E-01 2.5820E-01 8.4540E-01

8.7160E-01 1.9180E-01 1.9240E-01 6.5840E-01 5.2900E-01 3.9660E-01 1.6790E-01

2.4850E-01 1.4060E-01 1.0890E-02 1.3100E-02 1.2500E-02 8.7920E-03 1.2000E-02

8.1300E-03 3.5830E-03 3.1240E-02 1.8900E-02 4.0450E-02 1.7680E-02 8.3520E-02

7.9490E-02 5.3550E-02 8.8240E-02 2.0130E-02 5.4380E-02 3.8430E-02 5.0430E-02

2.3940E-03 2.1820E-02 3.7960E-02 1.9260E-02 1.8720E-02 3.5900E-02 2.5890E-02

1.6190E-02 5.5580E-02 5.6910E-02 3.3040E-02 9.3630E-03 1.4840E-02 4.5710E-02

5.5110E-02 2.3170E-02 4.0350E-03 1.2560E-02 1.4090E-02 9.1470E-03 4.9940E-02

2.7190E-02 3.4390E-02 2.5850E-02 6.9470E-03 4.6960E-02 6.6930E-02 2.9530E-02

3.6710E-03 1.0980E-02 9.8590E-03 9.8310E-03 3.0130E-02 1.7010E-02 1.3380E-02

1.9280E-02 2.2540E-02 1.4440E-02 7.4880E-03 1.0670E-02 1.6290E-02 1.2850E-02

1.1690E-02 5.2240E-02 2.2380E-02 2.8330E-02 1.5720E-02 9.6260E-03 1.6720E-02

1.0940E-02 1.5140E-02 2.7520E-02 1.1160E-02 9.7230E-03 4.0030E-03 7.6890E-03

8.1000E-03 5.1060E-03 3.0130E-03 7.5660E-03 1.0020E-02 9.0320E-03 7.4440E-03

1.1880E+00 3.3060E-02 2.3160E-01 2.1740E+00 8.8600E-01 9.8140E-01 1.2010E+00

2.1310E-01 8.2950E-01 8.3560E-01 6.3350E-02 3.0460E-01 6.5000E-01 4.2440E-01

2.5870E-02 2.7240E-01 4.2730E-01 4.5460E-01 6.2130E-02 1.6950E-01 1.3970E-01

4.5730E-03 8.3400E-03 9.6540E-03 7.6520E-03 8.2450E-03 4.9460E-03 2.5200E-03

2.0820E-02 6.7740E-03 2.1450E-02 2.3260E-02 2.5170E-02 7.1220E-02 5.8280E-02

4.8200E-02 2.6470E-03 2.6680E-02 3.4380E-02 4.5210E-02 1.4760E-04 3.8700E-03

2.0570E-02 2.9590E-02 4.7700E-03 2.0530E-02 2.3480E-02 1.6210E-02 4.4520E-02

2.3110E-02 2.1360E-02 1.3470E-02 4.2120E-03 1.5850E-02 3.6790E-02 3.5700E-02

9.1050E-04 4.7020E-03 9.6230E-03 1.1500E-02 2.2620E-02 3.1070E-02 2.5360E-02

1.2570E-02 6.1960E-04 1.0570E-02 4.0190E-02 4.8870E-02 5.6420E-04 4.7740E-03

7.6030E-03 9.9880E-03 1.6800E-02 1.6890E-02 6.1820E-03 1.1830E-02 1.2090E-02

1.1250E-02 7.3150E-03 3.5450E-03 9.9210E-03 1.0920E-02 9.9500E-03 2.5890E-02

3.0590E-02 1.7930E-02 4.7450E-03 2.3270E-03 1.0240E-02 1.0680E-02 1.1700E-02

1.8350E-02 7.4500E-03 5.3260E-03 3.8030E-03 4.5690E-03 4.8310E-03 4.0280E-03

2.5290E-03 2.5560E-03 6.5680E-03 7.3370E-03 6.2430E-03 6.4260E-03 3.4020E-02

1.6730E-01 1.2310E+00 1.0180E+00 2.9830E-01 1.6330E-02 4.5740E-01 4.6600E-01

1.1040E-02 9.1120E-02 2.4140E-01 3.7700E-01 1.3410E-03 4.3840E-02 2.5650E-01

2.8670E-01 1.7360E-02 8.2610E-02 8.5680E-02 1.5560E-03 4.1370E-03 4.7100E-03

4.2370E-03 4.2020E-03 2.2480E-03 1.3280E-03 1.0410E-02 2.2440E-03 7.6190E-03

1.5960E-02 3.1510E-03 3.6260E-02 4.8180E-02 1.4060E-02 5.9610E-05 4.4500E-03

2.6000E-02 2.3950E-02 1.9020E-05 2.0310E-04 3.9470E-03 2.2800E-02 5.8670E-04

7.7840E-03 1.4700E-02 9.0170E-03 2.5490E-02 5.9260E-03 9.6310E-03 1.0200E-02

1.0170E-03 4.7400E-03 1.2190E-02 2.7730E-02 1.9060E-04 1.1010E-03 4.1840E-03

7.8480E-03 6.5460E-03 2.3010E-02 1.1410E-02 4.8820E-03 3.5000E-05 1.0060E-03

1.0740E-02 3.8340E-02 3.4120E-05 8.8030E-04 4.6160E-03 5.9680E-03 7.1050E-03

1.0890E-02 1.7720E-03 5.9140E-03 4.4610E-03 6.5300E-03 4.3640E-03 9.8580E-04

3.9310E-03 7.0560E-03 5.4030E-03 8.7890E-03 2.3550E-02 6.6730E-03 6.4570E-04

3.3650E-04 3.2310E-03 8.5070E-03 5.3960E-03 9.1750E-03 3.8080E-03 2.1120E-03

2.3720E-03 2.1950E-03 1.9550E-03 2.4470E-03 1.3320E-03 5.7600E-04 3.0980E-03

4.2700E-03 3.4100E-03 3.9870E+00 4.1990E-01 3.4970E-02 6.0860E-03 1.1350E-03

9.0940E+00 1.8000E-01 6.1750E-02 2.0500E+00 4.4710E-01 2.1600E-02 3.3520E-03

2.9790E+00 4.4260E-01 3.3370E-02 2.2560E-03 1.7740E+00 2.0340E-02 1.3590E-02

4.6560E-02 2.0830E-02 7.6120E-03 1.8190E-03 1.4190E-02 5.4800E-03 2.3170E-03

1.1170E-02 3.3240E-02 1.1820E-02 2.1200E-03 1.4820E-01 3.3330E-02 6.0390E-03

7.2770E-04 1.7290E-01 5.7020E-02 1.1590E-02 1.1470E-03 5.2220E-01 1.6130E-01

2.8980E-02 2.5550E-03 1.4800E-01 1.8920E-02 1.0900E-03 6.9850E-05 5.2600E-02

2.5760E-02 9.5860E-03 1.5350E-03 6.8420E-02 5.6850E-02 2.5430E-02 4.3940E-03

2.7420E-01 7.7960E-02 1.9480E-02 2.8160E-03 1.3180E-01 5.5400E-02 1.5150E-02

1.8200E-03 1.1880E-01 7.7570E-02 2.5680E-02 3.6000E-03 3.9550E-01 1.0740E-01

2.2460E-02 2.3760E-03 4.1770E-02 4.0840E-02 3.4770E-02 6.7860E-02 4.6250E-02

2.0110E-02 3.4310E-03 1.9570E-01 4.8860E-02 7.6480E-03 1.3660E-03 4.3210E-02

1.5120E-02 5.8540E-03 1.2790E-03 9.3100E-02 3.8980E-02 9.8540E-03 1.5530E-03

5.2960E-02 4.5450E-02 2.0470E-02 7.0040E-04 7.3690E-02 3.0670E-02 6.6920E-03

6.5400E-04 7.2590E-02 4.6270E-02 1.3060E-02 1.4800E-03 4.8200E+00 7.0350E-01

5.3710E-02 8.6710E-03 3.6960E+00 3.9620E+00 1.0060E-01 9.4690E-01 7.8020E-01

3.5860E-01 1.6440E-02 1.5620E+00 3.0060E+00 3.8960E-01 3.1140E-02 8.3980E-01

6.5930E-01 7.8150E-03 2.6260E-02 1.8710E-02 1.1980E-02 6.1620E-03 9.7480E-03

6.3740E-03 2.3620E-03 9.3110E-03 2.1750E-02 1.1680E-02 5.6300E-03 5.1530E-02

7.2590E-02 2.7030E-02 5.5840E-03 6.9170E-02 6.9180E-02 4.6440E-02 1.0880E-02

1.8740E-01 2.4090E-01 1.4020E-01 2.7330E-02 5.9020E-02 6.5310E-02 1.4800E-02

9.1090E-04 3.4210E-02 2.1720E-02 1.1570E-02 7.2520E-03 5.8280E-02 2.2730E-02

2.5300E-02 2.2080E-02 1.0810E-01 1.3020E-01 5.5930E-02 1.7840E-02 7.1620E-02

4.8100E-02 3.5070E-02 1.3650E-02 8.1860E-02 3.4380E-02 4.8430E-02 2.3520E-02

1.3700E-01 1.8080E-01 8.6790E-02 2.1050E-02 4.1590E-02 4.1240E-02 1.4350E-02

5.3310E-02 2.8020E-02 1.8370E-02 1.4980E-02 8.0810E-02 8.5330E-02 3.8600E-02

6.6140E-03 2.3930E-02 1.9160E-02 7.3670E-03 4.0740E-03 4.6690E-02 3.5490E-02

2.8440E-02 8.9390E-03 4.4140E-02 3.2450E-02 1.2740E-02 1.0290E-02 4.4220E-02

2.5090E-02 1.8280E-02 5.4820E-03 5.1480E-02 1.9230E-02 2.8610E-02 1.1840E-02

4.2550E+00 7.6320E-01 5.0720E-02 1.2630E+00 3.6770E+00 1.2740E+00 3.7580E-01

7.0520E-01 4.2050E-01 1.7920E-01 3.4650E-01 1.7910E+00 1.6340E+00 2.2010E-01

3.5920E-01 6.6640E-01 1.8060E-01 1.3610E-02 1.5510E-02 1.3140E-02 8.9500E-03

6.7050E-03 5.6230E-03 2.6590E-03 7.4480E-03 1.3540E-02 1.1090E-02 6.6240E-03

1.5380E-02 4.7680E-02 4.4910E-02 1.7420E-02 2.2400E-02 5.8010E-02 4.8890E-02

3.1220E-02 5.1760E-02 1.6930E-01 1.6430E-01 9.1270E-02 2.0640E-02 5.1160E-02

3.2690E-02 7.5700E-03 2.0850E-02 1.6870E-02 1.5000E-02 7.4850E-03 3.8030E-02

2.0840E-02 2.0530E-02 2.3430E-02 3.9140E-02 8.8130E-02 8.2970E-02 3.9840E-02

3.3760E-02 4.3250E-02 3.4040E-02 2.5060E-02 4.1750E-02 4.0410E-02 2.9550E-02

3.8770E-02 4.1900E-02 1.2120E-01 1.1870E-01 5.8720E-02 4.1220E-02 2.9480E-02

7.2410E-03 3.6430E-02 2.1050E-02 2.1480E-02 1.2790E-02 2.9050E-02 6.5890E-02

5.0980E-02 2.3330E-02 1.3130E-02 1.4680E-02 1.1310E-02 4.4710E-03 1.9350E-02

3.1500E-02 2.4850E-02 1.9940E-02 3.5310E-02 2.0460E-02 1.2640E-02 1.1300E-02

2.3160E-02 2.3920E-02 1.6780E-02 1.0630E-02 2.7370E-02 2.3960E-02 1.6760E-02

2.0830E-02 3.1870E+00 5.8440E-01 3.4420E-01 2.1310E+00 2.1920E+00 1.2150E-01

4.4520E-01 4.1000E-01 2.7250E-01 5.7380E-02 6.0730E-01 1.5230E+00 7.8350E-01

1.3620E-01 4.4980E-01 3.1860E-01 6.1510E-03 1.0990E-02 1.1740E-02 9.3700E-03

4.3580E-03 4.2530E-03 2.4790E-03 5.5860E-03 7.8020E-03 9.5910E-03 6.1260E-03

3.8510E-03 2.0980E-02 3.8760E-02 3.0480E-02 5.2010E-03 3.0050E-02 3.9900E-02

4.3960E-02 8.5350E-03 8.0060E-02 1.3060E-01 1.3830E-01 6.0570E-03 2.7380E-02

3.3930E-02 1.6680E-02 1.1050E-02 1.3660E-02 1.3790E-02 6.6000E-03 1.9470E-02

2.2650E-02 1.8440E-02 1.6220E-02 1.2180E-02 4.3940E-02 7.2060E-02 5.8970E-02

1.3290E-02 3.0930E-02 2.9550E-02 2.7550E-02 1.6110E-02 3.6450E-02 2.5310E-02

3.5010E-02 9.9970E-03 5.6110E-02 9.8450E-02 9.0920E-02 3.7010E-02 1.6210E-02

5.1060E-03 2.1230E-02 2.0130E-02 1.8740E-02 8.7260E-03 8.5480E-03 3.6070E-02

4.5810E-02 3.6200E-02 6.8460E-03 1.0000E-02 1.0760E-02 5.0740E-03 6.3750E-03

2.0980E-02 2.0960E-02 2.3420E-02 2.6480E-02 1.1210E-02 1.3390E-02 8.7260E-03

1.0400E-02 1.9340E-02 1.5270E-02 1.0850E-02 1.1300E-02 2.2880E-02 1.4210E-02

1.8310E-02 2.0700E+00 7.9070E-02 7.9050E-01 2.2440E+00 3.0660E-02 2.0350E-01

3.4440E-01 2.5410E-01 7.9250E-03 1.2130E-01 7.3220E-01 1.1160E+00 4.4920E-02

2.2930E-01 3.2890E-01 2.4930E-03 6.7980E-03 8.6230E-03 7.3130E-03 2.6370E-03

2.8570E-03 1.9770E-03 3.7240E-03 4.0780E-03 7.0060E-03 4.5550E-03 7.7420E-04

6.6430E-03 2.1720E-02 3.3610E-02 6.3900E-04 1.0340E-02 2.8500E-02 4.0850E-02

3.8700E-05 2.1980E-02 7.9070E-02 1.3720E-01 1.3880E-03 1.0800E-02 2.3840E-02

2.0010E-02 4.9900E-03 1.0460E-02 9.1210E-03 5.3360E-03 7.4290E-03 1.9880E-02

1.5880E-02 7.9990E-03 3.0690E-03 1.7700E-02 4.3180E-02 6.0450E-02 4.0090E-03

1.7560E-02 2.4450E-02 2.2050E-02 4.2480E-03 2.2060E-02 2.7250E-02 2.1690E-02

1.5010E-03 1.8350E-02 5.9830E-02 9.3230E-02 2.8080E-02 6.7000E-03 4.1510E-03

1.0200E-02 1.8050E-02 1.2150E-02 5.4850E-03 2.2590E-03 1.4190E-02 3.1620E-02

3.6470E-02 3.2520E-03 6.4340E-03 7.2250E-03 4.9200E-03 1.7300E-03 9.7380E-03

1.7220E-02 1.9280E-02 1.7660E-02 5.1730E-03 1.1640E-02 5.3800E-03 3.8470E-03

1.2490E-02 1.3170E-02 7.7300E-03 3.4020E-03 1.4770E-02 1.5890E-02 1.0420E-02

2.1880E-02 1.4000E-01 1.3960E+00 5.5360E-03 6.0960E-02 2.0080E-01 1.4890E-01

9.2800E-04 1.6500E-02 1.5700E-01 8.1280E-01 1.2180E-02 8.4130E-02 2.0520E-01

7.5780E-04 3.1140E-03 4.5210E-03 4.0130E-03 1.2470E-03 1.3360E-03 1.0990E-03

1.8620E-03 1.6810E-03 3.7760E-03 1.8730E-03 1.1250E-04 1.4910E-03 7.7530E-03

2.1900E-02 7.5530E-06 1.5510E-03 1.3620E-02 2.3270E-02 4.2340E-06 7.7190E-05

3.4350E-02 8.4620E-02 2.2650E-04 2.9290E-03 1.1310E-02 1.3560E-02 1.7250E-03

5.7860E-03 4.1370E-03 2.9950E-03 1.8310E-03 1.1520E-02 9.6060E-03 2.6400E-03

4.3230E-04 6.0480E-03 1.7500E-02 3.8330E-02 7.5840E-04 7.2260E-03 1.4100E-02

1.1440E-02 5.0640E-04 8.6620E-03 1.9360E-02 9.1720E-03 1.5830E-05 3.6520E-03

2.2660E-02 5.8810E-02 1.5170E-02 1.7240E-03 2.4810E-03 3.6830E-03 1.1020E-02

5.4950E-03 2.7370E-03 5.6900E-04 3.4420E-03 1.5480E-02 2.2690E-02 1.2160E-03

3.2640E-03 3.3150E-03 3.1940E-03 2.1910E-04 2.8020E-03 1.0260E-02 1.0560E-02

8.8260E-03 1.8300E-03 6.8190E-03 2.4490E-03 1.0670E-03 5.7970E-03 7.9980E-03

3.7560E-03 6.1650E-04 6.2780E-03 1.1520E-02 3.8150E-03 1.1400E+00 2.4670E-01

9.2350E-01 3.7170E-01 1.1430E-01 2.1410E-02 2.2380E+00 7.4500E-01 1.9760E-01

4.8600E-02 2.4370E+00 1.2940E-01 3.1910E-02 2.2190E-02 1.4300E-02 7.5960E-03

3.1750E-03 1.3970E-02 1.1390E-02 5.3590E-03 3.3170E-02 7.7200E-02 4.8160E-02

2.6070E-02 1.9450E-01 1.0760E-01 4.9720E-02 1.5680E-02 2.1660E-01 8.9270E-02

2.9080E-02 5.9670E-03 1.0310E-03 1.0720E-03 7.6180E-04 3.1700E-04 1.9970E-02

8.3870E-03 3.0260E-03 8.3330E-04 7.8910E-02 2.2970E-02 6.0200E-03 1.7260E-03

3.9920E-02 3.6240E-02 3.2610E-02 2.5360E-02 8.5360E-02 7.8300E-02 4.7640E-02

1.7800E-02 1.3770E-01 6.0600E-02 2.7290E-02 1.1530E-02 8.2510E-02 6.0250E-02

3.3210E-02 1.1760E-02 8.2590E-03 3.6390E-03 1.3610E-03 3.7250E-04 6.3550E-02

3.0070E-02 1.1800E-02 1.2180E-01 7.1440E-02 2.6710E-02 4.7910E-03 4.1850E-02

4.4960E-02 4.7340E-02 4.0560E-02 1.4690E-02 6.0010E-03 2.2610E-03 7.3860E-04

1.2580E-02 9.5420E-03 5.8290E-03 2.9740E-03 2.5310E-02 3.0860E-02 3.2750E-02

2.0500E-02 4.1740E-02 4.9490E-02 4.1190E-02 2.2930E-02 6.5800E-02 5.4980E-02

3.4750E-02 1.7280E-02 9.3990E-01 3.0590E-01 3.6650E-01 2.6350E-01 1.2810E-01

3.0650E-01 1.1180E+00 7.4660E-01 2.4450E-01 4.1480E-01 1.4530E+00 8.1350E-02

1.2110E-02 8.3210E-03 7.9800E-03 7.1420E-03 1.2440E-02 6.0660E-03 4.5640E-03

2.4880E-02 5.4760E-02 4.3410E-02 1.5680E-02 7.0990E-02 7.3810E-02 7.0450E-02

6.0350E-02 2.6210E-02 1.0200E-01 8.6690E-02 4.0800E-02 9.4010E-04 2.0860E-04

4.3420E-04 8.3120E-04 7.0090E-03 7.8970E-03 5.9340E-03 2.6340E-03 1.5720E-02

4.0180E-02 2.1240E-02 5.3540E-03 3.5600E-02 3.3690E-02 2.1360E-02 9.8910E-03

7.3870E-02 1.5190E-02 2.9060E-02 5.3700E-02 3.8200E-02 7.2010E-02 4.9030E-02

2.2500E-02 5.0200E-02 2.3500E-02 2.9000E-02 3.8400E-02 1.3090E-03 3.8980E-03

3.3380E-03 1.7200E-03 3.7040E-02 2.8500E-02 1.4510E-02 6.7450E-02 3.0550E-02

3.9190E-02 3.0560E-02 4.6400E-02 4.9450E-02 2.7470E-02 7.7500E-03 4.9980E-03

6.6880E-03 4.2980E-03 1.7880E-03 8.1400E-03 4.4030E-03 4.8120E-03 5.6880E-03

1.8980E-02 3.4650E-02 2.0270E-02 8.1570E-03 5.3140E-02 3.3310E-02 2.0260E-02

9.7930E-03 5.2430E-02 2.3600E-02 2.5810E-02 2.7810E-02 5.7070E-02 2.2180E-01

2.6010E-01 1.6910E-01 5.0470E-02 2.1270E-01 6.0410E-01 7.3840E-01 7.1380E-02

3.6670E-01 8.6130E-01 3.6760E-03 7.8680E-03 7.0390E-03 4.9510E-03 8.1810E-03

5.6150E-03 1.5520E-03 1.6590E-02 3.8250E-02 2.2290E-02 1.4770E-02 1.0110E-02

4.8230E-02 6.3590E-02 6.1780E-02 1.2580E-03 1.7940E-02 5.8560E-02 9.2690E-02

1.6410E-04 6.1810E-04 5.5600E-04 2.0920E-04 1.9770E-03 4.7580E-03 5.6470E-03

3.4570E-03 3.8140E-03 1.0900E-02 2.2120E-02 1.7740E-02 3.2260E-02 1.6260E-02

1.0670E-02 7.7030E-03 1.2590E-02 4.9700E-02 3.7850E-02 1.4410E-02 1.3590E-02

2.3610E-02 3.8880E-02 4.1210E-02 8.0950E-03 3.3870E-02 3.1660E-02 2.0230E-02

1.5810E-04 8.5830E-04 2.2970E-03 3.4500E-03 1.9000E-02 2.0980E-02 1.3160E-02

1.3010E-02 4.8910E-02 3.5250E-02 1.5230E-02 5.2120E-02 1.7960E-02 9.4130E-03

8.2030E-03 1.6340E-03 3.3060E-03 4.1040E-03 2.8050E-03 2.1000E-03 5.2580E-03

4.7220E-03 3.0680E-03 1.2660E-02 2.9110E-02 1.0060E-02 2.8870E-03 4.4970E-02

2.2070E-02 8.4570E-03 2.2160E-03 2.0640E-02 3.2540E-02 2.2760E-02 1.0480E-02

1.8520E+00 3.6750E-01 5.6900E-02 6.6430E+00 2.4310E+00 5.3640E-01 9.7720E-02

2.0520E+00 8.7760E-01 4.9570E-02 2.6540E-01 1.8850E-01 7.7220E-02 2.9580E-02

7.9640E-02 3.0620E-02 1.1030E-02 5.3080E-02 1.0910E-01 4.0720E-02 6.6910E-03

1.6920E-01 7.2820E-02 2.7710E-02 7.2650E-03 7.3190E-02 3.8260E-02 1.6240E-02

4.2020E-03 6.9330E-02 2.5390E-02 7.3320E-03 1.4770E-03 2.6840E-01 7.8390E-02

1.5700E-02 1.7700E-03 1.9120E-01 4.8930E-02 1.9950E-02 8.5440E-03 1.9430E-01

6.7920E-02 2.0480E-02 5.0590E-03 1.0070E-01 3.6070E-02 1.0880E-02 2.7300E-03

1.8520E-01 6.6040E-02 2.1200E-02 6.2270E-03 6.7460E-02 2.6920E-02 8.3670E-03

1.7320E-03 3.8860E-02 1.7330E-02 5.5670E-03 1.1300E-03 6.0790E-02 2.6840E-02

2.2700E-03 6.5980E-02 3.0640E-02 1.4430E-02 5.0890E-03 4.5020E-02 1.8630E-02

7.1880E-03 2.2810E-03 3.3280E-02 2.0100E-02 9.3040E-03 2.6250E-03 1.7960E-02

7.8840E-03 2.7380E-03 9.4030E-04 1.3400E-02 9.6450E-03 4.9030E-03 1.5470E-03

1.3260E-02 6.4400E-03 3.1770E-03 1.3290E-03 1.5460E-02 6.4090E-03 2.0950E-03

4.5720E-04 1.5370E+00 3.7410E-01 1.8300E+00 2.5790E+00 2.2780E+00 6.1980E-01

1.1490E+00 4.8000E-01 6.0280E-01 1.2260E-01 8.9800E-02 6.5440E-02 6.8810E-02

4.2320E-02 3.5030E-02 1.4230E-02 3.9790E-02 5.6600E-02 3.5770E-02 2.4990E-02

4.8920E-02 7.5520E-02 5.2730E-02 3.0800E-02 2.6070E-02 2.8390E-02 2.5920E-02

1.8530E-02 9.6730E-03 3.4700E-02 2.4430E-02 8.9120E-03 7.7950E-02 1.1390E-01

6.2810E-02 1.7220E-02 4.8830E-02 1.0750E-01 3.4360E-02 1.0160E-02 4.9770E-02

8.9900E-02 5.4560E-02 2.1980E-02 2.0490E-02 4.9830E-02 3.1750E-02 1.2200E-02

4.8850E-02 8.6660E-02 5.2440E-02 2.1300E-02 1.6600E-02 2.9140E-02 2.2520E-02

9.8240E-03 1.0320E-02 1.5300E-02 1.4990E-02 6.6010E-03 3.5200E-02 1.4220E-02

1.8140E-02 3.0630E-02 3.0930E-02 1.6250E-02 9.4010E-03 1.4710E-02 2.0290E-02

1.2900E-02 7.0130E-03 2.0100E-02 1.2410E-02 9.1750E-03 7.1430E-03 5.3410E-03

7.5960E-03 6.3740E-03 2.9060E-03 1.0050E-02 6.0300E-03 3.5610E-03 2.4790E-03

6.4400E-03 6.1190E-03 3.8600E-03 1.6860E-03 5.0740E-03 6.2420E-03 4.6850E-03

2.3150E-03 9.8800E-01 1.5560E-01 1.8170E+00 1.1620E+00 1.7400E+00 4.3140E-01

6.3600E-01 4.2170E-01 4.4790E-02 9.7620E-02 5.6640E-02 4.2930E-02 2.1310E-02

2.4270E-02 1.4680E-02 2.6510E-02 2.3180E-02 3.3150E-02 2.1880E-02 1.1790E-02

3.2010E-02 5.1630E-02 4.3250E-02 5.5710E-03 1.7140E-02 2.0360E-02 2.2830E-02

5.0060E-04 9.0960E-03 2.1570E-02 2.0550E-02 1.5560E-02 6.2720E-02 6.3270E-02

4.0310E-02 1.9920E-02 3.4570E-02 6.0360E-02 1.8820E-02 1.0720E-02 3.8180E-02

5.4850E-02 4.1010E-02 3.1350E-03 1.7040E-02 3.0520E-02 2.5400E-02 1.1790E-02

3.6830E-02 5.2070E-02 3.8880E-02 2.3100E-03 1.3760E-02 1.7090E-02 1.8360E-02

6.0580E-04 9.4190E-03 8.4330E-03 1.2640E-02 1.3810E-02 1.8950E-02 1.2380E-02

1.4420E-02 1.6250E-02 1.9900E-02 7.4900E-03 4.5190E-03 9.4910E-03 1.3180E-02

9.3570E-03 9.3040E-03 9.1700E-03 1.0230E-02 3.9090E-03 1.0830E-03 4.3150E-03

4.3810E-03 5.0470E-03 6.7020E-03 3.1690E-03 3.0630E-03 1.8160E-03 3.1770E-03

3.8590E-03 3.2150E-03 1.8740E-03 1.1340E-03 3.6470E-03 3.8910E-03 3.5400E-03

3.8590E-02 1.2500E-01 1.2460E+00 1.0270E+00 8.5880E-02 4.9080E-01 1.6680E-01

1.5420E-02 3.1420E-02 2.9500E-02 2.8620E-02 8.8190E-03 1.1510E-02 9.7750E-03

1.3250E-02 6.7250E-03 2.0690E-02 1.1610E-02 1.0500E-03 1.1980E-02 2.2020E-02

3.4150E-02 6.9470E-05 6.0900E-03 1.2390E-02 1.4390E-02 7.7070E-05 5.3740E-04

6.4430E-03 1.8940E-02 1.7700E-03 1.7130E-02 4.0270E-02 3.1610E-02 8.5440E-03

1.0130E-02 1.8860E-02 2.9180E-02 1.8810E-03 9.7930E-03 2.5190E-02 3.5100E-02

6.3440E-04 2.6730E-03 1.1570E-02 2.2930E-02 2.7300E-03 9.8040E-03 2.3920E-02

3.3380E-02 1.9690E-04 2.3610E-03 9.5270E-03 1.3610E-02 8.1460E-05 5.6310E-04

6.6120E-03 8.1820E-03 3.1160E-03 1.4670E-02 4.6720E-03 5.0890E-03 9.4000E-03

7.4890E-03 7.0720E-03 9.9150E-04 3.8360E-03 5.9620E-03 7.5530E-03 2.6250E-03

7.1430E-03 3.9090E-03 2.5040E-03 3.0670E-04 7.6290E-04 2.8830E-03 3.4440E-03

3.3510E-03 1.2730E-03 1.8860E-03 8.6460E-04 1.3290E-03 1.6860E-03 1.8740E-03

1.2180E-03 1.2880E-04 1.1470E-03 2.4150E-03 2.4110E-03 2.5230E+00 3.4920E-01

4.3660E-02 7.5820E+00 3.6990E-01 1.8060E-01 2.8980E-01 1.4170E-01 5.6570E-02

2.4760E-02 5.2580E-02 2.4660E-02 5.5090E-03 4.1240E-03 3.7930E-02 7.9060E-03

2.2660E-03 1.0240E-01 3.9340E-02 1.2940E-02 2.4560E-03 6.4000E-02 2.7270E-02

1.1290E-02 2.6340E-03 7.4800E-02 3.1340E-02 1.0600E-02 1.8190E-03 1.4330E-01

4.6880E-02 6.8820E-03 1.0410E-03 1.4520E-01 5.0540E-02 1.1670E-02 1.8870E-03

4.3380E-02 1.8150E-02 7.2460E-03 2.1970E-03 8.1450E-02 3.1170E-02 9.1390E-03

1.8150E-03 2.0900E-01 5.6240E-02 1.4880E-02 2.1000E-03 9.5730E-02 2.8260E-02

7.5760E-03 1.5060E-03 1.7860E-01 6.0390E-02 1.6970E-02 3.2760E-03 9.2500E-02

2.5110E-02 1.4100E-02 4.3230E-02 2.2110E-02 8.1240E-03 1.7360E-03 6.0930E-02

2.1490E-02 6.8220E-03 1.7530E-03 1.6970E-02 7.0250E-03 2.2480E-03 4.3660E-04

2.2540E-02 1.0490E-02 3.7580E-03 9.9120E-04 2.1990E-02 1.8840E-02 6.6650E-03

2.6650E-03 2.0940E-02 1.0370E-02 3.7110E-03 6.4010E-04 2.3980E-02 1.2550E-02

6.0510E-03 2.2000E-03 2.5700E+00 3.9840E-01 2.6820E+00 3.6590E+00 1.5030E-01

1.0940E-01 1.8200E-01 1.1420E-01 4.5380E-02 3.4850E-02 1.8260E-02 1.3560E-02

3.2990E-03 1.7820E-02 1.6640E-02 4.0470E-03 3.3970E-02 4.7830E-02 2.9760E-02

1.4350E-02 2.1440E-02 3.2340E-02 1.8270E-02 1.2340E-02 2.2420E-02 3.5050E-02

2.5290E-02 1.2170E-02 5.9110E-02 5.1990E-02 4.0730E-02 6.5720E-03 6.2590E-02

5.7610E-02 3.6530E-02 1.1030E-02 1.8130E-02 2.0550E-02 1.1530E-02 6.7300E-03

2.6580E-02 3.6560E-02 2.5640E-02 9.9470E-03 5.6200E-02 1.0930E-01 4.3740E-02

1.6600E-02 2.2550E-02 5.1110E-02 2.4620E-02 8.3640E-03 4.3220E-02 8.7190E-02

5.4000E-02 1.9090E-02 4.7630E-02 4.9660E-02 8.9090E-03 2.5160E-02 1.6520E-02

1.1400E-02 7.0260E-03 2.1500E-02 2.8550E-02 1.6080E-02 6.7450E-03 8.3620E-03

6.6700E-03 4.1850E-03 1.9990E-03 9.2590E-03 9.1830E-03 7.7600E-03 3.9320E-03

1.7590E-02 1.0800E-02 8.7150E-03 2.9930E-03 1.1880E-02 7.7880E-03 5.4020E-03

3.4110E-03 1.2550E-02 1.0670E-02 6.8520E-03 5.3050E-03 1.9860E+00 8.3370E-01

2.6140E+00 1.4250E+00 5.3290E-02 7.7920E-02 1.3720E-01 8.4640E-02 1.9530E-02

1.8250E-02 1.1960E-02 2.4740E-03 8.0590E-03 1.3160E-02 7.6490E-03 9.2390E-03

2.4760E-02 3.4190E-02 2.5950E-02 7.3640E-03 1.2990E-02 2.5670E-02 1.7360E-02

4.7950E-03 1.7540E-02 2.5510E-02 2.3310E-02 1.6110E-02 4.9300E-02 2.5880E-02

2.7580E-02 2.1370E-02 4.5720E-02 3.4870E-02 2.3830E-02 7.2440E-03 1.1530E-02

1.4800E-02 9.0380E-03 6.2080E-03 2.1740E-02 2.4100E-02 2.1570E-02 1.4870E-02

4.3710E-02 7.5620E-02 3.5190E-02 5.0380E-03 1.8970E-02 3.5460E-02 2.0550E-02

8.2250E-03 3.7600E-02 6.0920E-02 4.6480E-02 2.7740E-02 3.4360E-02 1.7250E-02

1.1690E-02 1.3340E-02 1.3160E-02 6.6770E-03 6.8220E-03 1.6080E-02 1.9120E-02

1.2600E-02 3.4810E-03 5.1440E-03 4.6870E-03 2.5910E-03 2.7830E-03 6.7880E-03

6.4220E-03 6.6830E-03 1.3190E-02 6.2790E-03 6.8290E-03 3.8060E-03 5.4680E-03

6.4560E-03 6.2370E-03 3.2520E-03 6.0500E-03 6.8500E-03 8.2100E-03 5.2120E-03

2.7410E-01 9.3580E-01 2.0340E+00 2.4160E-02 4.4450E-02 6.4510E-02 4.9130E-02

9.1930E-03 1.6300E-02 7.5770E-03 1.6490E-03 3.5320E-03 7.2200E-03 8.4790E-03

1.2040E-03 1.0070E-02 2.0900E-02 3.0540E-02 8.3960E-04 7.9490E-03 1.1980E-02

2.1480E-02 1.1710E-04 5.4960E-03 1.5250E-02 2.6590E-02 3.2130E-03 1.8230E-02

3.7510E-02 2.0290E-02 5.3500E-03 2.2480E-02 3.4100E-02 2.1770E-02 2.1970E-03

6.7290E-03 9.0060E-03 1.0300E-02 9.5640E-04 6.4970E-03 1.7960E-02 2.4220E-02

2.1000E-03 1.6610E-02 3.5180E-02 5.8930E-02 8.0180E-04 5.3620E-03 1.5350E-02

3.1820E-02 1.0860E-03 8.8220E-03 3.0710E-02 6.1290E-02 1.6690E-02 1.4700E-02

2.1030E-02 4.0660E-03 1.1040E-02 9.2800E-03 5.3890E-03 1.7540E-03 6.7450E-03

1.2600E-02 1.5280E-02 1.0670E-03 3.4320E-03 3.7140E-03 2.2770E-03 5.9800E-04

2.8100E-03 5.6080E-03 5.9080E-03 8.7960E-03 3.5110E-03 4.0860E-03 3.6590E-03

1.6720E-03 5.3980E-03 4.5960E-03 2.6330E-03 2.2000E-03 5.3050E-03 5.2120E-03

4.9080E-03 3.2310E-01 7.5720E-02 9.1860E-02 5.3390E-02 2.9910E-02 1.5850E-02

1.3260E-01 6.9990E-02 1.4160E-02 1.8660E-02 3.8030E-02 1.5650E-02 7.3080E-03

2.5070E-02 1.6120E-02 8.8640E-03 3.7760E-03 1.2320E-02 7.1450E-03 3.8900E-03

1.4080E-03 2.2750E-03 1.7290E-03 1.1300E-03 5.2390E-04 4.5300E-02 2.2660E-02

9.3030E-03 2.8260E-03 6.5880E-02 4.1830E-02 1.7510E-02 3.9820E-03 1.9880E-02

1.6340E-02 1.1910E-02 7.6480E-03 3.5110E-02 2.3880E-02 1.3390E-02 5.6150E-03

1.0990E-01 4.3840E-02 1.5810E-02 5.7330E-03 3.0460E-02 2.0780E-02 1.2990E-02

7.3790E-03 8.6570E-03 4.1910E-03 1.7910E-03 5.6460E-04 1.2950E-01 2.8480E-02

8.3220E-03 9.0930E-02 3.5970E-02 1.2760E-02 4.0740E-03 9.6410E-02 4.7180E-02

2.3820E-02 1.2100E-02 3.2790E-02 1.7700E-02 6.8760E-03 1.4760E-03 8.6110E-03

6.6360E-03 4.2680E-03 2.2750E-03 3.1280E-02 2.3600E-02 1.3020E-02 7.4580E-03

1.2740E-02 1.0490E-02 7.0870E-03 3.4660E-03 1.4010E-02 9.0870E-03 5.3300E-03

2.7570E-03 2.0970E-01 3.3330E-02 3.9650E-02 3.2810E-02 2.1580E-02 6.8490E-02

2.7650E-02 4.7940E-02 1.2440E-02 1.5640E-02 1.9090E-02 5.8610E-03 9.7880E-03

8.5750E-03 8.8550E-03 9.3530E-03 2.8280E-03 4.5750E-03 4.7140E-03 4.1190E-03

1.1010E-03 5.6960E-04 8.5160E-04 1.1280E-03 1.5830E-02 1.5910E-02 1.3670E-02

7.9770E-03 3.4380E-02 1.2590E-02 2.1010E-02 1.7790E-02 1.3800E-02 1.0210E-02

7.9550E-03 5.5490E-03 1.5710E-02 9.8960E-03 1.2000E-02 1.4380E-02 1.1360E-02

5.1380E-02 3.8260E-02 1.6100E-02 1.3580E-02 1.2000E-02 1.1580E-02 1.0580E-02

8.6140E-04 3.5820E-03 3.4310E-03 2.2150E-03 2.8480E-02 6.5990E-02 1.6570E-02

1.9090E-02 3.9510E-02 2.6230E-02 1.0420E-02 2.2460E-02 4.5990E-02 3.4580E-02

1.7230E-02 1.3540E-02 7.3560E-03 1.0180E-02 7.4210E-03 4.9540E-03 2.7360E-03

3.1090E-03 3.7250E-03 2.0850E-02 1.3020E-02 1.3360E-02 3.2200E-03 9.6740E-03

6.0320E-03 4.3680E-03 2.4740E-03 6.3550E-03 5.4680E-03 4.9680E-03 4.0600E-03

1.1290E-02 1.6110E-02 1.9090E-02 1.7120E-02 1.4140E-02 4.7400E-02 1.0680E-02

6.2210E-03 7.2910E-03 5.8600E-03 7.1610E-03 9.9800E-04 5.7480E-03 6.2390E-03

5.3070E-03 1.3100E-04 1.6950E-03 2.8300E-03 3.2900E-03 1.2250E-04 6.2420E-04

6.6370E-04 4.7090E-04 2.9350E-03 9.4810E-03 9.0750E-03 5.2290E-03 2.8690E-03

2.2580E-02 1.3280E-02 3.7510E-03 6.4080E-03 5.6230E-03 4.0340E-03 2.4730E-03

1.2060E-03 9.4420E-03 9.2370E-03 6.0200E-03 3.4890E-03 5.7090E-03 2.1310E-02

2.7500E-02 3.6740E-03 7.0190E-03 7.2360E-03 5.8900E-03 5.7710E-05 5.0800E-04

1.7190E-03 2.7150E-03 8.3210E-03 1.6570E-02 3.0270E-02 4.6900E-03 1.0660E-02

1.8360E-02 1.3960E-02 9.0890E-03 9.8980E-03 1.8940E-02 2.1800E-02 9.7520E-04

9.1310E-03 6.2790E-03 2.4570E-03 9.5130E-04 2.7330E-03 2.3060E-03 1.2610E-03

1.0420E-02 7.4570E-03 3.2200E-03 4.0490E-03 4.5370E-03 3.7730E-03 2.0770E-03

8.2750E-04 1.8700E-03 3.2480E-03 3.0560E-03 2.1930E-03 5.7180E+00 5.7080E-01

1.6670E-01 1.9710E+00 2.8520E-01 4.7310E-02 2.9210E-02 4.8510E-02 1.7660E-02

3.7030E-03 1.1700E+00 1.3530E-01 1.9920E-02 2.8060E-03 1.5410E-01 4.9200E-02

1.3360E-02 1.9830E-03 1.5970E-01 5.6450E-02 1.3710E-02 1.5280E-03 1.4620E-01

2.9150E-02 1.0820E-02 3.5290E-03 2.6930E-01 3.7510E-02 1.1910E-02 2.8190E-03

4.0950E-01 7.7390E-02 1.6620E-02 3.4920E-03 3.1190E-01 6.3790E-02 1.4560E-02

2.5000E-03 8.5290E-01 1.1540E-01 1.3330E-02 2.3640E-03 1.1680E+00 1.6910E-01

2.8590E-02 4.8970E-03 1.4390E-01 5.5570E-02 1.6860E-02 2.9360E-03 2.9760E-02

9.6520E-03 1.4510E-03 4.4540E-02 1.3790E-02 4.0680E-03 1.1850E-03 1.1880E-01

3.7370E-02 1.5600E-02 4.4740E-03 1.3270E+01 4.2810E-01 6.9560E-02 2.8620E-02

2.9670E+01 3.6530E+00 3.3290E-01 4.1600E-02 1.0000E-01 5.5600E-02 2.6320E-02

3.2450E-03 5.3560E+00 1.8190E-01 8.0790E-03 3.0680E-03 1.6920E+01 2.1170E+00

1.0570E-01 8.9660E-03 6.4180E+00 5.4140E-01 8.3650E-01 8.4860E-01 1.6240E-01

2.3370E-02 2.8250E-02 1.7880E-02 9.3450E-03 5.3880E-02 8.5850E-01 1.4940E-01

2.2670E-02 3.4020E-02 7.3170E-02 4.3880E-02 1.5520E-02 4.7600E-02 7.7870E-02

7.2320E-02 1.6080E-02 3.9150E-02 7.8810E-02 1.8100E-02 7.1380E-03 6.2780E-02

1.5770E-01 2.4330E-02 9.8580E-03 7.5570E-02 2.3720E-01 6.8790E-02 1.7770E-02

3.7960E-02 2.0960E-01 6.4320E-02 1.6510E-02 1.1230E-01 5.3650E-01 1.2580E-01

1.4570E-02 7.0960E-02 8.5380E-01 1.7750E-01 3.2380E-02 4.2110E-02 6.7440E-02

4.6720E-02 1.9230E-02 1.6470E-02 1.0570E-02 5.6570E-03 1.7650E-02 2.0730E-02

1.0030E-02 2.8520E-03 3.7220E-02 6.4670E-02 2.4290E-02 1.4600E-02 2.2020E+00

8.6060E+00 3.9590E-01 4.1740E-02 1.3070E+00 2.1000E+01 4.2640E+00 3.9160E-01

8.0020E-02 3.6740E-02 1.5720E-02 1.6200E-02 7.9740E-01 3.4430E+00 1.9190E-01

5.0780E-03 2.1070E+00 1.0620E+01 2.4820E+00 1.2740E-01 4.8290E+00 3.1710E-01

6.7220E-01 3.9580E-01 1.7530E-02 1.4620E-02 1.6660E-02 1.0360E-02 9.8420E-03

4.8410E-02 6.3750E-01 1.1820E-01 6.3480E-03 2.8940E-02 5.1470E-02 3.8040E-02

1.5870E-03 4.8590E-02 5.1920E-02 6.1580E-02 1.5230E-02 3.0230E-02 5.2100E-02

1.0610E-02 1.9000E-02 5.3680E-02 1.0320E-01 1.5170E-02 1.6620E-02 6.7270E-02

1.6170E-01 5.3000E-02 9.0070E-03 3.3690E-02 1.7140E-01 5.3570E-02 1.2910E-02

1.2530E-01 3.7320E-01 9.6120E-02 1.5850E-02 6.8760E-02 6.5920E-01 1.4350E-01

8.6340E-03 3.4900E-02 4.6870E-02 4.1200E-02 7.9040E-03 1.0050E-02 6.6100E-03

6.6920E-03 1.3390E-02 1.2920E-02 6.1930E-03 1.5560E-02 2.4270E-02 4.7430E-02

1.9050E-02 2.3630E-01 2.3680E+00 5.4930E+00 2.6210E-01 1.0500E-01 1.4790E+00

1.5260E+01 3.3160E+00 6.0040E-02 1.9350E-02 1.8500E-02 1.3800E-02 7.7660E-02

9.3690E-01 2.1790E+00 1.3270E-01 1.0220E-01 2.4810E+00 7.0470E+00 1.8790E+00

1.0700E-01 3.4880E-01 4.6700E-01 1.1680E-02 6.4770E-03 1.2530E-02 8.4490E-03

1.3630E-03 1.0670E-02 3.9050E-02 4.9060E-01 1.7520E-04 7.2680E-03 2.4060E-02

5.5860E-02 9.0140E-05 1.8940E-03 3.8260E-02 5.9860E-02 6.5500E-03 1.2820E-02

2.1940E-02 2.9660E-02 6.0660E-03 1.8840E-02 4.0500E-02 6.2680E-02 3.4920E-03

1.7770E-02 5.2930E-02 1.2640E-01 1.1580E-03 1.0070E-02 2.7460E-02 1.5060E-01

2.3200E-03 1.4500E-02 9.5450E-02 2.8560E-01 2.4250E-03 1.7460E-02 5.5400E-02

5.2100E-01 7.5850E-04 9.6360E-03 2.9120E-02 4.8300E-02 3.0710E-03 7.8770E-03

5.4200E-03 2.3860E-03 5.8650E-03 9.5640E-03 7.5020E-03 4.4680E-03 1.4600E-02

1.9040E-02 3.2690E-02 5.5840E-02 2.6470E-01 1.7920E+00 3.4390E+00 2.2980E-02

1.0890E-01 1.1270E+00 1.2150E+01 4.0010E-02 7.6830E-03 1.9640E-02 7.3810E-03

7.1370E-03 9.8160E-02 7.1730E-01 1.4220E+00 7.9260E-03 1.2690E-01 1.8790E+00

5.6500E+00 1.9350E+00 1.9310E-01 5.5920E-01 4.8680E-01 2.2390E-01 1.3120E-02

4.9470E-02 2.4650E-02 1.1360E-02 4.9490E-03 1.3520E-02 7.3650E-03 3.5490E-03

1.3410E-03 1.8310E-02 9.4740E-03 4.2670E-03 1.4380E-03 6.9490E-02 5.5370E-02

4.3280E-02 2.4560E-02 2.7920E-01 8.0120E-02 2.0820E-02 6.4400E-03 5.2550E-02

2.9260E-02 1.4850E-02 6.5640E-03 3.6510E-02 1.9750E-02 1.0500E-02 5.1230E-03

4.2240E-02 2.4090E-02 1.1740E-02 4.8340E-03 5.6660E-02 2.7910E-02 1.2350E-02

4.7930E-03 3.1910E-02 1.8630E-02 9.0900E-03 3.9360E-03 8.0640E-01 3.5330E-01

9.8010E-03 5.3090E-01 1.4520E-01 3.0360E-02 5.5810E-03 7.3890E-02 5.3580E-02

3.0660E-02 1.3640E-02 1.0440E+01 2.6320E+00 4.8200E-01 7.6860E-02 4.7760E-01

2.3630E-01 1.1550E-01 5.8440E-02 5.2780E+00 8.2560E+00 3.5540E+00 9.4470E-02

9.0370E+00 2.2250E+00 3.1790E-01 1.7870E-02 6.1130E-02 2.5430E-02 9.7810E-03

3.5900E-03 1.5610E+00 3.7090E-01 2.2090E-01 7.5450E-02 1.8730E-01 8.8480E-03

2.0630E-02 1.8590E-02 1.2080E-02 2.6850E-03 5.3110E-03 5.1890E-03 4.2040E-03

2.2570E-03 7.2040E-03 7.4210E-03 5.4550E-03 5.0210E-02 4.8270E-02 2.3860E-02

6.6350E-03 2.1040E-02 1.4380E-01 7.7360E-02 1.7000E-02 1.7460E-02 2.0020E-02

1.8080E-02 1.3290E-02 8.6200E-03 1.6080E-02 1.4110E-02 9.2130E-03 1.4020E-02

1.5650E-02 1.4400E-02 1.1220E-02 9.6830E-03 2.2980E-02 2.1050E-02 1.4040E-02

7.5300E-03 1.1980E-02 1.2260E-02 1.0680E-02 3.5210E-01 1.1210E-01 3.1500E-01

3.0980E-02 2.6510E-01 1.4580E-01 3.3980E-02 4.1560E-02 2.1290E-02 2.5020E-02

2.7210E-02 2.9750E-01 5.2850E+00 2.7770E+00 5.3660E-01 8.4150E-02 2.1600E-01

1.8460E-01 1.0630E-01 3.5150E+00 3.5400E+00 1.2520E+00 3.1620E+00 1.9890E-01

4.5150E+00 2.4040E+00 4.7850E-01 8.3210E-03 2.7140E-02 2.0990E-02 1.0180E-02

1.8460E-01 1.3080E-02 1.8590E-01 3.9260E-02 1.5640E-03 4.8350E-03 1.0180E-02

1.3220E-02 1.4970E-04 1.5920E-03 2.9860E-03 3.9760E-03 3.6810E-05 1.2400E-03

3.7680E-03 5.9890E-03 3.4290E-02 1.2340E-02 1.0120E-02 6.6200E-03 8.2570E-03

9.3140E-03 5.7620E-02 5.4330E-02 3.8210E-03 9.6130E-03 1.1370E-02 9.6220E-03

2.2970E-03 4.4550E-03 7.5390E-03 9.3370E-03 1.7320E-03 7.9940E-03 9.2190E-03

7.7590E-03 1.3780E-03 5.5560E-03 1.1760E-02 1.5170E-02 8.7440E-04 4.3280E-03

7.3420E-03 8.5010E-03 9.7820E-03 3.1470E-01 6.5020E-02 5.8180E-03 1.8430E-02

1.1030E-01 1.0280E-01 7.1790E-03 2.3820E-02 1.8000E-02 8.1260E-03 9.3170E-02

1.5080E-01 2.1150E+00 2.0490E+00 3.0850E-02 4.0100E-02 9.4130E-02 1.3130E-01

1.7560E+00 9.4470E-02 3.1390E+00 7.1640E-01 8.4680E-03 1.3850E-01 1.8560E+00

1.8380E+00 1.9710E-03 4.5070E-03 1.2030E-02 1.5120E-02 1.7490E+00 1.1660E+00

5.8330E-01 6.2920E-02 5.2430E-02 4.1950E-02 3.1460E-02 2.6650E-04 2.2840E-04

1.9040E-04 1.5230E-04 1.0280E-03 8.9920E-04 7.7070E-04 6.4230E-04 3.6430E+00

2.7400E+00 1.8310E+00 9.1670E-01 1.0510E-01 7.8810E-02 5.2570E-02 2.6300E-02

4.5070E-03 3.6070E-03 2.7050E-03 1.8030E-03 2.0400E-02 1.6990E-02 1.3600E-02

1.0200E-02 2.0560E-02 1.6450E-02 1.2340E-02 8.2260E-03 1.5510E-02 1.2910E-02

1.0330E-02 7.7520E-03 2.4280E-04 2.0810E-04 1.7340E-04 1.3870E-04 2.9480E-02

1.9650E-02 9.8240E-03 2.7660E-02 2.0780E-02 1.3870E-02 6.9380E-03 1.7820E-02

1.4260E-02 1.0700E-02 7.1310E-03 5.2860E-02 3.9690E-02 2.6470E-02 1.3240E-02

7.6230E-03 6.3530E-03 5.0830E-03 3.8130E-03 2.4420E-02 1.5110E-02 1.0060E-02

5.0360E-03 4.3240E-02 3.2820E-02 2.1890E-02 1.0950E-02 3.1870E-03 2.5500E-03

1.9120E-03 1.2750E-03 2.4890E+00 1.1960E+00 2.9510E-02 2.0840E-02 1.1860E-02

5.3170E-03 5.4500E-02 2.2960E-02 8.6030E-03 2.3750E-03 1.0560E-03 8.7190E-04

5.7820E-04 3.1180E-04 6.4140E+00 4.1780E+00 1.6770E+00 3.3690E-01 8.0900E-02

4.6720E-02 2.1020E-02 6.7700E-03 9.8030E-02 7.7090E-02 6.3830E-02 4.7330E-02

5.6860E-02 4.3050E-02 2.8540E-02 1.6440E-02 3.7100E-02 2.2570E-02 1.2800E-02

6.5070E-03 2.5060E-02 1.1570E-02 4.6300E-03 1.4630E-03 1.5990E-02 6.6330E-03

2.6450E-03 9.4600E-04 3.1450E-02 3.1670E-02 1.9960E-02 5.7690E-02 3.3520E-02

1.6210E-02 5.9390E-03 6.0090E-02 3.1190E-02 1.5090E-02 6.3400E-03 7.3040E-02

4.5380E-02 2.1340E-02 7.1370E-03 7.0900E-03 5.9080E-03 3.1890E-03 1.3160E-03

1.9770E-02 3.3560E-02 3.3490E-02 2.1480E-02 5.9080E-02 4.3630E-02 2.0120E-02

5.3890E-03 3.9320E-02 1.5440E-02 5.7900E-03 2.0800E-03 8.8770E-01 1.3530E-02

4.8410E-03 9.1750E-03 1.2070E-02 2.8510E-03 2.3450E-02 2.2450E-02 1.1600E-02

6.0380E-04 2.9840E-04 3.7860E-04 5.8850E-04 3.4690E+00 9.9400E-01 2.0640E+00

1.8970E+00 3.6110E-02 2.4040E-02 2.5240E-02 1.7000E-02 6.3720E-02 6.6730E-02

4.2120E-02 1.7970E-02 3.1680E-02 2.0770E-02 2.1380E-02 2.2740E-02 1.5050E-02

1.4620E-02 1.2960E-02 9.7490E-03 3.1570E-03 1.0270E-02 9.2910E-03 5.7620E-03

1.1540E-03 5.9510E-03 5.6570E-03 3.4550E-03 3.1600E-02 1.8050E-02 5.6840E-03

2.5970E-02 2.0540E-02 1.8020E-02 1.1040E-02 1.7320E-02 2.2900E-02 2.0720E-02

1.4150E-02 3.6750E-02 2.1430E-02 2.3170E-02 1.6610E-02 3.1980E-03 2.1550E-03

2.4920E-03 3.2960E-03 1.3180E-02 3.3480E-02 1.9990E-02 5.5520E-03 3.8520E-02

8.6840E-03 1.9610E-02 1.8480E-02 4.7560E-03 1.6770E-02 1.2880E-02 6.1360E-03

1.0100E-03 7.9300E-03 7.9030E-03 2.6900E-03 1.1480E-04 1.6980E-03 9.7600E-03

1.8210E-02 6.0710E-05 3.4350E-04 3.3610E-04 1.7410E-04 1.9100E-01 2.4010E+00

1.3180E+00 3.0300E-01 7.2050E-03 2.1280E-02 1.5980E-02 6.5940E-03 4.2680E-02

1.9510E-02 1.6830E-02 1.6070E-02 8.0190E-03 1.6600E-02 1.4500E-02 9.1380E-03

4.3850E-03 7.6940E-03 8.0040E-03 6.2070E-03 2.6370E-04 1.8940E-03 5.0660E-03

7.0180E-03 7.9680E-05 6.8370E-04 2.7550E-03 4.5890E-03 1.9890E-02 5.6820E-03

2.0510E-03 6.8890E-03 1.4120E-02 1.1190E-02 5.5840E-03 3.5090E-03 9.6990E-03

1.2500E-02 1.1410E-02 7.7190E-03 2.1360E-02 1.4260E-02 5.4410E-03 3.9390E-04

1.8630E-03 2.0100E-03 1.2330E-03 6.5880E-03 2.1470E-02 5.5510E-03 2.4840E-03

4.8720E-03 2.4420E-02 1.1670E-02 1.5320E-03 1.1390E-03 2.5070E-03 7.7290E-03

9.3090E-03 1.7070E+00 5.4410E-02 6.7700E-03 2.8800E+00 1.1060E+00 1.1670E-01

6.3360E-03 5.1750E+00 1.2820E+00 1.7940E-01 1.0290E-02 5.7070E-02 1.2610E-02

3.1210E-03 7.3750E-04 2.4620E+00 2.6660E-01 5.5860E-03 8.1320E-04 2.2890E+00

4.6440E-01 4.6530E-02 2.0390E-03 9.0660E-01 3.8030E-01 4.2370E-02 2.0200E-03

4.3750E-01 1.3310E-01 3.5980E-02 6.8650E-03 6.8580E-01 1.8730E-01 4.6740E-02

7.8360E-03 2.9810E-01 1.7140E-01 2.0440E-02 1.6490E-03 3.8820E-02 6.9100E-03

1.7860E-04 1.9310E-01 2.2790E-02 1.6930E-03 9.4420E-05 2.0660E-01 4.0380E-02

3.4590E-03 3.8620E-04 1.8930E-01 2.7620E-02 8.2310E-03 7.6290E-04 8.5590E-02

3.0400E-02 5.8250E-03 9.0100E-04 2.7920E-02 1.0080E-02 5.8080E-03 4.3610E-04

7.0420E-02 8.0050E-03 1.7960E-03 1.4880E-04 1.1340E-01 3.1590E-02 8.2280E-03

1.5050E-03 5.4620E+00 6.3790E-02 8.5320E-01 3.7720E+00 1.2800E+00 1.3850E-01

1.0550E+00 5.1470E+00 2.2920E+00 2.1420E-01 2.0770E-02 2.7750E-02 8.6970E-03

2.5010E-03 6.7220E-01 1.3180E+00 2.7670E-01 4.7960E-03 6.0150E-01 1.2070E+00

4.7910E-01 5.4850E-02 3.8030E-01 9.4520E-01 4.1440E-01 5.0260E-02 1.5120E-01

2.1910E-01 9.9410E-02 3.4640E-02 1.8700E-01 3.7090E-01 1.6260E-01 5.1140E-02

1.4610E-01 3.1770E-01 1.9410E-01 2.3730E-02 1.9150E-02 1.4720E-02 4.3210E-03

5.4170E-02 1.0390E-01 2.0860E-02 1.8010E-03 5.2820E-02 1.0930E-01 4.3130E-02

3.8440E-03 5.7310E-02 1.0670E-01 1.5440E-02 8.3360E-03 3.0380E-02 8.7910E-02

2.9610E-02 6.4210E-03 2.3270E-02 8.0750E-03 2.0500E-03 3.4620E-03 1.9740E-02

3.9990E-02 5.3810E-03 1.7670E-03 3.8630E-02 5.6620E-02 2.5710E-02 8.5240E-03

1.9500E+00 4.9730E-02 9.9250E-01 2.7740E+00 1.0210E+00 1.1050E-02 1.2980E+00

6.3380E+00 1.8110E+00 7.3280E-03 1.7300E-02 1.7800E-02 5.7260E-03 1.3200E-01

7.0140E-01 7.9240E-01 1.9370E-01 1.0020E-01 6.1660E-01 7.7290E-01 3.7350E-01

4.2350E-02 4.1440E-01 6.4490E-01 3.3100E-01 4.7720E-02 1.2230E-01 1.5390E-01

8.0840E-02 4.6590E-02 1.6250E-01 2.7120E-01 1.4000E-01 8.3140E-03 1.6920E-01

2.0460E-01 1.5540E-01 8.0700E-03 1.4080E-02 8.2940E-03 1.1900E-02 5.4620E-02

6.4040E-02 1.4570E-02 8.3350E-03 5.5670E-02 7.0160E-02 3.3210E-02 1.8900E-02

4.7350E-02 7.3160E-02 1.0500E-02 5.8210E-03 2.9610E-02 6.3920E-02 2.4330E-02

1.8610E-02 4.6350E-03 3.3080E-03 2.9850E-03 5.4280E-03 1.8080E-02 2.6960E-02

3.7160E-03 1.1260E-02 3.1710E-02 3.9220E-02 2.0920E-02 1.6200E-03 5.8270E-02

7.7630E-01 2.7920E+00 4.4870E-04 1.2830E-02 1.0000E+00 6.1310E+00 2.4570E-03

7.5400E-03 1.3590E-02 1.2300E-02 1.5300E-02 1.6880E-01 5.6290E-01 6.1770E-01

8.8740E-03 1.2100E-01 4.9930E-01 7.7290E-01 2.0130E-03 5.0250E-02 3.3100E-01

7.0290E-01 1.1690E-02 5.0690E-02 1.0320E-01 1.3700E-01 7.8150E-03 5.1120E-02

1.4000E-01 2.6590E-01 7.8250E-04 9.3720E-03 1.3210E-01 2.6900E-01 2.4750E-03

1.0170E-02 1.0180E-02 1.7510E-03 1.4790E-02 4.3900E-02 4.8480E-02 9.2960E-04

9.8910E-03 4.4620E-02 7.0100E-02 4.9400E-03 2.1060E-02 3.8210E-02 4.8170E-02

9.0060E-04 6.4200E-03 2.4320E-02 6.1050E-02 1.3960E-02 2.1360E-03 4.7010E-03

1.0540E-03 1.1720E-03 6.2030E-03 1.4540E-02 1.8010E-02 2.6630E-03 1.2190E-02

2.6740E-02 3.5630E-02 2.7000E+00 2.4260E-01 7.2990E-03 5.7320E+00 9.8460E-01

1.5710E-01 8.1090E-03 3.5010E-02 8.3860E-03 2.6880E-03 4.3060E-05 5.8690E-02

1.9000E-02 2.2840E-04 6.5900E-06 1.7810E-01 3.2680E-02 2.5700E-03 7.3170E-05

9.4960E-01 3.2570E-01 2.1490E-02 2.1400E-04 1.2770E+00 1.7160E-01 2.9300E-02

3.1590E-03 3.3620E-01 2.4650E-01 2.9800E-02 3.8140E-03 1.0710E+00 4.3870E-01

5.9410E-02 3.5170E-03 1.1730E-02 6.5370E-04 2.4960E-05 6.2800E-02 1.2480E-02

3.5310E-03 3.3660E-05 2.2230E-01 1.3610E-02 1.6370E-03 1.9850E-04 3.4770E-02

1.0330E-02 2.6320E-04 3.5210E-05 2.0830E-01 4.2450E-02 4.7040E-03 2.7730E-04

1.9100E-04 2.2150E-02 3.2870E-03 2.1240E-05 3.4990E-02 1.0930E-02 3.5420E-03

1.9270E-05 3.6690E-01 3.2380E-02 3.4370E-03 5.4680E-05 4.8020E+00 2.8430E-01

7.5390E-01 5.3860E+00 2.0300E+00 2.7880E-01 1.4840E-02 1.8020E-02 3.9620E-03

2.9490E-03 2.9560E-02 1.8330E-02 1.9140E-02 2.4550E-04 4.9880E-02 9.2680E-02

3.4210E-02 2.9870E-03 4.0130E-01 1.1520E+00 3.7730E-01 2.5420E-02 3.0670E-01

7.7220E-01 1.5270E-01 3.0860E-02 2.9090E-01 6.2880E-01 2.5460E-01 3.2800E-02

2.7630E-01 1.2500E+00 4.7310E-01 6.8400E-02 5.2660E-03 5.1410E-03 3.9520E-04

2.4210E-02 3.2630E-02 6.4560E-03 3.8890E-03 3.8200E-02 1.5050E-01 1.3590E-02

1.7650E-03 1.6430E-02 1.2000E-02 1.0280E-02 2.4290E-04 5.1560E-02 1.1720E-01

4.4400E-02 5.3970E-03 1.6370E-04 1.1310E-02 8.5180E-03 2.0160E-03 1.6450E-02

1.6190E-02 4.9040E-03 3.8980E-03 7.3520E-02 2.3440E-01 3.2420E-02 4.2790E-03

3.7610E+00 1.1520E-01 1.6650E+00 6.9400E+00 2.5920E+00 6.3570E-03 1.0330E-02

1.3370E-02 2.9240E-03 8.9050E-03 2.5220E-02 7.6670E-03 1.3520E-02 9.6880E-03

5.1280E-02 6.1520E-02 2.6690E-02 4.6360E-02 4.6020E-01 8.4230E-01 2.9750E-01

6.9560E-02 3.0290E-01 5.5650E-01 1.2390E-01 4.9320E-02 3.0090E-01 4.3990E-01

2.0770E-01 5.9170E-02 4.6910E-01 9.4400E-01 3.9060E-01 1.9760E-03 4.6840E-03

2.2070E-03 9.4400E-03 1.8450E-02 2.3530E-02 4.7510E-03 5.7270E-03 4.2710E-02

1.1100E-01 1.0640E-02 5.0500E-03 1.4400E-02 5.6670E-03 7.2360E-03 8.1220E-03

5.4800E-02 8.5150E-02 3.6140E-02 1.3640E-04 4.9830E-03 8.5350E-03 4.6860E-03

7.9690E-03 9.9920E-03 1.3510E-02 3.6030E-03 1.2400E-02 7.9240E-02 1.7000E-01

2.5720E-02 1.0810E-03 1.3360E-01 2.1730E+00 7.6760E+00 1.7980E-03 7.1020E-03

9.0670E-03 8.7160E-03 1.4120E-03 1.1010E-02 2.1480E-02 1.0600E-02 1.0090E-03

1.1600E-02 4.2470E-02 6.3140E-02 2.2500E-03 5.5590E-02 3.7300E-01 8.9680E-01

1.1920E-02 7.9670E-02 2.5290E-01 5.0420E-01 6.3770E-03 5.6040E-02 2.4930E-01

4.9590E-01 3.5170E-03 6.8230E-02 3.8850E-01 1.0440E+00 6.4990E-04 2.6880E-03

3.8750E-03 2.4390E-03 1.0780E-02 1.5850E-02 1.5980E-02 7.4360E-04 6.7460E-03

3.3760E-02 9.2560E-02 9.2160E-04 6.1630E-03 1.2200E-02 6.7200E-03 6.8770E-04

9.4550E-03 4.4680E-02 9.2710E-02 1.0920E-04 1.6070E-03 6.3580E-03 6.5970E-03

2.2720E-03 8.8840E-03 8.9760E-03 7.7540E-03 1.2010E-03 1.4880E-02 6.4530E-02

1.5030E-01 1.0310E+00 3.1720E-02 1.0150E-03 1.6700E-01 2.8470E-02 1.0570E-04

1.6520E-05 1.3030E-02 9.0960E-04 2.4190E-05 1.6440E-06 2.9160E-02 7.4780E-03

4.7440E-04 9.7490E-06 1.8390E+00 1.7900E-01 2.7970E-03 3.1060E-05 1.0490E-01

2.3550E-02 3.2440E-03 3.6250E-05 3.4090E-01 1.0340E-01 1.0210E-02 8.5080E-04

1.0640E+00 2.1940E-01 5.6690E-02 3.7820E-03 4.8380E-04 1.7160E-04 2.3400E-05

1.5730E-02 2.3860E-03 1.7520E-04 3.2480E-05 8.6660E-02 1.4070E-02 2.0900E-03

1.1840E-04 3.3590E-02 6.5290E-03 2.4100E-04 4.1920E-05 4.5830E-01 5.8340E-02

6.2640E-03 2.9200E-04 1.1190E-03 7.2480E-04 3.9930E-04 8.9200E-05 3.0990E-02

3.4980E-03 1.2020E-04 1.7490E-06 3.5700E-02 1.0040E-02 1.3510E-03 3.1650E-05

2.2040E+00 6.0470E-02 6.5810E-02 7.6920E-02 2.9500E-02 9.3870E-05 4.1010E-03

7.0550E-03 8.8920E-04 2.4310E-05 1.1060E-02 1.2970E-02 7.8960E-03 5.4490E-04

3.0570E-01 1.8680E+00 2.1850E-01 3.2090E-03 3.6790E-02 5.3430E-02 2.1240E-02

3.7510E-03 1.0200E-01 4.4680E-01 1.1320E-01 1.1440E-02 2.6400E-01 1.3780E+00

3.9690E-01 6.3930E-02 3.1760E-04 2.0130E-04 9.6560E-05 5.9980E-03 7.6110E-03

2.1630E-03 1.4430E-04 2.5450E-02 4.9970E-02 1.2300E-02 2.3350E-03 1.4190E-02

1.4410E-02 6.2330E-03 2.0790E-04 1.1780E-01 5.0380E-01 5.9540E-02 7.2130E-03

9.7890E-04 5.7850E-04 2.7010E-04 2.1220E-04 1.1580E-02 1.5840E-02 3.3640E-03

1.2920E-04 1.4350E-02 1.6030E-02 9.2940E-03 1.5900E-03 2.4280E+00 1.9030E-02

6.2540E-02 4.5120E-02 2.0900E-02 9.8960E-04 4.2890E-03 4.4870E-03 6.3180E-04

2.5520E-03 1.1000E-02 8.1200E-03 6.1700E-03 3.9650E-02 6.1870E-01 2.3620E+00

1.6800E-01 9.9370E-03 3.3600E-02 3.7420E-02 1.7800E-02 2.5120E-02 1.6840E-01

3.4020E-01 9.0150E-02 7.5720E-02 4.6570E-01 1.0670E+00 3.3350E-01 1.8580E-04

1.9270E-04 1.2030E-04 1.8210E-03 5.5610E-03 4.6870E-03 1.5290E-03 6.5830E-03

2.4260E-02 3.6360E-02 1.0190E-02 4.4380E-03 1.2930E-02 8.5050E-03 4.4010E-03

1.5800E-02 1.3140E-01 3.9420E-01 4.9730E-02 8.3910E-04 4.1120E-04 2.9030E-04

2.0800E-04 2.9090E-03 1.1450E-02 9.9500E-03 2.3960E-03 4.0510E-03 1.2990E-02

1.0730E-02 7.5900E-03 3.0990E-03 2.3590E-02 5.3180E-02 4.3200E-02 1.4510E-04

1.2190E-03 3.5250E-03 3.7790E-03 3.0820E-04 3.0240E-03 9.3580E-03 1.0510E-02

1.9230E-03 4.9040E-02 4.8930E-01 2.1410E+00 1.3980E-03 1.1600E-02 2.9850E-02

3.9410E-02 2.7130E-03 2.9040E-02 1.3970E-01 3.5080E-01 6.8160E-03 8.5890E-02

3.9480E-01 1.1350E+00 1.0310E-04 1.9190E-04 1.4540E-04 3.9780E-04 2.1740E-03

4.7010E-03 4.1540E-03 1.0150E-03 7.6380E-03 2.0840E-02 3.4910E-02 8.8560E-04

5.3610E-03 1.1040E-02 8.2380E-03 1.3840E-03 1.8420E-02 1.0740E-01 3.6890E-01

6.9930E-04 2.5620E-04 3.5420E-04 1.4730E-04 4.8020E-04 3.6070E-03 9.6300E-03

8.5760E-03 6.1140E-04 4.7130E-03 1.1440E-02 1.2700E-02 3.4830E+00 5.1960E-01

3.2700E-02 1.2040E-01 5.2560E-02 3.2630E-02 1.6470E-02 8.4260E-02 5.6440E-02

3.1130E-02 1.6560E-02 7.8070E-02 3.6300E-02 1.3250E-02 3.2870E-03 4.7010E-02

2.6250E-02 1.1440E-02 3.3070E-03 4.8130E-02 2.4370E-02 1.1280E-02 3.6690E-03

8.3640E-02 3.1650E-02 8.5920E-03 1.3650E-03 9.1270E-02 5.9460E-02 9.5610E-03

3.1590E-02 1.8000E-02 8.6950E-03 3.3640E-03 8.6790E-02 4.0130E-02 1.2280E-02

3.3610E-03 5.9090E-02 3.0520E-02 1.2390E-02 5.3440E-03 5.4240E-02 1.7690E-02

5.9990E-03 2.2850E-03 9.9620E-02 1.0430E-01 6.8640E-02 4.0950E-03 5.3470E-02

2.7190E-02 9.5000E-03 2.7760E-03 4.0420E-02 1.7340E-02 5.6030E-03 1.0800E-03

3.1130E+00 6.2050E-01 5.2560E-02 7.8740E-02 3.0210E-02 1.1940E-02 5.1040E-02

3.4270E-02 3.5750E-02 2.1220E-02 2.6440E-02 3.0620E-02 2.7000E-02 1.4940E-02

2.4210E-02 1.5930E-02 1.4950E-02 1.1560E-02 1.9420E-02 1.4750E-02 1.4690E-02

1.1750E-02 1.5570E-02 3.7780E-02 2.9920E-02 1.0670E-02 6.7210E-02 1.7020E-02

3.5720E-02 1.7990E-02 1.3140E-02 9.9580E-03 5.0970E-03 3.2760E-02 3.0900E-02

3.1210E-02 1.3030E-02 3.0450E-02 2.2130E-02 2.0990E-02 7.1210E-03 9.4220E-03

2.8040E-02 1.6490E-02 5.7430E-03 7.4670E-02 7.7440E-02 7.9770E-03 4.7100E-02

2.7190E-02 1.7470E-02 1.7790E-02 7.2600E-03 1.4260E-02 1.2940E-02 1.3570E-02

6.3190E-03 2.0760E+00 3.2630E-02 3.0210E-02 3.8470E-02 1.0630E-02 2.3080E-02

3.2790E-02 1.7400E-02 2.1600E-02 4.9330E-03 1.9030E-02 1.9320E-02 2.2180E-02

7.4790E-03 1.3180E-02 1.2180E-02 1.0880E-02 5.5630E-03 1.1780E-02 1.0960E-02

1.1930E-02 3.8420E-04 1.5580E-02 2.1670E-02 2.4990E-02 3.2700E-02 3.0280E-02

1.7680E-02 8.6890E-03 9.9480E-03 7.3010E-03 4.5980E-03 6.1530E-03 2.6500E-02

1.4880E-02 2.3020E-02 1.2370E-02 2.1000E-02 9.3740E-03 1.0860E-02 2.3830E-03

6.9110E-03 1.8290E-02 1.2300E-02 4.9750E-02 3.2650E-02 3.4670E-02 2.1200E-02

9.4980E-03 1.7800E-02 8.9920E-03 1.0000E-02 2.8110E-03 1.1400E-02 7.6260E-03

9.5940E-03 1.6470E-02 1.1940E-02 1.0630E-02 1.5570E-02 9.6750E-03 1.2200E-02

1.7450E-02 7.6080E-03 4.7860E-04 4.9550E-03 1.3160E-02 1.4150E-02 1.2370E-03

7.5200E-03 8.2090E-03 5.2990E-03 8.8210E-04 5.1460E-03 7.8550E-03 6.1700E-03

3.5170E-05 3.7990E-04 1.0990E-02 1.9910E-02 9.6430E-03 2.6730E-02 3.0160E-03

3.3650E-03 5.0930E-03 4.5960E-03 2.3190E-03 1.4640E-03 5.1040E-03 1.7320E-02

1.1320E-02 5.3440E-03 7.0020E-03 1.0850E-02 3.6180E-03 8.1490E-04 1.1860E-03

4.0250E-03 1.2020E-02 2.4870E-02 6.9140E-03 3.6020E-02 1.2340E-03 2.7760E-03

7.2590E-03 1.0000E-02 3.1450E-03 2.8080E-04 2.9240E-03 7.5220E-03 4.9560E-03

1.2190E+00 6.6240E-02 7.5430E-03 4.3470E+00 1.4350E+00 3.0190E-01 3.3310E-02

8.9150E+00 1.9870E+00 3.2190E-01 3.1310E-02 1.3870E-01 5.3890E-02 2.0710E-02

5.3980E-03 1.6740E-01 5.8970E-02 1.8330E-02 4.4590E-03 3.7360E-02 1.7120E-02

7.8360E-03 2.2500E-03 3.2580E-01 1.2530E-01 2.1610E-02 6.2080E-01 2.8730E-01

8.2220E-02 1.2780E-02 4.5770E-01 1.3900E-01 3.0400E-02 5.4320E-03 1.5010E-01

7.3150E-02 2.3400E-02 7.2700E-03 3.2760E-02 1.4580E-02 5.8020E-03 2.0770E-03

1.8080E-02 1.8940E-02 1.2930E-02 7.2980E-03 5.8960E-02 3.4970E-02 1.7320E-02

6.2010E-03 6.5530E-02 3.3630E-02 1.3990E-02 5.0830E-03 1.3540E+00 7.3210E-02

1.0270E+00 1.8650E+00 1.3290E+00 3.7820E-01 4.6420E-01 5.2670E+00 2.2260E+00

4.2100E-01 4.1680E-02 6.4630E-02 3.3580E-02 2.1880E-02 2.6890E-02 1.0550E-01

6.2720E-02 2.1700E-02 1.0080E-02 1.8940E-02 1.0350E-02 8.7100E-03 1.7180E-01

1.0440E-01 7.5640E-02 2.8510E-01 1.9440E-01 1.8870E-01 8.3430E-02 9.4310E-02

2.1500E-01 1.3060E-01 3.5210E-02 7.3070E-02 4.8220E-02 5.2300E-02 1.7130E-02

1.0570E-02 1.4830E-02 1.1620E-02 6.0160E-03 1.3560E-02 1.4310E-02 9.8320E-03

4.5840E-03 3.4960E-02 2.4180E-02 1.7840E-02 1.0900E-02 2.8630E-02 2.4630E-02

2.2410E-02 1.2830E-02 9.4830E-01 8.5640E-02 9.8020E-01 9.6980E-01 1.0270E+00

3.0060E-03 4.9070E-01 3.3150E+00 1.7730E+00 1.3170E-02 2.2050E-02 4.6200E-02

2.4870E-02 5.6560E-03 2.2120E-02 8.0040E-02 3.4990E-02 3.6560E-03 3.7860E-03

1.5460E-02 9.2350E-03 7.2040E-02 9.9550E-02 6.5090E-02 8.1870E-02 1.8800E-01

1.2050E-01 1.1120E-01 1.0190E-02 8.9190E-02 1.1550E-01 9.9800E-02 2.3380E-02

5.2270E-02 1.9970E-02 3.0470E-02 2.5940E-03 6.9180E-03 9.8710E-03 9.3270E-03

9.0400E-03 1.1240E-02 6.5490E-03 2.8870E-03 1.7310E-02 1.7830E-02 1.5570E-02

7.7890E-03 8.9190E-03 1.9070E-02 1.4100E-02 1.5920E-02 2.5750E-03 9.8190E-02

6.7920E-01 7.5550E-01 2.7900E-04 3.0510E-03 3.4400E-01 2.4400E+00 1.7500E-03

1.3000E-02 1.4800E-02 2.4700E-02 4.2400E-04 5.4670E-03 1.5350E-02 3.8220E-02

9.8430E-06 4.0480E-03 2.9140E-03 8.9850E-03 2.1350E-02 6.2250E-02 3.2950E-02

1.2780E-02 8.3170E-02 1.1100E-01 4.3460E-02 1.7910E-03 9.3530E-03 6.1000E-02

8.6230E-02 7.2700E-03 1.7120E-02 3.0580E-02 7.9960E-03 5.4220E-04 2.2230E-03

4.5910E-03 6.7900E-03 4.5200E-03 5.4320E-03 2.9800E-03 1.3870E-03 6.2010E-03

1.0780E-02 7.7870E-03 4.4140E-03 2.6160E-03 6.8130E-03 1.1720E-02 7.8310E-03

3.1680E+00 2.8680E-01 1.5690E-02 7.8690E+00 2.0220E+00 3.1140E-01 2.2550E-02

4.7600E-01 1.5260E-01 3.1950E-02 5.4340E-03 7.7490E-01 2.5220E-01 5.4740E-02

7.2840E-03 4.0820E-01 1.1710E-01 1.8690E-02 1.4670E-03 4.0990E-01 2.0710E-02

3.2350E-03 5.9110E-01 1.1780E-01 1.4270E-02 7.7220E-04 7.2850E-01 2.4590E-01

5.6280E-02 6.2210E-03 1.3920E-01 4.7070E-02 9.2370E-03 3.0260E-03 8.3000E-02

3.4950E-02 1.3170E-02 3.6910E-03 2.2990E-02 5.9970E-02 1.1720E-02 7.5210E-03

6.2380E-02 2.7980E-02 1.1140E-02 2.2870E-03 9.3830E-02 3.2470E-02 7.6220E-03

1.2760E-03 3.4800E+00 3.5010E-01 1.5480E+00 4.1490E+00 2.1320E+00 3.8200E-01

1.5180E-01 2.1050E-01 1.3830E-01 3.4580E-02 2.0520E-01 3.8000E-01 2.4240E-01

6.4730E-02 7.4320E-02 2.2160E-01 1.2690E-01 2.2720E-02 1.4610E-01 1.8890E-01

1.1960E-02 1.7550E-01 2.8570E-01 1.0290E-01 1.5640E-02 2.4460E-01 3.1770E-01

2.0300E-01 6.6170E-02 5.8530E-02 5.1410E-02 4.1270E-02 6.3570E-03 3.0460E-02

3.8750E-02 2.5570E-02 1.3450E-02 1.8400E-02 2.7740E-02 3.1980E-02 3.7940E-03

3.3250E-02 2.6820E-02 1.4110E-02 9.7760E-03 3.4540E-02 3.5870E-02 2.7490E-02

8.3310E-03 2.6690E+00 1.2590E-01 1.6550E+00 2.6650E+00 1.7170E+00 3.1840E-02

1.3770E-01 1.2580E-01 1.0830E-01 2.9350E-02 1.9380E-01 2.4880E-01 2.0340E-01

1.8430E-03 8.3750E-02 1.4460E-01 1.0340E-01 4.1980E-02 1.3960E-01 7.8760E-02

3.9660E-02 1.5810E-01 1.6410E-01 7.0260E-02 5.6070E-02 2.0150E-01 2.0210E-01

1.6350E-01 1.8210E-02 4.9600E-02 2.4770E-02 2.6950E-02 9.8110E-03 2.1730E-02

2.7740E-02 2.1890E-02 1.3800E-02 1.4670E-02 2.2000E-02 1.1040E-02 1.6210E-02

1.7740E-02 2.0960E-02 8.0570E-03 7.6120E-03 2.7460E-02 2.1350E-02 2.1710E-02

2.4080E-03 1.5160E-01 1.2820E+00 2.6750E+00 5.4340E-03 3.4490E-02 1.0800E-01

1.1990E-01 2.5690E-03 3.4380E-02 1.5640E-01 2.5990E-01 9.4300E-05 2.1030E-03

6.3860E-02 1.5690E-01 9.3970E-03 5.5690E-02 1.0840E-01 5.4200E-03 4.7950E-02

1.2140E-01 1.1530E-01 6.2220E-03 6.6030E-02 1.6200E-01 1.8150E-01 5.8770E-03

1.8090E-02 3.6450E-02 1.8730E-02 2.2180E-03 9.7690E-03 1.7910E-02 2.4280E-02

9.1960E-03 8.8750E-03 8.3290E-03 1.4590E-02 5.5020E-03 1.5050E-02 1.2220E-02

9.4090E-03 1.2730E-03 8.3260E-03 2.1700E-02 2.0820E-02 2.9080E+00 1.1020E-01

4.8670E-03 5.0810E-01 1.2220E-01 2.5380E-02 5.3050E-03 3.3290E-01 8.6650E-02

1.3240E-02 6.0460E-04 2.5630E-01 7.9130E-02 1.9370E-02 2.5540E-03 2.2300E-02

8.6240E-03 1.1040E-03 7.3420E-01 5.5360E-02 1.0800E-02 1.9820E-03 5.0280E-01

1.0400E-01 1.1640E-02 1.3820E-03 6.3760E-02 1.6190E-02 2.3390E-03 6.5710E-04

2.5580E-01 6.1520E-02 9.7710E-03 1.8290E-03 3.9200E-02 3.0790E-02 1.5850E-02

3.4510E-03 8.5820E-02 2.0430E-02 6.6340E-03 5.4980E-04 1.5870E-01 4.6520E-02

1.1280E-02 1.4250E-03 3.5900E+00 1.3180E-01 1.5170E-01 2.6680E-01 1.0740E-01

2.6000E-02 8.6430E-02 1.7150E-01 8.9700E-02 1.5700E-02 6.8940E-02 1.3630E-01

7.1980E-02 2.1910E-02 1.4010E-02 7.0430E-03 5.0290E-03 1.8240E-01 4.3280E-01

4.4420E-02 9.5580E-03 1.3390E-01 2.6440E-01 1.0560E-01 1.2870E-02 2.5440E-02

2.7920E-02 1.4170E-02 1.7410E-03 6.1320E-02 1.4830E-01 6.2600E-02 1.0460E-02

3.2670E-02 2.2430E-02 1.0740E-02 8.5710E-03 3.4620E-02 4.4350E-02 1.0380E-02

6.7990E-03 5.5370E-02 7.7570E-02 3.6390E-02 1.2370E-02 2.7500E+00 3.9770E-02

1.3660E-01 1.8060E-01 8.5220E-02 1.3210E-02 8.9420E-02 1.1660E-01 7.3830E-02

1.4370E-02 6.2210E-02 9.9170E-02 6.3000E-02 7.8270E-03 7.6660E-03 5.3470E-03

4.0890E-02 1.8570E-01 2.7850E-01 3.0160E-02 2.3300E-02 1.3560E-01 1.7220E-01

7.9920E-02 8.0740E-03 2.2060E-02 1.5670E-02 9.6120E-03 9.7510E-03 6.2430E-02

1.1260E-01 5.0690E-02 2.6130E-02 1.4190E-02 1.1350E-02 7.8390E-03 1.3920E-02

2.3040E-02 3.2130E-02 7.0640E-03 1.6740E-02 4.4540E-02 5.4350E-02 3.0150E-02

8.9300E-03 4.2770E-02 1.1250E-01 1.6730E-01 6.0400E-04 1.5690E-02 7.3660E-02

1.2920E-01 1.3940E-03 1.6140E-02 5.3670E-02 1.0770E-01 3.5290E-03 7.9270E-03

4.1740E-03 8.9310E-03 4.7520E-02 1.4750E-01 1.9840E-01 3.0580E-03 2.7390E-02

1.0980E-01 1.6920E-01 2.2540E-03 8.7650E-03 1.7650E-02 1.2910E-02 1.8230E-03

1.0450E-02 5.0580E-02 1.1800E-01 1.9600E-02 7.6930E-03 1.2180E-02 5.1890E-03

3.9190E-03 1.4610E-02 1.8790E-02 1.9660E-02 2.9580E-03 1.8620E-02 3.8200E-02

4.9390E-02 1.8180E+00 6.1400E-02 3.8540E-03 5.8150E+00 1.3930E+00 1.9190E-01

1.2150E-02 1.1650E+01 2.0460E+00 2.3790E-01 1.3890E-02 4.5050E-01 5.6500E-02

1.9430E-02 5.6690E-01 1.8580E-01 3.0620E-02 8.0550E-03 6.0290E-01 1.3410E-01

2.2570E-02 3.2300E-03 1.9010E-01 6.0530E-02 8.1220E-03 2.2900E-03 7.8140E-02

2.8130E-02 8.4260E-03 1.7190E-03 1.8010E-02 2.8380E-02 1.0510E-02 4.5390E-03

4.5480E-02 2.1470E-02 6.9040E-03 1.1600E-03 9.5660E-02 2.8170E-02 7.5090E-03

1.3680E-03 2.2110E+00 7.4420E-02 1.0380E+00 3.1630E+00 1.5110E+00 2.3560E-01

7.7720E-01 7.6960E+00 2.4150E+00 2.9410E-01 1.8590E-01 2.1330E-01 2.7040E-02

2.3220E-01 2.1690E-01 1.6280E-01 2.2840E-02 1.3400E-01 3.1230E-01 1.3010E-01

2.4730E-02 7.7840E-02 7.0990E-02 5.4340E-02 6.5050E-03 1.7480E-02 4.8900E-02

2.5020E-02 9.3730E-03 1.4410E-02 1.6650E-02 1.3840E-02 4.2410E-03 2.4830E-02

1.6690E-02 1.1980E-02 6.4590E-03 2.8160E-02 4.7390E-02 2.2440E-02 8.0390E-03

1.6650E+00 6.5330E-02 1.1450E+00 2.0280E+00 1.2070E+00 5.2880E-03 9.1830E-01

5.5310E+00 1.9190E+00 7.2820E-02 1.5680E-01 8.7080E-02 6.6530E-02 1.9780E-01

1.0030E-01 1.0830E-01 2.2560E-02 1.3000E-01 1.9780E-01 1.0070E-01 2.1140E-02

6.6230E-02 3.1470E-02 3.6240E-02 4.6720E-03 1.7820E-02 3.4160E-02 2.1730E-02

1.0810E-02 1.0110E-02 1.0480E-02 5.6220E-03 1.0690E-02 1.4100E-02 1.2810E-02

7.3960E-03 7.5080E-03 2.2440E-02 3.1040E-02 1.7810E-02 1.0160E-03 7.8640E-02

8.7850E-01 2.0170E+00 4.7120E-04 5.8440E-03 6.9240E-01 4.9310E+00 2.9520E-02

6.8760E-02 1.1130E-01 1.7840E-02 6.9550E-02 1.4780E-01 8.2420E-02 3.2300E-03

2.4710E-02 1.0060E-01 1.7720E-01 5.0040E-03 2.1100E-02 4.9580E-02 2.7370E-02

8.9760E-04 5.4810E-03 1.6740E-02 3.2090E-02 7.2050E-03 5.6770E-03 5.9370E-03

5.5190E-03 3.1320E-03 1.0740E-02 1.0210E-02 5.8040E-03 1.3680E-03 8.0390E-03

1.7810E-02 2.5840E-02 3.6390E+00 2.4720E-01 1.2800E-02 6.9260E+00 1.5920E+00

2.9970E-01 1.4290E-02 7.8520E-02 4.3590E-02 1.2140E-02 2.6650E-01 1.8410E-02

4.2110E-03 7.2820E-04 7.0630E-01 1.6470E-01 3.6500E-02 7.8850E-03 1.0930E-01

1.4860E-02 4.1070E-03 6.9260E-04 2.4850E-01 6.3270E-02 1.0780E-02 1.4590E-03

5.2360E-03 2.7390E-02 6.0970E-03 4.0640E-04 1.0120E-01 2.2200E-02 7.8090E-03

1.2970E-03 1.8830E-01 6.1620E-02 4.7720E-03 3.7920E-04 4.2810E+00 2.9640E-01

1.2380E+00 7.4060E+00 2.9370E+00 3.5720E-01 5.8790E-02 2.9570E-02 2.2400E-02

6.2120E-02 1.6080E-01 1.3320E-02 3.7880E-03 2.0560E-01 3.8100E-01 1.4080E-01

3.7190E-02 3.2420E-02 6.0860E-02 9.7590E-03 3.4840E-03 6.3810E-02 1.3360E-01

6.1270E-02 1.2120E-02 4.3620E-03 1.4580E-02 1.0160E-02 3.6730E-03 3.9270E-02

5.3060E-02 1.1840E-02 7.1100E-03 7.9250E-02 1.4480E-01 6.6860E-02 5.4190E-03

3.3340E+00 1.3860E-01 2.3730E+00 5.3530E+00 2.3600E+00 3.9830E-02 3.0010E-02

1.9370E-02 1.4130E-02 6.3360E-02 1.0480E-01 9.0190E-03 5.5760E-02 1.8230E-01

2.6240E-01 1.1220E-01 1.0140E-02 2.9000E-02 3.9800E-02 6.5250E-03 1.0670E-02

6.1170E-02 9.3580E-02 5.0800E-02 3.4900E-03 6.7040E-03 9.9240E-03 6.0970E-03

1.5460E-02 2.7760E-02 3.7760E-02 7.7050E-03 1.2070E-02 8.4020E-02 8.9420E-02

5.1370E-02 3.6530E-04 1.6480E-01 1.8680E+00 5.6350E+00 2.3620E-02 3.0240E-02

1.2660E-02 3.2110E-03 1.6340E-02 5.0340E-02 7.3530E-02 1.3060E-02 5.9350E-02

1.5040E-01 2.3600E-01 2.9110E-03 1.0670E-02 2.3100E-02 2.7470E-02 1.4510E-03

1.2100E-02 5.0740E-02 9.7590E-02 2.6170E-03 2.3870E-03 7.8230E-03 6.7760E-03

5.1670E-03 1.5580E-02 2.2140E-02 2.3140E-02 1.1510E-03 1.4470E-02 6.7320E-02

9.5540E-02 1.4550E+00 1.0780E-01 4.6690E-03 1.6550E-02 1.9990E-03 1.0480E-04

7.1190E-02 2.4510E-02 7.7000E-03 1.7200E-04 1.9620E+00 1.4470E-01 2.0150E-02

2.6120E-03 3.1550E-02 7.8720E-03 1.2310E-03 1.4620E-04 5.2680E-01 9.1240E-02

1.0760E-02 1.0890E-03 3.8680E-04 2.4890E-02 3.5720E-03 1.5500E-04 3.6180E-02

7.7660E-03 6.6370E-04 5.1590E-05 2.9080E-01 2.2710E-02 3.9920E-03 2.4780E-04

2.8010E+00 1.2540E-01 8.1720E-03 6.6340E-03 1.1980E-03 3.6500E-02 3.4790E-02

1.1860E-02 8.3440E-03 3.6090E-01 1.3060E+00 1.3490E-01 2.1650E-02 1.3610E-02

1.3980E-02 6.2900E-03 1.1500E-03 1.1130E-01 3.0050E-01 9.7240E-02 1.2570E-02

3.3150E-04 1.2750E-02 9.6130E-03 2.1730E-03 1.5000E-02 1.5740E-02 6.8100E-03

6.4700E-04 5.1350E-02 1.6810E-01 2.0040E-02 4.4880E-03 3.3320E+00 3.5120E-03

6.4750E-03 3.3720E-03 1.7430E-02 2.1810E-02 2.5980E-02 8.7390E-03 6.1510E-02

3.9160E-01 9.5880E-01 1.0800E-01 4.7500E-03 1.1230E-02 8.7430E-03 4.4140E-03

1.7670E-02 1.1850E-01 2.2140E-01 7.8220E-02 2.7630E-04 5.6590E-03 9.6100E-03

5.2650E-03 4.6860E-03 1.3040E-02 9.3070E-03 4.7900E-03 1.0090E-02 5.2590E-02

1.2430E-01 1.6480E-02 1.1320E-03 4.4380E-03 5.0880E-03 5.1100E-03 1.9280E-02

1.9510E-02 1.5290E-02 9.0170E-03 7.1630E-02 3.2100E-01 8.1360E-01 1.2700E-03

5.5870E-03 9.4610E-03 7.1550E-03 2.0830E-03 2.0340E-02 9.7840E-02 2.2960E-01

2.2100E-04 1.7910E-03 7.1460E-03 7.4070E-03 9.9620E-04 5.6390E-03 1.0960E-02

8.1640E-03 1.4060E-03 1.1800E-02 4.3460E-02 1.0990E-01 6.3780E-01 4.2730E-02

2.3590E+00 1.1330E+00 3.8420E-01 6.7020E-02 7.6380E+00 2.6840E+00 7.2590E-01

1.2770E-01 5.3410E-02 3.0170E-02 1.4540E-02 5.6110E-03 2.0640E-02 1.4850E-02

8.9130E-03 4.3060E-03 3.2190E-02 1.0750E-01 9.1140E-02 5.5780E-02 9.1120E-02

5.4420E-02 3.0810E-02 1.4000E-02 4.1120E-02 2.5970E-02 1.7450E-02 1.1400E-02

5.3930E-01 7.6460E-01 6.9790E-01 7.0630E-01 4.6190E-01 3.1480E-01 3.5230E+00

2.6100E+00 1.0310E+00 2.2720E-02 2.0490E-02 1.6520E-02 9.3070E-03 1.0940E-02

5.8300E-03 7.1510E-03 9.0140E-03 2.1460E-02 9.1140E-02 6.0530E-02 1.8220E-02

4.3050E-02 4.0440E-02 2.9100E-02 1.4020E-02 1.7780E-02 2.2130E-02 1.5810E-02

8.2350E-03 3.0670E-02 5.3620E-01 4.8820E-01 2.6040E-01 1.9300E-02 1.9920E-01

1.4730E+00 2.0470E+00 6.3060E-03 1.1660E-02 1.0320E-02 5.8170E-03 1.1870E-03

6.4180E-03 5.4620E-03 3.1590E-03 1.0730E-02 5.5770E-02 1.8280E-02 1.0750E-02

1.8100E-02 1.8560E-02 1.6630E-02 9.8130E-03 9.6210E-03 6.7270E-03 7.9730E-03

7.7770E-03 2.9350E+00 4.5430E-01 3.1660E-02 8.0390E+00 2.9310E+00 6.4260E-01

7.5180E-02 1.0970E-01 5.4560E-02 1.5840E-02 2.7330E-03 6.1790E-02 3.2260E-02

1.5330E-02 5.5600E-03 1.7160E-01 1.3640E-01 3.8540E-02 1.6110E-02 1.3990E-01

7.2700E-02 2.8080E-02 1.0420E-02 1.3080E-01 5.2620E-02 1.4360E-02 2.1400E-03

2.6190E+00 5.3550E-01 2.2010E+00 3.1300E+00 2.6700E+00 7.9690E-01 5.4550E-02

3.1080E-02 3.7720E-02 1.3830E-02 2.4630E-02 2.4930E-02 2.1330E-02 1.4510E-02

1.2840E-01 6.2050E-02 6.5950E-02 1.6650E-02 7.2700E-02 4.8000E-02 4.8830E-02

1.7390E-02 4.1550E-02 4.9360E-02 4.2380E-02 1.7130E-02 1.7460E+00 1.8620E-01

2.1070E+00 1.5200E+00 2.0610E+00 1.5840E-02 3.7710E-02 1.5850E-02 2.1790E-02

7.3590E-03 1.5680E-02 1.6750E-02 1.6550E-02 8.5570E-02 2.9010E-02 4.0350E-02

2.6350E-02 2.8090E-02 4.8830E-02 2.1010E-02 2.6830E-02 6.0890E-03 3.3800E-02

2.7760E-02 3.2790E-02 8.5810E-03 2.0680E-01 1.4580E+00 1.2640E+00 2.7320E-03

1.3820E-02 2.1790E-02 5.6420E-03 1.2320E-03 6.2140E-03 9.9810E-03 1.0260E-02

4.2750E-02 1.2480E-02 1.4960E-02 2.0370E-02 1.0410E-02 1.7390E-02 2.6830E-02

7.6440E-03 3.1110E-04 6.8090E-03 2.2840E-02 1.9580E-02 2.8890E+00 2.0720E-01

1.1260E-02 1.7230E-01 6.6010E-02 1.6160E-02 4.1280E-03 1.2490E-01 6.0400E-02

1.8380E-02 4.3420E-03 3.7160E-02 3.6340E-01 3.5980E-02 5.2910E-03 3.8350E-01

1.1940E-01 1.5120E-02 3.9030E-03 1.1880E-01 5.9800E-02 2.1010E-02 3.7790E-03

3.2870E+00 2.5260E-01 7.9680E-02 6.3180E-02 5.0540E-02 1.2700E-02 5.4070E-02

4.8230E-02 4.3750E-02 1.9660E-02 2.9730E-02 1.4170E-01 1.6110E-01 2.0850E-02

1.5550E-01 1.3830E-01 1.1150E-01 1.1880E-02 5.9740E-02 4.0000E-02 3.6930E-02

2.2910E-02 2.5060E+00 2.8060E-02 6.0070E-02 3.3840E-02 3.2720E-02 1.2240E-02

3.9050E-02 2.9050E-02 3.7280E-02 2.2300E-02 4.7420E-02 1.2370E-01 7.1540E-02

3.9070E-02 1.3400E-01 5.8910E-02 7.7560E-02 2.1000E-02 3.6920E-02 3.0290E-02

3.0750E-02 8.8290E-03 2.7420E-02 4.3990E-02 2.2930E-02 2.5820E-03 1.2460E-02

3.1810E-02 3.3020E-02 1.4870E-02 1.3590E-02 5.7200E-02 9.1110E-02 8.9330E-03

4.2380E-02 1.0420E-01 5.3620E-02 3.7790E-03 2.2910E-02 3.0740E-02 2.2350E-02

1.7130E+00 2.7790E-01 8.5570E-02 6.3680E+00 1.6100E+00 3.3410E-01 5.8830E-02

1.1750E+00 2.0940E+00 1.1700E+00 9.6450E-02 1.7730E+00 5.7410E-01 1.0140E-01

6.2390E-03 2.2560E+00 6.9310E-01 1.3960E-01 1.7310E-02 1.5990E+00 2.0350E-01

5.1330E-01 3.6270E+00 1.6710E+00 3.8940E-01 8.7930E-01 1.3940E+00 3.4010E-01

7.8140E-01 5.7140E-01 6.7210E-01 4.7780E-01 1.2070E-01 4.6740E-01 1.0330E+00

6.6090E-01 1.7220E-01 1.0620E+00 4.6430E-02 4.5890E-01 2.2530E+00 1.3190E+00

5.8540E-01 5.8270E-01 6.7500E-01 4.2440E-01 1.0070E-01 4.7620E-01 3.3890E-01

3.1230E-01 3.7590E-02 4.5890E-01 5.5180E-01 5.0880E-01 1.3030E-02 3.4350E-02

3.1050E-01 1.6800E+00 2.9250E-01 1.3440E-01 6.0930E-01 9.3320E-02 6.2390E-03

1.2010E-01 3.1200E-01 1.7580E-01 3.4210E-03 4.0250E-02 3.1880E-01 4.1760E-01

3.7550E+00 2.8700E-01 3.0940E-02 1.1840E-01 7.8030E-02 2.7950E-02 5.9020E-03

5.1430E+00 2.3930E-01 5.6390E-03 1.2060E-03 1.0580E+01 2.0840E+00 1.7510E-01

7.5780E-03 4.3850E+00 3.2980E-01 9.8640E-02 4.8460E-02 2.9200E-02 1.5070E-02

1.1390E+00 3.0940E+00 2.4560E-01 4.7370E-03 2.7180E+00 5.5290E+00 2.2230E+00

2.0470E-01 3.4170E+00 7.8910E-02 2.7620E-02 2.9090E-02 1.8040E-02 1.8350E-01

1.2790E+00 1.9580E+00 1.7140E-01 4.1900E-01 2.8730E+00 3.5420E+00 1.7180E+00

5.9170E-02 1.4070E-02 2.5200E-02 1.6450E-02 1.7840E-02 2.3790E-01 1.0160E+00

1.4310E+00 3.4670E-02 5.1220E-01 2.3090E+00 3.5670E+00 6.3400E-01 4.2270E-01

2.1130E-01 2.0930E+00 1.5730E+00 1.0510E+00 5.2620E-01 1.8800E-02 1.5040E-02

1.1280E-02 7.5190E-03 2.2280E+00 1.0440E+00 4.4070E+00 3.0080E+00 1.2230E+00

2.4630E-01 3.6870E-01 1.5090E-01 6.2320E-02 2.9210E-02 8.2720E-01 2.5650E+00

5.2630E-01 1.4390E+00 1.3780E+00 4.4790E-02 1.8010E-01 1.3000E-01 5.2390E-02

1.3460E-01 1.7690E+00 9.0460E-01 1.4310E-01 2.1790E-02 1.8380E-02 7.0040E-02

9.3260E-02 2.1910E+00 2.8130E-01 3.3040E-02 2.0130E+00 6.7080E-01 1.8150E-01

4.6120E-02 2.0920E+00 3.0760E-01 4.8170E-01 9.3060E-01 5.8700E-01 1.8920E-01

1.4130E+00 8.3650E-02 4.1540E-01 5.2050E-01 4.4080E-01 1.9420E-02 6.7360E-02

2.7640E-01 3.6500E-01 4.2660E+00 4.2640E-01 2.3730E-02 4.6250E+00 5.2050E-01

3.5600E+00

30000.00

5.4020E+00 1.7300E+00 7.4970E-01 3.0820E-01 2.4760E+00 1.0320E+00 3.2280E-01

8.5080E-02 7.5470E+00 6.3490E-01 2.2190E-01 7.6650E-02 8.5370E-01 4.6720E-01

3.8510E-02 2.8290E-01 8.5670E-02 7.5870E-03 6.4690E-01 3.1870E-01 9.8110E-02

1.7270E-02 4.3460E-01 2.1650E-01 1.1420E-01 3.8880E-02 4.6950E-01 2.3160E-01

8.4750E-02 1.9600E-02 2.9160E-01 1.6100E-01 7.7470E-02 3.9570E-02 2.8370E+01

7.3260E+00 4.3780E-01 1.5790E-01 5.8140E-02 3.4190E+01 5.9300E+00 6.2340E-01

5.4650E-02 2.3050E-02 1.0750E-02 1.5780E+01 1.6830E-01 4.0590E-02 1.3200E+00

2.3580E-01 8.6170E-03 1.7880E-03 2.1250E+00 2.7010E-01 2.8720E-02 9.6210E-03

8.0870E-01 1.3440E-02 7.1210E-03 1.4920E-01 1.1000E-01 4.7800E-02 1.1200E-02

8.5030E-02 5.7790E-02 2.4160E-02 8.8880E-03 2.3060E-02 7.3060E-03 2.3080E-03

7.2520E-02 3.5550E-02 1.3070E-02 3.6530E-03 2.9360E-02 1.8140E-02 7.9310E-03

1.9240E-03 7.0730E-02 3.9790E-02 1.3530E-02 2.4320E-03 5.2160E-02 2.0970E-02

4.8030E-03 5.2590E-04 3.9060E-02 1.5440E-02 6.0210E-03 1.7530E-03 3.4400E-02

1.1330E-02 3.4400E-03 1.0810E-03 5.7270E-02 2.6080E-02 1.1260E-02 3.8810E-03

7.5940E-02 2.8410E-02 7.4960E-03 1.1150E-03 4.9170E-02 1.5410E-02 3.8330E-03

6.9510E-04 5.0150E-02 2.3600E-02 8.6370E-03 1.8810E-03 3.7760E-02 1.3340E-02

6.3290E-03 3.2320E-02 2.0690E-02 7.3770E-03 1.6130E-03 2.9490E-02 1.6530E-02

1.0120E-02 7.0880E-03 1.3570E-02 1.0080E-02 3.8590E-03 9.1220E-04 1.1270E-02

8.7140E-03 4.6520E-03 1.5090E-03 2.0410E-02 9.7490E-03 7.7030E-03 4.4540E-03

1.5330E-02 1.0370E-02 5.5640E-03 2.5170E-03 1.9760E-02 1.3590E-02 6.2030E-03

1.8260E-03 5.3100E+00 1.4960E+00 4.9630E-01 1.1240E+00 1.0020E+00 7.2930E-01

2.9230E-01 1.9310E+00 4.5010E+00 4.1260E-01 1.3510E-01 6.2130E-01 2.0840E-01

2.6410E-01 1.5970E-01 9.3650E-02 4.8510E-02 2.8730E-01 2.3090E-01 2.4700E-01

1.0190E-01 2.2500E-01 2.3010E-01 1.0160E-01 9.5250E-02 2.0340E-01 2.3030E-01

1.5570E-01 8.3330E-02 1.8360E-01 1.3790E-01 1.0970E-01 2.9300E-02 6.7600E+00

1.2860E+01 9.4130E+00 4.4450E-01 1.1720E-01 4.7900E-01 2.3330E+01 8.3400E+00

1.2610E+00 6.7060E-02 1.1940E-02 4.5870E+00 8.0650E+00 1.0430E-01 4.3630E-01

5.8500E-01 2.2610E-01 6.8740E-03 4.1300E-01 1.2350E+00 2.7440E-01 2.4140E-02

3.0650E-01 3.5190E-01 5.2180E-03 1.1100E-01 4.2490E-02 5.6080E-02 4.4670E-02

6.8450E-02 3.9830E-02 2.4710E-02 7.1110E-03 1.3220E-02 9.4290E-03 3.4690E-03

3.4560E-02 2.8220E-02 2.4640E-02 1.2410E-02 1.7990E-02 1.0490E-02 1.1010E-02

7.9250E-03 3.4770E-02 2.2350E-02 3.0010E-02 1.4100E-02 2.6720E-02 1.7740E-02

1.3780E-02 4.4600E-03 1.9780E-02 1.7260E-02 8.5580E-03 4.1170E-03 1.2960E-02

1.5820E-02 8.5840E-03 2.9600E-03 2.5410E-02 2.6480E-02 1.6760E-02 1.0150E-02

3.1650E-02 3.0720E-02 2.0570E-02 7.5790E-03 1.5240E-02 2.3480E-02 1.2650E-02

3.9190E-03 2.1340E-02 2.0770E-02 1.6620E-02 8.7230E-03 2.2700E-02 1.8070E-02

5.5020E-03 2.2930E-02 9.7680E-03 1.1120E-02 5.7720E-03 1.7240E-02 1.5850E-02

1.2190E-02 5.0870E-03 1.0780E-02 3.9420E-03 5.1290E-03 2.9270E-03 8.3770E-03

4.0490E-03 4.2350E-03 4.2630E-03 1.6320E-02 8.5790E-03 6.1050E-03 2.8410E-03

1.1340E-02 7.0700E-03 5.9930E-03 2.5430E-03 1.3810E-02 6.7100E-03 7.1260E-03

5.4520E-03 4.0420E+00 9.6740E-01 4.2390E-01 7.8170E-01 6.3840E-01 5.2030E-01

4.9620E-01 2.0690E+00 2.4670E+00 2.2250E-01 3.5740E-01 2.4280E-01 2.2100E-01

7.9200E-02 8.9340E-02 5.8180E-02 8.2170E-02 2.1410E-01 1.5640E-01 1.9840E-01

1.2350E-01 1.2220E-01 1.6670E-01 8.0230E-02 8.0100E-02 1.5230E-01 1.6010E-01

1.2660E-01 1.0910E-01 1.2410E-01 6.3790E-02 5.0090E-02 3.1160E-01 9.1360E+00

4.1360E+00 8.5020E+00 3.1780E-01 5.6230E-02 4.9970E-01 1.4800E+01 8.3330E+00

1.6450E+00 6.6640E-02 8.3500E-01 5.7300E+00 2.9880E+00 1.0610E-01 4.0400E-01

2.9840E-01 1.3110E-01 5.4250E-02 4.9370E-01 7.3670E-01 1.7520E-01 9.7580E-02

2.8580E-01 1.1430E-01 5.6360E-02 5.0010E-02 3.8580E-02 4.6000E-02 4.9610E-02

3.1730E-02 1.8430E-02 5.3330E-03 7.3060E-03 7.9840E-03 4.2960E-03 1.2960E-02

2.3060E-02 1.9360E-02 1.9490E-02 6.6500E-03 9.5660E-03 8.1650E-03 1.0250E-02

9.9640E-03 2.4870E-02 1.5850E-02 2.5240E-02 1.1010E-02 1.6450E-02 1.1290E-02

8.3630E-03 9.7900E-03 1.2190E-02 1.0560E-02 4.7440E-03 4.5020E-03 1.0170E-02

9.7620E-03 5.9430E-03 1.0730E-02 1.6510E-02 1.8420E-02 1.3430E-02 1.0530E-02

2.2910E-02 1.9580E-02 1.5020E-02 3.8150E-03 1.3040E-02 1.5160E-02 9.4270E-03

7.1550E-03 1.4730E-02 1.4720E-02 1.3990E-02 1.3920E-02 1.4200E-02 6.6500E-03

1.2320E-02 1.0730E-02 7.6420E-03 6.5040E-03 1.0600E-02 1.2600E-02 8.2810E-03

6.3380E-03 6.0910E-03 4.6120E-03 3.3550E-03 2.9530E-03 4.4400E-03 3.7800E-03

3.5320E-03 3.9420E-03 1.2280E-02 6.9910E-03 4.2760E-03 1.8770E-03 7.3640E-03

6.3220E-03 3.7850E-03 2.7340E-03 7.1720E-03 6.6390E-03 5.4230E-03 5.5900E-03

2.4370E+00 1.3390E-01 4.2090E-01 5.2250E-01 4.9880E-01 1.7400E-01 5.4060E-01

1.7090E+00 1.0770E+00 1.6240E-01 2.6860E-01 1.1680E-01 3.2670E-02 7.0430E-02

4.7920E-02 1.2530E-02 1.0540E-01 1.3730E-01 1.7860E-01 5.5710E-02 8.2140E-02

1.1050E-01 8.0460E-02 2.3190E-02 7.9180E-02 1.1890E-01 1.2650E-01 6.4610E-02

7.3420E-02 5.5700E-02 3.8110E-02 8.7400E-02 4.1120E-01 8.3350E+00 6.8160E-01

5.4740E+00 2.6710E-02 4.4430E-02 3.6960E-01 8.3890E+00 6.7220E+00 1.4850E+00

4.9610E-02 1.9260E+00 4.3870E+00 1.6190E-02 1.5750E-01 2.5790E-01 1.9130E-01

1.0120E-02 8.1870E-02 4.3910E-01 4.3630E-01 2.5690E-02 1.3780E-01 1.6830E-01

2.0100E-02 4.5020E-02 3.6120E-02 2.6060E-02 3.1620E-02 2.4020E-02 1.0940E-02

3.5560E-03 3.7880E-03 5.3380E-03 3.9340E-03 3.8360E-03 1.2810E-02 1.5950E-02

1.7310E-02 1.7260E-03 6.4420E-03 7.1930E-03 7.6480E-03 1.2890E-03 1.3000E-02

1.5390E-02 2.0900E-02 3.4560E-03 1.0730E-02 1.0280E-02 6.8750E-03 4.4200E-03

7.4760E-03 8.1630E-03 4.8350E-03 1.5100E-03 4.4760E-03 7.1770E-03 6.9370E-03

3.9650E-03 8.9600E-03 1.3140E-02 1.3340E-02 2.5630E-03 1.1500E-02 1.5790E-02

1.5350E-02 7.6170E-04 4.5890E-03 1.0190E-02 1.2030E-02 1.6320E-03 7.4470E-03

1.1210E-02 1.3410E-02 8.1770E-03 8.4680E-03 6.4060E-03 5.2010E-03 9.3990E-03

6.5460E-03 3.6840E-03 6.8390E-03 6.7350E-03 6.1840E-03 5.5340E-03 2.7160E-03

4.4330E-03 2.7840E-03 1.4180E-03 1.6730E-03 3.3230E-03 3.0770E-03 2.3910E-03

8.1620E-03 4.9620E-03 2.6090E-03 1.1920E-03 4.4080E-03 4.4390E-03 2.9680E-03

1.7120E-03 2.8180E-03 5.5240E-03 4.7240E-03 3.4830E-03 3.5610E-02 1.4340E-01

3.2010E-01 2.8950E-01 6.6840E-02 1.2970E-01 4.4040E-01 1.1110E+00 5.2930E-02

1.7840E-01 4.1070E-02 1.0210E-02 3.8640E-02 2.6510E-02 9.3510E-04 1.9270E-02

1.0110E-01 9.5650E-02 1.7020E-02 5.4050E-02 3.5810E-02 5.7560E-02 3.6940E-03

3.1220E-02 6.0440E-02 7.8310E-02 3.1650E-02 2.6510E-02 4.1700E-02 1.6070E-02

2.4160E-02 1.1710E-01 3.1720E-01 5.4410E+00 1.6610E+00 1.2800E-02 1.1880E-02

2.5810E-02 2.0420E-01 3.7480E+00 4.5390E+00 1.6240E-02 5.3960E-02 3.1100E+00

1.8340E-03 2.6740E-02 1.4680E-01 1.3570E-01 4.7390E-03 4.9830E-03 8.2170E-02

3.9110E-01 5.7920E-03 4.0420E-02 1.1970E-01 4.1660E-03 2.4840E-02 2.6020E-02

8.3770E-03 1.5340E-02 1.3130E-02 4.8640E-03 1.7780E-03 1.6160E-03 2.5890E-03

2.3370E-03 9.0440E-04 4.3740E-03 1.0160E-02 9.5320E-03 1.9830E-04 2.4740E-03

5.2110E-03 3.7640E-03 5.2770E-06 2.1800E-03 1.2820E-02 1.0310E-02 7.2620E-04

4.6370E-03 6.9980E-03 3.3300E-03 1.6040E-03 3.6780E-03 3.9650E-03 3.1890E-03

4.8620E-04 1.4130E-03 3.5040E-03 4.7010E-03 1.1040E-03 4.0490E-03 6.0950E-03

8.4510E-03 3.5560E-04 3.7120E-03 9.1960E-03 9.4820E-03 1.1860E-04 1.0400E-03

4.1460E-03 8.4320E-03 1.6830E-04 2.3900E-03 6.3040E-03 7.9520E-03 3.8840E-03

3.6820E-03 3.9310E-03 1.6220E-03 5.2100E-03 4.5500E-03 1.0630E-03 3.5800E-03

2.2660E-03 3.7500E-03 3.0500E-03 8.9260E-04 2.6130E-03 1.9090E-03 2.6750E-04

3.8480E-04 1.9310E-03 1.9420E-03 9.7370E-04 4.0810E-03 2.5780E-03 1.2130E-03

5.8950E-04 2.0570E-03 2.1080E-03 1.9700E-03 6.2430E-04 7.7070E-04 3.0010E-03

3.1230E-03 1.3810E-03 9.0720E+00 2.6840E+00 9.6560E-01 2.1950E+00 7.9830E-01

1.9230E-01 4.0770E-02 1.3090E+00 5.0260E-01 1.7120E-01 6.2210E-01 1.3340E-01

3.6530E-02 1.7100E+00 6.0550E-01 1.6420E-01 4.0970E-02 1.7860E+00 5.4110E-01

1.6140E-01 4.7620E-02 1.2760E+00 5.1960E-01 1.6820E-01 5.1480E-02 9.8220E-01

4.4090E-01 1.8880E-01 7.1740E-02 7.0580E-01 3.0860E-01 1.1330E-01 3.5620E-02

7.7640E-03 6.7750E-01 3.3820E-01 1.4440E-01 5.0170E-02 1.3530E-02 2.6320E-03

2.5050E-01 1.0430E-01 2.1650E-02 9.7120E+00 3.4620E-01 1.0460E-01 2.5040E-02

4.8530E+00 7.2190E-01 1.2320E-01 3.5660E-02 4.1540E-01 1.6120E-01 2.7710E-02

1.2250E+00 5.5230E-01 2.7340E-01 1.5330E-01 8.3140E-02 3.7590E-02 1.5620E-02

1.1620E-01 1.6290E-01 9.8210E-02 1.4110E-02 3.9770E+00 4.2250E-01 3.6280E-02

4.5270E-03 2.0790E-01 9.7280E-02 2.4080E-02 3.0600E-03 2.4070E-01 1.7230E-01

3.1690E-02 3.0630E-03 1.8470E+00 4.2420E-02 8.1820E-03 1.1660E-03 8.0140E-01

2.6380E-02 5.9250E-03 1.6180E-03 9.4120E-01 1.3000E-01 1.6050E-02 2.5400E-03

1.4310E+00 1.6720E-01 2.3680E-02 3.5350E-03 3.2080E+00 4.2380E-01 1.8700E-02

2.8960E-03 8.3830E-01 1.1680E-01 2.4930E-02 3.4470E-03 2.7860E-01 1.0110E-01

2.5740E-02 3.1160E-03 3.0790E-02 1.2690E-02 2.5050E-03 3.2260E-01 3.3370E-02

1.1330E-02 2.2670E-03 5.7240E-02 2.0550E-02 6.6070E-03 1.4070E-03 1.2080E-01

1.6170E-02 4.2260E-03 7.7270E-04 7.4400E-02 2.3960E-02 7.0740E-03 1.1800E-03

2.4630E-02 8.7510E-03 4.9860E-03 8.0200E-04 8.0500E-02 8.6450E-03 2.1220E-03

3.6160E-04 1.7210E-01 3.2710E-02 5.5250E-03 9.6300E-04 9.5220E+00 2.6020E+00

9.6960E-01 8.9280E-01 5.9320E-01 1.6660E-01 7.7880E-01 5.7350E-01 2.4050E-01

2.9750E-01 2.6890E-01 6.9380E-02 4.3560E-01 8.7390E-01 5.7950E-01 1.7670E-01

5.3470E-01 9.3730E-01 4.4230E-01 1.5220E-01 4.2370E-01 6.4790E-01 4.3560E-01

1.6850E-01 5.0060E-01 4.7880E-01 2.6920E-01 1.1130E-01 2.5690E-01 3.4440E-01

2.1820E-01 1.0800E-01 4.2560E-02 2.4570E-01 2.5860E-01 2.2910E-01 1.5200E-01

7.4060E-02 2.4220E-02 1.3670E-01 9.3460E-02 7.0660E-02 1.4260E+00 6.4070E+00

2.3110E-01 8.4990E-02 7.2210E-01 2.9880E+00 7.3110E-01 1.1790E-01 2.4940E-01

1.4200E-01 9.2690E-02 5.5220E-01 6.2820E-01 4.0470E-01 1.7810E-01 5.3730E-02

3.8790E-02 1.6710E-02 9.2980E-02 1.2270E-01 3.9520E-02 5.7970E-02 1.0350E-01

2.8190E+00 5.0920E-01 4.2380E-02 6.7770E-02 1.5290E-01 9.0940E-02 2.8340E-02

9.7190E-02 3.0300E-01 1.8590E-01 3.8110E-02 2.4880E-01 1.2280E+00 3.2010E-02

7.8060E-03 1.3080E-01 5.2610E-01 1.9810E-02 4.6500E-03 1.2980E-01 5.8700E-01

1.3700E-01 1.7750E-02 7.1600E-02 9.7740E-01 1.8360E-01 2.7190E-02 3.5000E-01

2.5730E+00 4.1750E-01 2.0770E-02 6.9750E-02 5.7620E-01 1.1910E-01 2.8860E-02

7.3860E-02 1.2900E-01 9.2030E-02 3.0440E-02 1.9010E-02 1.0900E-02 7.0450E-03

6.6010E-02 1.9890E-01 1.8820E-02 9.9810E-03 2.0550E-02 2.7590E-02 1.4380E-02

6.8900E-03 2.8580E-02 7.0000E-02 1.1260E-02 3.7340E-03 1.9770E-02 3.8890E-02

1.9500E-02 7.9990E-03 1.9700E-02 6.3180E-03 2.4410E-03 2.8800E-03 1.7350E-02

4.8020E-02 6.1760E-03 1.9340E-03 3.0870E-02 1.0150E-01 3.1390E-02 6.0190E-03

7.4270E+00 3.4290E-01 7.2880E-01 5.2330E-01 3.8410E-01 4.4840E-01 4.7270E-01

2.7550E-01 1.3390E-01 2.1570E-01 1.2650E-01 7.2830E-02 4.1790E-01 5.8250E-01

4.8620E-01 1.5890E-01 4.3730E-01 6.2180E-01 3.4060E-01 1.1910E-01 3.6290E-01

4.3630E-01 3.5880E-01 2.5650E-01 3.3640E-01 2.8730E-01 1.4720E-01 8.4980E-02

1.8570E-01 2.2470E-01 1.6560E-01 7.7710E-02 5.0890E-02 1.7680E-01 1.6900E-01

1.4820E-01 1.2050E-01 7.0320E-02 6.1370E-02 8.5460E-02 7.8550E-02 2.1610E-01

1.5760E+00 4.1760E+00 1.4440E-01 1.2270E-01 7.2780E-01 2.0020E+00 5.5450E-01

1.2860E-01 1.4100E-01 9.3710E-02 2.7340E-01 4.0470E-01 3.7580E-01 2.6860E-01

3.4000E-02 3.0780E-02 1.6710E-02 6.9750E-02 6.9840E-02 5.4310E-02 4.0900E-02

1.5080E-02 1.0340E-01 2.6970E+00 3.9390E-01 9.9070E-03 6.2790E-02 1.0560E-01

7.7680E-02 1.5880E-03 1.1110E-01 2.0180E-01 1.5350E-01 2.5790E-02 2.9150E-01

7.9880E-01 2.1290E-02 1.5390E-02 1.3160E-01 3.3950E-01 1.2830E-02 1.5970E-02

1.3690E-01 3.9600E-01 1.0500E-01 1.3120E-02 6.3890E-02 7.2190E-01 1.4520E-01

1.8360E-02 4.1630E-01 1.7370E+00 3.1430E-01 1.5860E-02 5.5410E-02 4.2630E-01

9.7540E-02 1.0700E-02 6.7500E-02 8.5890E-02 7.9420E-02 1.0230E-02 1.0590E-02

6.9030E-03 1.8570E-02 5.7550E-02 1.3190E-01 1.1890E-02 6.6050E-03 1.4380E-02

1.9100E-02 1.1560E-02 7.6080E-03 2.4520E-02 4.5060E-02 7.2290E-03 4.8740E-03

1.5570E-02 2.7570E-02 1.6710E-02 1.4780E-02 3.5590E-03 2.9680E-03 2.1210E-03

3.9860E-03 1.6270E-02 3.0860E-02 4.0340E-03 5.5200E-03 3.1360E-02 6.8260E-02

2.4260E-02 9.7350E-02 3.4580E-01 5.4130E-01 3.3460E-01 2.3920E-01 3.1750E-01

2.4150E-01 5.7930E-02 1.2210E-01 1.3570E-01 1.8780E-02 6.9200E-02 3.2910E-01

6.2610E-01 4.7440E-02 1.5150E-01 3.3970E-01 5.0380E-01 3.3480E-02 1.1190E-01

2.8840E-01 4.1460E-01 1.2700E-01 1.9180E-01 2.1720E-01 1.5040E-01 1.9770E-02

8.2750E-02 1.3510E-01 1.5090E-01 1.0050E-01 6.3320E-03 4.6010E-02 1.1410E-01

1.3910E-01 1.1750E-01 6.5390E-02 1.9880E-02 6.7640E-02 6.2550E-02 5.5090E-02

2.2860E-01 1.1940E+00 2.5870E+00 3.5600E-02 1.1790E-01 5.5440E-01 1.5780E+00

5.3770E-02 1.2020E-01 6.7910E-02 1.5330E-01 1.7810E-01 2.6860E-01 2.8150E-01

2.0100E-02 2.0030E-02 1.3690E-02 4.6490E-02 2.9620E-02 6.5030E-02 1.5510E-02

2.2820E-03 1.6260E-02 8.1040E-02 2.0540E+00 2.8830E-04 1.1500E-02 5.0730E-02

1.0720E-01 1.2730E-04 1.7430E-03 8.4630E-02 2.2460E-01 3.5440E-03 3.1370E-02

2.1700E-01 5.0040E-01 3.3130E-03 1.7250E-02 1.0410E-01 2.2350E-01 2.5210E-03

1.7710E-02 1.0490E-01 3.1100E-01 1.5760E-03 1.4440E-02 5.1290E-02 5.6010E-01

2.8170E-03 2.0620E-02 3.8140E-01 1.3560E+00 1.3120E-03 1.8090E-02 4.6040E-02

3.3310E-01 9.3230E-05 1.2590E-02 5.5090E-02 9.4320E-02 4.5900E-03 8.9180E-03

4.9260E-03 5.4380E-03 1.8460E-02 4.4410E-02 7.9390E-02 1.4070E-03 6.8900E-03

1.1550E-02 1.5110E-02 1.9910E-03 7.8790E-03 1.8930E-02 2.7890E-02 4.9000E-04

5.4230E-03 1.2960E-02 2.4380E-02 9.8510E-03 1.5810E-03 3.2270E-03 9.6600E-04

9.6520E-04 4.3050E-03 1.2150E-02 1.9240E-02 9.3240E-04 6.0350E-03 2.4270E-02

5.4170E-02 4.5090E+00 1.5250E+00 6.1950E-01 1.2520E+00 5.6390E-01 8.9340E-02

3.1250E-01 1.2460E-01 2.9000E-02 4.9080E-01 2.5550E-01 1.1330E-01 3.1430E-02

4.3610E-01 2.2070E-01 1.0830E-01 4.8860E-02 4.5080E-01 2.2730E-01 1.0130E-01

3.8850E-02 3.5120E-01 1.9400E-01 1.0830E-01 4.8720E-02 2.3270E+00 9.2800E-01

2.6760E-01 6.2390E-02 1.4580E-02 3.1690E+00 1.0460E+00 2.9850E-01 7.6400E-02

2.1390E-02 7.1510E-03 1.5320E+00 2.0940E-01 2.3090E-02 2.2830E+01 3.9310E+00

8.1380E-02 1.3490E-02 3.3110E+01 4.2130E+00 3.5480E-01 7.5320E-02 1.4590E+01

1.0370E-01 2.9800E-02 1.1100E-01 6.8470E-02 3.6750E-02 1.6370E-02 6.1210E-02

3.6920E-02 1.5930E-02 5.3540E-03 1.6820E-02 5.0560E-03 2.2880E-03 1.0950E-01

5.4240E-02 2.2730E-02 5.8950E-03 1.1510E-02 6.6670E-03 3.3110E-03 1.2560E-03

2.8910E-02 1.6110E-02 7.5520E-03 2.1800E-03 1.9850E-01 4.0870E-02 4.8910E-03

9.7870E-04 2.3570E-01 5.0070E-02 9.9190E-03 3.2190E-03 2.8750E-02 1.1580E-02

4.6230E-03 1.3940E-03 5.3000E-02 2.7370E-02 1.2240E-02 3.9980E-03 2.1260E-01

4.6530E-02 1.2070E-02 2.8760E-03 2.5390E-02 1.1540E-02 4.4880E-03 1.1220E-03

2.4190E-02 1.0840E-02 4.5880E-03 1.5650E-03 1.1620E-01 1.8490E-02 9.8300E-03

3.0950E-02 1.7220E-02 7.3110E-03 2.1280E-03 1.2920E-02 7.8800E-03 4.8740E-03

2.9150E-03 2.6630E-02 1.8670E-02 9.1570E-03 3.0470E-03 4.7360E-03 3.2830E-03

1.9890E-03 9.2990E-04 1.3060E-02 1.3060E-02 2.4810E-03 1.2910E-03 5.3630E-03

3.2280E-03 1.7280E-03 7.2950E-04 1.2880E-02 3.1390E-03 1.1190E-03 4.3310E-04

4.2200E+00 9.2830E-01 7.1850E-01 3.6210E-01 3.4660E-01 1.6820E-01 1.1270E-01

6.9560E-02 1.7200E-01 2.0390E-01 1.7070E-01 1.2490E-01 1.8650E-01 2.0010E-01

1.4100E-01 8.5000E-02 1.6110E-01 2.1020E-01 1.5890E-01 9.8930E-02 1.7950E-01

2.0520E-01 1.1070E-01 4.6780E-02 4.9100E-01 1.1210E+00 8.0410E-01 3.4560E-01

7.6860E-02 9.2050E-02 1.6310E+00 1.1130E+00 4.6990E-01 1.3520E-01 2.5450E-02

3.6590E-01 7.9760E-01 1.5980E-01 3.9110E+00 1.1420E+01 4.7140E+00 8.1680E-02

3.6370E-01 2.2530E+01 5.0960E+00 3.9690E-01 3.3800E+00 7.6140E+00 5.4520E-02

6.1040E-02 4.5970E-02 3.7980E-02 2.9280E-02 4.3040E-02 2.7140E-02 1.5620E-02

4.0370E-03 7.4640E-03 8.2030E-03 2.0840E-03 3.9720E-02 4.4450E-02 3.4960E-02

2.5230E-02 4.8820E-03 4.5930E-03 4.1490E-03 3.4340E-03 1.0590E-02 1.1570E-02

1.0350E-02 8.5100E-03 4.2610E-02 9.9830E-02 4.3010E-02 4.5770E-03 5.1540E-02

1.1380E-01 4.5490E-02 6.9880E-03 9.1270E-03 1.3210E-02 7.8020E-03 4.6420E-03

2.0470E-02 2.2140E-02 1.7530E-02 1.2650E-02 2.4140E-02 1.3370E-01 4.1280E-02

1.3020E-02 8.1530E-03 1.0790E-02 8.0670E-03 5.1090E-03 6.5590E-03 1.1190E-02

7.8900E-03 4.8780E-03 4.0450E-02 6.1210E-02 6.4990E-03 1.7210E-02 1.1000E-02

9.1220E-03 5.7230E-03 6.9820E-03 6.7050E-03 4.8590E-03 2.9060E-03 1.8660E-02

9.2690E-03 8.9200E-03 6.2790E-03 2.7820E-03 1.9070E-03 1.7260E-03 1.6960E-03

9.7930E-03 4.9020E-03 6.8320E-03 8.9470E-04 3.2280E-03 2.3130E-03 1.7030E-03

9.0130E-04 1.8250E-03 6.0400E-03 2.9860E-03 9.7190E-04 2.6250E+00 3.1010E-01

3.9140E-01 2.5130E-01 7.6130E-02 9.5890E-02 6.1520E-02 4.1130E-02 1.0760E-01

1.4840E-01 1.4840E-01 7.7080E-02 1.1260E-01 1.2580E-01 9.3260E-02 5.0910E-02

1.0640E-01 1.3990E-01 1.2470E-01 1.0220E-01 1.1070E-01 1.0410E-01 4.8390E-02

5.8120E-02 4.8410E-01 5.8350E-01 5.0460E-01 2.9260E-01 2.7440E-02 5.7990E-02

7.5940E-01 8.2410E-01 4.7900E-01 1.5990E-01 5.5170E-02 3.9520E-01 4.2880E-01

8.0450E-02 4.7100E+00 5.3400E+00 3.3400E+00 9.8320E-02 3.1560E-01 1.4600E+01

3.9060E+00 4.3360E-01 3.8960E+00 3.0300E+00 2.6970E-02 3.3010E-02 3.1960E-02

2.4260E-02 2.6340E-02 2.0100E-02 1.0770E-02 2.6770E-03 3.8410E-03 4.9710E-03

3.2160E-03 1.0310E-02 2.4000E-02 3.2660E-02 2.9120E-02 1.4720E-03 2.8940E-03

3.4450E-03 3.5500E-03 2.5380E-03 6.4040E-03 8.9090E-03 9.5150E-03 4.8710E-03

4.2980E-02 4.6550E-02 2.9250E-02 9.8980E-03 4.5410E-02 5.5970E-02 3.4260E-02

2.9650E-03 5.6150E-03 8.9800E-03 5.7270E-03 6.0790E-03 1.2270E-02 1.5930E-02

1.4080E-02 6.7790E-03 1.5270E-02 8.4430E-02 3.1170E-02 1.9070E-03 5.2240E-03

7.6510E-03 6.6690E-03 1.8220E-03 4.1480E-03 7.7700E-03 6.6500E-03 1.6460E-02

3.3030E-02 2.2800E-02 7.3100E-03 9.1210E-03 7.9230E-03 4.4280E-03 3.8450E-03

4.0400E-03 3.6850E-03 2.7020E-03 9.1570E-03 8.9200E-03 6.9200E-03 3.7570E-03

1.2040E-03 1.4000E-03 1.4530E-03 1.2550E-03 6.5300E-03 2.2740E-03 3.9310E-03

2.4270E-03 1.7290E-03 1.7030E-03 1.2810E-03 7.0870E-04 7.4050E-04 1.0400E-03

4.1650E-03 1.7560E-03 9.0870E-02 2.7560E-01 1.0930E-01 2.5870E-02 5.6490E-02

3.3850E-02 1.8340E-03 4.3170E-02 7.6680E-02 1.0020E-01 2.6400E-02 4.9960E-02

6.3080E-02 6.4510E-02 1.1410E-02 4.0670E-02 6.8830E-02 8.9250E-02 4.8670E-02

4.6780E-02 4.8390E-02 3.9930E-02 1.5170E-02 4.4390E-02 2.8150E-01 3.6970E-01

2.4900E-01 9.1210E-03 1.6030E-02 3.0030E-02 2.7930E-01 4.6380E-01 3.5350E-01

7.5140E-03 6.8300E-02 3.6130E-01 1.3220E-02 8.1210E-02 3.3400E+00 3.2950E+00

4.3760E-02 4.7120E-02 1.9970E-01 9.1380E+00 2.4580E-02 6.4380E-01 3.0040E+00

8.6340E-03 1.8530E-02 1.7820E-02 1.3080E-02 1.2260E-02 1.1070E-02 5.2570E-03

1.3380E-03 1.7520E-03 1.7520E-03 2.4470E-03 6.4600E-04 1.0830E-02 1.6590E-02

1.9860E-02 2.2380E-04 1.3270E-03 1.9950E-03 2.1340E-03 7.7500E-06 2.7660E-03

4.7810E-03 6.1120E-03 9.7780E-04 4.5750E-03 2.9240E-02 2.8210E-02 3.2150E-03

6.9820E-03 3.4250E-02 3.1380E-02 5.5190E-04 2.6740E-03 3.4800E-03 4.9150E-03

8.4230E-04 5.5390E-03 8.0980E-03 9.4220E-03 9.6040E-04 6.5740E-03 9.7980E-03

5.3680E-02 1.1840E-04 1.9910E-03 3.6150E-03 5.0410E-03 2.6000E-04 1.6380E-03

2.8720E-03 5.4490E-03 7.2970E-03 7.8650E-03 2.1280E-02 2.1280E-03 5.7230E-03

4.4270E-03 2.1710E-03 1.7670E-03 1.7990E-03 1.8780E-03 1.6890E-03 3.0470E-03

6.2790E-03 3.7570E-03 1.2830E-03 3.3830E-04 8.9140E-04 8.1180E-04 6.4260E-04

3.2640E-03 9.6170E-04 1.3170E-03 1.9030E-03 7.2950E-04 9.0130E-04 7.0860E-04

3.3190E-04 2.1370E-04 5.3190E-04 5.8500E-04 2.0820E-03 1.0810E+00 4.3190E-01

3.6560E+00 2.7860E-01 8.3110E-02 1.7120E-01 9.4440E-02 4.9740E-02 2.5470E-02

6.4050E-01 3.1180E-01 1.4400E-01 6.3960E-02 1.9160E-01 1.2670E-01 7.5500E-02

4.0050E-02 6.8200E-01 4.2530E-01 2.0820E-01 7.3860E-02 3.0360E-01 2.1210E-01

1.2110E-01 5.9080E-02 2.2380E-02 2.8470E-01 2.2190E-01 1.4680E-01 8.2360E-02

3.8170E-02 1.3220E-02 2.4880E-01 1.5210E-01 5.0030E-02 3.0140E+00 8.4050E-01

1.9810E-01 5.4940E-02 5.9460E-01 4.6190E-01 2.5140E-01 9.1280E-02 6.3450E+00

2.7590E+00 4.4800E-02 3.5910E-01 1.6220E-01 6.7280E-02 2.7710E-02 3.3660E-01

1.8050E-01 9.8600E-02 5.4320E-01 5.8640E-01 2.9230E-01 2.3690E-02 1.6440E-01

7.3220E-02 2.8790E-02 1.0140E-02 2.5710E-02 1.4160E-02 6.9550E-03 2.7900E-03

3.8820E-02 1.9030E-02 7.9840E-03 2.4330E-03 8.4430E-01 2.6140E-01 4.9640E-02

7.1530E-03 1.5250E+00 3.6240E-01 5.3100E-02 5.6600E-03 6.8190E-02 2.9860E-02

1.1270E-02 3.5470E-03 1.1760E-01 5.5420E-02 2.3230E-02 8.2550E-03 3.6510E-02

2.2980E-02 1.3030E-02 6.0860E-03 1.0350E-02 5.9750E-03 3.4670E-03 1.9960E-03

7.2060E-03 3.8450E-03 1.7990E-03 6.7740E-04 1.4160E+00 6.1750E-01 1.4520E-02

7.7200E-01 2.2830E-01 4.0700E-02 9.5380E-03 1.2520E-01 1.0050E-01 5.9090E-02

2.5800E-02 9.4850E-01 2.5320E-01 6.1480E-02 1.7740E-02 1.8530E-01 8.2940E-02

3.2830E-02 9.8880E-03 5.1450E-01 1.8540E-01 9.4270E-02 1.5550E-02 2.6280E-01

9.6000E-02 4.4130E-02 2.1600E-02 6.5080E-02 2.9180E-02 1.1170E-02 3.2680E-03

4.9700E-01 2.7840E-01 2.2450E+00 1.5750E-01 3.4150E-02 7.6060E-02 6.9950E-02

4.7440E-02 1.3840E-01 2.9030E-01 2.2750E-01 1.2300E-01 7.8880E-02 7.3430E-02

7.2370E-02 6.6190E-02 3.3380E-01 2.4190E-01 2.2440E-01 1.4330E-01 1.3110E-01

1.1190E-01 1.0580E-01 8.8240E-02 5.0080E-02 1.6180E-01 7.1160E-02 7.0630E-02

8.6850E-02 8.3360E-02 5.0310E-02 1.2930E-01 5.7920E-02 1.1280E-01 2.0030E-01

1.5340E+00 8.2700E-01 1.8440E-01 3.7680E-01 1.0100E-01 1.9040E-01 2.6410E-01

2.7540E+00 8.3910E-01 2.5020E+00 6.4560E-02 1.5410E-01 1.2360E-01 6.7630E-02

1.8040E-01 1.8180E-01 4.8910E-02 3.5490E-01 2.6960E-01 1.0340E-01 2.7920E-01

1.6650E-02 7.1240E-02 6.2090E-02 3.4410E-02 5.3200E-03 9.7820E-03 9.8940E-03

8.0450E-03 3.1550E-03 1.5810E-02 1.5960E-02 1.0550E-02 3.2170E-02 4.5130E-01

2.4920E-01 5.6240E-02 2.4110E-02 7.9270E-01 4.0160E-01 8.4390E-02 1.0570E-02

2.8160E-02 2.3090E-02 1.2830E-02 1.6620E-02 4.8720E-02 4.3870E-02 2.7320E-02

1.5110E-02 1.2930E-02 1.2800E-02 1.0220E-02 2.8550E-03 5.0810E-03 4.2380E-03

2.4940E-03 1.2020E-03 2.8930E-03 2.8110E-03 2.1220E-03 6.1630E-01 1.9570E-01

5.5370E-01 3.5280E-02 3.8580E-01 2.1000E-01 4.2430E-02 8.2750E-02 2.8410E-02

4.1890E-02 5.2730E-02 4.3270E-02 5.0290E-01 2.5830E-01 4.6320E-02 1.6480E-02

7.9440E-02 6.9670E-02 3.9420E-02 3.4290E-01 9.4120E-02 3.4580E-02 6.9510E-02

4.7700E-02 1.4540E-01 7.5060E-02 1.6100E-02 1.1690E-02 2.5710E-02 2.1870E-02

1.3320E-02 8.2930E-02 1.5750E-01 1.0960E+00 1.0060E-02 1.8680E-02 3.4950E-02

4.8780E-02 4.1610E-02 7.1210E-02 1.2950E-01 1.4410E-01 1.8670E-02 4.2030E-02

4.5890E-02 3.9010E-02 8.2210E-02 1.8310E-01 1.3640E-01 6.3940E-02 2.5300E-02

7.3190E-02 7.0770E-02 5.0270E-02 2.5070E-02 2.9560E-03 8.1770E-02 8.2670E-02

5.5780E-02 2.8310E-02 1.0340E-02 2.2680E-02 9.0480E-02 3.7160E-02 6.7790E-02

9.8250E-02 6.2230E-01 5.8470E-01 2.7560E-02 2.3640E-01 1.5780E-01 4.4230E-02

4.3850E-02 2.5010E+00 5.0430E-01 1.4560E-02 3.5270E-02 7.2900E-02 8.2170E-02

9.8470E-02 4.8910E-02 5.6510E-02 1.7950E-01 2.3580E-02 2.6180E-01 5.6010E-02

3.2870E-03 9.2410E-03 3.1940E-02 4.7750E-02 5.1910E-04 3.0970E-03 5.6850E-03

7.2190E-03 5.6160E-05 1.8950E-03 7.5400E-03 1.3230E-02 6.9710E-03 1.9250E-02

2.0920E-01 2.2380E-01 6.6210E-03 1.3080E-02 3.7950E-01 3.1230E-01 1.4220E-03

6.4610E-03 1.3960E-02 1.5600E-02 2.2200E-03 9.5270E-03 2.3840E-02 3.2750E-02

3.7700E-03 7.9470E-03 8.0210E-03 5.3570E-03 1.1330E-03 1.2550E-03 2.0700E-03

2.5240E-03 1.0750E-04 7.1810E-04 1.5540E-03 2.2210E-03 1.4370E-02 5.5320E-01

1.1460E-01 1.1740E-02 1.7360E-02 1.5550E-01 1.8570E-01 1.2870E-02 4.8280E-02

3.2150E-02 9.5780E-03 2.4010E-02 1.4260E-02 1.9420E-01 1.8950E-01 2.1950E-03

8.3310E-03 3.6270E-02 5.3500E-02 1.7140E-01 1.5490E-02 6.9510E-02 1.4480E-02

2.9800E-02 1.3460E-02 5.1190E-02 4.7540E-02 9.4700E-04 7.2470E-03 1.3580E-02

1.4500E-02 3.3380E+00 5.1570E-01 4.6870E-01 2.4460E-01 1.3010E-01 6.6320E-02

6.7630E-01 4.6710E-01 3.2890E-01 2.1150E-01 3.7750E-01 2.5050E-01 1.4860E-01

7.6530E-02 5.7710E-01 4.1380E-01 2.6230E-01 1.0480E-01 9.6780E-02 6.2730E-02

3.5900E-02 1.8830E-02 7.8300E-03 1.2290E-01 7.1050E-02 3.8680E-02 1.9600E-02

8.9840E-03 3.3100E-03 5.5920E-02 3.8660E-02 1.7420E-02 3.9700E-01 1.7660E-01

7.5150E-02 2.8280E-02 1.7050E-01 1.0670E-01 5.8460E-02 2.7180E-02 2.9820E-01

1.4530E-01 1.6210E-02 2.0670E-01 1.0980E-01 5.6980E-02 2.8450E-02 2.5560E-01

2.2950E-01 1.4200E-01 6.4030E+00 1.1480E+01 4.9610E+00 1.6210E-01 4.9020E-02

2.6120E-02 1.4280E-02 8.1620E-03 2.0010E-02 1.0790E-02 5.0930E-03 1.8460E-03

3.6510E-02 1.8730E-02 8.3120E-03 2.6990E-03 2.1080E+01 5.0520E+00 7.0150E-01

2.7140E-02 6.0820E-02 3.2020E-02 2.1580E-02 1.2160E-02 3.0280E-02 1.8220E-02

1.1250E-02 6.6560E-03 2.6100E-02 1.9580E-02 1.5720E-02 1.2700E-02 2.3170E-02

1.4170E-02 7.3110E-03 3.0510E-03 9.3130E-03 5.8510E-03 3.4480E-03 1.7600E-03

1.2740E-02 8.5310E-03 4.9190E-03 2.2260E-03 3.4500E-01 1.3340E-01 4.3940E-03

2.9270E-02 1.6390E-02 1.0160E-02 5.2420E-03 2.3120E-02 1.7960E-02 1.2180E-02

7.5190E-03 1.2990E-01 3.2940E-02 1.1190E-02 4.1200E-03 2.1130E-02 1.0220E-02

4.6290E-03 1.9390E-03 7.0530E-02 4.0360E-02 2.3050E-02 3.9740E-03 2.6380E-02

1.1540E-02 6.6010E-03 3.3380E-03 8.9860E-03 5.1720E-03 2.4870E-03 9.0980E-04

2.4570E+00 9.4280E-02 1.9990E-01 1.9010E-01 1.2730E-01 3.3590E-01 3.8600E-01

2.6910E-01 1.3990E-01 1.5220E-01 1.4630E-01 1.4470E-01 1.3420E-01 3.4690E-01

2.7140E-01 2.0230E-01 1.1080E-01 3.8000E-02 4.0080E-02 3.4900E-02 2.5310E-02

1.3050E-02 2.4680E-02 4.3090E-02 4.2490E-02 3.3490E-02 2.1950E-02 1.0610E-02

3.3830E-02 1.6290E-02 2.4520E-02 1.0760E-01 1.7920E-01 1.2040E-01 4.9760E-02

7.2460E-02 6.1080E-02 5.8910E-02 4.9560E-02 1.3560E-01 4.9320E-02 1.1550E-01

6.0070E-02 9.1320E-02 7.3520E-02 4.4300E-02 2.2940E-01 1.4800E-01 4.1480E-02

4.2660E+00 4.9520E+00 1.9280E+00 5.1650E+00 1.1250E-02 2.3300E-02 1.9400E-02

1.1360E-02 3.8240E-03 7.4990E-03 7.6560E-03 6.1850E-03 4.2240E-03 1.4400E-02

1.4790E-02 1.0760E-02 3.3940E-01 1.2760E+01 5.6750E+00 1.0690E+00 2.4730E-02

3.3750E-02 1.8840E-02 5.0750E-03 1.1650E-02 1.5120E-02 1.1430E-02 6.5550E-03

1.4240E-02 1.6350E-02 1.2070E-02 6.6180E-03 9.3440E-03 7.6820E-03 7.8360E-03

6.8950E-03 3.1250E-03 4.2110E-03 3.6420E-03 2.6500E-03 4.9230E-03 4.0780E-03

4.6530E-03 5.2850E-03 1.2750E-01 4.0550E-02 1.1090E-01 1.2350E-02 1.6760E-02

9.1400E-03 3.0060E-03 1.4210E-02 1.0540E-02 8.7080E-03 6.8000E-03 9.9710E-03

5.4290E-02 3.1110E-02 8.3340E-03 3.3500E-03 9.1100E-03 8.0160E-03 4.8470E-03

3.9050E-02 2.3020E-02 1.0150E-02 1.4060E-02 7.8470E-03 1.5110E-02 8.2530E-03

2.3650E-03 3.1880E-03 2.9050E-03 2.9660E-03 2.5550E-03 2.5380E-02 4.8770E-02

9.2440E-02 1.3400E-01 1.7640E-01 1.2930E-01 1.2760E-01 1.1940E-01 3.2300E-02

8.2180E-02 9.1850E-02 7.9510E-02 1.2790E-01 1.5160E-01 1.1330E-01 5.8150E-02

1.0550E-02 1.8650E-02 2.0200E-02 1.6580E-02 9.1640E-03 3.2820E-03 1.1920E-02

1.9630E-02 2.2630E-02 1.9320E-02 1.1070E-02 9.8160E-03 1.9710E-02 7.8190E-03

3.4300E-02 5.4200E-02 8.0630E-02 6.0740E-02 1.6230E-02 3.9620E-02 3.8160E-02

2.6940E-02 1.5030E-02 1.1050E-01 2.4880E-02 2.0160E-02 2.9470E-02 4.2570E-02

4.2820E-02 1.4230E-01 4.1460E-02 2.4290E-02 2.1310E+00 1.5740E-01 4.4440E+00

9.7980E-01 4.6880E-03 5.0470E-03 9.7250E-03 1.2890E-02 1.6820E-04 2.2990E-03

4.4090E-03 5.6940E-03 4.6550E-05 2.5510E-03 7.4700E-03 1.2030E-02 5.8940E-03

2.4620E-01 5.1670E+00 5.0600E+00 1.6820E-02 6.7660E-03 1.0710E-02 8.7910E-03

5.3100E-03 4.8880E-03 5.9890E-03 5.6720E-03 8.9620E-03 5.1350E-03 5.0740E-03

5.4660E-03 1.5440E-03 5.3870E-03 5.2810E-03 3.6510E-03 7.8360E-04 1.6220E-03

1.9860E-03 2.0660E-03 4.0340E-04 2.8870E-03 3.3400E-03 2.8200E-03 4.2230E-03

1.1240E-01 2.3230E-02 7.1520E-03 3.8400E-03 5.2150E-03 4.4210E-03 5.8670E-03

6.7120E-03 4.8490E-03 2.7340E-03 5.4880E-03 3.6780E-03 2.3160E-02 2.2050E-02

6.4250E-04 1.7650E-03 4.2370E-03 5.8220E-03 1.9130E-02 3.9510E-03 1.4050E-02

3.6260E-03 4.5580E-03 2.4990E-03 5.0250E-03 4.0980E-03 3.7030E-04 1.9300E-03

2.0180E-03 1.4990E-03 9.1700E+00 5.1570E-01 7.8510E-02 3.1550E+00 7.9890E-01

1.2050E-01 1.7660E-02 3.4670E+00 1.0700E+00 2.8640E-01 3.5040E-02 7.4150E-01

4.6240E-01 1.0870E-01 2.3290E-02 2.2190E-01 1.0770E-01 4.2360E-02 1.2230E-02

1.5930E-03 2.5330E-01 1.1720E-01 4.6620E-02 1.4980E-02 3.5220E-03 4.3490E-04

1.8480E-01 6.2990E-02 8.8190E-03 2.8450E-01 7.9820E-02 2.0230E-02 3.7630E-03

3.2950E-01 1.1030E-01 2.8090E-02 5.1430E-03 7.9970E-02 3.1330E-02 3.9610E-03

1.2170E+00 3.2950E-01 1.7740E-01 3.6460E-02 1.6170E-01 2.6520E-02 3.6210E-03

9.4010E-03 1.6810E-02 9.7760E-03 1.2070E-03 1.8660E+01 7.5850E-01 1.4440E-02

1.1000E-03 3.0750E+01 2.5610E+00 7.7490E-02 1.0800E-03 4.1510E+01 3.1910E+00

1.1370E-01 2.8490E-03 1.8990E-02 4.7820E-03 9.5010E-04 1.2310E-04 3.6660E-02

8.3280E-03 6.9040E-04 7.6650E-05 4.7240E-02 1.6170E-02 3.4800E-03 1.7750E-04

6.9370E+00 2.2860E-01 6.2920E-03 1.5940E-03 1.2860E-01 3.9970E-02 9.3340E-03

1.2260E-03 7.4120E-01 8.2740E-02 1.7670E-02 3.1930E-03 2.2810E+00 2.1110E-01

2.3610E-02 3.3110E-03 8.5730E-03 8.2390E-04 4.1550E-05 1.9870E-02 5.3340E-03

7.5840E-04 5.6120E-05 2.8300E-02 6.5320E-03 1.3010E-03 1.6190E-04 3.9660E-02

6.7830E-03 7.4210E-04 1.5370E-04 2.2130E-01 1.7550E-02 2.4390E-03 2.6630E-04

4.0710E-03 4.0260E-03 1.9740E-03 4.4810E-04 2.3920E-02 4.0760E-03 1.0010E-03

2.1830E-05 4.4920E-02 9.4730E-03 1.5100E-03 1.6760E-04 1.3340E+01 5.9830E-01

1.1030E+00 1.5760E+00 7.5190E-01 1.2680E-01 1.1540E+00 2.1170E+00 1.1950E+00

3.1580E-01 6.4660E-01 6.7100E-01 3.3450E-01 8.9120E-02 1.1600E-01 1.0390E-01

6.6790E-02 3.7620E-02 1.7040E-02 1.0290E-01 1.0730E-01 8.3610E-02 4.9760E-02

2.2420E-02 6.8950E-03 1.0490E-01 7.3040E-02 4.2050E-02 1.3110E-01 1.2970E-01

5.4560E-02 1.7340E-02 1.4010E-01 1.5000E-01 8.6810E-02 2.8610E-02 5.4000E-02

2.7030E-02 1.7900E-02 4.5180E-01 8.2210E-01 5.4270E-01 1.7720E-01 8.4470E-02

6.5520E-02 1.4850E-02 8.0570E-03 1.3410E-02 4.7550E-03 5.6260E-03 1.8930E+00

1.3600E+01 9.4690E-01 1.5940E-02 2.4850E+00 3.0580E+01 3.1580E+00 9.1320E-02

2.7840E-01 3.8520E+01 4.1440E+00 1.3280E-01 8.2450E-03 8.6450E-03 3.4540E-03

8.8090E-04 1.4960E-02 1.5780E-02 7.5960E-03 6.5870E-04 2.0370E-02 1.9860E-02

1.3110E-02 3.9610E-03 5.5770E-01 5.1970E+00 2.8020E-01 6.9680E-03 5.1860E-02

5.9530E-02 3.2380E-02 1.0040E-02 1.1250E-01 5.1720E-01 7.5860E-02 1.8720E-02

2.1220E-01 1.7050E+00 2.3900E-01 2.5940E-02 4.1220E-03 3.5020E-03 4.9420E-04

8.7670E-03 7.7910E-03 4.3610E-03 7.6230E-04 9.0710E-03 1.3350E-02 5.7970E-03

1.4030E-03 1.4820E-02 2.0190E-02 6.0060E-03 6.6000E-04 3.0650E-02 1.5230E-01

1.8060E-02 2.7190E-03 3.4900E-03 3.0350E-03 1.4850E-03 1.0520E-03 8.0820E-03

1.3580E-02 2.2140E-03 1.0550E-03 1.3920E-02 2.3620E-02 9.0640E-03 1.6430E-03

1.2260E+01 2.8250E-01 1.0350E+00 1.0480E+00 5.9970E-01 3.1710E-01 1.2740E+00

1.6320E+00 1.0300E+00 2.8390E-01 5.5600E-01 4.3280E-01 2.2810E-01 5.0660E-02

7.4550E-02 7.6830E-02 5.6390E-02 2.8010E-02 3.0410E-02 7.3750E-02 7.5570E-02

6.2870E-02 4.4850E-02 2.3330E-02 5.1060E-02 7.1060E-02 6.1190E-02 5.4810E-02

9.7870E-02 8.6550E-02 3.7240E-02 4.9320E-02 1.1190E-01 1.0490E-01 7.2160E-02

3.1840E-02 2.9810E-02 2.0700E-02 1.7400E-01 4.8820E-01 9.6220E-01 4.4830E-01

4.0010E-02 6.3760E-02 3.3770E-02 6.7140E-03 8.8190E-03 5.9560E-03 5.0450E-03

9.2110E-02 2.4190E+00 1.0540E+01 7.2260E-01 3.7910E-02 3.1110E+00 1.8370E+01

2.4350E+00 6.5760E-03 9.1800E-01 3.4010E+01 3.2120E+00 3.1110E-03 6.5340E-03

5.7940E-03 2.4210E-03 4.7220E-03 1.3300E-02 8.9690E-03 5.3460E-03 6.4700E-03

1.6440E-02 1.3560E-02 1.1070E-02 2.9070E-02 6.9830E-01 4.0880E+00 2.1490E-01

1.7210E-02 4.2170E-02 4.1750E-02 2.7100E-02 2.3960E-02 1.1170E-01 4.0450E-01

6.4560E-02 2.3600E-02 2.3580E-01 1.3680E+00 1.9130E-01 1.7690E-03 3.3770E-03

1.7070E-03 3.1400E-03 7.2860E-03 5.0710E-03 3.0860E-03 2.7280E-03 8.2100E-03

9.7160E-03 4.7260E-03 4.3220E-03 1.3360E-02 1.2600E-02 4.1810E-03 3.8610E-03

3.2900E-02 1.1780E-01 1.4780E-02 2.9080E-03 1.9570E-03 1.5660E-03 1.0780E-03

3.1440E-03 7.1260E-03 9.2020E-03 1.6100E-03 3.5310E-03 1.3520E-02 1.6250E-02

7.2930E-03 5.2790E-02 3.2280E-01 8.8440E-01 1.1240E+00 5.4250E-02 4.2330E-01

1.1900E+00 1.8490E+00 1.0480E-01 3.1950E-01 4.6230E-01 3.2860E-01 1.3340E-02

5.0170E-02 6.6250E-02 6.1510E-02 3.6960E-02 5.0100E-03 2.7560E-02 5.4890E-02

6.7150E-02 5.9050E-02 3.4060E-02 1.7710E-02 6.1740E-02 6.7090E-02 1.8720E-02

5.7700E-02 8.1410E-02 6.2880E-02 1.2500E-02 5.2630E-02 9.8680E-02 1.0640E-01

1.5470E-02 3.2620E-02 1.7790E-02 8.3310E-02 3.3180E-01 6.7510E-01 9.1000E-01

1.6370E-02 4.5600E-02 4.7990E-02 5.3720E-03 4.6170E-03 8.6050E-03 2.7050E-03

5.5320E-03 1.1260E-01 2.0990E+00 1.3820E+01 1.0780E-03 9.1320E-02 2.4070E+00

1.6740E+01 1.1930E-03 1.7910E-02 1.3950E+00 3.0670E+01 8.9070E-04 3.4660E-03

5.5100E-03 4.3320E-03 9.9430E-04 5.6370E-03 1.1180E-02 8.2760E-03 1.0720E-03

7.4460E-03 1.4760E-02 1.4990E-02 1.7700E-03 3.5220E-02 5.4090E-01 3.3810E+00

3.7620E-03 1.9120E-02 3.7820E-02 4.2250E-02 4.6530E-03 2.6050E-02 9.3890E-02

3.6990E-01 3.3080E-03 2.5930E-02 1.9900E-01 1.2390E+00 5.3450E-04 2.1990E-03

2.6950E-03 7.5760E-04 3.6250E-03 6.3420E-03 4.1980E-03 5.1170E-04 3.0860E-03

7.0590E-03 9.8610E-03 1.0170E-03 5.1730E-03 1.1050E-02 1.0250E-02 4.6520E-04

4.4770E-03 2.6990E-02 1.0670E-01 2.3270E-03 1.1530E-03 1.6870E-03 7.8960E-04

7.9460E-04 3.5660E-03 6.0160E-03 6.7030E-03 5.9700E-04 3.9370E-03 1.1450E-02

1.6190E-02 7.0920E+00 3.6500E-01 8.3750E-02 1.7230E+00 6.9760E-01 2.1250E-01

4.9290E-02 1.9800E+00 8.7220E-01 2.5360E-01 5.4100E-02 1.4010E-01 7.3090E-02

3.7300E-02 1.9630E-02 8.8420E-03 2.3200E-01 1.3930E-01 8.2340E-02 4.4690E-02

2.0990E-02 7.5930E-03 1.4720E-01 7.4210E-02 2.0240E-02 7.4480E-01 1.2840E-01

3.8180E-02 1.2550E-02 4.0820E-01 1.4560E-01 5.4700E-02 1.9050E-02 1.6140E-01

7.4050E-02 1.4090E-02 9.4090E-01 6.2280E-01 2.0960E-01 7.4890E-02 2.0710E-01

8.8900E-02 3.5400E-02 1.3990E-01 1.6600E-01 8.5270E-02 3.7690E-02 9.0370E+00

9.7750E-01 7.4670E-02 5.7870E-03 2.9810E-01 1.5650E-01 3.8330E-02 5.5260E-03

4.2490E-01 1.5990E-01 4.6700E-02 4.9020E-03 1.8210E-01 2.6380E-02 1.7190E-02

8.9680E-03 1.8650E+01 4.3260E-01 9.8420E-03 6.9340E-04 2.3720E+01 2.7540E+00

1.1900E-01 9.1150E-04 2.6340E+01 2.6290E+00 1.5030E-01 5.4140E-03 8.5310E-01

1.2610E-01 9.5000E-03 1.2360E-03 6.9520E-01 9.9170E-02 1.3560E-02 2.4730E-03

6.2170E-02 2.9610E-02 1.0770E-02 2.1510E-03 4.1630E-02 1.1070E-02 1.7490E-03

8.1630E-01 4.7480E-02 6.6640E-03 1.7470E-03 4.1200E-01 6.7730E-02 1.0180E-02

2.1510E-03 4.7380E-02 1.5140E-02 4.3340E-03 1.0990E-03 6.5840E-02 2.4820E-02

6.8050E-03 1.8780E-03 9.8690E-03 7.8840E-03 4.7700E-03 1.9280E-03 2.2770E-02

9.3450E-03 3.8940E-03 1.2340E-03 5.3920E-02 2.6940E-02 6.4000E-03 2.0740E-03

8.5850E+00 3.7820E-01 5.3170E-01 9.1730E-01 5.9660E-01 2.2790E-01 9.6460E-01

9.5950E-01 5.8250E-01 2.1530E-01 6.6250E-02 7.1390E-02 5.0710E-02 2.7300E-02

1.0590E-02 1.1500E-01 1.1090E-01 7.9030E-02 5.5690E-02 3.9350E-02 2.1550E-02

9.0240E-02 5.4110E-02 4.8940E-02 2.0150E-01 4.1630E-01 9.4470E-02 2.5720E-02

1.4530E-01 2.0510E-01 1.0380E-01 4.8670E-02 1.0500E-01 5.2820E-02 4.1880E-02

6.2270E-01 5.0710E-01 4.8520E-01 1.8400E-01 1.3040E-01 9.5120E-02 4.0020E-02

1.1190E-01 1.1430E-01 7.9620E-02 3.6750E-02 3.6200E-01 6.5400E+00 1.2000E+00

9.1720E-02 1.1310E-01 2.1690E-01 1.4730E-01 4.4650E-02 8.5970E-02 4.7320E-01

2.6790E-01 5.5850E-02 4.3110E-02 1.2370E-01 1.5290E-02 6.2500E-03 2.5680E+00

1.2210E+01 4.5780E-01 5.9920E-03 2.7380E+00 1.5060E+01 3.2950E+00 1.4470E-01

7.1020E-01 1.9170E+01 3.5300E+00 1.8870E-01 1.2310E-01 5.3130E-01 1.3020E-01

1.0570E-02 3.5820E-02 5.3640E-01 1.0510E-01 1.5060E-02 2.4240E-02 2.5530E-02

2.1950E-02 1.2070E-02 2.1170E-02 1.5800E-02 6.3860E-03 1.4670E-01 4.9790E-01

4.2620E-02 5.2410E-03 6.7280E-02 2.4240E-01 6.9040E-02 1.0540E-02 1.8750E-02

2.0350E-02 1.0530E-02 3.5200E-03 1.7680E-02 3.4400E-02 2.0700E-02 7.0660E-03

7.8940E-03 5.9570E-03 3.5310E-03 2.1290E-03 1.0580E-02 1.0040E-02 6.5610E-03

2.4550E-03 1.9520E-02 2.6710E-02 2.5760E-02 5.9540E-03 6.4510E+00 1.3700E-01

5.0070E-01 6.2050E-01 5.0130E-01 3.9800E-01 7.3030E-01 6.0730E-01 3.6750E-01

3.3210E-02 4.6710E-02 4.2770E-02 3.1440E-02 1.6550E-02 5.6510E-02 5.7510E-02

7.3750E-02 6.5950E-02 4.2940E-02 1.9340E-02 4.5580E-02 5.1940E-02 4.7430E-02

6.3140E-02 1.7410E-01 2.5730E-01 5.8350E-02 5.4700E-02 1.0360E-01 1.4020E-01

7.8950E-02 5.7480E-02 5.5090E-02 3.7210E-02 2.0960E-01 4.8520E-01 5.3530E-01

3.6640E-01 8.0710E-02 7.6080E-02 4.2510E-02 8.3930E-02 7.6670E-02 6.2750E-02

3.3940E-02 1.5480E-02 4.2580E-01 4.7850E+00 9.2880E-01 1.5200E-02 1.0760E-01

1.4330E-01 1.2520E-01 4.0400E-03 1.5140E-01 3.2240E-01 2.2120E-01 2.1590E-02

4.0050E-02 7.6250E-02 5.6480E-03 2.0230E-01 3.1030E+00 7.8160E+00 3.1870E-01

1.1370E-01 3.4540E+00 9.8630E+00 2.5220E+00 7.3060E-03 8.6680E-01 1.4100E+01

2.7130E+00 9.0690E-03 1.2930E-01 3.5410E-01 9.9290E-02 6.6390E-03 3.4690E-02

4.8330E-01 8.7240E-02 6.2870E-03 1.7900E-02 1.8450E-02 2.0200E-02 9.6450E-03

1.4090E-02 8.9150E-03 2.0960E-02 1.5300E-01 3.1700E-01 2.8440E-02 1.0060E-02

6.8700E-02 1.5540E-01 5.2860E-02 7.0050E-03 1.3830E-02 1.2150E-02 6.6240E-03

4.6420E-03 1.4650E-02 2.4650E-02 1.7300E-02 5.9200E-03 4.0480E-03 2.9340E-03

1.6400E-03 5.8140E-03 7.2710E-03 6.9320E-03 3.1740E-03 5.2110E-03 1.4680E-02

1.8900E-02 1.9660E-02 2.8510E-02 1.5060E-01 3.9900E-01 5.9360E-01 1.2500E-01

4.0130E-01 5.3150E-01 3.4920E-01 1.8100E-02 2.1700E-02 2.8840E-02 2.7900E-02

1.7040E-02 1.8280E-02 4.3680E-02 4.5990E-02 4.4050E-02 3.6960E-02 2.1630E-02

1.7750E-02 4.5200E-02 3.3700E-02 2.3860E-02 5.6270E-02 1.2680E-01 1.6080E-01

1.9050E-02 4.8670E-02 7.8870E-02 1.0480E-01 2.5570E-02 5.0960E-02 2.3280E-02

7.4860E-02 1.8400E-01 3.6640E-01 4.3850E-01 4.6640E-02 4.9680E-02 3.5770E-02

5.5950E-02 4.7310E-02 4.1910E-02 2.6380E-02 2.4490E-03 1.7370E-02 3.2300E-01

3.7610E+00 1.0400E-03 1.7110E-02 8.6200E-02 1.5660E-01 3.2920E-04 4.4230E-03

1.1600E-01 3.4540E-01 1.4200E-02 1.0980E-02 2.3960E-02 4.4200E-02 8.8400E-03

2.7760E-01 2.3770E+00 5.9960E+00 9.1130E-04 1.4340E-01 2.6140E+00 8.0020E+00

2.0170E-03 7.3680E-03 6.4990E-01 1.1000E+01 1.2250E-03 1.0560E-02 1.0380E-01

2.8330E-01 1.5580E-03 7.0330E-03 2.7590E-02 3.9850E-01 5.8730E-04 6.9270E-03

1.5480E-02 1.8900E-02 3.6970E-03 9.7860E-03 8.3280E-03 3.9000E-03 2.3300E-02

1.1660E-01 2.0450E-01 2.1240E-03 1.0530E-02 5.2650E-02 1.2600E-01 2.3250E-03

6.8470E-03 1.0520E-02 7.3790E-03 1.1470E-03 4.4850E-03 1.1650E-02 2.3000E-02

3.9470E-03 2.4760E-03 2.2740E-03 1.0570E-03 2.3640E-03 4.0970E-03 4.4010E-03

3.1060E-03 1.4640E-03 5.7830E-03 1.2130E-02 1.5320E-02 7.5590E+00 3.3150E-01

5.4970E-02 1.9390E+00 5.8230E-01 1.7170E-01 4.7340E-02 1.3420E-01 6.4130E-02

2.5910E-02 9.1750E-03 2.4300E-03 2.2300E-01 1.2720E-01 6.3750E-02 2.6880E-02

8.7810E-03 1.8420E-03 1.0170E-01 2.3750E-02 6.6700E-03 2.8570E-01 9.6200E-02

2.9660E-02 5.8930E-03 8.0620E-01 1.1150E-01 3.2530E-02 1.0400E-02 1.2650E-01

2.8520E-02 8.3060E-03 1.4490E+00 4.5280E-01 1.2970E-01 4.6050E-02 1.6760E-01

5.4680E-02 8.4630E-03 4.4500E-03 1.9210E-02 4.8650E-03 1.8880E-03 1.9190E+00

2.0770E-01 2.4480E-02 2.6690E-03 3.4760E+00 3.4450E-01 3.7870E-02 5.1330E-03

9.6670E-02 8.6750E-02 2.8050E-02 4.7060E-03 2.1580E-02 1.0870E-02 3.3270E-03

4.8720E-04 5.4700E-02 1.6100E-02 2.8270E-03 3.8440E-04 7.0480E-01 3.3820E-02

5.5500E-03 1.5410E-03 1.7430E-01 4.7110E-02 1.2450E-02 2.1980E-03 2.1240E+01

6.0290E-01 7.6660E-03 7.6440E-04 2.8110E+01 2.5200E+00 9.6850E-02 6.5380E-04

3.7960E+01 2.8880E+00 1.3260E-01 6.3470E-03 3.1690E-02 6.0810E-03 2.1540E-03

6.6560E-02 2.5820E-02 9.8440E-03 2.6120E-03 1.8940E+00 7.9980E-02 1.2100E-02

4.1820E-03 4.8810E-02 1.2990E-02 3.1500E-03 3.7210E-04 1.4850E-01 2.7070E-02

4.7760E-03 7.1790E-04 1.2090E-03 1.0940E-02 3.3200E-03 8.6400E-04 2.2720E-02

7.5960E-03 2.2120E-03 4.7280E-04 9.2160E-02 1.9050E-02 3.3670E-03 5.3270E-04

1.1300E+01 3.7150E-01 8.2550E-01 1.1240E+00 4.0300E-01 1.2700E-01 6.3180E-02

6.8740E-02 4.1160E-02 2.2210E-02 9.6160E-03 1.1260E-01 9.0420E-02 7.3590E-02

5.3000E-02 3.2090E-02 1.4390E-02 4.6510E-02 4.8210E-02 1.5320E-02 1.3550E-01

1.2870E-01 6.2550E-02 2.3240E-02 1.6240E-01 5.1620E-01 9.0230E-02 2.9230E-02

6.7000E-02 5.4680E-02 1.4460E-02 5.3320E-01 7.1060E-01 3.7710E-01 1.1210E-01

1.0200E-01 6.1570E-02 3.0890E-02 3.7080E-03 1.0790E-02 8.8270E-03 2.3480E-03

2.0250E-01 1.2430E+00 2.2690E-01 2.8120E-02 1.7930E-01 2.6970E+00 4.0440E-01

4.2910E-02 7.2300E-02 1.0910E-01 7.0520E-02 3.1070E-02 1.3510E-02 7.9240E-03

6.1890E-03 3.0070E-03 2.3760E-02 2.2110E-02 1.3030E-02 2.5290E-03 9.2670E-02

4.9960E-01 3.2880E-02 5.2920E-03 4.7070E-02 9.7040E-02 3.8970E-02 1.3510E-02

2.1430E+00 1.5260E+01 7.2910E-01 9.6250E-03 2.5090E+00 1.9890E+01 3.1050E+00

1.1300E-01 4.7720E-01 3.0400E+01 3.6990E+00 1.5930E-01 1.5970E-02 1.4110E-02

2.9390E-03 3.4740E-02 3.0110E-02 1.4960E-02 7.4200E-03 2.0880E-01 1.3020E+00

8.0580E-02 1.1070E-02 2.0090E-02 2.2560E-02 8.9580E-03 2.9100E-03 2.6960E-02

1.0060E-01 2.7310E-02 5.6180E-03 1.0080E-03 6.5000E-03 4.4360E-03 1.6330E-03

1.0740E-02 9.5620E-03 6.0210E-03 1.7370E-03 2.4010E-02 5.1290E-02 1.5590E-02

3.5320E-03 8.8810E+00 3.4410E-01 7.1810E-01 7.1880E-01 2.6080E-01 2.6800E-02

4.1620E-02 4.7480E-02 3.3800E-02 1.5150E-02 4.2640E-02 6.7160E-02 6.5430E-02

5.7160E-02 4.4020E-02 2.4410E-02 1.9800E-02 3.9010E-02 2.9180E-02 5.9260E-02

9.5140E-02 8.4860E-02 4.0220E-02 4.5340E-02 1.4900E-01 3.7410E-01 7.0640E-02

3.4340E-02 4.8440E-02 2.6180E-02 1.7850E-01 4.5040E-01 4.6620E-01 2.9090E-01

5.4460E-02 6.1430E-02 3.9130E-02 2.9660E-03 5.7280E-03 7.5690E-03 3.9410E-03

2.4310E-02 2.2670E-01 9.2370E-01 1.8110E-01 2.1190E-02 1.9870E-01 2.1220E+00

3.1660E-01 1.9030E-02 5.7640E-02 8.3740E-02 6.6640E-02 6.6050E-03 7.6750E-03

6.2270E-03 4.0340E-03 8.3090E-03 1.9130E-02 1.3270E-02 9.0250E-03 1.0420E-02

1.0130E-01 3.6730E-01 2.5340E-02 1.2440E-02 3.8960E-02 7.2060E-02 3.3940E-02

1.2650E-01 2.6570E+00 1.1180E+01 5.4710E-01 9.1050E-02 3.1010E+00 1.4940E+01

2.3800E+00 3.5640E-03 1.4850E+00 2.4030E+01 2.8480E+00 8.0170E-03 1.2230E-02

6.2650E-03 1.7430E-02 2.1990E-02 2.0520E-02 9.3600E-03 2.4510E-02 2.4300E-01

9.9160E-01 6.1590E-02 7.4440E-03 1.5150E-02 1.4830E-02 6.0590E-03 4.7620E-03

2.7300E-02 7.3720E-02 2.2060E-02 8.0600E-04 3.3010E-03 4.1380E-03 2.2860E-03

4.7550E-03 7.7530E-03 6.4560E-03 3.9900E-03 5.2710E-03 2.2180E-02 3.5700E-02

1.2620E-02 1.3770E-01 3.5270E-01 5.5900E-01 4.9000E-01 8.8260E-03 2.4660E-02

3.4040E-02 3.3160E-02 2.1060E-02 8.7590E-03 3.7700E-02 5.5290E-02 5.6160E-02

4.3860E-02 2.3620E-02 8.1500E-03 2.1040E-02 3.6700E-02 2.2870E-02 5.7620E-02

7.4310E-02 5.4510E-02 1.5230E-02 4.4380E-02 1.1960E-01 3.0000E-01 1.7230E-02

3.1820E-02 3.2670E-02 6.5840E-02 1.6900E-01 3.6360E-01 4.4090E-01 2.4850E-02

5.4620E-02 3.7130E-02 2.2250E-03 3.3160E-03 4.7370E-03 4.8310E-03 2.6450E-03

2.8230E-02 1.8100E-01 8.3380E-01 2.8650E-03 2.3290E-02 1.5950E-01 1.8150E+00

1.0650E-03 2.0910E-02 5.3330E-02 9.3380E-02 2.1620E-03 6.5660E-03 6.1310E-03

3.2600E-03 2.0910E-03 9.3440E-03 1.5540E-02 1.0310E-02 2.4190E-03 1.1160E-02

7.9660E-02 2.8640E-01 2.1980E-03 1.3510E-02 3.3940E-02 6.8100E-02 4.7580E-03

1.5890E-01 2.0450E+00 8.7400E+00 6.5340E-04 1.1250E-01 2.3820E+00 1.2890E+01

4.6830E-04 4.2630E-03 1.1340E+00 2.0200E+01 4.1020E-03 7.2260E-03 8.4230E-03

7.4550E-03 1.5950E-02 1.6700E-02 1.1880E-02 6.1990E-03 2.6290E-02 1.8870E-01

7.7290E-01 2.0990E-03 8.0130E-03 1.2220E-02 1.0030E-02 7.1660E-04 5.2130E-03

2.2060E-02 6.2190E-02 6.0450E-04 1.8220E-03 3.0510E-03 2.3780E-03 1.6630E-03

4.3870E-03 6.2980E-03 4.2160E-03 1.0050E-03 5.8180E-03 1.8340E-02 3.1560E-02

4.6770E+00 4.8110E-01 1.8770E-01 7.2120E-02 4.8690E-02 2.9320E-02 1.6570E-02

7.5500E-03 8.7760E-02 6.1610E-02 4.3770E-02 3.1320E-02 2.1010E-02 1.0730E-02

6.4140E-02 3.5460E-02 2.2360E-02 8.4510E-01 5.4130E-01 1.4460E-01 4.8370E-02

7.0120E-01 1.7010E-01 2.4750E-01 7.8020E-02 9.1750E-01 1.4370E-01 4.2940E-02

9.1660E-01 5.1350E-01 2.7690E-01 1.4170E-01 6.3070E-01 3.6590E-01 4.5010E-02

3.0400E-02 2.0840E-01 4.4650E-02 2.3930E-02 1.4460E-01 6.3480E-02 1.9930E-02

4.2810E-03 1.0730E-01 4.4350E-02 1.5330E-02 3.9970E-03 9.3150E-02 4.1580E-02

1.4650E-02 3.2460E-03 3.5840E-02 1.9480E-02 1.1210E-02 5.2370E-03 2.3120E+00

4.3430E-01 2.4250E-02 4.2630E-03 2.1050E+00 3.1950E-01 4.0530E-02 7.6240E-03

1.0190E-01 5.2510E-02 2.2690E-02 7.5870E-03 2.9070E+00 4.1590E-01 4.5710E-02

7.6820E-03 1.2780E-01 4.8610E-02 1.8460E-02 6.7040E-03 1.4450E-01 6.3680E-02

2.8550E-02 1.1470E-02 1.3020E+01 2.1060E-01 6.1890E-03 1.7570E+01 3.2230E+00

1.1660E-01 3.4230E-03 2.8990E+01 3.4680E+00 2.8250E-01 1.5640E-02 1.3940E-01

4.6740E-02 1.2010E-02 2.3100E-03 2.6420E-02 1.4710E-02 7.0660E-03 2.7130E-03

3.0370E-02 1.3390E-01 1.7910E-02 8.4720E-03 4.7840E-02 2.5470E-02 1.0130E-02

2.6580E-03 4.3510E-02 1.5240E-02 5.4160E-03 1.3280E-03 5.2220E+00 2.8330E-01

4.2290E-02 3.2900E-02 2.8700E-02 1.9030E-02 7.8630E-03 4.9330E-02 4.7980E-02

4.2040E-02 2.9700E-02 1.6540E-02 6.6580E-03 3.7570E-02 3.5610E-02 1.8320E-02

2.0520E-01 5.2380E-01 9.4260E-02 1.0350E-01 3.6170E-01 1.6290E-01 1.2580E-01

6.7710E-02 2.2060E-01 4.2100E-01 6.3070E-02 4.4590E-01 4.2450E-01 3.2060E-01

1.9670E-01 4.3000E-01 1.1620E-01 2.3460E-01 2.2800E-02 8.0830E-02 1.0380E-01

1.5550E-02 4.3140E-02 5.5230E-02 5.2670E-02 2.3220E-02 2.4200E-02 4.9340E-02

3.7070E-02 1.7460E-02 2.2150E-02 3.9630E-02 3.4870E-02 1.7400E-02 1.9100E-02

1.9430E-02 1.0650E-02 4.8530E-03 4.3170E-01 1.1390E+00 4.8600E-01 2.3800E-02

8.1910E-02 1.3740E+00 3.6160E-01 4.6710E-02 3.9250E-02 4.0590E-02 3.5410E-02

2.3430E-02 8.5490E-02 1.9250E+00 4.8490E-01 5.4190E-02 2.9550E-02 6.4900E-02

3.8890E-02 1.8420E-02 3.7820E-02 7.3420E-02 4.6820E-02 2.8570E-02 3.1170E+00

6.6680E+00 1.4840E-01 3.2180E+00 8.6510E+00 3.6480E+00 1.4480E-01 5.8970E-01

1.6390E+01 4.1990E+00 3.7550E-01 4.6680E-02 5.7870E-02 3.4520E-02 1.1460E-02

1.1480E-02 1.0180E-02 9.3150E-03 6.9000E-03 2.2770E-02 3.9020E-02 6.9180E-02

7.0420E-03 2.5450E-02 1.7330E-02 1.3840E-02 8.5710E-03 9.5990E-03 2.1980E-02

1.0830E-02 5.0410E-03 3.5610E+00 2.0730E-02 2.5810E-02 1.7630E-02 1.4230E-02

9.3560E-03 2.9210E-02 3.2900E-02 2.4000E-02 1.8480E-02 1.4750E-02 8.7500E-03

2.2680E-02 2.1620E-02 1.6580E-02 1.0620E-01 1.8220E-01 3.0350E-01 5.1820E-02

1.1150E-01 9.8670E-02 1.0980E-01 8.4190E-02 8.3030E-02 1.7270E-01 1.6710E-01

2.0600E-01 2.6590E-01 2.5340E-01 2.0050E-01 1.9030E-01 2.0480E-01 1.2570E-01

1.5200E-02 3.7900E-02 5.9090E-02 4.0190E-02 5.2460E-03 3.7640E-02 3.0380E-02

4.3000E-02 3.9130E-03 1.9080E-02 3.1150E-02 3.1150E-02 2.2350E-03 1.8750E-02

2.4650E-02 3.0350E-02 1.1170E-02 1.0400E-02 1.0090E-02 4.3640E-03 2.2920E-02

4.8560E-01 5.3940E-01 3.4040E-01 1.3990E-02 7.2330E-02 8.8350E-01 2.7570E-01

1.0780E-02 2.5800E-02 2.7300E-02 2.8490E-02 1.3780E-02 7.7580E-02 1.2420E+00

3.7030E-01 8.4480E-03 2.0340E-02 4.1500E-02 3.0500E-02 1.2620E-02 2.1880E-02

5.0900E-02 3.8630E-02 4.2370E-01 3.4970E+00 2.7130E+00 1.1350E-01 3.6470E+00

4.1120E+00 2.5700E+00 1.1340E-02 6.5980E-01 1.0460E+01 3.2200E+00 1.2010E-02

3.4520E-02 3.3090E-02 2.1090E-02 3.7290E-03 7.0560E-03 7.5250E-03 7.3960E-03

1.5180E-02 1.5380E-02 3.6200E-02 2.6590E-02 1.0120E-02 1.3500E-02 1.2560E-02

6.7550E-03 2.9310E-03 5.7860E-03 1.4710E-02 7.9340E-03 9.1120E-03 9.3550E-03

1.1800E-02 8.7710E-03 3.7550E-03 1.6700E-02 1.0070E-02 1.2250E-02 1.2000E-02

8.6760E-03 4.2860E-03 1.1140E-02 8.9260E-03 1.0340E-02 4.2870E-02 9.3910E-02

1.6490E-01 3.5970E-02 3.9110E-02 8.5670E-02 5.6080E-02 6.0750E-02 3.1120E-02

5.7930E-02 1.0490E-01 8.0980E-02 1.1760E-01 1.4120E-01 1.2360E-01 5.1050E-02

1.8080E-01 2.8220E-02 7.5990E-03 1.7730E-02 1.5650E-02 3.5050E-02 6.3310E-04

5.0580E-03 2.6110E-02 2.6320E-02 4.8160E-04 3.6570E-03 1.3390E-02 2.5060E-02

1.8760E-05 2.4200E-03 1.3480E-02 2.2200E-02 5.2290E-03 4.8440E-03 4.2400E-03

3.5950E-03 4.1320E-03 2.3540E-02 3.4020E-01 3.2660E-01 3.1460E-03 1.1830E-02

4.8290E-02 5.5920E-01 1.9260E-03 9.5460E-03 1.7210E-02 1.7510E-02 2.9280E-03

1.1970E-02 5.2220E-02 7.8440E-01 2.1470E-03 6.4890E-03 1.3250E-02 2.8640E-02

2.7490E-03 1.0320E-02 1.4510E-02 3.4470E-02 1.7090E-02 6.5700E-01 2.6410E+00

3.1910E-03 1.4540E-01 2.5690E+00 2.4950E+00 5.3040E-03 5.3860E-03 4.5890E-01

6.6890E+00 2.3080E-03 1.1460E-02 2.1090E-02 1.5120E-02 7.5350E-04 3.2670E-03

4.5610E-03 4.0250E-03 7.5910E-03 6.4010E-03 8.2610E-03 2.3840E-02 2.6100E-03

8.5690E-03 7.3500E-03 4.3250E-03 5.0670E-04 2.7080E-03 3.6370E-03 8.4130E-03

3.7080E+00 9.7660E-01 1.9810E-01 8.1760E-02 8.6020E+00 3.6920E+00 1.0450E+00

2.0010E-01 3.2860E-02 7.2270E-03 3.3970E+00 1.2160E+00 4.1010E-02 3.0090E+00

4.3860E-01 8.2120E-02 6.8780E-03 2.1060E+00 6.4640E-01 1.0480E-01 7.5900E-03

7.2630E-01 1.5130E-01 1.0150E-02 3.9560E-02 2.0680E-02 9.4050E-03 3.4860E-03

1.8090E-02 1.2650E-02 7.0100E-03 5.2100E-02 1.1480E-01 9.1140E-03 2.7120E-03

2.2020E-01 1.8330E-01 8.5560E-02 1.9700E-02 1.6620E-01 8.1340E-02 2.4220E-02

3.7800E-03 1.0460E-01 2.8720E-02 6.1670E-03 7.4060E-04 1.1860E-01 3.7390E-02

6.4780E-03 1.0410E-04 1.1210E-01 5.8000E-02 5.1200E-02 3.3280E-02 1.7760E-01

4.3000E-02 1.0880E-02 2.4720E-03 4.6180E-02 1.5090E-02 4.0460E-03 9.3720E-04

8.7810E-02 7.8830E-02 4.6520E-02 1.5160E-02 1.9780E-01 4.4250E-02 7.2240E-03

6.9250E-04 3.6360E-02 1.5480E-02 4.4770E-03 8.1100E-04 5.2200E-02 3.8770E-02

9.1850E-03 5.7870E-02 2.6360E-02 1.4370E-02 7.4330E-03 5.0750E-02 2.4200E-02

8.4080E-03 2.2060E-03 7.3740E-02 7.6090E-02 3.8320E-02 8.8970E-03 4.8590E-02

2.7170E-02 9.4370E-03 1.9730E-03 4.3990E-02 2.3770E-02 1.0960E-02 6.5720E-03

2.0870E-02 1.0750E-02 5.6080E-03 2.7160E-03 3.2710E-02 1.6240E-02 6.1540E-03

1.4670E-03 3.1850E+00 1.3720E+00 1.3750E-01 2.7720E+00 2.8840E+00 3.2760E+00

1.5770E+00 3.7340E-01 4.9860E-02 1.7940E+00 1.1140E+00 8.0940E-01 9.1170E-01

1.5240E+00 3.0900E-01 7.8480E-02 7.5030E-01 8.6590E-01 5.6000E-01 1.1290E-01

3.6540E-01 2.5810E-01 8.6750E-02 2.1750E-02 1.6670E-02 1.1570E-02 7.7460E-03

1.5170E-02 1.0950E-02 4.7820E-03 4.1680E-02 4.8150E-02 4.8750E-02 4.4030E-03

1.7600E-01 5.3900E-02 9.3910E-02 8.4390E-02 7.3720E-02 5.7630E-02 6.3640E-02

2.5480E-02 2.1460E-02 5.7870E-02 2.6430E-02 6.5410E-03 5.2160E-02 4.3070E-02

2.6310E-02 6.8550E-03 7.0800E-02 8.6980E-02 3.8570E-02 1.0040E-02 5.2890E-02

9.0580E-02 3.3650E-02 1.0110E-02 1.4870E-02 2.1750E-02 1.2270E-02 4.0220E-03

7.7970E-02 3.5820E-02 2.9340E-02 3.9520E-02 4.4590E-02 1.0560E-01 4.1880E-02

7.8460E-03 1.3890E-02 1.4660E-02 1.2420E-02 4.6810E-03 4.3800E-02 1.7120E-02

1.8680E-02 3.2280E-02 3.0000E-02 1.7210E-02 5.2790E-03 2.5840E-02 1.9960E-02

1.5890E-02 7.6390E-03 7.6100E-02 2.5020E-02 2.7250E-02 2.9290E-02 2.6330E-02

1.5350E-02 1.8620E-02 9.4540E-03 3.5200E-02 1.5840E-02 1.3260E-02 3.9390E-03

1.2630E-02 1.0170E-02 6.6650E-03 2.3000E-03 1.7220E-02 1.2620E-02 9.6290E-03

5.7450E-03 1.7570E+00 1.1390E+00 2.0720E-01 2.8960E+00 1.1520E+00 2.0060E+00

1.5410E+00 4.1610E-01 7.6360E-01 1.0360E+00 9.8900E-01 2.5130E-01 8.2480E-01

8.5130E-01 1.8640E-01 1.8680E-01 6.3630E-01 5.0750E-01 3.8500E-01 1.6260E-01

2.3510E-01 1.3500E-01 1.0860E-02 1.2540E-02 1.2020E-02 8.5840E-03 1.1680E-02

7.8000E-03 3.4120E-03 3.1270E-02 1.8320E-02 4.0180E-02 1.7460E-02 8.4080E-02

7.9760E-02 5.3440E-02 8.8710E-02 2.0360E-02 5.5030E-02 3.8940E-02 5.1020E-02

2.4750E-03 2.2410E-02 3.8940E-02 2.0030E-02 1.8660E-02 3.5790E-02 2.5800E-02

1.6140E-02 5.5380E-02 5.7140E-02 3.3070E-02 9.3320E-03 1.4980E-02 4.6220E-02

5.5780E-02 2.3420E-02 4.0220E-03 1.2520E-02 1.4040E-02 9.1130E-03 4.9780E-02

2.7120E-02 3.4280E-02 2.5770E-02 6.9300E-03 4.6850E-02 6.6760E-02 2.9460E-02

3.6610E-03 1.0950E-02 9.8280E-03 9.8010E-03 3.0210E-02 1.7060E-02 1.3340E-02

1.9210E-02 2.2470E-02 1.4390E-02 7.4630E-03 1.0640E-02 1.6240E-02 1.2800E-02

1.1650E-02 5.2060E-02 2.2320E-02 2.8240E-02 1.5670E-02 9.6060E-03 1.6690E-02

1.0910E-02 1.5110E-02 2.6400E-02 1.1110E-02 9.6850E-03 3.9890E-03 7.6620E-03

8.0720E-03 5.0870E-03 3.0030E-03 7.5360E-03 9.9800E-03 9.0010E-03 7.4150E-03

1.1620E+00 3.3150E-02 2.2840E-01 2.1880E+00 8.6820E-01 9.6930E-01 1.2050E+00

2.1470E-01 8.2590E-01 8.1710E-01 6.1900E-02 2.9650E-01 6.3450E-01 4.1430E-01

2.5110E-02 2.6460E-01 4.1190E-01 4.3870E-01 6.0510E-02 1.6280E-01 1.3180E-01

4.5770E-03 8.2480E-03 9.3140E-03 7.2650E-03 8.0540E-03 4.7490E-03 2.3850E-03

2.0840E-02 6.4080E-03 2.1160E-02 2.3330E-02 2.5340E-02 7.1680E-02 5.8270E-02

4.8110E-02 2.6760E-03 2.6980E-02 3.4810E-02 4.5770E-02 1.4750E-04 4.0620E-03

2.1130E-02 3.0350E-02 4.7550E-03 2.0470E-02 2.3480E-02 1.6210E-02 4.4350E-02

2.3030E-02 2.1400E-02 1.3470E-02 4.2530E-03 1.6010E-02 3.7210E-02 3.6120E-02

9.0760E-04 4.6840E-03 9.5920E-03 1.1530E-02 2.2550E-02 3.0970E-02 2.5280E-02

1.2540E-02 6.1790E-04 1.0540E-02 4.0090E-02 4.8750E-02 5.7170E-04 4.7590E-03

7.5800E-03 9.9560E-03 1.6710E-02 1.6830E-02 6.1620E-03 1.1780E-02 1.2050E-02

1.1210E-02 7.2910E-03 3.5340E-03 9.8890E-03 1.0880E-02 9.9180E-03 2.5800E-02

3.0490E-02 1.7870E-02 4.8330E-03 2.3220E-03 1.0220E-02 1.0660E-02 1.1670E-02

1.7600E-02 7.4190E-03 5.3060E-03 3.7880E-03 4.5530E-03 4.8140E-03 4.0130E-03

2.5200E-03 2.5460E-03 6.5420E-03 7.3110E-03 6.2220E-03 6.4190E-03 3.4190E-02

1.6490E-01 1.2380E+00 1.0160E+00 2.8890E-01 1.6390E-02 4.6190E-01 4.5170E-01

1.0960E-02 8.8570E-02 2.3500E-01 3.6840E-01 1.2820E-03 4.2660E-02 2.4950E-01

2.7530E-01 1.6920E-02 8.0450E-02 8.0200E-02 1.5460E-03 4.1570E-03 4.5390E-03

3.9450E-03 4.1160E-03 2.1440E-03 1.2470E-03 1.0420E-02 2.0920E-03 7.4230E-03

1.6050E-02 3.1690E-03 3.6510E-02 4.8480E-02 1.3910E-02 6.2440E-05 4.5000E-03

2.6290E-02 2.4270E-02 1.9020E-05 2.0300E-04 4.1270E-03 2.3370E-02 5.8490E-04

7.7590E-03 1.4650E-02 8.9430E-03 2.5400E-02 5.9070E-03 9.7110E-03 1.0140E-02

1.0130E-03 4.7830E-03 1.2150E-02 2.8070E-02 1.9010E-04 1.0970E-03 4.1680E-03

7.8490E-03 6.5260E-03 2.2940E-02 1.1390E-02 4.8690E-03 3.4910E-05 1.0030E-03

1.0710E-02 3.8250E-02 3.4040E-05 8.9130E-04 4.6020E-03 5.9490E-03 7.0280E-03

1.0860E-02 1.7690E-03 5.8910E-03 4.4770E-03 6.5080E-03 4.3500E-03 1.0040E-03

3.9180E-03 7.0330E-03 5.4290E-03 8.7600E-03 2.3480E-02 6.8030E-03 6.5110E-04

3.3590E-04 3.2250E-03 8.4890E-03 5.3850E-03 8.8000E-03 3.7920E-03 2.1040E-03

2.3630E-03 2.1860E-03 1.9400E-03 2.4380E-03 1.3270E-03 5.7550E-04 3.0860E-03

4.2530E-03 3.3980E-03 3.9610E+00 4.1430E-01 3.3180E-02 5.8110E-03 1.1080E-03

9.1480E+00 1.7770E-01 6.2490E-02 1.9740E+00 4.3570E-01 2.0840E-02 3.2510E-03

2.8710E+00 4.2940E-01 3.2850E-02 2.2880E-03 1.7470E+00 1.9320E-02 1.3070E-02

4.2890E-02 1.9670E-02 7.3100E-03 1.7580E-03 1.3340E-02 5.4540E-03 2.3940E-03

1.0500E-02 3.4050E-02 1.1080E-02 1.9490E-03 1.4460E-01 3.2340E-02 5.8170E-03

7.0180E-04 1.7500E-01 5.6970E-02 1.1580E-02 1.1460E-03 5.2750E-01 1.6310E-01

2.9360E-02 2.6190E-03 1.4750E-01 1.8860E-02 1.0800E-03 6.9630E-05 5.2130E-02

2.5680E-02 9.5500E-03 1.5290E-03 6.8640E-02 5.6640E-02 2.5340E-02 4.3770E-03

2.7600E-01 7.8390E-02 1.9420E-02 2.8390E-03 1.2930E-01 5.4500E-02 1.5050E-02

1.8240E-03 1.1840E-01 7.7320E-02 2.5600E-02 3.5890E-03 3.9880E-01 1.0710E-01

2.2390E-02 2.3690E-03 4.1150E-02 4.0450E-02 3.4490E-02 6.7630E-02 4.6090E-02

2.0040E-02 3.4200E-03 1.9730E-01 4.9270E-02 7.6230E-03 1.3610E-03 4.3090E-02

1.5080E-02 5.8570E-03 1.2770E-03 9.2910E-02 3.8900E-02 9.8340E-03 1.6060E-03

5.0480E-02 4.5290E-02 2.0380E-02 6.9760E-04 7.3430E-02 3.0560E-02 6.6660E-03

6.5170E-04 7.2300E-02 4.6090E-02 1.3010E-02 1.4740E-03 4.7980E+00 6.9960E-01

5.1110E-02 8.1270E-03 3.7190E+00 3.9920E+00 9.9440E-02 9.1540E-01 7.4750E-01

3.4970E-01 1.5850E-02 1.5130E+00 2.9100E+00 3.7740E-01 3.0610E-02 8.2660E-01

6.4920E-01 7.4000E-03 2.4560E-02 1.7210E-02 1.1210E-02 5.8560E-03 9.3190E-03

6.1420E-03 2.3340E-03 8.7550E-03 2.1540E-02 1.1970E-02 5.2820E-03 5.0260E-02

7.0880E-02 2.6300E-02 5.3790E-03 6.9110E-02 6.9490E-02 4.6400E-02 1.0870E-02

1.8950E-01 2.4330E-01 1.4170E-01 2.7680E-02 5.8830E-02 6.5090E-02 1.4750E-02

8.9830E-04 3.3990E-02 2.1510E-02 1.1480E-02 7.2250E-03 5.8060E-02 2.2790E-02

2.5210E-02 2.1990E-02 1.0870E-01 1.3110E-01 5.6230E-02 1.7780E-02 7.0410E-02

4.7330E-02 3.4350E-02 1.3550E-02 8.1600E-02 3.4290E-02 4.8280E-02 2.3440E-02

1.3670E-01 1.8040E-01 8.6520E-02 2.0980E-02 4.1020E-02 4.0790E-02 1.4200E-02

5.3130E-02 2.7930E-02 1.8310E-02 1.4930E-02 8.1480E-02 8.6020E-02 3.8940E-02

6.5920E-03 2.3870E-02 1.9110E-02 7.3460E-03 4.0760E-03 4.6600E-02 3.5410E-02

2.8380E-02 8.9210E-03 4.2070E-02 3.2320E-02 1.2700E-02 1.0240E-02 4.4070E-02

2.5010E-02 1.8220E-02 5.4600E-03 5.1280E-02 1.9160E-02 2.8500E-02 1.1790E-02

4.2410E+00 7.6070E-01 4.8340E-02 1.2700E+00 3.7060E+00 1.2820E+00 3.6430E-01

6.7890E-01 4.0390E-01 1.7490E-01 3.3610E-01 1.7330E+00 1.5810E+00 2.1340E-01

3.5320E-01 6.5630E-01 1.7760E-01 1.2890E-02 1.4290E-02 1.2150E-02 8.4230E-03

6.5250E-03 5.3620E-03 2.5430E-03 7.0030E-03 1.3130E-02 1.1450E-02 6.4680E-03

1.4900E-02 4.6530E-02 4.3850E-02 1.6910E-02 2.2380E-02 5.8820E-02 4.9290E-02

3.1190E-02 5.2390E-02 1.7110E-01 1.6600E-01 9.2310E-02 2.0570E-02 5.0990E-02

3.2580E-02 7.5450E-03 2.0790E-02 1.6690E-02 1.4940E-02 7.4300E-03 3.7890E-02

2.0910E-02 2.0470E-02 2.3350E-02 3.9360E-02 8.8680E-02 8.3520E-02 4.0050E-02

3.3280E-02 4.2420E-02 3.3510E-02 2.4620E-02 4.1620E-02 4.0290E-02 2.9460E-02

3.8650E-02 4.1770E-02 1.2080E-01 1.1840E-01 5.8540E-02 4.0780E-02 2.9130E-02

7.1300E-03 3.6310E-02 2.0980E-02 2.1410E-02 1.2750E-02 2.9290E-02 6.6440E-02

5.1390E-02 2.3520E-02 1.3090E-02 1.4640E-02 1.1280E-02 4.4590E-03 1.9310E-02

3.1440E-02 2.4810E-02 1.9900E-02 3.3650E-02 2.0380E-02 1.2600E-02 1.1250E-02

2.3080E-02 2.3830E-02 1.6720E-02 1.0590E-02 2.7260E-02 2.3870E-02 1.6690E-02

2.0750E-02 3.1750E+00 5.8300E-01 3.4580E-01 2.1460E+00 2.2090E+00 1.1810E-01

4.3120E-01 3.9360E-01 2.6400E-01 5.5940E-02 5.8840E-01 1.4760E+00 7.5940E-01

1.3370E-01 4.4290E-01 3.1380E-01 5.8130E-03 1.0260E-02 1.0850E-02 8.6760E-03

4.3220E-03 4.0380E-03 2.3190E-03 5.2520E-03 7.4550E-03 9.7170E-03 6.2670E-03

3.7110E-03 2.0430E-02 3.7840E-02 2.9710E-02 5.1970E-03 3.0020E-02 4.0220E-02

4.4190E-02 8.6580E-03 8.0970E-02 1.3190E-01 1.3970E-01 6.0380E-03 2.7300E-02

3.3820E-02 1.6620E-02 1.1010E-02 1.3580E-02 1.3740E-02 6.5100E-03 1.9400E-02

2.2560E-02 1.8380E-02 1.6160E-02 1.2140E-02 4.4180E-02 7.2550E-02 5.9320E-02

1.3160E-02 3.0350E-02 2.9100E-02 2.7010E-02 1.6060E-02 3.6340E-02 2.5230E-02

3.4900E-02 9.9650E-03 5.5930E-02 9.8200E-02 9.0690E-02 3.6670E-02 1.5990E-02

5.0150E-03 2.1160E-02 2.0060E-02 1.8680E-02 8.6970E-03 8.5210E-03 3.6370E-02

4.6180E-02 3.6510E-02 6.8270E-03 9.9720E-03 1.0730E-02 5.0600E-03 6.3620E-03

2.0940E-02 2.0920E-02 2.3370E-02 2.5240E-02 1.1160E-02 1.3340E-02 8.6960E-03

1.0360E-02 1.9270E-02 1.5220E-02 1.0810E-02 1.1250E-02 2.2790E-02 1.4150E-02

1.8240E-02 2.0640E+00 7.9430E-02 7.9530E-01 2.2630E+00 2.9810E-02 1.9770E-01

3.3250E-01 2.4440E-01 7.8320E-03 1.1780E-01 7.0960E-01 1.0820E+00 4.3890E-02

2.2570E-01 3.2400E-01 2.4040E-03 6.4430E-03 8.0000E-03 6.6660E-03 2.6570E-03

2.7170E-03 1.8320E-03 3.5010E-03 3.8550E-03 6.8830E-03 4.8080E-03 7.4400E-04

6.4150E-03 2.1170E-02 3.2820E-02 6.3850E-04 1.0330E-02 2.8670E-02 4.1260E-02

3.8680E-05 2.2260E-02 7.9930E-02 1.3860E-01 1.3840E-03 1.0770E-02 2.3760E-02

1.9950E-02 4.9720E-03 1.0410E-02 9.0380E-03 5.2620E-03 7.4010E-03 1.9810E-02

1.5820E-02 7.9750E-03 3.0590E-03 1.7640E-02 4.3440E-02 6.0840E-02 3.9990E-03

1.7310E-02 2.4000E-02 2.1630E-02 4.2350E-03 2.1990E-02 2.7170E-02 2.1620E-02

1.4970E-03 1.8300E-02 6.0350E-02 9.3000E-02 2.7840E-02 6.5940E-03 4.0750E-03

1.0170E-02 1.7990E-02 1.2110E-02 5.4670E-03 2.2520E-03 1.4300E-02 3.1890E-02

3.6780E-02 3.2530E-03 6.4160E-03 7.2050E-03 4.9060E-03 1.7990E-03 9.7180E-03

1.7180E-02 1.9240E-02 1.6830E-02 5.1520E-03 1.1600E-02 5.3620E-03 3.8330E-03

1.2440E-02 1.3120E-02 7.7040E-03 3.3890E-03 1.4710E-02 1.5820E-02 1.0380E-02

2.2080E-02 1.4010E-01 1.4080E+00 5.3740E-03 5.9330E-02 1.9500E-01 1.4240E-01

9.4330E-04 1.6240E-02 1.5230E-01 7.8770E-01 1.1830E-02 8.2740E-02 2.0220E-01

7.3260E-04 2.9420E-03 4.2150E-03 3.6480E-03 1.2690E-03 1.2650E-03 1.0130E-03

1.7510E-03 1.5720E-03 3.6840E-03 1.9190E-03 1.0920E-04 1.4280E-03 7.5060E-03

2.1380E-02 7.5510E-06 1.5500E-03 1.3610E-02 2.3390E-02 4.2320E-06 7.7150E-05

3.4770E-02 8.5460E-02 2.2770E-04 2.9190E-03 1.1270E-02 1.3520E-02 1.7190E-03

5.7650E-03 4.0490E-03 2.9580E-03 1.8240E-03 1.1470E-02 9.5710E-03 2.6320E-03

4.3700E-04 6.0260E-03 1.7580E-02 3.8590E-02 7.5990E-04 7.1660E-03 1.3800E-02

1.1230E-02 5.0480E-04 8.6340E-03 1.9300E-02 9.1530E-03 1.5790E-05 3.6410E-03

2.2590E-02 5.8670E-02 1.5040E-02 1.6840E-03 2.4390E-03 3.6710E-03 1.0990E-02

5.4770E-03 2.7280E-03 5.6710E-04 3.4310E-03 1.5610E-02 2.2880E-02 1.2160E-03

3.2550E-03 3.3060E-03 3.2180E-03 2.2140E-04 2.7960E-03 1.0240E-02 1.0540E-02

8.4120E-03 1.8230E-03 6.7930E-03 2.4400E-03 1.0630E-03 5.7770E-03 7.9710E-03

3.7430E-03 6.1410E-04 6.2530E-03 1.1480E-02 3.8000E-03 1.1190E+00 2.4540E-01

8.7550E-01 3.5850E-01 1.1170E-01 2.0970E-02 2.1960E+00 7.3100E-01 1.9390E-01

4.7700E-02 2.3710E+00 1.2300E-01 3.1290E-02 2.1990E-02 1.4270E-02 7.5890E-03

3.1510E-03 1.3520E-02 1.1170E-02 5.3270E-03 3.3750E-02 7.5790E-02 4.8800E-02

2.6120E-02 1.9170E-01 1.0590E-01 4.8840E-02 1.5370E-02 2.1980E-01 9.0620E-02

2.9520E-02 6.0550E-03 1.0670E-03 1.1010E-03 7.8110E-04 3.2420E-04 2.0050E-02

8.4750E-03 3.0650E-03 8.3380E-04 7.8660E-02 2.2900E-02 6.0000E-03 1.6820E-03

3.9790E-02 3.6110E-02 3.2490E-02 2.5260E-02 8.5040E-02 7.8010E-02 4.7460E-02

1.7730E-02 1.3740E-01 6.0440E-02 2.7370E-02 1.1370E-02 8.2240E-02 6.0060E-02

3.3110E-02 1.1730E-02 8.1250E-03 3.6100E-03 1.3670E-03 3.7160E-04 6.3350E-02

2.9970E-02 1.1760E-02 1.2230E-01 7.1660E-02 2.6800E-02 4.8110E-03 4.1710E-02

4.4810E-02 4.7160E-02 4.0410E-02 1.4830E-02 6.0220E-03 2.2580E-03 7.3690E-04

1.2550E-02 9.5230E-03 5.8170E-03 3.1010E-03 2.4560E-02 3.0750E-02 3.2640E-02

2.0430E-02 4.1600E-02 4.9300E-02 4.1030E-02 2.2840E-02 6.5540E-02 5.4770E-02

3.4620E-02 1.7210E-02 9.2050E-01 2.9750E-01 3.4340E-01 2.5120E-01 1.2510E-01

3.0060E-01 1.0970E+00 7.3340E-01 2.4000E-01 4.0080E-01 1.4170E+00 7.6310E-02

1.2140E-02 8.1480E-03 7.8980E-03 7.1720E-03 1.2170E-02 5.9620E-03 4.4000E-03

2.5310E-02 5.5180E-02 4.2150E-02 1.6060E-02 6.9660E-02 7.2900E-02 6.9470E-02

5.9330E-02 2.6600E-02 1.0350E-01 8.7990E-02 4.1420E-02 9.6200E-04 2.1880E-04

4.6310E-04 8.5280E-04 7.1060E-03 7.7060E-03 5.9820E-03 2.6810E-03 1.5670E-02

4.0060E-02 2.1170E-02 5.4030E-03 3.5470E-02 3.3570E-02 2.1280E-02 9.8550E-03

7.3600E-02 1.5130E-02 2.8950E-02 5.3510E-02 3.8100E-02 7.3280E-02 4.8900E-02

2.2440E-02 5.0040E-02 2.3510E-02 2.8910E-02 3.8280E-02 1.3250E-03 3.8320E-03

3.2860E-03 1.7150E-03 3.7230E-02 2.8410E-02 1.4460E-02 6.7660E-02 3.0450E-02

3.9330E-02 3.0650E-02 4.6220E-02 4.9280E-02 2.7380E-02 7.7240E-03 5.0020E-03

6.7680E-03 4.3320E-03 1.7880E-03 8.1230E-03 4.3940E-03 4.8020E-03 5.6770E-03

1.8420E-02 3.4530E-02 2.0200E-02 8.1290E-03 5.2930E-02 3.3180E-02 2.0180E-02

9.7590E-03 5.2220E-02 2.3520E-02 2.5710E-02 2.7700E-02 5.5850E-02 2.1570E-01

2.4710E-01 1.5860E-01 4.9550E-02 2.0860E-01 5.9340E-01 7.2540E-01 6.9200E-02

3.5410E-01 8.3950E-01 3.6430E-03 7.9010E-03 6.9330E-03 4.8680E-03 8.0970E-03

5.4080E-03 1.4790E-03 1.6880E-02 3.8370E-02 2.2460E-02 1.3960E-02 9.9010E-03

4.7330E-02 6.2630E-02 6.1020E-02 1.2750E-03 1.8210E-02 5.9450E-02 9.4080E-02

1.7220E-04 6.3260E-04 5.7220E-04 2.1920E-04 1.9950E-03 4.8280E-03 5.6790E-03

3.3840E-03 3.7340E-03 1.0870E-02 2.2050E-02 1.7680E-02 3.2150E-02 1.6200E-02

1.0630E-02 7.6620E-03 1.2540E-02 4.9510E-02 3.7710E-02 1.4360E-02 1.3440E-02

2.3550E-02 3.8780E-02 4.1100E-02 8.0700E-03 3.3770E-02 3.1560E-02 2.0170E-02

1.5770E-04 8.6190E-04 2.2690E-03 3.3820E-03 1.8940E-02 2.1070E-02 1.3110E-02

1.3060E-02 4.9050E-02 3.5380E-02 1.5300E-02 5.1920E-02 1.7890E-02 9.3820E-03

8.2960E-03 1.6300E-03 3.3110E-03 4.1440E-03 2.8420E-03 2.1100E-03 5.2470E-03

4.7120E-03 3.0610E-03 1.2280E-02 2.9010E-02 1.0020E-02 2.8780E-03 4.4800E-02

2.1990E-02 8.4280E-03 2.2080E-03 2.0560E-02 3.2410E-02 2.2670E-02 1.0440E-02

1.8340E+00 3.6270E-01 5.5390E-02 6.5990E+00 2.4100E+00 5.2680E-01 9.4220E-02

2.0550E+00 8.8490E-01 4.7870E-02 2.5420E-01 1.8470E-01 7.4340E-02 2.8020E-02

7.4810E-02 2.8440E-02 1.0240E-02 5.2320E-02 1.0730E-01 3.9900E-02 6.3310E-03

1.6750E-01 7.1760E-02 2.7180E-02 7.0780E-03 7.1210E-02 3.7300E-02 1.5850E-02

4.1180E-03 6.6760E-02 2.4500E-02 7.1200E-03 1.4980E-03 2.6800E-01 7.8130E-02

1.5550E-02 1.7450E-03 1.9050E-01 4.8690E-02 1.9760E-02 8.4650E-03 1.9290E-01

6.7100E-02 2.0190E-02 4.9980E-03 9.9280E-02 3.5650E-02 1.0810E-02 2.7230E-03

1.8280E-01 6.5340E-02 2.0910E-02 6.1100E-03 6.7310E-02 2.6850E-02 8.3410E-03

1.7280E-03 3.8030E-02 1.7000E-02 5.5070E-03 1.1280E-03 6.0310E-02 2.6760E-02

2.2650E-03 6.4710E-02 3.0040E-02 1.4170E-02 5.0310E-03 4.4260E-02 1.8130E-02

6.9350E-03 2.1870E-03 3.2520E-02 1.9890E-02 9.2340E-03 2.5740E-03 1.7450E-02

7.7540E-03 2.6610E-03 9.2320E-04 1.2970E-02 9.4040E-03 4.8090E-03 1.5280E-03

1.3010E-02 6.3180E-03 3.1760E-03 1.3310E-03 1.5330E-02 6.3660E-03 2.0800E-03

4.5590E-04 1.5230E+00 3.7090E-01 1.8120E+00 2.5620E+00 2.2660E+00 6.1130E-01

1.1550E+00 4.7410E-01 6.0890E-01 1.1690E-01 8.1870E-02 5.9680E-02 6.6800E-02

3.9490E-02 3.2960E-02 1.3230E-02 3.9220E-02 5.5580E-02 3.4940E-02 2.4680E-02

4.8240E-02 7.4790E-02 5.2220E-02 3.0260E-02 2.5450E-02 2.7570E-02 2.5260E-02

1.8050E-02 9.3770E-03 3.3450E-02 2.3570E-02 8.6450E-03 7.7600E-02 1.1330E-01

6.2730E-02 1.7080E-02 4.8560E-02 1.0690E-01 3.4230E-02 1.0060E-02 4.9040E-02

8.9560E-02 5.4090E-02 2.1660E-02 2.0260E-02 4.9610E-02 3.1250E-02 1.2090E-02

4.8320E-02 8.5510E-02 5.1930E-02 2.1060E-02 1.6410E-02 2.9160E-02 2.2500E-02

9.7960E-03 1.0140E-02 1.5020E-02 1.4640E-02 6.5030E-03 3.5110E-02 1.3880E-02

1.8140E-02 3.0030E-02 3.0540E-02 1.5960E-02 9.1950E-03 1.4250E-02 2.0000E-02

1.2690E-02 6.8220E-03 1.9890E-02 1.2020E-02 8.9480E-03 7.0830E-03 5.2870E-03

7.3150E-03 6.2310E-03 2.8680E-03 9.7260E-03 5.9020E-03 3.4790E-03 2.4240E-03

6.3180E-03 5.9930E-03 3.8000E-03 1.6860E-03 5.0430E-03 6.1790E-03 4.6590E-03

2.2960E-03 9.8050E-01 1.4920E-01 1.8070E+00 1.1500E+00 1.7320E+00 4.3300E-01

6.3870E-01 4.2270E-01 4.2210E-02 9.4960E-02 5.1700E-02 3.9120E-02 1.9790E-02

2.2750E-02 1.3730E-02 2.6130E-02 2.2610E-02 3.2610E-02 2.1570E-02 1.1500E-02

3.1600E-02 5.1090E-02 4.2840E-02 5.4430E-03 1.6720E-02 1.9760E-02 2.2240E-02

5.2110E-04 8.7310E-03 2.0840E-02 1.9760E-02 1.5390E-02 6.2620E-02 6.2900E-02

4.0270E-02 1.9720E-02 3.4620E-02 5.9810E-02 1.8780E-02 1.0550E-02 3.7710E-02

5.4690E-02 4.0660E-02 3.1290E-03 1.6720E-02 3.0480E-02 2.4980E-02 1.1590E-02

3.6530E-02 5.1330E-02 3.8520E-02 2.3030E-03 1.3520E-02 1.7050E-02 1.8330E-02

6.0390E-04 9.1800E-03 8.2930E-03 1.2340E-02 1.3790E-02 1.8820E-02 1.2290E-02

1.4160E-02 1.5960E-02 1.9490E-02 7.3600E-03 4.3370E-03 9.2570E-03 1.2900E-02

9.1920E-03 9.2340E-03 8.9440E-03 1.0080E-02 3.7800E-03 1.0740E-03 4.2510E-03

4.2180E-03 4.9320E-03 6.4860E-03 3.1130E-03 2.9890E-03 1.7680E-03 3.1760E-03

3.7990E-03 3.1360E-03 1.8510E-03 1.1250E-03 3.6320E-03 3.8420E-03 3.5200E-03

3.6930E-02 1.1990E-01 1.2410E+00 1.0220E+00 8.5090E-02 4.9570E-01 1.6510E-01

1.4550E-02 2.9790E-02 2.6890E-02 2.6060E-02 8.1870E-03 1.0730E-02 9.2470E-03

1.3060E-02 6.4530E-03 2.0420E-02 1.1350E-02 1.0040E-03 1.1710E-02 2.1750E-02

3.3840E-02 6.9890E-05 5.9340E-03 1.2080E-02 1.3970E-02 7.9830E-05 6.0290E-04

6.1850E-03 1.8320E-02 1.7440E-03 1.6970E-02 4.0220E-02 3.1470E-02 8.4650E-03

1.0020E-02 1.8830E-02 2.8980E-02 1.8740E-03 9.5940E-03 2.4880E-02 3.4910E-02

6.3370E-04 2.6670E-03 1.1340E-02 2.2780E-02 2.6690E-03 9.6680E-03 2.3770E-02

3.2950E-02 1.9670E-04 2.3540E-03 9.3440E-03 1.3580E-02 8.1160E-05 5.6130E-04

6.4400E-03 8.0110E-03 3.1100E-03 1.4650E-02 4.5430E-03 5.0300E-03 9.1940E-03

7.3590E-03 6.9490E-03 9.4830E-04 3.6860E-03 5.8670E-03 7.4830E-03 2.5740E-03

7.0830E-03 3.7800E-03 2.4130E-03 3.0520E-04 7.7020E-04 2.8440E-03 3.3290E-03

3.2420E-03 1.2550E-03 1.8410E-03 8.3890E-04 1.3300E-03 1.6860E-03 1.8510E-03

1.1910E-03 1.2800E-04 1.1350E-03 2.4060E-03 2.3860E-03 2.4860E+00 3.3680E-01

4.1530E-02 7.6100E+00 3.5540E-01 1.7220E-01 2.8220E-01 1.3760E-01 5.3360E-02

2.3340E-02 5.0690E-02 2.3890E-02 5.3460E-03 3.9590E-03 3.6410E-02 7.5760E-03

2.0900E-03 9.9810E-02 3.8610E-02 1.2810E-02 2.4240E-03 6.2700E-02 2.6870E-02

1.1190E-02 2.6310E-03 7.3600E-02 3.0710E-02 1.0370E-02 1.7860E-03 1.4280E-01

4.6370E-02 6.7140E-03 1.0230E-03 1.4400E-01 5.0400E-02 1.1570E-02 1.8710E-03

4.3140E-02 1.8120E-02 7.2610E-03 2.1890E-03 8.1260E-02 3.1130E-02 9.2390E-03

1.8090E-03 2.0640E-01 5.5430E-02 1.4690E-02 2.0890E-03 9.4320E-02 2.7670E-02

7.4210E-03 1.4790E-03 1.7870E-01 5.9390E-02 1.6610E-02 3.2040E-03 9.2000E-02

2.4720E-02 1.3910E-02 4.2180E-02 2.1710E-02 7.9930E-03 1.7030E-03 6.0030E-02

2.1180E-02 6.7380E-03 1.7560E-03 1.6980E-02 7.0160E-03 2.2390E-03 4.3480E-04

2.2520E-02 1.0520E-02 3.7110E-03 9.7310E-04 2.0780E-02 1.8620E-02 6.5530E-03

2.5810E-03 2.0730E-02 1.0250E-02 3.6480E-03 6.3680E-04 2.4150E-02 1.2500E-02

5.9370E-03 2.1520E-03 2.5460E+00 3.8500E-01 2.6780E+00 3.6670E+00 1.4520E-01

1.0280E-01 1.8120E-01 1.1320E-01 4.2960E-02 3.3710E-02 1.7580E-02 1.3150E-02

3.1670E-03 1.7090E-02 1.5910E-02 3.9090E-03 3.3540E-02 4.6510E-02 2.9060E-02

1.4180E-02 2.1170E-02 3.1660E-02 1.7920E-02 1.2220E-02 2.1910E-02 3.4660E-02

2.4840E-02 1.1890E-02 5.8530E-02 5.1870E-02 4.0530E-02 6.3750E-03 6.2240E-02

5.7010E-02 3.6470E-02 1.0930E-02 1.8100E-02 2.0420E-02 1.1450E-02 6.7330E-03

2.6520E-02 3.6540E-02 2.5630E-02 1.0000E-02 5.5380E-02 1.0820E-01 4.3010E-02

1.6360E-02 2.2020E-02 5.0660E-02 2.4080E-02 8.1910E-03 4.2330E-02 8.6780E-02

5.3250E-02 1.8690E-02 4.7150E-02 4.9470E-02 8.7450E-03 2.4670E-02 1.6080E-02

1.1160E-02 6.9160E-03 2.1190E-02 2.8170E-02 1.5890E-02 6.6220E-03 8.3550E-03

6.6480E-03 4.1750E-03 1.9910E-03 9.2600E-03 9.1720E-03 7.8120E-03 3.8930E-03

1.6620E-02 1.0630E-02 8.5830E-03 2.9470E-03 1.1740E-02 7.6990E-03 5.3700E-03

3.3330E-03 1.2500E-02 1.0560E-02 6.8170E-03 5.2380E-03 1.9670E+00 8.2310E-01

2.6200E+00 1.4310E+00 4.9950E-02 7.4210E-02 1.3740E-01 8.4070E-02 1.8900E-02

1.7600E-02 1.1540E-02 2.3760E-03 7.6920E-03 1.2610E-02 7.3590E-03 9.1240E-03

2.4110E-02 3.3320E-02 2.5370E-02 7.3240E-03 1.2760E-02 2.5190E-02 1.7050E-02

4.6610E-03 1.7180E-02 2.5200E-02 2.2870E-02 1.5870E-02 4.9110E-02 2.5710E-02

2.7450E-02 2.1250E-02 4.5530E-02 3.4370E-02 2.3780E-02 7.2590E-03 1.1440E-02

1.4770E-02 8.9990E-03 6.3000E-03 2.1680E-02 2.4080E-02 2.1530E-02 1.4680E-02

4.2970E-02 7.4950E-02 3.4590E-02 4.9410E-03 1.8460E-02 3.5220E-02 2.0110E-02

8.0170E-03 3.6880E-02 6.0730E-02 4.5810E-02 2.7400E-02 3.4150E-02 1.7140E-02

1.1480E-02 1.3030E-02 1.2850E-02 6.5240E-03 6.7380E-03 1.5890E-02 1.8810E-02

1.2420E-02 3.4710E-03 5.1320E-03 4.6790E-03 2.5850E-03 2.7380E-03 6.8140E-03

6.4140E-03 6.7290E-03 1.2470E-02 6.1680E-03 6.7390E-03 3.7660E-03 5.3870E-03

6.4650E-03 6.1030E-03 3.2350E-03 5.9360E-03 6.8150E-03 8.0820E-03 5.1910E-03

2.6490E-01 9.3580E-01 2.0430E+00 2.2700E-02 4.1960E-02 6.2300E-02 4.5610E-02

8.9090E-03 1.5770E-02 7.2610E-03 1.5840E-03 3.3140E-03 6.9690E-03 8.1310E-03

1.1900E-03 9.9400E-03 2.0450E-02 2.9680E-02 8.4330E-04 7.8950E-03 1.1790E-02

2.1010E-02 1.2600E-04 5.3340E-03 1.4930E-02 2.6260E-02 3.1570E-03 1.7970E-02

3.7370E-02 2.0260E-02 5.3260E-03 2.2330E-02 3.3950E-02 2.1530E-02 2.1890E-03

6.7320E-03 8.9400E-03 1.0210E-02 9.5340E-04 6.5450E-03 1.7930E-02 2.4210E-02

2.0890E-03 1.6360E-02 3.4580E-02 5.8240E-02 7.9120E-04 5.2580E-03 1.4950E-02

3.1450E-02 1.0830E-03 8.5930E-03 3.0100E-02 6.1040E-02 1.6460E-02 1.4520E-02

2.1010E-02 3.9910E-03 1.0850E-02 9.0550E-03 5.2320E-03 1.7570E-03 6.6220E-03

1.2420E-02 1.5050E-02 1.0630E-03 3.4250E-03 3.7050E-03 2.2550E-03 5.8440E-04

2.7730E-03 5.6330E-03 5.9010E-03 8.3130E-03 3.4210E-03 4.0400E-03 3.6240E-03

1.6580E-03 5.3020E-03 4.5980E-03 2.6010E-03 2.1520E-03 5.2380E-03 5.1900E-03

4.8840E-03 3.1890E-01 7.5790E-02 8.5010E-02 4.9490E-02 2.7640E-02 1.4620E-02

1.3550E-01 7.0340E-02 1.3210E-02 1.7730E-02 3.5360E-02 1.4960E-02 7.0600E-03

2.4480E-02 1.5490E-02 8.4380E-03 3.5540E-03 1.2310E-02 7.1390E-03 3.9540E-03

1.4220E-03 2.5910E-03 1.9190E-03 1.2310E-03 5.2170E-04 4.3840E-02 2.1870E-02

9.0010E-03 2.7510E-03 6.5800E-02 4.1760E-02 1.7480E-02 3.9080E-03 1.9630E-02

1.6170E-02 1.1760E-02 7.5480E-03 3.5070E-02 2.3820E-02 1.3370E-02 5.6160E-03

1.0970E-01 4.3560E-02 1.5560E-02 5.5540E-03 3.0100E-02 2.0450E-02 1.2710E-02

7.2190E-03 8.5760E-03 4.1640E-03 1.7940E-03 5.6510E-04 1.2870E-01 2.7860E-02

8.1300E-03 8.9800E-02 3.5480E-02 1.2570E-02 4.0050E-03 9.4960E-02 4.6450E-02

2.3440E-02 1.1900E-02 3.3320E-02 1.7700E-02 6.8680E-03 1.4670E-03 8.5460E-03

6.5540E-03 4.1980E-03 2.2280E-03 3.0300E-02 2.3330E-02 1.2800E-02 7.3360E-03

1.2700E-02 1.0480E-02 7.0970E-03 3.4580E-03 1.3800E-02 8.9900E-03 5.2690E-03

2.7130E-03 2.0570E-01 3.0950E-02 3.6530E-02 3.0350E-02 2.0050E-02 6.8850E-02

2.7340E-02 4.9340E-02 1.1820E-02 1.4940E-02 1.7630E-02 5.5470E-03 9.2260E-03

8.8100E-03 8.6730E-03 8.9750E-03 2.8330E-03 4.5710E-03 4.7100E-03 4.1160E-03

1.1670E-03 5.8130E-04 9.7510E-04 1.2450E-03 1.5250E-02 1.5460E-02 1.3220E-02

7.6830E-03 3.4350E-02 1.2420E-02 2.0990E-02 1.7790E-02 1.3600E-02 1.0140E-02

7.8750E-03 5.4220E-03 1.5680E-02 9.8790E-03 1.1970E-02 1.4360E-02 1.1020E-02

5.1300E-02 3.8220E-02 1.6010E-02 1.3280E-02 1.1870E-02 1.1440E-02 1.0420E-02

8.6150E-04 3.5490E-03 3.3990E-03 2.2040E-03 2.7860E-02 6.5770E-02 1.6280E-02

1.8810E-02 3.9020E-02 2.5900E-02 1.0290E-02 2.2010E-02 4.5480E-02 3.4120E-02

1.6900E-02 1.3510E-02 7.3770E-03 1.0340E-02 7.4200E-03 4.8720E-03 2.7100E-03

3.0820E-03 3.6840E-03 2.0200E-02 1.2790E-02 1.3390E-02 3.1560E-03 9.6700E-03

6.0390E-03 4.3560E-03 2.4600E-03 6.2820E-03 5.3380E-03 4.8870E-03 4.1100E-03

1.0400E-02 1.4990E-02 1.7680E-02 1.5810E-02 1.3180E-02 4.8780E-02 1.0920E-02

5.9120E-03 7.0400E-03 5.5460E-03 6.5150E-03 9.2150E-04 5.3920E-03 6.0250E-03

5.5160E-03 1.2240E-04 1.6990E-03 2.8280E-03 3.2870E-03 1.2160E-04 6.6360E-04

7.3870E-04 5.5500E-04 2.8660E-03 9.1410E-03 8.7820E-03 5.0930E-03 2.7440E-03

2.2560E-02 1.3260E-02 3.7210E-03 6.3840E-03 5.5160E-03 3.9670E-03 2.4410E-03

1.2010E-03 9.4150E-03 9.2220E-03 5.9940E-03 3.3440E-03 5.5650E-03 2.1290E-02

2.7470E-02 3.5680E-03 6.8650E-03 7.1370E-03 5.8500E-03 5.7980E-05 5.0710E-04

1.7060E-03 2.6830E-03 8.1290E-03 1.6280E-02 3.0070E-02 4.6050E-03 1.0520E-02

1.8130E-02 1.3780E-02 8.9540E-03 9.6640E-03 1.8650E-02 2.1570E-02 9.6410E-04

9.1180E-03 6.2800E-03 2.4670E-03 9.1870E-04 2.6930E-03 2.2850E-03 1.2610E-03

1.0100E-02 7.3350E-03 3.1560E-03 4.0510E-03 4.5200E-03 3.7580E-03 2.0660E-03

8.5100E-04 1.8290E-03 3.2280E-03 3.0130E-03 2.1390E-03 5.5340E+00 5.5640E-01

1.5870E-01 2.0120E+00 2.9010E-01 4.8850E-02 2.7550E-02 4.4600E-02 1.6530E-02

3.4170E-03 1.1960E+00 1.3600E-01 1.9720E-02 2.7850E-03 1.4670E-01 4.5930E-02

1.2440E-02 1.8490E-03 1.5320E-01 5.3670E-02 1.3270E-02 1.4730E-03 1.4760E-01

2.8750E-02 1.0570E-02 3.4810E-03 2.7280E-01 3.7670E-02 1.1950E-02 2.8390E-03

4.1140E-01 7.6160E-02 1.5930E-02 3.3600E-03 3.2250E-01 6.4070E-02 1.4490E-02

2.5000E-03 8.6100E-01 1.1630E-01 1.3450E-02 2.4280E-03 1.1750E+00 1.6950E-01

2.8450E-02 4.8730E-03 1.3740E-01 5.3120E-02 1.6120E-02 2.8230E-03 2.9750E-02

9.5060E-03 1.4230E-03 4.4490E-02 1.3700E-02 4.0750E-03 1.1870E-03 1.1860E-01

3.6320E-02 1.5010E-02 4.2840E-03 1.3470E+01 4.1150E-01 6.4750E-02 2.7010E-02

2.9740E+01 3.6610E+00 3.2730E-01 4.1210E-02 9.0390E-02 5.5060E-02 2.6100E-02

3.2330E-03 5.4060E+00 1.7920E-01 8.1200E-03 3.1620E-03 1.7010E+01 2.1320E+00

1.0490E-01 9.6880E-03 6.2010E+00 5.3110E-01 8.5340E-01 8.6840E-01 1.6440E-01

2.2040E-02 2.6190E-02 1.6300E-02 8.6240E-03 5.2650E-02 8.8060E-01 1.5100E-01

2.2410E-02 3.1410E-02 7.0980E-02 4.1120E-02 1.4440E-02 4.6040E-02 7.5480E-02

6.9610E-02 1.5550E-02 3.8260E-02 7.9440E-02 1.7780E-02 6.8260E-03 6.3120E-02

1.5930E-01 2.4490E-02 9.8670E-03 7.4030E-02 2.3860E-01 6.8270E-02 1.7050E-02

3.7420E-02 2.1270E-01 6.4760E-02 1.6500E-02 1.1320E-01 5.4210E-01 1.2700E-01

1.4680E-02 6.8970E-02 8.5980E-01 1.7820E-01 3.2240E-02 4.0250E-02 6.4460E-02

4.4640E-02 1.8380E-02 1.6360E-02 1.0620E-02 5.5690E-03 1.7560E-02 2.0990E-02

9.9830E-03 2.8480E-03 3.6150E-02 6.4710E-02 2.3960E-02 1.4070E-02 2.2720E+00

8.7430E+00 3.8160E-01 3.8810E-02 1.2610E+00 2.1120E+01 4.2750E+00 3.8550E-01

7.2300E-02 3.6410E-02 1.5610E-02 1.6320E-02 8.0420E-01 3.4770E+00 1.8720E-01

5.1560E-03 2.1210E+00 1.0680E+01 2.5000E+00 1.2640E-01 4.6680E+00 3.2380E-01

6.8640E-01 4.0350E-01 1.6530E-02 1.3600E-02 1.5310E-02 9.4580E-03 9.6210E-03

4.7360E-02 6.5450E-01 1.1930E-01 5.9010E-03 2.6670E-02 5.0220E-02 3.5600E-02

1.5710E-03 4.6410E-02 5.0710E-02 5.9300E-02 1.4710E-02 2.9680E-02 5.2680E-02

1.0450E-02 1.9080E-02 5.4050E-02 1.0410E-01 1.5270E-02 1.5930E-02 6.6300E-02

1.6270E-01 5.2230E-02 8.8750E-03 3.3480E-02 1.7380E-01 5.3910E-02 1.3020E-02

1.2650E-01 3.8240E-01 9.7020E-02 1.5350E-02 6.8620E-02 6.6420E-01 1.4400E-01

8.2660E-03 3.3360E-02 4.4790E-02 3.9360E-02 7.8170E-03 1.0050E-02 6.6300E-03

6.6820E-03 1.3300E-02 1.3260E-02 6.1470E-03 1.4960E-02 2.3940E-02 4.7430E-02

1.8780E-02 2.3370E-01 2.4170E+00 5.5820E+00 2.5310E-01 1.0150E-01 1.4420E+00

1.5350E+01 3.3240E+00 5.4240E-02 1.9210E-02 1.8340E-02 1.3970E-02 7.8250E-02

9.4390E-01 2.2020E+00 1.2950E-01 1.0020E-01 2.4990E+00 7.0900E+00 1.8930E+00

1.1030E-01 3.5450E-01 4.7720E-01 1.1020E-02 6.0190E-03 1.1500E-02 7.6790E-03

1.3640E-03 1.0410E-02 3.8110E-02 5.0290E-01 1.7250E-04 6.7500E-03 2.2190E-02

5.3580E-02 8.8060E-05 1.8950E-03 3.6590E-02 5.7690E-02 6.4120E-03 1.2330E-02

2.1600E-02 2.9930E-02 6.0910E-03 1.8900E-02 4.0880E-02 6.3390E-02 3.3590E-03

1.7050E-02 5.2390E-02 1.2720E-01 1.1620E-03 9.9360E-03 2.7210E-02 1.5400E-01

2.3780E-03 1.4600E-02 9.6250E-02 2.8870E-01 2.4130E-03 1.6950E-02 5.5200E-02

5.2520E-01 7.3500E-04 9.2140E-03 2.7810E-02 4.6130E-02 3.0150E-03 7.8040E-03

5.4950E-03 2.3880E-03 5.8450E-03 9.5010E-03 7.5380E-03 4.2790E-03 1.4050E-02

1.8770E-02 3.2720E-02 5.2670E-02 2.6470E-01 1.8300E+00 3.4820E+00 2.2830E-02

1.0610E-01 1.1000E+00 1.2210E+01 3.6150E-02 7.6570E-03 1.9810E-02 7.3110E-03

7.2010E-03 9.8730E-02 7.2260E-01 1.4420E+00 8.3180E-03 1.2580E-01 1.8920E+00

5.6830E+00 1.8780E+00 1.9570E-01 5.9100E-01 5.2110E-01 2.3850E-01 1.2470E-02

4.6080E-02 2.3120E-02 1.0790E-02 4.8420E-03 1.2850E-02 6.9860E-03 3.3680E-03

1.2570E-03 1.8150E-02 9.3580E-03 4.2170E-03 1.4280E-03 6.7780E-02 5.2290E-02

4.0320E-02 2.2800E-02 3.0860E-01 8.6170E-02 2.1010E-02 6.1080E-03 4.8720E-02

2.7240E-02 1.4030E-02 6.2650E-03 3.3720E-02 1.8470E-02 9.9870E-03 5.0060E-03

3.8890E-02 2.2660E-02 1.1190E-02 4.6830E-03 5.0940E-02 2.5140E-02 1.1190E-02

4.4370E-03 3.0270E-02 1.7810E-02 8.5710E-03 3.7300E-03 8.0770E-01 3.5400E-01

9.8410E-03 5.3040E-01 1.4510E-01 3.0560E-02 5.4980E-03 7.2360E-02 5.2500E-02

3.0020E-02 1.3300E-02 1.0550E+01 2.6440E+00 4.8210E-01 7.0140E-02 4.3910E-01

2.1640E-01 1.0580E-01 5.3480E-02 5.4190E+00 8.3170E+00 3.5880E+00 9.1690E-02

9.0890E+00 2.2410E+00 3.1840E-01 1.7600E-02 6.0870E-02 2.5250E-02 9.7320E-03

3.5860E-03 1.5060E+00 3.9170E-01 2.3490E-01 7.9260E-02 2.0140E-01 8.4460E-03

1.9250E-02 1.7340E-02 1.1310E-02 2.5170E-03 5.1150E-03 4.9370E-03 3.9860E-03

2.2410E-03 7.1390E-03 7.3540E-03 5.3890E-03 4.6790E-02 4.6390E-02 2.3110E-02

6.4190E-03 2.0150E-02 1.5940E-01 8.5220E-02 1.8050E-02 1.6540E-02 1.8510E-02

1.6780E-02 1.2410E-02 8.3390E-03 1.4940E-02 1.3070E-02 8.5700E-03 1.3400E-02

1.4450E-02 1.3280E-02 1.0530E-02 8.7850E-03 2.0710E-02 1.8940E-02 1.2640E-02

7.1350E-03 1.1380E-02 1.1630E-02 1.0210E-02 3.5260E-01 1.1220E-01 3.1560E-01

3.0930E-02 2.6500E-01 1.4580E-01 3.3940E-02 4.0720E-02 2.0900E-02 2.4460E-02

2.6730E-02 2.7940E-01 5.3130E+00 2.7930E+00 5.3910E-01 7.6910E-02 1.9800E-01

1.6910E-01 9.7430E-02 3.6070E+00 3.5700E+00 1.2590E+00 3.1920E+00 1.9340E-01

4.5200E+00 2.4090E+00 4.7930E-01 8.2760E-03 2.7030E-02 2.0910E-02 1.0100E-02

1.9480E-01 1.2430E-02 1.9980E-01 4.1930E-02 1.5200E-03 4.5790E-03 9.4930E-03

1.2250E-02 1.3510E-04 1.4970E-03 2.8340E-03 3.8280E-03 3.4980E-05 1.2160E-03

3.7210E-03 5.9340E-03 3.1800E-02 1.1610E-02 1.0090E-02 6.6090E-03 7.8260E-03

8.9310E-03 6.3840E-02 6.0700E-02 3.6850E-03 9.0810E-03 1.0560E-02 8.8010E-03

2.2860E-03 4.2770E-03 6.9740E-03 8.5530E-03 1.6400E-03 7.5960E-03 8.5060E-03

7.0700E-03 1.3160E-03 5.0150E-03 1.0570E-02 1.3630E-02 8.3350E-04 4.0980E-03

7.0060E-03 8.0190E-03 9.8150E-03 3.1530E-01 6.5110E-02 5.6800E-03 1.8450E-02

1.1030E-01 1.0280E-01 6.9110E-03 2.3340E-02 1.7710E-02 7.9670E-03 8.4190E-02

1.4390E-01 2.1270E+00 2.0620E+00 2.8330E-02 3.6670E-02 8.6500E-02 1.2080E-01

1.8010E+00 9.1690E-02 3.1620E+00 7.2190E-01 8.4450E-03 1.3420E-01 1.8590E+00

1.8560E+00 1.9700E-03 4.4900E-03 1.1930E-02 1.5270E-02 1.6440E+00 1.0960E+00

5.4800E-01 6.2870E-02 5.2390E-02 4.1910E-02 3.1430E-02 2.7270E-04 2.3370E-04

1.9480E-04 1.5580E-04 1.0930E-03 9.5680E-04 8.2010E-04 6.8340E-04 3.6340E+00

2.7340E+00 1.8270E+00 9.1470E-01 1.0490E-01 7.8670E-02 5.2470E-02 2.6250E-02

4.4910E-03 3.5930E-03 2.6950E-03 1.7970E-03 2.0340E-02 1.6950E-02 1.3560E-02

1.0170E-02 2.0500E-02 1.6400E-02 1.2300E-02 8.2010E-03 1.5680E-02 1.3060E-02

1.0450E-02 7.8390E-03 2.4510E-04 2.1010E-04 1.7510E-04 1.4000E-04 2.9460E-02

1.9640E-02 9.8180E-03 2.7630E-02 2.0770E-02 1.3860E-02 6.9360E-03 1.7460E-02

1.3970E-02 1.0480E-02 6.9840E-03 5.3700E-02 4.0330E-02 2.6900E-02 1.3460E-02

7.4340E-03 6.1950E-03 4.9570E-03 3.7180E-03 2.3400E-02 1.5100E-02 1.0060E-02

5.0330E-03 4.3100E-02 3.2850E-02 2.1910E-02 1.0960E-02 3.1740E-03 2.5400E-03

1.9050E-03 1.2700E-03 2.4410E+00 1.1820E+00 2.9990E-02 2.1040E-02 1.1980E-02

5.3590E-03 5.6530E-02 2.2970E-02 8.6030E-03 2.3750E-03 1.0670E-03 8.8250E-04

5.8290E-04 3.1520E-04 6.3680E+00 4.1580E+00 1.6700E+00 3.3350E-01 8.0960E-02

4.6840E-02 2.1080E-02 6.7770E-03 9.7750E-02 7.5970E-02 6.2520E-02 4.5930E-02

5.6710E-02 4.2900E-02 2.8450E-02 1.6380E-02 3.7130E-02 2.2520E-02 1.2770E-02

6.4920E-03 2.4980E-02 1.1530E-02 4.6160E-03 1.4580E-03 1.6410E-02 6.6170E-03

2.6390E-03 9.8110E-04 3.1530E-02 3.1720E-02 1.9990E-02 5.7450E-02 3.3310E-02

1.6000E-02 5.7850E-03 6.0350E-02 3.1070E-02 1.5030E-02 6.3120E-03 7.2950E-02

4.5370E-02 2.1400E-02 7.2250E-03 7.0820E-03 6.1540E-03 3.2460E-03 1.3220E-03

1.9790E-02 3.3570E-02 3.3550E-02 2.1530E-02 5.9460E-02 4.3910E-02 2.0240E-02

5.3660E-03 4.0070E-02 1.5510E-02 5.8120E-03 2.0870E-03 8.6040E-01 1.3720E-02

4.6420E-03 9.1990E-03 1.2210E-02 2.8490E-03 2.4480E-02 2.3530E-02 1.1600E-02

6.0830E-04 3.0090E-04 3.8210E-04 5.9580E-04 3.4610E+00 9.7370E-01 2.0510E+00

1.8940E+00 3.6250E-02 2.3830E-02 2.5270E-02 1.7080E-02 6.2460E-02 6.5530E-02

4.1640E-02 1.7920E-02 3.1590E-02 2.0690E-02 2.1310E-02 2.2670E-02 1.5020E-02

1.4580E-02 1.2930E-02 9.7250E-03 3.1470E-03 1.0240E-02 9.2620E-03 5.7430E-03

1.1500E-03 5.9370E-03 5.6440E-03 3.4470E-03 3.1650E-02 1.8080E-02 5.7090E-03

2.5750E-02 2.0270E-02 1.7940E-02 1.1050E-02 1.7180E-02 2.2900E-02 2.0810E-02

1.4100E-02 3.6840E-02 2.1490E-02 2.3150E-02 1.6570E-02 3.2030E-03 2.1510E-03

2.4880E-03 3.4240E-03 1.3190E-02 3.3540E-02 2.0010E-02 5.5500E-03 3.8770E-02

8.6510E-03 1.9740E-02 1.8620E-02 4.7670E-03 1.6860E-02 1.2950E-02 6.1600E-03

9.8380E-04 8.0510E-03 7.9750E-03 2.5920E-03 1.1130E-04 1.6970E-03 9.8270E-03

1.9000E-02 6.0700E-05 3.4580E-04 3.4000E-04 1.7540E-04 1.8660E-01 2.3990E+00

1.3090E+00 2.9650E-01 7.2010E-03 2.1390E-02 1.6000E-02 6.4660E-03 4.1250E-02

1.9290E-02 1.6900E-02 1.6040E-02 7.9670E-03 1.6550E-02 1.4460E-02 9.1190E-03

4.3750E-03 7.6760E-03 8.0090E-03 6.1960E-03 2.6290E-04 1.8880E-03 5.0500E-03

6.9960E-03 7.9450E-05 6.8170E-04 2.7490E-03 4.5790E-03 1.9910E-02 5.7060E-03

2.0850E-03 6.6670E-03 1.4160E-02 1.1200E-02 5.5500E-03 3.4890E-03 9.6520E-03

1.2420E-02 1.1390E-02 7.8290E-03 2.1360E-02 1.4240E-02 5.3900E-03 3.9310E-04

1.8660E-03 2.0460E-03 1.2310E-03 6.5960E-03 2.1520E-02 5.5490E-03 2.4750E-03

4.9110E-03 2.4590E-02 1.1750E-02 1.5280E-03 1.1360E-03 2.4990E-03 7.8670E-03

9.4030E-03 1.6680E+00 5.3150E-02 6.6240E-03 2.8240E+00 1.0840E+00 1.1400E-01

6.3070E-03 5.1400E+00 1.2590E+00 1.7740E-01 1.0460E-02 5.7750E-02 1.2720E-02

3.1120E-03 7.3520E-04 2.4390E+00 2.6090E-01 5.7000E-03 8.1730E-04 2.2770E+00

4.5930E-01 4.6440E-02 2.0650E-03 9.0640E-01 3.6660E-01 4.1160E-02 2.0160E-03

4.3650E-01 1.3450E-01 3.6410E-02 6.8320E-03 6.8590E-01 1.8730E-01 4.6720E-02

7.8150E-03 2.9320E-01 1.6460E-01 2.0050E-02 1.6560E-03 3.8690E-02 6.9630E-03

1.7810E-04 1.9270E-01 2.2740E-02 1.6890E-03 9.4710E-05 2.0770E-01 4.0570E-02

3.4500E-03 3.8600E-04 1.9500E-01 2.7820E-02 8.1550E-03 7.4380E-04 8.4140E-02

2.9810E-02 5.6290E-03 8.4490E-04 2.6970E-02 1.0180E-02 5.7650E-03 4.3460E-04

7.0750E-02 7.9780E-03 1.7810E-03 1.4820E-04 1.1330E-01 3.1470E-02 8.2310E-03

1.5220E-03 6.0080E+00 6.2500E-02 8.3320E-01 3.7640E+00 1.2560E+00 1.3540E-01

1.0430E+00 5.1050E+00 2.2690E+00 2.1190E-01 2.0820E-02 2.7750E-02 8.6770E-03

2.4930E-03 6.6360E-01 1.3100E+00 2.7060E-01 4.7910E-03 5.9560E-01 1.2060E+00

4.7330E-01 5.4720E-02 3.6650E-01 9.3430E-01 3.9870E-01 4.8740E-02 1.5090E-01

2.1860E-01 9.9190E-02 3.4560E-02 1.8700E-01 3.7030E-01 1.6250E-01 5.1140E-02

1.3970E-01 3.1760E-01 1.8570E-01 2.3260E-02 1.9090E-02 1.4660E-02 4.3550E-03

5.4040E-02 1.0380E-01 2.0720E-02 1.7960E-03 5.3070E-02 1.0990E-01 4.3340E-02

3.8320E-03 5.8020E-02 1.1000E-01 1.5720E-02 8.2660E-03 2.9790E-02 8.7370E-02

2.9320E-02 6.2200E-03 2.2470E-02 8.1570E-03 2.0420E-03 3.4240E-03 1.9830E-02

4.0400E-02 5.3630E-03 1.7380E-03 3.8620E-02 5.6620E-02 2.5700E-02 8.5270E-03

1.9140E+00 4.8740E-02 9.6880E-01 2.7740E+00 1.0020E+00 1.1320E-02 1.2810E+00

6.3430E+00 1.7930E+00 7.3060E-03 1.7500E-02 1.7800E-02 5.7210E-03 1.2980E-01

6.9280E-01 7.8870E-01 1.8940E-01 9.9290E-02 6.1060E-01 7.7190E-01 3.6920E-01

4.1150E-02 3.9870E-01 6.4090E-01 3.1870E-01 4.7610E-02 1.2210E-01 1.5390E-01

8.0660E-02 4.6570E-02 1.6240E-01 2.7130E-01 1.4010E-01 8.2920E-03 1.6080E-01

2.0400E-01 1.4880E-01 8.0460E-03 1.4040E-02 8.2690E-03 1.1860E-02 5.4780E-02

6.3970E-02 1.4460E-02 8.3720E-03 5.5950E-02 7.0530E-02 3.3370E-02 1.8990E-02

4.8160E-02 7.5240E-02 1.0700E-02 5.6240E-03 2.9320E-02 6.3520E-02 2.3970E-02

1.7970E-02 4.6230E-03 3.3400E-03 3.0140E-03 5.4510E-03 1.8160E-02 2.7560E-02

3.7030E-03 1.1160E-02 3.1700E-02 3.9220E-02 2.0910E-02 1.6360E-03 5.7070E-02

7.5800E-01 2.7780E+00 4.4050E-04 1.3200E-02 9.8890E-01 6.1240E+00 2.4500E-03

7.5170E-03 1.3730E-02 1.2280E-02 1.5190E-02 1.6610E-01 5.5590E-01 6.1360E-01

8.8750E-03 1.2010E-01 4.9460E-01 7.7010E-01 2.0080E-03 4.8730E-02 3.1870E-01

6.9490E-01 1.1660E-02 5.0570E-02 1.0300E-01 1.3670E-01 7.7940E-03 5.1120E-02

1.4010E-01 2.6580E-01 7.8770E-04 9.3470E-03 1.2580E-01 2.6640E-01 2.4680E-03

1.0140E-02 1.0140E-02 1.7560E-03 1.4720E-02 4.3990E-02 4.8390E-02 9.2830E-04

9.9360E-03 4.4840E-02 7.0460E-02 4.9030E-03 2.1240E-02 3.8860E-02 4.9690E-02

8.4430E-04 6.2190E-03 2.3960E-02 6.0730E-02 1.3480E-02 2.1610E-03 4.6550E-03

1.0400E-03 1.1690E-03 6.2100E-03 1.4610E-02 1.8050E-02 2.6960E-03 1.2100E-02

2.6740E-02 3.5620E-02 2.6630E+00 2.4090E-01 7.4340E-03 5.7560E+00 9.7100E-01

1.5380E-01 8.0310E-03 3.4900E-02 8.3600E-03 2.6780E-03 4.1320E-05 5.9020E-02

1.8920E-02 2.2750E-04 6.5710E-06 1.7970E-01 3.2590E-02 2.5630E-03 7.2970E-05

9.2310E-01 3.1690E-01 2.1140E-02 2.1500E-04 1.2760E+00 1.7010E-01 2.9020E-02

3.0830E-03 3.3540E-01 2.4440E-01 2.9720E-02 3.8080E-03 1.0660E+00 4.3360E-01

5.9240E-02 3.5070E-03 1.1700E-02 6.5130E-04 2.4890E-05 6.2560E-02 1.2430E-02

3.5180E-03 3.3550E-05 2.2310E-01 1.3560E-02 1.6310E-03 1.9970E-04 3.4690E-02

1.0300E-02 2.5990E-04 3.4170E-05 2.0760E-01 4.3340E-02 4.6960E-03 2.7870E-04

1.8740E-04 2.1310E-02 3.1890E-03 2.1170E-05 3.5670E-02 1.0870E-02 3.4860E-03

1.9200E-05 3.6940E-01 3.2360E-02 3.4240E-03 5.4540E-05 4.7620E+00 2.8240E-01

7.3910E-01 5.4010E+00 1.9680E+00 2.7270E-01 1.4790E-02 1.8030E-02 3.9510E-03

2.9490E-03 3.0040E-02 1.8710E-02 1.9000E-02 2.4450E-04 4.9750E-02 9.3250E-02

3.4110E-02 2.9780E-03 3.9150E-01 1.1470E+00 3.6740E-01 2.4970E-02 3.0520E-01

7.7280E-01 1.5080E-01 3.0440E-02 2.8810E-01 6.2820E-01 2.5010E-01 3.2710E-02

2.7310E-01 1.2500E+00 4.6760E-01 6.8210E-02 5.2500E-03 5.1760E-03 3.9370E-04

2.4070E-02 3.2510E-02 6.4000E-03 3.8740E-03 3.8310E-02 1.5110E-01 1.3590E-02

1.7590E-03 1.6390E-02 1.1970E-02 1.0260E-02 2.4260E-04 5.2530E-02 1.1710E-01

4.4940E-02 5.3880E-03 1.6060E-04 1.0900E-02 8.2010E-03 1.9520E-03 1.6260E-02

1.6370E-02 4.8890E-03 3.8240E-03 7.4970E-02 2.3590E-01 3.2730E-02 4.5050E-03

3.7310E+00 1.1350E-01 1.6020E+00 6.9480E+00 2.5260E+00 6.3340E-03 1.0360E-02

1.3300E-02 2.9160E-03 8.9060E-03 2.5180E-02 7.7140E-03 1.3430E-02 9.6610E-03

5.1140E-02 6.1830E-02 2.6610E-02 4.5330E-02 4.4980E-01 8.4160E-01 2.9000E-01

6.9200E-02 3.0160E-01 5.5710E-01 1.2240E-01 4.9190E-02 2.9640E-01 4.3910E-01

2.0480E-01 5.9010E-02 4.6360E-01 9.4460E-01 3.8620E-01 1.9700E-03 4.6690E-03

2.2010E-03 9.4050E-03 1.8390E-02 2.3450E-02 4.7090E-03 5.7110E-03 4.2840E-02

1.1150E-01 1.0610E-02 5.0380E-03 1.4370E-02 5.6530E-03 7.2200E-03 8.1880E-03

5.5350E-02 8.5210E-02 3.6700E-02 1.3380E-04 4.8180E-03 8.2160E-03 4.5130E-03

7.9110E-03 1.0130E-02 1.3760E-02 3.5810E-03 1.2770E-02 8.0580E-02 1.7110E-01

2.5990E-02 1.0870E-03 1.3160E-01 2.1090E+00 7.6350E+00 1.7910E-03 7.0760E-03

9.1040E-03 8.7430E-03 1.4080E-03 1.1000E-02 2.1460E-02 1.0720E-02 1.0060E-03

1.1570E-02 4.2360E-02 6.3000E-02 2.2170E-03 5.4380E-02 3.6510E-01 8.9290E-01

1.1820E-02 7.9350E-02 2.5200E-01 5.0460E-01 6.3650E-03 5.5880E-02 2.4550E-01

4.9430E-01 3.5070E-03 6.8030E-02 3.8410E-01 1.0440E+00 6.8510E-04 2.6790E-03

3.8630E-03 2.4300E-03 1.0740E-02 1.5790E-02 1.5920E-02 7.4100E-04 6.7280E-03

3.3690E-02 9.2400E-02 9.4780E-04 6.1480E-03 1.2170E-02 6.7030E-03 6.9450E-04

9.5330E-03 4.5310E-02 9.3830E-02 1.0710E-04 1.5670E-03 6.1270E-03 6.3420E-03

2.2530E-03 8.8230E-03 9.0870E-03 7.8730E-03 1.1970E-03 1.5300E-02 6.5680E-02

1.5130E-01 1.0150E+00 3.0360E-02 1.0090E-03 1.6650E-01 2.8260E-02 1.0530E-04

1.6460E-05 1.2990E-02 9.0670E-04 2.4120E-05 1.6390E-06 2.9080E-02 7.4570E-03

4.7290E-04 9.7160E-06 1.8260E+00 1.7560E-01 2.8180E-03 3.0940E-05 1.0480E-01

2.3520E-02 3.2330E-03 3.6150E-05 3.4080E-01 1.0310E-01 1.0210E-02 8.6610E-04

1.0670E+00 2.1890E-01 5.6710E-02 3.7820E-03 4.8230E-04 1.8340E-04 2.4140E-05

1.5740E-02 2.3780E-03 1.7470E-04 3.2150E-05 8.6390E-02 1.4020E-02 2.0420E-03

1.0820E-04 3.4080E-02 6.6180E-03 2.4370E-04 4.0200E-05 4.6260E-01 5.8370E-02

6.2940E-03 3.2430E-04 1.1200E-03 7.3800E-04 4.0730E-04 9.1620E-05 3.0870E-02

3.4840E-03 1.1980E-04 1.7440E-06 3.5960E-02 1.0130E-02 1.3900E-03 3.1550E-05

2.1760E+00 5.8080E-02 6.5620E-02 7.6890E-02 2.9460E-02 9.3520E-05 4.1050E-03

6.9900E-03 8.8620E-04 2.4230E-05 1.1030E-02 1.2930E-02 7.8720E-03 5.4310E-04

3.0240E-01 1.8600E+00 2.1420E-01 3.2330E-03 3.6750E-02 5.3540E-02 2.1170E-02

3.7400E-03 1.0200E-01 4.4670E-01 1.1330E-01 1.1430E-02 2.6490E-01 1.3840E+00

3.9600E-01 6.3960E-02 3.1660E-04 2.0710E-04 1.0370E-04 6.0310E-03 7.5780E-03

2.1560E-03 1.4130E-04 2.5370E-02 4.9800E-02 1.2260E-02 2.2880E-03 1.4450E-02

1.4440E-02 6.2820E-03 2.1220E-04 1.1950E-01 5.0980E-01 5.9540E-02 7.2420E-03

9.8000E-04 5.8940E-04 2.7570E-04 2.1630E-04 1.1760E-02 1.5670E-02 3.3520E-03

1.2880E-04 1.4470E-02 1.6120E-02 9.3980E-03 1.6480E-03 2.3710E+00 1.9020E-02

6.2350E-02 4.5090E-02 2.0870E-02 9.9220E-04 4.2910E-03 4.4410E-03 6.2970E-04

2.5450E-03 1.0960E-02 8.0960E-03 6.1510E-03 3.9560E-02 6.1840E-01 2.3580E+00

1.6490E-01 9.9430E-03 3.3490E-02 3.7400E-02 1.7810E-02 2.5090E-02 1.6810E-01

3.4050E-01 8.9950E-02 7.5510E-02 4.6480E-01 1.0680E+00 3.3280E-01 1.8690E-04

1.9210E-04 1.1990E-04 1.8330E-03 5.5550E-03 4.6570E-03 1.5240E-03 6.5800E-03

2.4180E-02 3.6240E-02 1.0150E-02 4.5370E-03 1.3140E-02 8.6100E-03 4.4320E-03

1.5840E-02 1.3320E-01 3.9890E-01 4.9860E-02 8.4000E-04 4.1950E-04 2.9590E-04

2.1160E-04 2.9000E-03 1.1610E-02 9.8230E-03 2.3870E-03 4.0740E-03 1.3110E-02

1.0770E-02 7.6680E-03 3.0880E-03 2.3570E-02 5.3020E-02 4.3190E-02 1.4470E-04

1.2150E-03 3.5150E-03 3.7480E-03 3.0730E-04 3.0140E-03 9.3300E-03 1.0470E-02

1.9430E-03 4.8950E-02 4.8940E-01 2.1390E+00 1.3950E-03 1.1600E-02 2.9850E-02

3.9370E-02 2.7270E-03 2.9000E-02 1.3960E-01 3.5110E-01 6.8180E-03 8.5650E-02

3.9410E-01 1.1350E+00 1.0770E-04 1.9130E-04 1.5030E-04 4.0090E-04 2.1900E-03

4.6970E-03 4.1410E-03 9.9240E-04 7.6490E-03 2.0770E-02 3.4790E-02 9.1350E-04

5.4730E-03 1.1230E-02 8.3500E-03 1.4150E-03 1.8460E-02 1.0900E-01 3.7340E-01

7.0000E-04 2.6200E-04 3.6050E-04 1.4980E-04 4.7870E-04 3.5960E-03 9.7700E-03

8.4930E-03 6.2200E-04 4.7390E-03 1.1540E-02 1.2790E-02 3.4420E+00 5.1320E-01

3.1870E-02 1.1810E-01 5.2420E-02 3.2530E-02 1.6420E-02 8.3990E-02 5.6090E-02

3.0830E-02 1.6380E-02 7.7850E-02 3.6190E-02 1.3220E-02 3.2770E-03 4.7290E-02

2.6190E-02 1.1420E-02 3.3000E-03 4.9740E-02 2.4310E-02 1.1220E-02 3.6250E-03

8.3440E-02 3.1580E-02 8.5720E-03 1.3620E-03 9.1430E-02 5.9820E-02 9.4340E-03

3.1850E-02 1.7910E-02 8.6320E-03 3.3400E-03 8.7510E-02 4.0620E-02 1.2130E-02

3.2870E-03 5.9060E-02 3.0510E-02 1.2100E-02 5.2040E-03 5.5870E-02 1.7940E-02

6.0790E-03 2.1410E-03 1.0230E-01 1.0510E-01 6.9160E-02 4.0800E-03 5.3630E-02

2.7300E-02 9.5380E-03 2.7850E-03 4.1540E-02 1.7440E-02 5.6400E-03 1.0800E-03

3.0780E+00 6.1350E-01 5.2420E-02 7.8010E-02 3.0390E-02 1.1910E-02 5.0660E-02

3.4310E-02 3.5650E-02 2.1050E-02 2.6620E-02 3.0540E-02 2.6920E-02 1.4900E-02

2.4470E-02 1.6030E-02 1.4920E-02 1.1540E-02 1.9370E-02 1.4700E-02 1.4650E-02

1.1710E-02 1.5540E-02 3.7690E-02 2.9850E-02 1.0640E-02 6.7530E-02 1.6890E-02

3.5820E-02 1.7890E-02 1.3250E-02 9.9280E-03 5.0620E-03 3.3100E-02 3.1320E-02

3.1520E-02 1.3180E-02 3.0430E-02 2.1570E-02 2.1110E-02 7.2310E-03 9.4830E-03

2.8510E-02 1.6990E-02 5.8080E-03 7.6670E-02 7.8010E-02 7.9540E-03 4.7480E-02

2.7290E-02 1.7510E-02 1.7850E-02 7.2930E-03 1.4350E-02 1.3000E-02 1.3940E-02

6.3600E-03 2.0530E+00 3.2530E-02 3.0390E-02 3.7570E-02 1.0500E-02 2.2830E-02

3.2710E-02 1.7380E-02 2.1580E-02 4.9190E-03 1.8980E-02 1.9260E-02 2.2120E-02

7.4630E-03 1.3150E-02 1.2260E-02 1.0880E-02 5.5150E-03 1.1760E-02 1.0930E-02

1.1890E-02 3.8320E-04 1.5540E-02 2.1620E-02 2.4940E-02 3.3000E-02 3.0360E-02

1.7690E-02 8.6270E-03 9.9180E-03 7.3400E-03 4.5840E-03 6.0330E-03 2.6740E-02

1.4900E-02 2.3090E-02 1.2070E-02 2.1110E-02 9.1300E-03 1.0950E-02 2.2240E-03

6.8990E-03 1.8910E-02 1.2660E-02 5.1080E-02 3.2880E-02 3.4940E-02 2.1380E-02

9.5360E-03 1.7860E-02 8.9630E-03 1.0040E-02 2.8010E-03 1.1700E-02 7.6610E-03

9.6540E-03 1.6420E-02 1.1910E-02 1.0500E-02 1.5060E-02 9.5600E-03 1.2060E-02

1.7450E-02 7.6340E-03 4.7720E-04 4.9410E-03 1.3150E-02 1.4110E-02 1.2350E-03

7.6180E-03 8.1990E-03 5.3070E-03 8.7560E-04 5.1100E-03 7.8370E-03 6.1520E-03

3.5080E-05 3.7890E-04 1.0970E-02 1.9870E-02 9.5760E-03 2.6760E-02 2.9870E-03

3.3400E-03 5.0570E-03 4.5820E-03 2.4070E-03 1.4220E-03 5.0640E-03 1.7350E-02

1.1410E-02 5.2050E-03 7.0230E-03 1.0940E-02 3.4930E-03 7.5620E-04 1.1390E-03

4.0190E-03 1.2240E-02 2.5530E-02 6.9580E-03 3.6300E-02 1.2350E-03 2.7850E-03

7.2920E-03 1.0030E-02 3.1410E-03 2.7990E-04 2.9140E-03 7.6870E-03 4.9790E-03

1.1940E+00 6.4820E-02 7.7540E-03 4.2950E+00 1.4120E+00 2.9660E-01 3.2810E-02

8.9070E+00 1.9740E+00 3.1920E-01 3.1440E-02 1.3960E-01 5.4400E-02 2.0720E-02

5.4020E-03 1.6790E-01 5.9340E-02 1.8450E-02 4.5770E-03 3.6630E-02 1.6900E-02

7.7800E-03 2.2330E-03 3.2550E-01 1.2410E-01 2.1310E-02 6.1480E-01 2.8580E-01

8.1860E-02 1.2760E-02 4.5240E-01 1.3660E-01 2.9980E-02 5.4310E-03 1.5100E-01

7.4570E-02 2.3790E-02 7.4230E-03 3.2290E-02 1.4290E-02 5.6840E-03 2.0000E-03

1.7880E-02 1.9010E-02 1.2650E-02 7.1600E-03 5.9080E-02 3.5060E-02 1.7350E-02

6.1810E-03 6.6370E-02 3.3600E-02 1.3920E-02 5.0340E-03 1.3260E+00 7.1160E-02

1.0080E+00 1.8500E+00 1.3100E+00 3.7130E-01 4.5470E-01 5.2570E+00 2.2160E+00

4.1750E-01 4.2140E-02 6.4290E-02 3.3500E-02 2.2050E-02 2.7200E-02 1.0600E-01

6.3170E-02 2.1830E-02 1.0030E-02 1.8500E-02 1.0150E-02 8.6430E-03 1.7070E-01

1.0380E-01 7.4960E-02 2.8310E-01 1.9190E-01 1.8790E-01 8.2770E-02 9.2440E-02

2.1380E-01 1.2830E-01 3.4740E-02 7.4470E-02 4.8220E-02 5.3250E-02 1.7420E-02

1.0280E-02 1.4690E-02 1.1400E-02 5.9080E-03 1.3400E-02 1.4140E-02 9.7330E-03

4.6120E-03 3.5040E-02 2.4110E-02 1.7900E-02 1.0920E-02 2.8550E-02 2.4920E-02

2.2460E-02 1.2800E-02 9.2860E-01 8.3890E-02 9.6390E-01 9.6230E-01 1.0120E+00

3.0030E-03 4.8020E-01 3.3110E+00 1.7640E+00 1.3140E-02 2.2000E-02 4.5940E-02

2.4820E-02 5.7480E-03 2.2390E-02 8.0520E-02 3.4980E-02 3.6390E-03 3.7460E-03

1.5220E-02 9.0710E-03 7.1350E-02 9.9480E-02 6.5050E-02 8.1480E-02 1.8710E-01

1.1850E-01 1.1070E-01 1.0180E-02 8.7030E-02 1.1520E-01 9.8050E-02 2.3770E-02

5.3200E-02 1.9850E-02 3.0820E-02 2.5440E-03 6.7300E-03 9.8800E-03 9.1660E-03

8.9360E-03 1.1210E-02 6.5810E-03 2.8870E-03 1.7350E-02 1.7880E-02 1.5620E-02

7.8210E-03 8.8140E-03 1.9040E-02 1.4070E-02 1.6040E-02 2.5660E-03 9.5930E-02

6.6830E-01 7.4970E-01 2.7880E-04 3.0440E-03 3.3660E-01 2.4360E+00 1.7300E-03

1.2990E-02 1.5060E-02 2.4570E-02 4.2270E-04 5.5000E-03 1.5550E-02 3.7810E-02

9.8150E-06 4.0280E-03 2.8980E-03 8.7980E-03 2.1110E-02 6.1730E-02 3.2750E-02

1.2760E-02 8.2480E-02 1.1050E-01 4.2620E-02 1.7850E-03 9.3490E-03 5.9450E-02

8.5710E-02 7.4230E-03 1.7400E-02 3.1040E-02 7.9470E-03 5.1970E-04 2.1960E-03

4.4640E-03 6.7810E-03 4.4680E-03 5.3400E-03 2.9880E-03 1.3810E-03 6.1810E-03

1.0850E-02 7.8180E-03 4.4410E-03 2.6070E-03 6.7870E-03 1.1710E-02 7.8180E-03

3.1250E+00 2.8240E-01 1.5420E-02 7.7890E+00 1.9900E+00 3.0600E-01 2.2450E-02

4.7460E-01 1.5240E-01 3.1980E-02 5.4180E-03 7.7410E-01 2.5300E-01 5.5030E-02

7.5290E-03 4.0860E-01 1.1690E-01 1.8690E-02 1.4630E-03 4.1040E-01 2.0880E-02

3.2300E-03 5.8260E-01 1.1580E-01 1.4130E-02 7.6060E-04 7.2490E-01 2.4440E-01

5.5770E-02 6.2120E-03 1.3970E-01 4.7170E-02 9.2160E-03 3.0170E-03 8.2970E-02

3.4940E-02 1.3160E-02 3.7070E-03 2.1910E-02 6.0350E-02 1.1680E-02 7.4970E-03

6.2630E-02 2.8020E-02 1.1110E-02 2.2420E-03 9.5340E-02 3.2420E-02 7.6050E-03

1.2740E-03 3.4350E+00 3.4500E-01 1.5200E+00 4.1250E+00 2.1000E+00 3.7610E-01

1.5160E-01 2.0950E-01 1.3840E-01 3.4590E-02 2.0750E-01 3.7970E-01 2.4220E-01

6.5060E-02 7.4200E-02 2.2130E-01 1.2670E-01 2.2720E-02 1.4630E-01 1.8910E-01

1.2020E-02 1.7290E-01 2.8310E-01 1.0070E-01 1.5420E-02 2.4300E-01 3.1640E-01

2.0210E-01 6.5490E-02 5.8640E-02 5.1630E-02 4.1520E-02 6.3260E-03 3.0430E-02

3.8760E-02 2.5570E-02 1.3440E-02 1.7530E-02 2.7870E-02 3.2170E-02 3.7790E-03

3.3430E-02 2.6910E-02 1.4190E-02 9.8340E-03 3.5150E-02 3.5830E-02 2.7460E-02

8.3120E-03 2.6340E+00 1.2380E-01 1.6260E+00 2.6550E+00 1.6910E+00 3.1870E-02

1.3780E-01 1.2530E-01 1.0840E-01 2.9600E-02 1.9370E-01 2.4880E-01 2.0330E-01

1.8380E-03 8.3520E-02 1.4440E-01 1.0330E-01 4.2040E-02 1.3980E-01 7.8880E-02

3.9100E-02 1.5560E-01 1.6290E-01 6.8380E-02 5.5540E-02 1.9990E-01 2.0100E-01

1.6300E-01 1.8210E-02 4.9870E-02 2.5130E-02 2.7120E-02 9.7860E-03 2.1730E-02

2.7770E-02 2.1900E-02 1.3150E-02 1.4710E-02 2.2130E-02 1.1120E-02 1.6310E-02

1.7820E-02 2.1050E-02 8.0990E-03 7.5920E-03 2.7420E-02 2.1330E-02 2.1690E-02

2.4670E-03 1.4900E-01 1.2590E+00 2.6550E+00 5.4180E-03 3.4500E-02 1.0810E-01

1.1930E-01 2.6080E-03 3.4530E-02 1.5620E-01 2.5980E-01 9.4100E-05 2.0980E-03

6.3760E-02 1.5670E-01 9.3720E-03 5.5780E-02 1.0850E-01 5.3810E-03 4.7180E-02

1.1950E-01 1.1420E-01 6.2130E-03 6.5340E-02 1.6080E-01 1.8080E-01 5.8760E-03

1.8280E-02 3.6640E-02 1.8730E-02 2.2050E-03 9.7580E-03 1.7910E-02 2.4330E-02

8.7620E-03 8.8870E-03 8.3770E-03 1.4700E-02 5.4840E-03 1.5140E-02 1.2270E-02

9.5480E-03 1.2690E-03 8.3060E-03 2.1680E-02 2.0810E-02 2.8520E+00 1.0800E-01

4.9910E-03 5.1000E-01 1.2260E-01 2.5320E-02 5.2950E-03 3.3160E-01 8.6060E-02

1.3230E-02 6.0400E-04 2.5570E-01 7.8940E-02 1.9320E-02 2.5470E-03 2.2470E-02

8.5970E-03 1.1000E-03 7.3500E-01 5.5230E-02 1.0780E-02 1.9830E-03 5.0510E-01

1.0480E-01 1.1620E-02 1.3850E-03 6.2670E-02 1.5990E-02 2.2770E-03 6.2280E-04

2.5860E-01 6.2320E-02 9.7630E-03 1.8250E-03 3.6700E-02 3.0680E-02 1.5800E-02

3.4380E-03 8.5590E-02 2.0350E-02 6.6090E-03 5.4790E-04 1.5950E-01 4.6770E-02

1.1250E-02 1.4230E-03 3.5210E+00 1.2930E-01 1.5230E-01 2.6790E-01 1.0780E-01

2.5980E-02 8.5840E-02 1.7180E-01 8.9180E-02 1.5690E-02 6.8760E-02 1.3640E-01

7.1800E-02 2.1850E-02 1.3970E-02 7.0210E-03 5.0310E-03 1.8270E-01 4.3320E-01

4.4170E-02 9.5560E-03 1.3480E-01 2.6550E-01 1.0630E-01 1.2840E-02 2.4990E-02

2.7660E-02 1.3860E-02 1.7140E-03 6.2090E-02 1.5160E-01 6.3400E-02 1.0450E-02

3.0580E-02 2.2340E-02 1.0700E-02 8.5440E-03 3.4900E-02 4.4270E-02 1.0340E-02

6.7730E-03 5.5640E-02 7.7970E-02 3.6600E-02 1.2330E-02 2.6980E+00 3.9970E-02

1.3710E-01 1.8130E-01 8.5510E-02 1.3210E-02 8.8910E-02 1.1720E-01 7.3470E-02

1.4320E-02 6.2060E-02 9.9140E-02 6.2840E-02 7.8030E-03 7.6420E-03 5.3310E-03

4.0810E-02 1.8600E-01 2.7880E-01 2.9970E-02 2.3250E-02 1.3640E-01 1.7290E-01

7.9750E-02 7.9800E-03 2.1610E-02 1.5580E-02 9.4100E-03 9.7410E-03 6.3200E-02

1.1590E-01 5.1370E-02 2.4470E-02 1.4140E-02 1.1300E-02 7.8090E-03 1.4040E-02

2.3010E-02 3.2000E-02 7.0380E-03 1.6920E-02 4.4790E-02 5.4620E-02 3.0320E-02

8.9140E-03 4.2960E-02 1.1290E-01 1.6790E-01 6.0340E-04 1.5670E-02 7.3300E-02

1.2880E-01 1.3910E-03 1.6100E-02 5.3530E-02 1.0740E-01 3.5180E-03 7.9030E-03

4.1610E-03 8.9230E-03 4.7430E-02 1.4780E-01 1.9870E-01 3.0590E-03 2.7330E-02

1.1040E-01 1.6990E-01 2.1840E-03 8.6840E-03 1.7340E-02 1.2790E-02 1.8180E-03

1.0440E-02 5.1240E-02 1.2170E-01 1.8350E-02 7.6640E-03 1.2140E-02 5.1680E-03

3.9510E-03 1.4560E-02 1.8740E-02 1.9610E-02 2.9490E-03 1.8710E-02 3.8410E-02

4.9650E-02 1.7770E+00 6.0010E-02 4.0390E-03 5.7590E+00 1.3660E+00 1.8800E-01

1.2080E-02 1.1620E+01 2.0220E+00 2.3370E-01 1.3630E-02 4.4980E-01 5.6290E-02

1.9360E-02 5.6500E-01 1.8570E-01 3.0510E-02 8.0250E-03 5.9340E-01 1.3080E-01

2.2330E-02 3.2180E-03 1.9420E-01 6.2410E-02 8.1030E-03 2.2850E-03 7.9400E-02

2.9890E-02 9.1290E-03 1.8680E-03 1.7260E-02 2.8610E-02 1.0610E-02 4.5570E-03

4.5640E-02 2.1550E-02 6.8570E-03 1.1600E-03 9.5920E-02 2.8330E-02 7.5510E-03

1.3650E-03 2.1620E+00 7.2500E-02 1.0130E+00 3.1540E+00 1.4830E+00 2.3080E-01

7.5770E-01 7.6960E+00 2.3910E+00 2.8910E-01 1.8550E-01 2.1290E-01 2.6910E-02

2.3150E-01 2.1670E-01 1.6240E-01 2.2610E-02 1.3070E-01 3.0830E-01 1.2660E-01

2.4300E-02 7.9900E-02 7.1950E-02 5.5670E-02 6.6020E-03 1.7550E-02 5.1450E-02

2.6810E-02 1.0180E-02 1.3810E-02 1.6790E-02 1.3930E-02 4.2250E-03 2.4910E-02

1.6720E-02 1.2040E-02 6.4610E-03 2.8320E-02 4.7540E-02 2.2580E-02 8.0810E-03

1.6280E+00 6.4310E-02 1.1170E+00 2.0290E+00 1.1840E+00 5.1970E-03 8.9480E-01

5.5330E+00 1.8990E+00 7.2610E-02 1.5660E-01 8.6840E-02 6.6340E-02 1.9730E-01

9.9500E-02 1.0800E-01 2.2320E-02 1.2660E-01 1.9590E-01 9.7930E-02 2.1500E-02

6.7730E-02 3.1430E-02 3.7060E-02 4.9400E-03 1.8720E-02 3.6300E-02 2.3540E-02

1.0360E-02 1.0200E-02 1.0560E-02 5.6730E-03 1.0680E-02 1.4170E-02 1.2820E-02

7.4370E-03 7.5480E-03 2.2580E-02 3.0800E-02 1.7920E-02 1.0200E-03 7.7270E-02

8.5750E-01 2.0060E+00 4.6620E-04 5.7340E-03 6.7470E-01 4.9300E+00 2.9420E-02

6.8260E-02 1.1100E-01 1.7770E-02 6.9490E-02 1.4750E-01 8.2230E-02 3.2180E-03

2.4290E-02 9.7900E-02 1.7570E-01 4.9930E-03 2.1290E-02 5.0640E-02 2.7840E-02

9.6980E-04 5.8660E-03 1.7980E-02 3.4550E-02 6.9060E-03 5.6520E-03 6.0000E-03

5.5560E-03 3.1410E-03 1.0710E-02 1.0260E-02 5.8170E-03 1.3650E-03 8.0800E-03

1.7920E-02 2.5880E-02 3.5870E+00 2.4430E-01 1.3220E-02 6.9260E+00 1.5590E+00

2.9410E-01 1.4340E-02 7.9250E-02 4.3250E-02 1.1980E-02 2.6820E-01 1.8420E-02

4.2180E-03 7.3760E-04 6.9930E-01 1.6290E-01 3.6390E-02 7.8650E-03 1.0940E-01

1.4910E-02 4.2190E-03 6.7750E-04 2.4470E-01 6.2350E-02 1.0650E-02 1.3930E-03

4.8330E-03 2.6520E-02 6.0050E-03 4.0490E-04 1.0150E-01 2.1670E-02 7.6340E-03

1.2660E-03 1.8830E-01 6.1470E-02 4.7750E-03 3.8020E-04 4.2210E+00 2.9280E-01

1.2050E+00 7.3820E+00 2.8870E+00 3.5040E-01 5.8210E-02 2.9400E-02 2.2260E-02

6.2050E-02 1.6190E-01 1.3340E-02 3.7890E-03 2.0350E-01 3.7820E-01 1.3870E-01

3.7070E-02 3.2390E-02 6.0880E-02 9.7070E-03 3.4910E-03 6.3480E-02 1.3160E-01

6.0470E-02 1.2000E-02 4.0270E-03 1.4270E-02 9.8300E-03 3.6050E-03 3.9450E-02

5.3190E-02 1.1620E-02 7.0070E-03 7.9260E-02 1.4550E-01 6.6760E-02 5.4040E-03

3.2870E+00 1.3610E-01 2.3240E+00 5.3500E+00 2.3200E+00 3.9610E-02 3.0290E-02

1.9170E-02 1.4130E-02 6.3300E-02 1.0560E-01 9.0370E-03 5.5570E-02 1.7990E-01

2.6110E-01 1.1070E-01 1.0300E-02 2.9000E-02 3.9830E-02 6.4960E-03 1.0510E-02

6.0340E-02 9.2120E-02 5.0150E-02 3.2210E-03 6.5920E-03 9.6140E-03 5.9550E-03

1.5390E-02 2.7860E-02 3.7860E-02 7.5690E-03 1.2020E-02 8.4160E-02 8.9850E-02

5.1280E-02 3.6440E-04 1.6180E-01 1.8300E+00 5.6040E+00 2.3400E-02 2.9900E-02

1.2770E-02 3.2250E-03 1.6340E-02 5.0290E-02 7.4080E-02 1.3030E-02 5.9130E-02

1.4850E-01 2.3400E-01 2.9470E-03 1.0660E-02 2.3110E-02 2.7490E-02 1.3840E-03

1.1980E-02 5.0060E-02 9.6200E-02 2.4160E-03 2.3590E-03 7.6480E-03 6.5230E-03

5.0660E-03 1.5250E-02 2.2220E-02 2.3190E-02 1.1490E-03 1.4410E-02 6.7420E-02

9.6000E-02 1.4460E+00 1.0620E-01 4.8670E-03 1.6550E-02 1.9930E-03 1.0440E-04

7.0970E-02 2.4440E-02 7.6710E-03 1.7140E-04 1.9650E+00 1.4310E-01 2.0070E-02

2.6030E-03 3.1170E-02 7.8590E-03 1.2790E-03 1.4260E-04 5.3350E-01 9.1780E-02

1.0940E-02 1.1590E-03 3.9020E-04 2.5130E-02 3.5600E-03 1.7190E-04 3.5400E-02

7.7040E-03 6.7350E-04 5.1420E-05 3.0360E-01 2.2750E-02 3.9650E-03 2.4890E-04

2.7420E+00 1.2340E-01 8.1810E-03 6.6380E-03 1.1940E-03 3.6390E-02 3.5530E-02

1.1830E-02 8.3130E-03 3.6000E-01 1.3080E+00 1.3260E-01 2.1600E-02 1.3480E-02

1.3890E-02 6.1720E-03 1.1940E-03 1.1180E-01 3.0130E-01 9.7870E-02 1.2910E-02

3.3450E-04 1.2880E-02 9.7040E-03 2.1660E-03 1.4800E-02 1.5400E-02 6.5990E-03

6.5230E-04 5.1700E-02 1.6960E-01 2.0210E-02 4.4470E-03 3.2550E+00 3.5190E-03

6.4780E-03 3.3740E-03 1.7370E-02 2.1740E-02 2.5880E-02 8.7120E-03 6.1320E-02

3.9150E-01 9.6150E-01 1.0640E-01 4.7050E-03 1.1060E-02 8.7550E-03 4.3330E-03

1.7840E-02 1.1890E-01 2.2230E-01 7.8640E-02 2.7870E-04 5.7190E-03 9.7030E-03

5.3180E-03 4.6510E-03 1.2670E-02 9.1630E-03 4.6340E-03 1.0140E-02 5.2970E-02

1.2550E-01 1.6610E-02 1.1290E-03 4.4420E-03 5.0890E-03 5.0940E-03 1.9220E-02

1.9450E-02 1.5240E-02 8.9850E-03 7.1420E-02 3.2110E-01 8.1220E-01 1.2940E-03

5.6430E-03 9.3230E-03 7.1000E-03 2.1980E-03 2.0500E-02 9.8280E-02 2.3070E-01

2.2300E-04 1.7850E-03 7.2210E-03 7.4770E-03 1.0090E-03 5.6250E-03 1.0640E-02

7.9100E-03 1.4150E-03 1.1860E-02 4.3770E-02 1.1210E-01 6.2580E-01 4.1720E-02

2.3230E+00 1.1190E+00 3.7990E-01 6.6210E-02 7.6130E+00 2.6730E+00 7.2220E-01

1.2650E-01 5.3570E-02 3.0290E-02 1.4580E-02 5.6410E-03 2.0520E-02 1.4680E-02

8.8210E-03 4.3070E-03 3.1260E-02 1.0770E-01 9.2100E-02 5.6480E-02 9.1150E-02

5.4430E-02 3.0800E-02 1.3990E-02 4.1170E-02 2.6000E-02 1.7470E-02 1.1410E-02

5.2890E-01 7.5690E-01 6.8440E-01 6.9620E-01 4.5700E-01 3.0800E-01 3.5170E+00

2.6040E+00 1.0260E+00 2.2790E-02 2.0640E-02 1.6570E-02 9.3540E-03 1.1010E-02

5.7900E-03 7.0940E-03 9.0480E-03 2.0840E-02 9.2100E-02 6.0830E-02 1.8260E-02

4.3050E-02 4.0220E-02 2.9270E-02 1.4030E-02 1.7800E-02 2.2150E-02 1.5820E-02

8.2480E-03 3.0030E-02 5.3100E-01 4.8090E-01 2.5520E-01 1.9280E-02 1.9470E-01

1.4680E+00 2.0440E+00 6.2530E-03 1.1710E-02 1.0360E-02 5.8680E-03 1.1740E-03

6.4720E-03 5.4020E-03 3.1370E-03 1.0420E-02 5.6460E-02 1.8330E-02 1.0590E-02

1.8080E-02 1.8580E-02 1.6620E-02 9.8050E-03 9.6240E-03 6.7360E-03 8.0220E-03

7.7870E-03 2.9140E+00 4.5400E-01 3.1360E-02 7.9950E+00 2.9120E+00 6.3630E-01

7.4630E-02 1.0880E-01 5.4170E-02 1.5880E-02 2.7260E-03 6.2230E-02 3.2240E-02

1.5310E-02 5.6590E-03 1.7650E-01 1.3500E-01 3.8540E-02 1.6080E-02 1.4060E-01

7.2720E-02 2.8060E-02 1.0400E-02 1.3160E-01 5.2980E-02 1.4440E-02 2.1330E-03

2.5970E+00 5.3540E-01 2.1850E+00 3.1150E+00 2.6580E+00 7.8880E-01 5.4160E-02

3.1140E-02 3.7420E-02 1.3810E-02 2.4610E-02 2.4930E-02 2.1330E-02 1.4500E-02

1.3210E-01 6.2150E-02 6.5370E-02 1.6660E-02 7.2720E-02 4.7810E-02 4.8850E-02

1.7400E-02 4.1940E-02 4.9640E-02 4.2720E-02 1.7230E-02 1.7300E+00 1.8280E-01

2.0960E+00 1.5090E+00 2.0520E+00 1.5880E-02 3.7410E-02 1.5730E-02 2.1520E-02

7.3200E-03 1.5670E-02 1.6750E-02 1.6550E-02 8.7980E-02 2.8990E-02 4.0020E-02

2.6110E-02 2.8070E-02 4.8850E-02 2.1020E-02 2.6840E-02 6.0680E-03 3.4020E-02

2.7990E-02 3.3120E-02 8.5530E-03 2.0220E-01 1.4510E+00 1.2580E+00 2.7260E-03

1.3800E-02 2.1520E-02 5.6050E-03 1.1750E-03 6.2060E-03 9.9760E-03 1.0270E-02

4.3950E-02 1.2460E-02 1.4960E-02 2.0130E-02 1.0390E-02 1.7390E-02 2.6840E-02

7.6040E-03 3.1010E-04 6.7850E-03 2.2930E-02 1.9700E-02 2.8350E+00 2.0280E-01

1.1210E-02 1.7180E-01 6.4270E-02 1.5290E-02 3.9480E-03 1.2480E-01 6.0330E-02

1.8310E-02 4.2080E-03 3.6800E-02 3.6530E-01 3.6410E-02 5.3150E-03 3.8940E-01

1.2010E-01 1.5150E-02 3.9210E-03 1.1980E-01 5.9970E-02 2.1070E-02 3.8580E-03

3.2280E+00 2.4710E-01 7.7920E-02 6.2950E-02 5.0180E-02 1.1890E-02 5.4000E-02

4.8390E-02 4.3710E-02 1.9690E-02 2.9440E-02 1.4230E-01 1.6210E-01 2.1020E-02

1.5760E-01 1.4050E-01 1.1240E-01 1.1870E-02 5.9900E-02 3.9880E-02 3.6830E-02

2.2980E-02 2.4600E+00 2.6800E-02 5.9970E-02 3.2960E-02 3.2700E-02 1.2030E-02

3.9010E-02 2.9140E-02 3.7230E-02 2.2080E-02 4.7540E-02 1.2430E-01 7.1900E-02

3.9180E-02 1.3500E-01 5.9220E-02 7.8870E-02 2.1060E-02 3.6810E-02 3.0200E-02

3.0660E-02 8.3420E-03 2.6320E-02 4.3990E-02 2.3030E-02 2.4860E-03 1.2320E-02

3.1770E-02 3.3000E-02 1.4720E-02 1.3700E-02 5.7410E-02 9.1680E-02 8.8640E-03

4.2570E-02 1.0590E-01 5.4510E-02 3.8580E-03 2.2980E-02 3.0650E-02 2.2290E-02

1.6770E+00 2.7180E-01 8.2000E-02 6.3510E+00 1.5990E+00 3.2820E-01 5.6110E-02

1.1740E+00 2.0870E+00 1.1680E+00 9.4590E-02 1.7540E+00 5.7010E-01 1.0060E-01

6.2360E-03 2.2480E+00 6.8890E-01 1.3850E-01 1.7130E-02 1.5640E+00 2.0140E-01

5.0580E-01 3.6230E+00 1.6600E+00 3.8520E-01 8.7860E-01 1.3920E+00 3.3490E-01

7.8110E-01 5.6690E-01 6.6260E-01 4.7580E-01 1.1910E-01 4.6360E-01 1.0300E+00

6.5810E-01 1.7090E-01 1.0370E+00 4.3310E-02 4.5370E-01 2.2520E+00 1.3110E+00

5.8480E-01 5.8180E-01 6.7320E-01 4.2340E-01 9.9670E-02 4.7380E-01 3.3180E-01

3.1120E-01 3.6970E-02 4.5640E-01 5.4910E-01 5.0670E-01 1.2020E-02 3.2280E-02

3.0740E-01 1.6780E+00 2.9220E-01 1.3330E-01 6.0920E-01 9.1810E-02 6.2360E-03

1.1830E-01 3.1100E-01 1.7290E-01 3.4090E-03 3.9880E-02 3.1720E-01 4.1600E-01

3.6170E+00 2.7720E-01 3.0150E-02 1.1270E-01 7.8380E-02 2.8140E-02 5.8710E-03

5.1420E+00 2.3640E-01 5.6740E-03 1.2270E-03 1.0580E+01 2.0730E+00 1.7340E-01

7.6330E-03 4.2250E+00 3.1890E-01 9.3910E-02 4.8720E-02 2.9110E-02 1.5170E-02

1.1390E+00 3.0940E+00 2.4150E-01 4.7550E-03 2.7060E+00 5.5270E+00 2.2140E+00

2.0190E-01 3.2930E+00 7.5130E-02 2.7800E-02 2.9220E-02 1.8120E-02 1.8340E-01

1.2790E+00 1.9580E+00 1.6850E-01 4.1520E-01 2.8660E+00 3.5400E+00 1.7100E+00

5.6340E-02 1.4180E-02 2.5330E-02 1.6390E-02 1.7840E-02 2.3770E-01 1.0160E+00

1.4310E+00 3.4630E-02 5.0780E-01 2.3030E+00 3.5660E+00 6.1210E-01 4.0810E-01

2.0400E-01 2.0930E+00 1.5720E+00 1.0510E+00 5.2620E-01 1.8870E-02 1.5090E-02

1.1330E-02 7.5480E-03 2.2020E+00 1.0390E+00 4.3990E+00 3.0040E+00 1.2210E+00

2.4470E-01 3.7050E-01 1.5150E-01 6.2530E-02 2.9280E-02 8.0770E-01 2.5650E+00

5.1330E-01 1.4370E+00 1.3780E+00 4.4640E-02 1.8100E-01 1.3060E-01 5.2630E-02

1.3160E-01 1.7690E+00 9.0370E-01 1.3880E-01 2.1720E-02 1.8460E-02 7.0400E-02

9.3760E-02 2.1610E+00 2.7890E-01 3.2870E-02 1.9680E+00 6.5840E-01 1.7960E-01

4.5970E-02 2.0570E+00 3.0480E-01 4.7360E-01 9.0960E-01 5.7520E-01 1.8600E-01

1.3860E+00 8.3490E-02 4.0770E-01 5.0920E-01 4.3150E-01 1.9350E-02 6.6430E-02

2.7090E-01 3.5630E-01 4.2190E+00 4.2060E-01 2.3380E-02 4.5870E+00 5.1350E-01

3.5300E+00

35000.00

5.3010E+00 1.7300E+00 7.5010E-01 3.0890E-01 2.3190E+00 9.6550E-01 2.9990E-01

7.8520E-02 7.0790E+00 6.1600E-01 2.1630E-01 7.5290E-02 8.1530E-01 4.4830E-01

3.6900E-02 2.7970E-01 8.3650E-02 7.2840E-03 6.5050E-01 3.2030E-01 9.8440E-02

1.7230E-02 4.3580E-01 2.1620E-01 1.1430E-01 3.8880E-02 4.8090E-01 2.3320E-01

8.5230E-02 1.9520E-02 2.9220E-01 1.6160E-01 7.8000E-02 3.9940E-02 2.9680E+01

7.5680E+00 3.9350E-01 1.3780E-01 5.0550E-02 3.5430E+01 6.1680E+00 6.4000E-01

5.3160E-02 2.2660E-02 1.0630E-02 1.6620E+01 1.6460E-01 3.9870E-02 1.2930E+00

2.3040E-01 8.1120E-03 1.7000E-03 2.0740E+00 2.6330E-01 2.7980E-02 9.4230E-03

7.9600E-01 1.2900E-02 6.8260E-03 1.5340E-01 1.1360E-01 4.9300E-02 1.1490E-02

8.7190E-02 5.9710E-02 2.5060E-02 8.8700E-03 2.2480E-02 7.1260E-03 2.2680E-03

7.2160E-02 3.5440E-02 1.2870E-02 3.5260E-03 2.9320E-02 1.8300E-02 8.0290E-03

1.9440E-03 7.1110E-02 4.0000E-02 1.3600E-02 2.4430E-03 5.2170E-02 2.0940E-02

4.8000E-03 5.2420E-04 3.9040E-02 1.5420E-02 6.0140E-03 1.7500E-03 3.4280E-02

1.1300E-02 3.4280E-03 1.0780E-03 5.7080E-02 2.5990E-02 1.1230E-02 3.8680E-03

7.5780E-02 2.8380E-02 7.4910E-03 1.1120E-03 4.9150E-02 1.5420E-02 3.8220E-03

6.9310E-04 5.0160E-02 2.3620E-02 8.6430E-03 1.8760E-03 3.7770E-02 1.3300E-02

6.3120E-03 3.2270E-02 2.0670E-02 7.3760E-03 1.6130E-03 2.9490E-02 1.6530E-02

1.0120E-02 7.0850E-03 1.3560E-02 1.0090E-02 3.8470E-03 9.0950E-04 1.1250E-02

8.6960E-03 4.6430E-03 1.5060E-03 1.9870E-02 9.7390E-03 7.6920E-03 4.4490E-03

1.5270E-02 1.0330E-02 5.5640E-03 2.5150E-03 1.9750E-02 1.3580E-02 6.1980E-03

1.8240E-03 5.1980E+00 1.5030E+00 4.9690E-01 1.0530E+00 9.3550E-01 6.8590E-01

2.7190E-01 1.8300E+00 4.2250E+00 4.0090E-01 1.3090E-01 5.9460E-01 1.9810E-01

2.5350E-01 1.5720E-01 9.2760E-02 4.7410E-02 2.8890E-01 2.3170E-01 2.4830E-01

1.0230E-01 2.2560E-01 2.2990E-01 1.0100E-01 9.5350E-02 2.0790E-01 2.3110E-01

1.5650E-01 8.3950E-02 1.8440E-01 1.3770E-01 1.1010E-01 2.9370E-02 6.9810E+00

1.3410E+01 9.8180E+00 4.0660E-01 1.0280E-01 4.6360E-01 2.4320E+01 8.7180E+00

1.3060E+00 6.4750E-02 1.1530E-02 4.8110E+00 8.5010E+00 1.0200E-01 4.2680E-01

5.7320E-01 2.2130E-01 6.4490E-03 4.0280E-01 1.2060E+00 2.6760E-01 2.3470E-02

3.0140E-01 3.4630E-01 5.0110E-03 1.1450E-01 4.3230E-02 5.7810E-02 4.6130E-02

7.0280E-02 4.1030E-02 2.5370E-02 7.0960E-03 1.2890E-02 9.2100E-03 3.3790E-03

3.4450E-02 2.7790E-02 2.4690E-02 1.2270E-02 1.8350E-02 1.0470E-02 1.1000E-02

8.0350E-03 3.4950E-02 2.2490E-02 3.0170E-02 1.4180E-02 2.6680E-02 1.7740E-02

1.3780E-02 4.4560E-03 1.9740E-02 1.7260E-02 8.5400E-03 4.1140E-03 1.2910E-02

1.5770E-02 8.5840E-03 2.9500E-03 2.5330E-02 2.6390E-02 1.6700E-02 1.0120E-02

3.1610E-02 3.0680E-02 2.0540E-02 7.5720E-03 1.5250E-02 2.3460E-02 1.2650E-02

3.9080E-03 2.1360E-02 2.0770E-02 1.6630E-02 8.7290E-03 2.2680E-02 1.8060E-02

5.5060E-03 2.2900E-02 9.7570E-03 1.1100E-02 5.7710E-03 1.7230E-02 1.5800E-02

1.2190E-02 5.0840E-03 1.0780E-02 3.9440E-03 5.1280E-03 2.9180E-03 8.3600E-03

4.0420E-03 4.2270E-03 4.2550E-03 1.5900E-02 8.5680E-03 6.1000E-03 2.8360E-03

1.1300E-02 7.0460E-03 5.9720E-03 2.5340E-03 1.3800E-02 6.7070E-03 7.1220E-03

5.4470E-03 3.9370E+00 9.7600E-01 3.9510E-01 7.3400E-01 5.9520E-01 4.8890E-01

4.7830E-01 1.9510E+00 2.3150E+00 2.1570E-01 3.4240E-01 2.3150E-01 2.1150E-01

7.7660E-02 8.8360E-02 5.7300E-02 8.2480E-02 2.1520E-01 1.5690E-01 1.9940E-01

1.2360E-01 1.2170E-01 1.6670E-01 7.9860E-02 8.0990E-02 1.5330E-01 1.6080E-01

1.2750E-01 1.0960E-01 1.2420E-01 6.3430E-02 5.0240E-02 2.8460E-01 9.4910E+00

4.2710E+00 8.8970E+00 2.9410E-01 5.4370E-02 4.8460E-01 1.5490E+01 8.7370E+00

1.7120E+00 6.4200E-02 8.6800E-01 6.0270E+00 3.1450E+00 1.0350E-01 3.9580E-01

2.9220E-01 1.2840E-01 5.2850E-02 4.8180E-01 7.1930E-01 1.7090E-01 9.5790E-02

2.8130E-01 1.1250E-01 5.8150E-02 5.1470E-02 3.9600E-02 4.7470E-02 5.1000E-02

3.2580E-02 1.8900E-02 5.3220E-03 7.1310E-03 7.7920E-03 4.1850E-03 1.2800E-02

2.3050E-02 1.9040E-02 1.9510E-02 6.7280E-03 9.5550E-03 8.1550E-03 1.0330E-02

1.0010E-02 2.5000E-02 1.5950E-02 2.5370E-02 1.1000E-02 1.6450E-02 1.1290E-02

8.3640E-03 9.7770E-03 1.2190E-02 1.0540E-02 4.7340E-03 4.4880E-03 1.0180E-02

9.7310E-03 5.9450E-03 1.0700E-02 1.6450E-02 1.8360E-02 1.3390E-02 1.0520E-02

2.2940E-02 1.9540E-02 1.5000E-02 3.8040E-03 1.3040E-02 1.5150E-02 9.4320E-03

7.1610E-03 1.4740E-02 1.4730E-02 1.3990E-02 1.3920E-02 1.4190E-02 6.6490E-03

1.2310E-02 1.0710E-02 7.6380E-03 6.4940E-03 1.0600E-02 1.2600E-02 8.2550E-03

6.3350E-03 6.0730E-03 4.6110E-03 3.3560E-03 2.9510E-03 4.4320E-03 3.7720E-03

3.5250E-03 3.9340E-03 1.1980E-02 6.9820E-03 4.2720E-03 1.8750E-03 7.3390E-03

6.3010E-03 3.7720E-03 2.7250E-03 7.1660E-03 6.6350E-03 5.4210E-03 5.5870E-03

2.3690E+00 1.2400E-01 3.9450E-01 4.8880E-01 4.6810E-01 1.6990E-01 5.1610E-01

1.6060E+00 1.0120E+00 1.5560E-01 2.5710E-01 1.1120E-01 3.1880E-02 6.9350E-02

4.7490E-02 1.2500E-02 1.0600E-01 1.3790E-01 1.7950E-01 5.5740E-02 8.1970E-02

1.1040E-01 8.0230E-02 2.3210E-02 7.9770E-02 1.1960E-01 1.2720E-01 6.5090E-02

7.3580E-02 5.5490E-02 3.8020E-02 7.7150E-02 3.7750E-01 8.7030E+00 6.5880E-01

5.7340E+00 2.6300E-02 4.2420E-02 3.5900E-01 8.7960E+00 7.0610E+00 1.5480E+00

4.8640E-02 2.0180E+00 4.6170E+00 1.5650E-02 1.5410E-01 2.5280E-01 1.8760E-01

9.8820E-03 7.9760E-02 4.2880E-01 4.2630E-01 2.5090E-02 1.3560E-01 1.6570E-01

2.0700E-02 4.6470E-02 3.7170E-02 2.6780E-02 3.2600E-02 2.4620E-02 1.1170E-02

3.5480E-03 3.7030E-03 5.2020E-03 3.8360E-03 3.7130E-03 1.2800E-02 1.5820E-02

1.7260E-02 1.7430E-03 6.5380E-03 7.1840E-03 7.6390E-03 1.2950E-03 1.3070E-02

1.5470E-02 2.1020E-02 3.4540E-03 1.0720E-02 1.0290E-02 6.8740E-03 4.4140E-03

7.4620E-03 8.1640E-03 4.8310E-03 1.5050E-03 4.4610E-03 7.1540E-03 6.9150E-03

3.9520E-03 8.9300E-03 1.3100E-02 1.3290E-02 2.5630E-03 1.1490E-02 1.5760E-02

1.5320E-02 7.5960E-04 4.5760E-03 1.0190E-02 1.2030E-02 1.6280E-03 7.4520E-03

1.1210E-02 1.3410E-02 8.1560E-03 8.4610E-03 6.3970E-03 5.1990E-03 9.3890E-03

6.5380E-03 3.6850E-03 6.8370E-03 6.7320E-03 6.1840E-03 5.5350E-03 2.7080E-03

4.4330E-03 2.7830E-03 1.4160E-03 1.6700E-03 3.3160E-03 3.0710E-03 2.3860E-03

7.9490E-03 4.9560E-03 2.6060E-03 1.1910E-03 4.4070E-03 4.4230E-03 2.9580E-03

1.7060E-03 2.8160E-03 5.5200E-03 4.7220E-03 3.4820E-03 3.2810E-02 1.3300E-01

3.0140E-01 2.7080E-01 6.5520E-02 1.2560E-01 4.1790E-01 1.0410E+00 5.0750E-02

1.7100E-01 3.8780E-02 9.9200E-03 3.7940E-02 2.6380E-02 9.0460E-04 1.9290E-02

1.0160E-01 9.6050E-02 1.7020E-02 5.4140E-02 3.5520E-02 5.7520E-02 3.6190E-03

3.1470E-02 6.0930E-02 7.8610E-02 3.1920E-02 2.6550E-02 4.1750E-02 1.5880E-02

2.1320E-02 1.0270E-01 2.9330E-01 5.6880E+00 1.7310E+00 1.2660E-02 1.1610E-02

2.4380E-02 1.9810E-01 3.9270E+00 4.7750E+00 1.5950E-02 5.2680E-02 3.2710E+00

1.7370E-03 2.5990E-02 1.4390E-01 1.3310E-01 4.6460E-03 4.8210E-03 8.0130E-02

3.8220E-01 5.5950E-03 3.9750E-02 1.1780E-01 4.2420E-03 2.5650E-02 2.6860E-02

8.4870E-03 1.5920E-02 1.3410E-02 4.9720E-03 1.7740E-03 1.5850E-03 2.5200E-03

2.2790E-03 8.5850E-04 4.2870E-03 1.0240E-02 9.4320E-03 1.9900E-04 2.5010E-03

5.3170E-03 3.7600E-03 4.8260E-06 2.1900E-03 1.2880E-02 1.0380E-02 7.2620E-04

4.6320E-03 6.9970E-03 3.3300E-03 1.6010E-03 3.6740E-03 3.9630E-03 3.1840E-03

4.8620E-04 1.4080E-03 3.5030E-03 4.6860E-03 1.1010E-03 4.0360E-03 6.0740E-03

8.4230E-03 3.5460E-04 3.7090E-03 9.1820E-03 9.4980E-03 1.1930E-04 1.0370E-03

4.1340E-03 8.4260E-03 1.6780E-04 2.3830E-03 6.3070E-03 7.9530E-03 3.8740E-03

3.6800E-03 3.9280E-03 1.6220E-03 5.2090E-03 4.5500E-03 1.0630E-03 3.5780E-03

2.2640E-03 3.7490E-03 3.0510E-03 8.8990E-04 2.6140E-03 1.9060E-03 2.6700E-04

3.8410E-04 1.9280E-03 1.9380E-03 9.7170E-04 3.9750E-03 2.5750E-03 1.2100E-03

5.8930E-04 2.0550E-03 2.1010E-03 1.9640E-03 6.2220E-04 7.6980E-04 2.9980E-03

3.1210E-03 1.3810E-03 1.0170E+01 3.0660E+00 1.1560E+00 2.1770E+00 7.9230E-01

1.9120E-01 4.1450E-02 1.3060E+00 5.0780E-01 1.7340E-01 6.1790E-01 1.3230E-01

3.6560E-02 1.7500E+00 6.1540E-01 1.6920E-01 4.3510E-02 1.8120E+00 5.4730E-01

1.6480E-01 4.9970E-02 1.2890E+00 5.1940E-01 1.6910E-01 5.3170E-02 9.8680E-01

4.4070E-01 1.8990E-01 7.2770E-02 6.8630E-01 2.9930E-01 1.1000E-01 3.4310E-02

7.3050E-03 6.6040E-01 3.3020E-01 1.4100E-01 4.8870E-02 1.3060E-02 2.5010E-03

2.4300E-01 1.0230E-01 2.1000E-02 1.0100E+01 3.3580E-01 1.0100E-01 2.3820E-02

5.0040E+00 7.1970E-01 1.1940E-01 3.4130E-02 4.0410E-01 1.5700E-01 2.6180E-02

1.1250E+00 5.0630E-01 2.5010E-01 1.4000E-01 7.7090E-02 3.4920E-02 1.4610E-02

1.0770E-01 1.5190E-01 9.1400E-02 1.2940E-02 4.0620E+00 4.2990E-01 3.5970E-02

4.4100E-03 2.0710E-01 9.6560E-02 2.4000E-02 3.0110E-03 2.3700E-01 1.7000E-01

3.1130E-02 2.9910E-03 1.8860E+00 4.2840E-02 8.2200E-03 1.1870E-03 8.1040E-01

2.6640E-02 5.8960E-03 1.6430E-03 9.5870E-01 1.3160E-01 1.6080E-02 2.5670E-03

1.4480E+00 1.6810E-01 2.3750E-02 3.5700E-03 3.2920E+00 4.4380E-01 1.8910E-02

2.9990E-03 8.6960E-01 1.1760E-01 2.5120E-02 3.4540E-03 2.7860E-01 1.0110E-01

2.5740E-02 3.1170E-03 3.0730E-02 1.2660E-02 2.4720E-03 3.3760E-01 3.3410E-02

1.1310E-02 2.2630E-03 5.7770E-02 2.0550E-02 6.5200E-03 1.3780E-03 1.2690E-01

1.6070E-02 4.2010E-03 7.7750E-04 7.5410E-02 2.3880E-02 7.0570E-03 1.1700E-03

2.4240E-02 8.7410E-03 5.0700E-03 7.9350E-04 8.4380E-02 8.6340E-03 2.1460E-03

3.6180E-04 1.7410E-01 3.3370E-02 5.5260E-03 9.7250E-04 1.1010E+01 2.9850E+00

9.6250E-01 8.8430E-01 5.9010E-01 1.6410E-01 7.8190E-01 5.7130E-01 2.4180E-01

2.9520E-01 2.6740E-01 6.8650E-02 4.4190E-01 8.9830E-01 5.8490E-01 1.8110E-01

5.4150E-01 9.5060E-01 4.4590E-01 1.5410E-01 4.2530E-01 6.5190E-01 4.3540E-01

1.6810E-01 5.0270E-01 4.7990E-01 2.6950E-01 1.1110E-01 2.5120E-01 3.3020E-01

2.1040E-01 1.0490E-01 4.1540E-02 2.4020E-01 2.5050E-01 2.2320E-01 1.4850E-01

7.2400E-02 2.3640E-02 1.3350E-01 8.9870E-02 6.9410E-02 1.4600E+00 6.6790E+00

2.2450E-01 8.2270E-02 7.2050E-01 3.0920E+00 7.3550E-01 1.1480E-01 2.4270E-01

1.3720E-01 9.0700E-02 5.0620E-01 5.7590E-01 3.7120E-01 1.6310E-01 4.9860E-02

3.6090E-02 1.5470E-02 8.6170E-02 1.1420E-01 3.6720E-02 5.4070E-02 1.0050E-01

2.8850E+00 5.2060E-01 4.2030E-02 6.7290E-02 1.5180E-01 9.0350E-02 2.8260E-02

9.5890E-02 2.9870E-01 1.8360E-01 3.7450E-02 2.5330E-01 1.2540E+00 3.2150E-02

7.8000E-03 1.3510E-01 5.3220E-01 1.9720E-02 4.6400E-03 1.3140E-01 5.9860E-01

1.3910E-01 1.7760E-02 7.1700E-02 9.8050E-01 1.8490E-01 2.7250E-02 3.5780E-01

2.7090E+00 4.2790E-01 2.0940E-02 7.0040E-02 6.0040E-01 1.2180E-01 2.9080E-02

7.3710E-02 1.2900E-01 9.2130E-02 3.0430E-02 1.8970E-02 1.0890E-02 7.0330E-03

6.7630E-02 2.0900E-01 1.8780E-02 9.9570E-03 2.0540E-02 2.8020E-02 1.4470E-02

6.8170E-03 2.9180E-02 7.4310E-02 1.1160E-02 3.6920E-03 1.9650E-02 4.0120E-02

1.9510E-02 7.9800E-03 1.9400E-02 6.3700E-03 2.4660E-03 2.9320E-03 1.7820E-02

5.0660E-02 6.1690E-03 1.9400E-03 3.1080E-02 1.0290E-01 3.2170E-02 6.0150E-03

8.6450E+00 3.4030E-01 7.2500E-01 5.1580E-01 3.8150E-01 4.5230E-01 4.7050E-01

2.7420E-01 1.3300E-01 2.1430E-01 1.2550E-01 7.7010E-02 4.1920E-01 6.0160E-01

4.9050E-01 1.6260E-01 4.4150E-01 6.2960E-01 3.4250E-01 1.2020E-01 3.6290E-01

4.3790E-01 3.5770E-01 2.5810E-01 3.3670E-01 2.8700E-01 1.4700E-01 8.2810E-02

1.7970E-01 2.1580E-01 1.5960E-01 7.5480E-02 4.9370E-02 1.7290E-01 1.6430E-01

1.4410E-01 1.1760E-01 6.8900E-02 6.0040E-02 8.2870E-02 7.6460E-02 2.1280E-01

1.6280E+00 4.3540E+00 1.4050E-01 1.1880E-01 7.3070E-01 2.0730E+00 5.5770E-01

1.2470E-01 1.3690E-01 9.1370E-02 2.5010E-01 3.7120E-01 3.4450E-01 2.4660E-01

3.1640E-02 2.8570E-02 1.5480E-02 6.4650E-02 6.4890E-02 5.0600E-02 3.8150E-02

1.4470E-02 1.0160E-01 2.8250E+00 4.0240E-01 9.8540E-03 6.2380E-02 1.0520E-01

7.7170E-02 1.4400E-03 1.0980E-01 1.9870E-01 1.5150E-01 2.6050E-02 2.9720E-01

8.1590E-01 2.1360E-02 1.5440E-02 1.3290E-01 3.4330E-01 1.2770E-02 1.5980E-02

1.3900E-01 4.0380E-01 1.0660E-01 1.3130E-02 6.3920E-02 7.2420E-01 1.4620E-01

1.8490E-02 4.2640E-01 1.8290E+00 3.2200E-01 1.5870E-02 5.5650E-02 4.4430E-01

9.9650E-02 1.0690E-02 6.7290E-02 8.5920E-02 7.9470E-02 1.0210E-02 1.0570E-02

6.8870E-03 1.8670E-02 5.9690E-02 1.3850E-01 1.2010E-02 6.5180E-03 1.4470E-02

1.9330E-02 1.1620E-02 7.5840E-03 2.5320E-02 4.7840E-02 7.1500E-03 4.8580E-03

1.5560E-02 2.8500E-02 1.6700E-02 1.4540E-02 3.5690E-03 2.9650E-03 2.1160E-03

3.9920E-03 1.6890E-02 3.2550E-02 4.0320E-03 5.5190E-03 3.2140E-02 6.9180E-02

2.4840E-02 9.7800E-02 3.4200E-01 5.3790E-01 3.3100E-01 2.4180E-01 3.1870E-01

2.3870E-01 5.7720E-02 1.2100E-01 1.3500E-01 2.0280E-02 7.2770E-02 3.3030E-01

6.3860E-01 4.9810E-02 1.5340E-01 3.4170E-01 5.0890E-01 3.4970E-02 1.1170E-01

2.8750E-01 4.1550E-01 1.2850E-01 1.9140E-01 2.1690E-01 1.5040E-01 1.8810E-02

8.0630E-02 1.3120E-01 1.4550E-01 9.6460E-02 6.0150E-03 4.4840E-02 1.1170E-01

1.3590E-01 1.1450E-01 6.3580E-02 1.9330E-02 6.6420E-02 6.0340E-02 5.2740E-02

2.2720E-01 1.2350E+00 2.7000E+00 3.4050E-02 1.1480E-01 5.5760E-01 1.6340E+00

5.1680E-02 1.1760E-01 6.5890E-02 1.4000E-01 1.6310E-01 2.4660E-01 2.5840E-01

1.8760E-02 1.8530E-02 1.2720E-02 4.3080E-02 2.7400E-02 6.0720E-02 1.4500E-02

2.2410E-03 1.5580E-02 7.9490E-02 2.1490E+00 2.7250E-04 1.1450E-02 5.0380E-02

1.0640E-01 1.1860E-04 1.5780E-03 8.3580E-02 2.2110E-01 3.5690E-03 3.1690E-02

2.1990E-01 5.1110E-01 3.3040E-03 1.7380E-02 1.0610E-01 2.2830E-01 2.5440E-03

1.7710E-02 1.0650E-01 3.1710E-01 1.5820E-03 1.4450E-02 5.1320E-02 5.6180E-01

2.9030E-03 2.0760E-02 4.0020E-01 1.4270E+00 1.3250E-03 1.8080E-02 4.6220E-02

3.4690E-01 9.4100E-05 1.2570E-02 5.4960E-02 9.4240E-02 4.5760E-03 8.8940E-03

4.9180E-03 5.4310E-03 1.8560E-02 4.6180E-02 8.3500E-02 1.3780E-03 6.8160E-03

1.1620E-02 1.5450E-02 1.9890E-03 7.8430E-03 1.9580E-02 2.9630E-02 4.9030E-04

5.4050E-03 1.2960E-02 2.5070E-02 9.6970E-03 1.5900E-03 3.2210E-03 9.6430E-04

9.6400E-04 4.3210E-03 1.2590E-02 2.0290E-02 9.3440E-04 6.0340E-03 2.4850E-02

5.4890E-02 5.4970E+00 1.8050E+00 7.3260E-01 1.2400E+00 5.6150E-01 8.6940E-02

2.9900E-01 1.1890E-01 2.7380E-02 4.6610E-01 2.4230E-01 1.0730E-01 2.9830E-02

4.1950E-01 2.1130E-01 1.0350E-01 4.6480E-02 4.2790E-01 2.1410E-01 9.5040E-02

3.6280E-02 3.3330E-01 1.8160E-01 1.0080E-01 4.5460E-02 2.2280E+00 8.7350E-01

2.4850E-01 5.6430E-02 1.2860E-02 3.0290E+00 9.9570E-01 2.8190E-01 7.1100E-02

1.9590E-02 6.5380E-03 1.4730E+00 1.9960E-01 2.1380E-02 2.3940E+01 4.0770E+00

7.8430E-02 1.2980E-02 3.4430E+01 4.3610E+00 3.5410E-01 7.0920E-02 1.5370E+01

1.0280E-01 2.9620E-02 1.0400E-01 6.4460E-02 3.4470E-02 1.5200E-02 5.8520E-02

3.5550E-02 1.5450E-02 5.1060E-03 1.7200E-02 4.8680E-03 2.2010E-03 1.0460E-01

5.1830E-02 2.1730E-02 5.6050E-03 1.1490E-02 6.6320E-03 3.2950E-03 1.2610E-03

2.8870E-02 1.6030E-02 7.4810E-03 2.1500E-03 2.0490E-01 4.1360E-02 4.8230E-03

9.6740E-04 2.4510E-01 5.0620E-02 9.7570E-03 3.1700E-03 2.8650E-02 1.1380E-02

4.5880E-03 1.3880E-03 5.2010E-02 2.6990E-02 1.2100E-02 3.9920E-03 2.1830E-01

4.6490E-02 1.1820E-02 2.8220E-03 2.4830E-02 1.1320E-02 4.4170E-03 1.1080E-03

2.4390E-02 1.0840E-02 4.5810E-03 1.5730E-03 1.1980E-01 1.8020E-02 9.5500E-03

3.0570E-02 1.6900E-02 7.1730E-03 2.1060E-03 1.2920E-02 7.8590E-03 4.8490E-03

2.9000E-03 2.4970E-02 1.7520E-02 8.6020E-03 2.8600E-03 4.7290E-03 3.2800E-03

1.9910E-03 9.2780E-04 1.2510E-02 1.4460E-02 2.4710E-03 1.2860E-03 5.8150E-03

3.2780E-03 1.7130E-03 7.2340E-04 1.4820E-02 3.4530E-03 1.1410E-03 4.3190E-04

5.2940E+00 1.1290E+00 7.1440E-01 3.5400E-01 3.4640E-01 1.6060E-01 1.0760E-01

6.6530E-02 1.6300E-01 1.9340E-01 1.6240E-01 1.1810E-01 1.7840E-01 1.9280E-01

1.3490E-01 8.1460E-02 1.5160E-01 1.9890E-01 1.5010E-01 9.2920E-02 1.6890E-01

1.9240E-01 1.0420E-01 4.3540E-02 4.6280E-01 1.0660E+00 7.6160E-01 3.2470E-01

7.0650E-02 8.2060E-02 1.5610E+00 1.0640E+00 4.4720E-01 1.2730E-01 2.3370E-02

3.5040E-01 7.6740E-01 1.5270E-01 4.0540E+00 1.1980E+01 4.9450E+00 7.8850E-02

3.5350E-01 2.3490E+01 5.2630E+00 4.0250E-01 3.5510E+00 8.0200E+00 5.4060E-02

5.7540E-02 4.2420E-02 3.5700E-02 2.7630E-02 4.1370E-02 2.6040E-02 1.4970E-02

3.8610E-03 7.2990E-03 8.3820E-03 2.0150E-03 3.7960E-02 4.2480E-02 3.3380E-02

2.4130E-02 4.8520E-03 4.6130E-03 4.1290E-03 3.4190E-03 1.0490E-02 1.1560E-02

1.0350E-02 8.4420E-03 4.3550E-02 1.0370E-01 4.4330E-02 4.5040E-03 5.2480E-02

1.1860E-01 4.6230E-02 6.8680E-03 8.9430E-03 1.3240E-02 7.7460E-03 4.6140E-03

2.0220E-02 2.1790E-02 1.7210E-02 1.2490E-02 2.3420E-02 1.3880E-01 4.1890E-02

1.2730E-02 8.0840E-03 1.0540E-02 7.8990E-03 5.0630E-03 6.5530E-03 1.1220E-02

7.8750E-03 4.8670E-03 4.0860E-02 6.3090E-02 6.3440E-03 1.6890E-02 1.0950E-02

8.9830E-03 5.6410E-03 6.9550E-03 6.7000E-03 4.8500E-03 2.8970E-03 1.7520E-02

8.7010E-03 8.3700E-03 5.8900E-03 2.7790E-03 1.9000E-03 1.7240E-03 1.6940E-03

9.3790E-03 5.2180E-03 7.5650E-03 8.9100E-04 3.2780E-03 2.4880E-03 1.7760E-03

8.9240E-04 1.8210E-03 7.0220E-03 3.3750E-03 1.0020E-03 3.3420E+00 3.0760E-01

3.8800E-01 2.4900E-01 7.2450E-02 9.1690E-02 5.8890E-02 3.8740E-02 1.0260E-01

1.4020E-01 1.4110E-01 7.3620E-02 1.0760E-01 1.2150E-01 8.9380E-02 4.7560E-02

1.0030E-01 1.3210E-01 1.1790E-01 9.5490E-02 1.0420E-01 9.7270E-02 4.5880E-02

5.1350E-02 4.5570E-01 5.5310E-01 4.7870E-01 2.7730E-01 2.4880E-02 5.1600E-02

7.2610E-01 7.8870E-01 4.5750E-01 1.5190E-01 5.2020E-02 3.7970E-01 4.1270E-01

7.7560E-02 4.9400E+00 5.5970E+00 3.5050E+00 9.3200E-02 3.0720E-01 1.5240E+01

4.0640E+00 4.5100E-01 4.1020E+00 3.1910E+00 2.5210E-02 3.1200E-02 2.9610E-02

2.2900E-02 2.5460E-02 1.9270E-02 1.0270E-02 2.5530E-03 3.7080E-03 5.0320E-03

3.3040E-03 9.8200E-03 2.2910E-02 3.1230E-02 2.7810E-02 1.4670E-03 2.8630E-03

3.4620E-03 3.5320E-03 2.4900E-03 6.3930E-03 8.8680E-03 9.5050E-03 4.7940E-03

4.4290E-02 4.8020E-02 3.0200E-02 9.7250E-03 4.6130E-02 5.8130E-02 3.5650E-02

2.9520E-03 5.5550E-03 8.9750E-03 5.6950E-03 6.0500E-03 1.2040E-02 1.5740E-02

1.3800E-02 6.5950E-03 1.4800E-02 8.7420E-02 3.1630E-02 1.8900E-03 5.1260E-03

7.5840E-03 6.5280E-03 1.8320E-03 4.1430E-03 7.7960E-03 6.6380E-03 1.6180E-02

3.3980E-02 2.3580E-02 7.1720E-03 8.9820E-03 7.8150E-03 4.3690E-03 3.8260E-03

4.0220E-03 3.6860E-03 2.6990E-03 8.6020E-03 8.3700E-03 6.4880E-03 3.5230E-03

1.2000E-03 1.3990E-03 1.4420E-03 1.2530E-03 6.2540E-03 2.3370E-03 4.3380E-03

2.6960E-03 1.7130E-03 1.7770E-03 1.3730E-03 7.5820E-04 7.3840E-04 1.0390E-03

4.8410E-03 1.9700E-03 8.9240E-02 2.7550E-01 1.0690E-01 2.4500E-02 5.4100E-02

3.2410E-02 1.8420E-03 4.0500E-02 7.3010E-02 9.5120E-02 2.5030E-02 4.7910E-02

6.0310E-02 6.2340E-02 1.0640E-02 3.8020E-02 6.4950E-02 8.4570E-02 4.5420E-02

4.3530E-02 4.5880E-02 3.7500E-02 1.3380E-02 3.9210E-02 2.6510E-01 3.5130E-01

2.3770E-01 8.3930E-03 1.4410E-02 2.6650E-02 2.6610E-01 4.4390E-01 3.3900E-01

6.8400E-03 6.5030E-02 3.4810E-01 1.2640E-02 7.8260E-02 3.5050E+00 3.4580E+00

4.1210E-02 4.4820E-02 1.9630E-01 9.5370E+00 2.4210E-02 6.7570E-01 3.1650E+00

7.9730E-03 1.7460E-02 1.6910E-02 1.2050E-02 1.1890E-02 1.0590E-02 5.0050E-03

1.2760E-03 1.6880E-03 1.7150E-03 2.5390E-03 5.9640E-04 1.0320E-02 1.5830E-02

1.8980E-02 2.2380E-04 1.3240E-03 1.9730E-03 2.1420E-03 7.0380E-06 2.7140E-03

4.7690E-03 6.1150E-03 9.6630E-04 4.5010E-03 3.0190E-02 2.9310E-02 3.1650E-03

6.8590E-03 3.5640E-02 3.2770E-02 5.5100E-04 2.6600E-03 3.4330E-03 4.9130E-03

8.3910E-04 5.4680E-03 7.9180E-03 9.2400E-03 9.4540E-04 6.3690E-03 9.4930E-03

5.5770E-02 1.1760E-04 1.9650E-03 3.5440E-03 4.9960E-03 2.6010E-04 1.6370E-03

2.8680E-03 5.4810E-03 7.0910E-03 7.9380E-03 2.2180E-02 2.1060E-03 5.6410E-03

4.3680E-03 2.1710E-03 1.7580E-03 1.7930E-03 1.8690E-03 1.6920E-03 2.8610E-03

5.8900E-03 3.5230E-03 1.2030E-03 3.3540E-04 8.8900E-04 8.1060E-04 6.4680E-04

3.1260E-03 9.5790E-04 1.4300E-03 2.1310E-03 7.2350E-04 8.9240E-04 7.5820E-04

3.7660E-04 2.1170E-04 5.2990E-04 5.8420E-04 2.4370E-03 1.0460E+00 4.2080E-01

3.6400E+00 2.7230E-01 8.1250E-02 1.7590E-01 9.6690E-02 5.0730E-02 2.5790E-02

6.4360E-01 3.1010E-01 1.4180E-01 6.2600E-02 1.8670E-01 1.2250E-01 7.2730E-02

3.8520E-02 6.5460E-01 4.0740E-01 1.9830E-01 6.9980E-02 2.8650E-01 1.9880E-01

1.1360E-01 5.5540E-02 2.1020E-02 2.7380E-01 2.1500E-01 1.4270E-01 8.0170E-02

3.7150E-02 1.2870E-02 2.4150E-01 1.4710E-01 4.7820E-02 3.0690E+00 8.4690E-01

1.9440E-01 5.2660E-02 5.6780E-01 4.4250E-01 2.4080E-01 8.7060E-02 6.5320E+00

2.8390E+00 4.4280E-02 3.4940E-01 1.5680E-01 6.4610E-02 2.6670E-02 3.2630E-01

1.7520E-01 9.5780E-02 5.7710E-01 6.1780E-01 3.1750E-01 2.2010E-02 1.4940E-01

6.6870E-02 2.6440E-02 9.5340E-03 2.2850E-02 1.2630E-02 6.2170E-03 2.4980E-03

3.5860E-02 1.7630E-02 7.4350E-03 2.2870E-03 9.0460E-01 2.8370E-01 5.3910E-02

7.5570E-03 1.5500E+00 3.6820E-01 5.4010E-02 5.6580E-03 6.7920E-02 2.9580E-02

1.1080E-02 3.4680E-03 1.1740E-01 5.5280E-02 2.3160E-02 8.2270E-03 3.6890E-02

2.3100E-02 1.3170E-02 6.0780E-03 1.0340E-02 5.9300E-03 3.3700E-03 1.8980E-03

7.0410E-03 3.8310E-03 1.8160E-03 6.8870E-04 1.4390E+00 6.2750E-01 1.4610E-02

7.8790E-01 2.3700E-01 4.1070E-02 9.5260E-03 1.2500E-01 1.0050E-01 5.9030E-02

2.5730E-02 9.6720E-01 2.5760E-01 6.2780E-02 1.7710E-02 1.8440E-01 8.2500E-02

3.2600E-02 9.7400E-03 5.4950E-01 1.9210E-01 9.7280E-02 1.5550E-02 2.6640E-01

9.6610E-02 4.4120E-02 2.1540E-02 6.4820E-02 2.9060E-02 1.1120E-02 3.2540E-03

4.7530E-01 2.7220E-01 2.2390E+00 1.5390E-01 3.4570E-02 7.8060E-02 7.1830E-02

4.8570E-02 1.3550E-01 2.9150E-01 2.2800E-01 1.2230E-01 7.5660E-02 7.1710E-02

7.0450E-02 6.3880E-02 3.2000E-01 2.2860E-01 2.1480E-01 1.3830E-01 1.2360E-01

1.0500E-01 9.9310E-02 8.2670E-02 4.6920E-02 1.5840E-01 6.7610E-02 6.7130E-02

8.3750E-02 8.1040E-02 4.9160E-02 1.2500E-01 5.5760E-02 1.0970E-01 1.9210E-01

1.5650E+00 8.4100E-01 1.8450E-01 3.6190E-01 9.4460E-02 1.8160E-01 2.5370E-01

2.8320E+00 8.6180E-01 2.5780E+00 6.1390E-02 1.5050E-01 1.2030E-01 6.5160E-02

1.7500E-01 1.7670E-01 4.7120E-02 3.7360E-01 2.8340E-01 1.0760E-01 2.9890E-01

1.5490E-02 6.4800E-02 5.6500E-02 3.1440E-02 4.7650E-03 8.6670E-03 8.7760E-03

7.2010E-03 3.0060E-03 1.4580E-02 1.4740E-02 9.7850E-03 3.2730E-02 4.8240E-01

2.6720E-01 6.0560E-02 2.4100E-02 8.0620E-01 4.0660E-01 8.7940E-02 1.0260E-02

2.8140E-02 2.3000E-02 1.2670E-02 1.6590E-02 4.8650E-02 4.3790E-02 2.7240E-02

1.5010E-02 1.3080E-02 1.2940E-02 1.0230E-02 2.7510E-03 5.0390E-03 4.2250E-03

2.4870E-03 1.2230E-03 2.8440E-03 2.7440E-03 2.1210E-03 6.2590E-01 1.9860E-01

5.6260E-01 3.5260E-02 3.9180E-01 2.1440E-01 4.3080E-02 8.2510E-02 2.8350E-02

4.1810E-02 5.2620E-02 4.3150E-02 5.1260E-01 2.6340E-01 4.7210E-02 1.6500E-02

7.8730E-02 6.9190E-02 3.9370E-02 3.6620E-01 9.7080E-02 3.5470E-02 7.2350E-02

4.7670E-02 1.4740E-01 7.6070E-02 1.6260E-02 1.1660E-02 2.5610E-02 2.1780E-02

1.3270E-02 8.1090E-02 1.5390E-01 1.0930E+00 1.0140E-02 1.8910E-02 3.5850E-02

5.0270E-02 4.0610E-02 6.9740E-02 1.2980E-01 1.4550E-01 1.7940E-02 4.0290E-02

4.4480E-02 3.8280E-02 7.7670E-02 1.7680E-01 1.3060E-01 6.0570E-02 2.4000E-02

6.8550E-02 6.6350E-02 4.7190E-02 2.3560E-02 2.6970E-03 8.0100E-02 8.0510E-02

5.3730E-02 2.6780E-02 9.5300E-03 2.1440E-02 8.7900E-02 3.6140E-02 6.4940E-02

9.4380E-02 6.3470E-01 5.9810E-01 2.5750E-02 2.2740E-01 1.5110E-01 4.1390E-02

4.3150E-02 2.5760E+00 5.1920E-01 1.3940E-02 3.3510E-02 7.0820E-02 8.0420E-02

9.5630E-02 4.7120E-02 5.4870E-02 1.9050E-01 2.1910E-02 2.7860E-01 5.9830E-02

3.2250E-03 8.5720E-03 2.9050E-02 4.3300E-02 4.6720E-04 2.7740E-03 5.0700E-03

6.3950E-03 5.9770E-05 1.8010E-03 6.9760E-03 1.2190E-02 7.2690E-03 1.9610E-02

2.2740E-01 2.4700E-01 6.6130E-03 1.3160E-02 3.9640E-01 3.1770E-01 1.3920E-03

6.2600E-03 1.3880E-02 1.5610E-02 2.2090E-03 9.5070E-03 2.3780E-02 3.2730E-02

3.7790E-03 7.8720E-03 8.0830E-03 5.4290E-03 1.0500E-03 1.2260E-03 2.0700E-03

2.5250E-03 1.0560E-04 7.3970E-04 1.5440E-03 2.2060E-03 1.4400E-02 5.6210E-01

1.1640E-01 1.1720E-02 1.7340E-02 1.5790E-01 1.9440E-01 1.2840E-02 4.8160E-02

3.2120E-02 9.5250E-03 2.3950E-02 1.4220E-02 1.9810E-01 1.9340E-01 2.0430E-03

8.2970E-03 3.6130E-02 5.3150E-02 1.8300E-01 1.5480E-02 7.2340E-02 1.5050E-02

2.9720E-02 1.3450E-02 5.2000E-02 4.8350E-02 9.4180E-04 7.2200E-03 1.3520E-02

1.4450E-02 3.3340E+00 5.3680E-01 4.5830E-01 2.4120E-01 1.2900E-01 6.6210E-02

6.5060E-01 4.4770E-01 3.1420E-01 2.0230E-01 3.6160E-01 2.3850E-01 1.4120E-01

7.2770E-02 5.4110E-01 3.8530E-01 2.4250E-01 9.7580E-02 9.3190E-02 5.9950E-02

3.4130E-02 1.7830E-02 7.3730E-03 1.1570E-01 6.6810E-02 3.6300E-02 1.8330E-02

8.3720E-03 3.0730E-03 5.1770E-02 3.5780E-02 1.6090E-02 3.7380E-01 1.6490E-01

6.9110E-02 2.5730E-02 1.5880E-01 9.9420E-02 5.4250E-02 2.4990E-02 3.2120E-01

1.5680E-01 1.5990E-02 1.9780E-01 1.0360E-01 5.3020E-02 2.6170E-02 2.4060E-01

2.1850E-01 1.3620E-01 6.6380E+00 1.1660E+01 5.0320E+00 1.5640E-01 4.5510E-02

2.4460E-02 1.3570E-02 7.8670E-03 1.8170E-02 9.8400E-03 4.6670E-03 1.7030E-03

3.4060E-02 1.7480E-02 7.7630E-03 2.5220E-03 2.1370E+01 5.1180E+00 7.1280E-01

2.7800E-02 6.2830E-02 3.1610E-02 2.1000E-02 1.2070E-02 3.0110E-02 1.8100E-02

1.1150E-02 6.5320E-03 2.5960E-02 1.9360E-02 1.5460E-02 1.2640E-02 2.3430E-02

1.4340E-02 7.3700E-03 3.0810E-03 9.3190E-03 5.8500E-03 3.4970E-03 1.7580E-03

1.2740E-02 8.5400E-03 4.9260E-03 2.2310E-03 3.6330E-01 1.3810E-01 4.4990E-03

2.9500E-02 1.6500E-02 1.0140E-02 5.2160E-03 2.3650E-02 1.8140E-02 1.2000E-02

7.3600E-03 1.3760E-01 3.3940E-02 1.1400E-02 4.2310E-03 2.1180E-02 1.0240E-02

4.6350E-03 1.9320E-03 7.3920E-02 4.5220E-02 2.5610E-02 3.9780E-03 2.7420E-02

1.1630E-02 6.6140E-03 3.3360E-03 8.9890E-03 5.1720E-03 2.4860E-03 9.0690E-04

2.4290E+00 9.3950E-02 1.9580E-01 1.8610E-01 1.2540E-01 3.2140E-01 3.6940E-01

2.5830E-01 1.3490E-01 1.4430E-01 1.4010E-01 1.3820E-01 1.2730E-01 3.2270E-01

2.5240E-01 1.8860E-01 1.0350E-01 3.6220E-02 3.8120E-02 3.3310E-02 2.4260E-02

1.2550E-02 2.3050E-02 4.0510E-02 3.9980E-02 3.1510E-02 2.0650E-02 9.9760E-03

3.1300E-02 1.5060E-02 2.2700E-02 9.8490E-02 1.7000E-01 1.1420E-01 4.6490E-02

6.7570E-02 5.6320E-02 5.4740E-02 4.6460E-02 1.4390E-01 5.0520E-02 1.2640E-01

5.5530E-02 8.7360E-02 7.0320E-02 4.1910E-02 2.1820E-01 1.4030E-01 3.8770E-02

4.4210E+00 5.0200E+00 1.9770E+00 5.3990E+00 1.0750E-02 2.1870E-02 1.8080E-02

1.0560E-02 3.5360E-03 6.7910E-03 6.9470E-03 5.6510E-03 3.9600E-03 1.3430E-02

1.3790E-02 1.0050E-02 3.3290E-01 1.3280E+01 5.7550E+00 1.0820E+00 2.3920E-02

3.4010E-02 1.9270E-02 5.1930E-03 1.1540E-02 1.5040E-02 1.1370E-02 6.5370E-03

1.3990E-02 1.6190E-02 1.1970E-02 6.5680E-03 9.4130E-03 7.7730E-03 7.9220E-03

6.9400E-03 3.1370E-03 4.2100E-03 3.6340E-03 2.6440E-03 4.9300E-03 4.0820E-03

4.6570E-03 5.2890E-03 1.3070E-01 4.1430E-02 1.1350E-01 1.2480E-02 1.6860E-02

9.2260E-03 3.1390E-03 1.4050E-02 1.0580E-02 8.7700E-03 6.9240E-03 9.9940E-03

5.6060E-02 3.2540E-02 8.9460E-03 3.3530E-03 9.1300E-03 8.0350E-03 4.8580E-03

3.9880E-02 2.5570E-02 1.1180E-02 1.5810E-02 7.8470E-03 1.5800E-02 8.6350E-03

2.4560E-03 3.1850E-03 2.8990E-03 2.9590E-03 2.5470E-03 2.5560E-02 4.8480E-02

9.0920E-02 1.3060E-01 1.6800E-01 1.2400E-01 1.2300E-01 1.1500E-01 3.0890E-02

7.7790E-02 8.7480E-02 7.6240E-02 1.1950E-01 1.4150E-01 1.0570E-01 5.4200E-02

9.8480E-03 1.7870E-02 1.9390E-02 1.5880E-02 8.7680E-03 2.9990E-03 1.1140E-02

1.8460E-02 2.1310E-02 1.8210E-02 1.0440E-02 9.0620E-03 1.8250E-02 7.2350E-03

3.1120E-02 4.9820E-02 7.6680E-02 5.8690E-02 1.4710E-02 3.7150E-02 3.5640E-02

2.4970E-02 1.4460E-02 1.1960E-01 2.6660E-02 1.8420E-02 2.7380E-02 4.0760E-02

4.1510E-02 1.3680E-01 3.8750E-02 2.2390E-02 2.2070E+00 1.4960E-01 4.5160E+00

9.9290E-01 4.5590E-03 4.7770E-03 9.0230E-03 1.1900E-02 1.5000E-04 2.1250E-03

4.0180E-03 5.1510E-03 4.2370E-05 2.3910E-03 6.9750E-03 1.1220E-02 6.1760E-03

2.4200E-01 5.3720E+00 5.2660E+00 1.6670E-02 6.6520E-03 1.1270E-02 9.3130E-03

5.1980E-03 4.8410E-03 5.9610E-03 5.6380E-03 8.7970E-03 5.0530E-03 5.0590E-03

5.4620E-03 1.5640E-03 5.4370E-03 5.3400E-03 3.6860E-03 7.4250E-04 1.6210E-03

1.9810E-03 2.0630E-03 4.0210E-04 2.8900E-03 3.3420E-03 2.8200E-03 4.2650E-03

1.1530E-01 2.3800E-02 7.1020E-03 3.9220E-03 5.2650E-03 4.5280E-03 5.6940E-03

6.9210E-03 4.9310E-03 2.7250E-03 5.6050E-03 3.7570E-03 2.4370E-02 2.3280E-02

6.4070E-04 1.7670E-03 4.2480E-03 5.8380E-03 1.9480E-02 3.9510E-03 1.5790E-02

4.0570E-03 4.5560E-03 2.5010E-03 5.2610E-03 4.2900E-03 3.6980E-04 1.9290E-03

2.0130E-03 1.4970E-03 9.1590E+00 5.2510E-01 8.1870E-02 3.2410E+00 8.1480E-01

1.2190E-01 1.8130E-02 3.4630E+00 1.0640E+00 2.8180E-01 3.5110E-02 7.3990E-01

4.5440E-01 1.0660E-01 2.3080E-02 2.1460E-01 1.0250E-01 4.0110E-02 1.1560E-02

1.5040E-03 2.3910E-01 1.1030E-01 4.3770E-02 1.4050E-02 3.2970E-03 4.0720E-04

1.7150E-01 5.9240E-02 8.3260E-03 2.6110E-01 7.3560E-02 1.8670E-02 3.4840E-03

3.0420E-01 1.0210E-01 2.6100E-02 4.7710E-03 7.4180E-02 2.8920E-02 3.6540E-03

1.1420E+00 3.0220E-01 1.6210E-01 3.3240E-02 1.4990E-01 2.4550E-02 3.2730E-03

8.9580E-03 1.5680E-02 9.0960E-03 1.1560E-03 1.9200E+01 7.4060E-01 1.4980E-02

1.0170E-03 3.1420E+01 2.5920E+00 7.6150E-02 1.0800E-03 4.2660E+01 3.2240E+00

1.1180E-01 2.7900E-03 1.8970E-02 4.7820E-03 9.4980E-04 1.2370E-04 3.6500E-02

8.0920E-03 6.7450E-04 7.5670E-05 4.7130E-02 1.6060E-02 3.4690E-03 1.7880E-04

7.1000E+00 2.2500E-01 6.4690E-03 1.8340E-03 1.2840E-01 3.9610E-02 9.2540E-03

1.2260E-03 7.5340E-01 8.3300E-02 1.7730E-02 3.2460E-03 2.3200E+00 2.1250E-01

2.3620E-02 3.3030E-03 8.4850E-03 8.2540E-04 4.1440E-05 2.0210E-02 5.3230E-03

7.5490E-04 5.6080E-05 2.9130E-02 6.4810E-03 1.3410E-03 1.6810E-04 3.9330E-02

6.8630E-03 7.3270E-04 1.4680E-04 2.4780E-01 1.7500E-02 2.4750E-03 2.8360E-04

3.9370E-03 3.9190E-03 1.9420E-03 4.4320E-04 2.4490E-02 4.2350E-03 1.0310E-03

2.1750E-05 4.4990E-02 9.4410E-03 1.5150E-03 1.7080E-04 1.3110E+01 6.0450E-01

1.1280E+00 1.6170E+00 7.6830E-01 1.2820E-01 1.1520E+00 2.0800E+00 1.1570E+00

3.1030E-01 6.4760E-01 6.6490E-01 3.2950E-01 8.7160E-02 1.1070E-01 1.0020E-01

6.3890E-02 3.5680E-02 1.6110E-02 9.6730E-02 1.0150E-01 7.8920E-02 4.6830E-02

2.1060E-02 6.4550E-03 9.7890E-02 6.7520E-02 3.9540E-02 1.2060E-01 1.1890E-01

5.0270E-02 1.5980E-02 1.2960E-01 1.3850E-01 8.0210E-02 2.6590E-02 5.0050E-02

2.5090E-02 1.6540E-02 4.1680E-01 7.7750E-01 4.9630E-01 1.6190E-01 7.8270E-02

6.0660E-02 1.3780E-02 7.6780E-03 1.2480E-02 4.4740E-03 5.2390E-03 1.9160E+00

1.4030E+01 9.2420E-01 1.6420E-02 2.5070E+00 3.2130E+01 3.1950E+00 8.9680E-02

2.7060E-01 3.9890E+01 4.2010E+00 1.3060E-01 8.2390E-03 8.6270E-03 3.4430E-03

8.7900E-04 1.4620E-02 1.5850E-02 7.3790E-03 6.4720E-04 2.0220E-02 1.9780E-02

1.3040E-02 3.9700E-03 5.6150E-01 5.3100E+00 2.7510E-01 7.1030E-03 5.1510E-02

5.9480E-02 3.2300E-02 1.0000E-02 1.1250E-01 5.2800E-01 7.6290E-02 1.8750E-02

2.1420E-01 1.7390E+00 2.4100E-01 2.5950E-02 4.0900E-03 3.4600E-03 4.9520E-04

8.7140E-03 7.7190E-03 4.3540E-03 7.5850E-04 9.0040E-03 1.3360E-02 5.7810E-03

1.4490E-03 1.4930E-02 2.0250E-02 6.0550E-03 6.5790E-04 3.3660E-02 1.7140E-01

1.7970E-02 2.7530E-03 3.3750E-03 2.9690E-03 1.4460E-03 1.0330E-03 8.0600E-03

1.4180E-02 2.2060E-03 1.0760E-03 1.3900E-02 2.3730E-02 9.1810E-03 1.6480E-03

1.1900E+01 2.8730E-01 1.0590E+00 1.0750E+00 6.1210E-01 3.1760E-01 1.2430E+00

1.5950E+00 9.9900E-01 2.8170E-01 5.4940E-01 4.2820E-01 2.2450E-01 4.8040E-02

7.1260E-02 7.3910E-02 5.4010E-02 2.6600E-02 2.8530E-02 6.9440E-02 7.1390E-02

5.9400E-02 4.2270E-02 2.1930E-02 4.7890E-02 6.5900E-02 5.7010E-02 5.0490E-02

8.9940E-02 7.9400E-02 3.4310E-02 4.5730E-02 1.0340E-01 9.6910E-02 6.6700E-02

2.9450E-02 2.7660E-02 1.9190E-02 1.5940E-01 4.5120E-01 8.9940E-01 4.1000E-01

3.7020E-02 5.9080E-02 3.1320E-02 6.3980E-03 8.2220E-03 5.5620E-03 4.6980E-03

9.2260E-02 2.4520E+00 1.0890E+01 7.0590E-01 3.6840E-02 3.1400E+00 1.8830E+01

2.4630E+00 6.4440E-03 8.9030E-01 3.5460E+01 3.2650E+00 3.1090E-03 6.5290E-03

5.8330E-03 2.4130E-03 4.6170E-03 1.3120E-02 8.9400E-03 5.1930E-03 6.4140E-03

1.6330E-02 1.3420E-02 1.1000E-02 2.9040E-02 7.0370E-01 4.1780E+00 2.1130E-01

1.7180E-02 4.1860E-02 4.1740E-02 2.7040E-02 2.4020E-02 1.1170E-01 4.1350E-01

6.4970E-02 2.3610E-02 2.3730E-01 1.3960E+00 1.9280E-01 1.7720E-03 3.3400E-03

1.6930E-03 3.1330E-03 7.4060E-03 5.1790E-03 3.0810E-03 2.8170E-03 8.1970E-03

9.9770E-03 4.7150E-03 4.3160E-03 1.3260E-02 1.2730E-02 4.2170E-03 3.9190E-03

3.6160E-02 1.3280E-01 1.4720E-02 2.8120E-03 1.9210E-03 1.5250E-03 1.0530E-03

3.2720E-03 7.3090E-03 9.5710E-03 1.6040E-03 3.5500E-03 1.3680E-02 1.6340E-02

7.3850E-03 5.3810E-02 3.2800E-01 9.0440E-01 1.1520E+00 5.4500E-02 4.1500E-01

1.1550E+00 1.8000E+00 1.0360E-01 3.1410E-01 4.5660E-01 3.2560E-01 1.2620E-02

4.7570E-02 6.3200E-02 5.9140E-02 3.5720E-02 4.6930E-03 2.5870E-02 5.1630E-02

6.3350E-02 5.5810E-02 3.2230E-02 1.6680E-02 5.7810E-02 6.2040E-02 1.7240E-02

5.3150E-02 7.4830E-02 5.7630E-02 1.1600E-02 4.8790E-02 9.1180E-02 9.8180E-02

1.4280E-02 3.0220E-02 1.6530E-02 7.6030E-02 3.0360E-01 6.2070E-01 8.4790E-01

1.5070E-02 4.2310E-02 4.4500E-02 5.1190E-03 4.3440E-03 8.0080E-03 2.5310E-03

6.1530E-03 1.1280E-01 2.1580E+00 1.4620E+01 1.0770E-03 8.9680E-02 2.4300E+00

1.7140E+01 1.1780E-03 1.7580E-02 1.3460E+00 3.2020E+01 8.8980E-04 3.4630E-03

5.5060E-03 4.3230E-03 9.7210E-04 5.5310E-03 1.1040E-02 8.2980E-03 1.0870E-03

7.3820E-03 1.4660E-02 1.5000E-02 1.9130E-03 3.5360E-02 5.4530E-01 3.4320E+00

3.7590E-03 1.9130E-02 3.7810E-02 4.2120E-02 4.7070E-03 2.6070E-02 9.3950E-02

3.7910E-01 3.3010E-03 2.5940E-02 2.0210E-01 1.2630E+00 5.3520E-04 2.1850E-03

2.6610E-03 7.5140E-04 3.6150E-03 6.4970E-03 4.2880E-03 5.2570E-04 3.1890E-03

7.0490E-03 1.0120E-02 1.0060E-03 5.2510E-03 1.0970E-02 1.0280E-02 4.8290E-04

4.5580E-03 2.9680E-02 1.1980E-01 2.2500E-03 1.1350E-03 1.6500E-03 7.6320E-04

8.3310E-04 3.6910E-03 6.1660E-03 6.9980E-03 6.0030E-04 3.9120E-03 1.1590E-02

1.6220E-02 6.9640E+00 3.6550E-01 8.5100E-02 1.7140E+00 6.8660E-01 2.0890E-01

4.9060E-02 1.9490E+00 8.4240E-01 2.4410E-01 5.2610E-02 1.3540E-01 7.0150E-02

3.5730E-02 1.8790E-02 8.4640E-03 2.2090E-01 1.3180E-01 7.7460E-02 4.1890E-02

1.9630E-02 7.0960E-03 1.4010E-01 7.1400E-02 1.9240E-02 7.1420E-01 1.1970E-01

3.5720E-02 1.1810E-02 3.9120E-01 1.3670E-01 5.1010E-02 1.7810E-02 1.4970E-01

6.8510E-02 1.3040E-02 8.8410E-01 5.7920E-01 1.9380E-01 6.8800E-02 1.9360E-01

8.4730E-02 3.4510E-02 1.2640E-01 1.4950E-01 7.6950E-02 3.3820E-02 9.2030E+00

9.6610E-01 7.1520E-02 5.5810E-03 2.6560E-01 1.3920E-01 3.4120E-02 4.9170E-03

3.7680E-01 1.4240E-01 4.1660E-02 4.4160E-03 1.8970E-01 2.6230E-02 1.6930E-02

8.7950E-03 1.8980E+01 4.3880E-01 1.1270E-02 6.8340E-04 2.4080E+01 2.7870E+00

1.2200E-01 9.0470E-04 2.6700E+01 2.6510E+00 1.5070E-01 5.4770E-03 8.9570E-01

1.3200E-01 9.5860E-03 1.2700E-03 7.5220E-01 1.0610E-01 1.4160E-02 2.6130E-03

6.2100E-02 2.9580E-02 1.0760E-02 2.1490E-03 4.1380E-02 1.1080E-02 1.7740E-03

8.2660E-01 4.7300E-02 6.7300E-03 1.7790E-03 4.1740E-01 6.8030E-02 1.0250E-02

2.1920E-03 5.0780E-02 1.5020E-02 4.2740E-03 1.1020E-03 7.3080E-02 2.6280E-02

6.8450E-03 1.8860E-03 9.8370E-03 7.8960E-03 4.7700E-03 1.9200E-03 2.3990E-02

9.5090E-03 4.0610E-03 1.2380E-03 5.9520E-02 2.9950E-02 6.7850E-03 2.3200E-03

8.4070E+00 3.7690E-01 5.2930E-01 9.0200E-01 5.8550E-01 2.2350E-01 9.4140E-01

9.2750E-01 5.6440E-01 2.0660E-01 6.3730E-02 6.8650E-02 4.8750E-02 2.6190E-02

1.0130E-02 1.0840E-01 1.0540E-01 7.5210E-02 5.2750E-02 3.7030E-02 2.0190E-02

8.6500E-02 5.0930E-02 4.7160E-02 1.8990E-01 4.0180E-01 8.8020E-02 2.3960E-02

1.3640E-01 1.9860E-01 9.8040E-02 4.5320E-02 9.7240E-02 4.9030E-02 3.8740E-02

5.7910E-01 4.7240E-01 4.5190E-01 1.7060E-01 1.2310E-01 9.0170E-02 3.7630E-02

1.0110E-01 1.0300E-01 7.1270E-02 3.3270E-02 3.4150E-01 6.7070E+00 1.1980E+00

8.8190E-02 1.0080E-01 1.9230E-01 1.3090E-01 3.9740E-02 7.6970E-02 4.1720E-01

2.3730E-01 4.9770E-02 4.3380E-02 1.2900E-01 1.5280E-02 6.1890E-03 2.6130E+00

1.2440E+01 4.5330E-01 6.6810E-03 2.7690E+00 1.5300E+01 3.3360E+00 1.4700E-01

6.9120E-01 1.9450E+01 3.6160E+00 1.8910E-01 1.2830E-01 5.5930E-01 1.3660E-01

1.0520E-02 3.6760E-02 5.7700E-01 1.1210E-01 1.5680E-02 2.4220E-02 2.5490E-02

2.1930E-02 1.2050E-02 2.1040E-02 1.5700E-02 6.3470E-03 1.4940E-01 5.0270E-01

4.1980E-02 5.2720E-03 6.7480E-02 2.4550E-01 6.9380E-02 1.0580E-02 1.8780E-02

2.2390E-02 1.0490E-02 3.4900E-03 1.7670E-02 3.9430E-02 2.2120E-02 7.1240E-03

7.8690E-03 5.9610E-03 3.5190E-03 2.1280E-03 1.0720E-02 1.0610E-02 6.9140E-03

2.5500E-03 2.0670E-02 3.0850E-02 2.9540E-02 6.1930E-03 6.3180E+00 1.3600E-01

4.9110E-01 6.0950E-01 4.9150E-01 3.8460E-01 7.0720E-01 5.8390E-01 3.5620E-01

3.1810E-02 4.4890E-02 4.1110E-02 3.0240E-02 1.5930E-02 5.2900E-02 5.4490E-02

6.9960E-02 6.2580E-02 4.0770E-02 1.8380E-02 4.3710E-02 4.9410E-02 4.5320E-02

5.8990E-02 1.6500E-01 2.4870E-01 5.4280E-02 5.1010E-02 9.7820E-02 1.3580E-01

7.4540E-02 5.3210E-02 5.1080E-02 3.4490E-02 1.9380E-01 4.5190E-01 4.9380E-01

3.4150E-01 7.7190E-02 7.1500E-02 3.9580E-02 7.5870E-02 6.9030E-02 5.6490E-02

3.0660E-02 1.4360E-02 4.0390E-01 4.9180E+00 9.2640E-01 1.3510E-02 9.5940E-02

1.2700E-01 1.1130E-01 3.7790E-03 1.3460E-01 2.8400E-01 1.9610E-01 2.1360E-02

4.1490E-02 7.9760E-02 5.6360E-03 2.0550E-01 3.1550E+00 7.9640E+00 3.1510E-01

1.1710E-01 3.5310E+00 9.9800E+00 2.5590E+00 7.4020E-03 8.4390E-01 1.4320E+01

2.7780E+00 9.0120E-03 1.3540E-01 3.7310E-01 1.0430E-01 6.8450E-03 3.5560E-02

5.3070E-01 9.3580E-02 6.2780E-03 1.7890E-02 1.8420E-02 2.0190E-02 9.6480E-03

1.4000E-02 8.8620E-03 2.1270E-02 1.5430E-01 3.2120E-01 2.7850E-02 1.0110E-02

6.8960E-02 1.5640E-01 5.3130E-02 6.8970E-03 1.4170E-02 1.3460E-02 6.5970E-03

4.6370E-03 1.4670E-02 2.8690E-02 1.8470E-02 5.9010E-03 4.0340E-03 2.9250E-03

1.6350E-03 5.9980E-03 7.5520E-03 7.4170E-03 3.2560E-03 5.3020E-03 1.6000E-02

2.1960E-02 2.2450E-02 2.8550E-02 1.4780E-01 3.9160E-01 5.8270E-01 1.2120E-01

3.8620E-01 5.1460E-01 3.3750E-01 1.7330E-02 2.0770E-02 2.7730E-02 2.6880E-02

1.6430E-02 1.7080E-02 4.0900E-02 4.3420E-02 4.1900E-02 3.5300E-02 2.0710E-02

1.6910E-02 4.3590E-02 3.1830E-02 2.2350E-02 5.2450E-02 1.2030E-01 1.5540E-01

1.7810E-02 4.5320E-02 7.4440E-02 1.0160E-01 2.3660E-02 4.7170E-02 2.1630E-02

6.8770E-02 1.7060E-01 3.4150E-01 4.0580E-01 4.5160E-02 4.6260E-02 3.3340E-02

5.0570E-02 4.2520E-02 3.8040E-02 2.3590E-02 2.3800E-03 1.6310E-02 3.0660E-01

3.8500E+00 9.2690E-04 1.5200E-02 7.6830E-02 1.3900E-01 2.9740E-04 4.1430E-03

1.0320E-01 3.0480E-01 1.3970E-02 1.0970E-02 2.4820E-02 4.6240E-02 9.5650E-03

2.8270E-01 2.4160E+00 6.2850E+00 9.0440E-04 1.4530E-01 2.6730E+00 8.1260E+00

2.0780E-03 7.4980E-03 6.3300E-01 1.1160E+01 1.2580E-03 1.0510E-02 1.0860E-01

2.9820E-01 1.6890E-03 7.2070E-03 2.8280E-02 4.3950E-01 5.8920E-04 6.9180E-03

1.5470E-02 1.8880E-02 3.7370E-03 9.7280E-03 8.2790E-03 3.9360E-03 2.3420E-02

1.1760E-01 2.0710E-01 2.1580E-03 1.0570E-02 5.2860E-02 1.2680E-01 2.2920E-03

6.8400E-03 1.1000E-02 8.1180E-03 1.1430E-03 4.4810E-03 1.1670E-02 2.6340E-02

3.9350E-03 2.4670E-03 2.2740E-03 1.0610E-03 2.4160E-03 4.1260E-03 4.5020E-03

3.2820E-03 1.5580E-03 5.9800E-03 1.3350E-02 1.8030E-02 7.4290E+00 3.2750E-01

5.5190E-02 1.8990E+00 5.5910E-01 1.6640E-01 4.6300E-02 1.3160E-01 6.2240E-02

2.5090E-02 8.8830E-03 2.3500E-03 2.1160E-01 1.2030E-01 6.0160E-02 2.5340E-02

8.2720E-03 1.7360E-03 9.6230E-02 2.2370E-02 6.2540E-03 2.6350E-01 8.8990E-02

2.7590E-02 5.4970E-03 7.9680E-01 1.0350E-01 3.0300E-02 9.7310E-03 1.1610E-01

2.6160E-02 7.6250E-03 1.3560E+00 4.2190E-01 1.1900E-01 4.2050E-02 1.5600E-01

5.0780E-02 7.8720E-03 4.4340E-03 1.9250E-02 4.7940E-03 1.9010E-03 1.9760E+00

2.0780E-01 2.3550E-02 2.6540E-03 3.5710E+00 3.4500E-01 3.7580E-02 5.1820E-03

9.4040E-02 8.5620E-02 2.7820E-02 4.7660E-03 2.1240E-02 1.0890E-02 3.3270E-03

4.9030E-04 5.3700E-02 1.5650E-02 2.9000E-03 3.7370E-04 7.5000E-01 3.3820E-02

5.5470E-03 1.5400E-03 2.0000E-01 4.9110E-02 1.2380E-02 2.1830E-03 2.1660E+01

5.9170E-01 8.6980E-03 7.6310E-04 2.8630E+01 2.5520E+00 9.8770E-02 6.5250E-04

3.9080E+01 2.9200E+00 1.3380E-01 7.0950E-03 3.1700E-02 6.0210E-03 2.1530E-03

6.6490E-02 2.5520E-02 9.8400E-03 2.6110E-03 1.9420E+00 7.9600E-02 1.2100E-02

4.2470E-03 4.8750E-02 1.2700E-02 3.0530E-03 3.7320E-04 1.5990E-01 2.7890E-02

4.6870E-03 7.0410E-04 1.3850E-03 1.1370E-02 3.4390E-03 8.9850E-04 2.2620E-02

7.3970E-03 2.2700E-03 4.8220E-04 1.0010E-01 2.0170E-02 3.4250E-03 5.3170E-04

1.0950E+01 3.6510E-01 8.0160E-01 1.0860E+00 3.8610E-01 1.2240E-01 6.1580E-02

6.6780E-02 4.0020E-02 2.1540E-02 9.3150E-03 1.0630E-01 8.5930E-02 6.9830E-02

5.0130E-02 3.0280E-02 1.3570E-02 4.3950E-02 4.5640E-02 1.4440E-02 1.2510E-01

1.1880E-01 5.7720E-02 2.1570E-02 1.5410E-01 5.1630E-01 8.3700E-02 2.7180E-02

6.1420E-02 5.0170E-02 1.3260E-02 4.9760E-01 6.6600E-01 3.5290E-01 1.0300E-01

9.4880E-02 5.7590E-02 2.8680E-02 3.6950E-03 1.0880E-02 8.9080E-03 2.3330E-03

2.0090E-01 1.2900E+00 2.2880E-01 2.7070E-02 1.7500E-01 2.7850E+00 4.0670E-01

4.2540E-02 7.1290E-02 1.0750E-01 6.9070E-02 3.0780E-02 1.3540E-02 7.8270E-03

6.1130E-03 2.9710E-03 2.3140E-02 2.1830E-02 1.2600E-02 2.5570E-03 9.7600E-02

5.3290E-01 3.2760E-02 5.3070E-03 4.9050E-02 1.1570E-01 4.1340E-02 1.3420E-02

2.1730E+00 1.5580E+01 7.1330E-01 1.1380E-02 2.5390E+00 2.0280E+01 3.1460E+00

1.1350E-01 4.6460E-01 3.1430E+01 3.7470E+00 1.6050E-01 1.5930E-02 1.4120E-02

2.9210E-03 3.4340E-02 3.0070E-02 1.4820E-02 7.2720E-03 2.1080E-01 1.3270E+00

8.0000E-02 1.1040E-02 1.9860E-02 2.2630E-02 8.8450E-03 2.8020E-03 2.7760E-02

1.0740E-01 2.8450E-02 5.7490E-03 1.1550E-03 6.8020E-03 4.5960E-03 1.6410E-03

1.0510E-02 9.5960E-03 6.0260E-03 1.7800E-03 2.5240E-02 5.6360E-02 1.5970E-02

3.5880E-03 8.5790E+00 3.3330E-01 6.9090E-01 6.9480E-01 2.4950E-01 2.6020E-02

4.0470E-02 4.6100E-02 3.2820E-02 1.4730E-02 4.0190E-02 6.3530E-02 6.2110E-02

5.4260E-02 4.1690E-02 2.3070E-02 1.8660E-02 3.6920E-02 2.7610E-02 5.4910E-02

8.7760E-02 7.8380E-02 3.7070E-02 4.2330E-02 1.4250E-01 3.7520E-01 6.5500E-02

3.1490E-02 4.4440E-02 2.4020E-02 1.6450E-01 4.2180E-01 4.3610E-01 2.7200E-01

5.0570E-02 5.7420E-02 3.6400E-02 2.9560E-03 5.6260E-03 7.6120E-03 3.9450E-03

2.3430E-02 2.2860E-01 9.6030E-01 1.8230E-01 2.1000E-02 1.9380E-01 2.1940E+00

3.1590E-01 1.8960E-02 5.6320E-02 8.3010E-02 6.5670E-02 6.5980E-03 7.5710E-03

6.2440E-03 3.9700E-03 8.2750E-03 1.8680E-02 1.3310E-02 8.7640E-03 1.0460E-02

1.0660E-01 3.9230E-01 2.5240E-02 1.2360E-02 4.1330E-02 8.6350E-02 3.5810E-02

1.2830E-01 2.6950E+00 1.1420E+01 5.3540E-01 9.1850E-02 3.1400E+00 1.5240E+01

2.4100E+00 3.5720E-03 1.4740E+00 2.4870E+01 2.8850E+00 7.9830E-03 1.2240E-02

6.2540E-03 1.7430E-02 2.1760E-02 2.0180E-02 9.2580E-03 2.4430E-02 2.4630E-01

1.0190E+00 6.1200E-02 7.2600E-03 1.5020E-02 1.4830E-02 5.9690E-03 4.6680E-03

2.8430E-02 7.8820E-02 2.2840E-02 9.2370E-04 3.3120E-03 4.3000E-03 2.3190E-03

4.8780E-03 7.6360E-03 6.4600E-03 3.9940E-03 5.3570E-03 2.3570E-02 3.9450E-02

1.3030E-02 1.3400E-01 3.3890E-01 5.3710E-01 4.7310E-01 8.5460E-03 2.3890E-02

3.3070E-02 3.2290E-02 2.0520E-02 8.2520E-03 3.5550E-02 5.2230E-02 5.3220E-02

4.1690E-02 2.2500E-02 7.6540E-03 1.9870E-02 3.4780E-02 2.1300E-02 5.3300E-02

6.8480E-02 5.0260E-02 1.4230E-02 4.1420E-02 1.1440E-01 2.9930E-01 1.5820E-02

2.9200E-02 2.9960E-02 6.0200E-02 1.5610E-01 3.4100E-01 4.1380E-01 2.3100E-02

5.0780E-02 3.4740E-02 2.2170E-03 3.3000E-03 4.6850E-03 4.8260E-03 2.6230E-03

2.7270E-02 1.8220E-01 8.6270E-01 2.9160E-03 2.3070E-02 1.5580E-01 1.8710E+00

1.0780E-03 2.0820E-02 5.2460E-02 9.1610E-02 2.1650E-03 6.5140E-03 6.0290E-03

3.2610E-03 2.0940E-03 9.2970E-03 1.5180E-02 1.0180E-02 2.4280E-03 1.1170E-02

8.3850E-02 3.0520E-01 2.1830E-03 1.3420E-02 3.5810E-02 8.0020E-02 5.2360E-03

1.6070E-01 2.0730E+00 8.9200E+00 6.5190E-04 1.1290E-01 2.4120E+00 1.3140E+01

4.6470E-04 4.2820E-03 1.1280E+00 2.0870E+01 4.0860E-03 7.1900E-03 8.4290E-03

7.3980E-03 1.5710E-02 1.6490E-02 1.1830E-02 6.2720E-03 2.6210E-02 1.9120E-01

7.9330E-01 2.0760E-03 7.8090E-03 1.2110E-02 1.0000E-02 7.0210E-04 5.1200E-03

2.2840E-02 6.7200E-02 6.9280E-04 1.8880E-03 3.1060E-03 2.3910E-03 1.7140E-03

4.2620E-03 6.2740E-03 4.2410E-03 1.0060E-03 5.9110E-03 1.9500E-02 3.4520E-02

4.5810E+00 4.7000E-01 1.8300E-01 7.0560E-02 4.7790E-02 2.8840E-02 1.6320E-02

7.4400E-03 8.4880E-02 6.0000E-02 4.2880E-02 3.0840E-02 2.0750E-02 1.0620E-02

6.2750E-02 3.4810E-02 2.1850E-02 9.2260E-01 6.0330E-01 1.5400E-01 5.1450E-02

7.2440E-01 1.5810E-01 2.6250E-01 8.0660E-02 1.0120E+00 1.5440E-01 4.4870E-02

8.4970E-01 4.7720E-01 2.5680E-01 1.3080E-01 6.1370E-01 3.5910E-01 4.3760E-02

2.7700E-02 2.1220E-01 4.1110E-02 2.1880E-02 1.3100E-01 5.7350E-02 1.8060E-02

3.8920E-03 9.8810E-02 4.0720E-02 1.4040E-02 3.6970E-03 8.5510E-02 3.7760E-02

1.3280E-02 2.9410E-03 3.5020E-02 1.9010E-02 1.0890E-02 5.1030E-03 2.3700E+00

4.4430E-01 2.4340E-02 4.3890E-03 2.1470E+00 3.2230E-01 3.9420E-02 7.3490E-03

9.5680E-02 4.9290E-02 2.1230E-02 7.1120E-03 2.9670E+00 4.2240E-01 4.5200E-02

7.7440E-03 1.1990E-01 4.5800E-02 1.7610E-02 6.4390E-03 1.3640E-01 6.0570E-02

2.7450E-02 1.1170E-02 1.3250E+01 2.0660E-01 6.3560E-03 1.7820E+01 3.2660E+00

1.1570E-01 3.7330E-03 3.0020E+01 3.5090E+00 2.8480E-01 1.5890E-02 1.4420E-01

4.7310E-02 1.1870E-02 2.2770E-03 2.6430E-02 1.4650E-02 7.0230E-03 2.7000E-03

2.9970E-02 1.4130E-01 1.7920E-02 8.4800E-03 4.8120E-02 2.5580E-02 1.0140E-02

2.6690E-03 4.9580E-02 1.6350E-02 5.5950E-03 1.3260E-03 5.0980E+00 2.7660E-01

4.1650E-02 3.2050E-02 2.8100E-02 1.8690E-02 7.7640E-03 4.8300E-02 4.6730E-02

4.1010E-02 2.8990E-02 1.6120E-02 6.4730E-03 3.6850E-02 3.4710E-02 1.8030E-02

2.0500E-01 5.8160E-01 8.9150E-02 1.1090E-01 3.7680E-01 1.5180E-01 1.1720E-01

6.2960E-02 2.2380E-01 4.5970E-01 6.5710E-02 4.1430E-01 3.9230E-01 2.9700E-01

1.8350E-01 4.2080E-01 1.1060E-01 2.3030E-01 2.0770E-02 7.8470E-02 1.0350E-01

1.4360E-02 3.8910E-02 5.0280E-02 4.7480E-02 2.1040E-02 2.2050E-02 4.5640E-02

3.4050E-02 1.5950E-02 1.9980E-02 3.6440E-02 3.1720E-02 1.5780E-02 1.8540E-02

1.9120E-02 1.0460E-02 4.6640E-03 4.4090E-01 1.1690E+00 4.9860E-01 2.3640E-02

7.8140E-02 1.4080E+00 3.6690E-01 4.5640E-02 3.6800E-02 3.8230E-02 3.3320E-02

2.1950E-02 8.3110E-02 1.9710E+00 4.9440E-01 5.3690E-02 2.7960E-02 6.1270E-02

3.6480E-02 1.7510E-02 3.6570E-02 6.9450E-02 4.4100E-02 2.7370E-02 3.1680E+00

6.7860E+00 1.4530E-01 3.2600E+00 8.7750E+00 3.7000E+00 1.4230E-01 5.7900E-01

1.6640E+01 4.2520E+00 3.7860E-01 4.7230E-02 6.0310E-02 3.5460E-02 1.1370E-02

1.1430E-02 1.0170E-02 9.3660E-03 6.8500E-03 2.2470E-02 3.9350E-02 7.3160E-02

7.0420E-03 2.5550E-02 1.7490E-02 1.3980E-02 8.6210E-03 9.5920E-03 2.5900E-02

1.1910E-02 5.1200E-03 3.4790E+00 2.0430E-02 2.5380E-02 1.7160E-02 1.3880E-02

9.1670E-03 2.8820E-02 3.2290E-02 2.3290E-02 1.7810E-02 1.4250E-02 8.4940E-03

2.2210E-02 2.1170E-02 1.6240E-02 1.0890E-01 1.9150E-01 3.3630E-01 4.9260E-02

1.1380E-01 9.1870E-02 1.0240E-01 7.8310E-02 8.4680E-02 1.7430E-01 1.8040E-01

1.9110E-01 2.4640E-01 2.3510E-01 1.8630E-01 1.8650E-01 1.9950E-01 1.2210E-01

1.3850E-02 3.5240E-02 5.9580E-02 4.1180E-02 4.8460E-03 3.3800E-02 2.7860E-02

3.8770E-02 3.6340E-03 1.7240E-02 2.8850E-02 2.8600E-02 2.0330E-03 1.6900E-02

2.2670E-02 2.7600E-02 1.0830E-02 1.0150E-02 9.8940E-03 4.3100E-03 2.2430E-02

4.9800E-01 5.5300E-01 3.4940E-01 1.3400E-02 6.9890E-02 9.0600E-01 2.7980E-01

1.0080E-02 2.4250E-02 2.5600E-02 2.6810E-02 1.3520E-02 7.6390E-02 1.2720E+00

3.7750E-01 8.1610E-03 1.9020E-02 3.9120E-02 2.8570E-02 1.2290E-02 2.0650E-02

4.8280E-02 3.6460E-02 4.2940E-01 3.5560E+00 2.7600E+00 1.1180E-01 3.6990E+00

4.1700E+00 2.6070E+00 1.1730E-02 6.4940E-01 1.0620E+01 3.2600E+00 1.1870E-02

3.5450E-02 3.4340E-02 2.1740E-02 3.6980E-03 7.1160E-03 7.5330E-03 7.3990E-03

1.4990E-02 1.5450E-02 3.7780E-02 2.8060E-02 1.0130E-02 1.3560E-02 1.2630E-02

6.7970E-03 2.9270E-03 5.7640E-03 1.7260E-02 8.7290E-03 8.9850E-03 9.2390E-03

1.1610E-02 8.5450E-03 3.6090E-03 1.6560E-02 9.8580E-03 1.1940E-02 1.1630E-02

8.3520E-03 4.0970E-03 1.0880E-02 8.8130E-03 1.0080E-02 4.5020E-02 9.9650E-02

1.8010E-01 3.4440E-02 4.0240E-02 8.8610E-02 5.2110E-02 5.6650E-02 3.1950E-02

5.9200E-02 1.0630E-01 7.4520E-02 1.0980E-01 1.3130E-01 1.1440E-01 4.9910E-02

1.7730E-01 2.6410E-02 6.9240E-03 1.6220E-02 1.5140E-02 3.6400E-02 5.6810E-04

4.6770E-03 2.3450E-02 2.3930E-02 4.5430E-04 3.3650E-03 1.2090E-02 2.3160E-02

1.7080E-05 2.2020E-03 1.2130E-02 2.0440E-02 5.0930E-03 4.6520E-03 4.1420E-03

3.5460E-03 4.2060E-03 2.3270E-02 3.4910E-01 3.3520E-01 3.0230E-03 1.1330E-02

4.6600E-02 5.7310E-01 1.7910E-03 8.9440E-03 1.6180E-02 1.6470E-02 2.8860E-03

1.1720E-02 5.1440E-02 8.0340E-01 2.0630E-03 6.2400E-03 1.2370E-02 2.6970E-02

2.6730E-03 1.0080E-02 1.3670E-02 3.2500E-02 1.6930E-02 6.6630E-01 2.6870E+00

3.4460E-03 1.4360E-01 2.6060E+00 2.5310E+00 5.4360E-03 5.6950E-03 4.5150E-01

6.7910E+00 2.2740E-03 1.1360E-02 2.1740E-02 1.5790E-02 7.3560E-04 3.2660E-03

4.5950E-03 4.0280E-03 7.4920E-03 6.4020E-03 8.3210E-03 2.5220E-02 2.6090E-03

8.6180E-03 7.5390E-03 4.5170E-03 5.0600E-04 2.7040E-03 3.6230E-03 9.9730E-03

3.6820E+00 9.6060E-01 1.8860E-01 7.8210E-02 8.5490E+00 3.6860E+00 1.0440E+00

1.9990E-01 3.2860E-02 7.2510E-03 3.3470E+00 1.2270E+00 4.1250E-02 2.9370E+00

4.2680E-01 8.0310E-02 6.9660E-03 2.0350E+00 6.2820E-01 1.0200E-01 7.3700E-03

6.9240E-01 1.4950E-01 9.6790E-03 3.8000E-02 2.0510E-02 9.4030E-03 3.4660E-03

1.7350E-02 1.2400E-02 6.8950E-03 5.2210E-02 1.1450E-01 8.5660E-03 2.5570E-03

2.1990E-01 1.8430E-01 8.6100E-02 1.9820E-02 1.6820E-01 8.2250E-02 2.4480E-02

3.8210E-03 1.0710E-01 2.9840E-02 6.4520E-03 7.6330E-04 1.1860E-01 3.7270E-02

6.4580E-03 1.0370E-04 1.1170E-01 5.7800E-02 5.1000E-02 3.3150E-02 1.7980E-01

4.3440E-02 1.0990E-02 2.4640E-03 4.6020E-02 1.5040E-02 4.0330E-03 9.4820E-04

8.7550E-02 7.8560E-02 4.6370E-02 1.5110E-02 1.9720E-01 4.4130E-02 7.2040E-03

6.9060E-04 3.6240E-02 1.5430E-02 4.4640E-03 8.2220E-04 5.2020E-02 3.9010E-02

9.0090E-03 5.7670E-02 2.6270E-02 1.4410E-02 7.4040E-03 5.0580E-02 2.4120E-02

8.3800E-03 2.1990E-03 7.3480E-02 7.5820E-02 3.8190E-02 8.8650E-03 4.8460E-02

2.7090E-02 9.4110E-03 1.9680E-03 4.2520E-02 2.3680E-02 1.0910E-02 6.5430E-03

2.0820E-02 1.0710E-02 5.5880E-03 2.7050E-03 3.2590E-02 1.6170E-02 6.1290E-03

1.4660E-03 3.1400E+00 1.3530E+00 1.2870E-01 2.7730E+00 2.8500E+00 3.2710E+00

1.5780E+00 3.7290E-01 4.9780E-02 1.7850E+00 1.0820E+00 8.1690E-01 8.8860E-01

1.4890E+00 3.0080E-01 7.6430E-02 7.2820E-01 8.3310E-01 5.4420E-01 1.1000E-01

3.5170E-01 2.4370E-01 8.5830E-02 2.1510E-02 1.5960E-02 1.1270E-02 7.7600E-03

1.4740E-02 1.0600E-02 4.6820E-03 4.1770E-02 4.7650E-02 4.8650E-02 4.1450E-03

1.7690E-01 5.3710E-02 9.4340E-02 8.4930E-02 7.4540E-02 5.8360E-02 6.4360E-02

2.5760E-02 2.2320E-02 5.9190E-02 2.7070E-02 6.8370E-03 5.1990E-02 4.2900E-02

2.6230E-02 6.8330E-03 7.1170E-02 8.6710E-02 3.8450E-02 1.0010E-02 5.3450E-02

9.1690E-02 3.4010E-02 1.0200E-02 1.4810E-02 2.1680E-02 1.2230E-02 4.0070E-03

7.7700E-02 3.5710E-02 2.9250E-02 3.9380E-02 4.4470E-02 1.0530E-01 4.1760E-02

7.8250E-03 1.3840E-02 1.4610E-02 1.2380E-02 4.6670E-03 4.3650E-02 1.7020E-02

1.8610E-02 3.2170E-02 2.9900E-02 1.7150E-02 5.3050E-03 2.5760E-02 2.0100E-02

1.5830E-02 7.6140E-03 7.5830E-02 2.4930E-02 2.7150E-02 2.9180E-02 2.6260E-02

1.5310E-02 1.8570E-02 9.4290E-03 3.4010E-02 1.5780E-02 1.3200E-02 3.9230E-03

1.2590E-02 1.0130E-02 6.6410E-03 2.2850E-03 1.7150E-02 1.2580E-02 9.5910E-03

5.7220E-03 1.7210E+00 1.1280E+00 2.0570E-01 2.9040E+00 1.1250E+00 1.9990E+00

1.5440E+00 4.1560E-01 7.6630E-01 1.0160E+00 9.8290E-01 2.4490E-01 8.0510E-01

8.3170E-01 1.8130E-01 1.8180E-01 6.1620E-01 4.8820E-01 3.7430E-01 1.5780E-01

2.2320E-01 1.2990E-01 1.0830E-02 1.2090E-02 1.1640E-02 8.4320E-03 1.1420E-02

7.5380E-03 3.2770E-03 3.1330E-02 1.7910E-02 4.0070E-02 1.7320E-02 8.4620E-02

8.0050E-02 5.3400E-02 8.9160E-02 2.0580E-02 5.5660E-02 3.9440E-02 5.1600E-02

2.5600E-03 2.2950E-02 3.9840E-02 2.0790E-02 1.8600E-02 3.5670E-02 2.5720E-02

1.6090E-02 5.5160E-02 5.7370E-02 3.3120E-02 9.3010E-03 1.5130E-02 4.6740E-02

5.6450E-02 2.3670E-02 4.0080E-03 1.2480E-02 1.3990E-02 9.0780E-03 4.9610E-02

2.7040E-02 3.4170E-02 2.5690E-02 6.9100E-03 4.6720E-02 6.6570E-02 2.9380E-02

3.6500E-03 1.0910E-02 9.7940E-03 9.7670E-03 3.0320E-02 1.7130E-02 1.3290E-02

1.9150E-02 2.2390E-02 1.4340E-02 7.4380E-03 1.0600E-02 1.6190E-02 1.2760E-02

1.1610E-02 5.1880E-02 2.2250E-02 2.8140E-02 1.5610E-02 9.5810E-03 1.6640E-02

1.0880E-02 1.5070E-02 2.5510E-02 1.1070E-02 9.6460E-03 3.9750E-03 7.6350E-03

8.0430E-03 5.0710E-03 2.9920E-03 7.5050E-03 9.9450E-03 8.9690E-03 7.3850E-03

1.1430E+00 3.3360E-02 2.2560E-01 2.1990E+00 8.5350E-01 9.5910E-01 1.2090E+00

2.1620E-01 8.2350E-01 8.0220E-01 6.0580E-02 2.8890E-01 6.1970E-01 4.0450E-01

2.4430E-02 2.5750E-01 3.9800E-01 4.2420E-01 5.9010E-02 1.5670E-01 1.2500E-01

4.5800E-03 8.1890E-03 9.0590E-03 6.9690E-03 7.8990E-03 4.5990E-03 2.2780E-03

2.0880E-02 6.1370E-03 2.0990E-02 2.3490E-02 2.5500E-02 7.2120E-02 5.8250E-02

4.8020E-02 2.7050E-03 2.7270E-02 3.5220E-02 4.6310E-02 1.4740E-04 4.2490E-03

2.1630E-02 3.1060E-02 4.7400E-03 2.0400E-02 2.3470E-02 1.6210E-02 4.4180E-02

2.2950E-02 2.1450E-02 1.3480E-02 4.2930E-03 1.6180E-02 3.7640E-02 3.6550E-02

9.0450E-04 4.6660E-03 9.5590E-03 1.1570E-02 2.2470E-02 3.0870E-02 2.5190E-02

1.2510E-02 6.1610E-04 1.0510E-02 3.9980E-02 4.8610E-02 5.7910E-04 4.7430E-03

7.5540E-03 9.9230E-03 1.6650E-02 1.6780E-02 6.1410E-03 1.1730E-02 1.2010E-02

1.1170E-02 7.2660E-03 3.5220E-03 9.8560E-03 1.0850E-02 9.8850E-03 2.5710E-02

3.0380E-02 1.7810E-02 4.9230E-03 2.3160E-03 1.0190E-02 1.0630E-02 1.1640E-02

1.7010E-02 7.3860E-03 5.2850E-03 3.7730E-03 4.5360E-03 4.7970E-03 3.9980E-03

2.5110E-03 2.5360E-03 6.5150E-03 7.2850E-03 6.1990E-03 6.4280E-03 3.4480E-02

1.6270E-01 1.2440E+00 1.0140E+00 2.8110E-01 1.6490E-02 4.6620E-01 4.4000E-01

1.0900E-02 8.6200E-02 2.2910E-01 3.6010E-01 1.2370E-03 4.1590E-02 2.4290E-01

2.6510E-01 1.6510E-02 7.8400E-02 7.5410E-02 1.5360E-03 4.1710E-03 4.4040E-03

3.7180E-03 4.0450E-03 2.0650E-03 1.1820E-03 1.0450E-02 1.9810E-03 7.2890E-03

1.6200E-02 3.1870E-03 3.6750E-02 4.8760E-02 1.3810E-02 6.5350E-05 4.5480E-03

2.6580E-02 2.4580E-02 1.8990E-05 2.0280E-04 4.3030E-03 2.3900E-02 5.8300E-04

7.7350E-03 1.4600E-02 8.8730E-03 2.5300E-02 5.8870E-03 9.7920E-03 1.0080E-02

1.0090E-03 4.8280E-03 1.2110E-02 2.8420E-02 1.8940E-04 1.0930E-03 4.1520E-03

7.8520E-03 6.5030E-03 2.2860E-02 1.1360E-02 4.8560E-03 3.4810E-05 9.9980E-04

1.0680E-02 3.8140E-02 3.3940E-05 9.0230E-04 4.5860E-03 5.9290E-03 6.9640E-03

1.0820E-02 1.7680E-03 5.8680E-03 4.4960E-03 6.4860E-03 4.3350E-03 1.0230E-03

3.9050E-03 7.0100E-03 5.4540E-03 8.7280E-03 2.3390E-02 6.9370E-03 6.5640E-04

3.3520E-04 3.2160E-03 8.4660E-03 5.3710E-03 8.5050E-03 3.7760E-03 2.0970E-03

2.3530E-03 2.1780E-03 1.9260E-03 2.4300E-03 1.3240E-03 5.7480E-04 3.0730E-03

4.2360E-03 3.3860E-03 3.9400E+00 4.1030E-01 3.1890E-02 5.6700E-03 1.1090E-03

9.1930E+00 1.7600E-01 6.3580E-02 1.9060E+00 4.2500E-01 2.0120E-02 3.1560E-03

2.7720E+00 4.1720E-01 3.2330E-02 2.3200E-03 1.7190E+00 1.8510E-02 1.2650E-02

4.0000E-02 1.8750E-02 7.0710E-03 1.7070E-03 1.2650E-02 5.4350E-03 2.4580E-03

9.9750E-03 3.4970E-02 1.0510E-02 1.8180E-03 1.4200E-01 3.1560E-02 5.6330E-03

6.8070E-04 1.7680E-01 5.6870E-02 1.1560E-02 1.1440E-03 5.3280E-01 1.6490E-01

2.9710E-02 2.6830E-03 1.4700E-01 1.8790E-02 1.0710E-03 6.9410E-05 5.1760E-02

2.5600E-02 9.5140E-03 1.5230E-03 6.8870E-02 5.6420E-02 2.5240E-02 4.3610E-03

2.7770E-01 7.8820E-02 1.9350E-02 2.8620E-03 1.2710E-01 5.3690E-02 1.4960E-02

1.8260E-03 1.1800E-01 7.7060E-02 2.5510E-02 3.5760E-03 4.0220E-01 1.0670E-01

2.2320E-02 2.3610E-03 4.0640E-02 4.0190E-02 3.4320E-02 6.7400E-02 4.5930E-02

1.9980E-02 3.4080E-03 1.9900E-01 4.9680E-02 7.5970E-03 1.3570E-03 4.2960E-02

1.5030E-02 5.8590E-03 1.2740E-03 9.2670E-02 3.8800E-02 9.8080E-03 1.6600E-03

4.8570E-02 4.5130E-02 2.0290E-02 6.9480E-04 7.3170E-02 3.0450E-02 6.6390E-03

6.4940E-04 7.2010E-02 4.5900E-02 1.2960E-02 1.4680E-03 4.7810E+00 6.9730E-01

4.9170E-02 7.7420E-03 3.7380E+00 4.0180E+00 9.8530E-02 8.8680E-01 7.1860E-01

3.4140E-01 1.5290E-02 1.4670E+00 2.8200E+00 3.6620E-01 3.0090E-02 8.1290E-01

6.3860E-01 7.0670E-03 2.3220E-02 1.6020E-02 1.0600E-02 5.6100E-03 8.9610E-03

5.9500E-03 2.3130E-03 8.3140E-03 2.1450E-02 1.2300E-02 5.0150E-03 4.9330E-02

6.9610E-02 2.5750E-02 5.2080E-03 6.8980E-02 6.9780E-02 4.6320E-02 1.0850E-02

1.9150E-01 2.4560E-01 1.4320E-01 2.8020E-02 5.8630E-02 6.4880E-02 1.4700E-02

8.8660E-04 3.3810E-02 2.1330E-02 1.1400E-02 7.1980E-03 5.7840E-02 2.2850E-02

2.5110E-02 2.1910E-02 1.0930E-01 1.3200E-01 5.6530E-02 1.7720E-02 6.9320E-02

4.6590E-02 3.3720E-02 1.3460E-02 8.1320E-02 3.4190E-02 4.8110E-02 2.3360E-02

1.3630E-01 1.7990E-01 8.6230E-02 2.0910E-02 4.0550E-02 4.0460E-02 1.4080E-02

5.2950E-02 2.7830E-02 1.8250E-02 1.4870E-02 8.2160E-02 8.6730E-02 3.9290E-02

6.5690E-03 2.3790E-02 1.9050E-02 7.3240E-03 4.0760E-03 4.6470E-02 3.5320E-02

2.8310E-02 8.8970E-03 4.0480E-02 3.2200E-02 1.2650E-02 1.0200E-02 4.3910E-02

2.4920E-02 1.8150E-02 5.4380E-03 5.1070E-02 1.9080E-02 2.8390E-02 1.1740E-02

4.2290E+00 7.5930E-01 4.6500E-02 1.2770E+00 3.7300E+00 1.2890E+00 3.5370E-01

6.5540E-01 3.8910E-01 1.7080E-01 3.2640E-01 1.6800E+00 1.5330E+00 2.0730E-01

3.4710E-01 6.4570E-01 1.7460E-01 1.2330E-02 1.3330E-02 1.1360E-02 8.0110E-03

6.3790E-03 5.1440E-03 2.4460E-03 6.6510E-03 1.2850E-02 1.1830E-02 6.3680E-03

1.4520E-02 4.5660E-02 4.3060E-02 1.6510E-02 2.2340E-02 5.9510E-02 4.9640E-02

3.1130E-02 5.3000E-02 1.7280E-01 1.6760E-01 9.3320E-02 2.0510E-02 5.0820E-02

3.2470E-02 7.5200E-03 2.0730E-02 1.6550E-02 1.4890E-02 7.3770E-03 3.7740E-02

2.0970E-02 2.0400E-02 2.3260E-02 3.9590E-02 8.9240E-02 8.4090E-02 4.0270E-02

3.2860E-02 4.1650E-02 3.3000E-02 2.4230E-02 4.1480E-02 4.0150E-02 2.9360E-02

3.8520E-02 4.1630E-02 1.2050E-01 1.1810E-01 5.8350E-02 4.0450E-02 2.8870E-02

7.0320E-03 3.6180E-02 2.0910E-02 2.1340E-02 1.2710E-02 2.9530E-02 6.7010E-02

5.1810E-02 2.3720E-02 1.3050E-02 1.4590E-02 1.1250E-02 4.4460E-03 1.9260E-02

3.1360E-02 2.4740E-02 1.9850E-02 3.2380E-02 2.0300E-02 1.2560E-02 1.1210E-02

2.3000E-02 2.3750E-02 1.6660E-02 1.0550E-02 2.7150E-02 2.3770E-02 1.6620E-02

2.0670E-02 3.1640E+00 5.8230E-01 3.4750E-01 2.1600E+00 2.2230E+00 1.1490E-01

4.1840E-01 3.7900E-01 2.5630E-01 5.4590E-02 5.7070E-01 1.4320E+00 7.3680E-01

1.3110E-01 4.3570E-01 3.0870E-01 5.5350E-03 9.6850E-03 1.0140E-02 8.1310E-03

4.2920E-03 3.8590E-03 2.1870E-03 4.9880E-03 7.2010E-03 9.8870E-03 6.4280E-03

3.5950E-03 2.0020E-02 3.7150E-02 2.9120E-02 5.1870E-03 2.9970E-02 4.0500E-02

4.4390E-02 8.7750E-03 8.1850E-02 1.3320E-01 1.4120E-01 6.0170E-03 2.7200E-02

3.3710E-02 1.6570E-02 1.0970E-02 1.3530E-02 1.3680E-02 6.4310E-03 1.9320E-02

2.2480E-02 1.8320E-02 1.6100E-02 1.2100E-02 4.4430E-02 7.3040E-02 5.9680E-02

1.3050E-02 2.9830E-02 2.8680E-02 2.6520E-02 1.6000E-02 3.6210E-02 2.5140E-02

3.4780E-02 9.9310E-03 5.5750E-02 9.7930E-02 9.0440E-02 3.6450E-02 1.5830E-02

4.9380E-03 2.1080E-02 1.9990E-02 1.8610E-02 8.6670E-03 8.4920E-03 3.6690E-02

4.6550E-02 3.6820E-02 6.8070E-03 9.9420E-03 1.0700E-02 5.0450E-03 6.3450E-03

2.0890E-02 2.0860E-02 2.3310E-02 2.4280E-02 1.1120E-02 1.3290E-02 8.6640E-03

1.0330E-02 1.9200E-02 1.5170E-02 1.0770E-02 1.1210E-02 2.2690E-02 1.4100E-02

1.8170E-02 2.0590E+00 7.9990E-02 7.9960E-01 2.2780E+00 2.9000E-02 1.9240E-01

3.2180E-01 2.3570E-01 7.7410E-03 1.1450E-01 6.8850E-01 1.0490E+00 4.2940E-02

2.2190E-01 3.1880E-01 2.3320E-03 6.1680E-03 7.5110E-03 6.1460E-03 2.6770E-03

2.6020E-03 1.7110E-03 3.3250E-03 3.6890E-03 6.8050E-03 5.0570E-03 7.1900E-04

6.2260E-03 2.0740E-02 3.2240E-02 6.3730E-04 1.0310E-02 2.8830E-02 4.1630E-02

3.8630E-05 2.2530E-02 8.0760E-02 1.3990E-01 1.3790E-03 1.0730E-02 2.3680E-02

1.9880E-02 4.9530E-03 1.0370E-02 8.9700E-03 5.1970E-03 7.3730E-03 1.9730E-02

1.5760E-02 7.9490E-03 3.0480E-03 1.7580E-02 4.3710E-02 6.1240E-02 3.9940E-03

1.7090E-02 2.3600E-02 2.1220E-02 4.2200E-03 2.1920E-02 2.7080E-02 2.1550E-02

1.4920E-03 1.8230E-02 6.0860E-02 9.2740E-02 2.7680E-02 6.5040E-03 4.0120E-03

1.0130E-02 1.7920E-02 1.2070E-02 5.4490E-03 2.2440E-03 1.4420E-02 3.2150E-02

3.7080E-02 3.2540E-03 6.3970E-03 7.1830E-03 4.8910E-03 1.8680E-03 9.6920E-03

1.7140E-02 1.9190E-02 1.6190E-02 5.1310E-03 1.1550E-02 5.3420E-03 3.8200E-03

1.2400E-02 1.3080E-02 7.6760E-03 3.3750E-03 1.4650E-02 1.5760E-02 1.0330E-02

2.2390E-02 1.4010E-01 1.4180E+00 5.2200E-03 5.7800E-02 1.8960E-01 1.3670E-01

9.5790E-04 1.5980E-02 1.4790E-01 7.6410E-01 1.1520E-02 8.1300E-02 1.9900E-01

7.1130E-04 2.8000E-03 3.9770E-03 3.3600E-03 1.2870E-03 1.2080E-03 9.4170E-04

1.6630E-03 1.4890E-03 3.6270E-03 1.9660E-03 1.0670E-04 1.3740E-03 7.3050E-03

2.1000E-02 7.5420E-06 1.5470E-03 1.3590E-02 2.3510E-02 4.2260E-06 7.7040E-05

3.5170E-02 8.6290E-02 2.2890E-04 2.9090E-03 1.1230E-02 1.3470E-02 1.7120E-03

5.7430E-03 3.9730E-03 2.9280E-03 1.8170E-03 1.1430E-02 9.5340E-03 2.6240E-03

4.4180E-04 6.0030E-03 1.7660E-02 3.8850E-02 7.6080E-04 7.1180E-03 1.3530E-02

1.1030E-02 5.0310E-04 8.6050E-03 1.9230E-02 9.1300E-03 1.5740E-05 3.6280E-03

2.2510E-02 5.8500E-02 1.4960E-02 1.6490E-03 2.4060E-03 3.6580E-03 1.0950E-02

5.4580E-03 2.7190E-03 5.6520E-04 3.4190E-03 1.5750E-02 2.3070E-02 1.2160E-03

3.2450E-03 3.2960E-03 3.2430E-03 2.2480E-04 2.7880E-03 1.0210E-02 1.0510E-02

8.0940E-03 1.8160E-03 6.7650E-03 2.4320E-03 1.0590E-03 5.7570E-03 7.9420E-03

3.7300E-03 6.1160E-04 6.2280E-03 1.1430E-02 3.7850E-03 1.1020E+00 2.4440E-01

8.3330E-01 3.4650E-01 1.0920E-01 2.0530E-02 2.1550E+00 7.1710E-01 1.9010E-01

4.6770E-02 2.3080E+00 1.1700E-01 3.0550E-02 2.1840E-02 1.4270E-02 7.5870E-03

3.1300E-03 1.3160E-02 1.0990E-02 5.3030E-03 3.4290E-02 7.4940E-02 4.9440E-02

2.6210E-02 1.8950E-01 1.0450E-01 4.8190E-02 1.5140E-02 2.2270E-01 9.1790E-02

2.9900E-02 6.1330E-03 1.1010E-03 1.1300E-03 7.9970E-04 3.3150E-04 2.0160E-02

8.5640E-03 3.1040E-03 8.3580E-04 7.8400E-02 2.2820E-02 5.9800E-03 1.6360E-03

3.9660E-02 3.5970E-02 3.2360E-02 2.5160E-02 8.4720E-02 7.7710E-02 4.7280E-02

1.7660E-02 1.3700E-01 6.0260E-02 2.7450E-02 1.1240E-02 8.1960E-02 5.9860E-02

3.2990E-02 1.1690E-02 8.0140E-03 3.5880E-03 1.3750E-03 3.7060E-04 6.3140E-02

2.9860E-02 1.1720E-02 1.2270E-01 7.1890E-02 2.6880E-02 4.8310E-03 4.1570E-02

4.4660E-02 4.6970E-02 4.0250E-02 1.4970E-02 6.0430E-03 2.2550E-03 7.3500E-04

1.2520E-02 9.4980E-03 5.8020E-03 3.2290E-03 2.4020E-02 3.0650E-02 3.2520E-02

2.0350E-02 4.1450E-02 4.9100E-02 4.0860E-02 2.2740E-02 6.5270E-02 5.4550E-02

3.4480E-02 1.7140E-02 9.0410E-01 2.8960E-01 3.2330E-01 2.4030E-01 1.2230E-01

2.9470E-01 1.0770E+00 7.2020E-01 2.3550E-01 3.8750E-01 1.3820E+00 7.1830E-02

1.2180E-02 8.0050E-03 7.8370E-03 7.2060E-03 1.1960E-02 5.8780E-03 4.2660E-03

2.5720E-02 5.5660E-02 4.1260E-02 1.6440E-02 6.8630E-02 7.2130E-02 6.8670E-02

5.8550E-02 2.6950E-02 1.0490E-01 8.9130E-02 4.1950E-02 9.8400E-04 2.2880E-04

4.9180E-04 8.7370E-04 7.2040E-03 7.5470E-03 6.0350E-03 2.7290E-03 1.5620E-02

3.9920E-02 2.1100E-02 5.4520E-03 3.5330E-02 3.3440E-02 2.1200E-02 9.8170E-03

7.3320E-02 1.5070E-02 2.8840E-02 5.3300E-02 3.7990E-02 7.4610E-02 4.8760E-02

2.2380E-02 4.9870E-02 2.3520E-02 2.8810E-02 3.8150E-02 1.3430E-03 3.7760E-03

3.2430E-03 1.7140E-03 3.7420E-02 2.8320E-02 1.4410E-02 6.7860E-02 3.0350E-02

3.9470E-02 3.0730E-02 4.6040E-02 4.9110E-02 2.7280E-02 7.6980E-03 5.0050E-03

6.8470E-03 4.3650E-03 1.7880E-03 8.1020E-03 4.3830E-03 4.7890E-03 5.6620E-03

1.8010E-02 3.4410E-02 2.0130E-02 8.1000E-03 5.2720E-02 3.3050E-02 2.0100E-02

9.7240E-03 5.2010E-02 2.3430E-02 2.5600E-02 2.7590E-02 5.4640E-02 2.0990E-01

2.3550E-01 1.4940E-01 4.8580E-02 2.0450E-01 5.8270E-01 7.1240E-01 6.6970E-02

3.4230E-01 8.1840E-01 3.6130E-03 7.9360E-03 6.8470E-03 4.8020E-03 8.0300E-03

5.2410E-03 1.4200E-03 1.7150E-02 3.8520E-02 2.2680E-02 1.3360E-02 9.7420E-03

4.6630E-02 6.1850E-02 6.0360E-02 1.2910E-03 1.8440E-02 6.0210E-02 9.5300E-02

1.8070E-04 6.4710E-04 5.8790E-04 2.2920E-04 2.0130E-03 4.8990E-03 5.7190E-03

3.3230E-03 3.6610E-03 1.0830E-02 2.1980E-02 1.7620E-02 3.2020E-02 1.6140E-02

1.0590E-02 7.6280E-03 1.2490E-02 4.9320E-02 3.7560E-02 1.4300E-02 1.3330E-02

2.3480E-02 3.8670E-02 4.0980E-02 8.0420E-03 3.3650E-02 3.1450E-02 2.0100E-02

1.5730E-04 8.6650E-04 2.2460E-03 3.3230E-03 1.8880E-02 2.1150E-02 1.3060E-02

1.3110E-02 4.9190E-02 3.5510E-02 1.5370E-02 5.1720E-02 1.7820E-02 9.3510E-03

8.3910E-03 1.6270E-03 3.3150E-03 4.1840E-03 2.8790E-03 2.1240E-03 5.2340E-03

4.7000E-03 3.0530E-03 1.2010E-02 2.8910E-02 9.9860E-03 2.8680E-03 4.4610E-02

2.1910E-02 8.3970E-03 2.2000E-03 2.0480E-02 3.2280E-02 2.2580E-02 1.0410E-02

1.8170E+00 3.5810E-01 5.3900E-02 6.5610E+00 2.3910E+00 5.1820E-01 9.1020E-02

2.0580E+00 8.9170E-01 4.6220E-02 2.4470E-01 1.8120E-01 7.1760E-02 2.6630E-02

7.0660E-02 2.6580E-02 9.5840E-03 5.1920E-02 1.0600E-01 3.9190E-02 6.0360E-03

1.6600E-01 7.0880E-02 2.6750E-02 6.9300E-03 6.9520E-02 3.6470E-02 1.5500E-02

4.0440E-03 6.4610E-02 2.3770E-02 6.9460E-03 1.5310E-03 2.6770E-01 7.7880E-02

1.5420E-02 1.7200E-03 1.8990E-01 4.8490E-02 1.9590E-02 8.3980E-03 1.9160E-01

6.6300E-02 1.9910E-02 4.9330E-03 9.8040E-02 3.5300E-02 1.0750E-02 2.7160E-03

1.8070E-01 6.4720E-02 2.0660E-02 6.0110E-03 6.7130E-02 2.6800E-02 8.3150E-03

1.7230E-03 3.7290E-02 1.6690E-02 5.4530E-03 1.1260E-03 5.9900E-02 2.6670E-02

2.2670E-03 6.3560E-02 2.9500E-02 1.3930E-02 4.9760E-03 4.3680E-02 1.7700E-02

6.7220E-03 2.1090E-03 3.1930E-02 1.9740E-02 9.1890E-03 2.5320E-03 1.7060E-02

7.6710E-03 2.6000E-03 9.1330E-04 1.2750E-02 9.1990E-03 4.7280E-03 1.5110E-03

1.2800E-02 6.2100E-03 3.1950E-03 1.3410E-03 1.5220E-02 6.3310E-03 2.0690E-03

4.5520E-04 1.5100E+00 3.6790E-01 1.7960E+00 2.5480E+00 2.2560E+00 6.0370E-01

1.1600E+00 4.6930E-01 6.1480E-01 1.1200E-01 7.5170E-02 5.4820E-02 6.4980E-02

3.7060E-02 3.1210E-02 1.2350E-02 3.8910E-02 5.4720E-02 3.4330E-02 2.4410E-02

4.7780E-02 7.4190E-02 5.1830E-02 2.9830E-02 2.4910E-02 2.6860E-02 2.4720E-02

1.7620E-02 9.1370E-03 3.2400E-02 2.2870E-02 8.4270E-03 7.7290E-02 1.1280E-01

6.2630E-02 1.6960E-02 4.8340E-02 1.0630E-01 3.4110E-02 9.9720E-03 4.8340E-02

8.9250E-02 5.3640E-02 2.1350E-02 2.0080E-02 4.9480E-02 3.0800E-02 1.2010E-02

4.7850E-02 8.4540E-02 5.1460E-02 2.0870E-02 1.6230E-02 2.9180E-02 2.2490E-02

9.7690E-03 9.9730E-03 1.4770E-02 1.4330E-02 6.4120E-03 3.5040E-02 1.3580E-02

1.8130E-02 2.9490E-02 3.0240E-02 1.5710E-02 9.0220E-03 1.3870E-02 1.9790E-02

1.2530E-02 6.6860E-03 1.9740E-02 1.1720E-02 8.7590E-03 7.0350E-03 5.2590E-03

7.0970E-03 6.1310E-03 2.8460E-03 9.5620E-03 5.7930E-03 3.4090E-03 2.3770E-03

6.2090E-03 5.8820E-03 3.7460E-03 1.6970E-03 5.0170E-03 6.1260E-03 4.6380E-03

2.2810E-03 9.7350E-01 1.4330E-01 1.7980E+00 1.1410E+00 1.7250E+00 4.3430E-01

6.4170E-01 4.2380E-01 3.9950E-02 9.2500E-02 4.7540E-02 3.5920E-02 1.8490E-02

2.1440E-02 1.2920E-02 2.5920E-02 2.2140E-02 3.2190E-02 2.1330E-02 1.1270E-02

3.1300E-02 5.0640E-02 4.2500E-02 5.3210E-03 1.6380E-02 1.9220E-02 2.1750E-02

5.3870E-04 8.4300E-03 2.0230E-02 1.9110E-02 1.5240E-02 6.2510E-02 6.2500E-02

4.0230E-02 1.9540E-02 3.4720E-02 5.9260E-02 1.8740E-02 1.0390E-02 3.7260E-02

5.4520E-02 4.0330E-02 3.1220E-03 1.6440E-02 3.0440E-02 2.4600E-02 1.1410E-02

3.6240E-02 5.0720E-02 3.8200E-02 2.2960E-03 1.3300E-02 1.7010E-02 1.8320E-02

6.0180E-04 8.9610E-03 8.1690E-03 1.2070E-02 1.3780E-02 1.8720E-02 1.2200E-02

1.3920E-02 1.5700E-02 1.9110E-02 7.2460E-03 4.1850E-03 9.0600E-03 1.2650E-02

9.0580E-03 9.1890E-03 8.7560E-03 9.9680E-03 3.6770E-03 1.0720E-03 4.2110E-03

4.0890E-03 4.8470E-03 6.3760E-03 3.0650E-03 2.9270E-03 1.7280E-03 3.1960E-03

3.7460E-03 3.0670E-03 1.8300E-03 1.1180E-03 3.6200E-03 3.8020E-03 3.5030E-03

3.5370E-02 1.1540E-01 1.2360E+00 1.0170E+00 8.4290E-02 5.0050E-01 1.6400E-01

1.3780E-02 2.8370E-02 2.4700E-02 2.3920E-02 7.6480E-03 1.0040E-02 8.7960E-03

1.2960E-02 6.2310E-03 2.0180E-02 1.1130E-02 9.6810E-04 1.1510E-02 2.1540E-02

3.3570E-02 7.0180E-05 5.7830E-03 1.1840E-02 1.3610E-02 8.2320E-05 6.6920E-04

5.9720E-03 1.7830E-02 1.7200E-03 1.6820E-02 4.0170E-02 3.1310E-02 8.3980E-03

9.9190E-03 1.8800E-02 2.8770E-02 1.8670E-03 9.4030E-03 2.4590E-02 3.4730E-02

6.3310E-04 2.6610E-03 1.1140E-02 2.2680E-02 2.6160E-03 9.5610E-03 2.3630E-02

3.2570E-02 1.9650E-04 2.3460E-03 9.1740E-03 1.3540E-02 8.0840E-05 5.5940E-04

6.2830E-03 7.8600E-03 3.1040E-03 1.4620E-02 4.4270E-03 4.9760E-03 9.0200E-03

7.2440E-03 6.8380E-03 9.1240E-04 3.5610E-03 5.8050E-03 7.4390E-03 2.5320E-03

7.0350E-03 3.6770E-03 2.3380E-03 3.0780E-04 7.8100E-04 2.8190E-03 3.2440E-03

3.1880E-03 1.2390E-03 1.8030E-03 8.1720E-04 1.3410E-03 1.6970E-03 1.8300E-03

1.1680E-03 1.2740E-04 1.1260E-03 2.3980E-03 2.3640E-03 2.4550E+00 3.2620E-01

3.9680E-02 7.6360E+00 3.4180E-01 1.6450E-01 2.7560E-01 1.3380E-01 5.0520E-02

2.2080E-02 4.8620E-02 2.3000E-02 5.1720E-03 3.8370E-03 3.5200E-02 7.3130E-03

1.9550E-03 9.7630E-02 3.7980E-02 1.2680E-02 2.3940E-03 6.1560E-02 2.6510E-02

1.1090E-02 2.6260E-03 7.2750E-02 3.0250E-02 1.0190E-02 1.7620E-03 1.4250E-01

4.5900E-02 6.5730E-03 1.0060E-03 1.4300E-01 5.0310E-02 1.1450E-02 1.8540E-03

4.2950E-02 1.8090E-02 7.2760E-03 2.1800E-03 8.1100E-02 3.1170E-02 9.3900E-03

1.8030E-03 2.0400E-01 5.4740E-02 1.4510E-02 2.0790E-03 9.3070E-02 2.7170E-02

7.2890E-03 1.4550E-03 1.7880E-01 5.8490E-02 1.6310E-02 3.1400E-03 9.1540E-02

2.4370E-02 1.3760E-02 4.1290E-02 2.1360E-02 7.8890E-03 1.6740E-03 5.9230E-02

2.0910E-02 6.6650E-03 1.7590E-03 1.6980E-02 7.0060E-03 2.2300E-03 4.3300E-04

2.2480E-02 1.0560E-02 3.6720E-03 9.6080E-04 1.9820E-02 1.8450E-02 6.4620E-03

2.5080E-03 2.0580E-02 1.0140E-02 3.5950E-03 6.3410E-04 2.4360E-02 1.2470E-02

5.8380E-03 2.1140E-03 2.5270E+00 3.7350E-01 2.6740E+00 3.6740E+00 1.4030E-01

9.7070E-02 1.8030E-01 1.1210E-01 4.0820E-02 3.2420E-02 1.6860E-02 1.2670E-02

3.0690E-03 1.6510E-02 1.5350E-02 3.7930E-03 3.3190E-02 4.5430E-02 2.8460E-02

1.4030E-02 2.0920E-02 3.1070E-02 1.7610E-02 1.2100E-02 2.1540E-02 3.4410E-02

2.4520E-02 1.1680E-02 5.8000E-02 5.1790E-02 4.0350E-02 6.1990E-03 6.1950E-02

5.6490E-02 3.6450E-02 1.0820E-02 1.8080E-02 2.0290E-02 1.1370E-02 6.7360E-03

2.6510E-02 3.6520E-02 2.5680E-02 1.0110E-02 5.4680E-02 1.0720E-01 4.2390E-02

1.6130E-02 2.1580E-02 5.0260E-02 2.3630E-02 8.0420E-03 4.1520E-02 8.6430E-02

5.2550E-02 1.8340E-02 4.6690E-02 4.9270E-02 8.6000E-03 2.4250E-02 1.5710E-02

1.0950E-02 6.8270E-03 2.0920E-02 2.7840E-02 1.5730E-02 6.5120E-03 8.3460E-03

6.6270E-03 4.1640E-03 1.9830E-03 9.2800E-03 9.1540E-03 7.8680E-03 3.8600E-03

1.5860E-02 1.0500E-02 8.4720E-03 2.9090E-03 1.1630E-02 7.6310E-03 5.3440E-03

3.2670E-03 1.2470E-02 1.0480E-02 6.7880E-03 5.1870E-03 1.9520E+00 8.1310E-01

2.6250E+00 1.4360E+00 4.7010E-02 7.0980E-02 1.3730E-01 8.3390E-02 1.8200E-02

1.6900E-02 1.1060E-02 2.3020E-03 7.4050E-03 1.2170E-02 7.1290E-03 9.0080E-03

2.3520E-02 3.2610E-02 2.4870E-02 7.2760E-03 1.2570E-02 2.4760E-02 1.6770E-02

4.5480E-03 1.6920E-02 2.5000E-02 2.2550E-02 1.5670E-02 4.8970E-02 2.5580E-02

2.7340E-02 2.1120E-02 4.5410E-02 3.3910E-02 2.3760E-02 7.2740E-03 1.1360E-02

1.4740E-02 8.9740E-03 6.4320E-03 2.1680E-02 2.4050E-02 2.1540E-02 1.4500E-02

4.2350E-02 7.4310E-02 3.4080E-02 4.8580E-03 1.8040E-02 3.5010E-02 1.9730E-02

7.8320E-03 3.6220E-02 6.0580E-02 4.5200E-02 2.7110E-02 3.3950E-02 1.7040E-02

1.1300E-02 1.2770E-02 1.2580E-02 6.3950E-03 6.6650E-03 1.5730E-02 1.8530E-02

1.2260E-02 3.4610E-03 5.1180E-03 4.6700E-03 2.5780E-03 2.7010E-03 6.8470E-03

6.4030E-03 6.7790E-03 1.1900E-02 6.0780E-03 6.6660E-03 3.7350E-03 5.3170E-03

6.4820E-03 5.9920E-03 3.2210E-03 5.8360E-03 6.7860E-03 7.9830E-03 5.1740E-03

2.5620E-01 9.3570E-01 2.0500E+00 2.1390E-02 3.9750E-02 6.0340E-02 4.2550E-02

8.5920E-03 1.5150E-02 6.9330E-03 1.5340E-03 3.1430E-03 6.7630E-03 7.8610E-03

1.1770E-03 9.8060E-03 2.0070E-02 2.8960E-02 8.4640E-04 7.8310E-03 1.1610E-02

2.0610E-02 1.3520E-04 5.1970E-03 1.4680E-02 2.6040E-02 3.1120E-03 1.7750E-02

3.7270E-02 2.0240E-02 5.2990E-03 2.2200E-02 3.3850E-02 2.1320E-02 2.1800E-03

6.7340E-03 8.8810E-03 1.0110E-02 9.5030E-04 6.6300E-03 1.7940E-02 2.4200E-02

2.0780E-03 1.6130E-02 3.4070E-02 5.7600E-02 7.8380E-04 5.1690E-03 1.4620E-02

3.1120E-02 1.0790E-03 8.3890E-03 2.9540E-02 6.0860E-02 1.6260E-02 1.4350E-02

2.0970E-02 3.9250E-03 1.0690E-02 8.8660E-03 5.0990E-03 1.7600E-03 6.5120E-03

1.2260E-02 1.4860E-02 1.0590E-03 3.4160E-03 3.6960E-03 2.2370E-03 5.7490E-04

2.7410E-03 5.6640E-03 5.8910E-03 7.9300E-03 3.3440E-03 4.0040E-03 3.5970E-03

1.6470E-03 5.2200E-03 4.6060E-03 2.5760E-03 2.1130E-03 5.1860E-03 5.1730E-03

4.8690E-03 3.1560E-01 7.6060E-02 7.8900E-02 4.6000E-02 2.5630E-02 1.3520E-02

1.3790E-01 7.0680E-02 1.2370E-02 1.7000E-02 3.3360E-02 1.4430E-02 6.8720E-03

2.4030E-02 1.5010E-02 8.1170E-03 3.3840E-03 1.2280E-02 7.1260E-03 4.0160E-03

1.4380E-03 2.9440E-03 2.1310E-03 1.3440E-03 5.2060E-04 4.2520E-02 2.1170E-02

8.7490E-03 2.6950E-03 6.5710E-02 4.1700E-02 1.7440E-02 3.8430E-03 1.9460E-02

1.6050E-02 1.1610E-02 7.4540E-03 3.5030E-02 2.3750E-02 1.3350E-02 5.6180E-03

1.0960E-01 4.3300E-02 1.5340E-02 5.4050E-03 2.9800E-02 2.0180E-02 1.2470E-02

7.0900E-03 8.5030E-03 4.1390E-03 1.7960E-03 5.6560E-04 1.2800E-01 2.7290E-02

7.9560E-03 8.8840E-02 3.5060E-02 1.2410E-02 3.9440E-03 9.3610E-02 4.5800E-02

2.3110E-02 1.1730E-02 3.3840E-02 1.7710E-02 6.8590E-03 1.4580E-03 8.4910E-03

6.4850E-03 4.1380E-03 2.1870E-03 2.9560E-02 2.3090E-02 1.2600E-02 7.2320E-03

1.2670E-02 1.0470E-02 7.1120E-03 3.4490E-03 1.3630E-02 8.9170E-03 5.2250E-03

2.6800E-03 2.0210E-01 2.8830E-02 3.3750E-02 2.8160E-02 1.8680E-02 6.9210E-02

2.7060E-02 5.0580E-02 1.1340E-02 1.4410E-02 1.6490E-02 5.3250E-03 8.8190E-03

9.1010E-03 8.5360E-03 8.6930E-03 2.8340E-03 4.5630E-03 4.7010E-03 4.1080E-03

1.2430E-03 5.9180E-04 1.1130E-03 1.3760E-03 1.4740E-02 1.5040E-02 1.2820E-02

7.4210E-03 3.4330E-02 1.2260E-02 2.0950E-02 1.7780E-02 1.3410E-02 1.0110E-02

7.8210E-03 5.3100E-03 1.5650E-02 9.8620E-03 1.1930E-02 1.4350E-02 1.0730E-02

5.1220E-02 3.8170E-02 1.5930E-02 1.3030E-02 1.1770E-02 1.1320E-02 1.0290E-02

8.6140E-04 3.5200E-03 3.3710E-03 2.1930E-03 2.7290E-02 6.5530E-02 1.6040E-02

1.8580E-02 3.8610E-02 2.5620E-02 1.0190E-02 2.1620E-02 4.5020E-02 3.3700E-02

1.6580E-02 1.3480E-02 7.3960E-03 1.0490E-02 7.4170E-03 4.8000E-03 2.6880E-03

3.0590E-03 3.6500E-03 1.9700E-02 1.2600E-02 1.3480E-02 3.1010E-03 9.6750E-03

6.0490E-03 4.3490E-03 2.4490E-03 6.2170E-03 5.2310E-03 4.8230E-03 4.1770E-03

9.5980E-03 1.3990E-02 1.6430E-02 1.4650E-02 1.2340E-02 5.0010E-02 1.1130E-02

5.6690E-03 6.8490E-03 5.3240E-03 6.0150E-03 8.6190E-04 5.1200E-03 5.8620E-03

5.7480E-03 1.1590E-04 1.6990E-03 2.8230E-03 3.2810E-03 1.2110E-04 7.0840E-04

8.2280E-04 6.5040E-04 2.8180E-03 8.8530E-03 8.5160E-03 4.9710E-03 2.6340E-03

2.2530E-02 1.3240E-02 3.6920E-03 6.3600E-03 5.4180E-03 3.9180E-03 2.4200E-03

1.1970E-03 9.3880E-03 9.2060E-03 5.9680E-03 3.2270E-03 5.4360E-03 2.1270E-02

2.7440E-02 3.4740E-03 6.7310E-03 7.0570E-03 5.8210E-03 5.8230E-05 5.0600E-04

1.6950E-03 2.6540E-03 7.9540E-03 1.6040E-02 2.9880E-02 4.5270E-03 1.0410E-02

1.7930E-02 1.3620E-02 8.8470E-03 9.4520E-03 1.8370E-02 2.1360E-02 9.5770E-04

9.1040E-03 6.2800E-03 2.4770E-03 8.8960E-04 2.6580E-03 2.2680E-03 1.2610E-03

9.8520E-03 7.2300E-03 3.1010E-03 4.0570E-03 4.5020E-03 3.7470E-03 2.0570E-03

8.8040E-04 1.7960E-03 3.2100E-03 2.9750E-03 2.0940E-03 5.3380E+00 5.3870E-01

1.5110E-01 2.0180E+00 2.9030E-01 5.0160E-02 2.6140E-02 4.1430E-02 1.5580E-02

3.1860E-03 1.2240E+00 1.3690E-01 1.9520E-02 2.7690E-03 1.4050E-01 4.3220E-02

1.1690E-02 1.7360E-03 1.4770E-01 5.1320E-02 1.2970E-02 1.4290E-03 1.4910E-01

2.8600E-02 1.0410E-02 3.4500E-03 2.7640E-01 3.7830E-02 1.1980E-02 2.8590E-03

4.1330E-01 7.5230E-02 1.5320E-02 3.2420E-03 3.3380E-01 6.4350E-02 1.4440E-02

2.5010E-03 8.6900E-01 1.1720E-01 1.3570E-02 2.4920E-03 1.1830E+00 1.6990E-01

2.8420E-02 4.8710E-03 1.3180E-01 5.1110E-02 1.5500E-02 2.7280E-03 2.9790E-02

9.4010E-03 1.4060E-03 4.4500E-02 1.3630E-02 4.0860E-03 1.1930E-03 1.1860E-01

3.5420E-02 1.4480E-02 4.1190E-03 1.3670E+01 3.9850E-01 6.0990E-02 2.5860E-02

2.9810E+01 3.6660E+00 3.2370E-01 4.1530E-02 8.2990E-02 5.4590E-02 2.5910E-02

3.2210E-03 5.4570E+00 1.7720E-01 8.1860E-03 3.2720E-03 1.7110E+01 2.1490E+00

1.0440E-01 1.0430E-02 5.9740E+00 5.1640E-01 8.5590E-01 8.7320E-01 1.6350E-01

2.0910E-02 2.4500E-02 1.5030E-02 8.0320E-03 5.1620E-02 9.0330E-01 1.5280E-01

2.2160E-02 2.9270E-02 6.9170E-02 3.8850E-02 1.3570E-02 4.4670E-02 7.3490E-02

6.6940E-02 1.5180E-02 3.7660E-02 8.0090E-02 1.7590E-02 6.5940E-03 6.3460E-02

1.6090E-01 2.4650E-02 9.8760E-03 7.2780E-02 2.4010E-01 6.7980E-02 1.6400E-02

3.7030E-02 2.1590E-01 6.5200E-02 1.6540E-02 1.1400E-01 5.4760E-01 1.2820E-01

1.4790E-02 6.7410E-02 8.6570E-01 1.7880E-01 3.2220E-02 3.8730E-02 6.1930E-02

4.2940E-02 1.7660E-02 1.6280E-02 1.0690E-02 5.5010E-03 1.7490E-02 2.1320E-02

9.9620E-03 2.8430E-03 3.5220E-02 6.4810E-02 2.3710E-02 1.3590E-02 2.3390E+00

8.8780E+00 3.6970E-01 3.6440E-02 1.2230E+00 2.1220E+01 4.2830E+00 3.8120E-01

6.6380E-02 3.6120E-02 1.5520E-02 1.6480E-02 8.1130E-01 3.5120E+00 1.8320E-01

5.2670E-03 2.1350E+00 1.0750E+01 2.5190E+00 1.2610E-01 4.5000E+00 3.2520E-01

6.8860E-01 4.0430E-01 1.5690E-02 1.2760E-02 1.4210E-02 8.7300E-03 9.4380E-03

4.6500E-02 6.7170E-01 1.2070E-01 5.5300E-03 2.4800E-02 4.9190E-02 3.3590E-02

1.5590E-03 4.4300E-02 4.9710E-02 5.7050E-02 1.4330E-02 2.9280E-02 5.3260E-02

1.0380E-02 1.9170E-02 5.4420E-02 1.0510E-01 1.5360E-02 1.5320E-02 6.5520E-02

1.6370E-01 5.1590E-02 8.7590E-03 3.3360E-02 1.7630E-01 5.4270E-02 1.3130E-02

1.2770E-01 3.9220E-01 9.7910E-02 1.4940E-02 6.8670E-02 6.6910E-01 1.4450E-01

7.9540E-03 3.2120E-02 4.3010E-02 3.7860E-02 7.7600E-03 1.0070E-02 6.6710E-03

6.6750E-03 1.3220E-02 1.3600E-02 6.1190E-03 1.4410E-02 2.3690E-02 4.7510E-02

1.8580E-02 2.3260E-01 2.4660E+00 5.6710E+00 2.4550E-01 9.9630E-02 1.4130E+00

1.5430E+01 3.3300E+00 4.9800E-02 1.9090E-02 1.8190E-02 1.4190E-02 7.8860E-02

9.5110E-01 2.2250E+00 1.2680E-01 9.8550E-02 2.5170E+00 7.1330E+00 1.9080E+00

1.1200E-01 3.5400E-01 4.7910E-01 1.0460E-02 5.6460E-03 1.0670E-02 7.0620E-03

1.3660E-03 1.0200E-02 3.7280E-02 5.1550E-01 1.7050E-04 6.3210E-03 2.0640E-02

5.1670E-02 8.6270E-05 1.8940E-03 3.4970E-02 5.5900E-02 6.3170E-03 1.1980E-02

2.1340E-02 3.0220E-02 6.1170E-03 1.8960E-02 4.1260E-02 6.4110E-02 3.2410E-03

1.6400E-02 5.2030E-02 1.2800E-01 1.1650E-03 9.8110E-03 2.7030E-02 1.5740E-01

2.4360E-03 1.4690E-02 9.7030E-02 2.9170E-01 2.4180E-03 1.6540E-02 5.5160E-02

5.2930E-01 7.1470E-04 8.8570E-03 2.6730E-02 4.4300E-02 2.9710E-03 7.7520E-03

5.5780E-03 2.3950E-03 5.8280E-03 9.4530E-03 7.5850E-03 4.1130E-03 1.3570E-02

1.8570E-02 3.2740E-02 5.0260E-02 2.6560E-01 1.8670E+00 3.5240E+00 2.3100E-02

1.0510E-01 1.0790E+00 1.2270E+01 3.3190E-02 7.6340E-03 2.0040E-02 7.2490E-03

7.2970E-03 9.9330E-02 7.2810E-01 1.4620E+00 8.7210E-03 1.2520E-01 1.9060E+00

5.7180E+00 1.8160E+00 1.9570E-01 6.2190E-01 5.5450E-01 2.5280E-01 1.1970E-02

4.3260E-02 2.1880E-02 1.0340E-02 4.7570E-03 1.2290E-02 6.6720E-03 3.2310E-03

1.1890E-03 1.7990E-02 9.2190E-03 4.1590E-03 1.4210E-03 6.6380E-02 4.9830E-02

3.7970E-02 2.1400E-02 3.3880E-01 9.2580E-02 2.1340E-02 5.8490E-03 4.5650E-02

2.5550E-02 1.3360E-02 6.0230E-03 3.1400E-02 1.7380E-02 9.5400E-03 4.8980E-03

3.6230E-02 2.1480E-02 1.0720E-02 4.5390E-03 4.6430E-02 2.2960E-02 1.0280E-02

4.1550E-03 2.9010E-02 1.7220E-02 8.1940E-03 3.5890E-03 8.0900E-01 3.5470E-01

9.8920E-03 5.2980E-01 1.4510E-01 3.0790E-02 5.4380E-03 7.1020E-02 5.1620E-02

2.9510E-02 1.3030E-02 1.0660E+01 2.6560E+00 4.8380E-01 6.4630E-02 4.0780E-01

1.9990E-01 9.7660E-02 4.9390E-02 5.5650E+00 8.3800E+00 3.6220E+00 8.9190E-02

9.1430E+00 2.2590E+00 3.1890E-01 1.7380E-02 6.0690E-02 2.5080E-02 9.6880E-03

3.5830E-03 1.4490E+00 4.1190E-01 2.4880E-01 8.3100E-02 2.1510E-01 8.1220E-03

1.8090E-02 1.6310E-02 1.0690E-02 2.3790E-03 4.9470E-03 4.7300E-03 3.8050E-03

2.2280E-03 7.0740E-03 7.2880E-03 5.3090E-03 4.4080E-02 4.4880E-02 2.2500E-02

6.2460E-03 1.9460E-02 1.7540E-01 9.3310E-02 1.9190E-02 1.5790E-02 1.7280E-02

1.5750E-02 1.1710E-02 8.0800E-03 1.3990E-02 1.2210E-02 8.0320E-03 1.2870E-02

1.3520E-02 1.2390E-02 9.9770E-03 8.0750E-03 1.8920E-02 1.7280E-02 1.1560E-02

6.8650E-03 1.0930E-02 1.1150E-02 9.8800E-03 3.5310E-01 1.1230E-01 3.1620E-01

3.0920E-02 2.6490E-01 1.4580E-01 3.3910E-02 4.0060E-02 2.0620E-02 2.3980E-02

2.6350E-02 2.6430E-01 5.3400E+00 2.8080E+00 5.4140E-01 7.0920E-02 1.8310E-01

1.5640E-01 9.0070E-02 3.7020E+00 3.6000E+00 1.2670E+00 3.2230E+00 1.8830E-01

4.5250E+00 2.4140E+00 4.8010E-01 8.2390E-03 2.6940E-02 2.0860E-02 1.0020E-02

2.0480E-01 1.1920E-02 2.1320E-01 4.4550E-02 1.4880E-03 4.3730E-03 8.9290E-03

1.1430E-02 1.2360E-04 1.4190E-03 2.7080E-03 3.6990E-03 3.3500E-05 1.1950E-03

3.6640E-03 5.8790E-03 2.9840E-02 1.1030E-02 1.0070E-02 6.5970E-03 7.4890E-03

8.6410E-03 7.0220E-02 6.7190E-02 3.5750E-03 8.6570E-03 9.9160E-03 8.1350E-03

2.2760E-03 4.1150E-03 6.5050E-03 7.9110E-03 1.5690E-03 7.2640E-03 7.9390E-03

6.5420E-03 1.2650E-03 4.5890E-03 9.6310E-03 1.2410E-02 8.0350E-04 3.9400E-03

6.7690E-03 7.6420E-03 9.8610E-03 3.1590E-01 6.5210E-02 5.5710E-03 1.8460E-02

1.1030E-01 1.0280E-01 6.6840E-03 2.2940E-02 1.7490E-02 7.8280E-03 7.6870E-02

1.3800E-01 2.1380E+00 2.0740E+00 2.6280E-02 3.3840E-02 8.0270E-02 1.1230E-01

1.8470E+00 8.9180E-02 3.1850E+00 7.2750E-01 8.4270E-03 1.3020E-01 1.8620E+00

1.8750E+00 1.9680E-03 4.4780E-03 1.1840E-02 1.5470E-02 1.5590E+00 1.0390E+00

5.1970E-01 6.2750E-02 5.2290E-02 4.1830E-02 3.1380E-02 2.7870E-04 2.3890E-04

1.9910E-04 1.5930E-04 1.1580E-03 1.0130E-03 8.6850E-04 7.2370E-04 3.6240E+00

2.7270E+00 1.8220E+00 9.1260E-01 1.0480E-01 7.8590E-02 5.2420E-02 2.6220E-02

4.4730E-03 3.5800E-03 2.6850E-03 1.7900E-03 2.0290E-02 1.6900E-02 1.3520E-02

1.0140E-02 2.0430E-02 1.6350E-02 1.2260E-02 8.1730E-03 1.5850E-02 1.3200E-02

1.0560E-02 7.9250E-03 2.4750E-04 2.1210E-04 1.7670E-04 1.4140E-04 2.9570E-02

1.9710E-02 9.8540E-03 2.7640E-02 2.0790E-02 1.3880E-02 6.9440E-03 1.7150E-02

1.3720E-02 1.0290E-02 6.8600E-03 5.4840E-02 4.1190E-02 2.7480E-02 1.3750E-02

7.3430E-03 6.1190E-03 4.8960E-03 3.6720E-03 2.2600E-02 1.5090E-02 1.0050E-02

5.0300E-03 4.2970E-02 3.2880E-02 2.1930E-02 1.0970E-02 3.1610E-03 2.5290E-03

1.8970E-03 1.2640E-03 2.4020E+00 1.1710E+00 3.0430E-02 2.1220E-02 1.2090E-02

5.3970E-03 5.8560E-02 2.2950E-02 8.5950E-03 2.3730E-03 1.0780E-03 8.9220E-04

5.8710E-04 3.1840E-04 6.3260E+00 4.1400E+00 1.6630E+00 3.3010E-01 8.1030E-02

4.6970E-02 2.1130E-02 6.7840E-03 9.7780E-02 7.5030E-02 6.1360E-02 4.4630E-02

5.6550E-02 4.2760E-02 2.8360E-02 1.6320E-02 3.7150E-02 2.2460E-02 1.2740E-02

6.4760E-03 2.4890E-02 1.1490E-02 4.6000E-03 1.4530E-03 1.6830E-02 6.6000E-03

2.6320E-03 1.0160E-03 3.1610E-02 3.1770E-02 2.0010E-02 5.7210E-02 3.3110E-02

1.5810E-02 5.6420E-03 6.0620E-02 3.0990E-02 1.5000E-02 6.2990E-03 7.2930E-02

4.5460E-02 2.1500E-02 7.3460E-03 7.0690E-03 6.4110E-03 3.2960E-03 1.3280E-03

1.9800E-02 3.3570E-02 3.3610E-02 2.1590E-02 5.9850E-02 4.4200E-02 2.0350E-02

5.3510E-03 4.0830E-02 1.5570E-02 5.8350E-03 2.0950E-03 8.3770E-01 1.3890E-02

4.4880E-03 9.2250E-03 1.2340E-02 2.8440E-03 2.5460E-02 2.4590E-02 1.1590E-02

6.1240E-04 3.0320E-04 3.8530E-04 6.0250E-04 3.4530E+00 9.5510E-01 2.0400E+00

1.8910E+00 3.6400E-02 2.3660E-02 2.5300E-02 1.7160E-02 6.1340E-02 6.4530E-02

4.1260E-02 1.7900E-02 3.1490E-02 2.0620E-02 2.1240E-02 2.2610E-02 1.4980E-02

1.4550E-02 1.2890E-02 9.6990E-03 3.1360E-03 1.0200E-02 9.2300E-03 5.7240E-03

1.1470E-03 5.9230E-03 5.6300E-03 3.4390E-03 3.1700E-02 1.8120E-02 5.7330E-03

2.5550E-02 2.0000E-02 1.7860E-02 1.1070E-02 1.7040E-02 2.2900E-02 2.0900E-02

1.4080E-02 3.7070E-02 2.1540E-02 2.3160E-02 1.6570E-02 3.2110E-03 2.1450E-03

2.4840E-03 3.5610E-03 1.3200E-02 3.3600E-02 2.0030E-02 5.5480E-03 3.9030E-02

8.6310E-03 1.9870E-02 1.8760E-02 4.7790E-03 1.6950E-02 1.3010E-02 6.1850E-03

9.6220E-04 8.1650E-03 8.0400E-03 2.5260E-03 1.0860E-04 1.6940E-03 9.8860E-03

1.9760E-02 6.0620E-05 3.4770E-04 3.4360E-04 1.7670E-04 1.8240E-01 2.3960E+00

1.3010E+00 2.9060E-01 7.1980E-03 2.1500E-02 1.6010E-02 6.3580E-03 3.9910E-02

1.9100E-02 1.7040E-02 1.6050E-02 7.9170E-03 1.6500E-02 1.4420E-02 9.1020E-03

4.3650E-03 7.6550E-03 8.0110E-03 6.1840E-03 2.6220E-04 1.8820E-03 5.0330E-03

6.9720E-03 7.9200E-05 6.7950E-04 2.7420E-03 4.5670E-03 1.9930E-02 5.7310E-03

2.1260E-03 6.4610E-03 1.4190E-02 1.1210E-02 5.5170E-03 3.4770E-03 9.6220E-03

1.2350E-02 1.1370E-02 7.9720E-03 2.1460E-02 1.4220E-02 5.3400E-03 3.9240E-04

1.8710E-03 2.0810E-03 1.2270E-03 6.6000E-03 2.1570E-02 5.5460E-03 2.4650E-03

4.9970E-03 2.4770E-02 1.1830E-02 1.5250E-03 1.1320E-03 2.4910E-03 8.0040E-03

9.5000E-03 1.6310E+00 5.2360E-02 6.5440E-03 2.7710E+00 1.0660E+00 1.1170E-01

6.3230E-03 5.1040E+00 1.2360E+00 1.7560E-01 1.0620E-02 5.8380E-02 1.2840E-02

3.1020E-03 7.3280E-04 2.4180E+00 2.5540E-01 5.8160E-03 8.2150E-04 2.2650E+00

4.5450E-01 4.6350E-02 2.0910E-03 9.0900E-01 3.5520E-01 4.0270E-02 2.0120E-03

4.3540E-01 1.3610E-01 3.6840E-02 6.7960E-03 6.8580E-01 1.8730E-01 4.6690E-02

7.7920E-03 2.8950E-01 1.5880E-01 1.9720E-02 1.6630E-03 3.8570E-02 7.0180E-03

1.7750E-04 1.9230E-01 2.2690E-02 1.6850E-03 9.5010E-05 2.0870E-01 4.0770E-02

3.4390E-03 3.8570E-04 2.0160E-01 2.8070E-02 8.0940E-03 7.2910E-04 8.3260E-02

2.9350E-02 5.4970E-03 8.0130E-04 2.6060E-02 1.0280E-02 5.7370E-03 4.3310E-04

7.1090E-02 7.9500E-03 1.7680E-03 1.4770E-04 1.1330E-01 3.1370E-02 8.2340E-03

1.5470E-03 6.5500E+00 6.1730E-02 8.1630E-01 3.7540E+00 1.2350E+00 1.3260E-01

1.0290E+00 5.0600E+00 2.2470E+00 2.0990E-01 2.0870E-02 2.7750E-02 8.6540E-03

2.4850E-03 6.5550E-01 1.3020E+00 2.6470E-01 4.7860E-03 5.9000E-01 1.2050E+00

4.6820E-01 5.4590E-02 3.5520E-01 9.2520E-01 3.8560E-01 4.7580E-02 1.5050E-01

2.1800E-01 9.8930E-02 3.4470E-02 1.8700E-01 3.6970E-01 1.6230E-01 5.1130E-02

1.3410E-01 3.1800E-01 1.7840E-01 2.2850E-02 1.9030E-02 1.4610E-02 4.3890E-03

5.3910E-02 1.0360E-01 2.0630E-02 1.7910E-03 5.3340E-02 1.1050E-01 4.3550E-02

3.8200E-03 5.8830E-02 1.1370E-01 1.6050E-02 8.1900E-03 2.9330E-02 8.7010E-02

2.9150E-02 6.0860E-03 2.1720E-02 8.2410E-03 2.0340E-03 3.3960E-03 1.9920E-02

4.0880E-02 5.3440E-03 1.7180E-03 3.8610E-02 5.6610E-02 2.5690E-02 8.5310E-03

1.8790E+00 4.7900E-02 9.4840E-01 2.7720E+00 9.8500E-01 1.1650E-02 1.2630E+00

6.3420E+00 1.7760E+00 7.2830E-03 1.7700E-02 1.7810E-02 5.7170E-03 1.2770E-01

6.8470E-01 7.8510E-01 1.8540E-01 9.8470E-02 6.0520E-01 7.7090E-01 3.6530E-01

4.0250E-02 3.8560E-01 6.3790E-01 3.0840E-01 4.7490E-02 1.2170E-01 1.5390E-01

8.0450E-02 4.6540E-02 1.6220E-01 2.7150E-01 1.4020E-01 8.2670E-03 1.5360E-01

2.0350E-01 1.4320E-01 8.0210E-03 1.4000E-02 8.2430E-03 1.1820E-02 5.4980E-02

6.3900E-02 1.4380E-02 8.4100E-03 5.6230E-02 7.0900E-02 3.3530E-02 1.9120E-02

4.9050E-02 7.7660E-02 1.0930E-02 5.4920E-03 2.9140E-02 6.3250E-02 2.3690E-02

1.7370E-02 4.6200E-03 3.3740E-03 3.0440E-03 5.4760E-03 1.8250E-02 2.8230E-02

3.6900E-03 1.1070E-02 3.1690E-02 3.9220E-02 2.0910E-02 1.6670E-03 5.6020E-02

7.4240E-01 2.7640E+00 4.3610E-04 1.3650E-02 9.7660E-01 6.1110E+00 2.4420E-03

7.4940E-03 1.3870E-02 1.2270E-02 1.5140E-02 1.6360E-01 5.4930E-01 6.0970E-01

8.8870E-03 1.1940E-01 4.9030E-01 7.6730E-01 2.0030E-03 4.7570E-02 3.0850E-01

6.8830E-01 1.1630E-02 5.0440E-02 1.0270E-01 1.3640E-01 7.7700E-03 5.1110E-02

1.4020E-01 2.6560E-01 7.9280E-04 9.3190E-03 1.2040E-01 2.6450E-01 2.4600E-03

1.0110E-02 1.0100E-02 1.7610E-03 1.4670E-02 4.4100E-02 4.8300E-02 9.2690E-04

9.9830E-03 4.5060E-02 7.0830E-02 4.8790E-03 2.1450E-02 3.9580E-02 5.1420E-02

8.0060E-04 6.0850E-03 2.3690E-02 6.0530E-02 1.3030E-02 2.1880E-03 4.6220E-03

1.0290E-03 1.1650E-03 6.2210E-03 1.4680E-02 1.8110E-02 2.7440E-03 1.2020E-02

2.6730E-02 3.5620E-02 2.6270E+00 2.3920E-01 7.6160E-03 5.7720E+00 9.5860E-01

1.5070E-01 7.9480E-03 3.4790E-02 8.3340E-03 2.6680E-03 4.0150E-05 5.9490E-02

1.8860E-02 2.2660E-04 6.5510E-06 1.8130E-01 3.2490E-02 2.5550E-03 7.2760E-05

8.9960E-01 3.0910E-01 2.0870E-02 2.1610E-04 1.2750E+00 1.6900E-01 2.8750E-02

3.0160E-03 3.3450E-01 2.4300E-01 2.9640E-02 3.8010E-03 1.0600E+00 4.2880E-01

5.9060E-02 3.4960E-03 1.1660E-02 6.4880E-04 2.4830E-05 6.2320E-02 1.2380E-02

3.5040E-03 3.3430E-05 2.2390E-01 1.3510E-02 1.6250E-03 2.0100E-04 3.4600E-02

1.0280E-02 2.5900E-04 3.3630E-05 2.0710E-01 4.4630E-02 4.6860E-03 2.8090E-04

1.8810E-04 2.0620E-02 3.1090E-03 2.1100E-05 3.6530E-02 1.0820E-02 3.4360E-03

1.9140E-05 3.7200E-01 3.2420E-02 3.4110E-03 5.4400E-05 4.7250E+00 2.8040E-01

7.2530E-01 5.4120E+00 1.9150E+00 2.6690E-01 1.4740E-02 1.8030E-02 3.9390E-03

2.9490E-03 3.0700E-02 1.9220E-02 1.8890E-02 2.4360E-04 4.9610E-02 9.3820E-02

3.4000E-02 2.9700E-03 3.8280E-01 1.1430E+00 3.5870E-01 2.4600E-02 3.0410E-01

7.7320E-01 1.4910E-01 3.0070E-02 2.8580E-01 6.2770E-01 2.4650E-01 3.2610E-02

2.7000E-01 1.2490E+00 4.6250E-01 6.7990E-02 5.2330E-03 5.2110E-03 3.9220E-04

2.3960E-02 3.2380E-02 6.3480E-03 3.8590E-03 3.8430E-02 1.5180E-01 1.3600E-02

1.7520E-03 1.6350E-02 1.1940E-02 1.0230E-02 2.4510E-04 5.3950E-02 1.1720E-01

4.5850E-02 5.3760E-03 1.6130E-04 1.0560E-02 7.9400E-03 1.8990E-03 1.6100E-02

1.6610E-02 4.8770E-03 3.7570E-03 7.6780E-02 2.3740E-01 3.3300E-02 4.7890E-03

3.7040E+00 1.1180E-01 1.5470E+00 6.9530E+00 2.4660E+00 6.3100E-03 1.0390E-02

1.3230E-02 2.9070E-03 8.9110E-03 2.5200E-02 7.7670E-03 1.3360E-02 9.6330E-03

5.1000E-02 6.2150E-02 2.6530E-02 4.4430E-02 4.4060E-01 8.4110E-01 2.8350E-01

6.8940E-02 3.0050E-01 5.5750E-01 1.2100E-01 4.9040E-02 2.9280E-01 4.3810E-01

2.0270E-01 5.8820E-02 4.5850E-01 9.4500E-01 3.8220E-01 1.9640E-03 4.6540E-03

2.1940E-03 9.3680E-03 1.8310E-02 2.3350E-02 4.6700E-03 5.6950E-03 4.2970E-02

1.1200E-01 1.0580E-02 5.0250E-03 1.4330E-02 5.6480E-03 7.2010E-03 8.2610E-03

5.6310E-02 8.5420E-02 3.7580E-02 1.3440E-04 4.6820E-03 7.9530E-03 4.3690E-03

7.8700E-03 1.0370E-02 1.4060E-02 3.5650E-03 1.3240E-02 8.2240E-02 1.7230E-01

2.6460E-02 1.0920E-03 1.2960E-01 2.0520E+00 7.5970E+00 1.7850E-03 7.0500E-03

9.1410E-03 8.7740E-03 1.4040E-03 1.0990E-02 2.1490E-02 1.0870E-02 1.0030E-03

1.1530E-02 4.2240E-02 6.2860E-02 2.1870E-03 5.3340E-02 3.5820E-01 8.9020E-01

1.1730E-02 7.9140E-02 2.5120E-01 5.0490E-01 6.3520E-03 5.5720E-02 2.4210E-01

4.9290E-01 3.4960E-03 6.7820E-02 3.8010E-01 1.0440E+00 7.2110E-04 2.6710E-03

3.8510E-03 2.4210E-03 1.0700E-02 1.5730E-02 1.5860E-02 7.3840E-04 6.7090E-03

3.3620E-02 9.2240E-02 9.8300E-04 6.1320E-03 1.2140E-02 6.6860E-03 7.0270E-04

9.6170E-03 4.6320E-02 9.5430E-02 1.0750E-04 1.5350E-03 5.9360E-03 6.1320E-03

2.2390E-03 8.7800E-03 9.2790E-03 8.0270E-03 1.1930E-03 1.5850E-02 6.7120E-02

1.5230E-01 1.0030E+00 2.9270E-02 1.0060E-03 1.6600E-01 2.8050E-02 1.0490E-04

1.6400E-05 1.2950E-02 9.0380E-04 2.4040E-05 1.6340E-06 2.8990E-02 7.4350E-03

4.7130E-04 9.6830E-06 1.8150E+00 1.7270E-01 2.8390E-03 3.0830E-05 1.0480E-01

2.3480E-02 3.2230E-03 3.6040E-05 3.4140E-01 1.0290E-01 1.0210E-02 8.8130E-04

1.0700E+00 2.1830E-01 5.6710E-02 3.7790E-03 4.8080E-04 1.9730E-04 2.5150E-05

1.5750E-02 2.3700E-03 1.7550E-04 3.1960E-05 8.6110E-02 1.3980E-02 2.0080E-03

1.0000E-04 3.4670E-02 6.7230E-03 2.4910E-04 3.8820E-05 4.6680E-01 5.8370E-02

6.3200E-03 3.5660E-04 1.1230E-03 7.5150E-04 4.1560E-04 9.4110E-05 3.0850E-02

3.4710E-03 1.1940E-04 1.7390E-06 3.6240E-02 1.0220E-02 1.4340E-03 3.1440E-05

2.1490E+00 5.6130E-02 6.5410E-02 7.6860E-02 2.9410E-02 9.3150E-05 4.1080E-03

6.9370E-03 8.8310E-04 2.4140E-05 1.1000E-02 1.2890E-02 7.8470E-03 5.4130E-04

2.9980E-01 1.8520E+00 2.1040E-01 3.2570E-03 3.6690E-02 5.3690E-02 2.1110E-02

3.7270E-03 1.0200E-01 4.4660E-01 1.1340E-01 1.1430E-02 2.6580E-01 1.3910E+00

3.9510E-01 6.3970E-02 3.1550E-04 2.1300E-04 1.1200E-04 6.0690E-03 7.5490E-03

2.1490E-03 1.3930E-04 2.5290E-02 4.9640E-02 1.2220E-02 2.2550E-03 1.4720E-02

1.4510E-02 6.3390E-03 2.1870E-04 1.2120E-01 5.1550E-01 5.9680E-02 7.2670E-03

9.8250E-04 6.0060E-04 2.8150E-04 2.2040E-04 1.1950E-02 1.5540E-02 3.3380E-03

1.2830E-04 1.4590E-02 1.6220E-02 9.5050E-03 1.7090E-03 2.3220E+00 1.9010E-02

6.2160E-02 4.5060E-02 2.0840E-02 9.9490E-04 4.2920E-03 4.4030E-03 6.2750E-04

2.5370E-03 1.0930E-02 8.0710E-03 6.1320E-03 3.9600E-02 6.1820E-01 2.3540E+00

1.6210E-01 9.9470E-03 3.3390E-02 3.7380E-02 1.7810E-02 2.5050E-02 1.6790E-01

3.4070E-01 8.9730E-02 7.5270E-02 4.6380E-01 1.0680E+00 3.3200E-01 1.8860E-04

1.9150E-04 1.1950E-04 1.8470E-03 5.5500E-03 4.6330E-03 1.5190E-03 6.5870E-03

2.4100E-02 3.6120E-02 1.0120E-02 4.6390E-03 1.3370E-02 8.7810E-03 4.4700E-03

1.5860E-02 1.3500E-01 4.0340E-01 5.0080E-02 8.4220E-04 4.2810E-04 3.0170E-04

2.1540E-04 2.8900E-03 1.1780E-02 9.7250E-03 2.3780E-03 4.0970E-03 1.3240E-02

1.0810E-02 7.7480E-03 3.0760E-03 2.3540E-02 5.2850E-02 4.3180E-02 1.4420E-04

1.2110E-03 3.5040E-03 3.7230E-03 3.0640E-04 3.0050E-03 9.3000E-03 1.0440E-02

1.9630E-03 4.8870E-02 4.8950E-01 2.1360E+00 1.3910E-03 1.1600E-02 2.9870E-02

3.9360E-02 2.7400E-03 2.8960E-02 1.3940E-01 3.5130E-01 6.8180E-03 8.5390E-02

3.9320E-01 1.1350E+00 1.1270E-04 1.9060E-04 1.5540E-04 4.0480E-04 2.2070E-03

4.6930E-03 4.1290E-03 9.7480E-04 7.6690E-03 2.0700E-02 3.4680E-02 9.4570E-04

5.5870E-03 1.1420E-02 8.5100E-03 1.4460E-03 1.8490E-02 1.1050E-01 3.7780E-01

7.0180E-04 2.6800E-04 3.6690E-04 1.5240E-04 4.7710E-04 3.5840E-03 9.9150E-03

8.4380E-03 6.3430E-04 4.7660E-03 1.1650E-02 1.2880E-02 3.4060E+00 5.0760E-01

3.1100E-02 1.1610E-01 5.2270E-02 3.2430E-02 1.6370E-02 8.3720E-02 5.5810E-02

3.0580E-02 1.6230E-02 7.7630E-02 3.6090E-02 1.3180E-02 3.2670E-03 4.7550E-02

2.6130E-02 1.1390E-02 3.2910E-03 5.1310E-02 2.4250E-02 1.1160E-02 3.5830E-03

8.3230E-02 3.1500E-02 8.5500E-03 1.3590E-03 9.1600E-02 6.0180E-02 9.3230E-03

3.2140E-02 1.7830E-02 8.5790E-03 3.3180E-03 8.8330E-02 4.1160E-02 1.1990E-02

3.2250E-03 5.9100E-02 3.0550E-02 1.1860E-02 5.1170E-03 5.7430E-02 1.8180E-02

6.2100E-03 2.0250E-03 1.0550E-01 1.0600E-01 6.9700E-02 4.0650E-03 5.3790E-02

2.7400E-02 9.5770E-03 2.7940E-03 4.2650E-02 1.7550E-02 5.6790E-03 1.0820E-03

3.0460E+00 6.0740E-01 5.2270E-02 7.7240E-02 3.0580E-02 1.1870E-02 5.0350E-02

3.4370E-02 3.5550E-02 2.0900E-02 2.6800E-02 3.0450E-02 2.6840E-02 1.4850E-02

2.4720E-02 1.6130E-02 1.4890E-02 1.1510E-02 1.9310E-02 1.4650E-02 1.4600E-02

1.1670E-02 1.5500E-02 3.7590E-02 2.9770E-02 1.0620E-02 6.7850E-02 1.6780E-02

3.5910E-02 1.7820E-02 1.3370E-02 9.8970E-03 5.0340E-03 3.3480E-02 3.1770E-02

3.1940E-02 1.3380E-02 3.0450E-02 2.1120E-02 2.1220E-02 7.3660E-03 9.5470E-03

2.8960E-02 1.7520E-02 5.8700E-03 7.9010E-02 7.8600E-02 7.9310E-03 4.7860E-02

2.7390E-02 1.7550E-02 1.7910E-02 7.3260E-03 1.4450E-02 1.3060E-02 1.4300E-02

6.4020E-03 2.0320E+00 3.2430E-02 3.0580E-02 3.6760E-02 1.0410E-02 2.2620E-02

3.2610E-02 1.7380E-02 2.1590E-02 4.9040E-03 1.8920E-02 1.9210E-02 2.2050E-02

7.4440E-03 1.3120E-02 1.2330E-02 1.0890E-02 5.4780E-03 1.1730E-02 1.0890E-02

1.1860E-02 3.8210E-04 1.5500E-02 2.1560E-02 2.4870E-02 3.3300E-02 3.0450E-02

1.7700E-02 8.5730E-03 9.8880E-03 7.3900E-03 4.5700E-03 5.9330E-03 2.7080E-02

1.4940E-02 2.3180E-02 1.1830E-02 2.1220E-02 8.9570E-03 1.1040E-02 2.0940E-03

6.8830E-03 1.9520E-02 1.3010E-02 5.2630E-02 3.3110E-02 3.5220E-02 2.1550E-02

9.5750E-03 1.7920E-02 8.9330E-03 1.0070E-02 2.7920E-03 1.1980E-02 7.6960E-03

9.7160E-03 1.6370E-02 1.1870E-02 1.0410E-02 1.4610E-02 9.4580E-03 1.1950E-02

1.7470E-02 7.6790E-03 4.7580E-04 4.9260E-03 1.3150E-02 1.4070E-02 1.2320E-03

7.7070E-03 8.1930E-03 5.3130E-03 8.6950E-04 5.0850E-03 7.8180E-03 6.1320E-03

3.4980E-05 3.7780E-04 1.0940E-02 1.9810E-02 9.5200E-03 2.6800E-02 2.9650E-03

3.3190E-03 5.0280E-03 4.5680E-03 2.5010E-03 1.3880E-03 5.0380E-03 1.7400E-02

1.1500E-02 5.1170E-03 7.0510E-03 1.1020E-02 3.3920E-03 7.1610E-04 1.1010E-03

4.0100E-03 1.2460E-02 2.6300E-02 7.0030E-03 3.6580E-02 1.2390E-03 2.7940E-03

7.3250E-03 1.0070E-02 3.1390E-03 2.7890E-04 2.9040E-03 7.8490E-03 5.0030E-03

1.1710E+00 6.3880E-02 8.0190E-03 4.2490E+00 1.3920E+00 2.9180E-01 3.2370E-02

8.8960E+00 1.9630E+00 3.1680E-01 3.1660E-02 1.4050E-01 5.4940E-02 2.0720E-02

5.4170E-03 1.6840E-01 5.9700E-02 1.8570E-02 4.6950E-03 3.6020E-02 1.6730E-02

7.7400E-03 2.2160E-03 3.2590E-01 1.2310E-01 2.1060E-02 6.0930E-01 2.8430E-01

8.1550E-02 1.2740E-02 4.4790E-01 1.3470E-01 2.9620E-02 5.4300E-03 1.5210E-01

7.6220E-02 2.4200E-02 7.5710E-03 3.1960E-02 1.4090E-02 5.6030E-03 1.9360E-03

1.7700E-02 1.9080E-02 1.2450E-02 7.0750E-03 5.9200E-02 3.5150E-02 1.7390E-02

6.1610E-03 6.7280E-02 3.3620E-02 1.3880E-02 5.0000E-03 1.3010E+00 6.9620E-02

9.9200E-01 1.8360E+00 1.2940E+00 3.6520E-01 4.4630E-01 5.2470E+00 2.2060E+00

4.1460E-01 4.2630E-02 6.3990E-02 3.3410E-02 2.2230E-02 2.7500E-02 1.0660E-01

6.3600E-02 2.1960E-02 1.0000E-02 1.8140E-02 9.9860E-03 8.5930E-03 1.6990E-01

1.0350E-01 7.4370E-02 2.8130E-01 1.8970E-01 1.8720E-01 8.2130E-02 9.0940E-02

2.1280E-01 1.2620E-01 3.4410E-02 7.6100E-02 4.8230E-02 5.4350E-02 1.7760E-02

1.0070E-02 1.4590E-02 1.1260E-02 5.8340E-03 1.3270E-02 1.4030E-02 9.6650E-03

4.6570E-03 3.5140E-02 2.4030E-02 1.7960E-02 1.0940E-02 2.8500E-02 2.5200E-02

2.2520E-02 1.2790E-02 9.1040E-01 8.2320E-02 9.4960E-01 9.5570E-01 9.9970E-01

3.0040E-03 4.7080E-01 3.3070E+00 1.7560E+00 1.3120E-02 2.1940E-02 4.5710E-02

2.4760E-02 5.8400E-03 2.2660E-02 8.0990E-02 3.4970E-02 3.6270E-03 3.7100E-03

1.5050E-02 8.9370E-03 7.0720E-02 9.9650E-02 6.5140E-02 8.1140E-02 1.8640E-01

1.1660E-01 1.1030E-01 1.0170E-02 8.5170E-02 1.1500E-01 9.6590E-02 2.4170E-02

5.4290E-02 1.9740E-02 3.1210E-02 2.5110E-03 6.6040E-03 9.9000E-03 9.0580E-03

8.8460E-03 1.1170E-02 6.6140E-03 2.8870E-03 1.7390E-02 1.7940E-02 1.5710E-02

7.8540E-03 8.7210E-03 1.9030E-02 1.4040E-02 1.6190E-02 2.5570E-03 9.3870E-02

6.5880E-01 7.4450E-01 2.7860E-04 3.0410E-03 3.2990E-01 2.4300E+00 1.7120E-03

1.2990E-02 1.5320E-02 2.4460E-02 4.2130E-04 5.5310E-03 1.5730E-02 3.7450E-02

9.7850E-06 4.0140E-03 2.8880E-03 8.6500E-03 2.0900E-02 6.1250E-02 3.2610E-02

1.2740E-02 8.1820E-02 1.1010E-01 4.1820E-02 1.7780E-03 9.3430E-03 5.8110E-02

8.5250E-02 7.5700E-03 1.7740E-02 3.1570E-02 7.9110E-03 5.0390E-04 2.1780E-03

4.3750E-03 6.7850E-03 4.4230E-03 5.2850E-03 2.9970E-03 1.3760E-03 6.1610E-03

1.0950E-02 7.8500E-03 4.4740E-03 2.5980E-03 6.7720E-03 1.1710E-02 7.8050E-03

3.0850E+00 2.7840E-01 1.5240E-02 7.7140E+00 1.9600E+00 3.0110E-01 2.2350E-02

4.7370E-01 1.5210E-01 3.2010E-02 5.4000E-03 7.7320E-01 2.5390E-01 5.5410E-02

7.8170E-03 4.1000E-01 1.1670E-01 1.8690E-02 1.4590E-03 4.1090E-01 2.1120E-02

3.2250E-03 5.7500E-01 1.1420E-01 1.4010E-02 7.5080E-04 7.2240E-01 2.4320E-01

5.5370E-02 6.2020E-03 1.4020E-01 4.7310E-02 9.2130E-03 3.0060E-03 8.2890E-02

3.4900E-02 1.3140E-02 3.7280E-03 2.0990E-02 6.0750E-02 1.1640E-02 7.4730E-03

6.2900E-02 2.8080E-02 1.1070E-02 2.2040E-03 9.6880E-02 3.2360E-02 7.5860E-03

1.2710E-03 3.3920E+00 3.4040E-01 1.4940E+00 4.1020E+00 2.0710E+00 3.7080E-01

1.5130E-01 2.0890E-01 1.3850E-01 3.4580E-02 2.0990E-01 3.7930E-01 2.4200E-01

6.5490E-02 7.4080E-02 2.2090E-01 1.2680E-01 2.2710E-02 1.4650E-01 1.8930E-01

1.2110E-02 1.7090E-01 2.8060E-01 9.9010E-02 1.5210E-02 2.4180E-01 3.1540E-01

2.0160E-01 6.4910E-02 5.8780E-02 5.1920E-02 4.1770E-02 6.3070E-03 3.0390E-02

3.8760E-02 2.5560E-02 1.3420E-02 1.6790E-02 2.8010E-02 3.2360E-02 3.7640E-03

3.3620E-02 2.7010E-02 1.4270E-02 9.8930E-03 3.5770E-02 3.5780E-02 2.7430E-02

8.2920E-03 2.6020E+00 1.2190E-01 1.5990E+00 2.6450E+00 1.6670E+00 3.1900E-02

1.3780E-01 1.2490E-01 1.0840E-01 2.9930E-02 1.9360E-01 2.4860E-01 2.0320E-01

1.8330E-03 8.3500E-02 1.4430E-01 1.0350E-01 4.2100E-02 1.4000E-01 7.9000E-02

3.8610E-02 1.5370E-01 1.6190E-01 6.6800E-02 5.5140E-02 1.9840E-01 2.0000E-01

1.6290E-01 1.8230E-02 5.0130E-02 2.5560E-02 2.7270E-02 9.7580E-03 2.1710E-02

2.7780E-02 2.1890E-02 1.2600E-02 1.4750E-02 2.2270E-02 1.1200E-02 1.6410E-02

1.7910E-02 2.1140E-02 8.1420E-03 7.5700E-03 2.7390E-02 2.1310E-02 2.1670E-02

2.5270E-03 1.4670E-01 1.2380E+00 2.6370E+00 5.4000E-03 3.4490E-02 1.0820E-01

1.1890E-01 2.6470E-03 3.4760E-02 1.5610E-01 2.5960E-01 9.3870E-05 2.0920E-03

6.3820E-02 1.5640E-01 9.3460E-03 5.5880E-02 1.0870E-01 5.3500E-03 4.6490E-02

1.1810E-01 1.1320E-01 6.2030E-03 6.4750E-02 1.5960E-01 1.8030E-01 5.8860E-03

1.8480E-02 3.6820E-02 1.8730E-02 2.1940E-03 9.7410E-03 1.7900E-02 2.4370E-02

8.3960E-03 8.9000E-03 8.4270E-03 1.4800E-02 5.4650E-03 1.5230E-02 1.2330E-02

9.6850E-03 1.2660E-03 8.2850E-03 2.1650E-02 2.0800E-02 2.8030E+00 1.0620E-01

5.1900E-03 5.1190E-01 1.2310E-01 2.5250E-02 5.2840E-03 3.3070E-01 8.5560E-02

1.3230E-02 6.0320E-04 2.5500E-01 7.8740E-02 1.9260E-02 2.5400E-03 2.2640E-02

8.5700E-03 1.0970E-03 7.3590E-01 5.5250E-02 1.0760E-02 1.9850E-03 5.0750E-01

1.0570E-01 1.1600E-02 1.3870E-03 6.1670E-02 1.5890E-02 2.2300E-03 5.9660E-04

2.6120E-01 6.3090E-02 9.7490E-03 1.8240E-03 3.4770E-02 3.0550E-02 1.5750E-02

3.4240E-03 8.5520E-02 2.0270E-02 6.5840E-03 5.4600E-04 1.6030E-01 4.7020E-02

1.1210E-02 1.4200E-03 3.4600E+00 1.2720E-01 1.5280E-01 2.6900E-01 1.0810E-01

2.5950E-02 8.5340E-02 1.7250E-01 8.8820E-02 1.5680E-02 6.8570E-02 1.3660E-01

7.1610E-02 2.1770E-02 1.3920E-02 6.9990E-03 5.0360E-03 1.8290E-01 4.3370E-01

4.4030E-02 9.5540E-03 1.3570E-01 2.6650E-01 1.0690E-01 1.2810E-02 2.4620E-02

2.7500E-02 1.3600E-02 1.6880E-03 6.2820E-02 1.5480E-01 6.4170E-02 1.0430E-02

2.8980E-02 2.2260E-02 1.0660E-02 8.5160E-03 3.5190E-02 4.4250E-02 1.0300E-02

6.7470E-03 5.5920E-02 7.8370E-02 3.6830E-02 1.2290E-02 2.6520E+00 4.0160E-02

1.3760E-01 1.8210E-01 8.5790E-02 1.3210E-02 8.8550E-02 1.1800E-01 7.3230E-02

1.4280E-02 6.1880E-02 9.9120E-02 6.2660E-02 7.7780E-03 7.6180E-03 5.3140E-03

4.0730E-02 1.8630E-01 2.7900E-01 2.9850E-02 2.3210E-02 1.3720E-01 1.7360E-01

7.9580E-02 7.9380E-03 2.1200E-02 1.5540E-02 9.2350E-03 9.7240E-03 6.3940E-02

1.1910E-01 5.2020E-02 2.3180E-02 1.4080E-02 1.1260E-02 7.7780E-03 1.4170E-02

2.3020E-02 3.1940E-02 7.0110E-03 1.7130E-02 4.5040E-02 5.4890E-02 3.0500E-02

8.8950E-03 4.3140E-02 1.1330E-01 1.6860E-01 6.0270E-04 1.5660E-02 7.3070E-02

1.2840E-01 1.3870E-03 1.6040E-02 5.3380E-02 1.0710E-01 3.5070E-03 7.8780E-03

4.1480E-03 8.9140E-03 4.7330E-02 1.4800E-01 1.9890E-01 3.0590E-03 2.7270E-02

1.1110E-01 1.7060E-01 2.1290E-03 8.6490E-03 1.7070E-02 1.2720E-02 1.8160E-03

1.0420E-02 5.1870E-02 1.2510E-01 1.7380E-02 7.6340E-03 1.2100E-02 5.1480E-03

3.9850E-03 1.4520E-02 1.8730E-02 1.9600E-02 2.9400E-03 1.8810E-02 3.8630E-02

4.9920E-02 1.7420E+00 5.9010E-02 4.2660E-03 5.7080E+00 1.3420E+00 1.8470E-01

1.2060E-02 1.1590E+01 1.9990E+00 2.2980E-01 1.3400E-02 4.4980E-01 5.6070E-02

1.9290E-02 5.6320E-01 1.8560E-01 3.0390E-02 7.9950E-03 5.8470E-01 1.2800E-01

2.2140E-02 3.2060E-03 1.9850E-01 6.4400E-02 8.0820E-03 2.2780E-03 8.0800E-02

3.1610E-02 9.8060E-03 2.0140E-03 1.6720E-02 2.8850E-02 1.0720E-02 4.6120E-03

4.5800E-02 2.1630E-02 6.8180E-03 1.1600E-03 9.6190E-02 2.8500E-02 7.5930E-03

1.3620E-03 2.1190E+00 7.1040E-02 9.9200E-01 3.1450E+00 1.4580E+00 2.2650E-01

7.3950E-01 7.6940E+00 2.3680E+00 2.8430E-01 1.8520E-01 2.1260E-01 2.6800E-02

2.3090E-01 2.1660E-01 1.6200E-01 2.2460E-02 1.2780E-01 3.0490E-01 1.2370E-01

2.3930E-02 8.1890E-02 7.2860E-02 5.7080E-02 6.6980E-03 1.7700E-02 5.3880E-02

2.8680E-02 1.0940E-02 1.3380E-02 1.6940E-02 1.4030E-02 4.2080E-03 2.5000E-02

1.6760E-02 1.2110E-02 6.4920E-03 2.8480E-02 4.7780E-02 2.2720E-02 8.1230E-03

1.5960E+00 6.3400E-02 1.0930E+00 2.0280E+00 1.1640E+00 5.1330E-03 8.7280E-01

5.5330E+00 1.8810E+00 7.2380E-02 1.5680E-01 8.6730E-02 6.6150E-02 1.9690E-01

9.8810E-02 1.0770E-01 2.2130E-02 1.2360E-01 1.9410E-01 9.5600E-02 2.1850E-02

6.9310E-02 3.1370E-02 3.7920E-02 5.2210E-03 1.9650E-02 3.8410E-02 2.5420E-02

1.0030E-02 1.0290E-02 1.0640E-02 5.7240E-03 1.0670E-02 1.4230E-02 1.2840E-02

7.4800E-03 7.5900E-03 2.2720E-02 3.0580E-02 1.8030E-02 1.0250E-03 7.6030E-02

8.3930E-01 1.9950E+00 4.6260E-04 5.6540E-03 6.5830E-01 4.9270E+00 2.9330E-02

6.7800E-02 1.1090E-01 1.7710E-02 6.9430E-02 1.4710E-01 8.2030E-02 3.2060E-03

2.3920E-02 9.5580E-02 1.7440E-01 4.9810E-03 2.1500E-02 5.1730E-02 2.8320E-02

1.0420E-03 6.2400E-03 1.9180E-02 3.7130E-02 6.6890E-03 5.6420E-03 6.0640E-03

5.5940E-03 3.1490E-03 1.0690E-02 1.0310E-02 5.8310E-03 1.3620E-03 8.1220E-03

1.8030E-02 2.5910E-02 3.5400E+00 2.4170E-01 1.3640E-02 6.9240E+00 1.5300E+00

2.8900E-01 1.4390E-02 8.0550E-02 4.3070E-02 1.1810E-02 2.7000E-01 1.8440E-02

4.2240E-03 7.4720E-04 6.9370E-01 1.6160E-01 3.6420E-02 7.8450E-03 1.0950E-01

1.4990E-02 4.3650E-03 6.6720E-04 2.4160E-01 6.1560E-02 1.0570E-02 1.3410E-03

4.5230E-03 2.5880E-02 5.9380E-03 4.0330E-04 1.0180E-01 2.1180E-02 7.4780E-03

1.2370E-03 1.8840E-01 6.1400E-02 4.7930E-03 3.8120E-04 4.1660E+00 2.8970E-01

1.1760E+00 7.3600E+00 2.8420E+00 3.4430E-01 5.7720E-02 2.9250E-02 2.2210E-02

6.1990E-02 1.6300E-01 1.3360E-02 3.7900E-03 2.0190E-01 3.7590E-01 1.3710E-01

3.6940E-02 3.2370E-02 6.0880E-02 9.6830E-03 3.5000E-03 6.3500E-02 1.2990E-01

5.9800E-02 1.1910E-02 3.7690E-03 1.4070E-02 9.5900E-03 3.5550E-03 3.9630E-02

5.3310E-02 1.1440E-02 6.9420E-03 7.9340E-02 1.4610E-01 6.6740E-02 5.4050E-03

3.2450E+00 1.3390E-01 2.2810E+00 5.3440E+00 2.2840E+00 3.9520E-02 3.0780E-02

1.9000E-02 1.4120E-02 6.3230E-02 1.0630E-01 9.0560E-03 5.5380E-02 1.7800E-01

2.5980E-01 1.0950E-01 1.0520E-02 2.9010E-02 3.9840E-02 6.4840E-03 1.0380E-02

5.9650E-02 9.0940E-02 4.9590E-02 3.0150E-03 6.5210E-03 9.3870E-03 5.8630E-03

1.5390E-02 2.7950E-02 3.7970E-02 7.4490E-03 1.1990E-02 8.4380E-02 9.0290E-02

5.1250E-02 3.6350E-04 1.5910E-01 1.7960E+00 5.5760E+00 2.3220E-02 2.9610E-02

1.2950E-02 3.2390E-03 1.6340E-02 5.0240E-02 7.4640E-02 1.2990E-02 5.9000E-02

1.4700E-01 2.3230E-01 3.0060E-03 1.0660E-02 2.3130E-02 2.7490E-02 1.3300E-03

1.1880E-02 4.9500E-02 9.5070E-02 2.2610E-03 2.3410E-03 7.5300E-03 6.3350E-03

4.9780E-03 1.4950E-02 2.2300E-02 2.3240E-02 1.1470E-03 1.4370E-02 6.7570E-02

9.6470E-02 1.4370E+00 1.0490E-01 5.1180E-03 1.6560E-02 1.9870E-03 1.0410E-04

7.0740E-02 2.4360E-02 7.6410E-03 1.7090E-04 1.9670E+00 1.4170E-01 2.0000E-02

2.5930E-03 3.0850E-02 7.9130E-03 1.3380E-03 1.4050E-04 5.3990E-01 9.2260E-02

1.1130E-02 1.2330E-03 3.9840E-04 2.5380E-02 3.5480E-03 1.8910E-04 3.4810E-02

7.6980E-03 6.8440E-04 5.1240E-05 3.1650E-01 2.2820E-02 3.9500E-03 2.5030E-04

2.6870E+00 1.2190E-01 8.1890E-03 6.6410E-03 1.1900E-03 3.6270E-02 3.6280E-02

1.1790E-02 8.2810E-03 3.5910E-01 1.3110E+00 1.3080E-01 2.1550E-02 1.3410E-02

1.3800E-02 6.0900E-03 1.2470E-03 1.1220E-01 3.0200E-01 9.8440E-02 1.3260E-02

3.4150E-04 1.3010E-02 9.7970E-03 2.1580E-03 1.4670E-02 1.5160E-02 6.4200E-03

6.5880E-04 5.2060E-02 1.7120E-01 2.0400E-02 4.4190E-03 3.1860E+00 3.5270E-03

6.4810E-03 3.3770E-03 1.7320E-02 2.1670E-02 2.5780E-02 8.6850E-03 6.1130E-02

3.9170E-01 9.6410E-01 1.0520E-01 4.6790E-03 1.0930E-02 8.7760E-03 4.2760E-03

1.8000E-02 1.1930E-01 2.2310E-01 7.9020E-02 2.8460E-04 5.7810E-03 9.7980E-03

5.3730E-03 4.6340E-03 1.2330E-02 9.0760E-03 4.5000E-03 1.0210E-02 5.3350E-02

1.2670E-01 1.6760E-02 1.1250E-03 4.4470E-03 5.0900E-03 5.0780E-03 1.9160E-02

1.9390E-02 1.5190E-02 8.9530E-03 7.1210E-02 3.2110E-01 8.1060E-01 1.3310E-03

5.7430E-03 9.2120E-03 7.0500E-03 2.3170E-03 2.0650E-02 9.8660E-02 2.3170E-01

2.2760E-04 1.7800E-03 7.2970E-03 7.5490E-03 1.0220E-03 5.6390E-03 1.0350E-02

7.6800E-03 1.4260E-03 1.1940E-02 4.4100E-02 1.1430E-01 6.1520E-01 4.0910E-02

2.2910E+00 1.1070E+00 3.7640E-01 6.5530E-02 7.5870E+00 2.6630E+00 7.1870E-01

1.2550E-01 5.3750E-02 3.0420E-02 1.4620E-02 5.6900E-03 2.0430E-02 1.4560E-02

8.7490E-03 4.3140E-03 3.0450E-02 1.0780E-01 9.3080E-02 5.7190E-02 9.1170E-02

5.4440E-02 3.0800E-02 1.3980E-02 4.1220E-02 2.6030E-02 1.7480E-02 1.1410E-02

5.1940E-01 7.5060E-01 6.7200E-01 6.8730E-01 4.5290E-01 3.0130E-01 3.5100E+00

2.5970E+00 1.0210E+00 2.2860E-02 2.0850E-02 1.6630E-02 9.3990E-03 1.1110E-02

5.7800E-03 7.0500E-03 9.1110E-03 2.0300E-02 9.3080E-02 6.1140E-02 1.8300E-02

4.3060E-02 4.0030E-02 2.9440E-02 1.4050E-02 1.7810E-02 2.2170E-02 1.5840E-02

8.2620E-03 2.9420E-02 5.2680E-01 4.7440E-01 2.5040E-01 1.9270E-02 1.9050E-01

1.4620E+00 2.0400E+00 6.2130E-03 1.1760E-02 1.0400E-02 5.9260E-03 1.1620E-03

6.5380E-03 5.3560E-03 3.1340E-03 1.0150E-02 5.7180E-02 1.8390E-02 1.0450E-02

1.8070E-02 1.8590E-02 1.6610E-02 9.8180E-03 9.6270E-03 6.7450E-03 8.0720E-03

7.7960E-03 2.8960E+00 4.5350E-01 3.1090E-02 7.9580E+00 2.8950E+00 6.3050E-01

7.4140E-02 1.0820E-01 5.3900E-02 1.5920E-02 2.7190E-03 6.2630E-02 3.2200E-02

1.5280E-02 5.7950E-03 1.8130E-01 1.3370E-01 3.8540E-02 1.6050E-02 1.4130E-01

7.2730E-02 2.8030E-02 1.0380E-02 1.3250E-01 5.3350E-02 1.4520E-02 2.1260E-03

2.5780E+00 5.3520E-01 2.1710E+00 3.1020E+00 2.6490E+00 7.8150E-01 5.3880E-02

3.1300E-02 3.7250E-02 1.3820E-02 2.4570E-02 2.4910E-02 2.1310E-02 1.4470E-02

1.3570E-01 6.2290E-02 6.4850E-02 1.6680E-02 7.2730E-02 4.7630E-02 4.8860E-02

1.7400E-02 4.2340E-02 4.9920E-02 4.3060E-02 1.7320E-02 1.7170E+00 1.7960E-01

2.0890E+00 1.4990E+00 2.0450E+00 1.5920E-02 3.7230E-02 1.5630E-02 2.1340E-02

7.2920E-03 1.5650E-02 1.6740E-02 1.6540E-02 9.0350E-02 2.8960E-02 3.9700E-02

2.5950E-02 2.8040E-02 4.8860E-02 2.1060E-02 2.6860E-02 6.0460E-03 3.4250E-02

2.8220E-02 3.3470E-02 8.5250E-03 1.9780E-01 1.4460E+00 1.2530E+00 2.7190E-03

1.3810E-02 2.1340E-02 5.5880E-03 1.1330E-03 6.1940E-03 9.9650E-03 1.0280E-02

4.5130E-02 1.2450E-02 1.4970E-02 1.9940E-02 1.0380E-02 1.7400E-02 2.6860E-02

7.5720E-03 3.0900E-04 6.7610E-03 2.3030E-02 1.9810E-02 2.7870E+00 1.9920E-01

1.1250E-02 1.7180E-01 6.2910E-02 1.4630E-02 3.8150E-03 1.2460E-01 6.0220E-02

1.8370E-02 4.1250E-03 3.6720E-02 3.6730E-01 3.6880E-02 5.3630E-03 3.9550E-01

1.2080E-01 1.5220E-02 3.9530E-03 1.2080E-01 6.0150E-02 2.1130E-02 3.9370E-03

3.1760E+00 2.4240E-01 7.6550E-02 6.2870E-02 4.9940E-02 1.1230E-02 5.3900E-02

4.8600E-02 4.3630E-02 1.9840E-02 2.9380E-02 1.4290E-01 1.6300E-01 2.1210E-02

1.5980E-01 1.4270E-01 1.1330E-01 1.1850E-02 6.0070E-02 3.9770E-02 3.6720E-02

2.3050E-02 2.4210E+00 2.5790E-02 6.0030E-02 3.2240E-02 3.2760E-02 1.1940E-02

3.8940E-02 2.9300E-02 3.7170E-02 2.2030E-02 4.7670E-02 1.2500E-01 7.2270E-02

3.9300E-02 1.3610E-01 5.9540E-02 8.0210E-02 2.1110E-02 3.6710E-02 3.0110E-02

3.0580E-02 7.9540E-03 2.5450E-02 4.4090E-02 2.3160E-02 2.4280E-03 1.2280E-02

3.1710E-02 3.2950E-02 1.4690E-02 1.3830E-02 5.7620E-02 9.2270E-02 8.8000E-03

4.2760E-02 1.0770E-01 5.5410E-02 3.9360E-03 2.3040E-02 3.0560E-02 2.2230E-02

1.6450E+00 2.6710E-01 7.9170E-02 6.3270E+00 1.5860E+00 3.2290E-01 5.3960E-02

1.1720E+00 2.0800E+00 1.1670E+00 9.2870E-02 1.7380E+00 5.6700E-01 9.9950E-02

6.2620E-03 2.2410E+00 6.8520E-01 1.3740E-01 1.6960E-02 1.5330E+00 1.9950E-01

4.9810E-01 3.6150E+00 1.6480E+00 3.8100E-01 8.7700E-01 1.3910E+00 3.3020E-01

7.8080E-01 5.6340E-01 6.5480E-01 4.7450E-01 1.1760E-01 4.6000E-01 1.0280E+00

6.5570E-01 1.6960E-01 1.0160E+00 4.0940E-02 4.4840E-01 2.2490E+00 1.3020E+00

5.8370E-01 5.8080E-01 6.7130E-01 4.2240E-01 9.8930E-02 4.7210E-01 3.2580E-01

3.1050E-01 3.6400E-02 4.5410E-01 5.4670E-01 5.0490E-01 1.1260E-02 3.0690E-02

3.0410E-01 1.6740E+00 2.9160E-01 1.3230E-01 6.0910E-01 9.0420E-02 6.2620E-03

1.1680E-01 3.1040E-01 1.7060E-01 3.3960E-03 3.9560E-02 3.1580E-01 4.1470E-01

3.5050E+00 2.6950E-01 2.9780E-02 1.0850E-01 7.8730E-02 2.8350E-02 5.8400E-03

5.1420E+00 2.3400E-01 5.7100E-03 1.2500E-03 1.0580E+01 2.0620E+00 1.7180E-01

7.6900E-03 4.0940E+00 3.1030E-01 9.0380E-02 4.8990E-02 2.9010E-02 1.5270E-02

1.1380E+00 3.0950E+00 2.3790E-01 4.7730E-03 2.6950E+00 5.5250E+00 2.2050E+00

1.9930E-01 3.1920E+00 7.2300E-02 2.7980E-02 2.9360E-02 1.8210E-02 1.8340E-01

1.2790E+00 1.9590E+00 1.6590E-01 4.1170E-01 2.8600E+00 3.5390E+00 1.7030E+00

5.4220E-02 1.4290E-02 2.5460E-02 1.6340E-02 1.7850E-02 2.3750E-01 1.0160E+00

1.4310E+00 3.4590E-02 5.0380E-01 2.2970E+00 3.5640E+00 5.9330E-01 3.9550E-01

1.9780E-01 2.0930E+00 1.5720E+00 1.0500E+00 5.2620E-01 1.8950E-02 1.5150E-02

1.1370E-02 7.5790E-03 2.1770E+00 1.0340E+00 4.3920E+00 3.0000E+00 1.2190E+00

2.4320E-01 3.7230E-01 1.5230E-01 6.2750E-02 2.9350E-02 7.9000E-01 2.5650E+00

5.0150E-01 1.4360E+00 1.3780E+00 4.4500E-02 1.8190E-01 1.3130E-01 5.2880E-02

1.2880E-01 1.7690E+00 9.0280E-01 1.3500E-01 2.1650E-02 1.8580E-02 7.0770E-02

9.4270E-02 2.1370E+00 2.7700E-01 3.2790E-02 1.9280E+00 6.4720E-01 1.7790E-01

4.5820E-02 2.0270E+00 3.0240E-01 4.6640E-01 8.9060E-01 5.6450E-01 1.8310E-01

1.3620E+00 8.3450E-02 4.0080E-01 4.9940E-01 4.2310E-01 1.9270E-02 6.5590E-02

2.6600E-01 3.4840E-01 4.1780E+00 4.1500E-01 2.3080E-02 4.5550E+00 5.0690E-01

3.5060E+00

40000.00

5.1780E+00 1.7120E+00 7.4360E-01 3.0700E-01 2.1850E+00 9.0890E-01 2.8040E-01

7.2970E-02 6.6740E+00 5.9380E-01 2.0930E-01 7.3350E-02 7.7890E-01 4.3020E-01

3.5200E-02 2.7690E-01 8.1910E-02 6.9790E-03 6.5350E-01 3.2150E-01 9.8670E-02

1.7170E-02 4.3620E-01 2.1590E-01 1.1430E-01 3.8880E-02 4.8970E-01 2.3440E-01

8.5580E-02 1.9440E-02 2.9250E-01 1.6200E-01 7.8450E-02 4.0260E-02 3.0960E+01

7.8270E+00 3.5930E-01 1.2250E-01 4.4790E-02 3.6640E+01 6.4030E+00 6.5760E-01

5.2050E-02 2.2420E-02 1.0560E-02 1.7450E+01 1.6130E-01 3.9250E-02 1.2680E+00

2.2530E-01 7.6840E-03 1.6240E-03 2.0260E+00 2.5690E-01 2.7290E-02 9.2370E-03

7.8330E-01 1.2420E-02 6.5650E-03 1.5740E-01 1.1680E-01 5.0690E-02 1.1760E-02

8.9210E-02 6.1510E-02 2.5900E-02 8.8570E-03 2.2040E-02 6.9890E-03 2.2380E-03

7.1960E-02 3.5400E-02 1.2740E-02 3.4330E-03 2.9270E-02 1.8470E-02 8.1150E-03

1.9620E-03 7.1470E-02 4.0200E-02 1.3670E-02 2.4540E-03 5.2170E-02 2.0910E-02

4.7980E-03 5.2250E-04 3.9030E-02 1.5390E-02 6.0070E-03 1.7470E-03 3.4170E-02

1.1260E-02 3.4170E-03 1.0740E-03 5.6890E-02 2.5910E-02 1.1190E-02 3.8550E-03

7.5610E-02 2.8340E-02 7.4840E-03 1.1080E-03 4.9130E-02 1.5430E-02 3.8100E-03

6.9110E-04 5.0170E-02 2.3620E-02 8.6480E-03 1.8700E-03 3.7790E-02 1.3270E-02

6.2950E-03 3.2230E-02 2.0650E-02 7.3750E-03 1.6130E-03 2.9490E-02 1.6520E-02

1.0110E-02 7.0820E-03 1.3550E-02 1.0090E-02 3.8350E-03 9.0660E-04 1.1220E-02

8.6750E-03 4.6320E-03 1.5020E-03 1.9450E-02 9.7280E-03 7.6810E-03 4.4440E-03

1.5220E-02 1.0300E-02 5.5630E-03 2.5140E-03 1.9740E-02 1.3570E-02 6.1920E-03

1.8210E-03 5.0680E+00 1.4920E+00 4.9190E-01 9.9170E-01 8.7930E-01 6.4850E-01

2.5460E-01 1.7370E+00 3.9860E+00 3.8680E-01 1.2610E-01 5.6910E-01 1.8830E-01

2.4340E-01 1.5500E-01 9.1950E-02 4.6490E-02 2.9020E-01 2.3230E-01 2.4940E-01

1.0260E-01 2.2590E-01 2.2950E-01 1.0040E-01 9.5430E-02 2.1130E-01 2.3160E-01

1.5710E-01 8.4420E-02 1.8500E-01 1.3750E-01 1.1040E-01 2.9420E-02 7.2020E+00

1.3960E+01 1.0230E+01 3.7700E-01 9.1840E-02 4.5050E-01 2.5290E+01 9.0910E+00

1.3510E+00 6.2900E-02 1.1230E-02 5.0270E+00 8.9260E+00 9.9940E-02 4.1790E-01

5.6210E-01 2.1680E-01 6.0890E-03 3.9330E-01 1.1780E+00 2.6130E-01 2.2860E-02

2.9640E-01 3.4070E-01 4.8270E-03 1.1780E-01 4.3910E-02 5.9430E-02 4.7480E-02

7.1940E-02 4.2140E-02 2.5980E-02 7.0860E-03 1.2640E-02 9.0410E-03 3.3090E-03

3.4410E-02 2.7480E-02 2.4760E-02 1.2180E-02 1.8680E-02 1.0450E-02 1.0980E-02

8.1340E-03 3.5120E-02 2.2640E-02 3.0320E-02 1.4250E-02 2.6640E-02 1.7740E-02

1.3790E-02 4.4530E-03 1.9700E-02 1.7260E-02 8.5210E-03 4.1110E-03 1.2870E-02

1.5710E-02 8.5830E-03 2.9400E-03 2.5240E-02 2.6300E-02 1.6640E-02 1.0090E-02

3.1560E-02 3.0640E-02 2.0510E-02 7.5630E-03 1.5260E-02 2.3450E-02 1.2650E-02

3.8970E-03 2.1360E-02 2.0770E-02 1.6630E-02 8.7340E-03 2.2670E-02 1.8050E-02

5.5110E-03 2.2880E-02 9.7460E-03 1.1090E-02 5.7710E-03 1.7220E-02 1.5750E-02

1.2190E-02 5.0810E-03 1.0780E-02 3.9460E-03 5.1270E-03 2.9090E-03 8.3400E-03

4.0320E-03 4.2170E-03 4.2450E-03 1.5560E-02 8.5570E-03 6.0950E-03 2.8310E-03

1.1260E-02 7.0220E-03 5.9510E-03 2.5250E-03 1.3790E-02 6.7040E-03 7.1180E-03

5.4430E-03 3.8250E+00 9.7160E-01 3.7060E-01 6.9310E-01 5.5860E-01 4.6180E-01

4.5940E-01 1.8460E+00 2.1840E+00 2.0770E-01 3.2800E-01 2.2080E-01 2.0240E-01

7.6320E-02 8.7500E-02 5.6550E-02 8.2690E-02 2.1610E-01 1.5730E-01 2.0030E-01

1.2370E-01 1.2120E-01 1.6660E-01 7.9470E-02 8.1650E-02 1.5400E-01 1.6130E-01

1.2810E-01 1.1010E-01 1.2420E-01 6.3100E-02 5.0360E-02 2.6350E-01 9.8440E+00

4.4110E+00 9.2950E+00 2.7540E-01 5.3030E-02 4.7160E-01 1.6170E+01 9.1360E+00

1.7790E+00 6.2190E-02 8.9970E-01 6.3140E+00 3.2980E+00 1.0110E-01 3.8800E-01

2.8640E-01 1.2590E-01 5.1550E-02 4.7060E-01 7.0280E-01 1.6680E-01 9.4040E-02

2.7680E-01 1.1070E-01 5.9800E-02 5.2840E-02 4.0560E-02 4.8840E-02 5.2210E-02

3.3390E-02 1.9340E-02 5.3140E-03 6.9980E-03 7.6420E-03 4.1000E-03 1.2700E-02

2.3070E-02 1.8810E-02 1.9550E-02 6.7960E-03 9.5380E-03 8.1400E-03 1.0420E-02

1.0060E-02 2.5130E-02 1.6050E-02 2.5500E-02 1.0980E-02 1.6440E-02 1.1290E-02

8.3650E-03 9.7620E-03 1.2190E-02 1.0520E-02 4.7240E-03 4.4730E-03 1.0180E-02

9.6980E-03 5.9460E-03 1.0660E-02 1.6400E-02 1.8300E-02 1.3340E-02 1.0500E-02

2.2970E-02 1.9500E-02 1.4970E-02 3.7930E-03 1.3040E-02 1.5140E-02 9.4350E-03

7.1650E-03 1.4740E-02 1.4730E-02 1.4000E-02 1.3920E-02 1.4180E-02 6.6480E-03

1.2300E-02 1.0700E-02 7.6340E-03 6.4840E-03 1.0590E-02 1.2600E-02 8.2280E-03

6.3320E-03 6.0540E-03 4.6100E-03 3.3570E-03 2.9490E-03 4.4210E-03 3.7630E-03

3.5160E-03 3.9250E-03 1.1740E-02 6.9730E-03 4.2680E-03 1.8720E-03 7.3130E-03

6.2780E-03 3.7590E-03 2.7150E-03 7.1600E-03 6.6320E-03 5.4180E-03 5.5840E-03

2.2990E+00 1.1560E-01 3.7180E-01 4.6010E-01 4.4170E-01 1.6470E-01 4.9230E-01

1.5160E+00 9.5550E-01 1.4910E-01 2.4610E-01 1.0600E-01 3.1170E-02 6.8430E-02

4.7130E-02 1.2440E-02 1.0640E-01 1.3840E-01 1.8020E-01 5.5770E-02 8.1820E-02

1.1020E-01 7.9970E-02 2.3210E-02 8.0220E-02 1.2020E-01 1.2780E-01 6.5510E-02

7.3690E-02 5.5290E-02 3.7930E-02 6.9290E-02 3.5110E-01 9.0670E+00 6.4150E-01

5.9940E+00 2.6050E-02 4.0920E-02 3.4980E-01 9.1940E+00 7.3950E+00 1.6110E+00

4.7800E-02 2.1070E+00 4.8400E+00 1.5170E-02 1.5100E-01 2.4800E-01 1.8400E-01

9.6650E-03 7.7800E-02 4.1920E-01 4.1670E-01 2.4520E-02 1.3330E-01 1.6310E-01

2.1260E-02 4.7820E-02 3.8150E-02 2.7460E-02 3.3460E-02 2.5190E-02 1.1390E-02

3.5430E-03 3.6380E-03 5.0970E-03 3.7600E-03 3.6220E-03 1.2800E-02 1.5740E-02

1.7230E-02 1.7590E-03 6.6240E-03 7.1710E-03 7.6250E-03 1.3000E-03 1.3140E-02

1.5550E-02 2.1120E-02 3.4520E-03 1.0700E-02 1.0290E-02 6.8730E-03 4.4070E-03

7.4490E-03 8.1640E-03 4.8280E-03 1.5000E-03 4.4460E-03 7.1300E-03 6.8920E-03

3.9380E-03 8.9000E-03 1.3050E-02 1.3250E-02 2.5620E-03 1.1480E-02 1.5720E-02

1.5280E-02 7.5730E-04 4.5620E-03 1.0190E-02 1.2020E-02 1.6230E-03 7.4550E-03

1.1220E-02 1.3410E-02 8.1340E-03 8.4530E-03 6.3870E-03 5.1980E-03 9.3790E-03

6.5310E-03 3.6850E-03 6.8340E-03 6.7290E-03 6.1840E-03 5.5350E-03 2.6990E-03

4.4330E-03 2.7820E-03 1.4140E-03 1.6660E-03 3.3080E-03 3.0630E-03 2.3800E-03

7.7780E-03 4.9500E-03 2.6020E-03 1.1900E-03 4.4060E-03 4.4080E-03 2.9470E-03

1.7000E-03 2.8130E-03 5.5170E-03 4.7190E-03 3.4810E-03 3.0440E-02 1.2420E-01

2.8520E-01 2.5490E-01 6.3730E-02 1.2090E-01 3.9700E-01 9.8050E-01 4.8580E-02

1.6400E-01 3.6650E-02 9.6500E-03 3.7360E-02 2.6270E-02 8.7010E-04 1.9280E-02

1.0210E-01 9.6390E-02 1.7010E-02 5.4230E-02 3.5240E-02 5.7460E-02 3.5530E-03

3.1660E-02 6.1310E-02 7.8820E-02 3.2140E-02 2.6580E-02 4.1790E-02 1.5700E-02

1.9140E-02 9.1740E-02 2.7450E-01 5.9340E+00 1.8020E+00 1.2580E-02 1.1410E-02

2.3290E-02 1.9280E-01 4.1030E+00 5.0060E+00 1.5700E-02 5.1540E-02 3.4270E+00

1.6550E-03 2.5310E-02 1.4110E-01 1.3060E-01 4.5570E-03 4.6740E-03 7.8220E-02

3.7370E-01 5.4170E-03 3.9080E-02 1.1600E-01 4.3170E-03 2.6410E-02 2.7640E-02

8.5930E-03 1.6460E-02 1.3670E-02 5.0790E-03 1.7710E-03 1.5610E-03 2.4660E-03

2.2350E-03 8.2430E-04 4.2270E-03 1.0310E-02 9.3620E-03 1.9980E-04 2.5250E-03

5.4110E-03 3.7530E-03 4.4890E-06 2.2000E-03 1.2950E-02 1.0440E-02 7.2620E-04

4.6270E-03 6.9960E-03 3.3300E-03 1.5980E-03 3.6710E-03 3.9600E-03 3.1790E-03

4.8630E-04 1.4030E-03 3.5030E-03 4.6700E-03 1.0970E-03 4.0220E-03 6.0540E-03

8.3940E-03 3.5350E-04 3.7050E-03 9.1670E-03 9.5090E-03 1.2000E-04 1.0340E-03

4.1220E-03 8.4190E-03 1.6730E-04 2.3760E-03 6.3080E-03 7.9530E-03 3.8630E-03

3.6790E-03 3.9250E-03 1.6220E-03 5.2060E-03 4.5500E-03 1.0630E-03 3.5770E-03

2.2630E-03 3.7470E-03 3.0530E-03 8.8710E-04 2.6150E-03 1.9040E-03 2.6650E-04

3.8320E-04 1.9230E-03 1.9340E-03 9.6950E-04 3.8890E-03 2.5720E-03 1.2080E-03

5.8910E-04 2.0540E-03 2.0940E-03 1.9570E-03 6.2000E-04 7.6890E-04 2.9960E-03

3.1200E-03 1.3810E-03 1.1320E+01 3.4620E+00 1.3640E+00 2.1530E+00 7.8170E-01

1.8810E-01 4.1360E-02 1.3000E+00 5.1000E-01 1.7450E-01 6.1100E-01 1.3020E-01

3.6210E-02 1.7660E+00 6.1670E-01 1.7110E-01 4.4880E-02 1.8130E+00 5.4590E-01

1.6550E-01 5.1110E-02 1.2860E+00 5.1380E-01 1.6770E-01 5.3690E-02 9.7560E-01

4.3410E-01 1.8790E-01 7.2370E-02 6.7030E-01 2.9160E-01 1.0720E-01 3.3220E-02

6.9190E-03 6.4520E-01 3.2310E-01 1.3790E-01 4.7710E-02 1.2640E-02 2.3860E-03

2.3660E-01 1.0060E-01 2.0450E-02 1.0480E+01 3.2680E-01 9.7800E-02 2.2670E-02

5.1530E+00 7.1780E-01 1.1580E-01 3.2640E-02 3.9410E-01 1.5330E-01 2.4800E-02

1.0390E+00 4.6680E-01 2.3000E-01 1.2850E-01 7.1850E-02 3.2610E-02 1.3740E-02

1.0100E-01 1.4330E-01 8.6060E-02 1.2010E-02 4.1450E+00 4.3700E-01 3.5870E-02

4.3310E-03 2.0620E-01 9.5900E-02 2.3960E-02 2.9700E-03 2.3440E-01 1.6820E-01

3.0680E-02 2.9360E-03 1.9250E+00 4.3250E-02 8.2580E-03 1.2080E-03 8.1950E-01

2.6970E-02 5.8750E-03 1.6680E-03 9.7650E-01 1.3320E-01 1.6110E-02 2.5940E-03

1.4650E+00 1.6900E-01 2.3830E-02 3.6050E-03 3.3760E+00 4.6300E-01 1.9120E-02

3.1010E-03 8.9930E-01 1.1850E-01 2.5320E-02 3.4600E-03 2.7840E-01 1.0110E-01

2.5760E-02 3.1160E-03 3.0660E-02 1.2660E-02 2.4430E-03 3.5220E-01 3.3470E-02

1.1290E-02 2.2660E-03 5.8330E-02 2.0570E-02 6.4490E-03 1.3550E-03 1.3300E-01

1.6000E-02 4.1790E-03 7.8340E-04 7.6420E-02 2.3820E-02 7.0480E-03 1.1620E-03

2.3940E-02 8.7300E-03 5.1640E-03 7.8620E-04 8.8330E-02 8.6230E-03 2.1750E-03

3.6200E-04 1.7620E-01 3.4040E-02 5.5260E-03 9.8220E-04 1.2520E+01 3.3750E+00

9.5050E-01 8.7210E-01 5.8470E-01 1.6030E-01 7.8170E-01 5.6820E-01 2.4130E-01

2.9140E-01 2.6480E-01 6.7440E-02 4.4180E-01 9.1030E-01 5.8360E-01 1.8240E-01

5.4080E-01 9.5120E-01 4.4390E-01 1.5370E-01 4.2190E-01 6.4870E-01 4.3080E-01

1.6580E-01 4.9690E-01 4.7360E-01 2.6580E-01 1.0920E-01 2.4640E-01 3.1870E-01

2.0400E-01 1.0240E-01 4.0700E-02 2.3530E-01 2.4330E-01 2.1790E-01 1.4540E-01

7.0920E-02 2.3120E-02 1.3070E-01 8.6790E-02 6.8390E-02 1.4960E+00 6.9480E+00

2.1870E-01 7.9890E-02 7.1940E-01 3.1960E+00 7.3980E-01 1.1190E-01 2.3680E-01

1.3300E-01 8.8950E-02 4.6670E-01 5.3130E-01 3.4260E-01 1.5030E-01 4.6520E-02

3.3760E-02 1.4400E-02 8.0810E-02 1.0760E-01 3.4520E-02 5.1020E-02 9.8100E-02

2.9490E+00 5.3130E-01 4.1910E-02 6.6860E-02 1.5080E-01 8.9820E-02 2.8210E-02

9.4830E-02 2.9530E-01 1.8170E-01 3.6920E-02 2.5790E-01 1.2810E+00 3.2280E-02

7.7990E-03 1.3950E-01 5.3830E-01 1.9660E-02 4.6490E-03 1.3300E-01 6.1030E-01

1.4120E-01 1.7770E-02 7.1820E-02 9.8360E-01 1.8620E-01 2.7310E-02 3.6560E-01

2.8380E+00 4.3820E-01 2.1110E-02 7.0330E-02 6.2320E-01 1.2450E-01 2.9300E-02

7.3580E-02 1.2900E-01 9.2250E-02 3.0430E-02 1.8930E-02 1.0870E-02 7.0310E-03

6.9270E-02 2.1890E-01 1.8750E-02 9.9400E-03 2.0560E-02 2.8460E-02 1.4580E-02

6.7560E-03 2.9820E-02 7.8620E-02 1.1080E-02 3.6530E-03 1.9560E-02 4.1330E-02

1.9550E-02 7.9680E-03 1.9150E-02 6.4300E-03 2.4940E-03 2.9890E-03 1.8300E-02

5.3350E-02 6.1630E-03 1.9480E-03 3.1300E-02 1.0430E-01 3.2950E-02 6.0110E-03

9.9090E+00 3.3510E-01 7.1840E-01 5.0590E-01 3.7750E-01 4.5380E-01 4.6710E-01

2.7210E-01 1.3120E-01 2.1190E-01 1.2400E-01 7.9160E-02 4.1610E-01 6.1170E-01

4.8920E-01 1.6350E-01 4.4000E-01 6.2920E-01 3.4040E-01 1.1960E-01 3.5930E-01

4.3480E-01 3.5330E-01 2.5530E-01 3.3220E-01 2.8260E-01 1.4470E-01 8.0970E-02

1.7470E-01 2.0880E-01 1.5480E-01 7.3640E-02 4.8030E-02 1.6940E-01 1.6020E-01

1.4050E-01 1.1510E-01 6.7630E-02 5.8930E-02 8.0670E-02 7.4680E-02 2.1020E-01

1.6800E+00 4.5300E+00 1.3720E-01 1.1520E-01 7.3370E-01 2.1420E+00 5.6110E-01

1.2130E-01 1.3330E-01 8.9330E-02 2.2990E-01 3.4260E-01 3.1780E-01 2.2780E-01

2.9600E-02 2.6660E-02 1.4420E-02 6.0620E-02 6.0990E-02 4.7680E-02 3.5990E-02

1.4000E-02 1.0030E-01 2.9430E+00 4.1040E-01 9.8170E-03 6.2000E-02 1.0480E-01

7.6700E-02 1.3250E-03 1.0870E-01 1.9640E-01 1.4990E-01 2.6300E-02 3.0290E-01

8.3330E-01 2.1440E-02 1.5490E-02 1.3420E-01 3.4700E-01 1.2730E-02 1.5980E-02

1.4110E-01 4.1180E-01 1.0820E-01 1.3140E-02 6.3970E-02 7.2650E-01 1.4720E-01

1.8630E-02 4.3650E-01 1.9160E+00 3.2960E-01 1.5870E-02 5.5890E-02 4.6140E-01

1.0170E-01 1.0670E-02 6.7080E-02 8.5930E-02 7.9540E-02 1.0190E-02 1.0550E-02

6.8700E-03 1.8780E-02 6.1830E-02 1.4480E-01 1.2130E-02 6.4460E-03 1.4570E-02

1.9570E-02 1.1700E-02 7.5670E-03 2.6180E-02 5.0610E-02 7.0820E-03 4.8480E-03

1.5590E-02 2.9400E-02 1.6700E-02 1.4360E-02 3.5840E-03 2.9630E-03 2.1120E-03

3.9970E-03 1.7510E-02 3.4270E-02 4.0310E-03 5.5180E-03 3.2920E-02 7.0110E-02

2.5420E-02 9.6880E-02 3.3620E-01 5.3280E-01 3.2620E-01 2.4310E-01 3.1870E-01

2.3580E-01 5.7000E-02 1.1920E-01 1.3390E-01 2.1150E-02 7.4520E-02 3.2790E-01

6.4320E-01 5.0960E-02 1.5310E-01 3.3970E-01 5.0770E-01 3.5570E-02 1.1020E-01

2.8390E-01 4.1240E-01 1.2750E-01 1.8830E-01 2.1360E-01 1.4810E-01 1.8000E-02

7.8880E-02 1.2800E-01 1.4110E-01 9.3220E-02 5.7380E-03 4.3820E-02 1.0950E-01

1.3300E-01 1.1180E-01 6.1950E-02 1.8860E-02 6.5410E-02 5.8440E-02 5.0590E-02

2.2640E-01 1.2760E+00 2.8120E+00 3.2550E-02 1.1190E-01 5.6100E-01 1.6880E+00

4.9810E-02 1.1530E-01 6.4190E-02 1.2850E-01 1.5030E-01 2.2780E-01 2.3880E-01

1.7590E-02 1.7230E-02 1.1880E-02 4.0400E-02 2.5660E-02 5.7360E-02 1.3700E-02

2.2190E-03 1.5060E-02 7.8420E-02 2.2380E+00 2.6150E-04 1.1410E-02 5.0050E-02

1.0570E-01 1.1220E-04 1.4500E-03 8.2710E-02 2.1820E-01 3.5950E-03 3.2020E-02

2.2300E-01 5.2190E-01 3.2950E-03 1.7520E-02 1.0810E-01 2.3310E-01 2.5660E-03

1.7720E-02 1.0810E-01 3.2330E-01 1.5890E-03 1.4450E-02 5.1370E-02 5.6350E-01

2.9890E-03 2.0890E-02 4.1830E-01 1.4950E+00 1.3390E-03 1.8080E-02 4.6400E-02

3.5980E-01 9.4950E-05 1.2530E-02 5.4840E-02 9.4140E-02 4.5710E-03 8.8700E-03

4.9090E-03 5.4350E-03 1.8660E-02 4.7920E-02 8.7500E-02 1.3550E-03 6.7550E-03

1.1690E-02 1.5780E-02 1.9870E-03 7.8120E-03 2.0260E-02 3.1360E-02 4.9260E-04

5.3910E-03 1.2990E-02 2.5760E-02 9.5740E-03 1.6030E-03 3.2160E-03 9.6260E-04

9.6270E-04 4.3370E-03 1.3030E-02 2.1360E-02 9.3630E-04 6.0340E-03 2.5430E-02

5.5620E-02 6.5830E+00 2.1070E+00 8.5730E-01 1.2210E+00 5.5620E-01 8.4070E-02

2.8610E-01 1.1360E-01 2.5860E-02 4.4370E-01 2.3040E-01 1.0190E-01 2.8350E-02

4.0290E-01 2.0230E-01 9.8970E-02 4.4260E-02 4.0700E-01 2.0240E-01 8.9490E-02

3.4010E-02 3.1660E-01 1.7060E-01 9.4310E-02 4.2610E-02 2.1420E+00 8.2820E-01

2.3290E-01 5.1710E-02 1.1520E-02 2.9100E+00 9.5320E-01 2.6810E-01 6.6810E-02

1.8150E-02 6.0490E-03 1.4220E+00 1.9130E-01 1.9990E-02 2.5010E+01 4.2140E+00

7.6330E-02 1.2650E-02 3.5720E+01 4.5100E+00 3.5480E-01 6.7550E-02 1.6120E+01

1.0210E-01 2.9620E-02 9.8170E-02 6.1050E-02 3.2550E-02 1.4200E-02 5.6040E-02

3.4260E-02 1.4980E-02 4.9110E-03 1.7650E-02 4.7170E-03 2.1310E-03 1.0040E-01

4.9730E-02 2.0870E-02 5.3620E-03 1.1500E-02 6.6150E-03 3.2870E-03 1.2660E-03

2.8910E-02 1.6000E-02 7.4310E-03 2.1270E-03 2.1130E-01 4.1860E-02 4.7660E-03

9.5930E-04 2.5390E-01 5.1170E-02 9.5910E-03 3.1200E-03 2.8600E-02 1.1190E-02

4.5680E-03 1.3830E-03 5.1100E-02 2.6640E-02 1.1960E-02 3.9850E-03 2.2390E-01

4.6530E-02 1.1590E-02 2.7730E-03 2.4360E-02 1.1140E-02 4.3570E-03 1.0960E-03

2.4640E-02 1.0850E-02 4.5740E-03 1.5820E-03 1.2350E-01 1.7590E-02 9.2920E-03

3.0260E-02 1.6620E-02 7.0480E-03 2.0890E-03 1.2910E-02 7.8380E-03 4.8250E-03

2.8850E-03 2.3590E-02 1.6550E-02 8.1340E-03 2.7010E-03 4.7210E-03 3.2760E-03

1.9920E-03 9.2560E-04 1.2100E-02 1.5960E-02 2.4610E-03 1.2810E-03 6.2940E-03

3.3370E-03 1.6990E-03 7.1800E-04 1.6750E-02 3.7820E-03 1.1650E-03 4.3100E-04

6.4420E+00 1.3340E+00 7.0620E-01 3.4330E-01 3.4450E-01 1.5350E-01 1.0260E-01

6.3750E-02 1.5490E-01 1.8380E-01 1.5490E-01 1.1210E-01 1.7060E-01 1.8530E-01

1.2900E-01 7.8020E-02 1.4320E-01 1.8860E-01 1.4220E-01 8.7630E-02 1.5950E-01

1.8110E-01 9.8410E-02 4.0750E-02 4.3920E-01 1.0180E+00 7.2590E-01 3.0740E-01

6.5660E-02 7.4280E-02 1.5010E+00 1.0220E+00 4.2810E-01 1.2080E-01 2.1720E-02

3.3710E-01 7.4110E-01 1.4660E-01 4.1870E+00 1.2520E+01 5.1700E+00 7.6790E-02

3.4790E-01 2.4420E+01 5.4200E+00 4.0880E-01 3.7180E+00 8.4120E+00 5.3770E-02

5.4570E-02 3.9460E-02 3.3770E-02 2.6230E-02 3.9800E-02 2.4980E-02 1.4370E-02

3.7250E-03 7.1790E-03 8.5990E-03 1.9600E-03 3.6430E-02 4.0760E-02 3.2010E-02

2.3160E-02 4.8380E-03 4.6360E-03 4.1210E-03 3.4130E-03 1.0420E-02 1.1580E-02

1.0370E-02 8.3980E-03 4.4480E-02 1.0740E-01 4.5660E-02 4.4380E-03 5.3440E-02

1.2310E-01 4.6970E-02 6.7460E-03 8.7800E-03 1.3270E-02 7.7070E-03 4.5990E-03

1.9990E-02 2.1460E-02 1.6930E-02 1.2330E-02 2.2780E-02 1.4360E-01 4.2530E-02

1.2480E-02 8.0460E-03 1.0340E-02 7.7570E-03 5.0350E-03 6.5460E-03 1.1280E-02

7.8630E-03 4.8570E-03 4.1310E-02 6.4990E-02 6.2010E-03 1.6610E-02 1.0920E-02

8.8630E-03 5.5700E-03 6.9280E-03 6.6950E-03 4.8410E-03 2.8870E-03 1.6550E-02

8.2270E-03 7.9090E-03 5.5620E-03 2.7750E-03 1.8940E-03 1.7210E-03 1.6920E-03

9.0760E-03 5.5630E-03 8.3550E-03 8.8710E-04 3.3360E-03 2.6740E-03 1.8570E-03

8.8490E-04 1.8170E-03 8.0340E-03 3.7570E-03 1.0340E-03 4.1060E+00 3.0340E-01

3.8220E-01 2.4520E-01 6.9010E-02 8.7700E-02 5.6380E-02 3.6580E-02 9.7990E-02

1.3270E-01 1.3450E-01 7.0350E-02 1.0280E-01 1.1710E-01 8.5560E-02 4.4620E-02

9.4840E-02 1.2510E-01 1.1180E-01 8.9630E-02 9.8410E-02 9.1230E-02 4.3580E-02

4.6050E-02 4.3220E-01 5.2750E-01 4.5690E-01 2.6440E-01 2.2860E-02 4.6630E-02

6.9760E-01 7.5820E-01 4.3910E-01 1.4530E-01 4.9420E-02 3.6620E-01 3.9850E-01

7.5640E-02 5.1640E+00 5.8470E+00 3.6660E+00 8.9480E-02 3.0170E-01 1.5850E+01

4.2190E+00 4.6860E-01 4.3020E+00 3.3470E+00 2.3710E-02 2.9660E-02 2.7640E-02

2.1750E-02 2.4620E-02 1.8500E-02 9.8250E-03 2.4550E-03 3.6040E-03 5.1140E-03

3.4050E-03 9.4000E-03 2.1960E-02 2.9990E-02 2.6670E-02 1.4640E-03 2.8440E-03

3.4800E-03 3.5230E-03 2.4490E-03 6.3990E-03 8.8490E-03 9.5200E-03 4.7260E-03

4.5610E-02 4.9500E-02 3.1150E-02 9.5470E-03 4.6860E-02 6.0170E-02 3.6970E-02

2.9470E-03 5.5110E-03 8.9820E-03 5.6750E-03 6.0190E-03 1.1830E-02 1.5570E-02

1.3540E-02 6.4280E-03 1.4390E-02 9.0340E-02 3.2130E-02 1.8820E-03 5.0430E-03

7.5500E-03 6.4080E-03 1.8420E-03 4.1370E-03 7.8350E-03 6.6290E-03 1.5920E-02

3.4930E-02 2.4370E-02 7.0470E-03 8.8620E-03 7.7210E-03 4.3190E-03 3.8060E-03

4.0040E-03 3.6860E-03 2.6960E-03 8.1340E-03 7.9080E-03 6.1260E-03 3.3280E-03

1.1960E-03 1.3960E-03 1.4330E-03 1.2510E-03 6.0510E-03 2.4030E-03 4.7680E-03

2.9910E-03 1.7000E-03 1.8570E-03 1.4720E-03 8.1110E-04 7.3680E-04 1.0380E-03

5.5330E-03 2.1900E-03 8.7140E-02 2.7400E-01 1.0360E-01 2.3220E-02 5.1880E-02

3.1000E-02 1.8220E-03 3.8130E-02 6.9670E-02 9.0490E-02 2.3760E-02 4.5920E-02

5.7660E-02 6.0090E-02 9.9600E-03 3.5720E-02 6.1500E-02 8.0300E-02 4.2580E-02

4.0750E-02 4.3580E-02 3.5320E-02 1.1980E-02 3.5160E-02 2.5140E-01 3.3570E-01

2.2790E-01 7.8100E-03 1.3140E-02 2.4030E-02 2.5480E-01 4.2690E-01 3.2650E-01

6.3010E-03 6.2290E-02 3.3660E-01 1.2250E-02 7.6090E-02 3.6650E+00 3.6150E+00

3.9420E-02 4.3110E-02 1.9460E-01 9.9210E+00 2.3940E-02 7.0680E-01 3.3210E+00

7.4090E-03 1.6550E-02 1.6140E-02 1.1190E-02 1.1520E-02 1.0150E-02 4.7730E-03

1.2280E-03 1.6370E-03 1.6890E-03 2.6380E-03 5.5750E-04 9.8820E-03 1.5180E-02

1.8210E-02 2.2400E-04 1.3240E-03 1.9590E-03 2.1520E-03 6.4790E-06 2.6700E-03

4.7710E-03 6.1320E-03 9.5800E-04 4.4350E-03 3.1140E-02 3.0350E-02 3.1130E-03

6.7330E-03 3.6960E-02 3.4080E-02 5.5020E-04 2.6530E-03 3.3970E-03 4.9160E-03

8.3580E-04 5.3990E-03 7.7520E-03 9.0740E-03 9.3180E-04 6.1830E-03 9.2260E-03

5.7760E-02 1.1740E-04 1.9460E-03 3.4850E-03 4.9700E-03 2.6010E-04 1.6370E-03

2.8630E-03 5.5230E-03 6.9000E-03 8.0180E-03 2.3050E-02 2.0890E-03 5.5700E-03

4.3190E-03 2.1780E-03 1.7490E-03 1.7870E-03 1.8590E-03 1.6950E-03 2.7020E-03

5.5620E-03 3.3280E-03 1.1380E-03 3.3250E-04 8.8650E-04 8.0910E-04 6.5170E-04

3.0250E-03 9.5390E-04 1.5380E-03 2.3930E-03 7.1800E-04 8.8490E-04 8.1100E-04

4.2350E-04 2.1010E-04 5.2840E-04 5.8340E-04 2.8100E-03 1.0140E+00 4.1090E-01

3.6170E+00 2.6470E-01 7.9050E-02 1.7700E-01 9.7080E-02 5.0780E-02 2.5680E-02

6.4060E-01 3.0590E-01 1.3870E-01 6.0900E-02 1.8060E-01 1.1780E-01 6.9720E-02

3.6870E-02 6.2810E-01 3.9050E-01 1.8930E-01 6.6420E-02 2.7240E-01 1.8810E-01

1.0760E-01 5.2710E-02 1.9940E-02 2.6510E-01 2.0960E-01 1.3960E-01 7.8550E-02

3.6410E-02 1.2610E-02 2.3580E-01 1.4300E-01 4.5930E-02 3.1210E+00 8.5370E-01

1.9160E-01 5.0840E-02 5.4670E-01 4.2730E-01 2.3240E-01 8.3760E-02 6.7040E+00

2.9120E+00 4.4000E-02 3.4080E-01 1.5200E-01 6.2220E-02 2.5660E-02 3.1650E-01

1.7050E-01 9.3390E-02 6.1190E-01 6.5000E-01 3.4580E-01 2.0770E-02 1.3780E-01

6.1940E-02 2.4590E-02 9.0940E-03 2.0610E-02 1.1440E-02 5.6430E-03 2.2710E-03

3.3410E-02 1.6470E-02 6.9790E-03 2.1650E-03 9.6880E-01 3.0620E-01 5.8240E-02

7.9650E-03 1.5760E+00 3.7400E-01 5.4930E-02 5.6550E-03 6.7650E-02 2.9330E-02

1.0920E-02 3.4010E-03 1.1710E-01 5.5130E-02 2.3090E-02 8.1980E-03 3.7220E-02

2.3200E-02 1.3320E-02 6.0810E-03 1.0320E-02 5.8930E-03 3.2890E-03 1.8160E-03

6.9070E-03 3.8390E-03 1.8430E-03 7.0490E-04 1.4610E+00 6.3750E-01 1.4720E-02

8.0400E-01 2.4540E-01 4.1450E-02 9.5130E-03 1.2470E-01 1.0040E-01 5.8980E-02

2.5660E-02 9.8590E-01 2.6200E-01 6.4010E-02 1.7700E-02 1.8350E-01 8.2090E-02

3.2390E-02 9.6150E-03 5.8320E-01 1.9890E-01 1.0030E-01 1.5550E-02 2.7000E-01

9.7240E-02 4.4100E-02 2.1480E-02 6.4540E-02 2.8940E-02 1.1070E-02 3.2390E-03

4.5590E-01 2.6460E-01 2.2290E+00 1.4950E-01 3.4410E-02 7.8510E-02 7.2270E-02

4.8780E-02 1.3180E-01 2.9000E-01 2.2650E-01 1.2070E-01 7.2290E-02 6.9490E-02

6.8110E-02 6.1360E-02 3.0710E-01 2.1630E-01 2.0560E-01 1.3350E-01 1.1740E-01

9.9480E-02 9.4030E-02 7.8100E-02 4.4310E-02 1.5600E-01 6.4720E-02 6.4280E-02

8.1340E-02 7.9300E-02 4.8330E-02 1.2140E-01 5.3960E-02 1.0720E-01 1.8540E-01

1.5950E+00 8.5390E-01 1.8490E-01 3.5010E-01 8.9350E-02 1.7460E-01 2.4560E-01

2.9050E+00 8.8280E-01 2.6460E+00 5.8540E-02 1.4730E-01 1.1740E-01 6.2980E-02

1.7030E-01 1.7190E-01 4.5420E-02 3.9220E-01 2.9820E-01 1.1250E-01 3.1860E-01

1.4570E-02 5.9810E-02 5.2160E-02 2.9150E-02 4.3300E-03 7.7910E-03 7.8970E-03

6.5480E-03 2.8760E-03 1.3560E-02 1.3730E-02 9.1440E-03 3.3300E-02 5.1380E-01

2.8540E-01 6.4920E-02 2.4090E-02 8.1990E-01 4.1170E-01 9.1360E-02 9.9860E-03

2.8120E-02 2.2900E-02 1.2520E-02 1.6540E-02 4.8560E-02 4.3700E-02 2.7160E-02

1.4930E-02 1.3230E-02 1.3060E-02 1.0230E-02 2.6630E-03 5.0020E-03 4.2140E-03

2.4810E-03 1.2510E-03 2.8100E-03 2.6900E-03 2.1330E-03 6.3570E-01 2.0150E-01

5.7170E-01 3.5240E-02 3.9790E-01 2.1890E-01 4.3740E-02 8.2260E-02 2.8310E-02

4.1730E-02 5.2500E-02 4.3080E-02 5.2240E-01 2.6840E-01 4.8090E-02 1.6520E-02

7.8120E-02 6.8760E-02 3.9300E-02 3.8870E-01 1.0010E-01 3.6380E-02 7.5190E-02

4.7630E-02 1.4940E-01 7.7100E-02 1.6430E-02 1.1630E-02 2.5500E-02 2.1690E-02

1.3210E-02 7.8900E-02 1.4950E-01 1.0890E+00 1.0050E-02 1.8820E-02 3.6050E-02

5.0740E-02 3.9390E-02 6.7890E-02 1.2900E-01 1.4540E-01 1.7140E-02 3.8480E-02

4.2870E-02 3.7230E-02 7.3490E-02 1.7080E-01 1.2520E-01 5.7380E-02 2.3030E-02

6.4720E-02 6.2710E-02 4.4680E-02 2.2340E-02 2.4860E-03 7.8940E-02 7.8910E-02

5.2130E-02 2.5520E-02 8.8430E-03 2.0350E-02 8.5890E-02 3.5350E-02 6.2660E-02

9.1200E-02 6.4620E-01 6.1030E-01 2.4350E-02 2.2030E-01 1.4590E-01 3.9170E-02

4.2720E-02 2.6450E+00 5.3290E-01 1.3350E-02 3.1940E-02 6.9000E-02 7.8930E-02

9.3220E-02 4.5420E-02 5.3220E-02 2.0200E-01 2.0690E-02 2.9530E-01 6.3710E-02

3.2080E-03 8.0480E-03 2.6800E-02 3.9830E-02 4.2820E-04 2.5210E-03 4.5910E-03

5.7480E-03 6.3650E-05 1.7190E-03 6.5080E-03 1.1330E-02 7.5700E-03 1.9970E-02

2.4580E-01 2.7050E-01 6.6040E-03 1.3240E-02 4.1250E-01 3.2310E-01 1.3680E-03

6.0820E-03 1.3810E-02 1.5610E-02 2.1980E-03 9.4920E-03 2.3730E-02 3.2710E-02

3.7970E-03 7.8070E-03 8.1350E-03 5.4950E-03 9.8010E-04 1.2010E-03 2.0680E-03

2.5250E-03 1.0400E-04 7.6580E-04 1.5430E-03 2.2010E-03 1.4450E-02 5.7110E-01

1.1820E-01 1.1710E-02 1.7330E-02 1.6040E-01 2.0270E-01 1.2830E-02 4.8040E-02

3.2080E-02 9.4750E-03 2.3920E-02 1.4200E-02 2.0210E-01 1.9730E-01 1.9190E-03

8.2590E-03 3.5990E-02 5.2840E-02 1.9420E-01 1.5460E-02 7.5180E-02 1.5610E-02

2.9630E-02 1.3430E-02 5.2820E-02 4.9160E-02 9.3650E-04 7.1920E-03 1.3470E-02

1.4390E-02 3.2930E+00 5.4530E-01 4.4680E-01 2.3650E-01 1.2680E-01 6.5320E-02

6.2570E-01 4.2950E-01 3.0090E-01 1.9430E-01 3.4720E-01 2.2760E-01 1.3430E-01

6.9190E-02 5.0920E-01 3.6070E-01 2.2560E-01 9.1320E-02 8.9830E-02 5.7390E-02

3.2490E-02 1.6900E-02 6.9500E-03 1.0940E-01 6.3100E-02 3.4230E-02 1.7250E-02

7.8480E-03 2.8710E-03 4.8280E-02 3.3350E-02 1.4980E-02 3.5440E-01 1.5530E-01

6.4120E-02 2.3620E-02 1.4870E-01 9.3230E-02 5.0710E-02 2.3170E-02 3.4650E-01

1.6970E-01 1.6020E-02 1.9060E-01 9.8540E-02 4.9780E-02 2.4320E-02 2.2860E-01

2.0960E-01 1.3150E-01 6.8610E+00 1.1820E+01 5.1020E+00 1.5270E-01 4.2770E-02

2.3160E-02 1.3010E-02 7.6330E-03 1.6740E-02 9.1020E-03 4.3370E-03 1.5950E-03

3.2150E-02 1.6490E-02 7.3270E-03 2.3800E-03 2.1660E+01 5.1840E+00 7.2420E-01

2.8570E-02 6.4880E-02 3.1300E-02 2.0550E-02 1.2100E-02 2.9960E-02 1.8010E-02

1.1090E-02 6.4360E-03 2.5830E-02 1.9150E-02 1.5230E-02 1.2660E-02 2.3880E-02

1.4640E-02 7.4920E-03 3.1390E-03 9.3240E-03 5.8480E-03 3.5640E-03 1.7710E-03

1.2750E-02 8.5470E-03 4.9320E-03 2.2350E-03 3.8120E-01 1.4280E-01 4.6330E-03

2.9750E-02 1.6620E-02 1.0140E-02 5.1940E-03 2.4290E-02 1.8380E-02 1.1850E-02

7.2180E-03 1.4530E-01 3.4950E-02 1.1600E-02 4.3700E-03 2.1220E-02 1.0260E-02

4.6400E-03 1.9240E-03 7.7290E-02 5.0610E-02 2.8380E-02 3.9830E-03 2.8460E-02

1.1720E-02 6.6280E-03 3.3350E-03 8.9920E-03 5.1710E-03 2.4850E-03 9.0380E-04

2.3810E+00 9.2620E-02 1.9110E-01 1.8160E-01 1.2290E-01 3.0800E-01 3.5400E-01

2.4810E-01 1.3000E-01 1.3710E-01 1.3440E-01 1.3240E-01 1.2110E-01 3.0170E-01

2.3600E-01 1.7670E-01 9.7150E-02 3.4530E-02 3.6370E-02 3.1880E-02 2.3290E-02

1.2080E-02 2.1650E-02 3.8230E-02 3.7760E-02 2.9770E-02 1.9520E-02 9.4310E-03

2.9180E-02 1.4040E-02 2.1170E-02 9.0840E-02 1.6250E-01 1.0920E-01 4.3770E-02

6.3470E-02 5.2290E-02 5.1180E-02 4.3810E-02 1.5330E-01 5.2070E-02 1.3820E-01

5.1800E-02 8.4150E-02 6.7740E-02 3.9930E-02 2.0930E-01 1.3400E-01 3.6590E-02

4.5690E+00 5.0880E+00 2.0230E+00 5.6240E+00 1.0360E-02 2.0760E-02 1.7040E-02

9.9480E-03 3.3150E-03 6.2400E-03 6.3950E-03 5.2330E-03 3.7440E-03 1.2680E-02

1.3000E-02 9.4890E-03 3.2750E-01 1.3780E+01 5.8360E+00 1.0940E+00 2.3240E-02

3.4380E-02 1.9690E-02 5.3130E-03 1.1470E-02 1.4990E-02 1.1320E-02 6.5200E-03

1.3760E-02 1.6030E-02 1.1880E-02 6.5220E-03 9.5680E-03 7.9110E-03 8.0680E-03

7.0420E-03 3.1620E-03 4.2090E-03 3.6250E-03 2.6370E-03 4.9360E-03 4.0850E-03

4.6590E-03 5.2930E-03 1.3390E-01 4.2310E-02 1.1610E-01 1.2650E-02 1.6950E-02

9.3190E-03 3.2930E-03 1.3910E-02 1.0660E-02 8.8530E-03 7.0650E-03 1.0050E-02

5.7830E-02 3.3970E-02 9.5590E-03 3.3550E-03 9.1470E-03 8.0500E-03 4.8680E-03

4.0690E-02 2.8310E-02 1.2220E-02 1.7770E-02 7.8470E-03 1.6500E-02 9.0180E-03

2.5480E-03 3.1830E-03 2.8930E-03 2.9510E-03 2.5390E-03 2.5320E-02 4.7740E-02

8.9050E-02 1.2710E-01 1.6050E-01 1.1900E-01 1.1850E-01 1.1070E-01 2.9440E-02

7.3820E-02 8.3570E-02 7.3290E-02 1.1200E-01 1.3270E-01 9.9150E-02 5.0820E-02

9.2050E-03 1.7130E-02 1.8640E-02 1.5270E-02 8.4190E-03 2.7580E-03 1.0480E-02

1.7440E-02 2.0150E-02 1.7220E-02 9.8810E-03 8.4290E-03 1.7010E-02 6.7440E-03

2.8500E-02 4.6130E-02 7.3420E-02 5.7060E-02 1.3460E-02 3.5060E-02 3.3480E-02

2.3270E-02 1.4130E-02 1.2960E-01 2.8630E-02 1.7030E-02 2.5650E-02 3.9290E-02

4.0450E-02 1.3260E-01 3.6570E-02 2.0810E-02 2.2810E+00 1.4340E-01 4.5860E+00

1.0060E+00 4.4610E-03 4.5690E-03 8.4750E-03 1.1130E-02 1.3570E-04 1.9900E-03

3.7130E-03 4.7260E-03 3.9230E-05 2.2610E-03 6.5840E-03 1.0590E-02 6.4610E-03

2.3850E-01 5.5690E+00 5.4630E+00 1.6690E-02 6.5580E-03 1.1820E-02 9.8420E-03

5.1100E-03 4.8090E-03 5.9360E-03 5.6070E-03 8.6530E-03 4.9780E-03 5.0490E-03

5.4570E-03 1.5990E-03 5.5540E-03 5.4430E-03 3.7360E-03 7.0940E-04 1.6200E-03

1.9760E-03 2.0590E-03 4.0090E-04 2.8930E-03 3.3440E-03 2.8210E-03 4.3320E-03

1.1830E-01 2.4380E-02 7.0580E-03 4.0250E-03 5.3190E-03 4.6370E-03 5.5370E-03

7.1720E-03 5.0250E-03 2.7200E-03 5.7550E-03 3.8580E-03 2.5590E-02 2.4510E-02

6.4630E-04 1.7690E-03 4.2570E-03 5.8510E-03 1.9810E-02 3.9500E-03 1.7750E-02

4.5090E-03 4.5550E-03 2.5040E-03 5.4950E-03 4.4820E-03 3.6920E-04 1.9280E-03

2.0080E-03 1.4940E-03 9.0520E+00 5.2630E-01 8.3490E-02 3.2640E+00 8.1670E-01

1.2150E-01 1.8250E-02 3.4230E+00 1.0480E+00 2.7590E-01 3.4840E-02 7.2810E-01

4.4220E-01 1.0360E-01 2.2540E-02 2.0760E-01 9.7750E-02 3.8080E-02 1.0960E-02

1.4240E-03 2.2660E-01 1.0430E-01 4.1270E-02 1.3240E-02 3.1020E-03 3.8310E-04

1.6020E-01 5.5880E-02 7.8740E-03 2.4130E-01 6.8260E-02 1.7340E-02 3.2450E-03

2.8230E-01 9.4970E-02 2.4370E-02 4.4430E-03 6.9280E-02 2.6870E-02 3.3950E-03

1.0810E+00 2.7960E-01 1.4900E-01 3.0480E-02 1.4000E-01 2.2870E-02 2.9860E-03

8.6150E-03 1.4810E-02 8.5640E-03 1.1150E-03 1.9730E+01 7.2670E-01 1.5730E-02

9.5260E-04 3.2080E+01 2.6220E+00 7.5070E-02 1.0930E-03 4.3790E+01 3.2590E+00

1.1030E-01 2.7590E-03 1.8940E-02 4.7810E-03 9.4940E-04 1.2420E-04 3.6500E-02

7.8840E-03 6.5920E-04 7.4820E-05 4.7150E-02 1.5960E-02 3.4580E-03 1.8100E-04

7.2640E+00 2.2210E-01 6.6710E-03 2.0770E-03 1.2830E-01 3.9320E-02 9.1910E-03

1.2260E-03 7.6560E-01 8.4060E-02 1.7800E-02 3.2990E-03 2.3590E+00 2.1380E-01

2.3630E-02 3.2960E-03 8.4140E-03 8.2700E-04 4.1320E-05 2.0690E-02 5.3290E-03

7.5190E-04 5.6040E-05 3.0130E-02 6.4530E-03 1.3900E-03 1.7510E-04 3.9100E-02

7.0070E-03 7.2720E-04 1.4110E-04 2.7760E-01 1.7490E-02 2.5150E-03 3.0410E-04

3.8310E-03 3.8290E-03 1.9160E-03 4.3920E-04 2.5120E-02 4.4190E-03 1.0680E-03

2.1680E-05 4.5080E-02 9.4240E-03 1.5270E-03 1.7470E-04 1.2800E+01 6.0270E-01

1.1330E+00 1.6270E+00 7.7090E-01 1.2770E-01 1.1390E+00 2.0330E+00 1.1180E+00

3.0340E-01 6.3850E-01 6.5100E-01 3.2110E-01 8.4460E-02 1.0580E-01 9.6790E-02

6.1260E-02 3.3930E-02 1.5270E-02 9.1300E-02 9.6250E-02 7.4740E-02 4.4240E-02

1.9870E-02 6.0740E-03 9.1800E-02 6.2860E-02 3.7290E-02 1.1160E-01 1.0980E-01

4.6630E-02 1.4840E-02 1.2050E-01 1.2840E-01 7.4470E-02 2.4820E-02 4.6700E-02

2.3460E-02 1.5380E-02 3.8780E-01 7.4190E-01 4.5710E-01 1.4900E-01 7.3000E-02

5.6560E-02 1.2860E-02 7.3840E-03 1.1740E-02 4.2510E-03 4.9400E-03 1.9390E+00

1.4460E+01 9.0610E-01 1.7090E-02 2.5260E+00 3.3600E+01 3.2300E+00 8.8350E-02

2.6390E-01 4.1180E+01 4.2590E+00 1.2900E-01 8.2330E-03 8.6090E-03 3.4320E-03

8.7790E-04 1.4320E-02 1.5980E-02 7.1880E-03 6.3840E-04 2.0090E-02 1.9740E-02

1.2980E-02 3.9860E-03 5.6530E-01 5.4230E+00 2.7090E-01 7.2560E-03 5.1260E-02

5.9470E-02 3.2300E-02 9.9920E-03 1.1240E-01 5.3870E-01 7.6910E-02 1.8780E-02

2.1620E-01 1.7720E+00 2.4300E-01 2.5950E-02 4.0650E-03 3.4270E-03 4.9630E-04

8.6900E-03 7.6730E-03 4.3610E-03 7.5550E-04 8.9690E-03 1.3430E-02 5.7950E-03

1.5030E-03 1.5120E-02 2.0350E-02 6.1550E-03 6.5570E-04 3.6950E-02 1.9310E-01

1.7930E-02 2.7900E-03 3.2840E-03 2.9130E-03 1.4130E-03 1.0190E-03 8.0460E-03

1.4790E-02 2.1980E-03 1.1050E-03 1.3900E-02 2.3850E-02 9.3200E-03 1.6600E-03

1.1510E+01 2.8730E-01 1.0630E+00 1.0810E+00 6.1370E-01 3.1500E-01 1.2070E+00

1.5530E+00 9.6620E-01 2.7590E-01 5.3670E-01 4.1890E-01 2.1880E-01 4.5670E-02

6.8280E-02 7.1260E-02 5.1850E-02 2.5330E-02 2.6890E-02 6.5640E-02 6.7660E-02

5.6300E-02 3.9990E-02 2.0700E-02 4.5080E-02 6.1510E-02 5.3400E-02 4.6840E-02

8.3260E-02 7.3390E-02 3.1830E-02 4.2610E-02 9.5930E-02 8.9950E-02 6.1960E-02

2.7430E-02 2.5840E-02 1.7910E-02 1.4710E-01 4.2060E-01 8.4760E-01 3.7760E-01

3.4480E-02 5.5130E-02 2.9230E-02 6.1530E-03 7.7530E-03 5.2520E-03 4.4290E-03

9.2780E-02 2.4830E+00 1.1240E+01 6.9270E-01 3.5930E-02 3.1680E+00 1.9280E+01

2.4890E+00 6.3950E-03 8.6590E-01 3.6810E+01 3.3200E+00 3.1070E-03 6.5240E-03

5.8720E-03 2.4050E-03 4.5260E-03 1.3010E-02 8.9440E-03 5.0580E-03 6.3630E-03

1.6250E-02 1.3300E-02 1.0940E-02 2.9090E-02 7.0900E-01 4.2690E+00 2.0830E-01

1.7200E-02 4.1630E-02 4.1740E-02 2.7050E-02 2.4070E-02 1.1170E-01 4.2260E-01

6.5540E-02 2.3610E-02 2.3870E-01 1.4240E+00 1.9420E-01 1.7740E-03 3.3110E-03

1.6810E-03 3.1370E-03 7.5730E-03 5.3260E-03 3.0860E-03 2.9260E-03 8.2220E-03

1.0290E-02 4.7280E-03 4.3380E-03 1.3210E-02 1.2880E-02 4.2900E-03 3.9870E-03

3.9720E-02 1.4990E-01 1.4700E-02 2.7370E-03 1.8920E-03 1.4900E-03 1.0310E-03

3.4170E-03 7.5110E-03 9.9650E-03 1.5980E-03 3.5800E-03 1.3860E-02 1.6420E-02

7.4970E-03 5.3900E-02 3.2800E-01 9.0790E-01 1.1580E+00 5.4150E-02 4.0520E-01

1.1170E+00 1.7460E+00 1.0100E-01 3.0570E-01 4.4600E-01 3.1880E-01 1.1970E-02

4.5220E-02 6.0430E-02 5.6980E-02 3.4590E-02 4.4170E-03 2.4390E-02 4.8760E-02

5.9980E-02 5.2910E-02 3.0580E-02 1.5740E-02 5.4340E-02 5.7770E-02 1.5980E-02

4.9310E-02 6.9280E-02 5.3190E-02 1.0810E-02 4.5450E-02 8.4660E-02 9.1060E-02

1.3270E-02 2.8190E-02 1.5460E-02 6.9820E-02 2.7960E-01 5.7480E-01 7.9660E-01

1.3980E-02 3.9500E-02 4.1540E-02 4.9230E-03 4.1310E-03 7.5460E-03 2.3930E-03

6.8390E-03 1.1340E-01 2.2140E+00 1.5380E+01 1.0890E-03 8.8340E-02 2.4520E+00

1.7530E+01 1.1760E-03 1.7470E-02 1.3030E+00 3.3290E+01 8.8890E-04 3.4610E-03

5.5020E-03 4.3150E-03 9.5190E-04 5.4500E-03 1.0940E-02 8.3510E-03 1.1080E-03

7.3250E-03 1.4580E-02 1.5060E-02 2.0640E-03 3.5620E-02 5.4960E-01 3.4830E+00

3.7560E-03 1.9200E-02 3.7890E-02 4.2010E-02 4.7610E-03 2.6100E-02 9.3990E-02

3.8830E-01 3.2920E-03 2.5940E-02 2.0510E-01 1.2870E+00 5.3580E-04 2.1740E-03

2.6350E-03 7.4590E-04 3.6170E-03 6.6890E-03 4.4230E-03 5.4280E-04 3.3160E-03

7.0730E-03 1.0440E-02 1.0020E-03 5.3660E-03 1.0940E-02 1.0320E-02 5.0400E-04

4.6470E-03 3.2610E-02 1.3460E-01 2.1900E-03 1.1210E-03 1.6200E-03 7.4090E-04

8.7610E-04 3.8360E-03 6.3330E-03 7.3020E-03 6.0580E-04 3.8940E-03 1.1740E-02

1.6250E-02 6.7950E+00 3.6160E-01 8.5210E-02 1.6860E+00 6.7110E-01 2.0410E-01

4.8360E-02 1.9050E+00 8.1210E-01 2.3430E-01 5.0880E-02 1.3080E-01 6.7340E-02

3.4210E-02 1.7970E-02 8.0910E-03 2.1010E-01 1.2470E-01 7.3050E-02 3.9400E-02

1.8440E-02 6.6610E-03 1.3350E-01 6.8460E-02 1.8270E-02 6.8930E-01 1.1230E-01

3.3620E-02 1.1170E-02 3.7730E-01 1.2890E-01 4.7740E-02 1.6710E-02 1.3940E-01

6.3690E-02 1.2120E-02 8.3640E-01 5.4240E-01 1.8030E-01 6.3560E-02 1.8230E-01

8.1250E-02 3.3780E-02 1.1620E-01 1.3670E-01 7.0370E-02 3.0760E-02 9.3820E+00

9.5930E-01 6.9130E-02 5.4640E-03 2.4010E-01 1.2560E-01 3.0820E-02 4.4410E-03

3.3920E-01 1.2860E-01 3.7710E-02 4.0410E-03 1.9740E-01 2.6100E-02 1.6690E-02

8.6340E-03 1.9320E+01 4.4730E-01 1.2710E-02 6.7780E-04 2.4440E+01 2.8210E+00

1.2520E-01 9.0350E-04 2.7050E+01 2.6740E+00 1.5110E-01 5.5590E-03 9.3880E-01

1.3790E-01 9.7140E-03 1.3090E-03 8.1270E-01 1.1310E-01 1.4760E-02 2.7530E-03

6.2020E-02 2.9550E-02 1.0750E-02 2.1470E-03 4.1160E-02 1.1130E-02 1.8070E-03

8.3710E-01 4.7280E-02 6.7990E-03 1.8120E-03 4.2290E-01 6.8330E-02 1.0310E-02

2.2330E-03 5.4870E-02 1.5010E-02 4.2440E-03 1.1110E-03 8.1490E-02 2.7800E-02

6.8830E-03 1.8940E-03 9.8960E-03 7.9070E-03 4.7710E-03 1.9120E-03 2.5270E-02

9.6760E-03 4.2510E-03 1.2450E-03 6.5960E-02 3.3010E-02 7.1770E-03 2.5700E-03

8.1860E+00 3.7150E-01 5.2190E-01 8.7980E-01 5.7100E-01 2.1790E-01 9.1460E-01

8.9460E-01 5.4540E-01 1.9800E-01 6.1270E-02 6.5980E-02 4.6860E-02 2.5130E-02

9.6850E-03 1.0230E-01 1.0010E-01 7.1490E-02 4.9980E-02 3.4920E-02 1.8980E-02

8.2770E-02 4.8110E-02 4.5280E-02 1.8010E-01 3.9030E-01 8.2530E-02 2.2450E-02

1.2850E-01 1.9350E-01 9.3120E-02 4.2350E-02 9.0480E-02 4.5720E-02 3.6020E-02

5.4230E-01 4.4340E-01 4.2380E-01 1.5910E-01 1.1690E-01 8.6050E-02 3.5620E-02

9.2930E-02 9.3970E-02 6.4700E-02 3.0510E-02 3.2570E-01 6.8780E+00 1.2010E+00

8.5570E-02 9.1230E-02 1.7310E-01 1.1810E-01 3.5900E-02 6.9910E-02 3.7320E-01

2.1330E-01 4.5000E-02 4.3660E-02 1.3420E-01 1.5280E-02 6.1310E-03 2.6580E+00

1.2660E+01 4.4980E-01 7.3780E-03 2.8000E+00 1.5530E+01 3.3760E+00 1.4940E-01

6.7450E-01 1.9730E+01 3.7000E+00 1.8970E-01 1.3350E-01 5.8730E-01 1.4340E-01

1.0500E-02 3.7730E-02 6.1760E-01 1.1920E-01 1.6310E-02 2.4190E-02 2.5450E-02

2.1910E-02 1.2040E-02 2.0920E-02 1.5610E-02 6.3160E-03 1.5210E-01 5.0770E-01

4.1510E-02 5.3040E-03 6.7690E-02 2.4850E-01 6.9740E-02 1.0620E-02 1.8960E-02

2.4830E-02 1.0510E-02 3.4940E-03 1.7640E-02 4.5420E-02 2.3650E-02 7.1800E-03

7.9160E-03 5.9640E-03 3.5070E-03 2.1270E-03 1.0860E-02 1.1220E-02 7.2690E-03

2.6620E-03 2.1890E-02 3.5740E-02 3.3380E-02 6.4370E-03 6.1510E+00 1.3380E-01

4.7900E-01 5.9400E-01 4.7900E-01 3.7040E-01 6.8300E-01 5.6030E-01 3.4440E-01

3.0460E-02 4.3120E-02 3.9530E-02 2.9080E-02 1.5320E-02 4.9700E-02 5.1630E-02

6.6360E-02 5.9370E-02 3.8690E-02 1.7450E-02 4.1810E-02 4.7030E-02 4.3280E-02

5.5450E-02 1.5750E-01 2.4180E-01 5.0790E-02 4.7730E-02 9.2860E-02 1.3230E-01

7.0740E-02 4.9490E-02 4.7580E-02 3.2110E-02 1.8020E-01 4.2380E-01 4.5880E-01

3.2060E-01 7.4250E-02 6.7660E-02 3.7120E-02 6.9710E-02 6.3000E-02 5.1610E-02

2.8100E-02 1.3500E-02 3.8720E-01 5.0520E+00 9.2840E-01 1.2180E-02 8.6830E-02

1.1420E-01 1.0040E-01 3.5900E-03 1.2150E-01 2.5390E-01 1.7640E-01 2.1160E-02

4.2950E-02 8.3270E-02 5.6230E-03 2.0860E-01 3.2080E+00 8.1120E+00 3.1220E-01

1.2120E-01 3.6090E+00 1.0100E+01 2.5980E+00 7.5050E-03 8.2380E-01 1.4530E+01

2.8430E+00 8.9830E-03 1.4170E-01 3.9230E-01 1.0950E-01 7.0610E-03 3.6420E-02

5.7830E-01 9.9950E-02 6.2690E-03 1.7870E-02 1.8390E-02 2.0170E-02 9.6740E-03

1.3930E-02 8.8170E-03 2.1600E-02 1.5560E-01 3.2550E-01 2.7350E-02 1.0150E-02

6.9230E-02 1.5730E-01 5.3390E-02 6.8310E-03 1.4630E-02 1.5030E-02 6.6090E-03

4.6300E-03 1.4690E-02 3.3480E-02 1.9730E-02 5.9360E-03 4.0200E-03 2.9140E-03

1.6290E-03 6.1840E-03 7.8350E-03 7.9110E-03 3.3390E-03 5.3950E-03 1.7450E-02

2.5580E-02 2.5280E-02 2.8250E-02 1.4420E-01 3.8210E-01 5.6780E-01 1.1700E-01

3.7100E-01 4.9700E-01 3.2560E-01 1.6570E-02 1.9880E-02 2.6660E-02 2.5890E-02

1.5830E-02 1.6030E-02 3.8440E-02 4.1040E-02 3.9800E-02 3.3630E-02 1.9770E-02

1.6080E-02 4.1880E-02 3.0160E-02 2.1050E-02 4.9160E-02 1.1490E-01 1.5100E-01

1.6710E-02 4.2350E-02 7.0630E-02 9.9080E-02 2.2000E-02 4.3880E-02 2.0190E-02

6.3540E-02 1.5910E-01 3.2060E-01 3.7810E-01 4.3930E-02 4.3380E-02 3.1330E-02

4.6470E-02 3.8740E-02 3.5030E-02 2.1410E-02 2.3500E-03 1.5540E-02 2.9410E-01

3.9430E+00 8.3910E-04 1.3710E-02 6.9530E-02 1.2520E-01 2.7260E-04 3.9410E-03

9.3180E-02 2.7300E-01 1.3750E-02 1.0950E-02 2.5680E-02 4.8290E-02 1.0320E-02

2.8790E-01 2.4560E+00 6.5660E+00 9.0320E-04 1.4740E-01 2.7330E+00 8.2520E+00

2.1440E-03 7.6290E-03 6.1830E-01 1.1330E+01 1.2960E-03 1.0490E-02 1.1340E-01

3.1330E-01 1.8210E-03 7.3880E-03 2.8970E-02 4.8070E-01 5.9120E-04 6.9070E-03

1.5460E-02 1.8850E-02 3.7940E-03 9.6810E-03 8.2350E-03 3.9790E-03 2.3560E-02

1.1860E-01 2.0970E-01 2.1920E-03 1.0610E-02 5.3070E-02 1.2750E-01 2.2700E-03

6.8940E-03 1.1560E-02 8.9920E-03 1.1400E-03 4.4750E-03 1.1680E-02 3.0270E-02

3.9580E-03 2.4580E-03 2.2730E-03 1.0650E-03 2.4780E-03 4.1560E-03 4.6050E-03

3.4610E-03 1.6530E-03 6.1800E-03 1.4700E-02 2.1230E-02 7.2450E+00 3.2080E-01

5.4650E-02 1.8500E+00 5.3580E-01 1.6100E-01 4.5040E-02 1.2870E-01 6.0360E-02

2.4270E-02 8.5850E-03 2.2690E-03 2.0130E-01 1.1400E-01 5.6900E-02 2.3930E-02

7.8080E-03 1.6390E-03 9.1410E-02 2.1140E-02 5.8840E-03 2.4430E-01 8.2740E-02

2.5750E-02 5.1400E-03 7.9130E-01 9.6580E-02 2.8320E-02 9.1220E-03 1.0730E-01

2.4160E-02 7.0360E-03 1.2800E+00 3.9680E-01 1.0990E-01 3.8620E-02 1.4620E-01

4.7480E-02 7.3690E-03 4.4350E-03 1.9550E-02 4.7390E-03 1.9120E-03 2.0300E+00

2.0870E-01 2.2820E-02 2.6540E-03 3.6660E+00 3.4650E-01 3.7430E-02 5.2310E-03

9.2340E-02 8.4990E-02 2.7700E-02 4.8260E-03 2.0950E-02 1.0940E-02 3.3260E-03

4.9350E-04 5.2900E-02 1.5260E-02 2.9960E-03 3.6450E-04 7.9590E-01 3.3940E-02

5.5510E-03 1.5420E-03 2.2900E-01 5.1440E-02 1.2330E-02 2.1730E-03 2.2090E+01

5.8270E-01 9.8340E-03 7.6490E-04 2.9160E+01 2.5820E+00 1.0090E-01 6.5160E-04

4.0150E+01 2.9500E+00 1.3490E-01 7.8460E-03 3.1720E-02 5.9690E-03 2.1520E-03

6.6650E-02 2.5280E-02 9.8740E-03 2.6100E-03 1.9900E+00 7.9560E-02 1.2130E-02

4.3130E-03 4.8910E-02 1.2450E-02 2.9690E-03 3.7420E-04 1.7230E-01 2.8830E-02

4.6180E-03 6.9460E-04 1.5920E-03 1.1960E-02 3.6030E-03 9.4190E-04 2.2620E-02

7.2230E-03 2.3370E-03 4.9540E-04 1.0860E-01 2.1320E-02 3.4880E-03 5.3140E-04

1.0560E+01 3.5610E-01 7.7530E-01 1.0480E+00 3.6920E-01 1.1780E-01 5.9920E-02

6.4870E-02 3.8910E-02 2.0860E-02 9.0100E-03 1.0060E-01 8.1810E-02 6.6400E-02

4.7510E-02 2.8620E-02 1.2810E-02 4.1670E-02 4.3360E-02 1.3660E-02 1.1620E-01

1.1030E-01 5.3530E-02 2.0110E-02 1.4720E-01 5.1830E-01 7.8050E-02 2.5380E-02

5.6700E-02 4.6390E-02 1.2240E-02 4.6860E-01 6.2950E-01 3.3300E-01 9.5300E-02

8.8860E-02 5.4410E-02 2.6810E-02 3.6960E-03 1.1100E-02 9.0990E-03 2.3320E-03

1.9990E-01 1.3340E+00 2.3130E-01 2.6250E-02 1.7190E-01 2.8710E+00 4.1010E-01

4.2340E-02 7.0710E-02 1.0630E-01 6.8120E-02 3.0620E-02 1.3630E-02 7.7430E-03

6.0470E-03 2.9350E-03 2.2610E-02 2.1610E-02 1.2230E-02 2.5950E-03 1.0240E-01

5.6650E-01 3.2730E-02 5.3300E-03 5.1380E-02 1.3670E-01 4.4050E-02 1.3370E-02

2.2020E+00 1.5900E+01 7.0000E-01 1.3260E-02 2.5690E+00 2.0670E+01 3.1860E+00

1.1400E-01 4.5300E-01 3.2410E+01 3.7920E+00 1.6170E-01 1.5900E-02 1.4140E-02

2.9120E-03 3.3990E-02 3.0130E-02 1.4710E-02 7.1420E-03 2.1290E-01 1.3520E+00

7.9720E-02 1.1020E-02 1.9720E-02 2.2810E-02 8.7590E-03 2.7110E-03 2.8680E-02

1.1500E-01 2.9700E-02 5.9300E-03 1.3270E-03 7.1980E-03 4.8140E-03 1.6670E-03

1.0300E-02 9.6760E-03 6.0320E-03 1.8450E-03 2.6540E-02 6.1910E-02 1.6370E-02

3.6490E-03 8.2590E+00 3.2180E-01 6.6340E-01 6.7100E-01 2.3830E-01 2.5210E-02

3.9350E-02 4.4750E-02 3.1860E-02 1.4320E-02 3.7960E-02 6.0210E-02 5.9080E-02

5.1620E-02 3.9560E-02 2.1840E-02 1.7630E-02 3.5060E-02 2.6220E-02 5.1100E-02

8.1370E-02 7.2760E-02 3.4340E-02 3.9700E-02 1.3700E-01 3.7760E-01 6.1070E-02

2.9080E-02 4.1090E-02 2.2210E-02 1.5270E-01 3.9830E-01 4.1140E-01 2.5640E-01

4.7250E-02 5.4200E-02 3.4100E-02 2.9570E-03 5.5460E-03 7.7510E-03 4.0000E-03

2.2790E-02 2.3110E-01 9.9550E-01 1.8400E-01 2.0860E-02 1.8990E-01 2.2640E+00

3.1590E-01 1.8930E-02 5.5430E-02 8.2550E-02 6.5150E-02 6.5910E-03 7.4810E-03

6.2750E-03 3.9150E-03 8.2920E-03 1.8320E-02 1.3390E-02 8.5560E-03 1.0500E-02

1.1180E-01 4.1760E-01 2.5220E-02 1.2310E-02 4.4050E-02 1.0240E-01 3.7950E-02

1.3020E-01 2.7320E+00 1.1670E+01 5.2560E-01 9.2880E-02 3.1790E+00 1.5530E+01

2.4400E+00 3.5920E-03 1.4660E+00 2.5660E+01 2.9200E+00 7.9540E-03 1.2240E-02

6.2450E-03 1.7490E-02 2.1550E-02 1.9880E-02 9.1680E-03 2.4390E-02 2.4970E-01

1.0470E+00 6.1050E-02 7.1020E-03 1.4950E-02 1.4910E-02 5.8940E-03 4.5930E-03

2.9690E-02 8.4450E-02 2.3710E-02 1.0620E-03 3.3560E-03 4.5190E-03 2.3800E-03

5.0470E-03 7.5390E-03 6.4630E-03 3.9980E-03 5.4500E-03 2.5040E-02 4.3560E-02

1.3460E-02 1.2990E-01 3.2520E-01 5.1530E-01 4.5640E-01 8.2620E-03 2.3120E-02

3.2110E-02 3.1430E-02 1.9990E-02 7.7900E-03 3.3590E-02 4.9450E-02 5.0530E-02

3.9700E-02 2.1470E-02 7.2140E-03 1.8820E-02 3.3070E-02 1.9890E-02 4.9560E-02

6.3460E-02 4.6580E-02 1.3320E-02 3.8870E-02 1.1000E-01 2.9970E-01 1.4610E-02

2.7010E-02 2.7690E-02 5.5370E-02 1.4540E-01 3.2260E-01 3.9150E-01 2.1620E-02

4.7550E-02 3.2850E-02 2.2170E-03 3.2880E-03 4.6840E-03 4.8900E-03 2.6180E-03

2.6560E-02 1.8400E-01 8.9040E-01 2.9660E-03 2.2910E-02 1.5300E-01 1.9260E+00

1.0900E-03 2.0780E-02 5.1960E-02 9.0220E-02 2.1680E-03 6.4700E-03 5.9420E-03

3.2790E-03 2.1110E-03 9.3060E-03 1.4890E-02 1.0090E-02 2.4430E-03 1.1170E-02

8.7960E-02 3.2420E-01 2.1720E-03 1.3370E-02 3.7950E-02 9.3430E-02 5.7740E-03

1.6270E-01 2.1020E+00 9.0990E+00 6.5090E-04 1.1340E-01 2.4430E+00 1.3390E+01

4.6320E-04 4.3150E-03 1.1250E+00 2.1500E+01 4.0740E-03 7.1610E-03 8.4350E-03

7.3490E-03 1.5490E-02 1.6310E-02 1.1810E-02 6.3470E-03 2.6170E-02 1.9380E-01

8.1400E-01 2.0640E-03 7.6350E-03 1.2040E-02 1.0010E-02 6.9200E-04 5.0460E-03

2.3710E-02 7.2640E-02 7.9620E-04 1.9760E-03 3.2020E-03 2.4310E-03 1.7800E-03

4.1540E-03 6.2750E-03 4.2850E-03 1.0070E-03 6.0140E-03 2.0720E-02 3.7740E-02

4.4540E+00 4.5590E-01 1.7740E-01 6.8790E-02 4.6690E-02 2.8210E-02 1.5960E-02

7.2740E-03 8.1850E-02 5.8170E-02 4.1750E-02 3.0120E-02 2.0320E-02 1.0410E-02

6.1260E-02 3.4050E-02 2.1300E-02 9.9870E-01 6.6290E-01 1.6300E-01 5.4390E-02

7.4850E-01 1.4740E-01 2.7620E-01 8.3090E-02 1.1080E+00 1.6530E-01 4.6860E-02

7.9280E-01 4.4610E-01 2.3960E-01 1.2130E-01 5.9930E-01 3.5350E-01 4.2640E-02

2.5680E-02 2.1680E-01 3.8380E-02 2.0280E-02 1.2010E-01 5.2470E-02 1.6570E-02

3.5840E-03 9.2240E-02 3.7950E-02 1.3050E-02 3.4680E-03 7.9740E-02 3.4790E-02

1.2210E-02 2.7010E-03 3.4400E-02 1.8650E-02 1.0620E-02 4.9840E-03 2.4340E+00

4.5560E-01 2.4690E-02 4.5830E-03 2.1950E+00 3.2650E-01 3.8640E-02 7.1650E-03

9.0630E-02 4.6700E-02 2.0060E-02 6.7370E-03 3.0270E+00 4.2960E-01 4.4880E-02

7.8810E-03 1.1360E-01 4.3550E-02 1.6940E-02 6.2180E-03 1.2980E-01 5.8070E-02

2.6550E-02 1.0930E-02 1.3470E+01 2.0310E-01 6.5250E-03 1.8070E+01 3.3100E+00

1.1500E-01 4.0470E-03 3.1000E+01 3.5500E+00 2.8710E-01 1.6140E-02 1.4930E-01

4.7990E-02 1.1760E-02 2.2530E-03 2.6420E-02 1.4600E-02 6.9860E-03 2.6910E-03

2.9650E-02 1.4860E-01 1.7940E-02 8.4900E-03 4.8410E-02 2.5690E-02 1.0140E-02

2.6800E-03 5.6840E-02 1.7560E-02 5.7750E-03 1.3250E-03 4.9470E+00 2.6800E-01

4.0800E-02 3.1110E-02 2.7380E-02 1.8280E-02 7.6300E-03 4.7020E-02 4.5280E-02

3.9790E-02 2.8140E-02 1.5640E-02 6.2690E-03 3.6040E-02 3.3790E-02 1.7670E-02

2.0510E-01 6.3690E-01 8.4540E-02 1.1790E-01 3.9060E-01 1.4180E-01 1.0940E-01

5.8710E-02 2.2720E-01 4.9940E-01 6.8280E-02 3.8730E-01 3.6490E-01 2.7670E-01

1.7230E-01 4.1310E-01 1.0560E-01 2.2660E-01 1.9260E-02 7.6890E-02 1.0350E-01

1.3420E-02 3.5550E-02 4.6340E-02 4.3360E-02 1.9300E-02 2.0380E-02 4.2770E-02

3.1720E-02 1.4780E-02 1.8270E-02 3.3970E-02 2.9270E-02 1.4510E-02 1.8090E-02

1.8900E-02 1.0330E-02 4.5110E-03 4.5150E-01 1.2010E+00 5.1240E-01 2.3690E-02

7.5120E-02 1.4450E+00 3.7330E-01 4.4930E-02 3.4820E-02 3.6340E-02 3.1640E-02

2.0760E-02 8.1230E-02 2.0180E+00 5.0440E-01 5.3390E-02 2.6700E-02 5.8430E-02

3.4560E-02 1.6820E-02 3.5690E-02 6.6320E-02 4.1910E-02 2.6400E-02 3.2190E+00

6.9060E+00 1.4260E-01 3.3030E+00 8.9000E+00 3.7530E+00 1.4020E-01 5.7030E-01

1.6900E+01 4.3050E+00 3.8180E-01 4.7890E-02 6.2860E-02 3.6480E-02 1.1290E-02

1.1390E-02 1.0160E-02 9.4270E-03 6.8020E-03 2.2240E-02 3.9690E-02 7.7100E-02

7.0420E-03 2.5650E-02 1.7660E-02 1.4130E-02 8.6720E-03 9.5840E-03 3.0670E-02

1.3160E-02 5.2070E-03 3.3790E+00 1.9990E-02 2.4820E-02 1.6670E-02 1.3500E-02

8.9500E-03 2.8180E-02 3.1490E-02 2.2510E-02 1.7130E-02 1.3740E-02 8.2190E-03

2.1700E-02 2.0680E-02 1.5860E-02 1.1160E-01 2.0080E-01 3.6750E-01 4.6940E-02

1.1600E-01 8.5750E-02 9.5670E-02 7.3040E-02 8.6400E-02 1.7600E-01 1.9400E-01

1.7820E-01 2.2960E-01 2.1960E-01 1.7420E-01 1.8320E-01 1.9520E-01 1.1900E-01

1.2840E-02 3.3190E-02 6.0380E-02 4.2260E-02 4.5370E-03 3.0770E-02 2.5840E-02

3.5410E-02 3.4260E-03 1.5790E-02 2.7070E-02 2.6630E-02 1.8740E-03 1.5440E-02

2.1120E-02 2.5450E-02 1.0550E-02 9.9490E-03 9.7710E-03 4.2830E-03 2.2130E-02

5.1160E-01 5.6770E-01 3.5910E-01 1.3000E-02 6.8080E-02 9.3040E-01 2.8480E-01

9.5290E-03 2.3010E-02 2.4210E-02 2.5470E-02 1.3370E-02 7.5600E-02 1.3030E+00

3.8500E-01 7.9440E-03 1.7940E-02 3.7190E-02 2.7020E-02 1.2020E-02 1.9650E-02

4.6190E-02 3.4730E-02 4.3520E-01 3.6170E+00 2.8070E+00 1.1040E-01 3.7510E+00

4.2270E+00 2.6440E+00 1.2120E-02 6.4130E-01 1.0790E+01 3.3010E+00 1.1770E-02

3.6470E-02 3.5640E-02 2.2440E-02 3.6710E-03 7.1980E-03 7.5380E-03 7.4000E-03

1.4830E-02 1.5530E-02 3.9360E-02 2.9520E-02 1.0130E-02 1.3620E-02 1.2700E-02

6.8400E-03 2.9220E-03 5.7420E-03 2.0360E-02 9.6490E-03 8.7870E-03 9.0740E-03

1.1380E-02 8.3030E-03 3.4680E-03 1.6250E-02 9.5870E-03 1.1580E-02 1.1230E-02

8.0240E-03 3.9110E-03 1.0600E-02 8.6590E-03 9.8200E-03 4.7100E-02 1.0510E-01

1.9460E-01 3.3020E-02 4.1260E-02 9.1240E-02 4.8550E-02 5.2930E-02 3.2830E-02

6.0480E-02 1.0760E-01 6.8920E-02 1.0310E-01 1.2280E-01 1.0660E-01 4.8950E-02

1.7430E-01 2.4850E-02 6.4200E-03 1.5040E-02 1.4760E-02 3.7760E-02 5.1740E-04

4.3730E-03 2.1350E-02 2.2030E-02 4.3220E-04 3.1430E-03 1.1060E-02 2.1680E-02

1.5850E-05 2.0300E-03 1.1070E-02 1.9120E-02 4.9720E-03 4.4950E-03 4.0650E-03

3.5180E-03 4.3430E-03 2.3220E-02 3.5880E-01 3.4450E-01 2.9360E-03 1.0990E-02

4.5290E-02 5.8810E-01 1.6790E-03 8.4660E-03 1.5360E-02 1.5610E-02 2.8630E-03

1.1590E-02 5.0920E-02 8.2250E-01 1.9890E-03 6.0450E-03 1.1670E-02 2.5660E-02

2.6110E-03 9.8980E-03 1.2980E-02 3.0940E-02 1.6800E-02 6.7570E-01 2.7350E+00

3.7040E-03 1.4230E-01 2.6440E+00 2.5670E+00 5.5690E-03 6.0090E-03 4.4560E-01

6.8940E+00 2.2490E-03 1.1280E-02 2.2440E-02 1.6490E-02 7.2080E-04 3.2590E-03

4.6390E-03 4.0300E-03 7.4130E-03 6.4040E-03 8.3820E-03 2.6590E-02 2.6080E-03

8.6680E-03 7.7310E-03 4.7110E-03 5.0520E-04 2.7000E-03 3.6090E-03 1.1880E-02

3.6600E+00 9.4770E-01 1.8110E-01 7.5420E-02 8.5010E+00 3.6790E+00 1.0430E+00

1.9970E-01 3.2920E-02 7.2880E-03 3.3050E+00 1.2370E+00 4.1550E-02 2.8670E+00

4.1580E-01 7.8640E-02 7.0510E-03 1.9700E+00 6.1130E-01 9.9480E-02 7.1840E-03

6.6200E-01 1.4760E-01 9.2770E-03 3.6730E-02 2.0410E-02 9.4040E-03 3.4490E-03

1.6750E-02 1.2220E-02 6.7970E-03 5.2350E-02 1.1440E-01 8.1470E-03 2.4400E-03

2.1960E-01 1.8530E-01 8.6620E-02 1.9940E-02 1.7010E-01 8.3160E-02 2.4750E-02

3.8630E-03 1.0930E-01 3.0930E-02 6.7260E-03 7.8630E-04 1.1860E-01 3.7150E-02

6.4360E-03 1.0340E-04 1.1140E-01 5.7610E-02 5.0800E-02 3.3020E-02 1.8190E-01

4.3890E-02 1.1090E-02 2.4550E-03 4.5860E-02 1.4990E-02 4.0190E-03 9.5930E-04

8.7280E-02 7.8280E-02 4.6200E-02 1.5050E-02 1.9660E-01 4.4000E-02 7.1830E-03

6.8850E-04 3.6110E-02 1.5380E-02 4.4500E-03 8.3340E-04 5.1830E-02 3.9290E-02

8.8520E-03 5.7470E-02 2.6180E-02 1.4460E-02 7.3740E-03 5.0410E-02 2.4040E-02

8.3520E-03 2.1910E-03 7.3210E-02 7.5540E-02 3.8040E-02 8.8320E-03 4.8310E-02

2.7010E-02 9.3820E-03 1.9620E-03 4.1320E-02 2.3580E-02 1.0870E-02 6.5140E-03

2.0770E-02 1.0670E-02 5.5670E-03 2.6940E-03 3.2470E-02 1.6100E-02 6.1040E-03

1.4640E-03 3.1040E+00 1.3380E+00 1.2180E-01 2.7720E+00 2.8200E+00 3.2660E+00

1.5780E+00 3.7240E-01 4.9780E-02 1.7780E+00 1.0560E+00 8.2390E-01 8.6680E-01

1.4550E+00 2.9310E-01 7.4520E-02 7.0780E-01 8.0330E-01 5.2950E-01 1.0730E-01

3.3930E-01 2.3100E-01 8.4830E-02 2.1340E-02 1.5390E-02 1.1030E-02 7.7780E-03

1.4400E-02 1.0310E-02 4.6090E-03 4.1880E-02 4.7340E-02 4.8650E-02 3.9490E-03

1.7790E-01 5.3610E-02 9.4760E-02 8.5450E-02 7.5350E-02 5.9080E-02 6.5070E-02

2.6040E-02 2.3160E-02 6.0410E-02 2.7650E-02 7.1210E-03 5.1820E-02 4.2740E-02

2.6140E-02 6.8100E-03 7.1550E-02 8.6420E-02 3.8310E-02 9.9730E-03 5.4020E-02

9.2800E-02 3.4380E-02 1.0300E-02 1.4750E-02 2.1610E-02 1.2190E-02 3.9910E-03

7.7420E-02 3.5600E-02 2.9160E-02 3.9240E-02 4.4340E-02 1.0500E-01 4.1640E-02

7.8010E-03 1.3790E-02 1.4560E-02 1.2330E-02 4.6530E-03 4.3500E-02 1.6940E-02

1.8550E-02 3.2060E-02 2.9790E-02 1.7090E-02 5.3330E-03 2.5670E-02 2.0250E-02

1.5780E-02 7.5880E-03 7.5550E-02 2.4830E-02 2.7050E-02 2.9080E-02 2.6180E-02

1.5260E-02 1.8510E-02 9.4000E-03 3.3050E-02 1.5710E-02 1.3150E-02 3.9060E-03

1.2540E-02 1.0090E-02 6.6170E-03 2.2700E-03 1.7080E-02 1.2530E-02 9.5520E-03

5.6980E-03 1.6910E+00 1.1190E+00 2.0450E-01 2.9100E+00 1.1020E+00 1.9930E+00

1.5460E+00 4.1500E-01 7.6920E-01 9.9960E-01 9.7830E-01 2.3900E-01 7.8640E-01

8.1280E-01 1.7660E-01 1.7720E-01 5.9780E-01 4.7080E-01 3.6430E-01 1.5330E-01

2.1270E-01 1.2530E-01 1.0830E-02 1.1730E-02 1.1360E-02 8.3230E-03 1.1220E-02

7.3290E-03 3.1700E-03 3.1410E-02 1.7620E-02 4.0060E-02 1.7250E-02 8.5140E-02

8.0340E-02 5.3390E-02 8.9600E-02 2.0800E-02 5.6280E-02 3.9920E-02 5.2160E-02

2.6460E-03 2.3450E-02 4.0660E-02 2.1540E-02 1.8540E-02 3.5560E-02 2.5650E-02

1.6040E-02 5.4950E-02 5.7600E-02 3.3160E-02 9.2690E-03 1.5280E-02 4.7270E-02

5.7130E-02 2.3920E-02 3.9940E-03 1.2430E-02 1.3940E-02 9.0430E-03 4.9440E-02

2.6950E-02 3.4040E-02 2.5600E-02 6.8900E-03 4.6580E-02 6.6380E-02 2.9290E-02

3.6390E-03 1.0870E-02 9.7580E-03 9.7320E-03 3.0470E-02 1.7220E-02 1.3250E-02

1.9080E-02 2.2310E-02 1.4290E-02 7.4120E-03 1.0570E-02 1.6130E-02 1.2720E-02

1.1570E-02 5.1690E-02 2.2180E-02 2.8030E-02 1.5550E-02 9.5510E-03 1.6590E-02

1.0850E-02 1.5020E-02 2.4790E-02 1.1020E-02 9.6060E-03 3.9600E-03 7.6070E-03

8.0140E-03 5.0580E-03 2.9810E-03 7.4740E-03 9.9080E-03 8.9360E-03 7.3550E-03

1.1260E+00 3.3640E-02 2.2310E-01 2.2070E+00 8.4090E-01 9.5030E-01 1.2110E+00

2.1770E-01 8.2200E-01 7.8990E-01 5.9370E-02 2.8180E-01 6.0540E-01 3.9520E-01

2.3830E-02 2.5080E-01 3.8520E-01 4.1090E-01 5.7600E-02 1.5110E-01 1.1880E-01

4.5840E-03 8.1530E-03 8.8660E-03 6.7400E-03 7.7730E-03 4.4850E-03 2.1940E-03

2.0940E-02 5.9290E-03 2.0890E-02 2.3710E-02 2.5660E-02 7.2540E-02 5.8210E-02

4.7920E-02 2.7340E-03 2.7560E-02 3.5630E-02 4.6850E-02 1.4710E-04 4.4290E-03

2.2090E-02 3.1710E-02 4.7240E-03 2.0340E-02 2.3470E-02 1.6220E-02 4.4010E-02

2.2870E-02 2.1490E-02 1.3490E-02 4.3340E-03 1.6340E-02 3.8070E-02 3.6990E-02

9.0140E-04 4.6480E-03 9.5260E-03 1.1610E-02 2.2390E-02 3.0760E-02 2.5100E-02

1.2470E-02 6.1420E-04 1.0480E-02 3.9860E-02 4.8470E-02 5.8650E-04 4.7260E-03

7.5270E-03 9.8870E-03 1.6600E-02 1.6720E-02 6.1190E-03 1.1690E-02 1.1970E-02

1.1140E-02 7.2400E-03 3.5100E-03 9.8220E-03 1.0810E-02 9.8520E-03 2.5620E-02

3.0270E-02 1.7740E-02 5.0110E-03 2.3090E-03 1.0160E-02 1.0600E-02 1.1610E-02

1.6530E-02 7.3530E-03 5.2630E-03 3.7580E-03 4.5200E-03 4.7790E-03 3.9830E-03

2.5020E-03 2.5250E-03 6.4890E-03 7.2580E-03 6.1770E-03 6.4460E-03 3.4860E-02

1.6070E-01 1.2480E+00 1.0120E+00 2.7460E-01 1.6610E-02 4.7020E-01 4.3020E-01

1.0850E-02 8.3980E-02 2.2350E-01 3.5210E-01 1.2040E-03 4.0600E-02 2.3670E-01

2.5580E-01 1.6120E-02 7.6470E-02 7.1180E-02 1.5280E-03 4.1840E-03 4.2940E-03

3.5380E-03 3.9870E-03 2.0040E-03 1.1280E-03 1.0470E-02 1.8960E-03 7.1960E-03

1.6380E-02 3.2040E-03 3.6980E-02 4.9040E-02 1.3740E-02 6.8320E-05 4.5960E-03

2.6860E-02 2.4870E-02 1.8950E-05 2.0240E-04 4.4720E-03 2.4390E-02 5.8110E-04

7.7090E-03 1.4550E-02 8.8050E-03 2.5200E-02 5.8670E-03 9.8740E-03 1.0020E-02

1.0050E-03 4.8720E-03 1.2070E-02 2.8760E-02 1.8880E-04 1.0890E-03 4.1360E-03

7.8550E-03 6.4800E-03 2.2780E-02 1.1330E-02 4.8410E-03 3.4710E-05 9.9620E-04

1.0650E-02 3.8030E-02 3.3840E-05 9.1310E-04 4.5700E-03 5.9070E-03 6.9080E-03

1.0780E-02 1.7690E-03 5.8440E-03 4.5170E-03 6.4630E-03 4.3190E-03 1.0420E-03

3.8920E-03 6.9860E-03 5.4780E-03 8.6960E-03 2.3310E-02 7.0700E-03 6.6150E-04

3.3440E-04 3.2060E-03 8.4400E-03 5.3540E-03 8.2640E-03 3.7590E-03 2.0890E-03

2.3440E-03 2.1690E-03 1.9150E-03 2.4210E-03 1.3210E-03 5.7400E-04 3.0610E-03

4.2190E-03 3.3730E-03 3.9230E+00 4.0750E-01 3.0970E-02 5.6260E-03 1.1290E-03

9.2310E+00 1.7460E-01 6.4900E-02 1.8440E+00 4.1490E-01 1.9460E-02 3.0660E-03

2.6820E+00 4.0580E-01 3.1810E-02 2.3490E-03 1.6900E+00 1.7850E-02 1.2300E-02

3.7690E-02 1.8040E-02 6.8810E-03 1.6650E-03 1.2080E-02 5.4250E-03 2.5140E-03

9.5420E-03 3.5930E-02 1.0050E-02 1.7140E-03 1.3990E-01 3.0920E-02 5.4780E-03

6.6340E-04 1.7840E-01 5.6730E-02 1.1530E-02 1.1420E-03 5.3780E-01 1.6660E-01

3.0050E-02 2.7480E-03 1.4650E-01 1.8730E-02 1.0620E-03 6.9180E-05 5.1460E-02

2.5510E-02 9.4760E-03 1.5170E-03 6.9090E-02 5.6200E-02 2.5140E-02 4.3430E-03

2.7950E-01 7.9260E-02 1.9280E-02 2.8860E-03 1.2490E-01 5.2980E-02 1.4900E-02

1.8270E-03 1.1760E-01 7.6780E-02 2.5420E-02 3.5630E-03 4.0540E-01 1.0630E-01

2.2240E-02 2.3520E-03 4.0210E-02 4.0010E-02 3.4220E-02 6.7160E-02 4.5770E-02

1.9900E-02 3.3960E-03 2.0060E-01 5.0090E-02 7.5700E-03 1.3520E-03 4.2820E-02

1.4980E-02 5.8600E-03 1.2720E-03 9.2390E-02 3.8680E-02 9.7770E-03 1.7130E-03

4.7060E-02 4.4960E-02 2.0200E-02 6.9190E-04 7.2900E-02 3.0340E-02 6.6120E-03

6.4710E-04 7.1720E-02 4.5710E-02 1.2910E-02 1.4620E-03 4.7670E+00 6.9620E-01

4.7680E-02 7.4670E-03 3.7530E+00 4.0410E+00 9.7810E-02 8.6070E-01 6.9260E-01

3.3360E-01 1.4770E-02 1.4240E+00 2.7360E+00 3.5580E-01 2.9580E-02 7.9880E-01

6.2770E-01 6.7950E-03 2.2160E-02 1.5070E-02 1.0120E-02 5.4130E-03 8.6650E-03

5.7930E-03 2.2970E-03 7.9530E-03 2.1430E-02 1.2650E-02 4.8030E-03 4.8630E-02

6.8660E-02 2.5310E-02 5.0640E-03 6.8810E-02 7.0050E-02 4.6200E-02 1.0820E-02

1.9340E-01 2.4780E-01 1.4460E-01 2.8330E-02 5.8430E-02 6.4650E-02 1.4650E-02

8.7580E-04 3.3660E-02 2.1170E-02 1.1330E-02 7.1690E-03 5.7610E-02 2.2910E-02

2.5020E-02 2.1820E-02 1.1000E-01 1.3290E-01 5.6830E-02 1.7660E-02 6.8340E-02

4.5900E-02 3.3160E-02 1.3390E-02 8.1030E-02 3.4080E-02 4.7940E-02 2.3280E-02

1.3580E-01 1.7940E-01 8.5920E-02 2.0830E-02 4.0150E-02 4.0210E-02 1.4000E-02

5.2760E-02 2.7740E-02 1.8180E-02 1.4810E-02 8.2850E-02 8.7450E-02 3.9640E-02

6.5460E-03 2.3720E-02 1.8990E-02 7.3010E-03 4.0770E-03 4.6330E-02 3.5220E-02

2.8220E-02 8.8700E-03 3.9220E-02 3.2060E-02 1.2610E-02 1.0150E-02 4.3750E-02

2.4820E-02 1.8090E-02 5.4160E-03 5.0860E-02 1.9000E-02 2.8270E-02 1.1700E-02

4.2190E+00 7.5860E-01 4.5050E-02 1.2820E+00 3.7510E+00 1.2950E+00 3.4400E-01

6.3410E-01 3.7580E-01 1.6690E-01 3.1740E-01 1.6310E+00 1.4880E+00 2.0150E-01

3.4090E-01 6.3470E-01 1.7150E-01 1.1900E-02 1.2560E-02 1.0730E-02 7.6890E-03

6.2630E-03 4.9660E-03 2.3670E-03 6.3620E-03 1.2640E-02 1.2230E-02 6.3050E-03

1.4200E-02 4.4990E-02 4.2460E-02 1.6180E-02 2.2290E-02 6.0120E-02 4.9960E-02

3.1060E-02 5.3570E-02 1.7440E-01 1.6910E-01 9.4260E-02 2.0430E-02 5.0650E-02

3.2360E-02 7.4940E-03 2.0660E-02 1.6430E-02 1.4830E-02 7.3280E-03 3.7600E-02

2.1040E-02 2.0330E-02 2.3170E-02 3.9820E-02 8.9800E-02 8.4660E-02 4.0490E-02

3.2470E-02 4.0920E-02 3.2520E-02 2.3880E-02 4.1330E-02 4.0000E-02 2.9260E-02

3.8380E-02 4.1480E-02 1.2020E-01 1.1770E-01 5.8140E-02 4.0210E-02 2.8670E-02

6.9450E-03 3.6060E-02 2.0830E-02 2.1260E-02 1.2660E-02 2.9770E-02 6.7590E-02

5.2240E-02 2.3920E-02 1.3010E-02 1.4550E-02 1.1210E-02 4.4320E-03 1.9200E-02

3.1260E-02 2.4670E-02 1.9790E-02 3.1370E-02 2.0210E-02 1.2510E-02 1.1160E-02

2.2920E-02 2.3660E-02 1.6600E-02 1.0510E-02 2.7040E-02 2.3670E-02 1.6550E-02

2.0580E-02 3.1550E+00 5.8190E-01 3.4920E-01 2.1720E+00 2.2360E+00 1.1190E-01

4.0650E-01 3.6570E-01 2.4910E-01 5.3310E-02 5.5430E-01 1.3900E+00 7.1570E-01

1.2870E-01 4.2820E-01 3.0350E-01 5.3040E-03 9.2320E-03 9.5680E-03 7.7000E-03

4.2700E-03 3.7120E-03 2.0790E-03 4.7710E-03 7.0120E-03 1.0080E-02 6.5980E-03

3.4980E-03 1.9700E-02 3.6640E-02 2.8660E-02 5.1740E-03 2.9890E-02 4.0740E-02

4.4590E-02 8.8840E-03 8.2680E-02 1.3440E-01 1.4250E-01 5.9970E-03 2.7110E-02

3.3590E-02 1.6510E-02 1.0930E-02 1.3480E-02 1.3630E-02 6.3610E-03 1.9250E-02

2.2390E-02 1.8260E-02 1.6030E-02 1.2060E-02 4.4670E-02 7.3540E-02 6.0040E-02

1.2960E-02 2.9370E-02 2.8290E-02 2.6070E-02 1.5940E-02 3.6080E-02 2.5050E-02

3.4650E-02 9.8950E-03 5.5550E-02 9.7640E-02 9.0180E-02 3.6310E-02 1.5700E-02

4.8730E-03 2.1010E-02 1.9920E-02 1.8550E-02 8.6370E-03 8.4640E-03 3.7010E-02

4.6930E-02 3.7140E-02 6.7850E-03 9.9100E-03 1.0670E-02 5.0290E-03 6.3260E-03

2.0820E-02 2.0800E-02 2.3240E-02 2.3530E-02 1.1070E-02 1.3240E-02 8.6330E-03

1.0290E-02 1.9130E-02 1.5110E-02 1.0730E-02 1.1160E-02 2.2600E-02 1.4040E-02

1.8090E-02 2.0540E+00 8.0680E-02 8.0320E-01 2.2920E+00 2.8250E-02 1.8740E-01

3.1190E-01 2.2780E-01 7.6510E-03 1.1150E-01 6.6870E-01 1.0190E+00 4.2050E-02

2.1800E-01 3.1350E-01 2.2730E-03 5.9550E-03 7.1240E-03 5.7220E-03 2.6970E-03

2.5090E-03 1.6110E-03 3.1810E-03 3.5620E-03 6.7560E-03 5.2980E-03 6.9810E-04

6.0690E-03 2.0410E-02 3.1790E-02 6.3570E-04 1.0290E-02 2.8970E-02 4.1950E-02

3.8550E-05 2.2780E-02 8.1550E-02 1.4120E-01 1.3740E-03 1.0700E-02 2.3600E-02

1.9810E-02 4.9330E-03 1.0320E-02 8.9150E-03 5.1390E-03 7.3440E-03 1.9650E-02

1.5690E-02 7.9230E-03 3.0380E-03 1.7520E-02 4.3970E-02 6.1640E-02 3.9950E-03

1.6910E-02 2.3220E-02 2.0840E-02 4.2050E-03 2.1840E-02 2.6980E-02 2.1470E-02

1.4860E-03 1.8170E-02 6.1360E-02 9.2470E-02 2.7590E-02 6.4270E-03 3.9610E-03

1.0100E-02 1.7860E-02 1.2030E-02 5.4310E-03 2.2360E-03 1.4540E-02 3.2430E-02

3.7400E-02 3.2540E-03 6.3770E-03 7.1600E-03 4.8760E-03 1.9330E-03 9.6630E-03

1.7080E-02 1.9130E-02 1.5690E-02 5.1100E-03 1.1500E-02 5.3230E-03 3.8060E-03

1.2350E-02 1.3030E-02 7.6480E-03 3.3620E-03 1.4590E-02 1.5700E-02 1.0290E-02

2.2780E-02 1.4010E-01 1.4270E+00 5.0750E-03 5.6340E-02 1.8460E-01 1.3160E-01

9.7110E-04 1.5710E-02 1.4380E-01 7.4190E-01 1.1240E-02 7.9850E-02 1.9570E-01

6.9350E-04 2.6830E-03 3.7910E-03 3.1280E-03 1.3040E-03 1.1620E-03 8.8240E-04

1.5910E-03 1.4240E-03 3.5930E-03 2.0140E-03 1.0480E-04 1.3280E-03 7.1380E-03

2.0720E-02 7.5280E-06 1.5440E-03 1.3550E-02 2.3610E-02 4.2170E-06 7.6890E-05

3.5540E-02 8.7070E-02 2.3010E-04 2.8990E-03 1.1190E-02 1.3430E-02 1.7060E-03

5.7200E-03 3.9080E-03 2.9030E-03 1.8100E-03 1.1380E-02 9.4960E-03 2.6150E-03

4.4660E-04 5.9790E-03 1.7750E-02 3.9120E-02 7.6130E-04 7.0780E-03 1.3300E-02

1.0840E-02 5.0130E-04 8.5730E-03 1.9160E-02 9.1050E-03 1.5690E-05 3.6150E-03

2.2430E-02 5.8330E-02 1.4910E-02 1.6180E-03 2.3800E-03 3.6460E-03 1.0910E-02

5.4390E-03 2.7100E-03 5.6330E-04 3.4070E-03 1.5890E-02 2.3260E-02 1.2160E-03

3.2350E-03 3.2850E-03 3.2690E-03 2.2850E-04 2.7800E-03 1.0180E-02 1.0480E-02

7.8420E-03 1.8080E-03 6.7370E-03 2.4230E-03 1.0550E-03 5.7360E-03 7.9130E-03

3.7160E-03 6.0910E-04 6.2020E-03 1.1380E-02 3.7690E-03 1.0870E+00 2.4360E-01

7.9580E-01 3.3540E-01 1.0670E-01 2.0090E-02 2.1150E+00 7.0350E-01 1.8640E-01

4.5840E-02 2.2470E+00 1.1150E-01 2.9760E-02 2.1740E-02 1.4270E-02 7.5890E-03

3.1120E-03 1.2860E-02 1.0850E-02 5.2850E-03 3.4820E-02 7.4460E-02 5.0050E-02

2.6310E-02 1.8760E-01 1.0340E-01 4.7680E-02 1.4950E-02 2.2510E-01 9.2800E-02

3.0230E-02 6.2020E-03 1.1350E-03 1.1580E-03 8.1800E-04 3.3890E-04 2.0300E-02

8.6550E-03 3.1440E-03 8.3880E-04 7.8130E-02 2.2740E-02 5.9600E-03 1.5920E-03

3.9520E-02 3.5830E-02 3.2240E-02 2.5070E-02 8.4380E-02 7.7410E-02 4.7100E-02

1.7590E-02 1.3650E-01 6.0070E-02 2.7530E-02 1.1130E-02 8.1670E-02 5.9640E-02

3.2870E-02 1.1640E-02 7.9210E-03 3.5730E-03 1.3850E-03 3.6950E-04 6.2930E-02

2.9760E-02 1.1680E-02 1.2320E-01 7.2130E-02 2.6970E-02 4.8520E-03 4.1430E-02

4.4500E-02 4.6780E-02 4.0090E-02 1.5110E-02 6.0620E-03 2.2520E-03 7.3300E-04

1.2480E-02 9.4690E-03 5.7840E-03 3.3570E-03 2.3620E-02 3.0530E-02 3.2400E-02

2.0280E-02 4.1300E-02 4.8900E-02 4.0690E-02 2.2640E-02 6.5000E-02 5.4320E-02

3.4340E-02 1.7070E-02 8.8980E-01 2.8210E-01 3.0560E-01 2.3040E-01 1.1950E-01

2.8890E-01 1.0570E+00 7.0700E-01 2.3110E-01 3.7500E-01 1.3480E+00 6.7830E-02

1.2210E-02 7.8870E-03 7.7920E-03 7.2420E-03 1.1790E-02 5.8110E-03 4.1570E-03

2.6110E-02 5.6160E-02 4.0610E-02 1.6790E-02 6.7810E-02 7.1470E-02 6.8000E-02

5.7940E-02 2.7250E-02 1.0600E-01 9.0120E-02 4.2420E-02 1.0060E-03 2.3870E-04

5.2020E-04 8.9420E-04 7.3030E-03 7.4120E-03 6.0910E-03 2.7770E-03 1.5570E-02

3.9790E-02 2.1030E-02 5.5020E-03 3.5190E-02 3.3310E-02 2.1110E-02 9.7780E-03

7.3030E-02 1.5010E-02 2.8730E-02 5.3090E-02 3.7870E-02 7.5960E-02 4.8610E-02

2.2310E-02 4.9690E-02 2.3520E-02 2.8710E-02 3.8020E-02 1.3610E-03 3.7290E-03

3.2060E-03 1.7140E-03 3.7620E-02 2.8220E-02 1.4360E-02 6.8070E-02 3.0240E-02

3.9610E-02 3.0820E-02 4.5860E-02 4.8940E-02 2.7190E-02 7.6710E-03 5.0080E-03

6.9260E-03 4.3980E-03 1.7870E-03 8.0770E-03 4.3690E-03 4.7740E-03 5.6450E-03

1.7710E-02 3.4280E-02 2.0060E-02 8.0700E-03 5.2500E-02 3.2910E-02 2.0020E-02

9.6880E-03 5.1790E-02 2.3350E-02 2.5500E-02 2.7480E-02 5.3460E-02 2.0440E-01

2.2510E-01 1.4130E-01 4.7610E-02 2.0050E-01 5.7200E-01 6.9950E-01 6.4790E-02

3.3130E-01 7.9790E-01 3.5860E-03 7.9720E-03 6.7780E-03 4.7500E-03 7.9770E-03

5.1040E-03 1.3720E-03 1.7410E-02 3.8700E-02 2.2940E-02 1.2900E-02 9.6170E-03

4.6080E-02 6.1210E-02 5.9810E-02 1.3070E-03 1.8650E-02 6.0880E-02 9.6350E-02

1.8930E-04 6.6160E-04 6.0330E-04 2.3900E-04 2.0310E-03 4.9710E-03 5.7640E-03

3.2710E-03 3.5960E-03 1.0800E-02 2.1900E-02 1.7560E-02 3.1900E-02 1.6070E-02

1.0550E-02 7.6000E-03 1.2450E-02 4.9130E-02 3.7420E-02 1.4250E-02 1.3250E-02

2.3400E-02 3.8550E-02 4.0860E-02 8.0130E-03 3.3530E-02 3.1340E-02 2.0030E-02

1.5680E-04 8.7200E-04 2.2280E-03 3.2720E-03 1.8810E-02 2.1240E-02 1.3010E-02

1.3170E-02 4.9340E-02 3.5640E-02 1.5440E-02 5.1510E-02 1.7750E-02 9.3200E-03

8.4870E-03 1.6230E-03 3.3190E-03 4.2230E-03 2.9160E-03 2.1410E-03 5.2180E-03

4.6860E-03 3.0440E-03 1.1810E-02 2.8800E-02 9.9500E-03 2.8580E-03 4.4430E-02

2.1830E-02 8.3670E-03 2.1920E-03 2.0400E-02 3.2150E-02 2.2480E-02 1.0370E-02

1.8010E+00 3.5390E-01 5.2450E-02 6.5280E+00 2.3730E+00 5.1040E-01 8.8090E-02

2.0620E+00 8.9800E-01 4.4670E-02 2.3660E-01 1.7800E-01 6.9490E-02 2.5430E-02

6.7060E-02 2.4990E-02 9.0260E-03 5.1760E-02 1.0500E-01 3.8560E-02 5.7890E-03

1.6480E-01 7.0140E-02 2.6400E-02 6.8130E-03 6.8070E-02 3.5750E-02 1.5190E-02

3.9790E-03 6.2790E-02 2.3140E-02 6.8000E-03 1.5720E-03 2.6730E-01 7.7650E-02

1.5300E-02 1.6980E-03 1.8930E-01 4.8330E-02 1.9450E-02 8.3390E-03 1.9040E-01

6.5540E-02 1.9640E-02 4.8660E-03 9.6920E-02 3.5020E-02 1.0680E-02 2.7090E-03

1.7870E-01 6.4170E-02 2.0450E-02 5.9290E-03 6.6950E-02 2.6760E-02 8.2880E-03

1.7180E-03 3.6620E-02 1.6410E-02 5.4030E-03 1.1230E-03 5.9540E-02 2.6590E-02

2.2740E-03 6.2510E-02 2.9020E-02 1.3710E-02 4.9250E-03 4.3240E-02 1.7340E-02

6.5430E-03 2.0430E-03 3.1460E-02 1.9630E-02 9.1610E-03 2.4960E-03 1.6750E-02

7.6200E-03 2.5490E-03 9.0830E-04 1.2680E-02 9.0240E-03 4.6580E-03 1.4960E-03

1.2610E-02 6.1130E-03 3.2300E-03 1.3580E-03 1.5130E-02 6.3020E-03 2.0600E-03

4.5500E-04 1.4980E+00 3.6530E-01 1.7810E+00 2.5360E+00 2.2460E+00 5.9690E-01

1.1660E+00 4.6520E-01 6.2050E-01 1.0770E-01 6.9480E-02 5.0700E-02 6.3380E-02

3.4990E-02 2.9720E-02 1.1590E-02 3.8790E-02 5.3990E-02 3.3910E-02 2.4190E-02

4.7490E-02 7.3680E-02 5.1520E-02 2.9470E-02 2.4440E-02 2.6250E-02 2.4260E-02

1.7230E-02 8.9390E-03 3.1510E-02 2.2310E-02 8.2460E-03 7.6990E-02 1.1230E-01

6.2540E-02 1.6840E-02 4.8150E-02 1.0570E-01 3.4000E-02 9.9020E-03 4.7670E-02

8.8980E-02 5.3220E-02 2.1040E-02 1.9940E-02 4.9420E-02 3.0390E-02 1.1950E-02

4.7440E-02 8.3720E-02 5.1020E-02 2.0700E-02 1.6080E-02 2.9200E-02 2.2490E-02

9.7460E-03 9.8170E-03 1.4560E-02 1.4040E-02 6.3280E-03 3.4970E-02 1.3310E-02

1.8130E-02 2.9010E-02 3.0030E-02 1.5470E-02 8.8810E-03 1.3550E-02 1.9640E-02

1.2430E-02 6.5950E-03 1.9640E-02 1.1480E-02 8.6000E-03 6.9960E-03 5.2500E-03

6.9210E-03 6.0580E-03 2.8360E-03 9.5120E-03 5.6980E-03 3.3490E-03 2.3360E-03

6.1120E-03 5.7840E-03 3.6980E-03 1.7150E-03 4.9960E-03 6.0810E-03 4.6190E-03

2.2690E-03 9.6680E-01 1.3800E-01 1.7900E+00 1.1330E+00 1.7190E+00 4.3540E-01

6.4490E-01 4.2490E-01 3.8000E-02 9.0300E-02 4.4000E-02 3.3220E-02 1.7370E-02

2.0310E-02 1.2240E-02 2.5840E-02 2.1750E-02 3.1870E-02 2.1150E-02 1.1090E-02

3.1060E-02 5.0260E-02 4.2210E-02 5.2080E-03 1.6100E-02 1.8740E-02 2.1330E-02

5.5390E-04 8.1780E-03 1.9720E-02 1.8560E-02 1.5090E-02 6.2400E-02 6.2080E-02

4.0180E-02 1.9390E-02 3.4870E-02 5.8700E-02 1.8710E-02 1.0230E-02 3.6830E-02

5.4340E-02 4.0020E-02 3.1160E-03 1.6200E-02 3.0390E-02 2.4250E-02 1.1270E-02

3.5970E-02 5.0230E-02 3.7890E-02 2.2880E-03 1.3110E-02 1.6960E-02 1.8320E-02

5.9970E-04 8.7630E-03 8.0590E-03 1.1830E-02 1.3760E-02 1.8620E-02 1.2130E-02

1.3700E-02 1.5470E-02 1.8760E-02 7.1450E-03 4.0560E-03 8.8920E-03 1.2420E-02

8.9470E-03 9.1610E-03 8.5970E-03 9.8750E-03 3.5950E-03 1.0750E-03 4.1850E-03

3.9840E-03 4.7810E-03 6.3420E-03 3.0240E-03 2.8730E-03 1.6930E-03 3.2300E-03

3.6970E-03 3.0070E-03 1.8100E-03 1.1130E-03 3.6100E-03 3.7670E-03 3.4880E-03

3.3940E-02 1.1140E-01 1.2310E+00 1.0140E+00 8.3510E-02 5.0540E-01 1.6320E-01

1.3120E-02 2.7140E-02 2.2840E-02 2.2120E-02 7.1840E-03 9.4500E-03 8.4080E-03

1.2910E-02 6.0450E-03 1.9960E-02 1.0930E-02 9.4050E-04 1.1350E-02 2.1370E-02

3.3340E-02 7.0380E-05 5.6420E-03 1.1630E-02 1.3300E-02 8.4590E-05 7.3470E-04

5.7940E-03 1.7440E-02 1.6980E-03 1.6690E-02 4.0120E-02 3.1140E-02 8.3380E-03

9.8350E-03 1.8770E-02 2.8560E-02 1.8590E-03 9.2240E-03 2.4320E-02 3.4560E-02

6.3240E-04 2.6550E-03 1.0970E-02 2.2600E-02 2.5730E-03 9.4740E-03 2.3500E-02

3.2250E-02 1.9620E-04 2.3380E-03 9.0160E-03 1.3500E-02 8.0510E-05 5.5740E-04

6.1400E-03 7.7270E-03 3.0980E-03 1.4600E-02 4.3230E-03 4.9250E-03 8.8790E-03

7.1430E-03 6.7380E-03 8.8240E-04 3.4540E-03 5.7700E-03 7.4140E-03 2.4960E-03

6.9960E-03 3.5950E-03 2.2770E-03 3.1280E-04 7.9430E-04 2.8030E-03 3.1800E-03

3.1710E-03 1.2260E-03 1.7700E-03 7.9890E-04 1.3580E-03 1.7150E-03 1.8100E-03

1.1470E-03 1.2700E-04 1.1180E-03 2.3910E-03 2.3460E-03 2.4280E+00 3.1690E-01

3.8070E-02 7.6580E+00 3.2900E-01 1.5730E-01 2.6990E-01 1.3050E-01 4.8040E-02

2.0970E-02 4.6560E-02 2.2090E-02 4.9990E-03 3.7420E-03 3.4220E-02 7.0990E-03

1.8460E-03 9.5720E-02 3.7420E-02 1.2560E-02 2.3650E-03 6.0560E-02 2.6180E-02

1.1000E-02 2.6190E-03 7.2130E-02 2.9910E-02 1.0060E-02 1.7450E-03 1.4230E-01

4.5490E-02 6.4570E-03 9.9020E-04 1.4220E-01 5.0240E-02 1.1340E-02 1.8370E-03

4.2800E-02 1.8070E-02 7.2910E-03 2.1720E-03 8.0970E-02 3.1260E-02 9.5840E-03

1.7970E-03 2.0180E-01 5.4130E-02 1.4340E-02 2.0670E-03 9.1980E-02 2.6740E-02

7.1740E-03 1.4340E-03 1.7880E-01 5.7700E-02 1.6040E-02 3.0840E-03 9.1110E-02

2.4060E-02 1.3620E-02 4.0550E-02 2.1070E-02 7.8050E-03 1.6500E-03 5.8540E-02

2.0680E-02 6.6020E-03 1.7620E-03 1.6980E-02 6.9950E-03 2.2200E-03 4.3110E-04

2.2430E-02 1.0620E-02 3.6370E-03 9.5290E-04 1.9040E-02 1.8310E-02 6.3880E-03

2.4440E-03 2.0450E-02 1.0050E-02 3.5500E-03 6.3180E-04 2.4600E-02 1.2460E-02

5.7500E-03 2.0830E-03 2.5120E+00 3.6360E-01 2.6700E+00 3.6800E+00 1.3570E-01

9.2140E-02 1.7960E-01 1.1110E-01 3.8960E-02 3.1110E-02 1.6150E-02 1.2160E-02

2.9930E-03 1.6040E-02 1.4910E-02 3.6950E-03 3.2900E-02 4.4530E-02 2.7930E-02

1.3880E-02 2.0690E-02 3.0540E-02 1.7350E-02 1.1980E-02 2.1270E-02 3.4260E-02

2.4280E-02 1.1520E-02 5.7530E-02 5.1720E-02 4.0210E-02 6.0420E-03 6.1690E-02

5.6040E-02 3.6450E-02 1.0710E-02 1.8050E-02 2.0160E-02 1.1310E-02 6.7380E-03

2.6560E-02 3.6490E-02 2.5780E-02 1.0260E-02 5.4060E-02 1.0620E-01 4.1860E-02

1.5910E-02 2.1210E-02 4.9910E-02 2.3230E-02 7.9130E-03 4.0810E-02 8.6140E-02

5.1900E-02 1.8040E-02 4.6260E-02 4.9080E-02 8.4690E-03 2.3900E-02 1.5400E-02

1.0780E-02 6.7530E-03 2.0680E-02 2.7570E-02 1.5590E-02 6.4170E-03 8.3360E-03

6.6050E-03 4.1530E-03 1.9750E-03 9.3160E-03 9.1330E-03 7.9260E-03 3.8310E-03

1.5240E-02 1.0380E-02 8.3790E-03 2.8780E-03 1.1530E-02 7.5790E-03 5.3210E-03

3.2100E-03 1.2460E-02 1.0420E-02 6.7650E-03 5.1490E-03 1.9400E+00 8.0380E-01

2.6300E+00 1.4400E+00 4.4460E-02 6.8230E-02 1.3730E-01 8.2750E-02 1.7500E-02

1.6210E-02 1.0590E-02 2.2450E-03 7.1760E-03 1.1820E-02 6.9400E-03 8.8910E-03

2.2980E-02 3.1990E-02 2.4430E-02 7.2240E-03 1.2410E-02 2.4370E-02 1.6530E-02

4.4510E-03 1.6730E-02 2.4870E-02 2.2310E-02 1.5510E-02 4.8880E-02 2.5480E-02

2.7250E-02 2.0980E-02 4.5340E-02 3.3480E-02 2.3760E-02 7.2880E-03 1.1300E-02

1.4720E-02 8.9580E-03 6.5950E-03 2.1720E-02 2.4030E-02 2.1590E-02 1.4330E-02

4.1810E-02 7.3680E-02 3.3640E-02 4.7850E-03 1.7670E-02 3.4820E-02 1.9410E-02

7.6720E-03 3.5620E-02 6.0450E-02 4.4660E-02 2.6850E-02 3.3760E-02 1.6940E-02

1.1150E-02 1.2550E-02 1.2340E-02 6.2890E-03 6.6030E-03 1.5590E-02 1.8290E-02

1.2120E-02 3.4500E-03 5.1040E-03 4.6600E-03 2.5710E-03 2.6680E-03 6.8830E-03

6.3890E-03 6.8320E-03 1.1430E-02 6.0030E-03 6.6050E-03 3.7100E-03 5.2590E-03

6.5030E-03 5.9000E-03 3.2090E-03 5.7480E-03 6.7620E-03 7.9080E-03 5.1610E-03

2.4820E-01 9.3560E-01 2.0560E+00 2.0260E-02 3.7840E-02 5.8660E-02 3.9910E-02

8.2720E-03 1.4510E-02 6.6150E-03 1.4970E-03 3.0050E-03 6.5920E-03 7.6440E-03

1.1640E-03 9.6710E-03 1.9730E-02 2.8350E-02 8.4920E-04 7.7660E-03 1.1460E-02

2.0260E-02 1.4430E-04 5.0800E-03 1.4510E-02 2.5900E-02 3.0760E-03 1.7580E-02

3.7210E-02 2.0230E-02 5.2680E-03 2.2070E-02 3.3780E-02 2.1150E-02 2.1720E-03

6.7370E-03 8.8270E-03 1.0020E-02 9.4710E-04 6.7460E-03 1.7970E-02 2.4190E-02

2.0670E-03 1.5900E-02 3.3620E-02 5.6980E-02 7.7930E-04 5.0910E-03 1.4330E-02

3.0830E-02 1.0750E-03 8.2120E-03 2.9040E-02 6.0730E-02 1.6090E-02 1.4190E-02

2.0940E-02 3.8660E-03 1.0570E-02 8.7100E-03 4.9870E-03 1.7620E-03 6.4160E-03

1.2120E-02 1.4680E-02 1.0550E-03 3.4070E-03 3.6860E-03 2.2210E-03 5.6830E-04

2.7130E-03 5.6990E-03 5.8780E-03 7.6180E-03 3.2770E-03 3.9750E-03 3.5750E-03

1.6380E-03 5.1510E-03 4.6170E-03 2.5570E-03 2.0820E-03 5.1490E-03 5.1600E-03

4.8610E-03 3.1280E-01 7.6460E-02 7.3540E-02 4.2940E-02 2.3860E-02 1.2570E-02

1.4020E-01 7.1040E-02 1.1640E-02 1.6420E-02 3.1850E-02 1.4010E-02 6.7270E-03

2.3680E-02 1.4640E-02 7.8680E-03 3.2520E-03 1.2250E-02 7.1090E-03 4.0780E-03

1.4550E-03 3.3130E-03 2.3520E-03 1.4610E-03 5.2000E-04 4.1320E-02 2.0550E-02

8.5410E-03 2.6560E-03 6.5610E-02 4.1630E-02 1.7400E-02 3.7850E-03 1.9360E-02

1.5980E-02 1.1480E-02 7.3680E-03 3.4980E-02 2.3690E-02 1.3330E-02 5.6200E-03

1.0940E-01 4.3070E-02 1.5150E-02 5.2790E-03 2.9560E-02 1.9970E-02 1.2260E-02

6.9870E-03 8.4360E-03 4.1140E-03 1.7970E-03 5.6590E-04 1.2730E-01 2.6770E-02

7.8010E-03 8.8030E-02 3.4680E-02 1.2280E-02 3.8900E-03 9.2370E-02 4.5220E-02

2.2820E-02 1.1590E-02 3.4350E-02 1.7710E-02 6.8480E-03 1.4500E-03 8.4450E-03

6.4250E-03 4.0860E-03 2.1520E-03 2.8990E-02 2.2870E-02 1.2440E-02 7.1420E-03

1.2650E-02 1.0480E-02 7.1310E-03 3.4400E-03 1.3500E-02 8.8630E-03 5.1930E-03

2.6550E-03 1.9880E-01 2.6960E-02 3.1330E-02 2.6240E-02 1.7470E-02 6.9590E-02

2.6820E-02 5.1690E-02 1.0950E-02 1.3980E-02 1.5570E-02 5.1720E-03 8.5170E-03

9.4330E-03 8.4290E-03 8.4740E-03 2.8310E-03 4.5510E-03 4.6900E-03 4.0980E-03

1.3220E-03 6.0080E-04 1.2580E-03 1.5120E-03 1.4290E-02 1.4660E-02 1.2450E-02

7.1890E-03 3.4300E-02 1.2110E-02 2.0920E-02 1.7770E-02 1.3230E-02 1.0110E-02

7.7930E-03 5.2110E-03 1.5620E-02 9.8440E-03 1.1900E-02 1.4330E-02 1.0480E-02

5.1120E-02 3.8110E-02 1.5870E-02 1.2810E-02 1.1690E-02 1.1230E-02 1.0180E-02

8.6110E-04 3.4930E-03 3.3450E-03 2.1820E-03 2.6770E-02 6.5280E-02 1.5840E-02

1.8380E-02 3.8280E-02 2.5380E-02 1.0110E-02 2.1260E-02 4.4620E-02 3.3320E-02

1.6290E-02 1.3450E-02 7.4150E-03 1.0650E-02 7.4130E-03 4.7380E-03 2.6690E-03

3.0390E-03 3.6200E-03 1.9330E-02 1.2440E-02 1.3590E-02 3.0530E-03 9.6860E-03

6.0630E-03 4.3460E-03 2.4400E-03 6.1570E-03 5.1440E-03 4.7720E-03 4.2540E-03

8.9030E-03 1.3110E-02 1.5340E-02 1.3640E-02 1.1620E-02 5.1110E-02 1.1310E-02

5.4730E-03 6.7010E-03 5.1710E-03 5.6190E-03 8.1460E-04 4.9060E-03 5.7350E-03

5.9960E-03 1.1100E-04 1.6960E-03 2.8160E-03 3.2730E-03 1.2080E-04 7.5510E-04

9.1030E-04 7.5280E-04 2.7880E-03 8.6110E-03 8.2750E-03 4.8640E-03 2.5380E-03

2.2500E-02 1.3220E-02 3.6650E-03 6.3350E-03 5.3310E-03 3.8840E-03 2.4060E-03

1.1920E-03 9.3600E-03 9.1900E-03 5.9410E-03 3.1290E-03 5.3230E-03 2.1250E-02

2.7410E-02 3.3900E-03 6.6120E-03 6.9900E-03 5.7970E-03 5.8470E-05 5.0490E-04

1.6840E-03 2.6280E-03 7.8000E-03 1.5840E-02 2.9680E-02 4.4570E-03 1.0310E-02

1.7760E-02 1.3480E-02 8.7610E-03 9.2640E-03 1.8110E-02 2.1170E-02 9.5490E-04

9.0870E-03 6.2790E-03 2.4870E-03 8.6380E-04 2.6290E-03 2.2530E-03 1.2610E-03

9.6640E-03 7.1400E-03 3.0530E-03 4.0650E-03 4.4840E-03 3.7400E-03 2.0500E-03

9.1300E-04 1.7710E-03 3.1940E-03 2.9420E-03 2.0570E-03 5.1430E+00 5.2020E-01

1.4430E-01 2.0040E+00 2.8780E-01 5.1330E-02 2.4940E-02 3.8790E-02 1.4790E-02

2.9950E-03 1.2530E+00 1.3810E-01 1.9340E-02 2.7580E-03 1.3530E-01 4.0960E-02

1.1090E-02 1.6420E-03 1.4300E-01 4.9310E-02 1.2790E-02 1.3920E-03 1.5050E-01

2.8620E-02 1.0320E-02 3.4330E-03 2.8000E-01 3.8000E-02 1.2020E-02 2.8790E-03

4.1530E-01 7.4550E-02 1.4780E-02 3.1380E-03 3.4570E-01 6.4640E-02 1.4400E-02

2.5020E-03 8.7690E-01 1.1810E-01 1.3680E-02 2.5560E-03 1.1900E+00 1.7020E-01

2.8440E-02 4.8830E-03 1.2710E-01 4.9470E-02 1.4970E-02 2.6470E-03 2.9860E-02

9.3280E-03 1.3970E-03 4.4550E-02 1.3560E-02 4.0980E-03 1.2020E-03 1.1880E-01

3.4640E-02 1.4000E-02 3.9740E-03 1.3870E+01 3.8830E-01 5.8030E-02 2.5060E-02

2.9850E+01 3.6700E+00 3.2140E-01 4.2360E-02 7.7120E-02 5.4170E-02 2.5740E-02

3.2090E-03 5.5090E+00 1.7590E-01 8.2700E-03 3.3950E-03 1.7200E+01 2.1650E+00

1.0420E-01 1.1180E-02 5.7510E+00 4.9990E-01 8.5010E-01 8.6910E-01 1.6110E-01

1.9950E-02 2.3090E-02 1.3990E-02 7.5400E-03 5.0790E-02 9.2640E-01 1.5480E-01

2.1940E-02 2.7480E-02 6.7650E-02 3.6950E-02 1.2860E-02 4.3540E-02 7.1820E-02

6.4420E-02 1.4970E-02 3.7300E-02 8.0740E-02 1.7520E-02 6.4200E-03 6.3800E-02

1.6250E-01 2.4810E-02 9.8840E-03 7.1790E-02 2.4160E-01 6.7880E-02 1.5810E-02

3.6750E-02 2.1920E-01 6.5650E-02 1.6610E-02 1.1490E-01 5.5300E-01 1.2930E-01

1.4900E-02 6.6170E-02 8.7140E-01 1.7940E-01 3.2270E-02 3.7480E-02 5.9760E-02

4.1540E-02 1.7040E-02 1.6230E-02 1.0760E-02 5.4480E-03 1.7440E-02 2.1700E-02

9.9650E-03 2.8390E-03 3.4430E-02 6.4950E-02 2.3550E-02 1.3170E-02 2.4030E+00

9.0130E+00 3.5970E-01 3.4510E-02 1.1920E+00 2.1320E+01 4.2900E+00 3.7830E-01

6.1690E-02 3.5860E-02 1.5440E-02 1.6690E-02 8.1840E-01 3.5480E+00 1.7960E-01

5.4030E-03 2.1490E+00 1.0810E+01 2.5380E+00 1.2620E-01 4.3330E+00 3.2350E-01

6.8390E-01 4.0100E-01 1.4960E-02 1.2070E-02 1.3300E-02 8.1310E-03 9.2910E-03

4.5820E-02 6.8920E-01 1.2220E-01 5.2200E-03 2.3240E-02 4.8340E-02 3.1930E-02

1.5500E-03 4.2340E-02 4.8890E-02 5.4930E-02 1.4060E-02 2.8990E-02 5.3850E-02

1.0380E-02 1.9260E-02 5.4790E-02 1.0620E-01 1.5460E-02 1.4780E-02 6.4890E-02

1.6470E-01 5.1070E-02 8.6570E-03 3.3310E-02 1.7880E-01 5.4620E-02 1.3240E-02

1.2890E-01 4.0230E-01 9.8790E-02 1.4610E-02 6.8840E-02 6.7390E-01 1.4500E-01

7.6860E-03 3.1130E-02 4.1480E-02 3.6630E-02 7.7250E-03 1.0090E-02 6.7240E-03

6.6690E-03 1.3150E-02 1.3960E-02 6.1050E-03 1.3920E-02 2.3520E-02 4.7640E-02

1.8440E-02 2.3250E-01 2.5150E+00 5.7600E+00 2.3900E-01 9.9000E-02 1.3910E+00

1.5510E+01 3.3340E+00 4.6280E-02 1.8980E-02 1.8060E-02 1.4450E-02 7.9490E-02

9.5840E-01 2.2480E+00 1.2440E-01 9.7180E-02 2.5360E+00 7.1770E+00 1.9220E+00

1.1270E-01 3.4990E-01 4.7590E-01 9.9770E-03 5.3360E-03 9.9780E-03 6.5570E-03

1.3690E-03 1.0030E-02 3.6550E-02 5.2840E-01 1.6930E-04 5.9640E-03 1.9360E-02

5.0070E-02 8.4780E-05 1.8920E-03 3.3460E-02 5.4400E-02 6.2550E-03 1.1720E-02

2.1170E-02 3.0500E-02 6.1420E-03 1.9030E-02 4.1640E-02 6.4840E-02 3.1370E-03

1.5810E-02 5.1820E-02 1.2880E-01 1.1680E-03 9.6970E-03 2.6900E-02 1.6080E-01

2.4940E-03 1.4780E-02 9.7810E-02 2.9480E-01 2.4380E-03 1.6200E-02 5.5240E-02

5.3330E-01 6.9690E-04 8.5480E-03 2.5860E-02 4.2730E-02 2.9370E-03 7.7120E-03

5.6610E-03 2.4050E-03 5.8140E-03 9.4180E-03 7.6390E-03 3.9690E-03 1.3150E-02

1.8420E-02 3.2770E-02 4.8450E-02 2.6710E-01 1.9050E+00 3.5660E+00 2.3670E-02

1.0520E-01 1.0620E+00 1.2320E+01 3.0850E-02 7.6140E-03 2.0330E-02 7.1930E-03

7.4170E-03 9.9930E-02 7.3360E-01 1.4830E+00 9.1310E-03 1.2500E-01 1.9210E+00

5.7530E+00 1.7530E+00 1.9400E-01 6.5190E-01 5.8710E-01 2.6690E-01 1.1570E-02

4.0900E-02 2.0870E-02 9.9800E-03 4.6900E-03 1.1820E-02 6.4120E-03 3.1290E-03

1.1320E-03 1.7850E-02 9.0690E-03 4.0970E-03 1.4190E-03 6.5240E-02 4.7830E-02

3.6080E-02 2.0280E-02 3.6930E-01 9.9200E-02 2.1750E-02 5.6490E-03 4.3180E-02

2.4110E-02 1.2830E-02 5.8280E-03 2.9470E-02 1.6460E-02 9.1520E-03 4.7980E-03

3.4060E-02 2.0480E-02 1.0300E-02 4.4040E-03 4.2780E-02 2.1190E-02 9.5350E-03

3.9270E-03 2.8050E-02 1.6840E-02 7.9230E-03 3.4950E-03 8.1030E-01 3.5540E-01

9.9500E-03 5.2920E-01 1.4500E-01 3.1030E-02 5.3940E-03 6.9830E-02 5.0900E-02

2.9120E-02 1.2820E-02 1.0760E+01 2.6670E+00 4.8660E-01 6.0070E-02 3.8200E-01

1.8620E-01 9.0900E-02 4.5990E-02 5.7120E+00 8.4440E+00 3.6570E+00 8.6930E-02

9.1980E+00 2.2760E+00 3.1940E-01 1.7190E-02 6.0570E-02 2.4930E-02 9.6480E-03

3.5790E-03 1.3930E+00 4.3160E-01 2.6230E-01 8.6920E-02 2.2840E-01 7.8640E-03

1.7100E-02 1.5450E-02 1.0190E-02 2.2630E-03 4.8050E-03 4.5600E-03 3.6560E-03

2.2200E-03 7.0210E-03 7.2340E-03 5.2230E-03 4.1890E-02 4.3650E-02 2.2010E-02

6.1080E-03 1.8930E-02 1.9160E-01 1.0150E-01 2.0390E-02 1.5180E-02 1.6270E-02

1.4910E-02 1.1150E-02 7.8430E-03 1.3190E-02 1.1490E-02 7.5770E-03 1.2410E-02

1.2780E-02 1.1660E-02 9.5110E-03 7.5010E-03 1.7470E-02 1.5940E-02 1.0700E-02

6.6880E-03 1.0610E-02 1.0780E-02 9.6600E-03 3.5350E-01 1.1240E-01 3.1680E-01

3.0910E-02 2.6480E-01 1.4580E-01 3.3880E-02 3.9550E-02 2.0430E-02 2.3550E-02

2.6040E-02 2.5140E-01 5.3670E+00 2.8230E+00 5.4370E-01 6.5930E-02 1.7060E-01

1.4570E-01 8.3940E-02 3.7980E+00 3.6300E+00 1.2740E+00 3.2540E+00 1.8380E-01

4.5300E+00 2.4190E+00 4.8090E-01 8.2080E-03 2.6870E-02 2.0820E-02 9.9520E-03

2.1450E-01 1.1510E-02 2.2630E-01 4.7120E-02 1.4640E-03 4.2100E-03 8.4670E-03

1.0740E-02 1.1430E-04 1.3540E-03 2.6030E-03 3.5870E-03 3.2270E-05 1.1770E-03

3.6030E-03 5.8330E-03 2.8260E-02 1.0570E-02 1.0060E-02 6.5850E-03 7.2240E-03

8.4240E-03 7.6660E-02 7.3710E-02 3.4860E-03 8.3200E-03 9.3950E-03 7.5910E-03

2.2660E-03 3.9680E-03 6.1110E-03 7.3770E-03 1.5110E-03 6.9810E-03 7.4770E-03

6.1320E-03 1.2250E-03 4.2450E-03 8.8730E-03 1.1430E-02 7.8030E-04 3.8370E-03

6.6120E-03 7.3510E-03 9.9120E-03 3.1640E-01 6.5300E-02 5.4820E-03 1.8460E-02

1.1030E-01 1.0270E-01 6.4950E-03 2.2610E-02 1.7320E-02 7.7050E-03 7.0830E-02

1.3270E-01 2.1490E+00 2.0870E+00 2.4610E-02 3.1480E-02 7.5160E-02 1.0530E-01

1.8930E+00 8.6920E-02 3.2090E+00 7.3320E-01 8.4120E-03 1.2670E-01 1.8640E+00

1.8940E+00 1.9660E-03 4.4700E-03 1.1760E-02 1.5690E-02 1.4890E+00 9.9260E-01

4.9640E-01 6.2600E-02 5.2160E-02 4.1730E-02 3.1300E-02 2.8430E-04 2.4370E-04

2.0310E-04 1.6250E-04 1.2190E-03 1.0670E-03 9.1440E-04 7.6200E-04 3.6140E+00

2.7200E+00 1.8180E+00 9.1040E-01 1.0480E-01 7.8580E-02 5.2410E-02 2.6220E-02

4.4560E-03 3.5660E-03 2.6740E-03 1.7830E-03 2.0230E-02 1.6850E-02 1.3480E-02

1.0110E-02 2.0360E-02 1.6290E-02 1.2220E-02 8.1440E-03 1.6020E-02 1.3340E-02

1.0680E-02 8.0100E-03 2.4970E-04 2.1410E-04 1.7840E-04 1.4270E-04 2.9800E-02

1.9860E-02 9.9310E-03 2.7680E-02 2.0830E-02 1.3910E-02 6.9590E-03 1.6900E-02

1.3520E-02 1.0140E-02 6.7600E-03 5.6160E-02 4.2190E-02 2.8150E-02 1.4080E-02

7.3110E-03 6.0930E-03 4.8750E-03 3.6560E-03 2.1960E-02 1.5080E-02 1.0050E-02

5.0280E-03 4.2830E-02 3.2900E-02 2.1950E-02 1.0980E-02 3.1470E-03 2.5180E-03

1.8880E-03 1.2590E-03 2.3690E+00 1.1620E+00 3.0830E-02 2.1380E-02 1.2200E-02

5.4320E-03 6.0540E-02 2.2920E-02 8.5810E-03 2.3690E-03 1.0870E-03 9.0140E-04

5.9100E-04 3.2140E-04 6.2880E+00 4.1230E+00 1.6560E+00 3.2690E-01 8.1090E-02

4.7100E-02 2.1190E-02 6.7900E-03 9.8030E-02 7.4250E-02 6.0370E-02 4.3460E-02

5.6380E-02 4.2610E-02 2.8270E-02 1.6260E-02 3.7160E-02 2.2400E-02 1.2700E-02

6.4590E-03 2.4800E-02 1.1450E-02 4.5830E-03 1.4480E-03 1.7250E-02 6.5820E-03

2.6250E-03 1.0510E-03 3.1690E-02 3.1830E-02 2.0030E-02 5.6980E-02 3.2920E-02

1.5650E-02 5.5090E-03 6.0880E-02 3.0960E-02 1.5010E-02 6.3010E-03 7.2950E-02

4.5600E-02 2.1640E-02 7.4880E-03 7.0530E-03 6.6740E-03 3.3400E-03 1.3330E-03

1.9800E-02 3.3570E-02 3.3680E-02 2.1640E-02 6.0240E-02 4.4500E-02 2.0470E-02

5.3440E-03 4.1570E-02 1.5640E-02 5.8580E-03 2.1030E-03 8.1840E-01 1.4060E-02

4.3650E-03 9.2520E-03 1.2470E-02 2.8370E-03 2.6390E-02 2.5600E-02 1.1570E-02

6.1600E-04 3.0520E-04 3.8830E-04 6.0890E-04 3.4430E+00 9.3790E-01 2.0290E+00

1.8880E+00 3.6540E-02 2.3520E-02 2.5340E-02 1.7240E-02 6.0380E-02 6.3720E-02

4.0960E-02 1.7900E-02 3.1390E-02 2.0560E-02 2.1170E-02 2.2540E-02 1.4940E-02

1.4510E-02 1.2860E-02 9.6720E-03 3.1250E-03 1.0170E-02 9.1970E-03 5.7030E-03

1.1430E-03 5.9070E-03 5.6150E-03 3.4290E-03 3.1750E-02 1.8150E-02 5.7590E-03

2.5370E-02 1.9750E-02 1.7780E-02 1.1080E-02 1.6910E-02 2.2910E-02 2.0990E-02

1.4090E-02 3.7430E-02 2.1580E-02 2.3190E-02 1.6590E-02 3.2200E-03 2.1390E-03

2.4780E-03 3.7040E-03 1.3200E-02 3.3660E-02 2.0050E-02 5.5460E-03 3.9290E-02

8.6210E-03 2.0000E-02 1.8900E-02 4.7910E-03 1.7040E-02 1.3080E-02 6.2090E-03

9.4410E-04 8.2740E-03 8.1010E-03 2.4840E-03 1.0640E-04 1.6900E-03 9.9400E-03

2.0470E-02 6.0520E-05 3.4950E-04 3.4700E-04 1.7790E-04 1.7830E-01 2.3930E+00

1.2940E+00 2.8520E-01 7.1940E-03 2.1610E-02 1.6030E-02 6.2660E-03 3.8690E-02

1.8930E-02 1.7240E-02 1.6080E-02 7.8720E-03 1.6450E-02 1.4380E-02 9.0880E-03

4.3530E-03 7.6340E-03 8.0120E-03 6.1710E-03 2.6140E-04 1.8750E-03 5.0150E-03

6.9470E-03 7.8940E-05 6.7720E-04 2.7350E-03 4.5550E-03 1.9950E-02 5.7560E-03

2.1700E-03 6.2720E-03 1.4220E-02 1.1230E-02 5.4850E-03 3.4730E-03 9.6100E-03

1.2280E-02 1.1350E-02 8.1380E-03 2.1630E-02 1.4220E-02 5.2940E-03 3.9160E-04

1.8770E-03 2.1160E-03 1.2240E-03 6.6010E-03 2.1620E-02 5.5440E-03 2.4550E-03

5.1170E-03 2.4960E-02 1.1910E-02 1.5230E-03 1.1280E-03 2.4820E-03 8.1390E-03

9.5970E-03 1.5950E+00 5.2000E-02 6.5280E-03 2.7200E+00 1.0490E+00 1.0970E-01

6.3750E-03 5.0650E+00 1.2130E+00 1.7390E-01 1.0780E-02 5.8930E-02 1.2950E-02

3.0920E-03 7.3030E-04 2.3980E+00 2.5010E-01 5.9330E-03 8.2570E-04 2.2550E+00

4.5020E-01 4.6250E-02 2.1180E-03 9.1370E-01 3.4600E-01 3.9680E-02 2.0080E-03

4.3420E-01 1.3770E-01 3.7260E-02 6.7590E-03 6.8570E-01 1.8720E-01 4.6650E-02

7.7680E-03 2.8660E-01 1.5380E-01 1.9440E-02 1.6700E-03 3.8440E-02 7.0730E-03

1.7700E-04 1.9200E-01 2.2640E-02 1.6810E-03 9.5310E-05 2.0980E-01 4.0970E-02

3.4290E-03 3.8550E-04 2.0880E-01 2.8360E-02 8.0490E-03 7.1730E-04 8.2800E-02

2.8990E-02 5.4130E-03 7.6700E-04 2.5220E-02 1.0380E-02 5.7230E-03 4.3160E-04

7.1440E-02 7.9220E-03 1.7580E-03 1.4710E-04 1.1330E-01 3.1290E-02 8.2380E-03

1.5760E-03 7.0910E+00 6.1450E-02 8.0190E-01 3.7420E+00 1.2160E+00 1.3020E-01

1.0150E+00 5.0140E+00 2.2250E+00 2.0800E-01 2.0910E-02 2.7750E-02 8.6300E-03

2.4770E-03 6.4810E-01 1.2950E+00 2.5910E-01 4.7810E-03 5.8500E-01 1.2030E+00

4.6360E-01 5.4450E-02 3.4590E-01 9.1780E-01 3.7470E-01 4.6780E-02 1.5010E-01

2.1740E-01 9.8670E-02 3.4370E-02 1.8690E-01 3.6890E-01 1.6210E-01 5.1100E-02

1.2930E-01 3.1880E-01 1.7210E-01 2.2500E-02 1.8970E-02 1.4550E-02 4.4250E-03

5.3780E-02 1.0340E-01 2.0560E-02 1.7870E-03 5.3600E-02 1.1110E-01 4.3770E-02

3.8080E-03 5.9690E-02 1.1770E-01 1.6400E-02 8.1090E-03 2.8970E-02 8.6760E-02

2.9050E-02 6.0020E-03 2.1020E-02 8.3260E-03 2.0260E-03 3.3770E-03 2.0020E-02

4.1390E-02 5.3250E-03 1.7060E-03 3.8600E-02 5.6610E-02 2.5680E-02 8.5340E-03

1.8450E+00 4.7210E-02 9.3090E-01 2.7670E+00 9.7050E-01 1.2030E-02 1.2450E+00

6.3370E+00 1.7590E+00 7.2600E-03 1.7890E-02 1.7810E-02 5.7150E-03 1.2580E-01

6.7720E-01 7.8170E-01 1.8170E-01 9.7730E-02 6.0040E-01 7.6980E-01 3.6190E-01

3.9660E-02 3.7460E-01 6.3560E-01 3.0000E-01 4.7350E-02 1.2140E-01 1.5370E-01

8.0230E-02 4.6490E-02 1.6200E-01 2.7160E-01 1.4020E-01 8.2410E-03 1.4730E-01

2.0300E-01 1.3840E-01 7.9960E-03 1.3950E-02 8.2160E-03 1.1780E-02 5.5210E-02

6.3820E-02 1.4310E-02 8.4480E-03 5.6510E-02 7.1280E-02 3.3700E-02 1.9280E-02

4.9980E-02 8.0280E-02 1.1170E-02 5.4070E-03 2.9050E-02 6.3080E-02 2.3480E-02

1.6810E-02 4.6250E-03 3.4080E-03 3.0740E-03 5.5000E-03 1.8340E-02 2.8940E-02

3.6770E-03 1.0990E-02 3.1680E-02 3.9230E-02 2.0900E-02 1.7110E-03 5.5120E-02

7.2910E-01 2.7500E+00 4.3510E-04 1.4180E-02 9.6390E-01 6.0950E+00 2.4340E-03

7.4700E-03 1.4000E-02 1.2250E-02 1.5160E-02 1.6140E-01 5.4320E-01 6.0620E-01

8.9060E-03 1.1880E-01 4.8650E-01 7.6450E-01 1.9980E-03 4.6770E-02 3.0000E-01

6.8280E-01 1.1600E-02 5.0300E-02 1.0250E-01 1.3600E-01 7.7460E-03 5.1080E-02

1.4020E-01 2.6540E-01 7.9770E-04 9.2890E-03 1.1570E-01 2.6280E-01 2.4520E-03

1.0080E-02 1.0060E-02 1.7660E-03 1.4610E-02 4.4220E-02 4.8200E-02 9.2550E-04

1.0030E-02 4.5290E-02 7.1210E-02 4.8650E-03 2.1690E-02 4.0330E-02 5.3290E-02

7.6620E-04 6.0010E-03 2.3470E-02 6.0430E-02 1.2610E-02 2.2140E-03 4.6000E-03

1.0220E-03 1.1610E-03 6.2340E-03 1.4750E-02 1.8180E-02 2.7990E-03 1.1960E-02

2.6720E-02 3.5620E-02 2.5920E+00 2.3760E-01 7.8450E-03 5.7840E+00 9.4720E-01

1.4780E-01 7.8650E-03 3.4680E-02 8.3070E-03 2.6580E-03 3.9400E-05 6.0070E-02

1.8810E-02 2.2580E-04 6.5310E-06 1.8300E-01 3.2390E-02 2.5480E-03 7.2550E-05

8.7870E-01 3.0230E-01 2.0660E-02 2.1710E-04 1.2740E+00 1.6830E-01 2.8500E-02

2.9570E-03 3.3360E-01 2.4200E-01 2.9550E-02 3.7940E-03 1.0550E+00 4.2450E-01

5.8860E-02 3.4850E-03 1.1620E-02 6.4630E-04 2.4760E-05 6.2070E-02 1.2330E-02

3.4900E-03 3.3310E-05 2.2480E-01 1.3460E-02 1.6190E-03 2.0240E-04 3.4500E-02

1.0250E-02 2.6000E-04 3.3450E-05 2.0690E-01 4.6260E-02 4.6730E-03 2.8390E-04

1.9180E-04 2.0070E-02 3.0450E-03 2.1030E-05 3.7480E-02 1.0790E-02 3.3930E-03

1.9070E-05 3.7460E-01 3.2570E-02 3.3970E-03 5.4250E-05 4.6910E+00 2.7860E-01

7.1260E-01 5.4220E+00 1.8670E+00 2.6160E-01 1.4700E-02 1.8030E-02 3.9260E-03

2.9470E-03 3.1530E-02 1.9830E-02 1.8800E-02 2.4260E-04 4.9470E-02 9.4410E-02

3.3900E-02 2.9610E-03 3.7510E-01 1.1390E+00 3.5110E-01 2.4310E-02 3.0310E-01

7.7350E-01 1.4750E-01 2.9750E-02 2.8400E-01 6.2720E-01 2.4380E-01 3.2510E-02

2.6700E-01 1.2490E+00 4.5790E-01 6.7760E-02 5.2160E-03 5.2470E-03 3.9070E-04

2.3890E-02 3.2250E-02 6.3010E-03 3.8440E-03 3.8550E-02 1.5240E-01 1.3620E-02

1.7460E-03 1.6300E-02 1.1910E-02 1.0200E-02 2.4950E-04 5.5740E-02 1.1750E-01

4.7040E-02 5.3610E-03 1.6440E-04 1.0290E-02 7.7300E-03 1.8550E-03 1.5970E-02

1.6890E-02 4.8660E-03 3.6970E-03 7.8890E-02 2.3900E-01 3.4110E-02 5.1180E-03

3.6780E+00 1.1000E-01 1.4970E+00 6.9550E+00 2.4130E+00 6.2860E-03 1.0420E-02

1.3170E-02 2.8980E-03 8.9190E-03 2.5240E-02 7.8260E-03 1.3300E-02 9.6040E-03

5.0860E-02 6.2470E-02 2.6450E-02 4.3650E-02 4.3260E-01 8.4080E-01 2.7780E-01

6.8770E-02 2.9950E-01 5.5790E-01 1.1980E-01 4.8890E-02 2.9010E-01 4.3710E-01

2.0120E-01 5.8630E-02 4.5380E-01 9.4520E-01 3.7860E-01 1.9570E-03 4.6390E-03

2.1860E-03 9.3310E-03 1.8240E-02 2.3260E-02 4.6340E-03 5.6780E-03 4.3110E-02

1.1250E-01 1.0540E-02 5.0110E-03 1.4290E-02 5.6520E-03 7.1810E-03 8.3380E-03

5.7600E-02 8.5730E-02 3.8720E-02 1.3700E-04 4.5730E-03 7.7400E-03 4.2520E-03

7.8430E-03 1.0670E-02 1.4390E-02 3.5540E-03 1.3790E-02 8.4150E-02 1.7340E-01

2.7130E-02 1.0960E-03 1.2760E-01 2.0010E+00 7.5630E+00 1.7780E-03 7.0230E-03

9.1780E-03 8.8070E-03 1.4000E-03 1.0990E-02 2.1550E-02 1.1050E-02 1.0010E-03

1.1500E-02 4.2130E-02 6.2710E-02 2.1620E-03 5.2430E-02 3.5230E-01 8.8840E-01

1.1650E-02 7.9010E-02 2.5070E-01 5.0520E-01 6.3380E-03 5.5540E-02 2.3910E-01

4.9190E-01 3.4850E-03 6.7590E-02 3.7640E-01 1.0430E+00 7.5730E-04 2.6620E-03

3.8380E-03 2.4110E-03 1.0660E-02 1.5670E-02 1.5790E-02 7.3570E-04 6.6890E-03

3.3550E-02 9.2070E-02 1.0250E-03 6.1150E-03 1.2110E-02 6.6670E-03 7.1200E-04

9.7070E-03 4.7610E-02 9.7390E-02 1.0960E-04 1.5100E-03 5.7800E-03 5.9620E-03

2.2290E-03 8.7510E-03 9.5340E-03 8.2000E-03 1.1890E-03 1.6500E-02 6.8770E-02

1.5340E-01 9.9260E-01 2.8390E-02 1.0060E-03 1.6550E-01 2.7840E-02 1.0440E-04

1.6330E-05 1.2920E-02 9.0080E-04 2.3960E-05 1.6290E-06 2.8900E-02 7.4120E-03

4.6970E-04 9.6480E-06 1.8060E+00 1.7010E-01 2.8600E-03 3.0710E-05 1.0480E-01

2.3450E-02 3.2110E-03 3.5930E-05 3.4250E-01 1.0260E-01 1.0200E-02 8.9650E-04

1.0730E+00 2.1770E-01 5.6700E-02 3.7760E-03 4.7920E-04 2.1270E-04 2.6330E-05

1.5750E-02 2.3620E-03 1.7740E-04 3.1860E-05 8.5830E-02 1.3940E-02 1.9840E-03

9.3420E-05 3.5290E-02 6.8400E-03 2.5640E-04 3.7690E-05 4.7100E-01 5.8340E-02

6.3440E-03 3.8890E-04 1.1260E-03 7.6530E-04 4.2390E-04 9.6650E-05 3.0900E-02

3.4570E-03 1.1900E-04 1.7330E-06 3.6520E-02 1.0310E-02 1.4790E-03 3.1330E-05

2.1230E+00 5.4540E-02 6.5200E-02 7.6830E-02 2.9370E-02 9.2780E-05 4.1120E-03

6.8940E-03 8.8000E-04 2.4060E-05 1.0960E-02 1.2850E-02 7.8220E-03 5.3950E-04

2.9760E-01 1.8460E+00 2.0710E-01 3.2820E-03 3.6620E-02 5.3870E-02 2.1050E-02

3.7140E-03 1.0200E-01 4.4640E-01 1.1340E-01 1.1420E-02 2.6660E-01 1.3970E+00

3.9410E-01 6.3950E-02 3.1450E-04 2.1910E-04 1.2120E-04 6.1100E-03 7.5240E-03

2.1420E-03 1.3800E-04 2.5210E-02 4.9460E-02 1.2180E-02 2.2330E-03 1.4990E-02

1.4600E-02 6.4010E-03 2.2670E-04 1.2280E-01 5.2100E-01 5.9930E-02 7.2890E-03

9.8540E-04 6.1190E-04 2.8730E-04 2.2460E-04 1.2140E-02 1.5460E-02 3.3250E-03

1.2790E-04 1.4710E-02 1.6310E-02 9.6140E-03 1.7700E-03 2.2780E+00 1.8990E-02

6.1960E-02 4.5020E-02 2.0810E-02 9.9750E-04 4.2930E-03 4.3730E-03 6.2530E-04

2.5290E-03 1.0900E-02 8.0450E-03 6.1120E-03 3.9730E-02 6.1790E-01 2.3500E+00

1.5970E-01 9.9500E-03 3.3320E-02 3.7340E-02 1.7800E-02 2.5010E-02 1.6760E-01

3.4080E-01 8.9490E-02 7.5020E-02 4.6280E-01 1.0680E+00 3.3120E-01 1.9080E-04

1.9090E-04 1.1910E-04 1.8630E-03 5.5450E-03 4.6120E-03 1.5140E-03 6.6000E-03

2.4010E-02 3.5990E-02 1.0080E-02 4.7410E-03 1.3600E-02 9.0000E-03 4.5100E-03

1.5890E-02 1.3680E-01 4.0770E-01 5.0380E-02 8.4460E-04 4.3680E-04 3.0750E-04

2.1920E-04 2.8810E-03 1.1950E-02 9.6510E-03 2.3680E-03 4.1200E-03 1.3380E-02

1.0850E-02 7.8290E-03 3.0640E-03 2.3520E-02 5.2690E-02 4.3170E-02 1.4380E-04

1.2080E-03 3.4930E-03 3.7020E-03 3.0540E-04 2.9950E-03 9.2700E-03 1.0410E-02

1.9840E-03 4.8770E-02 4.8950E-01 2.1330E+00 1.3860E-03 1.1600E-02 2.9880E-02

3.9370E-02 2.7540E-03 2.8920E-02 1.3920E-01 3.5150E-01 6.8160E-03 8.5110E-02

3.9230E-01 1.1350E+00 1.1810E-04 1.8990E-04 1.6060E-04 4.0930E-04 2.2270E-03

4.6890E-03 4.1190E-03 9.6090E-04 7.6950E-03 2.0630E-02 3.4560E-02 9.8050E-04

5.6980E-03 1.1620E-02 8.7040E-03 1.4760E-03 1.8520E-02 1.1200E-01 3.8200E-01

7.0390E-04 2.7400E-04 3.7350E-04 1.5500E-04 4.7560E-04 3.5720E-03 1.0060E-02

8.4070E-03 6.4800E-04 4.7930E-03 1.1760E-02 1.2970E-02 3.3720E+00 5.0260E-01

3.0420E-02 1.1430E-01 5.2110E-02 3.2330E-02 1.6320E-02 8.3460E-02 5.5590E-02

3.0380E-02 1.6110E-02 7.7400E-02 3.5970E-02 1.3130E-02 3.2570E-03 4.7810E-02

2.6060E-02 1.1360E-02 3.2830E-03 5.2830E-02 2.4180E-02 1.1100E-02 3.5430E-03

8.3000E-02 3.1410E-02 8.5270E-03 1.3550E-03 9.1770E-02 6.0550E-02 9.2350E-03

3.2460E-02 1.7780E-02 8.5410E-03 3.3020E-03 8.9220E-02 4.1710E-02 1.1860E-02

3.1740E-03 5.9200E-02 3.0610E-02 1.1670E-02 5.0660E-03 5.8920E-02 1.8410E-02

6.3800E-03 1.9300E-03 1.0890E-01 1.0690E-01 7.0240E-02 4.0490E-03 5.3960E-02

2.7510E-02 9.6170E-03 2.8030E-03 4.3740E-02 1.7670E-02 5.7180E-03 1.0850E-03

3.0170E+00 6.0200E-01 5.2110E-02 7.6450E-02 3.0760E-02 1.1840E-02 5.0110E-02

3.4440E-02 3.5450E-02 2.0780E-02 2.6980E-02 3.0370E-02 2.6760E-02 1.4810E-02

2.4970E-02 1.6230E-02 1.4850E-02 1.1480E-02 1.9250E-02 1.4600E-02 1.4550E-02

1.1630E-02 1.5460E-02 3.7480E-02 2.9690E-02 1.0590E-02 6.8170E-02 1.6690E-02

3.6000E-02 1.7760E-02 1.3490E-02 9.8660E-03 5.0160E-03 3.3890E-02 3.2240E-02

3.2480E-02 1.3600E-02 3.0500E-02 2.0760E-02 2.1330E-02 7.5180E-03 9.6160E-03

2.9400E-02 1.8070E-02 5.9300E-03 8.1550E-02 7.9190E-02 7.9080E-03 4.8250E-02

2.7500E-02 1.7590E-02 1.7980E-02 7.3600E-03 1.4540E-02 1.3130E-02 1.4640E-02

6.4450E-03 2.0130E+00 3.2330E-02 3.0760E-02 3.6030E-02 1.0360E-02 2.2450E-02

3.2520E-02 1.7390E-02 2.1620E-02 4.8890E-03 1.8860E-02 1.9160E-02 2.1980E-02

7.4250E-03 1.3080E-02 1.2400E-02 1.0910E-02 5.4540E-03 1.1690E-02 1.0860E-02

1.1820E-02 3.8090E-04 1.5460E-02 2.1500E-02 2.4810E-02 3.3610E-02 3.0530E-02

1.7700E-02 8.5350E-03 9.8560E-03 7.4490E-03 4.5560E-03 5.8500E-03 2.7520E-02

1.4980E-02 2.3280E-02 1.1630E-02 2.1330E-02 8.8380E-03 1.1120E-02 1.9870E-03

6.8650E-03 2.0140E-02 1.3340E-02 5.4310E-02 3.3350E-02 3.5500E-02 2.1730E-02

9.6140E-03 1.7980E-02 8.9020E-03 1.0100E-02 2.7820E-03 1.2260E-02 7.7320E-03

9.7790E-03 1.6320E-02 1.1840E-02 1.0360E-02 1.4220E-02 9.3740E-03 1.1850E-02

1.7500E-02 7.7370E-03 4.7430E-04 4.9100E-03 1.3170E-02 1.4030E-02 1.2280E-03

7.7900E-03 8.1940E-03 5.3180E-03 8.6360E-04 5.0690E-03 7.7960E-03 6.1110E-03

3.4870E-05 3.7670E-04 1.0910E-02 1.9760E-02 9.4790E-03 2.6840E-02 2.9500E-03

3.3020E-03 5.0100E-03 4.5540E-03 2.5970E-03 1.3590E-03 5.0220E-03 1.7450E-02

1.1590E-02 5.0660E-03 7.0830E-03 1.1100E-02 3.3080E-03 6.8920E-04 1.0710E-03

3.9990E-03 1.2680E-02 2.7130E-02 7.0490E-03 3.6880E-02 1.2470E-03 2.8030E-03

7.3590E-03 1.0100E-02 3.1380E-03 2.7790E-04 2.8930E-03 8.0070E-03 5.0280E-03

1.1510E+00 6.3320E-02 8.3250E-03 4.2070E+00 1.3740E+00 2.8750E-01 3.1990E-02

8.8820E+00 1.9530E+00 3.1470E-01 3.1960E-02 1.4150E-01 5.5520E-02 2.0710E-02

5.4420E-03 1.6890E-01 6.0050E-02 1.8690E-02 4.8120E-03 3.5520E-02 1.6590E-02

7.7120E-03 2.2010E-03 3.2700E-01 1.2210E-01 2.0850E-02 6.0420E-01 2.8300E-01

8.1300E-02 1.2720E-02 4.4390E-01 1.3310E-01 2.9310E-02 5.4300E-03 1.5330E-01

7.8020E-02 2.4600E-02 7.7090E-03 3.1740E-02 1.3950E-02 5.5490E-03 1.8820E-03

1.7550E-02 1.9150E-02 1.2310E-02 7.0350E-03 5.9320E-02 3.5250E-02 1.7430E-02

6.1400E-03 6.8230E-02 3.3650E-02 1.3860E-02 4.9790E-03 1.2770E+00 6.8510E-02

9.7760E-01 1.8240E+00 1.2800E+00 3.5980E-01 4.3880E-01 5.2360E+00 2.1970E+00

4.1200E-01 4.3160E-02 6.3700E-02 3.3310E-02 2.2440E-02 2.7800E-02 1.0710E-01

6.4030E-02 2.2080E-02 9.9860E-03 1.7840E-02 9.8530E-03 8.5590E-03 1.6920E-01

1.0330E-01 7.3840E-02 2.7970E-01 1.8770E-01 1.8660E-01 8.1550E-02 8.9740E-02

2.1200E-01 1.2450E-01 3.4180E-02 7.7880E-02 4.8270E-02 5.5540E-02 1.8130E-02

9.9190E-03 1.4520E-02 1.1160E-02 5.7860E-03 1.3160E-02 1.3970E-02 9.6240E-03

4.7100E-03 3.5230E-02 2.3950E-02 1.8030E-02 1.0970E-02 2.8480E-02 2.5480E-02

2.2590E-02 1.2780E-02 8.9390E-01 8.0920E-02 9.3700E-01 9.4980E-01 9.8850E-01

3.0070E-03 4.6220E-01 3.3020E+00 1.7480E+00 1.3090E-02 2.1880E-02 4.5490E-02

2.4700E-02 5.9310E-03 2.2920E-02 8.1440E-02 3.4950E-02 3.6210E-03 3.6790E-03

1.4920E-02 8.8270E-03 7.0170E-02 1.0000E-01 6.5350E-02 8.0860E-02 1.8570E-01

1.1480E-01 1.1000E-01 1.0160E-02 8.3560E-02 1.1490E-01 9.5350E-02 2.4570E-02

5.5470E-02 1.9650E-02 3.1610E-02 2.4890E-03 6.5230E-03 9.9270E-03 8.9870E-03

8.7690E-03 1.1130E-02 6.6480E-03 2.8870E-03 1.7420E-02 1.8000E-02 1.5840E-02

7.8870E-03 8.6360E-03 1.9040E-02 1.4010E-02 1.6350E-02 2.5480E-03 9.1980E-02

6.5060E-01 7.3960E-01 2.7840E-04 3.0400E-03 3.2380E-01 2.4250E+00 1.6970E-03

1.2980E-02 1.5580E-02 2.4350E-02 4.1980E-04 5.5620E-03 1.5920E-02 3.7120E-02

9.7530E-06 4.0050E-03 2.8830E-03 8.5320E-03 2.0730E-02 6.0830E-02 3.2510E-02

1.2720E-02 8.1210E-02 1.0980E-01 4.1070E-02 1.7710E-03 9.3350E-03 5.6940E-02

8.4840E-02 7.7090E-03 1.8100E-02 3.2130E-02 7.8880E-03 4.9320E-04 2.1660E-03

4.3140E-03 6.7970E-03 4.3840E-03 5.2610E-03 3.0060E-03 1.3710E-03 6.1400E-03

1.1090E-02 7.8830E-03 4.5110E-03 2.5890E-03 6.7650E-03 1.1730E-02 7.7920E-03

3.0480E+00 2.7480E-01 1.5140E-02 7.6450E+00 1.9320E+00 2.9680E-01 2.2260E-02

4.7320E-01 1.5180E-01 3.2030E-02 5.3810E-03 7.7210E-01 2.5470E-01 5.5850E-02

8.1350E-03 4.1220E-01 1.1640E-01 1.8680E-02 1.4540E-03 4.1140E-01 2.1400E-02

3.2200E-03 5.6810E-01 1.1310E-01 1.3900E-02 7.4250E-04 7.2100E-01 2.4260E-01

5.5070E-02 6.1920E-03 1.4070E-01 4.7470E-02 9.2230E-03 2.9960E-03 8.2780E-02

3.4850E-02 1.3120E-02 3.7520E-03 2.0220E-02 6.1150E-02 1.1610E-02 7.4490E-03

6.3170E-02 2.8170E-02 1.1040E-02 2.1730E-03 9.8440E-02 3.2300E-02 7.5670E-03

1.2690E-03 3.3530E+00 3.3620E-01 1.4700E+00 4.0800E+00 2.0440E+00 3.6610E-01

1.5110E-01 2.0850E-01 1.3850E-01 3.4570E-02 2.1250E-01 3.7880E-01 2.4170E-01

6.5980E-02 7.3940E-02 2.2060E-01 1.2710E-01 2.2700E-02 1.4670E-01 1.8960E-01

1.2230E-02 1.6930E-01 2.7840E-01 9.7870E-02 1.5020E-02 2.4100E-01 3.1480E-01

2.0130E-01 6.4420E-02 5.8940E-02 5.2250E-02 4.2020E-02 6.2980E-03 3.0330E-02

3.8730E-02 2.5550E-02 1.3400E-02 1.6180E-02 2.8150E-02 3.2560E-02 3.7490E-03

3.3810E-02 2.7110E-02 1.4350E-02 9.9530E-03 3.6400E-02 3.5740E-02 2.7410E-02

8.2720E-03 2.5720E+00 1.2020E-01 1.5740E+00 2.6360E+00 1.6450E+00 3.1920E-02

1.3790E-01 1.2480E-01 1.0850E-01 3.0300E-02 1.9340E-01 2.4850E-01 2.0310E-01

1.8270E-03 8.3640E-02 1.4410E-01 1.0380E-01 4.2160E-02 1.4020E-01 7.9130E-02

3.8180E-02 1.5250E-01 1.6090E-01 6.5470E-02 5.4830E-02 1.9700E-01 1.9930E-01

1.6290E-01 1.8270E-02 5.0380E-02 2.6030E-02 2.7430E-02 9.7280E-03 2.1680E-02

2.7770E-02 2.1880E-02 1.2130E-02 1.4790E-02 2.2410E-02 1.1280E-02 1.6510E-02

1.8000E-02 2.1230E-02 8.1850E-03 7.5490E-03 2.7360E-02 2.1280E-02 2.1650E-02

2.5870E-03 1.4460E-01 1.2190E+00 2.6200E+00 5.3810E-03 3.4480E-02 1.0820E-01

1.1860E-01 2.6850E-03 3.5040E-02 1.5590E-01 2.5930E-01 9.3630E-05 2.0850E-03

6.4030E-02 1.5620E-01 9.3190E-03 5.5990E-02 1.0880E-01 5.3250E-03 4.5890E-02

1.1710E-01 1.1230E-01 6.1930E-03 6.4260E-02 1.5860E-01 1.8000E-01 5.9050E-03

1.8680E-02 3.7000E-02 1.8730E-02 2.1840E-03 9.7200E-03 1.7880E-02 2.4400E-02

8.0870E-03 8.9120E-03 8.4770E-03 1.4910E-02 5.4450E-03 1.5320E-02 1.2380E-02

9.8190E-03 1.2620E-03 8.2630E-03 2.1620E-02 2.0790E-02 2.7600E+00 1.0480E-01

5.4560E-03 5.1360E-01 1.2350E-01 2.5180E-02 5.2720E-03 3.3010E-01 8.5140E-02

1.3240E-02 6.0240E-04 2.5430E-01 7.8520E-02 1.9190E-02 2.5320E-03 2.2810E-02

8.5430E-03 1.0930E-03 7.3680E-01 5.5370E-02 1.0740E-02 1.9860E-03 5.0980E-01

1.0650E-01 1.1580E-02 1.3900E-03 6.0780E-02 1.5870E-02 2.1940E-03 5.7610E-04

2.6380E-01 6.3830E-02 9.7310E-03 1.8270E-03 3.3240E-02 3.0430E-02 1.5700E-02

3.4110E-03 8.5570E-02 2.0190E-02 6.5570E-03 5.4400E-04 1.6110E-01 4.7280E-02

1.1180E-02 1.4170E-03 3.4060E+00 1.2560E-01 1.5340E-01 2.7000E-01 1.0850E-01

2.5900E-02 8.4920E-02 1.7350E-01 8.8600E-02 1.5670E-02 6.8360E-02 1.3690E-01

7.1400E-02 2.1700E-02 1.3880E-02 6.9760E-03 5.0420E-03 1.8320E-01 4.3410E-01

4.3970E-02 9.5520E-03 1.3670E-01 2.6760E-01 1.0760E-01 1.2780E-02 2.4310E-02

2.7440E-02 1.3380E-02 1.6630E-03 6.3540E-02 1.5790E-01 6.4920E-02 1.0420E-02

2.7700E-02 2.2170E-02 1.0610E-02 8.4870E-03 3.5480E-02 4.4310E-02 1.0260E-02

6.7190E-03 5.6200E-02 7.8780E-02 3.7050E-02 1.2250E-02 2.6110E+00 4.0340E-02

1.3810E-01 1.8280E-01 8.6050E-02 1.3210E-02 8.8320E-02 1.1900E-01 7.3110E-02

1.4230E-02 6.1700E-02 9.9120E-02 6.2480E-02 7.7530E-03 7.5930E-03 5.2970E-03

4.0640E-02 1.8660E-01 2.7930E-01 2.9800E-02 2.3160E-02 1.3800E-01 1.7440E-01

7.9400E-02 7.9440E-03 2.0830E-02 1.5550E-02 9.0880E-03 9.7030E-03 6.4650E-02

1.2210E-01 5.2650E-02 2.2160E-02 1.4030E-02 1.1210E-02 7.7470E-03 1.4300E-02

2.3050E-02 3.1930E-02 6.9840E-03 1.7360E-02 4.5300E-02 5.5170E-02 3.0680E-02

8.8740E-03 4.3320E-02 1.1360E-01 1.6920E-01 6.0180E-04 1.5660E-02 7.2950E-02

1.2820E-01 1.3830E-03 1.5990E-02 5.3230E-02 1.0670E-01 3.4960E-03 7.8520E-03

4.1340E-03 8.9050E-03 4.7230E-02 1.4830E-01 1.9910E-01 3.0600E-03 2.7210E-02

1.1180E-01 1.7130E-01 2.0870E-03 8.6570E-03 1.6850E-02 1.2680E-02 1.8180E-03

1.0400E-02 5.2480E-02 1.2840E-01 1.6620E-02 7.6030E-03 1.2060E-02 5.1270E-03

4.0190E-03 1.4470E-02 1.8750E-02 1.9620E-02 2.9300E-03 1.8900E-02 3.8850E-02

5.0190E-02 1.7110E+00 5.8330E-02 4.5290E-03 5.6610E+00 1.3200E+00 1.8170E-01

1.2070E-02 1.1550E+01 1.9780E+00 2.2620E-01 1.3190E-02 4.5060E-01 5.5850E-02

1.9210E-02 5.6160E-01 1.8550E-01 3.0270E-02 7.9640E-03 5.7680E-01 1.2560E-01

2.1980E-02 3.1940E-03 2.0280E-01 6.6410E-02 8.0590E-03 2.2710E-03 8.2240E-02

3.3240E-02 1.0440E-02 2.1540E-03 1.6350E-02 2.9090E-02 1.0830E-02 4.6980E-03

4.5970E-02 2.1710E-02 6.7850E-03 1.1600E-03 9.6460E-02 2.8670E-02 7.6360E-03

1.3580E-03 2.0820E+00 6.9940E-02 9.7310E-01 3.1350E+00 1.4350E+00 2.2270E-01

7.2250E-01 7.6890E+00 2.3460E+00 2.7990E-01 1.8490E-01 2.1220E-01 2.6700E-02

2.3060E-01 2.1640E-01 1.6160E-01 2.2380E-02 1.2540E-01 3.0200E-01 1.2120E-01

2.3610E-02 8.3780E-02 7.3720E-02 5.8520E-02 6.7940E-03 1.7930E-02 5.6160E-02

3.0580E-02 1.1660E-02 1.3080E-02 1.7090E-02 1.4130E-02 4.1910E-03 2.5090E-02

1.6790E-02 1.2170E-02 6.5450E-03 2.8650E-02 4.8100E-02 2.2870E-02 8.1660E-03

1.5670E+00 6.2590E-02 1.0720E+00 2.0270E+00 1.1460E+00 5.0890E-03 8.5220E-01

5.5310E+00 1.8640E+00 7.2150E-02 1.5720E-01 8.6740E-02 6.5960E-02 1.9640E-01

9.8200E-02 1.0740E-01 2.1970E-02 1.2110E-01 1.9250E-01 9.3620E-02 2.2190E-02

7.0920E-02 3.1320E-02 3.8790E-02 5.5070E-03 2.0570E-02 4.0460E-02 2.7330E-02

9.8100E-03 1.0380E-02 1.0730E-02 5.7760E-03 1.0670E-02 1.4300E-02 1.2850E-02

7.5240E-03 7.6320E-03 2.2870E-02 3.0370E-02 1.8150E-02 1.0290E-03 7.4900E-02

8.2320E-01 1.9850E+00 4.6010E-04 5.5950E-03 6.4280E-01 4.9230E+00 2.9230E-02

6.7390E-02 1.1080E-01 1.7640E-02 6.9370E-02 1.4680E-01 8.1820E-02 3.1940E-03

2.3600E-02 9.3600E-02 1.7330E-01 4.9680E-03 2.1710E-02 5.2850E-02 2.8810E-02

1.1120E-03 6.5960E-03 2.0300E-02 3.9740E-02 6.5400E-03 5.6450E-03 6.1300E-03

5.6320E-03 3.1580E-03 1.0680E-02 1.0360E-02 5.8440E-03 1.3580E-03 8.1650E-03

1.8150E-02 2.5940E-02 3.4970E+00 2.3960E-01 1.4060E-02 6.9190E+00 1.5040E+00

2.8450E-01 1.4440E-02 8.2360E-02 4.3030E-02 1.1640E-02 2.7180E-01 1.8450E-02

4.2310E-03 7.5700E-04 6.8930E-01 1.6060E-01 3.6600E-02 7.8240E-03 1.0950E-01

1.5080E-02 4.5360E-03 6.5960E-04 2.3900E-01 6.0890E-02 1.0510E-02 1.3000E-03

4.2800E-03 2.5450E-02 5.8960E-03 4.0170E-04 1.0210E-01 2.0740E-02 7.3460E-03

1.2110E-03 1.8850E-01 6.1410E-02 4.8230E-03 3.8220E-04 4.1170E+00 2.8710E-01

1.1490E+00 7.3390E+00 2.8020E+00 3.3890E-01 5.7340E-02 2.9130E-02 2.2250E-02

6.1920E-02 1.6410E-01 1.3390E-02 3.7900E-03 2.0070E-01 3.7390E-01 1.3580E-01

3.6810E-02 3.2370E-02 6.0870E-02 9.6780E-03 3.5120E-03 6.3810E-02 1.2850E-01

5.9240E-02 1.1840E-02 3.5660E-03 1.3970E-02 9.4330E-03 3.5210E-03 3.9820E-02

5.3440E-02 1.1280E-02 6.9110E-03 7.9480E-02 1.4680E-01 6.6800E-02 5.4200E-03

3.2060E+00 1.3190E-01 2.2420E+00 5.3380E+00 2.2510E+00 3.9530E-02 3.1440E-02

1.8860E-02 1.4120E-02 6.3160E-02 1.0710E-01 9.0740E-03 5.5180E-02 1.7670E-01

2.5860E-01 1.0860E-01 1.0780E-02 2.9020E-02 3.9850E-02 6.4820E-03 1.0280E-02

5.9070E-02 8.9950E-02 4.9120E-02 2.8530E-03 6.4860E-03 9.2370E-03 5.8160E-03

1.5460E-02 2.8050E-02 3.8080E-02 7.3460E-03 1.1980E-02 8.4640E-02 9.0750E-02

5.1290E-02 3.6240E-04 1.5660E-01 1.7650E+00 5.5510E+00 2.3090E-02 2.9370E-02

1.3170E-02 3.2540E-03 1.6330E-02 5.0190E-02 7.5200E-02 1.2950E-02 5.8960E-02

1.4580E-01 2.3100E-01 3.0810E-03 1.0670E-02 2.3150E-02 2.7490E-02 1.2880E-03

1.1800E-02 4.9010E-02 9.4120E-02 2.1390E-03 2.3330E-03 7.4620E-03 6.2040E-03

4.9060E-03 1.4670E-02 2.2380E-02 2.3300E-02 1.1440E-03 1.4360E-02 6.7770E-02

9.6940E-02 1.4280E+00 1.0410E-01 5.4220E-03 1.6570E-02 1.9800E-03 1.0370E-04

7.0500E-02 2.4280E-02 7.6110E-03 1.7030E-04 1.9690E+00 1.4060E-01 1.9920E-02

2.5830E-03 3.0570E-02 8.0200E-03 1.4010E-03 1.3950E-04 5.4600E-01 9.2710E-02

1.1320E-02 1.3090E-03 4.0950E-04 2.5630E-02 3.5360E-03 2.0640E-04 3.4410E-02

7.7370E-03 6.9590E-04 5.1050E-05 3.2940E-01 2.2910E-02 3.9430E-03 2.5200E-04

2.6370E+00 1.2080E-01 8.1980E-03 6.6440E-03 1.1860E-03 3.6150E-02 3.7020E-02

1.1750E-02 8.2480E-03 3.5820E-01 1.3140E+00 1.2950E-01 2.1490E-02 1.3370E-02

1.3720E-02 6.0330E-03 1.3030E-03 1.1250E-01 3.0250E-01 9.8970E-02 1.3620E-02

3.5100E-04 1.3150E-02 9.8920E-03 2.1510E-03 1.4610E-02 1.5000E-02 6.2670E-03

6.6600E-04 5.2430E-02 1.7280E-01 2.0600E-02 4.4020E-03 3.1240E+00 3.5340E-03

6.4850E-03 3.3790E-03 1.7260E-02 2.1600E-02 2.5680E-02 8.6570E-03 6.0940E-02

3.9220E-01 9.6690E-01 1.0440E-01 4.6670E-03 1.0810E-02 8.8020E-03 4.2380E-03

1.8150E-02 1.1960E-01 2.2390E-01 7.9370E-02 2.9250E-04 5.8450E-03 9.8950E-03

5.4290E-03 4.6330E-03 1.2020E-02 9.0390E-03 4.3840E-03 1.0270E-02 5.3750E-02

1.2790E-01 1.6920E-02 1.1220E-03 4.4520E-03 5.0900E-03 5.0610E-03 1.9100E-02

1.9330E-02 1.5140E-02 8.9200E-03 7.0980E-02 3.2110E-01 8.0910E-01 1.3780E-03

5.8750E-03 9.1190E-03 7.0040E-03 2.4390E-03 2.0790E-02 9.9000E-02 2.3260E-01

2.3400E-04 1.7740E-03 7.3750E-03 7.6210E-03 1.0350E-03 5.6760E-03 1.0090E-02

7.4730E-03 1.4380E-03 1.2010E-02 4.4430E-02 1.1650E-01 6.0590E-01 4.0250E-02

2.2630E+00 1.0960E+00 3.7350E-01 6.5000E-02 7.5600E+00 2.6520E+00 7.1530E-01

1.2460E-01 5.3950E-02 3.0530E-02 1.4660E-02 5.7530E-03 2.0370E-02 1.4460E-02

8.6930E-03 4.3240E-03 2.9740E-02 1.0800E-01 9.4070E-02 5.7910E-02 9.1200E-02

5.4450E-02 3.0790E-02 1.3970E-02 4.1270E-02 2.6060E-02 1.7500E-02 1.1420E-02

5.1110E-01 7.4540E-01 6.6070E-01 6.7930E-01 4.4930E-01 2.9480E-01 3.5030E+00

2.5910E+00 1.0160E+00 2.2930E-02 2.1110E-02 1.6690E-02 9.4430E-03 1.1240E-02

5.7930E-03 7.0150E-03 9.1910E-03 1.9830E-02 9.4070E-02 6.1450E-02 1.8330E-02

4.3060E-02 3.9870E-02 2.9620E-02 1.4060E-02 1.7830E-02 2.2190E-02 1.5860E-02

8.2760E-03 2.8860E-02 5.2320E-01 4.6860E-01 2.4600E-01 1.9260E-02 1.8640E-01

1.4570E+00 2.0360E+00 6.1820E-03 1.1810E-02 1.0450E-02 5.9880E-03 1.1520E-03

6.6110E-03 5.3190E-03 3.1450E-03 9.9150E-03 5.7900E-02 1.8440E-02 1.0300E-02

1.8050E-02 1.8610E-02 1.6610E-02 9.8460E-03 9.6300E-03 6.7540E-03 8.1230E-03

7.8060E-03 2.8820E+00 4.5290E-01 3.0840E-02 7.9240E+00 2.8800E+00 6.2530E-01

7.3690E-02 1.0790E-01 5.3730E-02 1.5950E-02 2.7120E-03 6.3010E-02 3.2160E-02

1.5250E-02 5.9550E-03 1.8610E-01 1.3250E-01 3.8540E-02 1.6020E-02 1.4210E-01

7.2750E-02 2.8000E-02 1.0360E-02 1.3340E-01 5.3730E-02 1.4610E-02 2.1190E-03

2.5620E+00 5.3470E-01 2.1590E+00 3.0900E+00 2.6410E+00 7.7470E-01 5.3700E-02

3.1530E-02 3.7170E-02 1.3860E-02 2.4510E-02 2.4880E-02 2.1280E-02 1.4450E-02

1.3920E-01 6.2450E-02 6.4390E-02 1.6690E-02 7.2740E-02 4.7470E-02 4.8880E-02

1.7410E-02 4.2740E-02 5.0210E-02 4.3410E-02 1.7420E-02 1.7060E+00 1.7650E-01

2.0820E+00 1.4890E+00 2.0390E+00 1.5950E-02 3.7160E-02 1.5540E-02 2.1220E-02

7.2730E-03 1.5620E-02 1.6730E-02 1.6530E-02 9.2680E-02 2.8930E-02 3.9410E-02

2.5860E-02 2.8010E-02 4.8880E-02 2.1100E-02 2.6870E-02 6.0240E-03 3.4490E-02

2.8430E-02 3.3860E-02 8.4960E-03 1.9350E-01 1.4420E+00 1.2490E+00 2.7120E-03

1.3850E-02 2.1220E-02 5.5850E-03 1.0990E-03 6.1800E-03 9.9490E-03 1.0280E-02

4.6290E-02 1.2430E-02 1.5000E-02 1.9800E-02 1.0350E-02 1.7410E-02 2.6880E-02

7.5450E-03 3.0790E-04 6.7360E-03 2.3130E-02 1.9920E-02 2.7450E+00 1.9600E-01

1.1360E-02 1.7210E-01 6.1830E-02 1.4130E-02 3.7140E-03 1.2440E-01 6.0090E-02

1.8520E-02 4.0760E-03 3.6770E-02 3.6920E-01 3.7370E-02 5.4280E-03 4.0170E-01

1.2150E-01 1.5310E-02 3.9940E-03 1.2180E-01 6.0330E-02 2.1190E-02 4.0130E-03

3.1300E+00 2.3840E-01 7.5470E-02 6.2900E-02 4.9790E-02 1.0710E-02 5.3770E-02

4.8840E-02 4.3540E-02 2.0080E-02 2.9420E-02 1.4350E-01 1.6400E-01 2.1420E-02

1.6210E-01 1.4500E-01 1.1420E-01 1.1840E-02 6.0240E-02 3.9650E-02 3.6610E-02

2.3120E-02 2.3860E+00 2.4970E-02 6.0190E-02 3.1650E-02 3.2860E-02 1.1920E-02

3.8850E-02 2.9500E-02 3.7090E-02 2.2070E-02 4.7800E-02 1.2560E-01 7.2640E-02

3.9420E-02 1.3710E-01 5.9870E-02 8.1570E-02 2.1170E-02 3.6600E-02 3.0010E-02

3.0490E-02 7.6410E-03 2.4740E-02 4.4250E-02 2.3330E-02 2.3930E-03 1.2310E-02

3.1640E-02 3.2890E-02 1.4710E-02 1.3960E-02 5.7830E-02 9.2860E-02 8.7400E-03

4.2950E-02 1.0950E-01 5.6320E-02 4.0120E-03 2.3110E-02 3.0470E-02 2.2160E-02

1.6160E+00 2.6340E-01 7.6880E-02 6.3000E+00 1.5730E+00 3.1800E-01 5.2220E-02

1.1700E+00 2.0740E+00 1.1660E+00 9.1300E-02 1.7250E+00 5.6470E-01 9.9500E-02

6.3120E-03 2.2350E+00 6.8170E-01 1.3650E-01 1.6810E-02 1.5070E+00 1.9760E-01

4.9060E-01 3.6050E+00 1.6360E+00 3.7700E-01 8.7500E-01 1.3890E+00 3.2580E-01

7.8040E-01 5.6070E-01 6.4830E-01 4.7370E-01 1.1640E-01 4.5680E-01 1.0260E+00

6.5350E-01 1.6850E-01 9.9610E-01 3.9100E-02 4.4300E-01 2.2450E+00 1.2920E+00

5.8230E-01 5.7970E-01 6.6950E-01 4.2140E-01 9.8380E-02 4.7100E-01 3.2070E-01

3.1010E-01 3.5890E-02 4.5210E-01 5.4460E-01 5.0330E-01 1.0690E-02 2.9440E-02

3.0070E-01 1.6700E+00 2.9090E-01 1.3130E-01 6.0900E-01 8.9140E-02 6.3120E-03

1.1550E-01 3.1020E-01 1.6870E-01 3.3830E-03 3.9280E-02 3.1460E-01 4.1350E-01

3.4120E+00 2.6330E-01 2.9740E-02 1.0520E-01 7.9090E-02 2.8550E-02 5.8080E-03

5.1410E+00 2.3210E-01 5.7470E-03 1.2720E-03 1.0570E+01 2.0520E+00 1.7040E-01

7.7470E-03 3.9870E+00 3.0340E-01 8.7640E-02 4.9260E-02 2.8910E-02 1.5380E-02

1.1370E+00 3.0950E+00 2.3470E-01 4.7920E-03 2.6840E+00 5.5220E+00 2.1960E+00

1.9700E-01 3.1090E+00 7.0110E-02 2.8160E-02 2.9500E-02 1.8300E-02 1.8330E-01

1.2790E+00 1.9600E+00 1.6360E-01 4.0840E-01 2.8530E+00 3.5380E+00 1.6950E+00

5.2580E-02 1.4400E-02 2.5600E-02 1.6280E-02 1.7850E-02 2.3730E-01 1.0160E+00

1.4310E+00 3.4550E-02 5.0010E-01 2.2910E+00 3.5620E+00 5.7710E-01 3.8470E-01

1.9240E-01 2.0920E+00 1.5710E+00 1.0500E+00 5.2610E-01 1.9020E-02 1.5220E-02

1.1420E-02 7.6090E-03 2.1550E+00 1.0300E+00 4.3840E+00 2.9960E+00 1.2170E+00

2.4170E-01 3.7420E-01 1.5300E-01 6.2980E-02 2.9430E-02 7.7410E-01 2.5640E+00

4.9080E-01 1.4340E+00 1.3780E+00 4.4350E-02 1.8280E-01 1.3190E-01 5.3140E-02

1.2610E-01 1.7690E+00 9.0210E-01 1.3150E-01 2.1580E-02 1.8730E-02 7.1150E-02

9.4790E-02 2.1170E+00 2.7540E-01 3.2760E-02 1.8920E+00 6.3720E-01 1.7640E-01

4.5660E-02 2.0000E+00 3.0030E-01 4.5990E-01 8.7360E-01 5.5480E-01 1.8050E-01

1.3400E+00 8.3500E-02 3.9450E-01 4.9090E-01 4.1540E-01 1.9200E-02 6.4830E-02

2.6150E-01 3.4120E-01 4.1410E+00 4.0980E-01 2.2820E-02 4.5280E+00 5.0080E-01

3.4850E+00

45000.00

5.0440E+00 1.6830E+00 7.3270E-01 3.0330E-01 2.0690E+00 8.5980E-01 2.6360E-01

6.8190E-02 6.3200E+00 5.7060E-01 2.0190E-01 7.1170E-02 7.4520E-01 4.1320E-01

3.3510E-02 2.7450E-01 8.0400E-02 6.6830E-03 6.5600E-01 3.2260E-01 9.8810E-02

1.7100E-02 4.3630E-01 2.1570E-01 1.1440E-01 3.8880E-02 4.9660E-01 2.3540E-01

8.5840E-02 1.9370E-02 2.9270E-01 1.6230E-01 7.8860E-02 4.0540E-02 3.2200E+01

8.0930E+00 3.3210E-01 1.1050E-01 4.0260E-02 3.7810E+01 6.6350E+00 6.7550E-01

5.1190E-02 2.2280E-02 1.0530E-02 1.8250E+01 1.5830E-01 3.8720E-02 1.2440E+00

2.2050E-01 7.3140E-03 1.5590E-03 1.9810E+00 2.5100E-01 2.6660E-02 9.0610E-03

7.7070E-01 1.1990E-02 6.3320E-03 1.6120E-01 1.1990E-01 5.1990E-02 1.2020E-02

9.1110E-02 6.3200E-02 2.6680E-02 8.8470E-03 2.1690E-02 6.8810E-03 2.2150E-03

7.1850E-02 3.5400E-02 1.2650E-02 3.3630E-03 2.9200E-02 1.8630E-02 8.1910E-03

1.9790E-03 7.1810E-02 4.0390E-02 1.3730E-02 2.4640E-03 5.2170E-02 2.0880E-02

4.7950E-03 5.2070E-04 3.9010E-02 1.5370E-02 5.9990E-03 1.7430E-03 3.4050E-02

1.1220E-02 3.4050E-03 1.0710E-03 5.6690E-02 2.5820E-02 1.1150E-02 3.8420E-03

7.5430E-02 2.8300E-02 7.4770E-03 1.1050E-03 4.9110E-02 1.5440E-02 3.7980E-03

6.8890E-04 5.0170E-02 2.3630E-02 8.6530E-03 1.8640E-03 3.7820E-02 1.3240E-02

6.2770E-03 3.2180E-02 2.0630E-02 7.3740E-03 1.6130E-03 2.9490E-02 1.6510E-02

1.0110E-02 7.0790E-03 1.3540E-02 1.0090E-02 3.8230E-03 9.0360E-04 1.1190E-02

8.6520E-03 4.6190E-03 1.4980E-03 1.9090E-02 9.7180E-03 7.6700E-03 4.4390E-03

1.5170E-02 1.0260E-02 5.5630E-03 2.5120E-03 1.9730E-02 1.3560E-02 6.1870E-03

1.8190E-03 4.9310E+00 1.4690E+00 4.8340E-01 9.3860E-01 8.3070E-01 6.1580E-01

2.3960E-01 1.6520E+00 3.7760E+00 3.7190E-01 1.2110E-01 5.4550E-01 1.7920E-01

2.3390E-01 1.5310E-01 9.1240E-02 4.5690E-02 2.9120E-01 2.3280E-01 2.5030E-01

1.0280E-01 2.2620E-01 2.2910E-01 9.9820E-02 9.5520E-02 2.1390E-01 2.3190E-01

1.5760E-01 8.4790E-02 1.8550E-01 1.3730E-01 1.1070E-01 2.9460E-02 7.4220E+00

1.4500E+01 1.0640E+01 3.5320E-01 8.3150E-02 4.3920E-01 2.6230E+01 9.4570E+00

1.3970E+00 6.1370E-02 1.0990E-02 5.2360E+00 9.3400E+00 9.8040E-02 4.0950E-01

5.5140E-01 2.1250E-01 5.7780E-03 3.8430E-01 1.1520E+00 2.5530E-01 2.2290E-02

2.9150E-01 3.3520E-01 4.6630E-03 1.2080E-01 4.4540E-02 6.0950E-02 4.8730E-02

7.3450E-02 4.3190E-02 2.6550E-02 7.0790E-03 1.2440E-02 8.9080E-03 3.2540E-03

3.4410E-02 2.7250E-02 2.4830E-02 1.2130E-02 1.8980E-02 1.0430E-02 1.0950E-02

8.2220E-03 3.5290E-02 2.2770E-02 3.0460E-02 1.4310E-02 2.6590E-02 1.7740E-02

1.3790E-02 4.4490E-03 1.9660E-02 1.7250E-02 8.5020E-03 4.1080E-03 1.2830E-02

1.5660E-02 8.5830E-03 2.9300E-03 2.5150E-02 2.6210E-02 1.6580E-02 1.0050E-02

3.1500E-02 3.0590E-02 2.0470E-02 7.5540E-03 1.5260E-02 2.3420E-02 1.2650E-02

3.8850E-03 2.1370E-02 2.0770E-02 1.6630E-02 8.7380E-03 2.2650E-02 1.8040E-02

5.5160E-03 2.2860E-02 9.7350E-03 1.1070E-02 5.7700E-03 1.7220E-02 1.5700E-02

1.2180E-02 5.0770E-03 1.0780E-02 3.9470E-03 5.1250E-03 2.8990E-03 8.3180E-03

4.0210E-03 4.2050E-03 4.2330E-03 1.5270E-02 8.5460E-03 6.0890E-03 2.8260E-03

1.1220E-02 6.9970E-03 5.9300E-03 2.5160E-03 1.3780E-02 6.7000E-03 7.1140E-03

5.4380E-03 3.7110E+00 9.5900E-01 3.4940E-01 6.5740E-01 5.2690E-01 4.3820E-01

4.4060E-01 1.7530E+00 2.0690E+00 1.9930E-01 3.1460E-01 2.1090E-01 1.9410E-01

7.5160E-02 8.6760E-02 5.5920E-02 8.2830E-02 2.1690E-01 1.5760E-01 2.0100E-01

1.2380E-01 1.2060E-01 1.6650E-01 7.9100E-02 8.2170E-02 1.5460E-01 1.6170E-01

1.2860E-01 1.1050E-01 1.2420E-01 6.2790E-02 5.0460E-02 2.4650E-01 1.0190E+01

4.5530E+00 9.6900E+00 2.6010E-01 5.2030E-02 4.6010E-01 1.6820E+01 9.5260E+00

1.8460E+00 6.0480E-02 9.3020E-01 6.5910E+00 3.4470E+00 9.8880E-02 3.8050E-01

2.8080E-01 1.2340E-01 5.0340E-02 4.6010E-01 6.8720E-01 1.6290E-01 9.2350E-02

2.7230E-01 1.0890E-01 6.1350E-02 5.4140E-02 4.1470E-02 5.0120E-02 5.3250E-02

3.4150E-02 1.9760E-02 5.3090E-03 6.8920E-03 7.5240E-03 4.0320E-03 1.2630E-02

2.3110E-02 1.8640E-02 1.9600E-02 6.8570E-03 9.5170E-03 8.1220E-03 1.0490E-02

1.0110E-02 2.5250E-02 1.6140E-02 2.5620E-02 1.0970E-02 1.6440E-02 1.1290E-02

8.3660E-03 9.7470E-03 1.2190E-02 1.0490E-02 4.7140E-03 4.4570E-03 1.0180E-02

9.6650E-03 5.9460E-03 1.0620E-02 1.6340E-02 1.8230E-02 1.3300E-02 1.0490E-02

2.3000E-02 1.9450E-02 1.4950E-02 3.7810E-03 1.3030E-02 1.5130E-02 9.4370E-03

7.1690E-03 1.4740E-02 1.4730E-02 1.4000E-02 1.3920E-02 1.4170E-02 6.6460E-03

1.2300E-02 1.0680E-02 7.6290E-03 6.4730E-03 1.0590E-02 1.2590E-02 8.2010E-03

6.3300E-03 6.0340E-03 4.6080E-03 3.3570E-03 2.9460E-03 4.4090E-03 3.7530E-03

3.5070E-03 3.9140E-03 1.1550E-02 6.9640E-03 4.2630E-03 1.8690E-03 7.2860E-03

6.2560E-03 3.7450E-03 2.7050E-03 7.1540E-03 6.6290E-03 5.4150E-03 5.5810E-03

2.2280E+00 1.0840E-01 3.5210E-01 4.3520E-01 4.1880E-01 1.5900E-01 4.6980E-01

1.4360E+00 9.0570E-01 1.4290E-01 2.3590E-01 1.0110E-01 3.0530E-02 6.7640E-02

4.6830E-02 1.2370E-02 1.0670E-01 1.3880E-01 1.8090E-01 5.5820E-02 8.1690E-02

1.1000E-01 7.9720E-02 2.3210E-02 8.0570E-02 1.2060E-01 1.2820E-01 6.5880E-02

7.3780E-02 5.5110E-02 3.7850E-02 6.3070E-02 3.2980E-01 9.4250E+00 6.2800E-01

6.2520E+00 2.5920E-02 3.9780E-02 3.4150E-01 9.5820E+00 7.7220E+00 1.6730E+00

4.7060E-02 2.1920E+00 5.0560E+00 1.4740E-02 1.4800E-01 2.4330E-01 1.8060E-01

9.4610E-03 7.5960E-02 4.1000E-01 4.0760E-01 2.3990E-02 1.3120E-01 1.6050E-01

2.1780E-02 4.9070E-02 3.9090E-02 2.8120E-02 3.4190E-02 2.5720E-02 1.1600E-02

3.5390E-03 3.5880E-03 5.0130E-03 3.7000E-03 3.5520E-03 1.2820E-02 1.5690E-02

1.7220E-02 1.7740E-03 6.7000E-03 7.1550E-03 7.6080E-03 1.3050E-03 1.3200E-02

1.5620E-02 2.1220E-02 3.4490E-03 1.0680E-02 1.0290E-02 6.8710E-03 4.4010E-03

7.4350E-03 8.1640E-03 4.8240E-03 1.4950E-03 4.4310E-03 7.1060E-03 6.8680E-03

3.9250E-03 8.8690E-03 1.3000E-02 1.3200E-02 2.5620E-03 1.1460E-02 1.5690E-02

1.5240E-02 7.5490E-04 4.5480E-03 1.0180E-02 1.2010E-02 1.6180E-03 7.4580E-03

1.1220E-02 1.3410E-02 8.1120E-03 8.4460E-03 6.3770E-03 5.1960E-03 9.3680E-03

6.5230E-03 3.6850E-03 6.8310E-03 6.7250E-03 6.1840E-03 5.5350E-03 2.6910E-03

4.4320E-03 2.7800E-03 1.4120E-03 1.6620E-03 3.2990E-03 3.0550E-03 2.3740E-03

7.6370E-03 4.9430E-03 2.5980E-03 1.1890E-03 4.4050E-03 4.3920E-03 2.9370E-03

1.6940E-03 2.8100E-03 5.5130E-03 4.7170E-03 3.4790E-03 2.8400E-02 1.1660E-01

2.7110E-01 2.4110E-01 6.1740E-02 1.1600E-01 3.7780E-01 9.2810E-01 4.6520E-02

1.5750E-01 3.4700E-02 9.4010E-03 3.6870E-02 2.6180E-02 8.3460E-04 1.9260E-02

1.0260E-01 9.6670E-02 1.7010E-02 5.4310E-02 3.4970E-02 5.7390E-02 3.4950E-03

3.1810E-02 6.1600E-02 7.8980E-02 3.2350E-02 2.6600E-02 4.1820E-02 1.5540E-02

1.7410E-02 8.3070E-02 2.5920E-01 6.1760E+00 1.8720E+00 1.2560E-02 1.1270E-02

2.2450E-02 1.8800E-01 4.2750E+00 5.2340E+00 1.5480E-02 5.0490E-02 3.5770E+00

1.5830E-03 2.4680E-02 1.3850E-01 1.2820E-01 4.4730E-03 4.5400E-03 7.6410E-02

3.6560E-01 5.2560E-03 3.8430E-02 1.1410E-01 4.3900E-03 2.7110E-02 2.8380E-02

8.6940E-03 1.6960E-02 1.3910E-02 5.1830E-03 1.7690E-03 1.5430E-03 2.4240E-03

2.1990E-03 7.9820E-04 4.1850E-03 1.0380E-02 9.3120E-03 2.0060E-04 2.5480E-03

5.4960E-03 3.7440E-03 4.2330E-06 2.2090E-03 1.3010E-02 1.0510E-02 7.2610E-04

4.6220E-03 6.9950E-03 3.3300E-03 1.5950E-03 3.6670E-03 3.9580E-03 3.1730E-03

4.8640E-04 1.3990E-03 3.5020E-03 4.6540E-03 1.0940E-03 4.0090E-03 6.0330E-03

8.3650E-03 3.5230E-04 3.7010E-03 9.1500E-03 9.5150E-03 1.2080E-04 1.0310E-03

4.1090E-03 8.4100E-03 1.6680E-04 2.3690E-03 6.3090E-03 7.9520E-03 3.8530E-03

3.6770E-03 3.9220E-03 1.6220E-03 5.2040E-03 4.5500E-03 1.0630E-03 3.5750E-03

2.2610E-03 3.7460E-03 3.0550E-03 8.8420E-04 2.6150E-03 1.9010E-03 2.6600E-04

3.8210E-04 1.9180E-03 1.9280E-03 9.6690E-04 3.8190E-03 2.5690E-03 1.2060E-03

5.8890E-04 2.0530E-03 2.0860E-03 1.9500E-03 6.1780E-04 7.6790E-04 2.9930E-03

3.1180E-03 1.3810E-03 1.2460E+01 3.8560E+00 1.5810E+00 2.1240E+00 7.6870E-01

1.8370E-01 4.0820E-02 1.2930E+00 5.0990E-01 1.7500E-01 6.0270E-01 1.2740E-01

3.5630E-02 1.7660E+00 6.1260E-01 1.7080E-01 4.5440E-02 1.7980E+00 5.3990E-01

1.6440E-01 5.1410E-02 1.2730E+00 5.0500E-01 1.6490E-01 5.3460E-02 9.5570E-01

4.2400E-01 1.8400E-01 7.1140E-02 6.5680E-01 2.8510E-01 1.0490E-01 3.2290E-02

6.5900E-03 6.3150E-01 3.1670E-01 1.3510E-01 4.6690E-02 1.2280E-02 2.2860E-03

2.3110E-01 9.9220E-02 1.9980E-02 1.0860E+01 3.1920E-01 9.5130E-02 2.1630E-02

5.3010E+00 7.1640E-01 1.1260E-01 3.1270E-02 3.8550E-01 1.5000E-01 2.3560E-02

9.6530E-01 4.3300E-01 2.1260E-01 1.1860E-01 6.7300E-02 3.0610E-02 1.2970E-02

9.5600E-02 1.3630E-01 8.1740E-02 1.1270E-02 4.2260E+00 4.4380E-01 3.5940E-02

4.2800E-03 2.0510E-01 9.5290E-02 2.3930E-02 2.9350E-03 2.3260E-01 1.6660E-01

3.0290E-02 2.8930E-03 1.9650E+00 4.3670E-02 8.2950E-03 1.2300E-03 8.2860E-01

2.7340E-02 5.8610E-03 1.6930E-03 9.9430E-01 1.3490E-01 1.6130E-02 2.6220E-03

1.4820E+00 1.7000E-01 2.3900E-02 3.6400E-03 3.4600E+00 4.8150E-01 1.9320E-02

3.2030E-03 9.2760E-01 1.1930E-01 2.5530E-02 3.4660E-03 2.7820E-01 1.0110E-01

2.5770E-02 3.1150E-03 3.0590E-02 1.2660E-02 2.4160E-03 3.6650E-01 3.3570E-02

1.1290E-02 2.2750E-03 5.8900E-02 2.0600E-02 6.3880E-03 1.3360E-03 1.3920E-01

1.5970E-02 4.1610E-03 7.9010E-04 7.7380E-02 2.3760E-02 7.0420E-03 1.1560E-03

2.3690E-02 8.7190E-03 5.2610E-03 7.7980E-04 9.2320E-02 8.6120E-03 2.2080E-03

3.6220E-04 1.7820E-01 3.4710E-02 5.5260E-03 9.9200E-04 1.4010E+01 3.7540E+00

9.3570E-01 8.5810E-01 5.7800E-01 1.5590E-01 7.7930E-01 5.6470E-01 2.3980E-01

2.8680E-01 2.6160E-01 6.5970E-02 4.3770E-01 9.1390E-01 5.7810E-01 1.8170E-01

5.3520E-01 9.4370E-01 4.3840E-01 1.5200E-01 4.1550E-01 6.4130E-01 4.2380E-01

1.6250E-01 4.8650E-01 4.6320E-01 2.5990E-01 1.0650E-01 2.4230E-01 3.0940E-01

1.9870E-01 1.0030E-01 3.9990E-02 2.3090E-01 2.3680E-01 2.1320E-01 1.4260E-01

6.9600E-02 2.2660E-02 1.2840E-01 8.4080E-02 6.7500E-02 1.5320E+00 7.2120E+00

2.1390E-01 7.7820E-02 7.1880E-01 3.2970E+00 7.4440E-01 1.0940E-01 2.3170E-01

1.2950E-01 8.7410E-02 4.3290E-01 4.9320E-01 3.1810E-01 1.3920E-01 4.3620E-02

3.1720E-02 1.3480E-02 7.6470E-02 1.0220E-01 3.2740E-02 4.8570E-02 9.6200E-02

3.0130E+00 5.4130E-01 4.1970E-02 6.6460E-02 1.4980E-01 8.9330E-02 2.8180E-02

9.3910E-02 2.9270E-01 1.8010E-01 3.6460E-02 2.6260E-01 1.3080E+00 3.2420E-02

7.8040E-03 1.4390E-01 5.4440E-01 1.9620E-02 4.6740E-03 1.3460E-01 6.2210E-01

1.4340E-01 1.7780E-02 7.1960E-02 9.8670E-01 1.8760E-01 2.7370E-02 3.7340E-01

2.9610E+00 4.4860E-01 2.1270E-02 7.0600E-02 6.4500E-01 1.2720E-01 2.9520E-02

7.3450E-02 1.2890E-01 9.2360E-02 3.0430E-02 1.8890E-02 1.0860E-02 7.0370E-03

7.0930E-02 2.2850E-01 1.8730E-02 9.9290E-03 2.0590E-02 2.8890E-02 1.4680E-02

6.7040E-03 3.0480E-02 8.2910E-02 1.1010E-02 3.6170E-03 1.9480E-02 4.2500E-02

1.9590E-02 7.9590E-03 1.8950E-02 6.4940E-03 2.5250E-03 3.0460E-03 1.8780E-02

5.6070E-02 6.1570E-03 1.9570E-03 3.1530E-02 1.0570E-01 3.3730E-02 6.0070E-03

1.1170E+01 3.2830E-01 7.1040E-01 4.9480E-01 3.7280E-01 4.5370E-01 4.6290E-01

2.6950E-01 1.2890E-01 2.0910E-01 1.2220E-01 7.9940E-02 4.1010E-01 6.1590E-01

4.8430E-01 1.6260E-01 4.3490E-01 6.2380E-01 3.3570E-01 1.1780E-01 3.5350E-01

4.2910E-01 3.4700E-01 2.5000E-01 3.2480E-01 2.7590E-01 1.4140E-01 7.9370E-02

1.7060E-01 2.0300E-01 1.5080E-01 7.2090E-02 4.6840E-02 1.6630E-01 1.5650E-01

1.3730E-01 1.1280E-01 6.6480E-02 5.7970E-02 7.8730E-02 7.3130E-02 2.0830E-01

1.7330E+00 4.7030E+00 1.3440E-01 1.1180E-01 7.3670E-01 2.2110E+00 5.6460E-01

1.1830E-01 1.3020E-01 8.7550E-02 2.1260E-01 3.1810E-01 2.9500E-01 2.1180E-01

2.7830E-02 2.5000E-02 1.3500E-02 5.7360E-02 5.7850E-02 4.5320E-02 3.4250E-02

1.3640E-02 9.9390E-02 3.0540E+00 4.1790E-01 9.7880E-03 6.1630E-02 1.0450E-01

7.6260E-02 1.2330E-03 1.0770E-01 1.9460E-01 1.4860E-01 2.6560E-02 3.0870E-01

8.5070E-01 2.1510E-02 1.5550E-02 1.3550E-01 3.5080E-01 1.2720E-02 1.5990E-02

1.4320E-01 4.1970E-01 1.0980E-01 1.3160E-02 6.4050E-02 7.2880E-01 1.4820E-01

1.8760E-02 4.4660E-01 2.0000E+00 3.3720E-01 1.5880E-02 5.6150E-02 4.7760E-01

1.0380E-01 1.0640E-02 6.6870E-02 8.5930E-02 7.9590E-02 1.0180E-02 1.0530E-02

6.8530E-03 1.8890E-02 6.3950E-02 1.5110E-01 1.2250E-02 6.3840E-03 1.4680E-02

1.9820E-02 1.1770E-02 7.5560E-03 2.7060E-02 5.3350E-02 7.0230E-03 4.8390E-03

1.5640E-02 3.0280E-02 1.6710E-02 1.4210E-02 3.6040E-03 2.9610E-03 2.1080E-03

4.0030E-03 1.8130E-02 3.6010E-02 4.0290E-03 5.5170E-03 3.3700E-02 7.1050E-02

2.6000E-02 9.5150E-02 3.2940E-01 5.2680E-01 3.2100E-01 2.4340E-01 3.1810E-01

2.3300E-01 5.5980E-02 1.1710E-01 1.3260E-01 2.1580E-02 7.5040E-02 3.2320E-01

6.4280E-01 5.1280E-02 1.5150E-01 3.3510E-01 5.0260E-01 3.5600E-02 1.0800E-01

2.7890E-01 4.0690E-01 1.2520E-01 1.8380E-01 2.0870E-01 1.4480E-01 1.7300E-02

7.7400E-02 1.2530E-01 1.3740E-01 9.0560E-02 5.4960E-03 4.2900E-02 1.0760E-01

1.3050E-01 1.0940E-01 6.0500E-02 1.8450E-02 6.4540E-02 5.6770E-02 4.8660E-02

2.2610E-01 1.3160E+00 2.9210E+00 3.1150E-02 1.0940E-01 5.6440E-01 1.7420E+00

4.8160E-02 1.1340E-01 6.2750E-02 1.1860E-01 1.3920E-01 2.1180E-01 2.2200E-01

1.6580E-02 1.6110E-02 1.1150E-02 3.8230E-02 2.4250E-02 5.4650E-02 1.3060E-02

2.2080E-03 1.4660E-02 7.7690E-02 2.3210E+00 2.5410E-04 1.1380E-02 4.9750E-02

1.0500E-01 1.0740E-04 1.3480E-03 8.1930E-02 2.1580E-01 3.6200E-03 3.2350E-02

2.2600E-01 5.3290E-01 3.2880E-03 1.7650E-02 1.1000E-01 2.3790E-01 2.5890E-03

1.7720E-02 1.0970E-01 3.2960E-01 1.5960E-03 1.4460E-02 5.1430E-02 5.6520E-01

3.0750E-03 2.1020E-02 4.3570E-01 1.5600E+00 1.3540E-03 1.8080E-02 4.6590E-02

3.7220E-01 9.5800E-05 1.2500E-02 5.4720E-02 9.4010E-02 4.5740E-03 8.8450E-03

4.9000E-03 5.4490E-03 1.8760E-02 4.9630E-02 9.1390E-02 1.3360E-03 6.7040E-03

1.1760E-02 1.6110E-02 1.9860E-03 7.7860E-03 2.0950E-02 3.3080E-02 4.9620E-04

5.3780E-03 1.3030E-02 2.6420E-02 9.4750E-03 1.6190E-03 3.2100E-03 9.6070E-04

9.6140E-04 4.3540E-03 1.3470E-02 2.2430E-02 9.3830E-04 6.0340E-03 2.6010E-02

5.6360E-02 7.7250E+00 2.4210E+00 9.8770E-01 1.1980E+00 5.4950E-01 8.1010E-02

2.7410E-01 1.0870E-01 2.4460E-02 4.2350E-01 2.1970E-01 9.7030E-02 2.6990E-02

3.8690E-01 1.9370E-01 9.4760E-02 4.2220E-02 3.8820E-01 1.9210E-01 8.4590E-02

3.2010E-02 3.0120E-01 1.6110E-01 8.8670E-02 4.0120E-02 2.0660E+00 7.8960E-01

2.1990E-01 4.7870E-02 1.0450E-02 2.8050E+00 9.1630E-01 2.5630E-01 6.3230E-02

1.6970E-02 5.6480E-03 1.3760E+00 1.8410E-01 1.8840E-02 2.6050E+01 4.3420E+00

7.4810E-02 1.2450E-02 3.6970E+01 4.6590E+00 3.5640E-01 6.4900E-02 1.6840E+01

1.0170E-01 2.9780E-02 9.3250E-02 5.8150E-02 3.0910E-02 1.3340E-02 5.3800E-02

3.3070E-02 1.4520E-02 4.7540E-03 1.8160E-02 4.5940E-03 2.0750E-03 9.6610E-02

4.7870E-02 2.0110E-02 5.1550E-03 1.1520E-02 6.6100E-03 3.2840E-03 1.2720E-03

2.8980E-02 1.6000E-02 7.3950E-03 2.1100E-03 2.1760E-01 4.2370E-02 4.7180E-03

9.5350E-04 2.6230E-01 5.1720E-02 9.4260E-03 3.0690E-03 2.8580E-02 1.1030E-02

4.5560E-03 1.3780E-03 5.0250E-02 2.6320E-02 1.1830E-02 3.9780E-03 2.2950E-01

4.6630E-02 1.1400E-02 2.7290E-03 2.3960E-02 1.0980E-02 4.3070E-03 1.0860E-03

2.4910E-02 1.0860E-02 4.5670E-03 1.5910E-03 1.2720E-01 1.7180E-02 9.0500E-03

3.0000E-02 1.6370E-02 6.9350E-03 2.0750E-03 1.2900E-02 7.8160E-03 4.8000E-03

2.8700E-03 2.2420E-02 1.5730E-02 7.7330E-03 2.5650E-03 4.7110E-03 3.2710E-03

1.9910E-03 9.2350E-04 1.1800E-02 1.7600E-02 2.4510E-03 1.2760E-03 6.7860E-03

3.4020E-03 1.6870E-03 7.1300E-04 1.8680E-02 4.1200E-03 1.1910E-03 4.3030E-04

7.6180E+00 1.5370E+00 6.9620E-01 3.3150E-01 3.4180E-01 1.4690E-01 9.7980E-02

6.1240E-02 1.4760E-01 1.7520E-01 1.4810E-01 1.0670E-01 1.6320E-01 1.7800E-01

1.2340E-01 7.4770E-02 1.3570E-01 1.7940E-01 1.3520E-01 8.2970E-02 1.5100E-01

1.7100E-01 9.3250E-02 3.8340E-02 4.1890E-01 9.7680E-01 6.9500E-01 2.9270E-01

6.1530E-02 6.8020E-02 1.4490E+00 9.8530E-01 4.1150E-01 1.1530E-01 2.0350E-02

3.2540E-01 7.1760E-01 1.4130E-01 4.3130E+00 1.3050E+01 5.3890E+00 7.5260E-02

3.4560E-01 2.5310E+01 5.5680E+00 4.1520E-01 3.8800E+00 8.7910E+00 5.3590E-02

5.2030E-02 3.6950E-02 3.2120E-02 2.5030E-02 3.8360E-02 2.4010E-02 1.3830E-02

3.6180E-03 7.0900E-03 8.8390E-03 1.9150E-03 3.5080E-02 3.9250E-02 3.0810E-02

2.2310E-02 4.8330E-03 4.6610E-03 4.1200E-03 3.4130E-03 1.0370E-02 1.1610E-02

1.0410E-02 8.3690E-03 4.5410E-02 1.1090E-01 4.6990E-02 4.3800E-03 5.4410E-02

1.2740E-01 4.7720E-02 6.6250E-03 8.6330E-03 1.3320E-02 7.6830E-03 4.5910E-03

1.9770E-02 2.1140E-02 1.6670E-02 1.2180E-02 2.2220E-02 1.4820E-01 4.3200E-02

1.2260E-02 8.0290E-03 1.0160E-02 7.6350E-03 5.0210E-03 6.5380E-03 1.1340E-02

7.8530E-03 4.8470E-03 4.1800E-02 6.6890E-02 6.0680E-03 1.6350E-02 1.0920E-02

8.7600E-03 5.5070E-03 6.9000E-03 6.6910E-03 4.8320E-03 2.8770E-03 1.5720E-02

7.8270E-03 7.5170E-03 5.2830E-03 2.7710E-03 1.8880E-03 1.7180E-03 1.6900E-03

8.8490E-03 5.9390E-03 9.2150E-03 8.8330E-04 3.4020E-03 2.8670E-03 1.9420E-03

8.7850E-04 1.8140E-03 9.0850E-03 4.1340E-03 1.0670E-03 4.8850E+00 2.9850E-01

3.7530E-01 2.4070E-01 6.5860E-02 8.4010E-02 5.4060E-02 3.4640E-02 9.3820E-02

1.2600E-01 1.2850E-01 6.7310E-02 9.8300E-02 1.1270E-01 8.1920E-02 4.2040E-02

9.0030E-02 1.1880E-01 1.0630E-01 8.4480E-02 9.3250E-02 8.5900E-02 4.1480E-02

4.1800E-02 4.1210E-01 5.0530E-01 4.3790E-01 2.5320E-01 2.1210E-02 4.2640E-02

6.7260E-01 7.3150E-01 4.2300E-01 1.3950E-01 4.7210E-02 3.5430E-01 3.8590E-01

7.4420E-02 5.3810E+00 6.0890E+00 3.8220E+00 8.6730E-02 2.9800E-01 1.6440E+01

4.3700E+00 4.8620E-01 4.4940E+00 3.4980E+00 2.2430E-02 2.8340E-02 2.5980E-02

2.0770E-02 2.3840E-02 1.7800E-02 9.4230E-03 2.3770E-03 3.5200E-03 5.2070E-03

3.5140E-03 9.0350E-03 2.1140E-02 2.8880E-02 2.5660E-02 1.4600E-03 2.8320E-03

3.4990E-03 3.5210E-03 2.4150E-03 6.4150E-03 8.8440E-03 9.5480E-03 4.6670E-03

4.6930E-02 5.0970E-02 3.2100E-02 9.3680E-03 4.7590E-02 6.2110E-02 3.8220E-02

2.9490E-03 5.4810E-03 8.9950E-03 5.6630E-03 5.9870E-03 1.1630E-02 1.5410E-02

1.3300E-02 6.2750E-03 1.4030E-02 9.3200E-02 3.2630E-02 1.8800E-03 4.9730E-03

7.5400E-03 6.3040E-03 1.8530E-03 4.1300E-03 7.8810E-03 6.6220E-03 1.5690E-02

3.5880E-02 2.5170E-02 6.9330E-03 8.7590E-03 7.6400E-03 4.2790E-03 3.7870E-03

3.9850E-03 3.6860E-03 2.6920E-03 7.7340E-03 7.5170E-03 5.8190E-03 3.1630E-03

1.1930E-03 1.3940E-03 1.4250E-03 1.2490E-03 5.9000E-03 2.4710E-03 5.2280E-03

3.3160E-03 1.6880E-03 1.9430E-03 1.5760E-03 8.6620E-04 7.3550E-04 1.0370E-03

6.2480E-03 2.4140E-03 8.4840E-02 2.7180E-01 1.0000E-01 2.2050E-02 4.9870E-02

2.9680E-02 1.7860E-03 3.6020E-02 6.6660E-02 8.6320E-02 2.2590E-02 4.4040E-02

5.5190E-02 5.7880E-02 9.3500E-03 3.3710E-02 5.8430E-02 7.6430E-02 4.0080E-02

3.8340E-02 4.1480E-02 3.3370E-02 1.0860E-02 3.1900E-02 2.3970E-01 3.2210E-01

2.1930E-01 7.3280E-03 1.2110E-02 2.1920E-02 2.4510E-01 4.1190E-01 3.1540E-01

5.8590E-03 5.9910E-02 3.2620E-01 1.1990E-02 7.4450E-02 3.8210E+00 3.7670E+00

3.8190E-02 4.1810E-02 1.9410E-01 1.0290E+01 2.3770E-02 7.3710E-01 3.4710E+00

6.9280E-03 1.5770E-02 1.5470E-02 1.0470E-02 1.1170E-02 9.7550E-03 4.5650E-03

1.1880E-03 1.5960E-03 1.6710E-03 2.7410E-03 5.2610E-04 9.4930E-03 1.4600E-02

1.7530E-02 2.2440E-04 1.3260E-03 1.9500E-03 2.1630E-03 6.0290E-06 2.6330E-03

4.7800E-03 6.1580E-03 9.5210E-04 4.3770E-03 3.2080E-02 3.1360E-02 3.0620E-03

6.6080E-03 3.8210E-02 3.5340E-02 5.4930E-04 2.6490E-03 3.3690E-03 4.9230E-03

8.3250E-04 5.3310E-03 7.6000E-03 8.9210E-03 9.1970E-04 6.0160E-03 8.9930E-03

5.9650E-02 1.1760E-04 1.9340E-03 3.4330E-03 4.9570E-03 2.6000E-04 1.6360E-03

2.8570E-03 5.5690E-03 6.7210E-03 8.1050E-03 2.3920E-02 2.0740E-03 5.5070E-03

4.2790E-03 2.1880E-03 1.7390E-03 1.7820E-03 1.8500E-03 1.6980E-03 2.5650E-03

5.2820E-03 3.1630E-03 1.0840E-03 3.2980E-04 8.8410E-04 8.0740E-04 6.5720E-04

2.9500E-03 9.5000E-04 1.6420E-03 2.6910E-03 7.1300E-04 8.7850E-04 8.6610E-04

4.7200E-04 2.0880E-04 5.2710E-04 5.8250E-04 3.2040E-03 9.8540E-01 4.0220E-01

3.5880E+00 2.5660E-01 7.6710E-02 1.7590E-01 9.6290E-02 5.0240E-02 2.5300E-02

6.3370E-01 3.0040E-01 1.3510E-01 5.9070E-02 1.7410E-01 1.1300E-01 6.6700E-02

3.5220E-02 6.0310E-01 3.7500E-01 1.8100E-01 6.3210E-02 2.6050E-01 1.7900E-01

1.0250E-01 5.0380E-02 1.9050E-02 2.5810E-01 2.0540E-01 1.3730E-01 7.7320E-02

3.5840E-02 1.2410E-02 2.3120E-01 1.3970E-01 4.4290E-02 3.1690E+00 8.6050E-01

1.8940E-01 4.9360E-02 5.2970E-01 4.1490E-01 2.2570E-01 8.1110E-02 6.8620E+00

2.9790E+00 4.3910E-02 3.3340E-01 1.4780E-01 6.0090E-02 2.4720E-02 3.0730E-01

1.6640E-01 9.1360E-02 6.4710E-01 6.8280E-01 3.7660E-01 1.9830E-02 1.2850E-01

5.8030E-02 2.3110E-02 8.7730E-03 1.8810E-02 1.0490E-02 5.1860E-03 2.0910E-03

3.1350E-02 1.5500E-02 6.5940E-03 2.0630E-03 1.0360E+00 3.2890E-01 6.2600E-02

8.3770E-03 1.6020E+00 3.7990E-01 5.5850E-02 5.6530E-03 6.7400E-02 2.9090E-02

1.0770E-02 3.3440E-03 1.1690E-01 5.4990E-02 2.3020E-02 8.1690E-03 3.7500E-02

2.3290E-02 1.3480E-02 6.0950E-03 1.0310E-02 5.8610E-03 3.2200E-03 1.7480E-03

6.7970E-03 3.8610E-03 1.8780E-03 7.2440E-04 1.4840E+00 6.4770E-01 1.4860E-02

8.2030E-01 2.5340E-01 4.1820E-02 9.5000E-03 1.2450E-01 1.0030E-01 5.8920E-02

2.5590E-02 1.0050E+00 2.6630E-01 6.5180E-02 1.7710E-02 1.8270E-01 8.1700E-02

3.2200E-02 9.5060E-03 6.1600E-01 2.0580E-01 1.0340E-01 1.5540E-02 2.7380E-01

9.7860E-02 4.4090E-02 2.1420E-02 6.4270E-02 2.8810E-02 1.1020E-02 3.2240E-03

4.3850E-01 2.5650E-01 2.2150E+00 1.4470E-01 3.3890E-02 7.7980E-02 7.1810E-02

4.8390E-02 1.2790E-01 2.8690E-01 2.2380E-01 1.1850E-01 6.8960E-02 6.7050E-02

6.5610E-02 5.8810E-02 2.9530E-01 2.0500E-01 1.9720E-01 1.2900E-01 1.1220E-01

9.4920E-02 8.9660E-02 7.4260E-02 4.2090E-02 1.5430E-01 6.2320E-02 6.1920E-02

7.9400E-02 7.7960E-02 4.7710E-02 1.1850E-01 5.2430E-02 1.0520E-01 1.7990E-01

1.6230E+00 8.6590E-01 1.8540E-01 3.4060E-01 8.5230E-02 1.6900E-01 2.3890E-01

2.9710E+00 9.0210E-01 2.7100E+00 5.5980E-02 1.4460E-01 1.1490E-01 6.1060E-02

1.6610E-01 1.6740E-01 4.3820E-02 4.1060E-01 3.1400E-01 1.1770E-01 3.3810E-01

1.3830E-02 5.5830E-02 4.8710E-02 2.7340E-02 3.9790E-03 7.0850E-03 7.1870E-03

6.0300E-03 2.7620E-03 1.2710E-02 1.2880E-02 8.6020E-03 3.3860E-02 5.4550E-01

3.0380E-01 6.9320E-02 2.4080E-02 8.3360E-01 4.1680E-01 9.4640E-02 9.7480E-03

2.8100E-02 2.2820E-02 1.2380E-02 1.6490E-02 4.8480E-02 4.3620E-02 2.7080E-02

1.4880E-02 1.3370E-02 1.3170E-02 1.0230E-02 2.5880E-03 4.9710E-03 4.2040E-03

2.4750E-03 1.2850E-03 2.7870E-03 2.6450E-03 2.1510E-03 6.4550E-01 2.0450E-01

5.8090E-01 3.5220E-02 4.0410E-01 2.2340E-01 4.4410E-02 8.2010E-02 2.8270E-02

4.1650E-02 5.2380E-02 4.3040E-02 5.3210E-01 2.7350E-01 4.8980E-02 1.6520E-02

7.7580E-02 6.8370E-02 3.9210E-02 4.1050E-01 1.0310E-01 3.7290E-02 7.8020E-02

4.7600E-02 1.5140E-01 7.8130E-02 1.6600E-02 1.1590E-02 2.5400E-02 2.1600E-02

1.3160E-02 7.6570E-02 1.4470E-01 1.0830E+00 9.8670E-03 1.8540E-02 3.5800E-02

5.0530E-02 3.8120E-02 6.5880E-02 1.2740E-01 1.4440E-01 1.6350E-02 3.6710E-02

4.1200E-02 3.6040E-02 6.9700E-02 1.6510E-01 1.2020E-01 5.4430E-02 2.2280E-02

6.1490E-02 5.9650E-02 4.2580E-02 2.1340E-02 2.3100E-03 7.8110E-02 7.7680E-02

5.0830E-02 2.4470E-02 8.2560E-03 1.9390E-02 8.4270E-02 3.4730E-02 6.0800E-02

8.8550E-02 6.5700E-01 6.2140E-01 2.3220E-02 2.1450E-01 1.4160E-01 3.7370E-02

4.2520E-02 2.7080E+00 5.4550E-01 1.2800E-02 3.0530E-02 6.7410E-02 7.7650E-02

9.1170E-02 4.3820E-02 5.1590E-02 2.1370E-01 1.9780E-02 3.1190E-01 6.7640E-02

3.2240E-03 7.6280E-03 2.4990E-02 3.7060E-02 3.9810E-04 2.3160E-03 4.2080E-03

5.2260E-03 6.7710E-05 1.6460E-03 6.1120E-03 1.0610E-02 7.8740E-03 2.0340E-02

2.6430E-01 2.9420E-01 6.5960E-03 1.3330E-02 4.2790E-01 3.2870E-01 1.3510E-03

5.9250E-03 1.3740E-02 1.5620E-02 2.1880E-03 9.4820E-03 2.3670E-02 3.2690E-02

3.8230E-03 7.7520E-03 8.1810E-03 5.5560E-03 9.2040E-04 1.1790E-03 2.0670E-03

2.5250E-03 1.0260E-04 7.9470E-04 1.5470E-03 2.2020E-03 1.4520E-02 5.8020E-01

1.2000E-01 1.1690E-02 1.7310E-02 1.6280E-01 2.1070E-01 1.2820E-02 4.7910E-02

3.2040E-02 9.4260E-03 2.3900E-02 1.4200E-02 2.0600E-01 2.0120E-01 1.8150E-03

8.2190E-03 3.5850E-02 5.2560E-02 2.0510E-01 1.5450E-02 7.8000E-02 1.6180E-02

2.9550E-02 1.3410E-02 5.3650E-02 4.9990E-02 9.3110E-04 7.1630E-03 1.3410E-02

1.4340E-02 3.2300E+00 5.4550E-01 4.3510E-01 2.3130E-01 1.2410E-01 6.3990E-02

6.0220E-01 4.1260E-01 2.8870E-01 1.8750E-01 3.3430E-01 2.1780E-01 1.2810E-01

6.5860E-02 4.8110E-01 3.3930E-01 2.1120E-01 8.5860E-02 8.6770E-02 5.5070E-02

3.0990E-02 1.6060E-02 6.5650E-03 1.0380E-01 5.9870E-02 3.2440E-02 1.6310E-02

7.3980E-03 2.6980E-03 4.5320E-02 3.1300E-02 1.4040E-02 3.3800E-01 1.4720E-01

5.9960E-02 2.1860E-02 1.4010E-01 8.7920E-02 4.7710E-02 2.1650E-02 3.7350E-01

1.8360E-01 1.6240E-02 1.8470E-01 9.4300E-02 4.7080E-02 2.2800E-02 2.1880E-01

2.0230E-01 1.2780E-01 7.0720E+00 1.1990E+01 5.1730E+00 1.5020E-01 4.0560E-02

2.2120E-02 1.2560E-02 7.4430E-03 1.5590E-02 8.5140E-03 4.0770E-03 1.5140E-03

3.0600E-02 1.5680E-02 6.9710E-03 2.2640E-03 2.1960E+01 5.2510E+00 7.3560E-01

2.9420E-02 6.6970E-02 3.1100E-02 2.0210E-02 1.2240E-02 2.9810E-02 1.7970E-02

1.1080E-02 6.3640E-03 2.5720E-02 1.8970E-02 1.5020E-02 1.2770E-02 2.4440E-02

1.5040E-02 7.6540E-03 3.2150E-03 9.3270E-03 5.8460E-03 3.6430E-03 1.7940E-03

1.2760E-02 8.5530E-03 4.9370E-03 2.2400E-03 3.9890E-01 1.4760E-01 4.7920E-03

3.0010E-02 1.6750E-02 1.0130E-02 5.1760E-03 2.4990E-02 1.8670E-02 1.1710E-02

7.0930E-03 1.5280E-01 3.5950E-02 1.1810E-02 4.5300E-03 2.1260E-02 1.0270E-02

4.6440E-03 1.9180E-03 8.0650E-02 5.6470E-02 3.1340E-02 3.9880E-03 2.9480E-02

1.1810E-02 6.6430E-03 3.3340E-03 8.9940E-03 5.1710E-03 2.4840E-03 9.0080E-04

2.3240E+00 9.0750E-02 1.8620E-01 1.7690E-01 1.2020E-01 2.9580E-01 3.3990E-01

2.3850E-01 1.2530E-01 1.3050E-01 1.2920E-01 1.2710E-01 1.1570E-01 2.8350E-01

2.2170E-01 1.6640E-01 9.1570E-02 3.2960E-02 3.4800E-02 3.0600E-02 2.2420E-02

1.1640E-02 2.0460E-02 3.6240E-02 3.5810E-02 2.8260E-02 1.8530E-02 8.9610E-03

2.7380E-02 1.3160E-02 1.9860E-02 8.4380E-02 1.5620E-01 1.0510E-01 4.1500E-02

5.9990E-02 4.8860E-02 4.8130E-02 4.1520E-02 1.6360E-01 5.3870E-02 1.5070E-01

4.8680E-02 8.1530E-02 6.5630E-02 3.8280E-02 2.0200E-01 1.2890E-01 3.4820E-02

4.7090E+00 5.1560E+00 2.0650E+00 5.8390E+00 1.0050E-02 1.9870E-02 1.6200E-02

9.4560E-03 3.1430E-03 5.8000E-03 5.9550E-03 4.8980E-03 3.5630E-03 1.2080E-02

1.2360E-02 9.0300E-03 3.2290E-01 1.4250E+01 5.9170E+00 1.1070E+00 2.2660E-02

3.4830E-02 2.0120E-02 5.4330E-03 1.1460E-02 1.4950E-02 1.1280E-02 6.5060E-03

1.3560E-02 1.5900E-02 1.1800E-02 6.4810E-03 9.7790E-03 8.0790E-03 8.2530E-03

7.1780E-03 3.1960E-03 4.2070E-03 3.6150E-03 2.6290E-03 4.9420E-03 4.0880E-03

4.6620E-03 5.2960E-03 1.3720E-01 4.3210E-02 1.1870E-01 1.2870E-02 1.7050E-02

9.4160E-03 3.4640E-03 1.3780E-02 1.0780E-02 8.9540E-03 7.2160E-03 1.0120E-02

5.9600E-02 3.5400E-02 1.0170E-02 3.3550E-03 9.1610E-03 8.0640E-03 4.8760E-03

4.1490E-02 3.1240E-02 1.3270E-02 1.9940E-02 7.8470E-03 1.7180E-02 9.3970E-03

2.6400E-03 3.1810E-03 2.8870E-03 2.9440E-03 2.5310E-03 2.4820E-02 4.6750E-02

8.7040E-02 1.2360E-01 1.5370E-01 1.1430E-01 1.1430E-01 1.0650E-01 2.8020E-02

7.0250E-02 8.0100E-02 7.0650E-02 1.0550E-01 1.2500E-01 9.3450E-02 4.7890E-02

8.6260E-03 1.6440E-02 1.7960E-02 1.4720E-02 8.1140E-03 2.5510E-03 9.9180E-03

1.6560E-02 1.9130E-02 1.6360E-02 9.3840E-03 7.8930E-03 1.5960E-02 6.3270E-03

2.6320E-02 4.3000E-02 7.0700E-02 5.5760E-02 1.2420E-02 3.3270E-02 3.1610E-02

2.1800E-02 1.3970E-02 1.4010E-01 3.0750E-02 1.5880E-02 2.4210E-02 3.8100E-02

3.9590E-02 1.2950E-01 3.4800E-02 1.9470E-02 2.3490E+00 1.3830E-01 4.6550E+00

1.0180E+00 4.3890E-03 4.4040E-03 8.0350E-03 1.0500E-02 1.2420E-04 1.8850E-03

3.4700E-03 4.3840E-03 3.6810E-05 2.1510E-03 6.2670E-03 1.0090E-02 6.7490E-03

2.3560E-01 5.7580E+00 5.6520E+00 1.6860E-02 6.4790E-03 1.2380E-02 1.0380E-02

5.0460E-03 4.7900E-03 5.9140E-03 5.5780E-03 8.5270E-03 4.9120E-03 5.0440E-03

5.4520E-03 1.6430E-03 5.7170E-03 5.5760E-03 3.7960E-03 6.8280E-04 1.6180E-03

1.9710E-03 2.0560E-03 3.9950E-04 2.8960E-03 3.3460E-03 2.8210E-03 4.4190E-03

1.2120E-01 2.4970E-02 7.0190E-03 4.1460E-03 5.3760E-03 4.7470E-03 5.3960E-03

7.4500E-03 5.1240E-03 2.7180E-03 5.9290E-03 3.9750E-03 2.6810E-02 2.5740E-02

6.5780E-04 1.7700E-03 4.2640E-03 5.8630E-03 2.0140E-02 3.9500E-03 1.9910E-02

4.9830E-03 4.5530E-03 2.5060E-03 5.7240E-03 4.6710E-03 3.6870E-04 1.9270E-03

2.0030E-03 1.4910E-03 8.8890E+00 5.2230E-01 8.3960E-02 3.2460E+00 8.0970E-01

1.2000E-01 1.8120E-02 3.3640E+00 1.0270E+00 2.6930E-01 3.4370E-02 7.1080E-01

4.2780E-01 9.9990E-02 2.1850E-02 2.0110E-01 9.3530E-02 3.6280E-02 1.0420E-02

1.3530E-03 2.1540E-01 9.8930E-02 3.9080E-02 1.2540E-02 2.9330E-03 3.6200E-04

1.5050E-01 5.2890E-02 7.4660E-03 2.2440E-01 6.3750E-02 1.6210E-02 3.0390E-03

2.6330E-01 8.8760E-02 2.2860E-02 4.1560E-03 6.5120E-02 2.5110E-02 3.1730E-03

1.0310E+00 2.6050E-01 1.3790E-01 2.8120E-02 1.3150E-01 2.1440E-02 2.7460E-03

8.3420E-03 1.4110E-02 8.1370E-03 1.0810E-03 2.0250E+01 7.1590E-01 1.6630E-02

9.0250E-04 3.2720E+01 2.6510E+00 7.4190E-02 1.1180E-03 4.4890E+01 3.2950E+00

1.0920E-01 2.7490E-03 1.8910E-02 4.7800E-03 9.4920E-04 1.2460E-04 3.6620E-02

7.7000E-03 6.4480E-04 7.4110E-05 4.7260E-02 1.5870E-02 3.4470E-03 1.8390E-04

7.4300E+00 2.1980E-01 6.8940E-03 2.3220E-03 1.2830E-01 3.9110E-02 9.1430E-03

1.2270E-03 7.7780E-01 8.5010E-02 1.7860E-02 3.3520E-03 2.3980E+00 2.1520E-01

2.3630E-02 3.2870E-03 8.3570E-03 8.2850E-04 4.1200E-05 2.1260E-02 5.3480E-03

7.4950E-04 5.6000E-05 3.1250E-02 6.4450E-03 1.4430E-03 1.8230E-04 3.8930E-02

7.1930E-03 7.2470E-04 1.3640E-04 3.1030E-01 1.7500E-02 2.5570E-03 3.2720E-04

3.7470E-03 3.7540E-03 1.8950E-03 4.3610E-04 2.5780E-02 4.6200E-03 1.1080E-03

2.1610E-05 4.5160E-02 9.4170E-03 1.5450E-03 1.7910E-04 1.2440E+01 5.9570E-01

1.1250E+00 1.6160E+00 7.6470E-01 1.2610E-01 1.1190E+00 1.9820E+00 1.0790E+00

2.9600E-01 6.2380E-01 6.3310E-01 3.1110E-01 8.1440E-02 1.0140E-01 9.3750E-02

5.8910E-02 3.2370E-02 1.4530E-02 8.6540E-02 9.1600E-02 7.1070E-02 4.1970E-02

1.8840E-02 5.7440E-03 8.6490E-02 5.8900E-02 3.5290E-02 1.0400E-01 1.0200E-01

4.3540E-02 1.3860E-02 1.1250E-01 1.1970E-01 6.9490E-02 2.3290E-02 4.3860E-02

2.2080E-02 1.4380E-02 3.6330E-01 7.1310E-01 4.2380E-01 1.3790E-01 6.8470E-02

5.3060E-02 1.2080E-02 7.1500E-03 1.1150E-02 4.0700E-03 4.7030E-03 1.9620E+00

1.4890E+01 8.9150E-01 1.7890E-02 2.5450E+00 3.5000E+01 3.2640E+00 8.7230E-02

2.5820E-01 4.2420E+01 4.3160E+00 1.2770E-01 8.2260E-03 8.5910E-03 3.4210E-03

8.7730E-04 1.4070E-02 1.6150E-02 7.0210E-03 6.3240E-04 1.9980E-02 1.9750E-02

1.2930E-02 4.0060E-03 5.6920E-01 5.5380E+00 2.6730E-01 7.4230E-03 5.1110E-02

5.9500E-02 3.2350E-02 1.0010E-02 1.1240E-01 5.4940E-01 7.7680E-02 1.8800E-02

2.1820E-01 1.8050E+00 2.4500E-01 2.5950E-02 4.0440E-03 3.4000E-03 4.9730E-04

8.6900E-03 7.6500E-03 4.3810E-03 7.5310E-04 8.9620E-03 1.3540E-02 5.8320E-03

1.5630E-03 1.5370E-02 2.0480E-02 6.2910E-03 6.5340E-04 4.0400E-02 2.1710E-01

1.7930E-02 2.8290E-03 3.2120E-03 2.8660E-03 1.3850E-03 1.0070E-03 8.0390E-03

1.5400E-02 2.1900E-03 1.1380E-03 1.3900E-02 2.3960E-02 9.4730E-03 1.6790E-03

1.1110E+01 2.8440E-01 1.0550E+00 1.0740E+00 6.0850E-01 3.1060E-01 1.1700E+00

1.5080E+00 9.3350E-01 2.6820E-01 5.2100E-01 4.0700E-01 2.1190E-01 4.3560E-02

6.5610E-02 6.8880E-02 4.9920E-02 2.4200E-02 2.5470E-02 6.2300E-02 6.4360E-02

5.3550E-02 3.7990E-02 1.9630E-02 4.2600E-02 5.7740E-02 5.0270E-02 4.3740E-02

7.7580E-02 6.8290E-02 2.9720E-02 3.9900E-02 8.9470E-02 8.3900E-02 5.7850E-02

2.5700E-02 2.4290E-02 1.6830E-02 1.3670E-01 3.9490E-01 8.0460E-01 3.5010E-01

3.2300E-02 5.1750E-02 2.7440E-02 5.9580E-03 7.3740E-03 5.0000E-03 4.2140E-03

9.3580E-02 2.5140E+00 1.1580E+01 6.8220E-01 3.5170E-02 3.1940E+00 1.9720E+01

2.5150E+00 6.4140E-03 8.4400E-01 3.8100E+01 3.3750E+00 3.1040E-03 6.5190E-03

5.9100E-03 2.3970E-03 4.4470E-03 1.2950E-02 8.9720E-03 4.9390E-03 6.3200E-03

1.6180E-02 1.3190E-02 1.0890E-02 2.9200E-02 7.1440E-01 4.3600E+00 2.0580E-01

1.7250E-02 4.1450E-02 4.1770E-02 2.7110E-02 2.4120E-02 1.1170E-01 4.3160E-01

6.6230E-02 2.3610E-02 2.4020E-01 1.4510E+00 1.9560E-01 1.7770E-03 3.2870E-03

1.6720E-03 3.1480E-03 7.7750E-03 5.5000E-03 3.1010E-03 3.0470E-03 8.2810E-03

1.0640E-02 4.7590E-03 4.3810E-03 1.3200E-02 1.3040E-02 4.3870E-03 4.0630E-03

4.3460E-02 1.6890E-01 1.4710E-02 2.6770E-03 1.8680E-03 1.4610E-03 1.0130E-03

3.5720E-03 7.7240E-03 1.0370E-02 1.5930E-03 3.6180E-03 1.4060E-02 1.6500E-02

7.6220E-03 5.3400E-02 3.2460E-01 9.0110E-01 1.1500E+00 5.3440E-02 3.9470E-01

1.0800E+00 1.6920E+00 9.7890E-02 2.9580E-01 4.3300E-01 3.1010E-01 1.1390E-02

4.3130E-02 5.7960E-02 5.5030E-02 3.3570E-02 4.1780E-03 2.3110E-02 4.6230E-02

5.7010E-02 5.0350E-02 2.9110E-02 1.4910E-02 5.1290E-02 5.4130E-02 1.4900E-02

4.6040E-02 6.4560E-02 4.9410E-02 1.0120E-02 4.2540E-02 7.9010E-02 8.4890E-02

1.2410E-02 2.6460E-02 1.4560E-02 6.4510E-02 2.5920E-01 5.3580E-01 7.5380E-01

1.3050E-02 3.7080E-02 3.9010E-02 4.7670E-03 3.9600E-03 7.1790E-03 2.2820E-03

7.5720E-03 1.1430E-01 2.2680E+00 1.6110E+01 1.1120E-03 8.7230E-02 2.4720E+00

1.7910E+01 1.1850E-03 1.7520E-02 1.2650E+00 3.4500E+01 8.8790E-04 3.4580E-03

5.4970E-03 4.3060E-03 9.3380E-04 5.3890E-03 1.0890E-02 8.4260E-03 1.1340E-03

7.2750E-03 1.4510E-02 1.5160E-02 2.2190E-03 3.5960E-02 5.5400E-01 3.5350E+00

3.7530E-03 1.9310E-02 3.8030E-02 4.1920E-02 4.8140E-03 2.6120E-02 9.4020E-02

3.9760E-01 3.2840E-03 2.5930E-02 2.0810E-01 1.3110E+00 5.3650E-04 2.1660E-03

2.6140E-03 7.4120E-04 3.6280E-03 6.9040E-03 4.5940E-03 5.6190E-04 3.4570E-03

7.1230E-03 1.0800E-02 1.0040E-03 5.5070E-03 1.0930E-02 1.0380E-02 5.2780E-04

4.7420E-03 3.5700E-02 1.5090E-01 2.1410E-03 1.1100E-03 1.5950E-03 7.2210E-04

9.2170E-04 3.9940E-03 6.5100E-03 7.6030E-03 6.1300E-04 3.8830E-03 1.1920E-02

1.6280E-02 6.6050E+00 3.5510E-01 8.4570E-02 1.6490E+00 6.5360E-01 1.9850E-01

4.7410E-02 1.8550E+00 7.8280E-01 2.2480E-01 4.9080E-02 1.2640E-01 6.4720E-02

3.2800E-02 1.7200E-02 7.7390E-03 2.0000E-01 1.1830E-01 6.9100E-02 3.7210E-02

1.7400E-02 6.2820E-03 1.2740E-01 6.5600E-02 1.7370E-02 6.6910E-01 1.0590E-01

3.1820E-02 1.0630E-02 3.6600E-01 1.2210E-01 4.4870E-02 1.5750E-02 1.3050E-01

5.9500E-02 1.1320E-02 7.9620E-01 5.1120E-01 1.6870E-01 5.9060E-02 1.7280E-01

7.8320E-02 3.3190E-02 1.0810E-01 1.2640E-01 6.5030E-02 2.8280E-02 9.5690E+00

9.5560E-01 6.7270E-02 5.4100E-03 2.1960E-01 1.1460E-01 2.8180E-02 4.0590E-03

3.0890E-01 1.1750E-01 3.4550E-02 3.7470E-03 2.0510E-01 2.5970E-02 1.6470E-02

8.4880E-03 1.9670E+01 4.5760E-01 1.4170E-02 6.7560E-04 2.4800E+01 2.8550E+00

1.2840E-01 9.0700E-04 2.7410E+01 2.6970E+00 1.5150E-01 5.6550E-03 9.8200E-01

1.4370E-01 9.8740E-03 1.3530E-03 8.7600E-01 1.2000E-01 1.5370E-02 2.8940E-03

6.1940E-02 2.9510E-02 1.0730E-02 2.1440E-03 4.0970E-02 1.1190E-02 1.8470E-03

8.4760E-01 4.7380E-02 6.8700E-03 1.8470E-03 4.2850E-01 6.8640E-02 1.0380E-02

2.2740E-03 5.9540E-02 1.5080E-02 4.2360E-03 1.1250E-03 9.0980E-02 2.9370E-02

6.9190E-03 1.9030E-03 1.0010E-02 7.9180E-03 4.7710E-03 1.9040E-03 2.6610E-02

9.8440E-03 4.4560E-03 1.2540E-03 7.3240E-02 3.6100E-02 7.5740E-03 2.8230E-03

7.9440E+00 3.6360E-01 5.1180E-01 8.5430E-01 5.5510E-01 2.1170E-01 8.8680E-01

8.6260E-01 5.2670E-01 1.8990E-01 5.8960E-02 6.3490E-02 4.5090E-02 2.4140E-02

9.2800E-03 9.6840E-02 9.5180E-02 6.8020E-02 4.7430E-02 3.3040E-02 1.7910E-02

7.9210E-02 4.5640E-02 4.3430E-02 1.7190E-01 3.8100E-01 7.7830E-02 2.1160E-02

1.2170E-01 1.8970E-01 8.8930E-02 3.9740E-02 8.4590E-02 4.2820E-02 3.3660E-02

5.1110E-01 4.1890E-01 4.0010E-01 1.4930E-01 1.1170E-01 8.2590E-02 3.3930E-02

8.6510E-02 8.6700E-02 5.9390E-02 2.8270E-02 3.1330E-01 7.0480E+00 1.2080E+00

8.3590E-02 8.3570E-02 1.5760E-01 1.0780E-01 3.2830E-02 6.4250E-02 3.3790E-01

1.9410E-01 4.1150E-02 4.3940E-02 1.3930E-01 1.5270E-02 6.0780E-03 2.7040E+00

1.2890E+01 4.4720E-01 8.0810E-03 2.8310E+00 1.5770E+01 3.4170E+00 1.5200E-01

6.5980E-01 2.0020E+01 3.7820E+00 1.9040E-01 1.3880E-01 6.1540E-01 1.5030E-01

1.0510E-02 3.8730E-02 6.5840E-01 1.2620E-01 1.6940E-02 2.4160E-02 2.5410E-02

2.1880E-02 1.2020E-02 2.0830E-02 1.5520E-02 6.2930E-03 1.5490E-01 5.1270E-01

4.1190E-02 5.3360E-03 6.7900E-02 2.5160E-01 7.0090E-02 1.0670E-02 1.9250E-02

2.7620E-02 1.0580E-02 3.5240E-03 1.7620E-02 5.2310E-02 2.5260E-02 7.2340E-03

8.0090E-03 5.9680E-03 3.4950E-03 2.1260E-03 1.1000E-02 1.1860E-02 7.6220E-03

2.7850E-03 2.3180E-02 4.1390E-02 3.7270E-02 6.6830E-03 5.9700E+00 1.3090E-01

4.6570E-01 5.7650E-01 4.6550E-01 3.5640E-01 6.5910E-01 5.3730E-01 3.3270E-01

2.9190E-02 4.1480E-02 3.8050E-02 2.8010E-02 1.4770E-02 4.6900E-02 4.8990E-02

6.3040E-02 5.6400E-02 3.6770E-02 1.6590E-02 3.9980E-02 4.4850E-02 4.1370E-02

5.2430E-02 1.5120E-01 2.3620E-01 4.7800E-02 4.4860E-02 8.8630E-02 1.2970E-01

6.7490E-02 4.6260E-02 4.4530E-02 3.0050E-02 1.6860E-01 4.0010E-01 4.2900E-01

3.0290E-01 7.1790E-02 6.4410E-02 3.5030E-02 6.4890E-02 5.8100E-02 4.7720E-02

2.6070E-02 1.2830E-02 3.7410E-01 5.1850E+00 9.3330E-01 1.1100E-02 7.9570E-02

1.0390E-01 9.1680E-02 3.4540E-03 1.1100E-01 2.2980E-01 1.6050E-01 2.0970E-02

4.4400E-02 8.6770E-02 5.6100E-03 2.1180E-01 3.2610E+00 8.2620E+00 3.1000E-01

1.2590E-01 3.6870E+00 1.0220E+01 2.6360E+00 7.6130E-03 8.0600E-01 1.4750E+01

2.9050E+00 8.9750E-03 1.4810E-01 4.1140E-01 1.1480E-01 7.2840E-03 3.7280E-02

6.2610E-01 1.0630E-01 6.2590E-03 1.7850E-02 1.8360E-02 2.0140E-02 9.7200E-03

1.3860E-02 8.7790E-03 2.1950E-02 1.5690E-01 3.2990E-01 2.6930E-02 1.0190E-02

6.9500E-02 1.5820E-01 5.3660E-02 6.7970E-03 1.5190E-02 1.6820E-02 6.6500E-03

4.6210E-03 1.4700E-02 3.8980E-02 2.1050E-02 6.0070E-03 4.0050E-03 2.9040E-03

1.6240E-03 6.3730E-03 8.1150E-03 8.4100E-03 3.4240E-03 5.4880E-03 1.9030E-02

2.9750E-02 2.8150E-02 2.7750E-02 1.4020E-01 3.7160E-01 5.5090E-01 1.1280E-01

3.5630E-01 4.7960E-01 3.1400E-01 1.5850E-02 1.9060E-02 2.5670E-02 2.4970E-02

1.5280E-02 1.5120E-02 3.6280E-02 3.8890E-02 3.7850E-02 3.2050E-02 1.8870E-02

1.5310E-02 4.0200E-02 2.8680E-02 1.9930E-02 4.6330E-02 1.1040E-01 1.4750E-01

1.5750E-02 3.9740E-02 6.7360E-02 9.7210E-02 2.0550E-02 4.1020E-02 1.8920E-02

5.9040E-02 1.4930E-01 3.0290E-01 3.5460E-01 4.2920E-02 4.0950E-02 2.9650E-02

4.3260E-02 3.5680E-02 3.2660E-02 1.9650E-02 2.3490E-03 1.4990E-02 2.8450E-01

4.0360E+00 7.6950E-04 1.2500E-02 6.3700E-02 1.1400E-01 2.5270E-04 3.7960E-03

8.5170E-02 2.4740E-01 1.3560E-02 1.0940E-02 2.6540E-02 5.0340E-02 1.1110E-02

2.9300E-01 2.4970E+00 6.8370E+00 9.0670E-04 1.4950E-01 2.7940E+00 8.3790E+00

2.2130E-03 7.7610E-03 6.0530E-01 1.1490E+01 1.3390E-03 1.0490E-02 1.1820E-01

3.2840E-01 1.9530E-03 7.5750E-03 2.9660E-02 5.2200E-01 5.9340E-04 6.8950E-03

1.5440E-02 1.8820E-02 3.8620E-03 9.6430E-03 8.1960E-03 4.0270E-03 2.3720E-02

1.1960E-01 2.1230E-01 2.2270E-03 1.0650E-02 5.3280E-02 1.2830E-01 2.2560E-03

6.9960E-03 1.2190E-02 9.9850E-03 1.1360E-03 4.4670E-03 1.1690E-02 3.4740E-02

4.0050E-03 2.4490E-03 2.2730E-03 1.0690E-03 2.5480E-03 4.1860E-03 4.7090E-03

3.6430E-03 1.7500E-03 6.3820E-03 1.6190E-02 2.4920E-02 7.0360E+00 3.1270E-01

5.3660E-02 1.7960E+00 5.1350E-01 1.5570E-01 4.3700E-02 1.2590E-01 5.8590E-02

2.3480E-02 8.3010E-03 2.1920E-03 1.9190E-01 1.0840E-01 5.3970E-02 2.2680E-02

7.3920E-03 1.5520E-03 8.7170E-02 2.0050E-02 5.5600E-03 2.2770E-01 7.7320E-02

2.4120E-02 4.8220E-03 7.8900E-01 9.0590E-02 2.6600E-02 8.5780E-03 9.9970E-02

2.2450E-02 6.5270E-03 1.2170E+00 3.7620E-01 1.0220E-01 3.5680E-02 1.3800E-01

4.4660E-02 6.9390E-03 4.4490E-03 2.0020E-02 4.6950E-03 1.9210E-03 2.0830E+00

2.1020E-01 2.2230E-02 2.6670E-03 3.7590E+00 3.4880E-01 3.7400E-02 5.2800E-03

9.1330E-02 8.4740E-02 2.7650E-02 4.8840E-03 2.0700E-02 1.1030E-02 3.3260E-03

4.9660E-04 5.2280E-02 1.4920E-02 3.1090E-03 3.5660E-04 8.4180E-01 3.4140E-02

5.5620E-03 1.5480E-03 2.6070E-01 5.4040E-02 1.2300E-02 2.1660E-03 2.2520E+01

5.7570E-01 1.1050E-02 7.6910E-04 2.9670E+01 2.6130E+00 1.0310E-01 6.5090E-04

4.1180E+01 2.9790E+00 1.3600E-01 8.5990E-03 3.1730E-02 5.9250E-03 2.1520E-03

6.6990E-02 2.5070E-02 9.9410E-03 2.6100E-03 2.0390E+00 7.9790E-02 1.2170E-02

4.3790E-03 4.9240E-02 1.2240E-02 2.8960E-03 3.7510E-04 1.8540E-01 2.9860E-02

4.5630E-03 6.8870E-04 1.8210E-03 1.2660E-02 3.8020E-03 9.9210E-04 2.2690E-02

7.0720E-03 2.4060E-03 5.1130E-04 1.1770E-01 2.2460E-02 3.5540E-03 5.3160E-04

1.0170E+01 3.4580E-01 7.4860E-01 1.0120E+00 3.5290E-01 1.1340E-01 5.8310E-02

6.3080E-02 3.7850E-02 2.0220E-02 8.7180E-03 9.5530E-02 7.8100E-02 6.3320E-02

4.5160E-02 2.7140E-02 1.2140E-02 3.9650E-02 4.1350E-02 1.2960E-02 1.0840E-01

1.0280E-01 4.9890E-02 1.8840E-02 1.4140E-01 5.2180E-01 7.3170E-02 2.3820E-02

5.2680E-02 4.3190E-02 1.1380E-02 4.4490E-01 5.9930E-01 3.1640E-01 8.8820E-02

8.3760E-02 5.1910E-02 2.5220E-02 3.7080E-03 1.1410E-02 9.3680E-03 2.3420E-03

1.9930E-01 1.3780E+00 2.3420E-01 2.5610E-02 1.6970E-01 2.9540E+00 4.1420E-01

4.2260E-02 7.0450E-02 1.0530E-01 6.7520E-02 3.0560E-02 1.3770E-02 7.6690E-03

5.9900E-03 2.8980E-03 2.2140E-02 2.1440E-02 1.1910E-02 2.6380E-03 1.0710E-01

6.0020E-01 3.2780E-02 5.3590E-03 5.3970E-02 1.5950E-01 4.7020E-02 1.3340E-02

2.2310E+00 1.6220E+01 6.8890E-01 1.5200E-02 2.5990E+00 2.1060E+01 3.2260E+00

1.1470E-01 4.4240E-01 3.3330E+01 3.8350E+00 1.6280E-01 1.5870E-02 1.4150E-02

2.9120E-03 3.3680E-02 3.0270E-02 1.4610E-02 7.0270E-03 2.1500E-01 1.3770E+00

7.9680E-02 1.1010E-02 1.9660E-02 2.3060E-02 8.6930E-03 2.6330E-03 2.9690E-02

1.2300E-01 3.1040E-02 6.1470E-03 1.5170E-03 7.6600E-03 5.0730E-03 1.7080E-03

1.0120E-02 9.7920E-03 6.0370E-03 1.9250E-03 2.7880E-02 6.7890E-02 1.6760E-02

3.7140E-03 7.9390E+00 3.1030E-01 6.3690E-01 6.4810E-01 2.2760E-01 2.4440E-02

3.8290E-02 4.3480E-02 3.0950E-02 1.3940E-02 3.5970E-02 5.7240E-02 5.6370E-02

4.9240E-02 3.7650E-02 2.0740E-02 1.6730E-02 3.3420E-02 2.4980E-02 4.7770E-02

7.5830E-02 6.7890E-02 3.1990E-02 3.7430E-02 1.3240E-01 3.8090E-01 5.7240E-02

2.7020E-02 3.8260E-02 2.0690E-02 1.4280E-01 3.7880E-01 3.9090E-01 2.4330E-01

4.4410E-02 5.1650E-02 3.2160E-02 2.9660E-03 5.4800E-03 7.9590E-03 4.0890E-03

2.2320E-02 2.3390E-01 1.0290E+00 1.8610E-01 2.0760E-02 1.8700E-01 2.3310E+00

3.1620E-01 1.8930E-02 5.4850E-02 8.2280E-02 6.4930E-02 6.5830E-03 7.4040E-03

6.3130E-03 3.8680E-03 8.3470E-03 1.8040E-02 1.3490E-02 8.3890E-03 1.0550E-02

1.1680E-01 4.4280E-01 2.5250E-02 1.2290E-02 4.7010E-02 1.1990E-01 4.0300E-02

1.3220E-01 2.7690E+00 1.1910E+01 5.1730E-01 9.4100E-02 3.2180E+00 1.5830E+01

2.4700E+00 3.6220E-03 1.4600E+00 2.6410E+01 2.9530E+00 7.9290E-03 1.2250E-02

6.2380E-03 1.7600E-02 2.1370E-02 1.9610E-02 9.0890E-03 2.4380E-02 2.5310E-01

1.0750E+00 6.1080E-02 6.9660E-03 1.4910E-02 1.5050E-02 5.8290E-03 4.5320E-03

3.1020E-02 9.0520E-02 2.4660E-02 1.2140E-03 3.4290E-03 4.7780E-03 2.4650E-03

5.2500E-03 7.4570E-03 6.4660E-03 4.0020E-03 5.5500E-03 2.6550E-02 4.7990E-02

1.3890E-02 1.2570E-01 3.1220E-01 4.9440E-01 4.4050E-01 7.9890E-03 2.2380E-02

3.1210E-02 3.0620E-02 1.9490E-02 7.3760E-03 3.1840E-02 4.6950E-02 4.8120E-02

3.7920E-02 2.0540E-02 6.8260E-03 1.7900E-02 3.1560E-02 1.8650E-02 4.6320E-02

5.9110E-02 4.3400E-02 1.2510E-02 3.6680E-02 1.0650E-01 3.0110E-01 1.3570E-02

2.5160E-02 2.5770E-02 5.1220E-02 1.3630E-01 3.0760E-01 3.7310E-01 2.0350E-02

4.4800E-02 3.1380E-02 2.2240E-03 3.2790E-03 4.7190E-03 5.0030E-03 2.6250E-03

2.6050E-02 1.8610E-01 9.1700E-01 3.0150E-03 2.2790E-02 1.5100E-01 1.9800E+00

1.1020E-03 2.0800E-02 5.1730E-02 8.9110E-02 2.1710E-03 6.4320E-03 5.8670E-03

3.3110E-03 2.1410E-03 9.3560E-03 1.4660E-02 1.0030E-02 2.4640E-03 1.1180E-02

9.1950E-02 3.4320E-01 2.1650E-03 1.3340E-02 4.0300E-02 1.0810E-01 6.3610E-03

1.6470E-01 2.1300E+00 9.2780E+00 6.5010E-04 1.1390E-01 2.4730E+00 1.3630E+01

4.6380E-04 4.3610E-03 1.1230E+00 2.2100E+01 4.0630E-03 7.1370E-03 8.4410E-03

7.3070E-03 1.5310E-02 1.6150E-02 1.1820E-02 6.4210E-03 2.6150E-02 1.9640E-01

8.3490E-01 2.0610E-03 7.4850E-03 1.2000E-02 1.0040E-02 6.8530E-04 4.9860E-03

2.4650E-02 7.8390E-02 9.1040E-04 2.0810E-03 3.3300E-03 2.4940E-03 1.8560E-03

4.0590E-03 6.2970E-03 4.3440E-03 1.0090E-03 6.1220E-03 2.1970E-02 4.1210E-02

4.3150E+00 4.4090E-01 1.7140E-01 6.6960E-02 4.5530E-02 2.7520E-02 1.5550E-02

7.0820E-03 7.8890E-02 5.6310E-02 4.0540E-02 2.9310E-02 1.9800E-02 1.0160E-02

5.9770E-02 3.3270E-02 2.0750E-02 1.0730E+00 7.1990E-01 1.7150E-01 5.7210E-02

7.7350E-01 1.3800E-01 2.8900E-01 8.5370E-02 1.2060E+00 1.7620E-01 4.8900E-02

7.4440E-01 4.1950E-01 2.2470E-01 1.1320E-01 5.8730E-01 3.4870E-01 4.1650E-02

2.4160E-02 2.2180E-01 3.6250E-02 1.9000E-02 1.1120E-01 4.8510E-02 1.5360E-02

3.3350E-03 8.7090E-02 3.5800E-02 1.2270E-02 3.2890E-03 7.5320E-02 3.2420E-02

1.1350E-02 2.5100E-03 3.3930E-02 1.8370E-02 1.0390E-02 4.8810E-03 2.5010E+00

4.6780E-01 2.5210E-02 4.8220E-03 2.2470E+00 3.3160E-01 3.8120E-02 7.0470E-03

8.6440E-02 4.4580E-02 1.9100E-02 6.4370E-03 3.0860E+00 4.3700E-01 4.4700E-02

8.0720E-03 1.0830E-01 4.1720E-02 1.6430E-02 6.0310E-03 1.2450E-01 5.6010E-02

2.5810E-02 1.0750E-02 1.3700E+01 2.0020E-01 6.6960E-03 1.8320E+01 3.3540E+00

1.1450E-01 4.3640E-03 3.1950E+01 3.5910E+00 2.8950E-01 1.6400E-02 1.5470E-01

4.8750E-02 1.1660E-02 2.2350E-03 2.6410E-02 1.4560E-02 6.9550E-03 2.6840E-03

2.9390E-02 1.5580E-01 1.7950E-02 8.5000E-03 4.8700E-02 2.5800E-02 1.0140E-02

2.6910E-03 6.5290E-02 1.8880E-02 5.9570E-03 1.3230E-03 4.7850E+00 2.5860E-01

3.9860E-02 3.0160E-02 2.6630E-02 1.7840E-02 7.4810E-03 4.5660E-02 4.3780E-02

3.8530E-02 2.7280E-02 1.5150E-02 6.0640E-03 3.5200E-02 3.2890E-02 1.7300E-02

2.0550E-01 6.8990E-01 8.0430E-02 1.2450E-01 4.0350E-01 1.3290E-01 1.0250E-01

5.4930E-02 2.3080E-01 5.3940E-01 7.0850E-02 3.6420E-01 3.4150E-01 2.5930E-01

1.6260E-01 4.0660E-01 1.0140E-01 2.2350E-01 1.8120E-02 7.5880E-02 1.0370E-01

1.2670E-02 3.2820E-02 4.3130E-02 4.0010E-02 1.7880E-02 1.9070E-02 4.0500E-02

2.9900E-02 1.3860E-02 1.6890E-02 3.2040E-02 2.7320E-02 1.3500E-02 1.7720E-02

1.8740E-02 1.0250E-02 4.3840E-03 4.6290E-01 1.2340E+00 5.2690E-01 2.3900E-02

7.2670E-02 1.4830E+00 3.8060E-01 4.4480E-02 3.3200E-02 3.4800E-02 3.0270E-02

1.9790E-02 7.9730E-02 2.0640E+00 5.1450E-01 5.3220E-02 2.5690E-02 5.6170E-02

3.3000E-02 1.6280E-02 3.5090E-02 6.3810E-02 4.0110E-02 2.5600E-02 3.2710E+00

7.0270E+00 1.4040E-01 3.3460E+00 9.0270E+00 3.8070E+00 1.3840E-01 5.6340E-01

1.7150E+01 4.3590E+00 3.8500E-01 4.8630E-02 6.5500E-02 3.7560E-02 1.1220E-02

1.1350E-02 1.0150E-02 9.4910E-03 6.7570E-03 2.2040E-02 4.0030E-02 8.0950E-02

7.0420E-03 2.5760E-02 1.7820E-02 1.4270E-02 8.7240E-03 9.5760E-03 3.6280E-02

1.4570E-02 5.3020E-03 3.2720E+00 1.9490E-02 2.4220E-02 1.6180E-02 1.3120E-02

8.7270E-03 2.7440E-02 3.0630E-02 2.1730E-02 1.6460E-02 1.3230E-02 7.9470E-03

2.1170E-02 2.0180E-02 1.5490E-02 1.1410E-01 2.1010E-01 3.9730E-01 4.4860E-02

1.1810E-01 8.0310E-02 8.9650E-02 6.8350E-02 8.8200E-02 1.7770E-01 2.0780E-01

1.6710E-01 2.1520E-01 2.0630E-01 1.6390E-01 1.8050E-01 1.9150E-01 1.1640E-01

1.2080E-02 3.1580E-02 6.1390E-02 4.3390E-02 4.2930E-03 2.8310E-02 2.4190E-02

3.2680E-02 3.2670E-03 1.4610E-02 2.5660E-02 2.5090E-02 1.7450E-03 1.4260E-02

1.9890E-02 2.3750E-02 1.0310E-02 9.7880E-03 9.7020E-03 4.2760E-03 2.1960E-02

5.2590E-01 5.8310E-01 3.6940E-01 1.2730E-02 6.6730E-02 9.5600E-01 2.9040E-01

9.0800E-03 2.1990E-02 2.3060E-02 2.4370E-02 1.3330E-02 7.5110E-02 1.3330E+00

3.9250E-01 7.7830E-03 1.7050E-02 3.5600E-02 2.5770E-02 1.1810E-02 1.8820E-02

4.4470E-02 3.3320E-02 4.4100E-01 3.6780E+00 2.8550E+00 1.0930E-01 3.8040E+00

4.2860E+00 2.6820E+00 1.2520E-02 6.3510E-01 1.0960E+01 3.3420E+00 1.1680E-02

3.7540E-02 3.6970E-02 2.3180E-02 3.6490E-03 7.2960E-03 7.5400E-03 7.3980E-03

1.4690E-02 1.5610E-02 4.0930E-02 3.0940E-02 1.0130E-02 1.3680E-02 1.2780E-02

6.8830E-03 2.9170E-03 5.7190E-03 2.4010E-02 1.0690E-02 8.5560E-03 8.8900E-03

1.1130E-02 8.0630E-03 3.3370E-03 1.5860E-02 9.2990E-03 1.1230E-02 1.0850E-02

7.7120E-03 3.7380E-03 1.0320E-02 8.4890E-03 9.5670E-03 4.9110E-02 1.1030E-01

2.0840E-01 3.1740E-02 4.2190E-02 9.3660E-02 4.5380E-02 4.9600E-02 3.3740E-02

6.1790E-02 1.0900E-01 6.4080E-02 9.7390E-02 1.1560E-01 9.9990E-02 4.8130E-02

1.7170E-01 2.3510E-02 6.0400E-03 1.4100E-02 1.4490E-02 3.9120E-02 4.7690E-04

4.1280E-03 1.9640E-02 2.0490E-02 4.1420E-04 2.9720E-03 1.0220E-02 2.0510E-02

1.4930E-05 1.8900E-03 1.0210E-02 1.8110E-02 4.8650E-03 4.3650E-03 4.0030E-03

3.5060E-03 4.5210E-03 2.3310E-02 3.6890E-01 3.5400E-01 2.8760E-03 1.0770E-02

4.4280E-02 6.0390E-01 1.5840E-03 8.0840E-03 1.4690E-02 1.4900E-02 2.8550E-03

1.1540E-02 5.0590E-02 8.4140E-01 1.9240E-03 5.8950E-03 1.1100E-02 2.4620E-02

2.5600E-03 9.7720E-03 1.2410E-02 2.9690E-02 1.6690E-02 6.8520E-01 2.7820E+00

3.9650E-03 1.4160E-01 2.6810E+00 2.6040E+00 5.7040E-03 6.3260E-03 4.4100E-01

6.9980E+00 2.2310E-03 1.1210E-02 2.3170E-02 1.7210E-02 7.0840E-04 3.2490E-03

4.6910E-03 4.0310E-03 7.3460E-03 6.4070E-03 8.4440E-03 2.7950E-02 2.6070E-03

8.7190E-03 7.9220E-03 4.9040E-03 5.0450E-04 2.6960E-03 3.5950E-03 1.4130E-02

3.6400E+00 9.3690E-01 1.7500E-01 7.3180E-02 8.4550E+00 3.6710E+00 1.0420E+00

1.9960E-01 3.3010E-02 7.3320E-03 3.2700E+00 1.2460E+00 4.1910E-02 2.8010E+00

4.0560E-01 7.7070E-02 7.1340E-03 1.9100E+00 5.9560E-01 9.7110E-02 7.0240E-03

6.3470E-01 1.4560E-01 8.9270E-03 3.5690E-02 2.0350E-02 9.4060E-03 3.4340E-03

1.6270E-02 1.2080E-02 6.7150E-03 5.2520E-02 1.1460E-01 7.8200E-03 2.3490E-03

2.1920E-01 1.8630E-01 8.7110E-02 2.0050E-02 1.7200E-01 8.4050E-02 2.5010E-02

3.9040E-03 1.1140E-01 3.1990E-02 6.9880E-03 8.0940E-04 1.1860E-01 3.7020E-02

6.4150E-03 1.0300E-04 1.1100E-01 5.7400E-02 5.0600E-02 3.2890E-02 1.8400E-01

4.4350E-02 1.1200E-02 2.4470E-03 4.5700E-02 1.4940E-02 4.0040E-03 9.7050E-04

8.6990E-02 7.7990E-02 4.6020E-02 1.5000E-02 1.9600E-01 4.3860E-02 7.1610E-03

6.8640E-04 3.5970E-02 1.5320E-02 4.4360E-03 8.4450E-04 5.1650E-02 3.9580E-02

8.7100E-03 5.7260E-02 2.6090E-02 1.4520E-02 7.3430E-03 5.0240E-02 2.3950E-02

8.3230E-03 2.1840E-03 7.2930E-02 7.5250E-02 3.7900E-02 8.7970E-03 4.8140E-02

2.6920E-02 9.3510E-03 1.9550E-03 4.0310E-02 2.3490E-02 1.0820E-02 6.4840E-03

2.0710E-02 1.0630E-02 5.5470E-03 2.6830E-03 3.2350E-02 1.6040E-02 6.0780E-03

1.4620E-03 3.0740E+00 1.3260E+00 1.1610E-01 2.7700E+00 2.7930E+00 3.2610E+00

1.5780E+00 3.7180E-01 4.9840E-02 1.7730E+00 1.0340E+00 8.3040E-01 8.4620E-01

1.4230E+00 2.8590E-01 7.2710E-02 6.8880E-01 7.7620E-01 5.1570E-01 1.0480E-01

3.2790E-01 2.1970E-01 8.3780E-02 2.1240E-02 1.4930E-02 1.0830E-02 7.7990E-03

1.4140E-02 1.0080E-02 4.5560E-03 4.2010E-02 4.7160E-02 4.8740E-02 3.7980E-03

1.7880E-01 5.3560E-02 9.5180E-02 8.5940E-02 7.6160E-02 5.9790E-02 6.5780E-02

2.6310E-02 2.3960E-02 6.1520E-02 2.8190E-02 7.3940E-03 5.1650E-02 4.2590E-02

2.6050E-02 6.7880E-03 7.1930E-02 8.6130E-02 3.8180E-02 9.9380E-03 5.4590E-02

9.3920E-02 3.4750E-02 1.0400E-02 1.4690E-02 2.1530E-02 1.2150E-02 3.9750E-03

7.7130E-02 3.5480E-02 2.9070E-02 3.9090E-02 4.4200E-02 1.0470E-01 4.1510E-02

7.7770E-03 1.3740E-02 1.4500E-02 1.2290E-02 4.6380E-03 4.3340E-02 1.6870E-02

1.8480E-02 3.1940E-02 2.9680E-02 1.7030E-02 5.3630E-03 2.5580E-02 2.0390E-02

1.5730E-02 7.5620E-03 7.5260E-02 2.4740E-02 2.6940E-02 2.8960E-02 2.6090E-02

1.5210E-02 1.8450E-02 9.3680E-03 3.2250E-02 1.5650E-02 1.3090E-02 3.8900E-03

1.2490E-02 1.0060E-02 6.5920E-03 2.2570E-03 1.7010E-02 1.2480E-02 9.5120E-03

5.6740E-03 1.6670E+00 1.1130E+00 2.0350E-01 2.9130E+00 1.0820E+00 1.9870E+00

1.5480E+00 4.1420E-01 7.7210E-01 9.8570E-01 9.7480E-01 2.3340E-01 7.6840E-01

7.9460E-01 1.7220E-01 1.7290E-01 5.8060E-01 4.5490E-01 3.5490E-01 1.4920E-01

2.0320E-01 1.2110E-01 1.0830E-02 1.1430E-02 1.1140E-02 8.2450E-03 1.1060E-02

7.1610E-03 3.0860E-03 3.1520E-02 1.7400E-02 4.0110E-02 1.7210E-02 8.5640E-02

8.0630E-02 5.3400E-02 9.0030E-02 2.1020E-02 5.6900E-02 4.0400E-02 5.2730E-02

2.7330E-03 2.3900E-02 4.1420E-02 2.2250E-02 1.8480E-02 3.5440E-02 2.5570E-02

1.5990E-02 5.4730E-02 5.7830E-02 3.3220E-02 9.2360E-03 1.5430E-02 4.7790E-02

5.7820E-02 2.4170E-02 3.9800E-03 1.2390E-02 1.3900E-02 9.0060E-03 4.9250E-02

2.6860E-02 3.3920E-02 2.5500E-02 6.8690E-03 4.6430E-02 6.6170E-02 2.9200E-02

3.6270E-03 1.0830E-02 9.7210E-03 9.6960E-03 3.0630E-02 1.7330E-02 1.3200E-02

1.9010E-02 2.2230E-02 1.4240E-02 7.3850E-03 1.0530E-02 1.6080E-02 1.2670E-02

1.1530E-02 5.1490E-02 2.2110E-02 2.7920E-02 1.5500E-02 9.5190E-03 1.6530E-02

1.0810E-02 1.4970E-02 2.4190E-02 1.0980E-02 9.5660E-03 3.9460E-03 7.5780E-03

7.9840E-03 5.0470E-03 2.9700E-03 7.4430E-03 9.8710E-03 8.9030E-03 7.3250E-03

1.1130E+00 3.3960E-02 2.2080E-01 2.2140E+00 8.2980E-01 9.4240E-01 1.2130E+00

2.1910E-01 8.2100E-01 7.7960E-01 5.8240E-02 2.7500E-01 5.9160E-01 3.8610E-01

2.3280E-02 2.4450E-01 3.7340E-01 3.9860E-01 5.6280E-02 1.4610E-01 1.1330E-01

4.5890E-03 8.1350E-03 8.7180E-03 6.5610E-03 7.6700E-03 4.3980E-03 2.1270E-03

2.1010E-02 5.7660E-03 2.0840E-02 2.3970E-02 2.5810E-02 7.2940E-02 5.8150E-02

4.7820E-02 2.7640E-03 2.7850E-02 3.6030E-02 4.7380E-02 1.4670E-04 4.6010E-03

2.2510E-02 3.2300E-02 4.7080E-03 2.0270E-02 2.3470E-02 1.6220E-02 4.3830E-02

2.2790E-02 2.1540E-02 1.3510E-02 4.3760E-03 1.6510E-02 3.8500E-02 3.7420E-02

8.9820E-04 4.6290E-03 9.4930E-03 1.1650E-02 2.2300E-02 3.0640E-02 2.5010E-02

1.2430E-02 6.1220E-04 1.0450E-02 3.9740E-02 4.8320E-02 5.9390E-04 4.7090E-03

7.4990E-03 9.8500E-03 1.6560E-02 1.6660E-02 6.0970E-03 1.1640E-02 1.1920E-02

1.1100E-02 7.2150E-03 3.4980E-03 9.7880E-03 1.0770E-02 9.8180E-03 2.5520E-02

3.0150E-02 1.7670E-02 5.0970E-03 2.3010E-03 1.0130E-02 1.0560E-02 1.1570E-02

1.6130E-02 7.3200E-03 5.2410E-03 3.7420E-03 4.5030E-03 4.7610E-03 3.9690E-03

2.4930E-03 2.5150E-03 6.4610E-03 7.2310E-03 6.1540E-03 6.4720E-03 3.5290E-02

1.5890E-01 1.2510E+00 1.0100E+00 2.6900E-01 1.6760E-02 4.7390E-01 4.2180E-01

1.0810E-02 8.1890E-02 2.1810E-01 3.4430E-01 1.1800E-03 3.9680E-02 2.3080E-01

2.4730E-01 1.5770E-02 7.4650E-02 6.7430E-02 1.5220E-03 4.1940E-03 4.2040E-03

3.3930E-03 3.9390E-03 1.9570E-03 1.0850E-03 1.0510E-02 1.8300E-03 7.1310E-03

1.6580E-02 3.2210E-03 3.7200E-02 4.9300E-02 1.3680E-02 7.1310E-05 4.6440E-03

2.7150E-02 2.5170E-02 1.8910E-05 2.0190E-04 4.6350E-03 2.4840E-02 5.7920E-04

7.6830E-03 1.4510E-02 8.7410E-03 2.5100E-02 5.8460E-03 9.9560E-03 9.9690E-03

1.0010E-03 4.9170E-03 1.2030E-02 2.9110E-02 1.8820E-04 1.0840E-03 4.1190E-03

7.8590E-03 6.4560E-03 2.2690E-02 1.1290E-02 4.8250E-03 3.4600E-05 9.9250E-04

1.0610E-02 3.7910E-02 3.3730E-05 9.2390E-04 4.5530E-03 5.8850E-03 6.8610E-03

1.0740E-02 1.7720E-03 5.8200E-03 4.5410E-03 6.4400E-03 4.3040E-03 1.0610E-03

3.8780E-03 6.9620E-03 5.5020E-03 8.6610E-03 2.3220E-02 7.1990E-03 6.6640E-04

3.3340E-04 3.1950E-03 8.4120E-03 5.3360E-03 8.0640E-03 3.7420E-03 2.0810E-03

2.3340E-03 2.1590E-03 1.9040E-03 2.4120E-03 1.3190E-03 5.7320E-04 3.0480E-03

4.2020E-03 3.3610E-03 3.9080E+00 4.0560E-01 3.0300E-02 5.6550E-03 1.1670E-03

9.2630E+00 1.7350E-01 6.6400E-02 1.7880E+00 4.0530E-01 1.8850E-02 2.9830E-03

2.5990E+00 3.9500E-01 3.1310E-02 2.3750E-03 1.6600E+00 1.7290E-02 1.2000E-02

3.5830E-02 1.7480E-02 6.7280E-03 1.6290E-03 1.1610E-02 5.4240E-03 2.5650E-03

9.1790E-03 3.6900E-02 9.6870E-03 1.6300E-03 1.3830E-01 3.0390E-02 5.3460E-03

6.4890E-04 1.7990E-01 5.6560E-02 1.1500E-02 1.1380E-03 5.4250E-01 1.6820E-01

3.0360E-02 2.8100E-03 1.4600E-01 1.8660E-02 1.0540E-03 6.8940E-05 5.1210E-02

2.5420E-02 9.4390E-03 1.5110E-03 6.9320E-02 5.5970E-02 2.5040E-02 4.3260E-03

2.8130E-01 7.9690E-02 1.9220E-02 2.9090E-03 1.2290E-01 5.2340E-02 1.4840E-02

1.8270E-03 1.1720E-01 7.6490E-02 2.5330E-02 3.5500E-03 4.0870E-01 1.0590E-01

2.2150E-02 2.3430E-03 3.9850E-02 3.9900E-02 3.4180E-02 6.6920E-02 4.5610E-02

1.9830E-02 3.3840E-03 2.0230E-01 5.0520E-02 7.5430E-03 1.3470E-03 4.2680E-02

1.4930E-02 5.8600E-03 1.2690E-03 9.2090E-02 3.8550E-02 9.7440E-03 1.7640E-03

4.5840E-02 4.4800E-02 2.0110E-02 6.8900E-04 7.2630E-02 3.0230E-02 6.5840E-03

6.4470E-04 7.1410E-02 4.5520E-02 1.2850E-02 1.4560E-03 4.7540E+00 6.9580E-01

4.6540E-02 7.2720E-03 3.7660E+00 4.0600E+00 9.7240E-02 8.3640E-01 6.6900E-01

3.2610E-01 1.4290E-02 1.3840E+00 2.6580E+00 3.4600E-01 2.9070E-02 7.8470E-01

6.1680E-01 6.5680E-03 2.1320E-02 1.4290E-02 9.7490E-03 5.2550E-03 8.4190E-03

5.6650E-03 2.2870E-03 7.6500E-03 2.1460E-02 1.3000E-02 4.6320E-03 4.8090E-02

6.7930E-02 2.4970E-02 4.9410E-03 6.8610E-02 7.0300E-02 4.6070E-02 1.0790E-02

1.9520E-01 2.4990E-01 1.4600E-01 2.8620E-02 5.8220E-02 6.4420E-02 1.4600E-02

8.6600E-04 3.3530E-02 2.1040E-02 1.1270E-02 7.1410E-03 5.7380E-02 2.2970E-02

2.4920E-02 2.1740E-02 1.1060E-01 1.3380E-01 5.7130E-02 1.7600E-02 6.7470E-02

4.5240E-02 3.2660E-02 1.3330E-02 8.0730E-02 3.3970E-02 4.7760E-02 2.3190E-02

1.3540E-01 1.7880E-01 8.5600E-02 2.0760E-02 3.9800E-02 4.0030E-02 1.3930E-02

5.2580E-02 2.7640E-02 1.8120E-02 1.4750E-02 8.3550E-02 8.8170E-02 4.0000E-02

6.5230E-03 2.3640E-02 1.8920E-02 7.2770E-03 4.0760E-03 4.6180E-02 3.5100E-02

2.8130E-02 8.8400E-03 3.8200E-02 3.1930E-02 1.2560E-02 1.0110E-02 4.3590E-02

2.4730E-02 1.8020E-02 5.3930E-03 5.0650E-02 1.8920E-02 2.8150E-02 1.1650E-02

4.2090E+00 7.5830E-01 4.3880E-02 1.2870E+00 3.7700E+00 1.3010E+00 3.3490E-01

6.1460E-01 3.6360E-01 1.6320E-01 3.0890E-01 1.5840E+00 1.4450E+00 1.9610E-01

3.3470E-01 6.2370E-01 1.6840E-01 1.1560E-02 1.1940E-02 1.0220E-02 7.4370E-03

6.1720E-03 4.8190E-03 2.3020E-03 6.1200E-03 1.2480E-02 1.2620E-02 6.2670E-03

1.3940E-02 4.4470E-02 4.2000E-02 1.5910E-02 2.2220E-02 6.0650E-02 5.0240E-02

3.0970E-02 5.4100E-02 1.7600E-01 1.7060E-01 9.5150E-02 2.0360E-02 5.0470E-02

3.2250E-02 7.4670E-03 2.0580E-02 1.6330E-02 1.4770E-02 7.2800E-03 3.7440E-02

2.1110E-02 2.0260E-02 2.3070E-02 4.0050E-02 9.0370E-02 8.5230E-02 4.0710E-02

3.2130E-02 4.0250E-02 3.2060E-02 2.3570E-02 4.1170E-02 3.9850E-02 2.9150E-02

3.8230E-02 4.1320E-02 1.1980E-01 1.1740E-01 5.7920E-02 4.0020E-02 2.8520E-02

6.8680E-03 3.5930E-02 2.0760E-02 2.1190E-02 1.2620E-02 3.0010E-02 6.8170E-02

5.2670E-02 2.4130E-02 1.2970E-02 1.4500E-02 1.1170E-02 4.4170E-03 1.9140E-02

3.1160E-02 2.4580E-02 1.9720E-02 3.0560E-02 2.0130E-02 1.2460E-02 1.1110E-02

2.2830E-02 2.3570E-02 1.6540E-02 1.0480E-02 2.6930E-02 2.3570E-02 1.6480E-02

2.0500E-02 3.1460E+00 5.8190E-01 3.5080E-01 2.1820E+00 2.2470E+00 1.0910E-01

3.9550E-01 3.5360E-01 2.4240E-01 5.2100E-02 5.3880E-01 1.3510E+00 6.9570E-01

1.2630E-01 4.2070E-01 2.9820E-01 5.1120E-03 8.8730E-03 9.1080E-03 7.3550E-03

4.2550E-03 3.5910E-03 1.9910E-03 4.5890E-03 6.8680E-03 1.0290E-02 6.7700E-03

3.4160E-03 1.9450E-02 3.6240E-02 2.8290E-02 5.1590E-03 2.9800E-02 4.0970E-02

4.4770E-02 8.9850E-03 8.3450E-02 1.3560E-01 1.4380E-01 5.9760E-03 2.7010E-02

3.3470E-02 1.6450E-02 1.0880E-02 1.3450E-02 1.3580E-02 6.3000E-03 1.9170E-02

2.2300E-02 1.8190E-02 1.5970E-02 1.2020E-02 4.4920E-02 7.4040E-02 6.0400E-02

1.2880E-02 2.8950E-02 2.7930E-02 2.5660E-02 1.5880E-02 3.5940E-02 2.4960E-02

3.4520E-02 9.8580E-03 5.5340E-02 9.7340E-02 8.9900E-02 3.6220E-02 1.5590E-02

4.8190E-03 2.0930E-02 1.9850E-02 1.8480E-02 8.6060E-03 8.4340E-03 3.7330E-02

4.7310E-02 3.7450E-02 6.7620E-03 9.8770E-03 1.0630E-02 5.0120E-03 6.3040E-03

2.0750E-02 2.0730E-02 2.3160E-02 2.2920E-02 1.1020E-02 1.3190E-02 8.6000E-03

1.0250E-02 1.9060E-02 1.5060E-02 1.0690E-02 1.1110E-02 2.2510E-02 1.3980E-02

1.8020E-02 2.0500E+00 8.1460E-02 8.0630E-01 2.3040E+00 2.7530E-02 1.8270E-01

3.0280E-01 2.2060E-01 7.5600E-03 1.0860E-01 6.5010E-01 9.9030E-01 4.1200E-02

2.1420E-01 3.0800E-01 2.2260E-03 5.7880E-03 6.8140E-03 5.3720E-03 2.7200E-03

2.4330E-03 1.5280E-03 3.0600E-03 3.4620E-03 6.7260E-03 5.5290E-03 6.8020E-04

5.9350E-03 2.0140E-02 3.1450E-02 6.3390E-04 1.0260E-02 2.9110E-02 4.2230E-02

3.8450E-05 2.3010E-02 8.2290E-02 1.4250E-01 1.3700E-03 1.0660E-02 2.3510E-02

1.9740E-02 4.9140E-03 1.0280E-02 8.8700E-03 5.0870E-03 7.3140E-03 1.9580E-02

1.5630E-02 7.8960E-03 3.0270E-03 1.7460E-02 4.4240E-02 6.2040E-02 3.9980E-03

1.6750E-02 2.2880E-02 2.0480E-02 4.1890E-03 2.1750E-02 2.6880E-02 2.1390E-02

1.4810E-03 1.8100E-02 6.1850E-02 9.2180E-02 2.7540E-02 6.3620E-03 3.9190E-03

1.0060E-02 1.7800E-02 1.1980E-02 5.4120E-03 2.2290E-03 1.4650E-02 3.2700E-02

3.7710E-02 3.2540E-03 6.3560E-03 7.1370E-03 4.8590E-03 1.9960E-03 9.6300E-03

1.7030E-02 1.9070E-02 1.5280E-02 5.0890E-03 1.1450E-02 5.3030E-03 3.7920E-03

1.2310E-02 1.2980E-02 7.6190E-03 3.3480E-03 1.4530E-02 1.5630E-02 1.0250E-02

2.3240E-02 1.4010E-01 1.4340E+00 4.9390E-03 5.4970E-02 1.7990E-01 1.2700E-01

9.8250E-04 1.5440E-02 1.3990E-01 7.2100E-01 1.1000E-02 7.8400E-02 1.9230E-01

6.7880E-04 2.5850E-03 3.6440E-03 2.9390E-03 1.3200E-03 1.1250E-03 8.3280E-04

1.5300E-03 1.3720E-03 3.5750E-03 2.0620E-03 1.0330E-04 1.2870E-03 6.9970E-03

2.0500E-02 7.5110E-06 1.5390E-03 1.3510E-02 2.3710E-02 4.2060E-06 7.6700E-05

3.5890E-02 8.7810E-02 2.3130E-04 2.8890E-03 1.1150E-02 1.3380E-02 1.6990E-03

5.6970E-03 3.8500E-03 2.8820E-03 1.8020E-03 1.1340E-02 9.4580E-03 2.6060E-03

4.5140E-04 5.9560E-03 1.7830E-02 3.9380E-02 7.6130E-04 7.0450E-03 1.3090E-02

1.0650E-02 4.9940E-04 8.5410E-03 1.9090E-02 9.0780E-03 1.5640E-05 3.6020E-03

2.2340E-02 5.8150E-02 1.4890E-02 1.5920E-03 2.3600E-03 3.6330E-03 1.0870E-02

5.4190E-03 2.7010E-03 5.6140E-04 3.3950E-03 1.6030E-02 2.3450E-02 1.2160E-03

3.2240E-03 3.2740E-03 3.2960E-03 2.3250E-04 2.7700E-03 1.0150E-02 1.0450E-02

7.6390E-03 1.8010E-03 6.7090E-03 2.4140E-03 1.0510E-03 5.7140E-03 7.8830E-03

3.7020E-03 6.0660E-04 6.1760E-03 1.1340E-02 3.7530E-03 1.0730E+00 2.4300E-01

7.6220E-01 3.2520E-01 1.0440E-01 1.9670E-02 2.0750E+00 6.9010E-01 1.8280E-01

4.4920E-02 2.1890E+00 1.0650E-01 2.8970E-02 2.1670E-02 1.4290E-02 7.5940E-03

3.0960E-03 1.2620E-02 1.0730E-02 5.2700E-03 3.5330E-02 7.4220E-02 5.0640E-02

2.6420E-02 1.8600E-01 1.0240E-01 4.7270E-02 1.4800E-02 2.2720E-01 9.3690E-02

3.0530E-02 6.2640E-03 1.1690E-03 1.1860E-03 8.3590E-04 3.4630E-04 2.0450E-02

8.7450E-03 3.1840E-03 8.4260E-04 7.7860E-02 2.2660E-02 5.9390E-03 1.5490E-03

3.9380E-02 3.5680E-02 3.2110E-02 2.4970E-02 8.4050E-02 7.7100E-02 4.6910E-02

1.7520E-02 1.3610E-01 5.9880E-02 2.7610E-02 1.1030E-02 8.1360E-02 5.9420E-02

3.2750E-02 1.1600E-02 7.8410E-03 3.5620E-03 1.3950E-03 3.6840E-04 6.2720E-02

2.9650E-02 1.1640E-02 1.2370E-01 7.2360E-02 2.7060E-02 4.8730E-03 4.1290E-02

4.4340E-02 4.6590E-02 3.9920E-02 1.5250E-02 6.0810E-03 2.2480E-03 7.3090E-04

1.2440E-02 9.4370E-03 5.7650E-03 3.4810E-03 2.3320E-02 3.0420E-02 3.2280E-02

2.0210E-02 4.1140E-02 4.8690E-02 4.0520E-02 2.2540E-02 6.4730E-02 5.4090E-02

3.4190E-02 1.7000E-02 8.7710E-01 2.7510E-01 2.8990E-01 2.2150E-01 1.1690E-01

2.8330E-01 1.0370E+00 6.9390E-01 2.2670E-01 3.6330E-01 1.3150E+00 6.4260E-02

1.2250E-02 7.7900E-03 7.7590E-03 7.2780E-03 1.1650E-02 5.7560E-03 4.0670E-03

2.6500E-02 5.6650E-02 4.0130E-02 1.7140E-02 6.7140E-02 7.0890E-02 6.7420E-02

5.7460E-02 2.7510E-02 1.0700E-01 9.0980E-02 4.2820E-02 1.0280E-03 2.4850E-04

5.4830E-04 9.1430E-04 7.4030E-03 7.2980E-03 6.1490E-03 2.8260E-03 1.5510E-02

3.9650E-02 2.0950E-02 5.5520E-03 3.5050E-02 3.3170E-02 2.1030E-02 9.7390E-03

7.2740E-02 1.4950E-02 2.8610E-02 5.2880E-02 3.7750E-02 7.7300E-02 4.8450E-02

2.2240E-02 4.9500E-02 2.3520E-02 2.8600E-02 3.7870E-02 1.3810E-03 3.6890E-03

3.1750E-03 1.7160E-03 3.7820E-02 2.8130E-02 1.4310E-02 6.8290E-02 3.0130E-02

3.9750E-02 3.0910E-02 4.5680E-02 4.8770E-02 2.7090E-02 7.6430E-03 5.0100E-03

7.0050E-03 4.4310E-03 1.7860E-03 8.0500E-03 4.3550E-03 4.7580E-03 5.6260E-03

1.7490E-02 3.4160E-02 1.9980E-02 8.0410E-03 5.2280E-02 3.2770E-02 1.9940E-02

9.6520E-03 5.1580E-02 2.3260E-02 2.5390E-02 2.7360E-02 5.2320E-02 1.9930E-01

2.1580E-01 1.3410E-01 4.6660E-02 1.9660E-01 5.6140E-01 6.8660E-01 6.2710E-02

3.2100E-01 7.7830E-01 3.5630E-03 8.0080E-03 6.7230E-03 4.7090E-03 7.9350E-03

4.9920E-03 1.3320E-03 1.7670E-02 3.8890E-02 2.3210E-02 1.2550E-02 9.5170E-03

4.5630E-02 6.0670E-02 5.9320E-02 1.3220E-03 1.8830E-02 6.1460E-02 9.7260E-02

1.9810E-04 6.7620E-04 6.1850E-04 2.4870E-04 2.0500E-03 5.0440E-03 5.8130E-03

3.2270E-03 3.5380E-03 1.0760E-02 2.1830E-02 1.7500E-02 3.1770E-02 1.6010E-02

1.0510E-02 7.5760E-03 1.2400E-02 4.8940E-02 3.7270E-02 1.4190E-02 1.3190E-02

2.3330E-02 3.8420E-02 4.0730E-02 7.9830E-03 3.3410E-02 3.1220E-02 1.9950E-02

1.5640E-04 8.7800E-04 2.2130E-03 3.2260E-03 1.8750E-02 2.1330E-02 1.2970E-02

1.3220E-02 4.9490E-02 3.5770E-02 1.5520E-02 5.1300E-02 1.7680E-02 9.2870E-03

8.5830E-03 1.6190E-03 3.3230E-03 4.2610E-03 2.9530E-03 2.1590E-03 5.2010E-03

4.6700E-03 3.0340E-03 1.1660E-02 2.8700E-02 9.9130E-03 2.8480E-03 4.4240E-02

2.1750E-02 8.3350E-03 2.1840E-03 2.0310E-02 3.2010E-02 2.2390E-02 1.0330E-02

1.7870E+00 3.5000E-01 5.1070E-02 6.4990E+00 2.3570E+00 5.0340E-01 8.5440E-02

2.0660E+00 9.0400E-01 4.3230E-02 2.2980E-01 1.7510E-01 6.7500E-02 2.4390E-02

6.3920E-02 2.3620E-02 8.5510E-03 5.1780E-02 1.0430E-01 3.8010E-02 5.5790E-03

1.6370E-01 6.9500E-02 2.6110E-02 6.7200E-03 6.6820E-02 3.5130E-02 1.4920E-02

3.9230E-03 6.1210E-02 2.2610E-02 6.6740E-03 1.6180E-03 2.6700E-01 7.7440E-02

1.5190E-02 1.6770E-03 1.8870E-01 4.8200E-02 1.9320E-02 8.2860E-03 1.8930E-01

6.4810E-02 1.9390E-02 4.7980E-03 9.5900E-02 3.4780E-02 1.0620E-02 2.7020E-03

1.7690E-01 6.3680E-02 2.0270E-02 5.8610E-03 6.6750E-02 2.6730E-02 8.2610E-03

1.7120E-03 3.6020E-02 1.6150E-02 5.3570E-03 1.1210E-03 5.9210E-02 2.6510E-02

2.2880E-03 6.1550E-02 2.8580E-02 1.3510E-02 4.8790E-03 4.2920E-02 1.7020E-02

6.3890E-03 1.9870E-03 3.1090E-02 1.9560E-02 9.1470E-03 2.4650E-03 1.6500E-02

7.5900E-03 2.5070E-03 9.0660E-04 1.2720E-02 8.8750E-03 4.5980E-03 1.4830E-03

1.2440E-02 6.0250E-03 3.2730E-03 1.3790E-03 1.5050E-02 6.2760E-03 2.0520E-03

4.5510E-04 1.4860E+00 3.6290E-01 1.7670E+00 2.5260E+00 2.2380E+00 5.9080E-01

1.1710E+00 4.6180E-01 6.2600E-01 1.0400E-01 6.4610E-02 4.7180E-02 6.1990E-02

3.3210E-02 2.8450E-02 1.0920E-02 3.8800E-02 5.3360E-02 3.3630E-02 2.4000E-02

4.7320E-02 7.3260E-02 5.1260E-02 2.9160E-02 2.4030E-02 2.5720E-02 2.3880E-02

1.6870E-02 8.7710E-03 3.0730E-02 2.1840E-02 8.0910E-03 7.6720E-02 1.1180E-01

6.2440E-02 1.6750E-02 4.7990E-02 1.0510E-01 3.3900E-02 9.8450E-03 4.7050E-02

8.8730E-02 5.2820E-02 2.0760E-02 1.9820E-02 4.9420E-02 3.0020E-02 1.1900E-02

4.7060E-02 8.3030E-02 5.0610E-02 2.0560E-02 1.5930E-02 2.9210E-02 2.2500E-02

9.7260E-03 9.6740E-03 1.4370E-02 1.3780E-02 6.2520E-03 3.4900E-02 1.3060E-02

1.8130E-02 2.8570E-02 2.9900E-02 1.5260E-02 8.7710E-03 1.3270E-02 1.9540E-02

1.2360E-02 6.5390E-03 1.9560E-02 1.1280E-02 8.4630E-03 6.9640E-03 5.2510E-03

6.7760E-03 6.0030E-03 2.8350E-03 9.5410E-03 5.6170E-03 3.2980E-03 2.3020E-03

6.0250E-03 5.6980E-03 3.6540E-03 1.7370E-03 4.9770E-03 6.0410E-03 4.6030E-03

2.2580E-03 9.6070E-01 1.3330E-01 1.7830E+00 1.1260E+00 1.7140E+00 4.3630E-01

6.4820E-01 4.2610E-01 3.6310E-02 8.8340E-02 4.0970E-02 3.0910E-02 1.6390E-02

1.9320E-02 1.1650E-02 2.5850E-02 2.1430E-02 3.1640E-02 2.1040E-02 1.0950E-02

3.0880E-02 4.9940E-02 4.1960E-02 5.1080E-03 1.5850E-02 1.8320E-02 2.0980E-02

5.6710E-04 7.9640E-03 1.9270E-02 1.8080E-02 1.4960E-02 6.2290E-02 6.1650E-02

4.0130E-02 1.9250E-02 3.5050E-02 5.8140E-02 1.8670E-02 1.0080E-02 3.6420E-02

5.4170E-02 3.9720E-02 3.1090E-03 1.5990E-02 3.0350E-02 2.3940E-02 1.1140E-02

3.5710E-02 4.9830E-02 3.7610E-02 2.2800E-03 1.2940E-02 1.6910E-02 1.8330E-02

5.9740E-04 8.5830E-03 7.9600E-03 1.1610E-02 1.3740E-02 1.8540E-02 1.2060E-02

1.3500E-02 1.5260E-02 1.8450E-02 7.0550E-03 3.9460E-03 8.7470E-03 1.2230E-02

8.8530E-03 9.1470E-03 8.4600E-03 9.7980E-03 3.5290E-03 1.0820E-03 4.1660E-03

3.8970E-03 4.7290E-03 6.3620E-03 2.9880E-03 2.8270E-03 1.6640E-03 3.2730E-03

3.6530E-03 2.9540E-03 1.7930E-03 1.1090E-03 3.6000E-03 3.7370E-03 3.4750E-03

3.2620E-02 1.0790E-01 1.2270E+00 1.0110E+00 8.2760E-02 5.1010E-01 1.6260E-01

1.2540E-02 2.6080E-02 2.1260E-02 2.0590E-02 6.7820E-03 8.9280E-03 8.0710E-03

1.2920E-02 5.8880E-03 1.9760E-02 1.0760E-02 9.1980E-04 1.1210E-02 2.1240E-02

3.3130E-02 7.0510E-05 5.5150E-03 1.1450E-02 1.3040E-02 8.6700E-05 7.9810E-04

5.6420E-03 1.7130E-02 1.6770E-03 1.6570E-02 4.0060E-02 3.0960E-02 8.2850E-03

9.7650E-03 1.8730E-02 2.8350E-02 1.8520E-03 9.0550E-03 2.4060E-02 3.4390E-02

6.3160E-04 2.6490E-03 1.0820E-02 2.2560E-02 2.5370E-03 9.4020E-03 2.3380E-02

3.1970E-02 1.9590E-04 2.3290E-03 8.8710E-03 1.3460E-02 8.0160E-05 5.5530E-04

6.0100E-03 7.6080E-03 3.0920E-03 1.4580E-02 4.2280E-03 4.8790E-03 8.7680E-03

7.0530E-03 6.6480E-03 8.5700E-04 3.3630E-03 5.7550E-03 7.4050E-03 2.4650E-03

6.9640E-03 3.5290E-03 2.2260E-03 3.1920E-04 8.0950E-04 2.7920E-03 3.1320E-03

3.1810E-03 1.2140E-03 1.7420E-03 7.8340E-04 1.3790E-03 1.7370E-03 1.7930E-03

1.1290E-03 1.2680E-04 1.1120E-03 2.3840E-03 2.3290E-03 2.4050E+00 3.0890E-01

3.6680E-02 7.6780E+00 3.1700E-01 1.5060E-01 2.6520E-01 1.2760E-01 4.5880E-02

2.0020E-02 4.4600E-02 2.1210E-02 4.8340E-03 3.6670E-03 3.3410E-02 6.9210E-03

1.7580E-03 9.4020E-02 3.6930E-02 1.2450E-02 2.3370E-03 5.9670E-02 2.5880E-02

1.0900E-02 2.6120E-03 7.1690E-02 2.9660E-02 9.9620E-03 1.7330E-03 1.4230E-01

4.5110E-02 6.3610E-03 9.7530E-04 1.4140E-01 5.0160E-02 1.1220E-02 1.8210E-03

4.2670E-02 1.8040E-02 7.3050E-03 2.1630E-03 8.0860E-02 3.1380E-02 9.8110E-03

1.7910E-03 1.9980E-01 5.3590E-02 1.4180E-02 2.0560E-03 9.0990E-02 2.6380E-02

7.0720E-03 1.4160E-03 1.7870E-01 5.7000E-02 1.5820E-02 3.0370E-03 9.0690E-02

2.3770E-02 1.3500E-02 3.9920E-02 2.0830E-02 7.7350E-03 1.6290E-03 5.7940E-02

2.0480E-02 6.5490E-03 1.7640E-03 1.6980E-02 6.9820E-03 2.2100E-03 4.2910E-04

2.2380E-02 1.0680E-02 3.6070E-03 9.4840E-04 1.8390E-02 1.8200E-02 6.3290E-03

2.3880E-03 2.0360E-02 9.9790E-03 3.5120E-03 6.2990E-04 2.4850E-02 1.2460E-02

5.6720E-03 2.0580E-03 2.4990E+00 3.5490E-01 2.6660E+00 3.6860E+00 1.3140E-01

8.7920E-02 1.7900E-01 1.1020E-01 3.7330E-02 2.9840E-02 1.5480E-02 1.1670E-02

2.9340E-03 1.5650E-02 1.4550E-02 3.6090E-03 3.2650E-02 4.3740E-02 2.7470E-02

1.3750E-02 2.0480E-02 3.0080E-02 1.7120E-02 1.1870E-02 2.1060E-02 3.4170E-02

2.4120E-02 1.1410E-02 5.7090E-02 5.1670E-02 4.0100E-02 5.9020E-03 6.1440E-02

5.5630E-02 3.6460E-02 1.0580E-02 1.8030E-02 2.0030E-02 1.1250E-02 6.7400E-03

2.6640E-02 3.6460E-02 2.5910E-02 1.0440E-02 5.3510E-02 1.0530E-01 4.1390E-02

1.5690E-02 2.0900E-02 4.9600E-02 2.2890E-02 7.8000E-03 4.0190E-02 8.5880E-02

5.1320E-02 1.7780E-02 4.5850E-02 4.8880E-02 8.3510E-03 2.3600E-02 1.5140E-02

1.0640E-02 6.6900E-03 2.0480E-02 2.7330E-02 1.5480E-02 6.3350E-03 8.3240E-03

6.5850E-03 4.1410E-03 1.9660E-03 9.3630E-03 9.1100E-03 7.9850E-03 3.8040E-03

1.4720E-02 1.0290E-02 8.3010E-03 2.8540E-03 1.1450E-02 7.5410E-03 5.3030E-03

3.1620E-03 1.2450E-02 1.0370E-02 6.7460E-03 5.1220E-03 1.9310E+00 7.9520E-01

2.6350E+00 1.4440E+00 4.2260E-02 6.5880E-02 1.3730E-01 8.2170E-02 1.6820E-02

1.5550E-02 1.0120E-02 2.2000E-03 6.9880E-03 1.1530E-02 6.7830E-03 8.7740E-03

2.2480E-02 3.1450E-02 2.4040E-02 7.1740E-03 1.2270E-02 2.4020E-02 1.6320E-02

4.3670E-03 1.6590E-02 2.4790E-02 2.2150E-02 1.5390E-02 4.8820E-02 2.5410E-02

2.7180E-02 2.0840E-02 4.5280E-02 3.3070E-02 2.3770E-02 7.3030E-03 1.1230E-02

1.4690E-02 8.9510E-03 6.7800E-03 2.1790E-02 2.4000E-02 2.1670E-02 1.4170E-02

4.1320E-02 7.3070E-02 3.3250E-02 4.7190E-03 1.7350E-02 3.4650E-02 1.9120E-02

7.5330E-03 3.5080E-02 6.0360E-02 4.4180E-02 2.6600E-02 3.3580E-02 1.6850E-02

1.1030E-02 1.2380E-02 1.2120E-02 6.2010E-03 6.5490E-03 1.5480E-02 1.8090E-02

1.2000E-02 3.4390E-03 5.0890E-03 4.6500E-03 2.5630E-03 2.6390E-03 6.9230E-03

6.3730E-03 6.8870E-03 1.1040E-02 5.9420E-03 6.5560E-03 3.6910E-03 5.2090E-03

6.5240E-03 5.8260E-03 3.1990E-03 5.6700E-03 6.7430E-03 7.8530E-03 5.1510E-03

2.4080E-01 9.3550E-01 2.0610E+00 1.9290E-02 3.6170E-02 5.7220E-02 3.7620E-02

7.9650E-03 1.3890E-02 6.3160E-03 1.4670E-03 2.8910E-03 6.4460E-03 7.4670E-03

1.1520E-03 9.5370E-03 1.9430E-02 2.7810E-02 8.5170E-04 7.7020E-03 1.1330E-02

1.9950E-02 1.5320E-04 4.9790E-03 1.4380E-02 2.5820E-02 3.0480E-03 1.7450E-02

3.7170E-02 2.0210E-02 5.2330E-03 2.1940E-02 3.3740E-02 2.1000E-02 2.1630E-03

6.7390E-03 8.7770E-03 9.9410E-03 9.4390E-04 6.8850E-03 1.8030E-02 2.4180E-02

2.0560E-03 1.5690E-02 3.3220E-02 5.6390E-02 7.7720E-04 5.0210E-03 1.4080E-02

3.0560E-02 1.0710E-03 8.0590E-03 2.8600E-02 6.0640E-02 1.5940E-02 1.4030E-02

2.0910E-02 3.8140E-03 1.0460E-02 8.5800E-03 4.8940E-03 1.7640E-03 6.3340E-03

1.2000E-02 1.4530E-02 1.0500E-03 3.3970E-03 3.6750E-03 2.2080E-03 5.6400E-04

2.6870E-03 5.7370E-03 5.8640E-03 7.3580E-03 3.2210E-03 3.9530E-03 3.5570E-03

1.6300E-03 5.0920E-03 4.6290E-03 2.5440E-03 2.0580E-03 5.1210E-03 5.1500E-03

4.8570E-03 3.1060E-01 7.6960E-02 6.8850E-02 4.0260E-02 2.2320E-02 1.1740E-02

1.4230E-01 7.1430E-02 1.1010E-02 1.5940E-02 3.0700E-02 1.3670E-02 6.6120E-03

2.3390E-02 1.4340E-02 7.6690E-03 3.1460E-03 1.2220E-02 7.0880E-03 4.1400E-03

1.4720E-03 3.6830E-03 2.5720E-03 1.5770E-03 5.1950E-04 4.0240E-02 1.9990E-02

8.3720E-03 2.6320E-03 6.5500E-02 4.1560E-02 1.7360E-02 3.7320E-03 1.9310E-02

1.5960E-02 1.1370E-02 7.2910E-03 3.4920E-02 2.3620E-02 1.3300E-02 5.6220E-03

1.0920E-01 4.2860E-02 1.4980E-02 5.1710E-03 2.9360E-02 1.9780E-02 1.2070E-02

6.9070E-03 8.3710E-03 4.0890E-03 1.7970E-03 5.6620E-04 1.2670E-01 2.6300E-02

7.6670E-03 8.7340E-02 3.4350E-02 1.2160E-02 3.8430E-03 9.1210E-02 4.4710E-02

2.2560E-02 1.1470E-02 3.4840E-02 1.7710E-02 6.8370E-03 1.4430E-03 8.4050E-03

6.3730E-03 4.0400E-03 2.1220E-03 2.8560E-02 2.2680E-02 1.2290E-02 7.0650E-03

1.2640E-02 1.0490E-02 7.1520E-03 3.4300E-03 1.3400E-02 8.8260E-03 5.1720E-03

2.6380E-03 1.9580E-01 2.5320E-02 2.9220E-02 2.4560E-02 1.6410E-02 7.0010E-02

2.6620E-02 5.2720E-02 1.0620E-02 1.3650E-02 1.4820E-02 5.0720E-03 8.2920E-03

9.7920E-03 8.3440E-03 8.3000E-03 2.8250E-03 4.5380E-03 4.6760E-03 4.0860E-03

1.4000E-03 6.0840E-04 1.4030E-03 1.6480E-03 1.3890E-02 1.4310E-02 1.2120E-02

6.9830E-03 3.4270E-02 1.1980E-02 2.0890E-02 1.7760E-02 1.3070E-02 1.0130E-02

7.7840E-03 5.1220E-03 1.5580E-02 9.8260E-03 1.1860E-02 1.4310E-02 1.0270E-02

5.1020E-02 3.8050E-02 1.5810E-02 1.2630E-02 1.1620E-02 1.1150E-02 1.0100E-02

8.6070E-04 3.4670E-03 3.3200E-03 2.1720E-03 2.6290E-02 6.5030E-02 1.5680E-02

1.8210E-02 3.8000E-02 2.5180E-02 1.0040E-02 2.0950E-02 4.4260E-02 3.2970E-02

1.6010E-02 1.3420E-02 7.4330E-03 1.0790E-02 7.4080E-03 4.6840E-03 2.6530E-03

3.0220E-03 3.5940E-03 1.9030E-02 1.2290E-02 1.3730E-02 3.0120E-03 9.7020E-03

6.0780E-03 4.3440E-03 2.4340E-03 6.1030E-03 5.0730E-03 4.7320E-03 4.3360E-03

8.2980E-03 1.2330E-02 1.4380E-02 1.2760E-02 1.0980E-02 5.2140E-02 1.1480E-02

5.3130E-03 6.5850E-03 5.0710E-03 5.3000E-03 7.7660E-04 4.7340E-03 5.6330E-03

6.2530E-03 1.0700E-04 1.6910E-03 2.8080E-03 3.2640E-03 1.2070E-04 8.0160E-04

9.9770E-04 8.5860E-04 2.7750E-03 8.4090E-03 8.0580E-03 4.7710E-03 2.4530E-03

2.2480E-02 1.3200E-02 3.6400E-03 6.3090E-03 5.2540E-03 3.8630E-03 2.3990E-03

1.1870E-03 9.3320E-03 9.1720E-03 5.9140E-03 3.0470E-03 5.2230E-03 2.1220E-02

2.7370E-02 3.3170E-03 6.5070E-03 6.9350E-03 5.7780E-03 5.8700E-05 5.0370E-04

1.6730E-03 2.6040E-03 7.6650E-03 1.5680E-02 2.9490E-02 4.3930E-03 1.0230E-02

1.7620E-02 1.3360E-02 8.6900E-03 9.0980E-03 1.7860E-02 2.1010E-02 9.5480E-04

9.0700E-03 6.2780E-03 2.4960E-03 8.4110E-04 2.6030E-03 2.2400E-03 1.2610E-03

9.5190E-03 7.0620E-03 3.0110E-03 4.0740E-03 4.4660E-03 3.7350E-03 2.0450E-03

9.4700E-04 1.7520E-03 3.1780E-03 2.9120E-03 2.0260E-03 4.9550E+00 5.0200E-01

1.3830E-01 1.9780E+00 2.8390E-01 5.2390E-02 2.3900E-02 3.6570E-02 1.4110E-02

2.8350E-03 1.2820E+00 1.3940E-01 1.9190E-02 2.7500E-03 1.3090E-01 3.9050E-02

1.0590E-02 1.5620E-03 1.3900E-01 4.7570E-02 1.2710E-02 1.3620E-03 1.5200E-01

2.8760E-02 1.0260E-02 3.4280E-03 2.8370E-01 3.8160E-02 1.2050E-02 2.8990E-03

4.1730E-01 7.4050E-02 1.4310E-02 3.0470E-03 3.5790E-01 6.4920E-02 1.4370E-02

2.5030E-03 8.8470E-01 1.1900E-01 1.3800E-02 2.6200E-03 1.1970E+00 1.7050E-01

2.8510E-02 4.9030E-03 1.2290E-01 4.8120E-02 1.4500E-02 2.5760E-03 2.9940E-02

9.2800E-03 1.3950E-03 4.4640E-02 1.3500E-02 4.1090E-03 1.2120E-03 1.1920E-01

3.3980E-02 1.3570E-02 3.8470E-03 1.4060E+01 3.8030E-01 5.5690E-02 2.4540E-02

2.9900E+01 3.6720E+00 3.2020E-01 4.3560E-02 7.2360E-02 5.3800E-02 2.5590E-02

3.1960E-03 5.5610E+00 1.7500E-01 8.3680E-03 3.5270E-03 1.7300E+01 2.1820E+00

1.0430E-01 1.1950E-02 5.5390E+00 4.8320E-01 8.3960E-01 8.5970E-01 1.5780E-01

1.9120E-02 2.1900E-02 1.3110E-02 7.1280E-03 5.0140E-02 9.4950E-01 1.5700E-01

2.1760E-02 2.5970E-02 6.6350E-02 3.5360E-02 1.2280E-02 4.2670E-02 7.0400E-02

6.2110E-02 1.4870E-02 3.7100E-02 8.1390E-02 1.7540E-02 6.2910E-03 6.4140E-02

1.6420E-01 2.4970E-02 9.8920E-03 7.1020E-02 2.4310E-01 6.7920E-02 1.5280E-02

3.6570E-02 2.2240E-01 6.6100E-02 1.6700E-02 1.1580E-01 5.5840E-01 1.3050E-01

1.5000E-02 6.5180E-02 8.7700E-01 1.8000E-01 3.2370E-02 3.6470E-02 5.7880E-02

4.0390E-02 1.6500E-02 1.6190E-02 1.0830E-02 5.4050E-03 1.7400E-02 2.2120E-02

9.9860E-03 2.8340E-03 3.3750E-02 6.5130E-02 2.3440E-02 1.2810E-02 2.4650E+00

9.1480E+00 3.5120E-01 3.2900E-02 1.1660E+00 2.1410E+01 4.2950E+00 3.7650E-01

5.7880E-02 3.5640E-02 1.5360E-02 1.6910E-02 8.2560E-01 3.5840E+00 1.7650E-01

5.5600E-03 2.1630E+00 1.0880E+01 2.5570E+00 1.2670E-01 4.1740E+00 3.1990E-01

6.7500E-01 3.9540E-01 1.4340E-02 1.1480E-02 1.2540E-02 7.6320E-03 9.1750E-03

4.5290E-02 7.0670E-01 1.2380E-01 4.9580E-03 2.1930E-02 4.7630E-02 3.0520E-02

1.5450E-03 4.0530E-02 4.8220E-02 5.2970E-02 1.3870E-02 2.8780E-02 5.4450E-02

1.0440E-02 1.9350E-02 5.5170E-02 1.0720E-01 1.5570E-02 1.4310E-02 6.4370E-02

1.6570E-01 5.0640E-02 8.5670E-03 3.3320E-02 1.8130E-01 5.4970E-02 1.3340E-02

1.3010E-01 4.1260E-01 9.9660E-02 1.4330E-02 6.9100E-02 6.7870E-01 1.4550E-01

7.4500E-03 3.0340E-02 4.0140E-02 3.5610E-02 7.7080E-03 1.0130E-02 6.7810E-03

6.6650E-03 1.3090E-02 1.4310E-02 6.1020E-03 1.3480E-02 2.3400E-02 4.7820E-02

1.8350E-02 2.3330E-01 2.5640E+00 5.8480E+00 2.3360E-01 9.9280E-02 1.3730E+00

1.5580E+01 3.3380E+00 4.3420E-02 1.8880E-02 1.7950E-02 1.4730E-02 8.0110E-02

9.6580E-01 2.2720E+00 1.2240E-01 9.6040E-02 2.5550E+00 7.2220E+00 1.9370E+00

1.1280E-01 3.4390E-01 4.6980E-01 9.5610E-03 5.0750E-03 9.4020E-03 6.1390E-03

1.3720E-03 9.9100E-03 3.5920E-02 5.4130E-01 1.6870E-04 5.6620E-03 1.8280E-02

4.8710E-02 8.3580E-05 1.8890E-03 3.2060E-02 5.3130E-02 6.2170E-03 1.1540E-02

2.1060E-02 3.0790E-02 6.1680E-03 1.9090E-02 4.2030E-02 6.5580E-02 3.0460E-03

1.5280E-02 5.1710E-02 1.2960E-01 1.1720E-03 9.5930E-03 2.6810E-02 1.6430E-01

2.5520E-03 1.4870E-02 9.8570E-02 2.9780E-01 2.4680E-03 1.5920E-02 5.5410E-02

5.3740E-01 6.8150E-04 8.2790E-03 2.5140E-02 4.1360E-02 2.9100E-03 7.6820E-03

5.7390E-03 2.4170E-03 5.8020E-03 9.3940E-03 7.7000E-03 3.8440E-03 1.2790E-02

1.8330E-02 3.2800E-02 4.7110E-02 2.6890E-01 1.9420E+00 3.6080E+00 2.4430E-02

1.0620E-01 1.0500E+00 1.2380E+01 2.8940E-02 7.5960E-03 2.0650E-02 7.1430E-03

7.5570E-03 1.0050E-01 7.3920E-01 1.5030E+00 9.5450E-03 1.2520E-01 1.9350E+00

5.7880E+00 1.6920E+00 1.9120E-01 6.8110E-01 6.1890E-01 2.8050E-01 1.1260E-02

3.8930E-02 2.0050E-02 9.6990E-03 4.6380E-03 1.1420E-02 6.1930E-03 3.0570E-03

1.0850E-03 1.7760E-02 8.9140E-03 4.0330E-03 1.4220E-03 6.4310E-02 4.6200E-02

3.4550E-02 1.9370E-02 3.9980E-01 1.0590E-01 2.2220E-02 5.4920E-03 4.1170E-02

2.2880E-02 1.2400E-02 5.6720E-03 2.7820E-02 1.5680E-02 8.8150E-03 4.7070E-03

3.2250E-02 1.9620E-02 9.9390E-03 4.2790E-03 3.9780E-02 1.9740E-02 8.9230E-03

3.7410E-03 2.7350E-02 1.6610E-02 7.7340E-03 3.4380E-03 8.1160E-01 3.5610E-01

1.0010E-02 5.2860E-01 1.4490E-01 3.1270E-02 5.3610E-03 6.8800E-02 5.0330E-02

2.8820E-02 1.2660E-02 1.0870E+01 2.6780E+00 4.9010E-01 5.6230E-02 3.6070E-01

1.7450E-01 8.5200E-02 4.3110E-02 5.8570E+00 8.5080E+00 3.6930E+00 8.4870E-02

9.2540E+00 2.2940E+00 3.1990E-01 1.7020E-02 6.0500E-02 2.4800E-02 9.6120E-03

3.5750E-03 1.3400E+00 4.5070E-01 2.7560E-01 9.0700E-02 2.4130E-01 7.6580E-03

1.6270E-02 1.4720E-02 9.7830E-03 2.1650E-03 4.6850E-03 4.4220E-03 3.5310E-03

2.2190E-03 6.9840E-03 7.1960E-03 5.1340E-03 4.0120E-02 4.2640E-02 2.1610E-02

5.9970E-03 1.8520E-02 2.0770E-01 1.0970E-01 2.1630E-02 1.4690E-02 1.5440E-02

1.4230E-02 1.0690E-02 7.6290E-03 1.2510E-02 1.0880E-02 7.1880E-03 1.2000E-02

1.2200E-02 1.1060E-02 9.1150E-03 7.0260E-03 1.6270E-02 1.4830E-02 1.0020E-02

6.5830E-03 1.0390E-02 1.0510E-02 9.5310E-03 3.5400E-01 1.1260E-01 3.1730E-01

3.0910E-02 2.6460E-01 1.4580E-01 3.3850E-02 3.9160E-02 2.0330E-02 2.3170E-02

2.5800E-02 2.4030E-01 5.3930E+00 2.8380E+00 5.4600E-01 6.1720E-02 1.6010E-01

1.3670E-01 7.8760E-02 3.8920E+00 3.6610E+00 1.2820E+00 3.2860E+00 1.7960E-01

4.5350E+00 2.4240E+00 4.8180E-01 8.1820E-03 2.6820E-02 2.0800E-02 9.8910E-03

2.2390E-01 1.1200E-02 2.3900E-01 4.9610E-02 1.4450E-03 4.0810E-03 8.0880E-03

1.0140E-02 1.0680E-04 1.3010E-03 2.5140E-03 3.4900E-03 3.1230E-05 1.1640E-03

3.5400E-03 5.8000E-03 2.6980E-02 1.0190E-02 1.0060E-02 6.5730E-03 7.0150E-03

8.2630E-03 8.3080E-02 8.0190E-02 3.4160E-03 8.0540E-03 8.9720E-03 7.1400E-03

2.2560E-03 3.8350E-03 5.7760E-03 6.9270E-03 1.4640E-03 6.7370E-03 7.0930E-03

5.8120E-03 1.1920E-03 3.9630E-03 8.2480E-03 1.0620E-02 7.6170E-04 3.7760E-03

6.5220E-03 7.1330E-03 9.9650E-03 3.1700E-01 6.5400E-02 5.4100E-03 1.8450E-02

1.1020E-01 1.0270E-01 6.3340E-03 2.2340E-02 1.7200E-02 7.5980E-03 6.5770E-02

1.2820E-01 2.1600E+00 2.0990E+00 2.3220E-02 2.9510E-02 7.0910E-02 9.9470E-02

1.9380E+00 8.4860E-02 3.2330E+00 7.3900E-01 8.4010E-03 1.2340E-01 1.8670E+00

1.9130E+00 1.9650E-03 4.4640E-03 1.1690E-02 1.5930E-02 1.4300E+00 9.5360E-01

4.7690E-01 6.2420E-02 5.2010E-02 4.1610E-02 3.1210E-02 2.8910E-04 2.4780E-04

2.0650E-04 1.6520E-04 1.2760E-03 1.1160E-03 9.5690E-04 7.9740E-04 3.6040E+00

2.7120E+00 1.8130E+00 9.0820E-01 1.0480E-01 7.8610E-02 5.2430E-02 2.6230E-02

4.4380E-03 3.5510E-03 2.6630E-03 1.7760E-03 2.0170E-02 1.6800E-02 1.3440E-02

1.0080E-02 2.0280E-02 1.6230E-02 1.2170E-02 8.1140E-03 1.6190E-02 1.3490E-02

1.0790E-02 8.0940E-03 2.5200E-04 2.1600E-04 1.8000E-04 1.4400E-04 3.0140E-02

2.0090E-02 1.0040E-02 2.7740E-02 2.0890E-02 1.3950E-02 6.9800E-03 1.6710E-02

1.3370E-02 1.0030E-02 6.6850E-03 5.7580E-02 4.3270E-02 2.8880E-02 1.4450E-02

7.3130E-03 6.0950E-03 4.8770E-03 3.6580E-03 2.1430E-02 1.5070E-02 1.0040E-02

5.0250E-03 4.2690E-02 3.2930E-02 2.1970E-02 1.0990E-02 3.1340E-03 2.5070E-03

1.8800E-03 1.2530E-03 2.3410E+00 1.1540E+00 3.1190E-02 2.1530E-02 1.2290E-02

5.4640E-03 6.2450E-02 2.2880E-02 8.5640E-03 2.3640E-03 1.0960E-03 9.1030E-04

5.9460E-04 3.2430E-04 6.2520E+00 4.1060E+00 1.6500E+00 3.2380E-01 8.1150E-02

4.7230E-02 2.1250E-02 6.7970E-03 9.8460E-02 7.3620E-02 5.9530E-02 4.2430E-02

5.6210E-02 4.2460E-02 2.8180E-02 1.6200E-02 3.7170E-02 2.2340E-02 1.2670E-02

6.4420E-03 2.4710E-02 1.1410E-02 4.5660E-03 1.4430E-03 1.7670E-02 6.5630E-03

2.6180E-03 1.0870E-03 3.1770E-02 3.1880E-02 2.0060E-02 5.6780E-02 3.2760E-02

1.5520E-02 5.3860E-03 6.1150E-02 3.0970E-02 1.5030E-02 6.3150E-03 7.3010E-02

4.5780E-02 2.1790E-02 7.6450E-03 7.0350E-03 6.9390E-03 3.3800E-03 1.3390E-03

1.9800E-02 3.3570E-02 3.3750E-02 2.1700E-02 6.0640E-02 4.4800E-02 2.0600E-02

5.3430E-03 4.2280E-02 1.5710E-02 5.8810E-03 2.1110E-03 8.0190E-01 1.4220E-02

4.2640E-03 9.2780E-03 1.2590E-02 2.8290E-03 2.7280E-02 2.6560E-02 1.1550E-02

6.1940E-04 3.0710E-04 3.9110E-04 6.1510E-04 3.4340E+00 9.2210E-01 2.0190E+00

1.8850E+00 3.6690E-02 2.3400E-02 2.5370E-02 1.7320E-02 5.9570E-02 6.3090E-02

4.0740E-02 1.7920E-02 3.1280E-02 2.0510E-02 2.1090E-02 2.2470E-02 1.4890E-02

1.4470E-02 1.2820E-02 9.6430E-03 3.1130E-03 1.0130E-02 9.1630E-03 5.6820E-03

1.1390E-03 5.8900E-03 5.5990E-03 3.4190E-03 3.1810E-02 1.8180E-02 5.7840E-03

2.5220E-02 1.9520E-02 1.7720E-02 1.1100E-02 1.6780E-02 2.2920E-02 2.1080E-02

1.4110E-02 3.7870E-02 2.1610E-02 2.3230E-02 1.6630E-02 3.2310E-03 2.1320E-03

2.4720E-03 3.8500E-03 1.3190E-02 3.3720E-02 2.0070E-02 5.5440E-03 3.9560E-02

8.6180E-03 2.0140E-02 1.9040E-02 4.8030E-03 1.7130E-02 1.3150E-02 6.2350E-03

9.2850E-04 8.3800E-03 8.1580E-03 2.4570E-03 1.0460E-04 1.6850E-03 9.9920E-03

2.1150E-02 6.0380E-05 3.5110E-04 3.5020E-04 1.7910E-04 1.7440E-01 2.3890E+00

1.2880E+00 2.8030E-01 7.1900E-03 2.1720E-02 1.6040E-02 6.1840E-03 3.7600E-02

1.8790E-02 1.7480E-02 1.6140E-02 7.8330E-03 1.6390E-02 1.4340E-02 9.0780E-03

4.3420E-03 7.6110E-03 8.0120E-03 6.1570E-03 2.6050E-04 1.8680E-03 4.9960E-03

6.9200E-03 7.8670E-05 6.7480E-04 2.7270E-03 4.5430E-03 1.9970E-02 5.7810E-03

2.2170E-03 6.0990E-03 1.4260E-02 1.1240E-02 5.4550E-03 3.4780E-03 9.6180E-03

1.2210E-02 1.1330E-02 8.3180E-03 2.1850E-02 1.4220E-02 5.2510E-03 3.9100E-04

1.8840E-03 2.1490E-03 1.2200E-03 6.6000E-03 2.1670E-02 5.5420E-03 2.4450E-03

5.2640E-03 2.5140E-02 1.1990E-02 1.5230E-03 1.1250E-03 2.4740E-03 8.2690E-03

9.6960E-03 1.5610E+00 5.2040E-02 6.5720E-03 2.6730E+00 1.0350E+00 1.0790E-01

6.4520E-03 5.0250E+00 1.1910E+00 1.7240E-01 1.0930E-02 5.9390E-02 1.3060E-02

3.0820E-03 7.2780E-04 2.3800E+00 2.4520E-01 6.0510E-03 8.3000E-04 2.2450E+00

4.4630E-01 4.6160E-02 2.1440E-03 9.1990E-01 3.3840E-01 3.9370E-02 2.0030E-03

4.3300E-01 1.3950E-01 3.7680E-02 6.7240E-03 6.8540E-01 1.8710E-01 4.6590E-02

7.7430E-03 2.8430E-01 1.4940E-01 1.9200E-02 1.6770E-03 3.8310E-02 7.1280E-03

1.7640E-04 1.9160E-01 2.2590E-02 1.6770E-03 9.5610E-05 2.1090E-01 4.1170E-02

3.4190E-03 3.8530E-04 2.1640E-01 2.8680E-02 8.0180E-03 7.0740E-04 8.2640E-02

2.8700E-02 5.3650E-03 7.3950E-04 2.4440E-02 1.0480E-02 5.7210E-03 4.3000E-04

7.1800E-02 7.8940E-03 1.7490E-03 1.4660E-04 1.1330E-01 3.1220E-02 8.2410E-03

1.6080E-03 7.6310E+00 6.1580E-02 7.8950E-01 3.7290E+00 1.2000E+00 1.2810E-01

1.0010E+00 4.9680E+00 2.2040E+00 2.0630E-01 2.0960E-02 2.7750E-02 8.6040E-03

2.4690E-03 6.4150E-01 1.2890E+00 2.5410E-01 4.7750E-03 5.8030E-01 1.2010E+00

4.5930E-01 5.4310E-02 3.3840E-01 9.1150E-01 3.6550E-01 4.6300E-02 1.4960E-01

2.1680E-01 9.8380E-02 3.4270E-02 1.8680E-01 3.6820E-01 1.6180E-01 5.1060E-02

1.2520E-01 3.1980E-01 1.6660E-01 2.2200E-02 1.8910E-02 1.4490E-02 4.4600E-03

5.3640E-02 1.0320E-01 2.0520E-02 1.7820E-03 5.3870E-02 1.1170E-01 4.3990E-02

3.7950E-03 6.0580E-02 1.2190E-01 1.6760E-02 8.0270E-03 2.8690E-02 8.6610E-02

2.9020E-02 5.9560E-03 2.0370E-02 8.4120E-03 2.0180E-03 3.3670E-03 2.0120E-02

4.1930E-02 5.3060E-03 1.7020E-03 3.8590E-02 5.6610E-02 2.5670E-02 8.5380E-03

1.8130E+00 4.6640E-02 9.1560E-01 2.7610E+00 9.5760E-01 1.2450E-02 1.2260E+00

6.3290E+00 1.7420E+00 7.2360E-03 1.8060E-02 1.7810E-02 5.7140E-03 1.2390E-01

6.7040E-01 7.7850E-01 1.7830E-01 9.7040E-02 5.9590E-01 7.6860E-01 3.5870E-01

3.9350E-02 3.6550E-01 6.3380E-01 2.9300E-01 4.7210E-02 1.2110E-01 1.5360E-01

8.0000E-02 4.6430E-02 1.6170E-01 2.7180E-01 1.4030E-01 8.2140E-03 1.4190E-01

2.0260E-01 1.3430E-01 7.9700E-03 1.3900E-02 8.1890E-03 1.1750E-02 5.5470E-02

6.3750E-02 1.4270E-02 8.4870E-03 5.6790E-02 7.1670E-02 3.3870E-02 1.9460E-02

5.0910E-02 8.3050E-02 1.1420E-02 5.3580E-03 2.9020E-02 6.2970E-02 2.3310E-02

1.6290E-02 4.6370E-03 3.4420E-03 3.1040E-03 5.5250E-03 1.8430E-02 2.9660E-02

3.6640E-03 1.0930E-02 3.1670E-02 3.9230E-02 2.0890E-02 1.7650E-03 5.4360E-02

7.1740E-01 2.7360E+00 4.3700E-04 1.4760E-02 9.5100E-01 6.0760E+00 2.4260E-03

7.4460E-03 1.4120E-02 1.2230E-02 1.5240E-02 1.5950E-01 5.3760E-01 6.0290E-01

8.9300E-03 1.1830E-01 4.8300E-01 7.6180E-01 1.9920E-03 4.6300E-02 2.9300E-01

6.7820E-01 1.1560E-02 5.0150E-02 1.0220E-01 1.3560E-01 7.7200E-03 5.1040E-02

1.4030E-01 2.6520E-01 8.0260E-04 9.2580E-03 1.1170E-01 2.6150E-01 2.4450E-03

1.0050E-02 1.0020E-02 1.7720E-03 1.4560E-02 4.4350E-02 4.8100E-02 9.2410E-04

1.0080E-02 4.5520E-02 7.1590E-02 4.8600E-03 2.1940E-02 4.1070E-02 5.5220E-02

7.3850E-04 5.9550E-03 2.3300E-02 6.0390E-02 1.2220E-02 2.2410E-03 4.5900E-03

1.0180E-03 1.1570E-03 6.2500E-03 1.4820E-02 1.8260E-02 2.8590E-03 1.1900E-02

2.6720E-02 3.5610E-02 2.5600E+00 2.3620E-01 8.1170E-03 5.7920E+00 9.3670E-01

1.4500E-01 7.7860E-03 3.4560E-02 8.2800E-03 2.6470E-03 3.8950E-05 6.0710E-02

1.8770E-02 2.2480E-04 6.5100E-06 1.8460E-01 3.2290E-02 2.5400E-03 7.2340E-05

8.6010E-01 2.9640E-01 2.0520E-02 2.1820E-04 1.2720E+00 1.6770E-01 2.8270E-02

2.9060E-03 3.3260E-01 2.4140E-01 2.9450E-02 3.7860E-03 1.0510E+00 4.2060E-01

5.8660E-02 3.4730E-03 1.1580E-02 6.4380E-04 2.4690E-05 6.1820E-02 1.2280E-02

3.4760E-03 3.3190E-05 2.2560E-01 1.3400E-02 1.6120E-03 2.0390E-04 3.4400E-02

1.0220E-02 2.6260E-04 3.3530E-05 2.0680E-01 4.8120E-02 4.6590E-03 2.8750E-04

1.9740E-04 1.9620E-02 2.9940E-03 2.0950E-05 3.8470E-02 1.0770E-02 3.3550E-03

1.8990E-05 3.7720E-01 3.2760E-02 3.3840E-03 5.4100E-05 4.6600E+00 2.7700E-01

7.0090E-01 5.4290E+00 1.8260E+00 2.5660E-01 1.4650E-02 1.8030E-02 3.9130E-03

2.9450E-03 3.2480E-02 2.0530E-02 1.8730E-02 2.4170E-04 4.9320E-02 9.4990E-02

3.3790E-02 2.9520E-03 3.6830E-01 1.1360E+00 3.4440E-01 2.4080E-02 3.0240E-01

7.7360E-01 1.4620E-01 2.9480E-02 2.8260E-01 6.2680E-01 2.4170E-01 3.2400E-02

2.6410E-01 1.2480E+00 4.5370E-01 6.7530E-02 5.1980E-03 5.2840E-03 3.8920E-04

2.3870E-02 3.2120E-02 6.2570E-03 3.8280E-03 3.8680E-02 1.5300E-01 1.3630E-02

1.7390E-03 1.6260E-02 1.1880E-02 1.0170E-02 2.5560E-04 5.7800E-02 1.1790E-01

4.8450E-02 5.3450E-03 1.6920E-04 1.0080E-02 7.5650E-03 1.8210E-03 1.5870E-02

1.7180E-02 4.8570E-03 3.6440E-03 8.1220E-02 2.4060E-01 3.5120E-02 5.4830E-03

3.6550E+00 1.0840E-01 1.4530E+00 6.9560E+00 2.3650E+00 6.2610E-03 1.0450E-02

1.3120E-02 2.8880E-03 8.9280E-03 2.5320E-02 7.8880E-03 1.3260E-02 9.5740E-03

5.0720E-02 6.2790E-02 2.6370E-02 4.2980E-02 4.2540E-01 8.4060E-01 2.7280E-01

6.8670E-02 2.9860E-01 5.5820E-01 1.1860E-01 4.8730E-02 2.8810E-01 4.3610E-01

2.0020E-01 5.8430E-02 4.4960E-01 9.4540E-01 3.7530E-01 1.9510E-03 4.6240E-03

2.1790E-03 9.2930E-03 1.8170E-02 2.3170E-02 4.6000E-03 5.6610E-03 4.3240E-02

1.1300E-01 1.0500E-02 4.9960E-03 1.4250E-02 5.6640E-03 7.1600E-03 8.4190E-03

5.9130E-02 8.6120E-02 4.0050E-02 1.4100E-04 4.4870E-03 7.5720E-03 4.1600E-03

7.8270E-03 1.1020E-02 1.4740E-02 3.5470E-03 1.4400E-02 8.6250E-02 1.7460E-01

2.7960E-02 1.1000E-03 1.2560E-01 1.9550E+00 7.5320E+00 1.7710E-03 6.9960E-03

9.2150E-03 8.8420E-03 1.3950E-03 1.1000E-02 2.1630E-02 1.1230E-02 9.9750E-04

1.1460E-02 4.2010E-02 6.2560E-02 2.1400E-03 5.1650E-02 3.4710E-01 8.8740E-01

1.1600E-02 7.8960E-02 2.5020E-01 5.0530E-01 6.3220E-03 5.5360E-02 2.3640E-01

4.9100E-01 3.4730E-03 6.7350E-02 3.7310E-01 1.0420E+00 7.9360E-04 2.6530E-03

3.8260E-03 2.4010E-03 1.0610E-02 1.5600E-02 1.5730E-02 7.3300E-04 6.6700E-03

3.3480E-02 9.1900E-02 1.0710E-03 6.0980E-03 1.2070E-02 6.6470E-03 7.2210E-04

9.8010E-03 4.9100E-02 9.9590E-02 1.1280E-04 1.4920E-03 5.6560E-03 5.8260E-03

2.2240E-03 8.7330E-03 9.8340E-03 8.3830E-03 1.1840E-03 1.7230E-02 7.0590E-02

1.5440E-01 9.8400E-01 2.7680E-02 1.0080E-03 1.6500E-01 2.7630E-02 1.0400E-04

1.6260E-05 1.2900E-02 8.9770E-04 2.3870E-05 1.6240E-06 2.8810E-02 7.3890E-03

4.6810E-04 9.6130E-06 1.7980E+00 1.6780E-01 2.8820E-03 3.0590E-05 1.0480E-01

2.3400E-02 3.1990E-03 3.5810E-05 3.4400E-01 1.0230E-01 1.0200E-02 9.1170E-04

1.0760E+00 2.1710E-01 5.6670E-02 3.7720E-03 4.7760E-04 2.2900E-04 2.7600E-05

1.5760E-02 2.3540E-03 1.8010E-04 3.1830E-05 8.5540E-02 1.3890E-02 1.9680E-03

8.8020E-05 3.5930E-02 6.9690E-03 2.6460E-04 3.6720E-05 4.7520E-01 5.8290E-02

6.3660E-03 4.2110E-04 1.1290E-03 7.7930E-04 4.3240E-04 9.9210E-05 3.1010E-02

3.4430E-03 1.1850E-04 1.7280E-06 3.6800E-02 1.0400E-02 1.5250E-03 3.1220E-05

2.0990E+00 5.3230E-02 6.4990E-02 7.6790E-02 2.9330E-02 9.2390E-05 4.1150E-03

6.8580E-03 8.7680E-04 2.3970E-05 1.0930E-02 1.2810E-02 7.7960E-03 5.3760E-04

2.9580E-01 1.8400E+00 2.0430E-01 3.3060E-03 3.6550E-02 5.4060E-02 2.1000E-02

3.7000E-03 1.0200E-01 4.4610E-01 1.1340E-01 1.1420E-02 2.6740E-01 1.4030E+00

3.9300E-01 6.3920E-02 3.1340E-04 2.2520E-04 1.3100E-04 6.1530E-03 7.5030E-03

2.1350E-03 1.3720E-04 2.5130E-02 4.9290E-02 1.2140E-02 2.2190E-03 1.5260E-02

1.4700E-02 6.4660E-03 2.3550E-04 1.2440E-01 5.2640E-01 6.0280E-02 7.3090E-03

9.8820E-04 6.2340E-04 2.9320E-04 2.2890E-04 1.2340E-02 1.5420E-02 3.3120E-03

1.2740E-04 1.4830E-02 1.6400E-02 9.7240E-03 1.8280E-03 2.2390E+00 1.8970E-02

6.1760E-02 4.4980E-02 2.0780E-02 1.0000E-03 4.2940E-03 4.3480E-03 6.2300E-04

2.5210E-03 1.0860E-02 8.0190E-03 6.0920E-03 3.9950E-02 6.1760E-01 2.3460E+00

1.5760E-01 9.9520E-03 3.3260E-02 3.7310E-02 1.7800E-02 2.4960E-02 1.6720E-01

3.4090E-01 8.9240E-02 7.4760E-02 4.6160E-01 1.0680E+00 3.3030E-01 1.9340E-04

1.9030E-04 1.1870E-04 1.8810E-03 5.5400E-03 4.5940E-03 1.5090E-03 6.6200E-03

2.3930E-02 3.5860E-02 1.0050E-02 4.8410E-03 1.3830E-02 9.2560E-03 4.5530E-03

1.5900E-02 1.3850E-01 4.1190E-01 5.0750E-02 8.4700E-04 4.4550E-04 3.1350E-04

2.2310E-04 2.8710E-03 1.2120E-02 9.6000E-03 2.3590E-03 4.1440E-03 1.3510E-02

1.0890E-02 7.9110E-03 3.0520E-03 2.3490E-02 5.2510E-02 4.3160E-02 1.4330E-04

1.2040E-03 3.4820E-03 3.6850E-03 3.0450E-04 2.9850E-03 9.2400E-03 1.0370E-02

2.0050E-03 4.8680E-02 4.8960E-01 2.1310E+00 1.3820E-03 1.1600E-02 2.9900E-02

3.9400E-02 2.7670E-03 2.8870E-02 1.3900E-01 3.5160E-01 6.8120E-03 8.4830E-02

3.9140E-01 1.1340E+00 1.2370E-04 1.8920E-04 1.6580E-04 4.1410E-04 2.2470E-03

4.6860E-03 4.1090E-03 9.4990E-04 7.7250E-03 2.0550E-02 3.4430E-02 1.0170E-03

5.8060E-03 1.1820E-02 8.9260E-03 1.5060E-03 1.8530E-02 1.1350E-01 3.8610E-01

7.0580E-04 2.8010E-04 3.8010E-04 1.5770E-04 4.7400E-04 3.5600E-03 1.0210E-02

8.3950E-03 6.6260E-04 4.8210E-03 1.1870E-02 1.3060E-02 3.3430E+00 4.9820E-01

2.9790E-02 1.1270E-01 5.1960E-02 3.2230E-02 1.6270E-02 8.3210E-02 5.5450E-02

3.0240E-02 1.6020E-02 7.7160E-02 3.5860E-02 1.3090E-02 3.2470E-03 4.8060E-02

2.5990E-02 1.1330E-02 3.2740E-03 5.4290E-02 2.4110E-02 1.1040E-02 3.5060E-03

8.2750E-02 3.1320E-02 8.5030E-03 1.3510E-03 9.1940E-02 6.0920E-02 9.1740E-03

3.2800E-02 1.7760E-02 8.5210E-03 3.2930E-03 9.0130E-02 4.2260E-02 1.1740E-02

3.1330E-03 5.9340E-02 3.0680E-02 1.1500E-02 5.0420E-03 6.0350E-02 1.8640E-02

6.5780E-03 1.8510E-03 1.1250E-01 1.0770E-01 7.0790E-02 4.0330E-03 5.4120E-02

2.7610E-02 9.6570E-03 2.8130E-03 4.4780E-02 1.7780E-02 5.7580E-03 1.0890E-03

2.9910E+00 5.9720E-01 5.1960E-02 7.5680E-02 3.0950E-02 1.1800E-02 4.9930E-02

3.4530E-02 3.5350E-02 2.0690E-02 2.7170E-02 3.0280E-02 2.6670E-02 1.4760E-02

2.5220E-02 1.6320E-02 1.4810E-02 1.1450E-02 1.9190E-02 1.4550E-02 1.4500E-02

1.1590E-02 1.5410E-02 3.7370E-02 2.9610E-02 1.0560E-02 6.8500E-02 1.6640E-02

3.6100E-02 1.7740E-02 1.3630E-02 9.8350E-03 5.0090E-03 3.4320E-02 3.2720E-02

3.3120E-02 1.3830E-02 3.0570E-02 2.0450E-02 2.1440E-02 7.6790E-03 9.6870E-03

2.9830E-02 1.8640E-02 5.9880E-03 8.4200E-02 7.9800E-02 7.8840E-03 4.8650E-02

2.7600E-02 1.7640E-02 1.8040E-02 7.3950E-03 1.4630E-02 1.3190E-02 1.4970E-02

6.4880E-03 1.9970E+00 3.2230E-02 3.0950E-02 3.5380E-02 1.0330E-02 2.2330E-02

3.2420E-02 1.7420E-02 2.1660E-02 4.8730E-03 1.8800E-02 1.9100E-02 2.1920E-02

7.4040E-03 1.3050E-02 1.2470E-02 1.0930E-02 5.4410E-03 1.1660E-02 1.0820E-02

1.1780E-02 3.7970E-04 1.5420E-02 2.1430E-02 2.4730E-02 3.3920E-02 3.0620E-02

1.7710E-02 8.5140E-03 9.8250E-03 7.5150E-03 4.5410E-03 5.7820E-03 2.8050E-02

1.5030E-02 2.3390E-02 1.1470E-02 2.1430E-02 8.7580E-03 1.1210E-02 1.8970E-03

6.8440E-03 2.0750E-02 1.3670E-02 5.6060E-02 3.3590E-02 3.5780E-02 2.1910E-02

9.6540E-03 1.8040E-02 8.8710E-03 1.0130E-02 2.7720E-03 1.2530E-02 7.7680E-03

9.8420E-03 1.6270E-02 1.1800E-02 1.0330E-02 1.3880E-02 9.3070E-03 1.1780E-02

1.7550E-02 7.8000E-03 4.7280E-04 4.8950E-03 1.3210E-02 1.3990E-02 1.2250E-03

7.8700E-03 8.2000E-03 5.3230E-03 8.5790E-04 5.0630E-03 7.7740E-03 6.0900E-03

3.4760E-05 3.7550E-04 1.0880E-02 1.9700E-02 9.4550E-03 2.6870E-02 2.9390E-03

3.2930E-03 5.0040E-03 4.5390E-03 2.6910E-03 1.3360E-03 5.0160E-03 1.7520E-02

1.1680E-02 5.0420E-03 7.1180E-03 1.1180E-02 3.2380E-03 6.7170E-04 1.0460E-03

3.9880E-03 1.2890E-02 2.8010E-02 7.0950E-03 3.7170E-02 1.2570E-03 2.8120E-03

7.3930E-03 1.0130E-02 3.1390E-03 2.7700E-04 2.8830E-03 8.1590E-03 5.0520E-03

1.1340E+00 6.3110E-02 8.6590E-03 4.1680E+00 1.3580E+00 2.8370E-01 3.1660E-02

8.8650E+00 1.9430E+00 3.1280E-01 3.2310E-02 1.4250E-01 5.6120E-02 2.0700E-02

5.4740E-03 1.6930E-01 6.0400E-02 1.8800E-02 4.9300E-03 3.5110E-02 1.6490E-02

7.6960E-03 2.1860E-03 3.2860E-01 1.2130E-01 2.0660E-02 5.9950E-01 2.8190E-01

8.1090E-02 1.2710E-02 4.4040E-01 1.3180E-01 2.9030E-02 5.4290E-03 1.5440E-01

7.9900E-02 2.4990E-02 7.8380E-03 3.1590E-02 1.3860E-02 5.5150E-03 1.8360E-03

1.7420E-02 1.9220E-02 1.2210E-02 7.0310E-03 5.9450E-02 3.5340E-02 1.7470E-02

6.1190E-03 6.9180E-02 3.3710E-02 1.3850E-02 4.9690E-03 1.2570E+00 6.7770E-02

9.6450E-01 1.8120E+00 1.2670E+00 3.5490E-01 4.3210E-01 5.2240E+00 2.1880E+00

4.0980E-01 4.3700E-02 6.3430E-02 3.3220E-02 2.2650E-02 2.8090E-02 1.0760E-01

6.4450E-02 2.2210E-02 9.9820E-03 1.7580E-02 9.7460E-03 8.5370E-03 1.6860E-01

1.0340E-01 7.3390E-02 2.7830E-01 1.8600E-01 1.8620E-01 8.1020E-02 8.8770E-02

2.1120E-01 1.2290E-01 3.4040E-02 7.9750E-02 4.8310E-02 5.6790E-02 1.8500E-02

9.8080E-03 1.4470E-02 1.1090E-02 5.7570E-03 1.3060E-02 1.3940E-02 9.6040E-03

4.7680E-03 3.5320E-02 2.3880E-02 1.8090E-02 1.0990E-02 2.8480E-02 2.5750E-02

2.2670E-02 1.2790E-02 8.7910E-01 7.9660E-02 9.2570E-01 9.4460E-01 9.7850E-01

3.0130E-03 4.5430E-01 3.2970E+00 1.7410E+00 1.3060E-02 2.1810E-02 4.5290E-02

2.4630E-02 6.0220E-03 2.3180E-02 8.1890E-02 3.4920E-02 3.6180E-03 3.6510E-03

1.4840E-02 8.7390E-03 6.9680E-02 1.0060E-01 6.5660E-02 8.0640E-02 1.8510E-01

1.1320E-01 1.0980E-01 1.0150E-02 8.2170E-02 1.1490E-01 9.4290E-02 2.4960E-02

5.6710E-02 1.9570E-02 3.2010E-02 2.4760E-03 6.4740E-03 9.9580E-03 8.9420E-03

8.7030E-03 1.1090E-02 6.6820E-03 2.8870E-03 1.7460E-02 1.8060E-02 1.5990E-02

7.9210E-03 8.5580E-03 1.9060E-02 1.3980E-02 1.6530E-02 2.5380E-03 9.0270E-02

6.4340E-01 7.3520E-01 2.7820E-04 3.0420E-03 3.1830E-01 2.4190E+00 1.6840E-03

1.2960E-02 1.5840E-02 2.4250E-02 4.1820E-04 5.5920E-03 1.6110E-02 3.6830E-02

9.7200E-06 4.0020E-03 2.8830E-03 8.4380E-03 2.0590E-02 6.0450E-02 3.2440E-02

1.2710E-02 8.0670E-02 1.0950E-01 4.0370E-02 1.7640E-03 9.3250E-03 5.5920E-02

8.4470E-02 7.8380E-03 1.8470E-02 3.2720E-02 7.8740E-03 4.8630E-04 2.1580E-03

4.2730E-03 6.8160E-03 4.3510E-03 5.2620E-03 3.0140E-03 1.3650E-03 6.1190E-03

1.1250E-02 7.9160E-03 4.5500E-03 2.5790E-03 6.7640E-03 1.1750E-02 7.7780E-03

3.0140E+00 2.7160E-01 1.5120E-02 7.5800E+00 1.9060E+00 2.9290E-01 2.2190E-02

4.7300E-01 1.5160E-01 3.2040E-02 5.3620E-03 7.7100E-01 2.5560E-01 5.6320E-02

8.4710E-03 4.1490E-01 1.1620E-01 1.8680E-02 1.4490E-03 4.1190E-01 2.1710E-02

3.2140E-03 5.6200E-01 1.1230E-01 1.3810E-02 7.3540E-04 7.2040E-01 2.4230E-01

5.4860E-02 6.1820E-03 1.4120E-01 4.7650E-02 9.2450E-03 2.9850E-03 8.2640E-02

3.4790E-02 1.3100E-02 3.7780E-03 1.9570E-02 6.1550E-02 1.1570E-02 7.4240E-03

6.3440E-02 2.8270E-02 1.1000E-02 2.1500E-03 1.0000E-01 3.2250E-02 7.5480E-03

1.2660E-03 3.3170E+00 3.3230E-01 1.4480E+00 4.0590E+00 2.0190E+00 3.6190E-01

1.5080E-01 2.0820E-01 1.3850E-01 3.4550E-02 2.1510E-01 3.7830E-01 2.4140E-01

6.6490E-02 7.3790E-02 2.2010E-01 1.2760E-01 2.2690E-02 1.4680E-01 1.8980E-01

1.2360E-02 1.6800E-01 2.7630E-01 9.7140E-02 1.4860E-02 2.4070E-01 3.1450E-01

2.0140E-01 6.4020E-02 5.9130E-02 5.2620E-02 4.2260E-02 6.2950E-03 3.0270E-02

3.8700E-02 2.5520E-02 1.3380E-02 1.5660E-02 2.8290E-02 3.2760E-02 3.7340E-03

3.4000E-02 2.7210E-02 1.4430E-02 1.0010E-02 3.7020E-02 3.5690E-02 2.7380E-02

8.2520E-03 2.5440E+00 1.1870E-01 1.5520E+00 2.6260E+00 1.6240E+00 3.1930E-02

1.3790E-01 1.2480E-01 1.0850E-01 3.0690E-02 1.9330E-01 2.4830E-01 2.0290E-01

1.8210E-03 8.3930E-02 1.4390E-01 1.0430E-01 4.2230E-02 1.4040E-01 7.9250E-02

3.7810E-02 1.5180E-01 1.6010E-01 6.4370E-02 5.4610E-02 1.9580E-01 1.9870E-01

1.6310E-01 1.8330E-02 5.0630E-02 2.6500E-02 2.7580E-02 9.6980E-03 2.1650E-02

2.7760E-02 2.1860E-02 1.1740E-02 1.4830E-02 2.2550E-02 1.1360E-02 1.6610E-02

1.8090E-02 2.1320E-02 8.2290E-03 7.5270E-03 2.7320E-02 2.1260E-02 2.1630E-02

2.6480E-03 1.4280E-01 1.2010E+00 2.6040E+00 5.3620E-03 3.4460E-02 1.0820E-01

1.1840E-01 2.7230E-03 3.5340E-02 1.5560E-01 2.5910E-01 9.3370E-05 2.0780E-03

6.4340E-02 1.5590E-01 9.2920E-03 5.6090E-02 1.0900E-01 5.3060E-03 4.5370E-02

1.1650E-01 1.1140E-01 6.1830E-03 6.3840E-02 1.5760E-01 1.7980E-01 5.9310E-03

1.8860E-02 3.7170E-02 1.8740E-02 2.1750E-03 9.6970E-03 1.7860E-02 2.4420E-02

7.8270E-03 8.9250E-03 8.5270E-03 1.5020E-02 5.4260E-03 1.5410E-02 1.2440E-02

9.9480E-03 1.2590E-03 8.2420E-03 2.1600E-02 2.0780E-02 2.7220E+00 1.0380E-01

5.7820E-03 5.1540E-01 1.2390E-01 2.5110E-02 5.2600E-03 3.2990E-01 8.4780E-02

1.3240E-02 6.0150E-04 2.5360E-01 7.8290E-02 1.9120E-02 2.5230E-03 2.2990E-02

8.5150E-03 1.0890E-03 7.3760E-01 5.5540E-02 1.0720E-02 1.9870E-03 5.1220E-01

1.0740E-01 1.1550E-02 1.3920E-03 5.9970E-02 1.5930E-02 2.1650E-03 5.5980E-04

2.6630E-01 6.4560E-02 9.7100E-03 1.8330E-03 3.1990E-02 3.0310E-02 1.5640E-02

3.3960E-03 8.5740E-02 2.0110E-02 6.5310E-03 5.4190E-04 1.6200E-01 4.7540E-02

1.1140E-02 1.4150E-03 3.3580E+00 1.2440E-01 1.5390E-01 2.7100E-01 1.0880E-01

2.5850E-02 8.4560E-02 1.7470E-01 8.8490E-02 1.5670E-02 6.8140E-02 1.3740E-01

7.1180E-02 2.1620E-02 1.3830E-02 6.9520E-03 5.0500E-03 1.8340E-01 4.3460E-01

4.3980E-02 9.5500E-03 1.3770E-01 2.6870E-01 1.0830E-01 1.2750E-02 2.4070E-02

2.7440E-02 1.3200E-02 1.6410E-03 6.4230E-02 1.6100E-01 6.5660E-02 1.0390E-02

2.6660E-02 2.2070E-02 1.0570E-02 8.4580E-03 3.5770E-02 4.4410E-02 1.0220E-02

6.6920E-03 5.6480E-02 7.9200E-02 3.7280E-02 1.2210E-02 2.5750E+00 4.0530E-02

1.3850E-01 1.8360E-01 8.6300E-02 1.3210E-02 8.8220E-02 1.2010E-01 7.3090E-02

1.4180E-02 6.1510E-02 9.9130E-02 6.2280E-02 7.7270E-03 7.5680E-03 5.2790E-03

4.0550E-02 1.8690E-01 2.7950E-01 2.9790E-02 2.3110E-02 1.3870E-01 1.7510E-01

7.9210E-02 7.9870E-03 2.0500E-02 1.5590E-02 8.9690E-03 9.6800E-03 6.5350E-02

1.2490E-01 5.3270E-02 2.1330E-02 1.3970E-02 1.1170E-02 7.7150E-03 1.4420E-02

2.3110E-02 3.1970E-02 6.9560E-03 1.7610E-02 4.5560E-02 5.5450E-02 3.0870E-02

8.8530E-03 4.3490E-02 1.1400E-01 1.6980E-01 6.0090E-04 1.5660E-02 7.2920E-02

1.2810E-01 1.3780E-03 1.5930E-02 5.3060E-02 1.0640E-01 3.4840E-03 7.8260E-03

4.1200E-03 8.8960E-03 4.7120E-02 1.4850E-01 1.9930E-01 3.0600E-03 2.7150E-02

1.1250E-01 1.7200E-01 2.0530E-03 8.7020E-03 1.6660E-02 1.2670E-02 1.8220E-03

1.0370E-02 5.3080E-02 1.3160E-01 1.5990E-02 7.5720E-03 1.2020E-02 5.1050E-03

4.0530E-03 1.4420E-02 1.8780E-02 1.9660E-02 2.9200E-03 1.9000E-02 3.9070E-02

5.0460E-02 1.6850E+00 5.7900E-02 4.8220E-03 5.6160E+00 1.3010E+00 1.7900E-01

1.2100E-02 1.1510E+01 1.9590E+00 2.2270E-01 1.2990E-02 4.5170E-01 5.5630E-02

1.9130E-02 5.6010E-01 1.8540E-01 3.0160E-02 7.9330E-03 5.6970E-01 1.2340E-01

2.1860E-02 3.1810E-03 2.0710E-01 6.8410E-02 8.0360E-03 2.2640E-03 8.3680E-02

3.4760E-02 1.1040E-02 2.2870E-03 1.6120E-02 2.9340E-02 1.0940E-02 4.8110E-03

4.6130E-02 2.1790E-02 6.7590E-03 1.1600E-03 9.6740E-02 2.8840E-02 7.6790E-03

1.3540E-03 2.0490E+00 6.9130E-02 9.5620E-01 3.1250E+00 1.4150E+00 2.1930E-01

7.0660E-01 7.6810E+00 2.3260E+00 2.7570E-01 1.8470E-01 2.1170E-01 2.6610E-02

2.3030E-01 2.1630E-01 1.6110E-01 2.2360E-02 1.2330E-01 2.9940E-01 1.1910E-01

2.3330E-02 8.5540E-02 7.4540E-02 5.9980E-02 6.8890E-03 1.8200E-02 5.8270E-02

3.2470E-02 1.2320E-02 1.2890E-02 1.7250E-02 1.4230E-02 4.1740E-03 2.5190E-02

1.6830E-02 1.2230E-02 6.6140E-03 2.8820E-02 4.8490E-02 2.3020E-02 8.2090E-03

1.5420E+00 6.1860E-02 1.0530E+00 2.0250E+00 1.1300E+00 5.0610E-03 8.3280E-01

5.5290E+00 1.8480E+00 7.1920E-02 1.5770E-01 8.6810E-02 6.5760E-02 1.9590E-01

9.7630E-02 1.0720E-01 2.1840E-02 1.1900E-01 1.9100E-01 9.1920E-02 2.2520E-02

7.2550E-02 3.1260E-02 3.9670E-02 5.7910E-03 2.1480E-02 4.2400E-02 2.9220E-02

9.6700E-03 1.0470E-02 1.0810E-02 5.8290E-03 1.0670E-02 1.4370E-02 1.2870E-02

7.5670E-03 7.6750E-03 2.3020E-02 3.0190E-02 1.8260E-02 1.0340E-03 7.3870E-02

8.0880E-01 1.9750E+00 4.5850E-04 5.5530E-03 6.2830E-01 4.9170E+00 2.9140E-02

6.7010E-02 1.1080E-01 1.7570E-02 6.9300E-02 1.4640E-01 8.1600E-02 3.1810E-03

2.3320E-02 9.1900E-02 1.7230E-01 4.9550E-03 2.1930E-02 5.3980E-02 2.9290E-02

1.1790E-03 6.9300E-03 2.1340E-02 4.2350E-02 6.4460E-03 5.6590E-03 6.1960E-03

5.6710E-03 3.1660E-03 1.0670E-02 1.0410E-02 5.8580E-03 1.3540E-03 8.2080E-03

1.8260E-02 2.5980E-02 3.4580E+00 2.3780E-01 1.4480E-02 6.9130E+00 1.4810E+00

2.8040E-01 1.4480E-02 8.4580E-02 4.3110E-02 1.1480E-02 2.7360E-01 1.8470E-02

4.2380E-03 7.6680E-04 6.8590E-01 1.5990E-01 3.6960E-02 7.8020E-03 1.0960E-01

1.5180E-02 4.7220E-03 6.5360E-04 2.3670E-01 6.0320E-02 1.0470E-02 1.2680E-03

4.0840E-03 2.5200E-02 5.8750E-03 4.0000E-04 1.0240E-01 2.0360E-02 7.2370E-03

1.1860E-03 1.8880E-01 6.1480E-02 4.8600E-03 3.8320E-04 4.0720E+00 2.8470E-01

1.1250E+00 7.3180E+00 2.7650E+00 3.3390E-01 5.7050E-02 2.9050E-02 2.2360E-02

6.1860E-02 1.6530E-01 1.3410E-02 3.7910E-03 1.9990E-01 3.7240E-01 1.3480E-01

3.6670E-02 3.2370E-02 6.0860E-02 9.6850E-03 3.5240E-03 6.4360E-02 1.2730E-01

5.8750E-02 1.1790E-02 3.4030E-03 1.3950E-02 9.3460E-03 3.5000E-03 4.0000E-02

5.3580E-02 1.1140E-02 6.9080E-03 7.9680E-02 1.4750E-01 6.6900E-02 5.4460E-03

3.1720E+00 1.3010E-01 2.2070E+00 5.3310E+00 2.2210E+00 3.9640E-02 3.2260E-02

1.8760E-02 1.4120E-02 6.3090E-02 1.0790E-01 9.0930E-03 5.4980E-02 1.7570E-01

2.5760E-01 1.0790E-01 1.1070E-02 2.9040E-02 3.9850E-02 6.4890E-03 1.0200E-02

5.8560E-02 8.9120E-02 4.8720E-02 2.7220E-03 6.4810E-03 9.1520E-03 5.8060E-03

1.5580E-02 2.8150E-02 3.8190E-02 7.2600E-03 1.1980E-02 8.4930E-02 9.1200E-02

5.1360E-02 3.6130E-04 1.5430E-01 1.7380E+00 5.5280E+00 2.3000E-02 2.9200E-02

1.3430E-02 3.2680E-03 1.6330E-02 5.0130E-02 7.5770E-02 1.2910E-02 5.8990E-02

1.4490E-01 2.2990E-01 3.1660E-03 1.0680E-02 2.3170E-02 2.7490E-02 1.2540E-03

1.1750E-02 4.8600E-02 9.3330E-02 2.0410E-03 2.3320E-03 7.4380E-03 6.1240E-03

4.8470E-03 1.4430E-02 2.2460E-02 2.3350E-02 1.1420E-03 1.4360E-02 6.7990E-02

9.7420E-02 1.4200E+00 1.0360E-01 5.7730E-03 1.6580E-02 1.9730E-03 1.0330E-04

7.0270E-02 2.4200E-02 7.5810E-03 1.6970E-04 1.9720E+00 1.3960E-01 1.9840E-02

2.5740E-03 3.0330E-02 8.1660E-03 1.4650E-03 1.3910E-04 5.5210E-01 9.3140E-02

1.1510E-02 1.3860E-03 4.2230E-04 2.5890E-02 3.5240E-03 2.2350E-04 3.4180E-02

7.8100E-03 7.0770E-04 5.0860E-05 3.4190E-01 2.3020E-02 3.9430E-03 2.5390E-04

2.5930E+00 1.2010E-01 8.2060E-03 6.6470E-03 1.1820E-03 3.6030E-02 3.7750E-02

1.1710E-02 8.2150E-03 3.5720E-01 1.3160E+00 1.2860E-01 2.1430E-02 1.3360E-02

1.3650E-02 5.9950E-03 1.3580E-03 1.1280E-01 3.0300E-01 9.9480E-02 1.3990E-02

3.6200E-04 1.3290E-02 9.9880E-03 2.1430E-03 1.4620E-02 1.4920E-02 6.1340E-03

6.7350E-04 5.2800E-02 1.7440E-01 2.0800E-02 4.3940E-03 3.0700E+00 3.5410E-03

6.4880E-03 3.3820E-03 1.7200E-02 2.1530E-02 2.5580E-02 8.6290E-03 6.0750E-02

3.9280E-01 9.6960E-01 1.0380E-01 4.6630E-03 1.0710E-02 8.8330E-03 4.2110E-03

1.8310E-02 1.1990E-01 2.2450E-01 7.9700E-02 3.0170E-04 5.9090E-03 9.9930E-03

5.4860E-03 4.6450E-03 1.1740E-02 9.0450E-03 4.2830E-03 1.0350E-02 5.4150E-02

1.2910E-01 1.7080E-02 1.1180E-03 4.4570E-03 5.0900E-03 5.0430E-03 1.9040E-02

1.9260E-02 1.5090E-02 8.8860E-03 7.0760E-02 3.2110E-01 8.0750E-01 1.4290E-03

6.0280E-03 9.0380E-03 6.9620E-03 2.5630E-03 2.0930E-02 9.9320E-02 2.3350E-01

2.4130E-04 1.7680E-03 7.4540E-03 7.6950E-03 1.0480E-03 5.7310E-03 9.8480E-03

7.2880E-03 1.4500E-03 1.2100E-02 4.4760E-02 1.1880E-01 5.9790E-01 3.9710E-02

2.2370E+00 1.0870E+00 3.7110E-01 6.4580E-02 7.5330E+00 2.6400E+00 7.1190E-01

1.2380E-01 5.4160E-02 3.0650E-02 1.4700E-02 5.8270E-03 2.0320E-02 1.4380E-02

8.6470E-03 4.3340E-03 2.9120E-02 1.0810E-01 9.5070E-02 5.8640E-02 9.1230E-02

5.4460E-02 3.0780E-02 1.3960E-02 4.1320E-02 2.6090E-02 1.7510E-02 1.1420E-02

5.0380E-01 7.4090E-01 6.5060E-01 6.7220E-01 4.4620E-01 2.8870E-01 3.4960E+00

2.5840E+00 1.0100E+00 2.2990E-02 2.1420E-02 1.6750E-02 9.4860E-03 1.1370E-02

5.8230E-03 6.9860E-03 9.2800E-03 1.9420E-02 9.5070E-02 6.1770E-02 1.8370E-02

4.3060E-02 3.9720E-02 2.9800E-02 1.4080E-02 1.7850E-02 2.2210E-02 1.5880E-02

8.2890E-03 2.8340E-02 5.2020E-01 4.6330E-01 2.4200E-01 1.9240E-02 1.8250E-01

1.4510E+00 2.0310E+00 6.1580E-03 1.1850E-02 1.0500E-02 6.0510E-03 1.1420E-03

6.6840E-03 5.2900E-03 3.1680E-03 9.7090E-03 5.8630E-02 1.8500E-02 1.0170E-02

1.8030E-02 1.8620E-02 1.6610E-02 9.8840E-03 9.6330E-03 6.7630E-03 8.1750E-03

7.8160E-03 2.8690E+00 4.5220E-01 3.0620E-02 7.8920E+00 2.8660E+00 6.2030E-01

7.3270E-02 1.0780E-01 5.3620E-02 1.5980E-02 2.7040E-03 6.3370E-02 3.2100E-02

1.5210E-02 6.1310E-03 1.9080E-01 1.3140E-01 3.8530E-02 1.6000E-02 1.4280E-01

7.2760E-02 2.7980E-02 1.0340E-02 1.3430E-01 5.4110E-02 1.4700E-02 2.1120E-03

2.5480E+00 5.3410E-01 2.1480E+00 3.0780E+00 2.6340E+00 7.6840E-01 5.3590E-02

3.1810E-02 3.7170E-02 1.3910E-02 2.4460E-02 2.4840E-02 2.1240E-02 1.4420E-02

1.4260E-01 6.2620E-02 6.3960E-02 1.6710E-02 7.2760E-02 4.7300E-02 4.8900E-02

1.7410E-02 4.3130E-02 5.0510E-02 4.3760E-02 1.7530E-02 1.6970E+00 1.7350E-01

2.0770E+00 1.4790E+00 2.0340E+00 1.5980E-02 3.7150E-02 1.5460E-02 2.1140E-02

7.2610E-03 1.5590E-02 1.6710E-02 1.6500E-02 9.4960E-02 2.8900E-02 3.9140E-02

2.5820E-02 2.7980E-02 4.8900E-02 2.1160E-02 2.6890E-02 6.0020E-03 3.4730E-02

2.8640E-02 3.4290E-02 8.4660E-03 1.8940E-01 1.4380E+00 1.2440E+00 2.7040E-03

1.3910E-02 2.1140E-02 5.5910E-03 1.0730E-03 6.1640E-03 9.9310E-03 1.0280E-02

4.7430E-02 1.2410E-02 1.5050E-02 1.9700E-02 1.0330E-02 1.7410E-02 2.6900E-02

7.5210E-03 3.0680E-04 6.7110E-03 2.3250E-02 2.0040E-02 2.7090E+00 1.9330E-01

1.1540E-02 1.7270E-01 6.0980E-02 1.3730E-02 3.6360E-03 1.2410E-01 5.9940E-02

1.8730E-02 4.0500E-03 3.6890E-02 3.7130E-01 3.7870E-02 5.5050E-03 4.0790E-01

1.2230E-01 1.5420E-02 4.0400E-03 1.2280E-01 6.0520E-02 2.1250E-02 4.0850E-03

3.0900E+00 2.3490E-01 7.4630E-02 6.3010E-02 4.9720E-02 1.0280E-02 5.3630E-02

4.9110E-02 4.3430E-02 2.0370E-02 2.9520E-02 1.4410E-01 1.6500E-01 2.1630E-02

1.6430E-01 1.4720E-01 1.1510E-01 1.1820E-02 6.0420E-02 3.9530E-02 3.6500E-02

2.3190E-02 2.3550E+00 2.4300E-02 6.0430E-02 3.1150E-02 3.3010E-02 1.1960E-02

3.8750E-02 2.9710E-02 3.7000E-02 2.2140E-02 4.7930E-02 1.2630E-01 7.3020E-02

3.9530E-02 1.3820E-01 6.0190E-02 8.2930E-02 2.1230E-02 3.6490E-02 2.9920E-02

3.0390E-02 7.3850E-03 2.4160E-02 4.4460E-02 2.3510E-02 2.3740E-03 1.2390E-02

3.1570E-02 3.2830E-02 1.4760E-02 1.4100E-02 5.8040E-02 9.3470E-02 8.6840E-03

4.3150E-02 1.1130E-01 5.7250E-02 4.0850E-03 2.3180E-02 3.0380E-02 2.2100E-02

1.5920E+00 2.6050E-01 7.5020E-02 6.2690E+00 1.5600E+00 3.1360E-01 5.0790E-02

1.1670E+00 2.0680E+00 1.1650E+00 8.9860E-02 1.7150E+00 5.6290E-01 9.9190E-02

6.3810E-03 2.2280E+00 6.7850E-01 1.3560E-01 1.6690E-02 1.4840E+00 1.9590E-01

4.8320E-01 3.5930E+00 1.6230E+00 3.7300E-01 8.7260E-01 1.3880E+00 3.2170E-01

7.8010E-01 5.5850E-01 6.4290E-01 4.7320E-01 1.1530E-01 4.5380E-01 1.0240E+00

6.5160E-01 1.6740E-01 9.7880E-01 3.7650E-02 4.3770E-01 2.2400E+00 1.2830E+00

5.8060E-01 5.7870E-01 6.6780E-01 4.2040E-01 9.7960E-02 4.7020E-01 3.1620E-01

3.0990E-01 3.5420E-02 4.5030E-01 5.4270E-01 5.0190E-01 1.0250E-02 2.8440E-02

2.9720E-01 1.6640E+00 2.9000E-01 1.3040E-01 6.0890E-01 8.7960E-02 6.3800E-03

1.1430E-01 3.1020E-01 1.6710E-01 3.3700E-03 3.9030E-02 3.1340E-01 4.1240E-01

3.3350E+00 2.5840E-01 2.9970E-02 1.0260E-01 7.9450E-02 2.8760E-02 5.7770E-03

5.1410E+00 2.3040E-01 5.7840E-03 1.2950E-03 1.0560E+01 2.0430E+00 1.6920E-01

7.8050E-03 3.8960E+00 2.9780E-01 8.5480E-02 4.9530E-02 2.8810E-02 1.5480E-02

1.1370E+00 3.0950E+00 2.3190E-01 4.8110E-03 2.6730E+00 5.5200E+00 2.1870E+00

1.9480E-01 3.0400E+00 6.8380E-02 2.8340E-02 2.9640E-02 1.8390E-02 1.8320E-01

1.2790E+00 1.9600E+00 1.6160E-01 4.0530E-01 2.8460E+00 3.5360E+00 1.6880E+00

5.1280E-02 1.4510E-02 2.5740E-02 1.6230E-02 1.7850E-02 2.3700E-01 1.0160E+00

1.4310E+00 3.4510E-02 4.9680E-01 2.2840E+00 3.5600E+00 5.6290E-01 3.7530E-01

1.8770E-01 2.0920E+00 1.5700E+00 1.0500E+00 5.2600E-01 1.9100E-02 1.5280E-02

1.1460E-02 7.6400E-03 2.1350E+00 1.0250E+00 4.3770E+00 2.9920E+00 1.2150E+00

2.4030E-01 3.7620E-01 1.5370E-01 6.3200E-02 2.9500E-02 7.5980E-01 2.5640E+00

4.8100E-01 1.4330E+00 1.3780E+00 4.4190E-02 1.8370E-01 1.3260E-01 5.3400E-02

1.2350E-01 1.7690E+00 9.0130E-01 1.2840E-01 2.1500E-02 1.8900E-02 7.1530E-02

9.5320E-02 2.1010E+00 2.7400E-01 3.2790E-02 1.8600E+00 6.2810E-01 1.7510E-01

4.5500E-02 1.9780E+00 2.9840E-01 4.5400E-01 8.5820E-01 5.4590E-01 1.7820E-01

1.3210E+00 8.3620E-02 3.8870E-01 4.8350E-01 4.0840E-01 1.9120E-02 6.4140E-02

2.5740E-01 3.3480E-01 4.1080E+00 4.0490E-01 2.2590E-02 4.5050E+00 4.9500E-01

3.4680E+00

50000.00

4.9060E+00 1.6470E+00 7.1910E-01 2.9850E-01 1.9670E+00 8.1670E-01 2.4890E-01

6.4020E-02 6.0060E+00 5.4740E-01 1.9450E-01 6.8900E-02 7.1430E-01 3.9750E-01

3.1900E-02 2.7250E-01 7.9080E-02 6.4020E-03 6.5810E-01 3.2340E-01 9.8910E-02

1.7020E-02 4.3610E-01 2.1550E-01 1.1450E-01 3.8900E-02 5.0230E-01 2.3610E-01

8.6040E-02 1.9290E-02 2.9280E-01 1.6260E-01 7.9230E-02 4.0790E-02 3.3410E+01

8.3630E+00 3.0980E-01 1.0080E-01 3.6620E-02 3.8950E+01 6.8620E+00 6.9370E-01

5.0510E-02 2.2220E-02 1.0530E-02 1.9030E+01 1.5550E-01 3.8260E-02 1.2200E+00

2.1600E-01 6.9900E-03 1.5010E-03 1.9380E+00 2.4530E-01 2.6060E-02 8.8940E-03

7.5820E-01 1.1600E-02 6.1230E-03 1.6480E-01 1.2280E-01 5.3200E-02 1.2260E-02

9.2900E-02 6.4780E-02 2.7400E-02 8.8390E-03 2.1400E-02 6.7940E-03 2.1970E-03

7.1800E-02 3.5430E-02 1.2600E-02 3.3090E-03 2.9130E-02 1.8790E-02 8.2580E-03

1.9950E-03 7.2120E-02 4.0560E-02 1.3790E-02 2.4730E-03 5.2170E-02 2.0850E-02

4.7920E-03 5.1890E-04 3.9000E-02 1.5340E-02 5.9910E-03 1.7390E-03 3.3940E-02

1.1180E-02 3.3940E-03 1.0670E-03 5.6490E-02 2.5720E-02 1.1110E-02 3.8290E-03

7.5240E-02 2.8250E-02 7.4690E-03 1.1010E-03 4.9070E-02 1.5450E-02 3.7860E-03

6.8660E-04 5.0160E-02 2.3630E-02 8.6560E-03 1.8590E-03 3.7840E-02 1.3200E-02

6.2600E-03 3.2130E-02 2.0620E-02 7.3730E-03 1.6120E-03 2.9490E-02 1.6500E-02

1.0100E-02 7.0760E-03 1.3530E-02 1.0090E-02 3.8100E-03 9.0060E-04 1.1160E-02

8.6270E-03 4.6060E-03 1.4940E-03 1.8800E-02 9.7070E-03 7.6580E-03 4.4340E-03

1.5110E-02 1.0220E-02 5.5620E-03 2.5100E-03 1.9720E-02 1.3550E-02 6.1810E-03

1.8170E-03 4.7920E+00 1.4400E+00 4.7290E-01 8.9200E-01 7.8830E-01 5.8700E-01

2.2650E-01 1.5750E+00 3.5910E+00 3.5700E-01 1.1620E-01 5.2360E-01 1.7080E-01

2.2510E-01 1.5150E-01 9.0600E-02 4.5000E-02 2.9210E-01 2.3320E-01 2.5110E-01

1.0300E-01 2.2640E-01 2.2860E-01 9.9250E-02 9.5620E-02 2.1610E-01 2.3220E-01

1.5800E-01 8.5090E-02 1.8590E-01 1.3720E-01 1.1090E-01 2.9500E-02 7.6380E+00

1.5030E+01 1.1050E+01 3.3340E-01 7.6110E-02 4.2920E-01 2.7140E+01 9.8140E+00

1.4430E+00 6.0090E-02 1.0810E-02 5.4370E+00 9.7410E+00 9.6300E-02 4.0140E-01

5.4110E-01 2.0840E-01 5.5080E-03 3.7580E-01 1.1270E+00 2.4970E-01 2.1750E-02

2.8670E-01 3.2970E-01 4.5140E-03 1.2370E-01 4.5120E-02 6.2390E-02 4.9910E-02

7.4820E-02 4.4180E-02 2.7080E-02 7.0720E-03 1.2280E-02 8.7990E-03 3.2090E-03

3.4440E-02 2.7080E-02 2.4900E-02 1.2100E-02 1.9240E-02 1.0400E-02 1.0930E-02

8.3030E-03 3.5440E-02 2.2910E-02 3.0600E-02 1.4370E-02 2.6550E-02 1.7740E-02

1.3790E-02 4.4460E-03 1.9620E-02 1.7250E-02 8.4830E-03 4.1040E-03 1.2780E-02

1.5610E-02 8.5820E-03 2.9200E-03 2.5060E-02 2.6120E-02 1.6530E-02 1.0020E-02

3.1440E-02 3.0540E-02 2.0430E-02 7.5440E-03 1.5270E-02 2.3400E-02 1.2650E-02

3.8720E-03 2.1370E-02 2.0770E-02 1.6630E-02 8.7410E-03 2.2640E-02 1.8020E-02

5.5230E-03 2.2830E-02 9.7230E-03 1.1050E-02 5.7700E-03 1.7210E-02 1.5650E-02

1.2180E-02 5.0740E-03 1.0780E-02 3.9480E-03 5.1220E-03 2.8900E-03 8.2930E-03

4.0100E-03 4.1930E-03 4.2210E-03 1.5040E-02 8.5340E-03 6.0830E-03 2.8210E-03

1.1170E-02 6.9710E-03 5.9080E-03 2.5070E-03 1.3770E-02 6.6970E-03 7.1100E-03

5.4340E-03 3.6000E+00 9.4130E-01 3.3080E-01 6.2600E-01 4.9930E-01 4.1740E-01

4.2240E-01 1.6690E+00 1.9670E+00 1.9100E-01 3.0210E-01 2.0180E-01 1.8640E-01

7.4140E-02 8.6110E-02 5.5370E-02 8.2930E-02 2.1750E-01 1.5790E-01 2.0160E-01

1.2390E-01 1.2010E-01 1.6630E-01 7.8740E-02 8.2580E-02 1.5500E-01 1.6200E-01

1.2900E-01 1.1080E-01 1.2420E-01 6.2520E-02 5.0550E-02 2.3250E-01 1.0540E+01

4.6940E+00 1.0080E+01 2.4740E-01 5.1280E-02 4.4980E-01 1.7460E+01 9.9070E+00

1.9120E+00 5.9010E-02 9.5940E-01 6.8580E+00 3.5920E+00 9.6770E-02 3.7340E-01

2.7550E-01 1.2110E-01 4.9190E-02 4.5000E-01 6.7240E-01 1.5930E-01 9.0700E-02

2.6790E-01 1.0710E-01 6.2800E-02 5.5370E-02 4.2340E-02 5.1330E-02 5.4160E-02

3.4870E-02 2.0160E-02 5.3040E-03 6.8070E-03 7.4270E-03 3.9760E-03 1.2590E-02

2.3150E-02 1.8510E-02 1.9650E-02 6.9110E-03 9.4930E-03 8.1010E-03 1.0570E-02

1.0150E-02 2.5360E-02 1.6240E-02 2.5730E-02 1.0960E-02 1.6440E-02 1.1290E-02

8.3660E-03 9.7320E-03 1.2190E-02 1.0470E-02 4.7040E-03 4.4420E-03 1.0180E-02

9.6320E-03 5.9470E-03 1.0590E-02 1.6280E-02 1.8170E-02 1.3250E-02 1.0480E-02

2.3020E-02 1.9400E-02 1.4920E-02 3.7690E-03 1.3030E-02 1.5120E-02 9.4380E-03

7.1720E-03 1.4740E-02 1.4730E-02 1.4000E-02 1.3920E-02 1.4150E-02 6.6440E-03

1.2290E-02 1.0660E-02 7.6240E-03 6.4630E-03 1.0580E-02 1.2590E-02 8.1730E-03

6.3270E-03 6.0130E-03 4.6050E-03 3.3580E-03 2.9430E-03 4.3960E-03 3.7420E-03

3.4970E-03 3.9030E-03 1.1400E-02 6.9540E-03 4.2590E-03 1.8660E-03 7.2600E-03

6.2340E-03 3.7310E-03 2.6960E-03 7.1480E-03 6.6260E-03 5.4120E-03 5.5770E-03

2.1600E+00 1.0200E-01 3.3470E-01 4.1330E-01 3.9870E-01 1.5330E-01 4.4880E-01

1.3660E+00 8.6130E-01 1.3710E-01 2.2650E-01 9.6690E-02 2.9950E-02 6.6960E-02

4.6570E-02 1.2300E-02 1.0700E-01 1.3910E-01 1.8140E-01 5.5870E-02 8.1590E-02

1.0970E-01 7.9470E-02 2.3200E-02 8.0850E-02 1.2100E-01 1.2860E-01 6.6220E-02

7.3860E-02 5.4950E-02 3.7780E-02 5.8030E-02 3.1210E-01 9.7760E+00 6.1720E-01

6.5060E+00 2.5860E-02 3.8910E-02 3.3390E-01 9.9590E+00 8.0420E+00 1.7340E+00

4.6390E-02 2.2740E+00 5.2640E+00 1.4340E-02 1.4510E-01 2.3880E-01 1.7730E-01

9.2700E-03 7.4230E-02 4.0120E-01 3.9890E-01 2.3480E-02 1.2900E-01 1.5790E-01

2.2260E-02 5.0260E-02 3.9970E-02 2.8740E-02 3.4820E-02 2.6210E-02 1.1800E-02

3.5360E-03 3.5470E-03 4.9440E-03 3.6510E-03 3.4990E-03 1.2850E-02 1.5660E-02

1.7220E-02 1.7870E-03 6.7690E-03 7.1370E-03 7.5890E-03 1.3100E-03 1.3250E-02

1.5690E-02 2.1320E-02 3.4460E-03 1.0670E-02 1.0290E-02 6.8700E-03 4.3940E-03

7.4210E-03 8.1630E-03 4.8200E-03 1.4900E-03 4.4160E-03 7.0810E-03 6.8440E-03

3.9110E-03 8.8370E-03 1.2960E-02 1.3150E-02 2.5610E-03 1.1440E-02 1.5650E-02

1.5200E-02 7.5250E-04 4.5330E-03 1.0180E-02 1.2000E-02 1.6130E-03 7.4600E-03

1.1220E-02 1.3410E-02 8.0900E-03 8.4380E-03 6.3670E-03 5.1950E-03 9.3570E-03

6.5150E-03 3.6850E-03 6.8270E-03 6.7220E-03 6.1840E-03 5.5360E-03 2.6810E-03

4.4300E-03 2.7780E-03 1.4100E-03 1.6570E-03 3.2900E-03 3.0470E-03 2.3670E-03

7.5190E-03 4.9370E-03 2.5950E-03 1.1880E-03 4.4040E-03 4.3760E-03 2.9260E-03

1.6880E-03 2.8070E-03 5.5090E-03 4.7140E-03 3.4780E-03 2.6630E-02 1.1000E-01

2.5860E-01 2.2910E-01 5.9690E-02 1.1120E-01 3.6010E-01 8.8190E-01 4.4580E-02

1.5150E-01 3.2930E-02 9.1730E-03 3.6460E-02 2.6100E-02 7.9970E-04 1.9230E-02

1.0290E-01 9.6910E-02 1.7020E-02 5.4390E-02 3.4710E-02 5.7310E-02 3.4440E-03

3.1930E-02 6.1840E-02 7.9100E-02 3.2530E-02 2.6610E-02 4.1850E-02 1.5400E-02

1.6010E-02 7.6050E-02 2.4640E-01 6.4130E+00 1.9400E+00 1.2560E-02 1.1170E-02

2.1780E-02 1.8380E-01 4.4430E+00 5.4550E+00 1.5300E-02 4.9520E-02 3.7210E+00

1.5200E-03 2.4100E-02 1.3590E-01 1.2590E-01 4.3930E-03 4.4170E-03 7.4700E-02

3.5780E-01 5.1090E-03 3.7780E-02 1.1230E-01 4.4630E-03 2.7770E-02 2.9070E-02

8.7900E-03 1.7420E-02 1.4140E-02 5.2830E-03 1.7680E-03 1.5280E-03 2.3890E-03

2.1700E-03 7.7800E-04 4.1550E-03 1.0440E-02 9.2750E-03 2.0130E-04 2.5680E-03

5.5710E-03 3.7350E-03 4.0360E-06 2.2180E-03 1.3060E-02 1.0570E-02 7.2600E-04

4.6170E-03 6.9930E-03 3.3300E-03 1.5920E-03 3.6630E-03 3.9550E-03 3.1670E-03

4.8640E-04 1.3940E-03 3.5010E-03 4.6380E-03 1.0900E-03 3.9950E-03 6.0110E-03

8.3350E-03 3.5120E-04 3.6960E-03 9.1320E-03 9.5160E-03 1.2160E-04 1.0280E-03

4.0950E-03 8.4010E-03 1.6620E-04 2.3610E-03 6.3100E-03 7.9500E-03 3.8420E-03

3.6750E-03 3.9200E-03 1.6210E-03 5.2020E-03 4.5500E-03 1.0630E-03 3.5740E-03

2.2590E-03 3.7440E-03 3.0560E-03 8.8120E-04 2.6150E-03 1.8980E-03 2.6540E-04

3.8100E-04 1.9120E-03 1.9230E-03 9.6410E-04 3.7600E-03 2.5660E-03 1.2040E-03

5.8870E-04 2.0520E-03 2.0780E-03 1.9420E-03 6.1560E-04 7.6690E-04 2.9910E-03

3.1170E-03 1.3800E-03 1.3570E+01 4.2380E+00 1.8000E+00 2.0950E+00 7.5470E-01

1.7880E-01 3.9990E-02 1.2850E+00 5.0820E-01 1.7500E-01 5.9380E-01 1.2440E-01

3.4910E-02 1.7560E+00 6.0500E-01 1.6920E-01 4.5450E-02 1.7730E+00 5.3100E-01

1.6220E-01 5.1160E-02 1.2550E+00 4.9460E-01 1.6140E-01 5.2760E-02 9.3120E-01

4.1210E-01 1.7900E-01 6.9440E-02 6.4510E-01 2.7960E-01 1.0290E-01 3.1480E-02

6.3060E-03 6.1920E-01 3.1090E-01 1.3260E-01 4.5770E-02 1.1950E-02 2.1970E-03

2.2610E-01 9.7960E-02 1.9560E-02 1.1240E+01 3.1280E-01 9.2900E-02 2.0700E-02

5.4450E+00 7.1550E-01 1.0970E-01 3.0020E-02 3.7780E-01 1.4710E-01 2.2470E-02

9.0210E-01 4.0380E-01 1.9760E-01 1.1000E-01 6.3320E-02 2.8870E-02 1.2290E-02

9.1110E-02 1.3050E-01 7.8190E-02 1.0650E-02 4.3070E+00 4.5030E-01 3.6120E-02

4.2480E-03 2.0390E-01 9.4710E-02 2.3910E-02 2.9050E-03 2.3130E-01 1.6530E-01

2.9950E-02 2.8590E-03 2.0050E+00 4.4100E-02 8.3330E-03 1.2510E-03 8.3780E-01

2.7730E-02 5.8540E-03 1.7190E-03 1.0120E+00 1.3650E-01 1.6160E-02 2.6490E-03

1.4990E+00 1.7090E-01 2.3980E-02 3.6760E-03 3.5440E+00 4.9940E-01 1.9520E-02

3.3060E-03 9.5450E-01 1.2020E-01 2.5730E-02 3.4700E-03 2.7800E-01 1.0110E-01

2.5780E-02 3.1120E-03 3.0520E-02 1.2690E-02 2.3930E-03 3.8050E-01 3.3680E-02

1.1300E-02 2.2880E-03 5.9490E-02 2.0640E-02 6.3350E-03 1.3210E-03 1.4530E-01

1.5960E-02 4.1460E-03 7.9740E-04 7.8310E-02 2.3710E-02 7.0370E-03 1.1510E-03

2.3490E-02 8.7070E-03 5.3570E-03 7.7410E-04 9.6330E-02 8.6000E-03 2.2440E-03

3.6240E-04 1.8030E-01 3.5360E-02 5.5260E-03 1.0020E-03 1.5430E+01 4.1140E+00

9.1980E-01 8.4340E-01 5.7100E-01 1.5110E-01 7.7540E-01 5.6130E-01 2.3750E-01

2.8170E-01 2.5810E-01 6.4360E-02 4.3110E-01 9.1220E-01 5.7000E-01 1.7960E-01

5.2670E-01 9.3100E-01 4.3080E-01 1.4950E-01 4.0740E-01 6.3150E-01 4.1540E-01

1.5860E-01 4.7370E-01 4.5070E-01 2.5290E-01 1.0340E-01 2.3860E-01 3.0150E-01

1.9420E-01 9.8420E-02 3.9360E-02 2.2690E-01 2.3090E-01 2.0890E-01 1.4010E-01

6.8400E-02 2.2240E-02 1.2630E-01 8.1660E-02 6.6710E-02 1.5690E+00 7.4700E+00

2.0980E-01 7.6030E-02 7.1880E-01 3.3960E+00 7.4910E-01 1.0710E-01 2.2710E-01

1.2650E-01 8.6060E-02 4.0360E-01 4.6030E-01 2.9690E-01 1.2960E-01 4.1080E-02

2.9940E-02 1.2670E-02 7.2870E-02 9.7790E-02 3.1270E-02 4.6550E-02 9.4660E-02

3.0750E+00 5.5090E-01 4.2150E-02 6.6080E-02 1.4900E-01 8.8850E-02 2.8150E-02

9.3080E-02 2.9050E-01 1.7870E-01 3.6050E-02 2.6720E-01 1.3350E+00 3.2560E-02

7.8120E-03 1.4820E-01 5.5060E-01 1.9610E-02 4.7120E-03 1.3620E-01 6.3390E-01

1.4560E-01 1.7800E-02 7.2130E-02 9.8980E-01 1.8890E-01 2.7430E-02 3.8120E-01

3.0800E+00 4.5900E-01 2.1430E-02 7.0840E-02 6.6570E-01 1.2970E-01 2.9730E-02

7.3310E-02 1.2880E-01 9.2450E-02 3.0430E-02 1.8840E-02 1.0850E-02 7.0520E-03

7.2590E-02 2.3790E-01 1.8720E-02 9.9210E-03 2.0620E-02 2.9330E-02 1.4780E-02

6.6600E-03 3.1160E-02 8.7160E-02 1.0950E-02 3.5840E-03 1.9410E-02 4.3620E-02

1.9640E-02 7.9510E-03 1.8790E-02 6.5580E-03 2.5550E-03 3.1010E-03 1.9250E-02

5.8790E-02 6.1500E-03 1.9670E-03 3.1750E-02 1.0710E-01 3.4510E-02 6.0020E-03

1.2390E+01 3.2070E-01 7.0190E-01 4.8330E-01 3.6800E-01 4.5270E-01 4.5850E-01

2.6670E-01 1.2640E-01 2.0600E-01 1.2020E-01 7.9770E-02 4.0240E-01 6.1620E-01

4.7730E-01 1.6050E-01 4.2760E-01 6.1510E-01 3.2960E-01 1.1540E-01 3.4660E-01

4.2200E-01 3.3980E-01 2.4340E-01 3.1610E-01 2.6810E-01 1.3750E-01 7.7970E-02

1.6700E-01 1.9810E-01 1.4750E-01 7.0750E-02 4.5770E-02 1.6350E-01 1.5320E-01

1.3440E-01 1.1070E-01 6.5430E-02 5.7110E-02 7.7010E-02 7.1740E-02 2.0690E-01

1.7850E+00 4.8720E+00 1.3210E-01 1.0880E-01 7.3990E-01 2.2780E+00 5.6820E-01

1.1560E-01 1.2740E-01 8.5980E-02 1.9760E-01 2.9690E-01 2.7530E-01 1.9800E-01

2.6290E-02 2.3550E-02 1.2700E-02 5.4670E-02 5.5250E-02 4.3370E-02 3.2810E-02

1.3360E-02 9.8820E-02 3.1590E+00 4.2520E-01 9.7620E-03 6.1270E-02 1.0430E-01

7.5840E-02 1.1590E-03 1.0670E-01 1.9320E-01 1.4740E-01 2.6810E-02 3.1450E-01

8.6830E-01 2.1590E-02 1.5600E-02 1.3690E-01 3.5460E-01 1.2730E-02 1.6000E-02

1.4540E-01 4.2780E-01 1.1140E-01 1.3170E-02 6.4140E-02 7.3110E-01 1.4920E-01

1.8890E-02 4.5670E-01 2.0800E+00 3.4490E-01 1.5890E-02 5.6400E-02 4.9310E-01

1.0580E-01 1.0620E-02 6.6640E-02 8.5900E-02 7.9630E-02 1.0160E-02 1.0510E-02

6.8360E-03 1.9010E-02 6.6050E-02 1.5720E-01 1.2370E-02 6.3310E-03 1.4780E-02

2.0080E-02 1.1840E-02 7.5490E-03 2.7960E-02 5.6080E-02 6.9710E-03 4.8310E-03

1.5690E-02 3.1100E-02 1.6730E-02 1.4090E-02 3.6250E-03 2.9580E-03 2.1030E-03

4.0090E-03 1.8750E-02 3.7750E-02 4.0270E-03 5.5150E-03 3.4470E-02 7.2000E-02

2.6580E-02 9.2960E-02 3.2210E-01 5.2070E-01 3.1570E-01 2.4290E-01 3.1710E-01

2.3030E-01 5.4800E-02 1.1490E-01 1.3110E-01 2.1710E-02 7.4730E-02 3.1710E-01

6.3910E-01 5.1040E-02 1.4900E-01 3.2900E-01 4.9510E-01 3.5260E-02 1.0530E-01

2.7310E-01 4.0010E-01 1.2210E-01 1.7850E-01 2.0290E-01 1.4080E-01 1.6690E-02

7.6120E-02 1.2290E-01 1.3440E-01 8.8340E-02 5.2820E-03 4.2080E-02 1.0580E-01

1.2820E-01 1.0720E-01 5.9190E-02 1.8090E-02 6.3760E-02 5.5280E-02 4.6960E-02

2.2640E-01 1.3570E+00 3.0280E+00 2.9880E-02 1.0720E-01 5.6810E-01 1.7950E+00

4.6690E-02 1.1170E-01 6.1540E-02 1.1000E-01 1.2960E-01 1.9800E-01 2.0760E-01

1.5690E-02 1.5130E-02 1.0500E-02 3.6430E-02 2.3080E-02 5.2420E-02 1.2520E-02

2.2070E-03 1.4340E-02 7.7220E-02 2.4000E+00 2.4910E-04 1.1350E-02 4.9460E-02

1.0440E-01 1.0370E-04 1.2650E-03 8.1220E-02 2.1370E-01 3.6460E-03 3.2690E-02

2.2900E-01 5.4380E-01 3.2820E-03 1.7780E-02 1.1200E-01 2.4280E-01 2.6120E-03

1.7720E-02 1.1130E-01 3.3580E-01 1.6030E-03 1.4470E-02 5.1500E-02 5.6690E-01

3.1610E-03 2.1150E-02 4.5250E-01 1.6230E+00 1.3700E-03 1.8080E-02 4.6770E-02

3.8390E-01 9.6630E-05 1.2460E-02 5.4600E-02 9.3880E-02 4.5860E-03 8.8190E-03

4.8920E-03 5.4710E-03 1.8860E-02 5.1300E-02 9.5200E-02 1.3200E-03 6.6590E-03

1.1840E-02 1.6420E-02 1.9840E-03 7.7630E-03 2.1640E-02 3.4770E-02 5.0080E-04

5.3660E-03 1.3070E-02 2.7050E-02 9.3960E-03 1.6370E-03 3.2040E-03 9.5870E-04

9.6010E-04 4.3710E-03 1.3910E-02 2.3520E-02 9.4030E-04 6.0330E-03 2.6580E-02

5.7110E-02 8.8860E+00 2.7380E+00 1.1190E+00 1.1740E+00 5.4240E-01 7.7960E-02

2.6310E-01 1.0440E-01 2.3190E-02 4.0520E-01 2.1000E-01 9.2670E-02 2.5760E-02

3.7170E-01 1.8570E-01 9.0890E-02 4.0360E-02 3.7120E-01 1.8280E-01 8.0270E-02

3.0250E-02 2.8710E-01 1.5260E-01 8.3740E-02 3.7920E-02 1.9970E+00 7.5600E-01

2.0880E-01 4.4670E-02 9.5700E-03 2.7110E+00 8.8370E-01 2.4600E-01 6.0170E-02

1.5980E-02 5.3120E-03 1.3350E+00 1.7780E-01 1.7860E-02 2.7060E+01 4.4630E+00

7.3730E-02 1.2350E-02 3.8180E+01 4.8050E+00 3.5850E-01 6.2770E-02 1.7530E+01

1.0150E-01 3.0090E-02 8.9080E-02 5.5650E-02 2.9510E-02 1.2610E-02 5.1790E-02

3.1990E-02 1.4100E-02 4.6250E-03 1.8680E-02 4.4910E-03 2.0280E-03 9.3240E-02

4.6220E-02 1.9440E-02 4.9750E-03 1.1550E-02 6.6130E-03 3.2850E-03 1.2780E-03

2.9070E-02 1.6010E-02 7.3680E-03 2.0960E-03 2.2390E-01 4.2870E-02 4.6790E-03

9.4960E-04 2.7030E-01 5.2270E-02 9.2650E-03 3.0200E-03 2.8580E-02 1.0890E-02

4.5510E-03 1.3740E-03 4.9470E-02 2.6010E-02 1.1700E-02 3.9700E-03 2.3500E-01

4.6790E-02 1.1230E-02 2.6900E-03 2.3610E-02 1.0840E-02 4.2640E-03 1.0790E-03

2.5180E-02 1.0880E-02 4.5590E-03 1.5990E-03 1.3090E-01 1.6800E-02 8.8230E-03

2.9790E-02 1.6140E-02 6.8310E-03 2.0620E-03 1.2890E-02 7.7940E-03 4.7750E-03

2.8540E-03 2.1420E-02 1.5020E-02 7.3870E-03 2.4460E-03 4.7010E-03 3.2650E-03

1.9900E-03 9.2150E-04 1.1570E-02 1.9380E-02 2.4400E-03 1.2700E-03 7.2840E-03

3.4720E-03 1.6760E-03 7.0840E-04 2.0620E-02 4.4630E-03 1.2180E-03 4.2970E-04

8.7870E+00 1.7330E+00 6.8540E-01 3.1940E-01 3.3870E-01 1.4090E-01 9.3690E-02

5.8970E-02 1.4110E-01 1.6750E-01 1.4190E-01 1.0200E-01 1.5640E-01 1.7120E-01

1.1820E-01 7.1740E-02 1.2910E-01 1.7100E-01 1.2890E-01 7.8860E-02 1.4350E-01

1.6190E-01 8.8630E-02 3.6230E-02 4.0130E-01 9.4040E-01 6.6790E-01 2.7990E-01

5.8050E-02 6.2860E-02 1.4020E+00 9.5240E-01 3.9680E-01 1.1060E-01 1.9210E-02

3.1500E-01 6.9630E-01 1.3660E-01 4.4310E+00 1.3550E+01 5.6020E+00 7.4110E-02

3.4590E-01 2.6170E+01 5.7080E+00 4.2170E-01 4.0370E+00 9.1550E+00 5.3510E-02

4.9840E-02 3.4810E-02 3.0690E-02 2.4000E-02 3.7060E-02 2.3130E-02 1.3340E-02

3.5330E-03 7.0260E-03 9.0920E-03 1.8780E-03 3.3890E-02 3.7900E-02 2.9740E-02

2.1550E-02 4.8350E-03 4.6870E-03 4.1240E-03 3.4180E-03 1.0330E-02 1.1650E-02

1.0460E-02 8.3510E-03 4.6310E-02 1.1430E-01 4.8320E-02 4.3290E-03 5.5380E-02

1.3150E-01 4.8470E-02 6.5080E-03 8.5000E-03 1.3370E-02 7.6680E-03 4.5860E-03

1.9550E-02 2.0840E-02 1.6430E-02 1.2040E-02 2.1710E-02 1.5260E-01 4.3880E-02

1.2060E-02 8.0270E-03 1.0010E-02 7.5290E-03 5.0160E-03 6.5300E-03 1.1410E-02

7.8450E-03 4.8360E-03 4.2310E-02 6.8800E-02 5.9450E-03 1.6120E-02 1.0940E-02

8.6730E-03 5.4490E-03 6.8710E-03 6.6860E-03 4.8220E-03 2.8670E-03 1.5020E-02

7.4860E-03 7.1820E-03 5.0410E-03 2.7660E-03 1.8830E-03 1.7150E-03 1.6870E-03

8.6760E-03 6.3500E-03 1.0150E-02 8.7930E-04 3.4720E-03 3.0660E-03 2.0310E-03

8.7270E-04 1.8110E-03 1.0190E-02 4.5050E-03 1.1020E-03 5.6560E+00 2.9330E-01

3.6800E-01 2.3600E-01 6.3000E-02 8.0620E-02 5.1920E-02 3.2890E-02 9.0040E-02

1.2000E-01 1.2310E-01 6.4540E-02 9.4200E-02 1.0850E-01 7.8500E-02 3.9770E-02

8.5750E-02 1.1320E-01 1.0140E-01 7.9950E-02 8.8630E-02 8.1180E-02 3.9570E-02

3.8310E-02 3.9460E-01 4.8580E-01 4.2120E-01 2.4340E-01 1.9840E-02 3.9360E-02

6.5030E-01 7.0750E-01 4.0870E-01 1.3450E-01 4.5290E-02 3.4350E-01 3.7450E-01

7.3750E-02 5.5920E+00 6.3230E+00 3.9730E+00 8.4700E-02 2.9570E-01 1.7000E+01

4.5170E+00 5.0360E-01 4.6790E+00 3.6430E+00 2.1330E-02 2.7210E-02 2.4570E-02

1.9930E-02 2.3140E-02 1.7160E-02 9.0650E-03 2.3120E-03 3.4510E-03 5.3060E-03

3.6270E-03 8.7140E-03 2.0400E-02 2.7890E-02 2.4770E-02 1.4570E-03 2.8250E-03

3.5180E-03 3.5240E-03 2.3850E-03 6.4350E-03 8.8470E-03 9.5820E-03 4.6160E-03

4.8250E-02 5.2430E-02 3.3040E-02 9.1930E-03 4.8330E-02 6.3960E-02 3.9420E-02

2.9540E-03 5.4590E-03 9.0100E-03 5.6570E-03 5.9540E-03 1.1450E-02 1.5250E-02

1.3080E-02 6.1350E-03 1.3710E-02 9.5980E-02 3.3160E-02 1.8830E-03 4.9120E-03

7.5440E-03 6.2140E-03 1.8640E-03 4.1220E-03 7.9310E-03 6.6160E-03 1.5470E-02

3.6830E-02 2.5960E-02 6.8290E-03 8.6710E-03 7.5710E-03 4.2470E-03 3.7670E-03

3.9660E-03 3.6860E-03 2.6890E-03 7.3880E-03 7.1810E-03 5.5560E-03 3.0230E-03

1.1900E-03 1.3910E-03 1.4180E-03 1.2460E-03 5.7850E-03 2.5410E-03 5.7220E-03

3.6750E-03 1.6770E-03 2.0310E-03 1.6820E-03 9.2290E-04 7.3440E-04 1.0360E-03

6.9920E-03 2.6440E-03 8.2510E-02 2.6930E-01 9.6290E-02 2.0980E-02 4.8050E-02

2.8440E-02 1.7410E-03 3.4140E-02 6.3940E-02 8.2570E-02 2.1520E-02 4.2280E-02

5.2920E-02 5.5770E-02 8.8080E-03 3.1950E-02 5.5710E-02 7.2950E-02 3.7890E-02

3.6230E-02 3.9570E-02 3.1610E-02 9.9480E-03 2.9230E-02 2.2960E-01 3.1010E-01

2.1170E-01 6.9210E-03 1.1260E-02 2.0190E-02 2.3640E-01 3.9840E-01 3.0540E-01

5.4880E-03 5.7810E-02 3.1680E-01 1.1830E-02 7.3190E-02 3.9720E+00 3.9130E+00

3.7400E-02 4.0810E-02 1.9430E-01 1.0650E+01 2.3670E-02 7.6640E-01 3.6140E+00

6.5140E-03 1.5100E-02 1.4880E-02 9.8550E-03 1.0850E-02 9.4000E-03 4.3780E-03

1.1560E-03 1.5620E-03 1.6580E-03 2.8460E-03 5.0020E-04 9.1480E-03 1.4090E-02

1.6920E-02 2.2480E-04 1.3290E-03 1.9450E-03 2.1750E-03 5.6610E-06 2.6010E-03

4.7920E-03 6.1870E-03 9.4810E-04 4.3260E-03 3.3030E-02 3.2320E-02 3.0110E-03

6.4870E-03 3.9410E-02 3.6550E-02 5.4830E-04 2.6480E-03 3.3470E-03 4.9310E-03

8.2920E-04 5.2650E-03 7.4580E-03 8.7810E-03 9.0900E-04 5.8650E-03 8.7880E-03

6.1450E-02 1.1800E-04 1.9260E-03 3.3880E-03 4.9520E-03 2.6000E-04 1.6350E-03

2.8510E-03 5.6160E-03 6.5530E-03 8.1980E-03 2.4770E-02 2.0620E-03 5.4490E-03

4.2470E-03 2.2030E-03 1.7300E-03 1.7760E-03 1.8400E-03 1.7010E-03 2.4460E-03

5.0410E-03 3.0230E-03 1.0390E-03 3.2730E-04 8.8170E-04 8.0550E-04 6.6300E-04

2.8920E-03 9.4590E-04 1.7440E-03 3.0290E-03 7.0840E-04 8.7270E-04 9.2270E-04

5.2190E-04 2.0770E-04 5.2600E-04 5.8170E-04 3.6220E-03 9.6060E-01 3.9480E-01

3.5540E+00 2.4830E-01 7.4350E-02 1.7340E-01 9.4780E-02 4.9350E-02 2.4770E-02

6.2450E-01 2.9410E-01 1.3140E-01 5.7240E-02 1.6750E-01 1.0840E-01 6.3770E-02

3.3630E-02 5.8000E-01 3.6080E-01 1.7360E-01 6.0330E-02 2.5030E-01 1.7140E-01

9.8260E-02 4.8430E-02 1.8310E-02 2.5220E-01 2.0200E-01 1.3530E-01 7.6340E-02

3.5390E-02 1.2250E-02 2.2730E-01 1.3690E-01 4.2860E-02 3.2150E+00 8.6740E-01

1.8770E-01 4.8140E-02 5.1560E-01 4.0460E-01 2.2010E-01 7.8940E-02 7.0090E+00

3.0410E+00 4.3970E-02 3.2700E-01 1.4420E-01 5.8200E-02 2.3840E-02 2.9880E-01

1.6270E-01 8.9610E-02 6.8270E-01 7.1600E-01 4.0940E-01 1.9120E-02 1.2090E-01

5.4860E-02 2.1900E-02 8.5400E-03 1.7340E-02 9.7150E-03 4.8150E-03 1.9450E-03

2.9600E-02 1.4660E-02 6.2650E-03 1.9770E-03 1.1070E+00 3.5180E-01 6.6990E-02

8.7920E-03 1.6280E+00 3.8580E-01 5.6780E-02 5.6500E-03 6.7160E-02 2.8870E-02

1.0640E-02 3.2960E-03 1.1660E-01 5.4840E-02 2.2940E-02 8.1390E-03 3.7760E-02

2.3370E-02 1.3630E-02 6.1190E-03 1.0290E-02 5.8330E-03 3.1600E-03 1.6900E-03

6.7070E-03 3.8910E-03 1.9160E-03 7.4590E-04 1.5080E+00 6.5790E-01 1.5010E-02

8.3670E-01 2.6100E-01 4.2200E-02 9.4870E-03 1.2420E-01 1.0030E-01 5.8860E-02

2.5530E-02 1.0230E+00 2.7070E-01 6.6260E-02 1.7720E-02 1.8200E-01 8.1310E-02

3.2020E-02 9.4080E-03 6.4800E-01 2.1260E-01 1.0640E-01 1.5540E-02 2.7750E-01

9.8500E-02 4.4070E-02 2.1360E-02 6.3990E-02 2.8690E-02 1.0970E-02 3.2090E-03

4.2280E-01 2.4820E-01 2.1990E+00 1.3980E-01 3.3170E-02 7.6820E-02 7.0770E-02

4.7650E-02 1.2390E-01 2.8290E-01 2.2040E-01 1.1610E-01 6.5770E-02 6.4560E-02

6.3090E-02 5.6320E-02 2.8450E-01 1.9470E-01 1.8940E-01 1.2480E-01 1.0770E-01

9.1080E-02 8.5960E-02 7.0980E-02 4.0180E-02 1.5310E-01 6.0300E-02 5.9930E-02

7.7800E-02 7.6880E-02 4.7230E-02 1.1600E-01 5.1110E-02 1.0360E-01 1.7520E-01

1.6490E+00 8.7710E-01 1.8610E-01 3.3260E-01 8.1840E-02 1.6440E-01 2.3340E-01

3.0330E+00 9.2010E-01 2.7690E+00 5.3670E-02 1.4220E-01 1.1280E-01 5.9370E-02

1.6240E-01 1.6330E-01 4.2340E-02 4.2880E-01 3.3050E-01 1.2330E-01 3.5760E-01

1.3210E-02 5.2600E-02 4.5910E-02 2.5880E-02 3.6900E-03 6.5040E-03 6.6020E-03

5.6100E-03 2.6630E-03 1.1990E-02 1.2160E-02 8.1380E-03 3.4440E-02 5.7740E-01

3.2220E-01 7.3750E-02 2.4060E-02 8.4750E-01 4.2190E-01 9.7800E-02 9.5400E-03

2.8070E-02 2.2730E-02 1.2250E-02 1.6440E-02 4.8400E-02 4.3530E-02 2.7000E-02

1.4840E-02 1.3510E-02 1.3260E-02 1.0230E-02 2.5230E-03 4.9430E-03 4.1940E-03

2.4690E-03 1.3220E-03 2.7720E-03 2.6080E-03 2.1740E-03 6.5550E-01 2.0750E-01

5.9020E-01 3.5200E-02 4.1030E-01 2.2790E-01 4.5080E-02 8.1750E-02 2.8220E-02

4.1560E-02 5.2250E-02 4.3020E-02 5.4190E-01 2.7850E-01 4.9870E-02 1.6520E-02

7.7090E-02 6.8010E-02 3.9110E-02 4.3170E-01 1.0610E-01 3.8190E-02 8.0820E-02

4.7560E-02 1.5340E-01 7.9180E-02 1.6770E-02 1.1560E-02 2.5290E-02 2.1510E-02

1.3110E-02 7.4220E-02 1.3980E-01 1.0750E+00 9.6280E-03 1.8140E-02 3.5280E-02

4.9890E-02 3.6860E-02 6.3820E-02 1.2540E-01 1.4280E-01 1.5580E-02 3.5020E-02

3.9560E-02 3.4790E-02 6.6290E-02 1.6000E-01 1.1560E-01 5.1730E-02 2.1690E-02

5.8720E-02 5.7020E-02 4.0800E-02 2.0490E-02 2.1610E-03 7.7490E-02 7.6710E-02

4.9760E-02 2.3570E-02 7.7480E-03 1.8530E-02 8.2940E-02 3.4220E-02 5.9260E-02

8.6300E-02 6.6710E-01 6.3160E-01 2.2280E-02 2.0970E-01 1.3800E-01 3.5880E-02

4.2490E-02 2.7670E+00 5.5720E-01 1.2290E-02 2.9270E-02 6.6030E-02 7.6570E-02

8.9410E-02 4.2340E-02 5.0020E-02 2.2560E-01 1.9110E-02 3.2850E-01 7.1600E-02

3.2670E-03 7.2830E-03 2.3510E-02 3.4780E-02 3.7450E-04 2.1480E-03 3.8970E-03

4.7980E-03 7.1880E-05 1.5830E-03 5.7740E-03 9.9920E-03 8.1790E-03 2.0710E-02

2.8290E-01 3.1800E-01 6.5870E-03 1.3420E-02 4.4260E-01 3.3420E-01 1.3380E-03

5.7860E-03 1.3670E-02 1.5610E-02 2.1790E-03 9.4750E-03 2.3610E-02 3.2670E-02

3.8570E-03 7.7070E-03 8.2220E-03 5.6130E-03 8.6910E-04 1.1590E-03 2.0650E-03

2.5240E-03 1.0150E-04 8.2470E-04 1.5540E-03 2.2070E-03 1.4600E-02 5.8940E-01

1.2180E-01 1.1670E-02 1.7300E-02 1.6530E-01 2.1840E-01 1.2810E-02 4.7790E-02

3.1980E-02 9.3770E-03 2.3880E-02 1.4200E-02 2.1000E-01 2.0510E-01 1.7280E-03

8.1780E-03 3.5700E-02 5.2290E-02 2.1570E-01 1.5430E-02 8.0800E-02 1.6740E-02

2.9460E-02 1.3400E-02 5.4480E-02 5.0820E-02 9.2560E-04 7.1330E-03 1.3360E-02

1.4280E-02 3.1530E+00 5.4050E-01 4.2370E-01 2.2590E-01 1.2110E-01 6.2440E-02

5.8010E-01 3.9710E-01 2.7760E-01 1.8180E-01 3.2290E-01 2.0900E-01 1.2250E-01

6.2810E-02 4.5610E-01 3.2050E-01 1.9880E-01 8.1070E-02 8.3990E-02 5.2980E-02

2.9630E-02 1.5290E-02 6.2180E-03 9.8980E-02 5.7050E-02 3.0880E-02 1.5500E-02

7.0100E-03 2.5480E-03 4.2800E-02 2.9540E-02 1.3230E-02 3.2400E-01 1.4040E-01

5.6440E-02 2.0370E-02 1.3250E-01 8.3330E-02 4.5140E-02 2.0360E-02 4.0180E-01

1.9810E-01 1.6580E-02 1.7980E-01 9.0720E-02 4.4790E-02 2.1520E-02 2.1090E-01

1.9640E-01 1.2490E-01 7.2710E+00 1.2150E+01 5.2430E+00 1.4880E-01 3.8750E-02

2.1270E-02 1.2190E-02 7.2850E-03 1.4650E-02 8.0360E-03 3.8680E-03 1.4500E-03

2.9340E-02 1.5020E-02 6.6750E-03 2.1670E-03 2.2250E+01 5.3180E+00 7.4720E-01

3.0310E-02 6.9080E-02 3.0960E-02 1.9950E-02 1.2460E-02 2.9660E-02 1.7950E-02

1.1100E-02 6.3140E-03 2.5620E-02 1.8810E-02 1.4840E-02 1.2960E-02 2.5070E-02

1.5500E-02 7.8400E-03 3.3030E-03 9.3300E-03 5.8430E-03 3.7290E-03 1.8230E-03

1.2760E-02 8.5590E-03 4.9420E-03 2.2440E-03 4.1630E-01 1.5240E-01 4.9690E-03

3.0290E-02 1.6880E-02 1.0130E-02 5.1630E-03 2.5730E-02 1.8990E-02 1.1590E-02

6.9830E-03 1.6020E-01 3.6960E-02 1.2020E-02 4.7050E-03 2.1290E-02 1.0290E-02

4.6460E-03 1.9120E-03 8.4000E-02 6.2780E-02 3.4450E-02 3.9940E-03 3.0490E-02

1.1910E-02 6.6570E-03 3.3320E-03 8.9970E-03 5.1700E-03 2.4830E-03 8.9770E-04

2.2610E+00 8.8600E-02 1.8130E-01 1.7220E-01 1.1740E-01 2.8460E-01 3.2700E-01

2.2970E-01 1.2090E-01 1.2460E-01 1.2440E-01 1.2230E-01 1.1090E-01 2.6760E-01

2.0930E-01 1.5730E-01 8.6660E-02 3.1530E-02 3.3420E-02 2.9470E-02 2.1630E-02

1.1250E-02 1.9440E-02 3.4490E-02 3.4100E-02 2.6930E-02 1.7680E-02 8.5520E-03

2.5840E-02 1.2420E-02 1.8750E-02 7.8870E-02 1.5100E-01 1.0170E-01 3.9590E-02

5.7000E-02 4.5910E-02 4.5480E-02 3.9530E-02 1.7450E-01 5.5870E-02 1.6360E-01

4.6040E-02 7.9360E-02 6.3910E-02 3.6880E-02 1.9610E-01 1.2480E-01 3.3370E-02

4.8400E+00 5.2230E+00 2.1040E+00 6.0450E+00 9.7970E-03 1.9150E-02 1.5510E-02

9.0550E-03 3.0060E-03 5.4410E-03 5.5960E-03 4.6260E-03 3.4100E-03 1.1600E-02

1.1840E-02 8.6490E-03 3.1910E-01 1.4710E+01 5.9990E+00 1.1190E+00 2.2170E-02

3.5340E-02 2.0550E-02 5.5550E-03 1.1470E-02 1.4920E-02 1.1250E-02 6.4940E-03

1.3380E-02 1.5780E-02 1.1730E-02 6.4440E-03 1.0020E-02 8.2660E-03 8.4640E-03

7.3340E-03 3.2360E-03 4.2050E-03 3.6050E-03 2.6210E-03 4.9480E-03 4.0900E-03

4.6630E-03 5.2980E-03 1.4050E-01 4.4120E-02 1.2130E-01 1.3130E-02 1.7150E-02

9.5170E-03 3.6490E-03 1.3670E-02 1.0930E-02 9.0680E-03 7.3720E-03 1.0210E-02

6.1380E-02 3.6840E-02 1.0790E-02 3.3550E-03 9.1740E-03 8.0760E-03 4.8830E-03

4.2290E-02 3.4320E-02 1.4340E-02 2.2310E-02 7.8460E-03 1.7860E-02 9.7700E-03

2.7310E-03 3.1780E-03 2.8800E-03 2.9360E-03 2.5230E-03 2.4180E-02 4.5640E-02

8.5020E-02 1.2040E-01 1.4750E-01 1.1000E-01 1.1020E-01 1.0260E-01 2.6680E-02

6.7030E-02 7.7000E-02 6.8290E-02 9.9710E-02 1.1820E-01 8.8470E-02 4.5360E-02

8.1070E-03 1.5800E-02 1.7350E-02 1.4230E-02 7.8470E-03 2.3730E-03 9.4320E-03

1.5790E-02 1.8240E-02 1.5600E-02 8.9460E-03 7.4340E-03 1.5070E-02 5.9700E-03

2.4470E-02 4.0320E-02 6.8410E-02 5.4720E-02 1.1540E-02 3.1720E-02 2.9990E-02

2.0530E-02 1.3930E-02 1.5110E-01 3.2970E-02 1.4920E-02 2.2980E-02 3.7130E-02

3.8900E-02 1.2720E-01 3.3350E-02 1.8340E-02 2.4140E+00 1.3420E-01 4.7220E+00

1.0310E+00 4.3390E-03 4.2690E-03 7.6750E-03 9.9900E-03 1.1480E-04 1.8010E-03

3.2710E-03 4.1050E-03 3.4920E-05 2.0570E-03 6.0060E-03 9.6740E-03 7.0380E-03

2.3320E-01 5.9390E+00 5.8320E+00 1.7130E-02 6.4140E-03 1.2950E-02 1.0910E-02

5.0010E-03 4.7830E-03 5.8940E-03 5.5510E-03 8.4190E-03 4.8530E-03 5.0450E-03

5.4460E-03 1.6940E-03 5.9110E-03 5.7280E-03 3.8610E-03 6.6120E-04 1.6170E-03

1.9650E-03 2.0510E-03 3.9810E-04 2.8980E-03 3.3470E-03 2.8200E-03 4.5230E-03

1.2420E-01 2.5560E-02 6.9870E-03 4.2790E-03 5.4350E-03 4.8580E-03 5.2700E-03

7.7430E-03 5.2250E-03 2.7200E-03 6.1190E-03 4.1060E-03 2.8020E-02 2.6980E-02

6.7360E-04 1.7720E-03 4.2710E-03 5.8730E-03 2.0470E-02 3.9490E-03 2.2260E-02

5.4820E-03 4.5510E-03 2.5090E-03 5.9480E-03 4.8560E-03 3.6810E-04 1.9260E-03

1.9980E-03 1.4880E-03 8.6960E+00 5.1490E-01 8.3690E-02 3.2030E+00 7.9740E-01

1.1770E-01 1.7850E-02 3.2950E+00 1.0040E+00 2.6260E-01 3.3800E-02 6.9090E-01

4.1260E-01 9.6260E-02 2.1080E-02 1.9530E-01 8.9800E-02 3.4680E-02 9.9460E-03

1.2900E-03 2.0560E-01 9.4260E-02 3.7170E-02 1.1930E-02 2.7860E-03 3.4370E-04

1.4200E-01 5.0240E-02 7.1000E-03 2.0980E-01 5.9880E-02 1.5240E-02 2.8630E-03

2.4670E-01 8.3340E-02 2.1550E-02 3.9040E-03 6.1550E-02 2.3600E-02 2.9840E-03

9.8840E-01 2.4430E-01 1.2830E-01 2.6080E-02 1.2410E-01 2.0200E-02 2.5430E-03

8.1200E-03 1.3530E-02 7.7870E-03 1.0520E-03 2.0770E+01 7.0750E-01 1.7650E-02

8.6300E-04 3.3360E+01 2.6800E+00 7.3440E-02 1.1530E-03 4.5990E+01 3.3300E+00

1.0850E-01 2.7580E-03 1.8890E-02 4.7790E-03 9.4890E-04 1.2500E-04 3.6830E-02

7.5360E-03 6.3150E-04 7.3520E-05 4.7460E-02 1.5800E-02 3.4350E-03 1.8730E-04

7.5960E+00 2.1800E-01 7.1330E-03 2.5690E-03 1.2850E-01 3.8970E-02 9.1090E-03

1.2270E-03 7.8990E-01 8.6100E-02 1.7910E-02 3.4050E-03 2.4370E+00 2.1650E-01

2.3630E-02 3.2790E-03 8.3110E-03 8.3010E-04 4.1080E-05 2.1900E-02 5.3780E-03

7.4740E-04 5.5960E-05 3.2430E-02 6.4530E-03 1.5000E-03 1.8970E-04 3.8810E-02

7.4050E-03 7.2460E-04 1.3250E-04 3.4550E-01 1.7540E-02 2.6010E-03 3.5240E-04

3.6790E-03 3.6900E-03 1.8780E-03 4.3370E-04 2.6470E-02 4.8320E-03 1.1520E-03

2.1530E-05 4.5250E-02 9.4190E-03 1.5670E-03 1.8390E-04 1.2080E+01 5.8550E-01

1.1080E+00 1.5930E+00 7.5310E-01 1.2370E-01 1.0950E+00 1.9300E+00 1.0410E+00

2.8850E-01 6.0630E-01 6.1330E-01 3.0040E-01 7.8340E-02 9.7540E-02 9.1030E-02

5.6820E-02 3.0990E-02 1.3870E-02 8.2360E-02 8.7490E-02 6.7830E-02 3.9960E-02

1.7940E-02 5.4570E-03 8.1850E-02 5.5500E-02 3.3520E-02 9.7430E-02 9.5290E-02

4.0880E-02 1.3030E-02 1.0560E-01 1.1210E-01 6.5140E-02 2.1950E-02 4.1420E-02

2.0900E-02 1.3530E-02 3.4250E-01 6.8960E-01 3.9530E-01 1.2840E-01 6.4540E-02

5.0040E-02 1.1390E-02 6.9590E-03 1.0670E-02 3.9190E-03 4.5110E-03 1.9840E+00

1.5310E+01 8.7960E-01 1.8790E-02 2.5630E+00 3.6340E+01 3.2970E+00 8.6280E-02

2.5320E-01 4.3620E+01 4.3720E+00 1.2690E-01 8.2190E-03 8.5720E-03 3.4100E-03

8.7730E-04 1.3850E-02 1.6350E-02 6.8740E-03 6.2930E-04 1.9890E-02 1.9800E-02

1.2890E-02 4.0280E-03 5.7300E-01 5.6530E+00 2.6430E-01 7.6020E-03 5.1020E-02

5.9540E-02 3.2450E-02 1.0040E-02 1.1230E-01 5.6010E-01 7.8590E-02 1.8830E-02

2.2010E-01 1.8390E+00 2.4700E-01 2.5940E-02 4.0280E-03 3.3790E-03 4.9830E-04

8.7110E-03 7.6480E-03 4.4110E-03 7.5120E-04 8.9770E-03 1.3690E-02 5.8890E-03

1.6260E-03 1.5650E-02 2.0620E-02 6.4460E-03 6.5100E-04 4.3960E-02 2.4320E-01

1.7950E-02 2.8690E-03 3.1530E-03 2.8260E-03 1.3610E-03 9.9750E-04 8.0360E-03

1.5990E-02 2.1820E-03 1.1750E-03 1.3910E-02 2.4080E-02 9.6380E-03 1.7030E-03

1.0720E+01 2.7960E-01 1.0400E+00 1.0580E+00 5.9910E-01 3.0530E-01 1.1330E+00

1.4640E+00 9.0190E-01 2.5960E-01 5.0400E-01 3.9400E-01 2.0460E-01 4.1690E-02

6.3230E-02 6.6750E-02 4.8200E-02 2.3200E-02 2.4240E-02 5.9370E-02 6.1440E-02

5.1130E-02 3.6230E-02 1.8680E-02 4.0410E-02 5.4490E-02 4.7550E-02 4.1070E-02

7.2700E-02 6.3940E-02 2.7900E-02 3.7540E-02 8.3840E-02 7.8620E-02 5.4260E-02

2.4220E-02 2.2960E-02 1.5900E-02 1.2790E-01 3.7330E-01 7.6860E-01 3.2660E-01

3.0420E-02 4.8840E-02 2.5870E-02 5.7990E-03 7.0630E-03 4.7920E-03 4.0400E-03

9.4590E-02 2.5440E+00 1.1920E+01 6.7390E-01 3.4520E-02 3.2200E+00 2.0160E+01

2.5390E+00 6.4860E-03 8.2420E-01 3.9330E+01 3.4300E+00 3.1010E-03 6.5130E-03

5.9460E-03 2.3890E-03 4.3780E-03 1.2930E-02 9.0200E-03 4.8350E-03 6.2820E-03

1.6120E-02 1.3110E-02 1.0850E-02 2.9380E-02 7.1990E-01 4.4520E+00 2.0380E-01

1.7330E-02 4.1330E-02 4.1800E-02 2.7210E-02 2.4170E-02 1.1170E-01 4.4050E-01

6.7030E-02 2.3600E-02 2.4160E-01 1.4790E+00 1.9710E-01 1.7790E-03 3.2690E-03

1.6650E-03 3.1650E-03 7.9980E-03 5.6910E-03 3.1220E-03 3.1770E-03 8.3660E-03

1.1020E-02 4.8060E-03 4.4390E-03 1.3210E-02 1.3220E-02 4.4980E-03 4.1460E-03

4.7330E-02 1.8950E-01 1.4730E-02 2.6280E-03 1.8490E-03 1.4370E-03 9.9820E-04

3.7320E-03 7.9460E-03 1.0770E-02 1.5870E-03 3.6640E-03 1.4270E-02 1.6590E-02

7.7580E-03 5.2530E-02 3.1910E-01 8.8770E-01 1.1340E+00 5.2530E-02 3.8420E-01

1.0440E+00 1.6390E+00 9.4500E-02 2.8540E-01 4.1890E-01 3.0050E-01 1.0880E-02

4.1280E-02 5.5760E-02 5.3290E-02 3.2650E-02 3.9700E-03 2.2000E-02 4.4010E-02

5.4410E-02 4.8080E-02 2.7820E-02 1.4170E-02 4.8590E-02 5.1000E-02 1.3960E-02

4.3230E-02 6.0510E-02 4.6160E-02 9.5140E-03 4.0010E-02 7.4070E-02 7.9500E-02

1.1660E-02 2.4980E-02 1.3790E-02 5.9940E-02 2.4170E-01 5.0240E-01 7.1800E-01

1.2250E-02 3.4980E-02 3.6830E-02 4.6400E-03 3.8190E-03 6.8800E-03 2.1890E-03

8.3400E-03 1.1530E-01 2.3200E+00 1.6800E+01 1.1440E-03 8.6280E-02 2.4920E+00

1.8280E+01 1.2030E-03 1.7700E-02 1.2310E+00 3.5660E+01 8.8690E-04 3.4550E-03

5.4930E-03 4.2980E-03 9.1760E-04 5.3470E-03 1.0870E-02 8.5140E-03 1.1640E-03

7.2320E-03 1.4460E-02 1.5290E-02 2.3790E-03 3.6380E-02 5.5850E-01 3.5870E+00

3.7490E-03 1.9460E-02 3.8210E-02 4.1860E-02 4.8670E-03 2.6130E-02 9.4040E-02

4.0680E-01 3.2750E-03 2.5930E-02 2.1110E-01 1.3350E+00 5.3720E-04 2.1590E-03

2.5970E-03 7.3710E-04 3.6470E-03 7.1310E-03 4.7880E-03 5.8210E-04 3.6080E-03

7.1960E-03 1.1180E-02 1.0100E-03 5.6610E-03 1.0940E-02 1.0450E-02 5.5380E-04

4.8420E-03 3.8870E-02 1.6860E-01 2.1020E-03 1.1010E-03 1.5750E-03 7.0630E-04

9.6820E-04 4.1590E-03 6.6950E-03 7.8980E-03 6.2170E-04 3.8770E-03 1.2100E-02

1.6310E-02 6.4070E+00 3.4720E-01 8.3510E-02 1.6060E+00 6.3550E-01 1.9270E-01

4.6330E-02 1.8030E+00 7.5500E-01 2.1580E-01 4.7290E-02 1.2220E-01 6.2330E-02

3.1500E-02 1.6490E-02 7.4150E-03 1.9070E-01 1.1240E-01 6.5600E-02 3.5280E-02

1.6490E-02 5.9520E-03 1.2190E-01 6.2880E-02 1.6540E-02 6.5260E-01 1.0050E-01

3.0280E-02 1.0160E-02 3.5700E-01 1.1620E-01 4.2340E-02 1.4900E-02 1.2260E-01

5.5840E-02 1.0620E-02 7.6200E-01 4.8460E-01 1.5860E-01 5.5180E-02 1.6460E-01

7.5840E-02 3.2690E-02 1.0170E-01 1.1810E-01 6.0610E-02 2.6230E-02 9.7600E+00

9.5410E-01 6.5810E-02 5.4030E-03 2.0270E-01 1.0560E-01 2.6020E-02 3.7480E-03

2.8410E-01 1.0840E-01 3.1950E-02 3.5120E-03 2.1280E-01 2.5860E-02 1.6270E-02

8.3550E-03 2.0010E+01 4.6930E-01 1.5630E-02 6.7590E-04 2.5170E+01 2.8890E+00

1.3180E-01 9.1470E-04 2.7770E+01 2.7200E+00 1.5200E-01 5.7650E-03 1.0250E+00

1.4960E-01 1.0060E-02 1.4010E-03 9.4180E-01 1.2700E-01 1.5970E-02 3.0350E-03

6.1840E-02 2.9470E-02 1.0710E-02 2.1420E-03 4.0810E-02 1.1280E-02 1.8900E-03

8.5820E-01 4.7590E-02 6.9440E-03 1.8830E-03 4.3410E-01 6.8950E-02 1.0450E-02

2.3160E-03 6.4720E-02 1.5210E-02 4.2460E-03 1.1420E-03 1.0150E-01 3.0970E-02

6.9540E-03 1.9120E-03 1.0170E-02 7.9300E-03 4.7710E-03 1.8960E-03 2.8000E-02

1.0010E-02 4.6690E-03 1.2650E-03 8.1370E-02 3.9220E-02 7.9740E-03 3.0790E-03

7.6960E+00 3.5460E-01 5.0050E-01 8.2750E-01 5.3890E-01 2.0530E-01 8.5950E-01

8.3230E-01 5.0870E-01 1.8240E-01 5.6830E-02 6.1200E-02 4.3470E-02 2.3240E-02

8.9120E-03 9.1970E-02 9.0700E-02 6.4830E-02 4.5120E-02 3.1360E-02 1.6980E-02

7.5900E-02 4.3450E-02 4.1670E-02 1.6490E-01 3.7350E-01 7.3800E-02 2.0050E-02

1.1580E-01 1.8700E-01 8.5350E-02 3.7440E-02 7.9430E-02 4.0280E-02 3.1590E-02

4.8450E-01 3.9800E-01 3.7980E-01 1.4080E-01 1.0730E-01 7.9650E-02 3.2490E-02

8.1390E-02 8.0690E-02 5.5010E-02 2.6420E-02 3.0350E-01 7.2180E+00 1.2170E+00

8.2080E-02 7.7340E-02 1.4480E-01 9.9370E-02 3.0310E-02 5.9610E-02 3.0890E-01

1.7820E-01 3.7990E-02 4.4210E-02 1.4430E-01 1.5260E-02 6.0300E-03 2.7490E+00

1.3120E+01 4.4530E-01 8.7880E-03 2.8620E+00 1.6010E+01 3.4590E+00 1.5460E-01

6.4670E-01 2.0300E+01 3.8600E+00 1.9110E-01 1.4400E-01 6.4340E-01 1.5730E-01

1.0520E-02 3.9750E-02 6.9920E-01 1.3330E-01 1.7570E-02 2.4130E-02 2.5370E-02

2.1860E-02 1.2000E-02 2.0750E-02 1.5450E-02 6.2750E-03 1.5770E-01 5.1770E-01

4.0990E-02 5.3680E-03 6.8120E-02 2.5480E-01 7.0440E-02 1.0710E-02 1.9630E-02

3.0730E-02 1.0690E-02 3.5750E-03 1.7590E-02 6.0060E-02 2.6940E-02 7.2870E-03

8.1330E-03 5.9710E-03 3.4830E-03 2.1250E-03 1.1150E-02 1.2520E-02 7.9720E-03

2.9140E-03 2.4530E-02 4.7780E-02 4.1200E-02 6.9320E-03 5.7840E+00 1.2770E-01

4.5220E-01 5.5820E-01 4.5180E-01 3.4300E-01 6.3620E-01 5.1540E-01 3.2160E-01

2.8020E-02 3.9970E-02 3.6700E-02 2.7020E-02 1.4250E-02 4.4440E-02 4.6600E-02

6.0020E-02 5.3710E-02 3.5010E-02 1.5800E-02 3.8260E-02 4.2880E-02 3.9620E-02

4.9850E-02 1.4590E-01 2.3170E-01 4.5210E-02 4.2330E-02 8.5010E-02 1.2780E-01

6.4720E-02 4.3430E-02 4.1850E-02 2.8240E-02 1.5860E-01 3.7980E-01 4.0360E-01

2.8780E-01 6.9700E-02 6.1640E-02 3.3250E-02 6.1050E-02 5.4060E-02 4.4550E-02

2.4410E-02 1.2310E-02 3.6380E-01 5.3170E+00 9.4010E-01 1.0220E-02 7.3660E-02

9.5460E-02 8.4490E-02 3.3580E-03 1.0240E-01 2.0990E-01 1.4750E-01 2.0810E-02

4.5850E-02 9.0230E-02 5.5970E-03 2.1510E-01 3.3150E+00 8.4130E+00 3.0820E-01

1.3090E-01 3.7660E+00 1.0340E+01 2.6750E+00 7.7250E-03 7.9010E-01 1.4970E+01

2.9650E+00 8.9840E-03 1.5460E-01 4.3050E-01 1.2020E-01 7.5120E-03 3.8150E-02

6.7390E-01 1.1270E-01 6.2490E-03 1.7830E-02 1.8320E-02 2.0120E-02 9.7800E-03

1.3800E-02 8.7460E-03 2.2320E-02 1.5830E-01 3.3420E-01 2.6580E-02 1.0240E-02

6.9770E-02 1.5920E-01 5.3930E-02 6.7890E-03 1.5820E-02 1.8790E-02 6.7140E-03

4.6120E-03 1.4710E-02 4.5160E-02 2.2430E-02 6.0990E-03 3.9900E-03 2.8940E-03

1.6180E-03 6.5620E-03 8.3930E-03 8.9140E-03 3.5090E-03 5.5830E-03 2.0750E-02

3.4480E-02 3.1050E-02 2.7140E-02 1.3610E-01 3.6100E-01 5.3340E-01 1.0870E-01

3.4230E-01 4.6310E-01 3.0300E-01 1.5190E-02 1.8310E-02 2.4770E-02 2.4130E-02

1.4770E-02 1.4320E-02 3.4380E-02 3.6960E-02 3.6050E-02 3.0580E-02 1.8030E-02

1.4590E-02 3.8610E-02 2.7370E-02 1.8970E-02 4.3880E-02 1.0660E-01 1.4460E-01

1.4900E-02 3.7440E-02 6.4570E-02 9.5870E-02 1.9290E-02 3.8510E-02 1.7810E-02

5.5150E-02 1.4080E-01 2.8780E-01 3.3450E-01 4.2070E-02 3.8870E-02 2.8250E-02

4.0700E-02 3.3140E-02 3.0740E-02 1.8210E-02 2.3680E-03 1.4590E-02 2.7690E-01

4.1300E+00 7.1320E-04 1.1500E-02 5.8960E-02 1.0490E-01 2.3650E-04 3.6930E-03

7.8640E-02 2.2640E-01 1.3390E-02 1.0930E-02 2.7390E-02 5.2380E-02 1.1920E-02

2.9830E-01 2.5370E+00 7.0990E+00 9.1430E-04 1.5180E-01 2.8550E+00 8.5060E+00

2.2860E-03 7.8930E-03 5.9370E-01 1.1650E+01 1.3860E-03 1.0510E-02 1.2300E-01

3.4350E-01 2.0860E-03 7.7650E-03 3.0350E-02 5.6330E-01 5.9580E-04 6.8830E-03

1.5420E-02 1.8790E-02 3.9380E-03 9.6110E-03 8.1590E-03 4.0800E-03 2.3880E-02

1.2060E-01 2.1500E-01 2.2620E-03 1.0690E-02 5.3500E-02 1.2900E-01 2.2480E-03

7.1350E-03 1.2870E-02 1.1080E-02 1.1330E-03 4.4590E-03 1.1700E-02 3.9720E-02

4.0670E-03 2.4400E-03 2.2730E-03 1.0730E-03 2.6240E-03 4.2160E-03 4.8140E-03

3.8260E-03 1.8480E-03 6.5870E-03 1.7800E-02 2.9090E-02 6.8180E+00 3.0410E-01

5.2430E-02 1.7410E+00 4.9250E-01 1.5060E-01 4.2360E-02 1.2330E-01 5.6960E-02

2.2750E-02 8.0380E-03 2.1200E-03 1.8360E-01 1.0340E-01 5.1370E-02 2.1560E-02

7.0220E-03 1.4750E-03 8.3440E-02 1.9100E-02 5.2750E-03 2.1320E-01 7.2620E-02

2.2690E-02 4.5410E-03 7.8920E-01 8.5380E-02 2.5080E-02 8.0930E-03 9.3690E-02

2.0970E-02 6.0840E-03 1.1630E+00 3.5920E-01 9.5610E-02 3.3130E-02 1.3100E-01

4.2240E-02 6.5680E-03 4.4730E-03 2.0600E-02 4.6580E-03 1.9290E-03 2.1330E+00

2.1200E-01 2.1760E-02 2.6890E-03 3.8520E+00 3.5150E-01 3.7440E-02 5.3300E-03

9.0820E-02 8.4750E-02 2.7680E-02 4.9420E-03 2.0480E-02 1.1150E-02 3.3250E-03

4.9980E-04 5.1800E-02 1.4620E-02 3.2340E-03 3.4970E-04 8.8740E-01 3.4410E-02

5.5790E-03 1.5560E-03 2.9450E-01 5.6820E-02 1.2300E-02 2.1630E-03 2.2940E+01

5.7020E-01 1.2330E-02 7.7520E-04 3.0190E+01 2.6440E+00 1.0540E-01 6.5050E-04

4.2160E+01 3.0070E+00 1.3720E-01 9.3540E-03 3.1750E-02 5.8860E-03 2.1520E-03

6.7440E-02 2.4880E-02 1.0030E-02 2.6090E-03 2.0880E+00 8.0230E-02 1.2230E-02

4.4460E-03 4.9680E-02 1.2060E-02 2.8320E-03 3.7610E-04 1.9900E-01 3.0960E-02

4.5190E-03 6.8550E-04 2.0630E-03 1.3430E-02 4.0250E-03 1.0470E-03 2.2830E-02

6.9420E-03 2.4750E-03 5.2890E-04 1.2730E-01 2.3560E-02 3.6230E-03 5.3240E-04

9.7820E+00 3.3520E-01 7.2260E-01 9.7820E-01 3.3750E-01 1.0930E-01 5.6800E-02

6.1430E-02 3.6890E-02 1.9630E-02 8.4480E-03 9.0980E-02 7.4790E-02 6.0570E-02

4.3070E-02 2.5820E-02 1.1540E-02 3.7890E-02 3.9590E-02 1.2350E-02 1.0160E-01

9.6390E-02 4.6730E-02 1.7740E-02 1.3650E-01 5.2650E-01 6.8930E-02 2.2450E-02

4.9230E-02 4.0460E-02 1.0630E-02 4.2530E-01 5.7410E-01 3.0250E-01 8.3290E-02

7.9400E-02 4.9990E-02 2.3850E-02 3.7270E-03 1.1780E-02 9.6900E-03 2.3600E-03

1.9910E-01 1.4190E+00 2.3730E-01 2.5110E-02 1.6820E-01 3.0350E+00 4.1880E-01

4.2280E-02 7.0420E-02 1.0460E-01 6.7180E-02 3.0580E-02 1.3930E-02 7.6030E-03

5.9390E-03 2.8630E-03 2.1740E-02 2.1310E-02 1.1630E-02 2.6850E-03 1.1160E-01

6.3350E-01 3.2910E-02 5.3920E-03 5.6740E-02 1.8400E-01 5.0170E-02 1.3330E-02

2.2600E+00 1.6540E+01 6.7950E-01 1.7160E-02 2.6280E+00 2.1450E+01 3.2650E+00

1.1540E-01 4.3270E-01 3.4220E+01 3.8750E+00 1.6400E-01 1.5850E-02 1.4160E-02

2.9190E-03 3.3420E-02 3.0470E-02 1.4520E-02 6.9250E-03 2.1720E-01 1.4030E+00

7.9790E-02 1.1010E-02 1.9660E-02 2.3350E-02 8.6440E-03 2.5650E-03 3.0760E-02

1.3160E-01 3.2420E-02 6.3860E-03 1.7200E-03 8.1640E-03 5.3590E-03 1.7620E-03

9.9680E-03 9.9370E-03 6.0420E-03 2.0140E-03 2.9240E-02 7.4250E-02 1.7150E-02

3.7810E-03 7.6300E+00 2.9920E-01 6.1180E-01 6.2660E-01 2.1750E-01 2.3730E-02

3.7330E-02 4.2310E-02 3.0120E-02 1.3580E-02 3.4190E-02 5.4590E-02 5.3950E-02

4.7120E-02 3.5950E-02 1.9760E-02 1.5940E-02 3.1990E-02 2.3900E-02 4.4850E-02

7.1020E-02 6.3650E-02 2.9940E-02 3.5460E-02 1.2850E-01 3.8510E-01 5.3910E-02

2.5240E-02 3.5860E-02 1.9400E-02 1.3420E-01 3.6250E-01 3.7380E-01 2.3230E-01

4.1940E-02 4.9680E-02 3.0500E-02 2.9820E-03 5.4270E-03 8.2120E-03 4.2010E-03

2.1980E-02 2.3700E-01 1.0620E+00 1.8850E-01 2.0700E-02 1.8480E-01 2.3960E+00

3.1680E-01 1.8980E-02 5.4500E-02 8.2170E-02 6.4930E-02 6.5760E-03 7.3360E-03

6.3540E-03 3.8270E-03 8.4300E-03 1.7810E-02 1.3610E-02 8.2560E-03 1.0610E-02

1.2160E-01 4.6790E-01 2.5340E-02 1.2280E-02 5.0170E-02 1.3870E-01 4.2800E-02

1.3430E-01 2.8060E+00 1.2150E+01 5.1040E-01 9.5470E-02 3.2570E+00 1.6130E+01

2.5000E+00 3.6610E-03 1.4570E+00 2.7130E+01 2.9850E+00 7.9080E-03 1.2260E-02

6.2330E-03 1.7730E-02 2.1210E-02 1.9370E-02 9.0200E-03 2.4390E-02 2.5660E-01

1.1040E+00 6.1230E-02 6.8460E-03 1.4900E-02 1.5230E-02 5.7740E-03 4.4820E-03

3.2400E-02 9.6940E-02 2.5650E-02 1.3750E-03 3.5230E-03 5.0630E-03 2.5660E-03

5.4740E-03 7.3890E-03 6.4700E-03 4.0070E-03 5.6530E-03 2.8080E-02 5.2720E-02

1.4320E-02 1.2160E-01 2.9990E-01 4.7470E-01 4.2570E-01 7.7370E-03 2.1690E-02

3.0380E-02 2.9880E-02 1.9030E-02 7.0080E-03 3.0290E-02 4.4720E-02 4.5970E-02

3.6320E-02 1.9710E-02 6.4850E-03 1.7090E-02 3.0240E-02 1.7540E-02 4.3500E-02

5.5330E-02 4.0630E-02 1.1790E-02 3.4790E-02 1.0350E-01 3.0330E-01 1.2680E-02

2.3590E-02 2.4140E-02 4.7650E-02 1.2860E-01 2.9540E-01 3.5760E-01 1.9260E-02

4.2450E-02 3.0270E-02 2.2360E-03 3.2710E-03 4.7810E-03 5.1480E-03 2.6410E-03

2.5690E-02 1.8840E-01 9.4240E-01 3.0640E-03 2.2700E-02 1.4940E-01 2.0330E+00

1.1140E-03 2.0850E-02 5.1680E-02 8.8230E-02 2.1730E-03 6.3990E-03 5.8010E-03

3.3520E-03 2.1790E-03 9.4360E-03 1.4480E-02 9.9880E-03 2.4880E-03 1.1200E-02

9.5810E-02 3.6210E-01 2.1610E-03 1.3330E-02 4.2800E-02 1.2370E-01 6.9860E-03

1.6670E-01 2.1580E+00 9.4570E+00 6.4950E-04 1.1450E-01 2.5030E+00 1.3880E+01

4.6590E-04 4.4160E-03 1.1230E+00 2.2680E+01 4.0540E-03 7.1170E-03 8.4480E-03

7.2700E-03 1.5150E-02 1.6010E-02 1.1850E-02 6.4970E-03 2.6150E-02 1.9900E-01

8.5580E-01 2.0650E-03 7.3550E-03 1.1980E-02 1.0090E-02 6.8140E-04 4.9390E-03

2.5640E-02 8.4370E-02 1.0320E-03 2.1970E-03 3.4800E-03 2.5720E-03 1.9390E-03

3.9770E-03 6.3370E-03 4.4140E-03 1.0120E-03 6.2360E-03 2.3220E-02 4.4880E-02

4.1710E+00 4.2580E-01 1.6550E-01 6.5190E-02 4.4380E-02 2.6820E-02 1.5140E-02

6.8830E-03 7.6090E-02 5.4510E-02 3.9330E-02 2.8480E-02 1.9260E-02 9.8830E-03

5.8350E-02 3.2510E-02 2.0220E-02 1.1450E+00 7.7410E-01 1.7960E-01 5.9900E-02

7.9900E-01 1.2960E-01 3.0080E-01 8.7540E-02 1.3030E+00 1.8700E-01 5.0940E-02

7.0280E-01 3.9660E-01 2.1190E-01 1.0620E-01 5.7730E-01 3.4480E-01 4.0780E-02

2.3000E-02 2.2710E-01 3.4570E-02 1.7970E-02 1.0390E-01 4.5220E-02 1.4360E-02

3.1310E-03 8.2970E-02 3.4090E-02 1.1660E-02 3.1480E-03 7.1900E-02 3.0510E-02

1.0660E-02 2.3530E-03 3.3580E-02 1.8160E-02 1.0190E-02 4.7900E-03 2.5690E+00

4.8040E-01 2.5840E-02 5.0900E-03 2.3010E+00 3.3730E-01 3.7800E-02 6.9760E-03

8.2920E-02 4.2830E-02 1.8290E-02 6.1950E-03 3.1440E+00 4.4460E-01 4.4630E-02

8.3000E-03 1.0390E-01 4.0220E-02 1.6020E-02 5.8710E-03 1.2000E-01 5.4290E-02

2.5180E-02 1.0610E-02 1.3940E+01 1.9780E-01 6.8690E-03 1.8580E+01 3.3980E+00

1.1430E-01 4.6840E-03 3.2850E+01 3.6330E+00 2.9190E-01 1.6650E-02 1.6030E-01

4.9560E-02 1.1590E-02 2.2240E-03 2.6400E-02 1.4520E-02 6.9270E-03 2.6790E-03

2.9150E-02 1.6270E-01 1.7970E-02 8.5110E-03 4.8990E-02 2.5910E-02 1.0150E-02

2.7020E-03 7.4890E-02 2.0290E-02 6.1380E-03 1.3210E-03 4.6220E+00 2.4920E-01

3.8910E-02 2.9230E-02 2.5900E-02 1.7400E-02 7.3310E-03 4.4310E-02 4.2320E-02

3.7290E-02 2.6430E-02 1.4670E-02 5.8690E-03 3.4390E-02 3.2050E-02 1.6920E-02

2.0630E-01 7.4040E-01 7.6760E-02 1.3080E-01 4.1580E-01 1.2500E-01 9.6320E-02

5.1590E-02 2.3460E-01 5.7920E-01 7.3410E-02 3.4420E-01 3.2150E-01 2.4420E-01

1.5430E-01 4.0120E-01 9.7660E-02 2.2070E-01 1.7250E-02 7.5290E-02 1.0420E-01

1.2050E-02 3.0550E-02 4.0470E-02 3.7230E-02 1.6700E-02 1.8020E-02 3.8680E-02

2.8440E-02 1.3120E-02 1.5760E-02 3.0510E-02 2.5760E-02 1.2670E-02 1.7410E-02

1.8630E-02 1.0190E-02 4.2790E-03 4.7480E-01 1.2680E+00 5.4170E-01 2.4210E-02

7.0660E-02 1.5230E+00 3.8840E-01 4.4240E-02 3.1860E-02 3.3530E-02 2.9140E-02

1.8980E-02 7.8520E-02 2.1090E+00 5.2470E-01 5.3170E-02 2.4880E-02 5.4330E-02

3.1710E-02 1.5860E-02 3.4700E-02 6.1760E-02 3.8620E-02 2.4920E-02 3.3230E+00

7.1490E+00 1.3860E-01 3.3890E+00 9.1540E+00 3.8600E+00 1.3690E-01 5.5800E-01

1.7410E+01 4.4130E+00 3.8820E-01 4.9420E-02 6.8190E-02 3.8680E-02 1.1170E-02

1.1320E-02 1.0130E-02 9.5560E-03 6.7150E-03 2.1860E-02 4.0380E-02 8.4680E-02

7.0420E-03 2.5860E-02 1.7990E-02 1.4420E-02 8.7750E-03 9.5680E-03 4.2690E-02

1.6120E-02 5.4050E-03 3.1630E+00 1.8980E-02 2.3610E-02 1.5710E-02 1.2760E-02

8.5090E-03 2.6670E-02 2.9760E-02 2.0980E-02 1.5830E-02 1.2760E-02 7.6880E-03

2.0650E-02 1.9710E-02 1.5120E-02 1.1670E-01 2.1930E-01 4.2550E-01 4.2990E-02

1.2010E-01 7.5470E-02 8.4300E-02 6.4190E-02 9.0090E-02 1.7940E-01 2.2140E-01

1.5760E-01 2.0270E-01 1.9480E-01 1.5510E-01 1.7820E-01 1.8840E-01 1.1400E-01

1.1500E-02 3.0310E-02 6.2550E-02 4.4560E-02 4.0990E-03 2.6290E-02 2.2820E-02

3.0420E-02 3.1460E-03 1.3630E-02 2.4540E-02 2.3860E-02 1.6400E-03 1.3300E-02

1.8900E-02 2.2380E-02 1.0100E-02 9.6580E-03 9.6760E-03 4.2850E-03 2.1890E-02

5.4050E-01 5.9880E-01 3.7980E-01 1.2560E-02 6.5710E-02 9.8210E-01 2.9640E-01

8.7130E-03 2.1150E-02 2.2080E-02 2.3470E-02 1.3350E-02 7.4840E-02 1.3630E+00

3.9990E-01 7.6670E-03 1.6300E-02 3.4270E-02 2.4720E-02 1.1640E-02 1.8120E-02

4.3050E-02 3.2140E-02 4.4690E-01 3.7390E+00 2.9030E+00 1.0840E-01 3.8580E+00

4.3450E+00 2.7200E+00 1.2920E-02 6.3050E-01 1.1130E+01 3.3830E+00 1.1600E-02

3.8660E-02 3.8320E-02 2.3940E-02 3.6290E-03 7.4060E-03 7.5400E-03 7.3950E-03

1.4580E-02 1.5700E-02 4.2470E-02 3.2320E-02 1.0130E-02 1.3740E-02 1.2850E-02

6.9260E-03 2.9130E-03 5.6960E-03 2.8200E-02 1.1860E-02 8.3140E-03 8.7010E-03

1.0880E-02 7.8340E-03 3.2160E-03 1.5430E-02 9.0130E-03 1.0880E-02 1.0480E-02

7.4220E-03 3.5790E-03 1.0060E-02 8.3170E-03 9.3290E-03 5.1050E-02 1.1520E-01

2.2150E-01 3.0580E-02 4.3070E-02 9.5890E-02 4.2580E-02 4.6640E-02 3.4680E-02

6.3150E-02 1.1040E-01 5.9890E-02 9.2410E-02 1.0950E-01 9.4340E-02 4.7460E-02

1.6950E-01 2.2350E-02 5.7500E-03 1.3350E-02 1.4290E-02 4.0460E-02 4.4400E-04

3.9260E-03 1.8240E-02 1.9200E-02 3.9960E-04 2.8390E-03 9.5330E-03 1.9580E-02

1.4250E-05 1.7760E-03 9.4940E-03 1.7330E-02 4.7720E-03 4.2570E-03 3.9540E-03

3.5050E-03 4.7260E-03 2.3510E-02 3.7930E-01 3.6380E-01 2.8350E-03 1.0640E-02

4.3480E-02 6.2010E-01 1.5040E-03 7.7760E-03 1.4140E-02 1.4310E-02 2.8570E-03

1.1550E-02 5.0420E-02 8.5990E-01 1.8660E-03 5.7800E-03 1.0620E-02 2.3760E-02

2.5160E-03 9.6890E-03 1.1940E-02 2.8660E-02 1.6610E-02 6.9470E-01 2.8300E+00

4.2280E-03 1.4130E-01 2.7200E+00 2.6410E+00 5.8390E-03 6.6460E-03 4.3760E-01

7.1030E+00 2.2180E-03 1.1160E-02 2.3940E-02 1.7950E-02 6.9770E-04 3.2360E-03

4.7500E-03 4.0310E-03 7.2880E-03 6.4090E-03 8.5070E-03 2.9280E-02 2.6060E-03

8.7690E-03 8.1120E-03 5.0960E-03 5.0370E-04 2.6920E-03 3.5810E-03 1.6710E-02

3.6220E+00 9.2750E-01 1.7000E-01 7.1360E-02 8.4110E+00 3.6620E+00 1.0400E+00

1.9950E-01 3.3130E-02 7.3820E-03 3.2400E+00 1.2550E+00 4.2320E-02 2.7370E+00

3.9590E-01 7.5600E-02 7.2170E-03 1.8540E+00 5.8080E-01 9.4890E-02 6.8840E-03

6.0990E-01 1.4360E-01 8.6200E-03 3.4810E-02 2.0320E-02 9.4090E-03 3.4220E-03

1.5880E-02 1.1970E-02 6.6460E-03 5.2700E-02 1.1480E-01 7.5600E-03 2.2770E-03

2.1870E-01 1.8720E-01 8.7570E-02 2.0160E-02 1.7390E-01 8.4940E-02 2.5270E-02

3.9450E-03 1.1330E-01 3.2990E-02 7.2370E-03 8.3260E-04 1.1860E-01 3.6900E-02

6.3930E-03 1.0270E-04 1.1060E-01 5.7200E-02 5.0390E-02 3.2760E-02 1.8620E-01

4.4800E-02 1.1310E-02 2.4380E-03 4.5540E-02 1.4880E-02 3.9900E-03 9.8170E-04

8.6700E-02 7.7680E-02 4.5850E-02 1.4940E-02 1.9540E-01 4.3720E-02 7.1380E-03

6.8420E-04 3.5830E-02 1.5260E-02 4.4210E-03 8.5560E-04 5.1460E-02 3.9880E-02

8.5810E-03 5.7050E-02 2.5990E-02 1.4590E-02 7.3120E-03 5.0060E-02 2.3870E-02

8.2940E-03 2.1760E-03 7.2640E-02 7.4950E-02 3.7750E-02 8.7620E-03 4.7970E-02

2.6820E-02 9.3170E-03 1.9480E-03 3.9460E-02 2.3390E-02 1.0770E-02 6.4540E-03

2.0660E-02 1.0590E-02 5.5260E-03 2.6720E-03 3.2230E-02 1.5970E-02 6.0520E-03

1.4610E-03 3.0490E+00 1.3160E+00 1.1140E-01 2.7670E+00 2.7700E+00 3.2540E+00

1.5760E+00 3.7120E-01 4.9930E-02 1.7690E+00 1.0150E+00 8.3640E-01 8.2650E-01

1.3920E+00 2.7910E-01 7.1010E-02 6.7100E-01 7.5120E-01 5.0270E-01 1.0240E-01

3.1750E-01 2.0950E-01 8.2700E-02 2.1170E-02 1.4560E-02 1.0670E-02 7.8230E-03

1.3930E-02 9.8890E-03 4.5180E-03 4.2160E-02 4.7080E-02 4.8870E-02 3.6790E-03

1.7960E-01 5.3560E-02 9.5580E-02 8.6420E-02 7.6970E-02 6.0490E-02 6.6490E-02

2.6590E-02 2.4730E-02 6.2560E-02 2.8680E-02 7.6530E-03 5.1470E-02 4.2440E-02

2.5960E-02 6.7640E-03 7.2300E-02 8.5840E-02 3.8040E-02 9.9020E-03 5.5170E-02

9.5050E-02 3.5120E-02 1.0500E-02 1.4630E-02 2.1450E-02 1.2100E-02 3.9590E-03

7.6830E-02 3.5370E-02 2.8970E-02 3.8940E-02 4.4060E-02 1.0440E-01 4.1380E-02

7.7520E-03 1.3690E-02 1.4450E-02 1.2240E-02 4.6220E-03 4.3180E-02 1.6820E-02

1.8410E-02 3.1830E-02 2.9570E-02 1.6970E-02 5.3930E-03 2.5490E-02 2.0530E-02

1.5670E-02 7.5350E-03 7.4960E-02 2.4640E-02 2.6840E-02 2.8850E-02 2.5990E-02

1.5150E-02 1.8380E-02 9.3340E-03 3.1570E-02 1.5580E-02 1.3040E-02 3.8730E-03

1.2450E-02 1.0020E-02 6.5670E-03 2.2450E-03 1.6940E-02 1.2440E-02 9.4720E-03

5.6500E-03 1.6460E+00 1.1070E+00 2.0270E-01 2.9150E+00 1.0650E+00 1.9820E+00

1.5480E+00 4.1320E-01 7.7490E-01 9.7380E-01 9.7190E-01 2.2810E-01 7.5110E-01

7.7710E-01 1.6800E-01 1.6880E-01 5.6470E-01 4.4020E-01 3.4600E-01 1.4530E-01

1.9470E-01 1.1730E-01 1.0840E-02 1.1180E-02 1.0960E-02 8.1910E-03 1.0930E-02

7.0250E-03 3.0180E-03 3.1630E-02 1.7240E-02 4.0210E-02 1.7210E-02 8.6110E-02

8.0920E-02 5.3430E-02 9.0440E-02 2.1240E-02 5.7510E-02 4.0870E-02 5.3290E-02

2.8200E-03 2.4320E-02 4.2120E-02 2.2940E-02 1.8410E-02 3.5320E-02 2.5500E-02

1.5930E-02 5.4500E-02 5.8050E-02 3.3280E-02 9.2030E-03 1.5580E-02 4.8320E-02

5.8510E-02 2.4420E-02 3.9660E-03 1.2340E-02 1.3850E-02 8.9700E-03 4.9060E-02

2.6770E-02 3.3780E-02 2.5400E-02 6.8470E-03 4.6290E-02 6.5960E-02 2.9110E-02

3.6150E-03 1.0790E-02 9.6830E-03 9.6590E-03 3.0810E-02 1.7440E-02 1.3150E-02

1.8940E-02 2.2150E-02 1.4190E-02 7.3580E-03 1.0490E-02 1.6020E-02 1.2630E-02

1.1490E-02 5.1290E-02 2.2030E-02 2.7810E-02 1.5430E-02 9.4840E-03 1.6480E-02

1.0770E-02 1.4910E-02 2.3680E-02 1.0930E-02 9.5250E-03 3.9310E-03 7.5500E-03

7.9540E-03 5.0380E-03 2.9590E-03 7.4110E-03 9.8340E-03 8.8690E-03 7.2940E-03

1.1010E+00 3.4320E-02 2.1860E-01 2.2180E+00 8.2000E-01 9.3530E-01 1.2140E+00

2.2040E-01 8.2040E-01 7.7070E-01 5.7170E-02 2.6860E-01 5.7840E-01 3.7750E-01

2.2780E-02 2.3860E-01 3.6250E-01 3.8710E-01 5.5030E-02 1.4140E-01 1.0840E-01

4.5950E-03 8.1290E-03 8.6050E-03 6.4200E-03 7.5860E-03 4.3310E-03 2.0720E-03

2.1080E-02 5.6360E-03 2.0830E-02 2.4240E-02 2.5950E-02 7.3320E-02 5.8060E-02

4.7710E-02 2.7930E-03 2.8140E-02 3.6430E-02 4.7900E-02 1.4640E-04 4.7640E-03

2.2910E-02 3.2850E-02 4.6920E-03 2.0200E-02 2.3470E-02 1.6220E-02 4.3650E-02

2.2710E-02 2.1590E-02 1.3530E-02 4.4170E-03 1.6670E-02 3.8930E-02 3.7860E-02

8.9500E-04 4.6100E-03 9.4590E-03 1.1700E-02 2.2220E-02 3.0520E-02 2.4920E-02

1.2390E-02 6.1010E-04 1.0420E-02 3.9610E-02 4.8170E-02 6.0120E-04 4.6900E-03

7.4700E-03 9.8120E-03 1.6530E-02 1.6600E-02 6.0750E-03 1.1590E-02 1.1880E-02

1.1060E-02 7.1880E-03 3.4860E-03 9.7540E-03 1.0740E-02 9.7830E-03 2.5420E-02

3.0030E-02 1.7600E-02 5.1790E-03 2.2930E-03 1.0090E-02 1.0530E-02 1.1530E-02

1.5790E-02 7.2860E-03 5.2190E-03 3.7260E-03 4.4860E-03 4.7430E-03 3.9540E-03

2.4830E-03 2.5040E-03 6.4340E-03 7.2040E-03 6.1300E-03 6.5020E-03 3.5740E-02

1.5710E-01 1.2530E+00 1.0080E+00 2.6420E-01 1.6920E-02 4.7740E-01 4.1460E-01

1.0770E-02 7.9920E-02 2.1300E-01 3.3670E-01 1.1610E-03 3.8820E-02 2.2520E-01

2.3940E-01 1.5440E-02 7.2920E-02 6.4070E-02 1.5160E-03 4.2040E-03 4.1290E-03

3.2740E-03 3.9000E-03 1.9200E-03 1.0490E-03 1.0540E-02 1.7780E-03 7.0860E-03

1.6800E-02 3.2380E-03 3.7410E-02 4.9550E-02 1.3640E-02 7.4310E-05 4.6920E-03

2.7430E-02 2.5460E-02 1.8860E-05 2.0140E-04 4.7910E-03 2.5250E-02 5.7720E-04

7.6570E-03 1.4460E-02 8.6790E-03 2.5000E-02 5.8250E-03 1.0040E-02 9.9170E-03

9.9710E-04 4.9630E-03 1.1990E-02 2.9470E-02 1.8750E-04 1.0800E-03 4.1030E-03

7.8640E-03 6.4310E-03 2.2600E-02 1.1260E-02 4.8090E-03 3.4490E-05 9.8860E-04

1.0580E-02 3.7790E-02 3.3620E-05 9.3470E-04 4.5350E-03 5.8620E-03 6.8200E-03

1.0710E-02 1.7770E-03 5.7950E-03 4.5660E-03 6.4170E-03 4.2880E-03 1.0800E-03

3.8650E-03 6.9380E-03 5.5240E-03 8.6270E-03 2.3130E-02 7.3230E-03 6.7110E-04

3.3240E-04 3.1840E-03 8.3810E-03 5.3170E-03 7.8940E-03 3.7240E-03 2.0740E-03

2.3240E-03 2.1500E-03 1.8950E-03 2.4030E-03 1.3170E-03 5.7230E-04 3.0350E-03

4.1840E-03 3.3480E-03 3.8950E+00 4.0430E-01 2.9840E-02 5.7420E-03 1.2170E-03

9.2880E+00 1.7260E-01 6.8010E-02 1.7350E+00 3.9620E-01 1.8280E-02 2.9060E-03

2.5220E+00 3.8500E-01 3.0800E-02 2.3960E-03 1.6310E+00 1.6810E-02 1.1740E-02

3.4320E-02 1.7040E-02 6.6040E-03 1.5990E-03 1.1230E-02 5.4300E-03 2.6120E-03

8.8670E-03 3.7870E-02 9.3820E-03 1.5600E-03 1.3710E-01 2.9950E-02 5.2330E-03

6.3670E-04 1.8110E-01 5.6380E-02 1.1460E-02 1.1350E-03 5.4690E-01 1.6960E-01

3.0650E-02 2.8710E-03 1.4540E-01 1.8590E-02 1.0460E-03 6.8710E-05 5.1010E-02

2.5320E-02 9.4000E-03 1.5050E-03 6.9540E-02 5.5740E-02 2.4940E-02 4.3080E-03

2.8310E-01 8.0130E-02 1.9150E-02 2.9330E-03 1.2110E-01 5.1750E-02 1.4800E-02

1.8260E-03 1.1670E-01 7.6190E-02 2.5230E-02 3.5360E-03 4.1190E-01 1.0550E-01

2.2070E-02 2.3340E-03 3.9550E-02 3.9830E-02 3.4180E-02 6.6680E-02 4.5440E-02

1.9760E-02 3.3720E-03 2.0400E-01 5.0940E-02 7.5160E-03 1.3430E-03 4.2530E-02

1.4880E-02 5.8600E-03 1.2660E-03 9.1760E-02 3.8410E-02 9.7090E-03 1.8130E-03

4.4830E-02 4.4630E-02 2.0010E-02 6.8600E-04 7.2350E-02 3.0110E-02 6.5560E-03

6.4230E-04 7.1110E-02 4.5320E-02 1.2800E-02 1.4500E-03 4.7430E+00 6.9600E-01

4.5670E-02 7.1380E-03 3.7770E+00 4.0760E+00 9.6770E-02 8.1380E-01 6.4740E-01

3.1900E-01 1.3850E-02 1.3470E+00 2.5840E+00 3.3690E-01 2.8560E-02 7.7060E-01

6.0580E-01 6.3730E-03 2.0650E-02 1.3650E-02 9.4490E-03 5.1280E-03 8.2130E-03

5.5610E-03 2.2820E-03 7.3900E-03 2.1510E-02 1.3350E-02 4.4890E-03 4.7680E-02

6.7370E-02 2.4700E-02 4.8350E-03 6.8390E-02 7.0520E-02 4.5920E-02 1.0760E-02

1.9690E-01 2.5190E-01 1.4720E-01 2.8890E-02 5.8010E-02 6.4190E-02 1.4540E-02

8.5690E-04 3.3430E-02 2.0930E-02 1.1210E-02 7.1120E-03 5.7140E-02 2.3030E-02

2.4810E-02 2.1650E-02 1.1130E-01 1.3470E-01 5.7430E-02 1.7540E-02 6.6680E-02

4.4630E-02 3.2210E-02 1.3280E-02 8.0410E-02 3.3850E-02 4.7570E-02 2.3100E-02

1.3490E-01 1.7820E-01 8.5280E-02 2.0680E-02 3.9490E-02 3.9890E-02 1.3880E-02

5.2380E-02 2.7540E-02 1.8050E-02 1.4690E-02 8.4250E-02 8.8900E-02 4.0350E-02

6.4990E-03 2.3560E-02 1.8860E-02 7.2520E-03 4.0760E-03 4.6010E-02 3.4980E-02

2.8030E-02 8.8080E-03 3.7360E-02 3.1800E-02 1.2510E-02 1.0060E-02 4.3420E-02

2.4640E-02 1.7950E-02 5.3700E-03 5.0430E-02 1.8840E-02 2.8030E-02 1.1600E-02

4.2010E+00 7.5830E-01 4.2920E-02 1.2910E+00 3.7850E+00 1.3050E+00 3.2630E-01

5.9650E-01 3.5230E-01 1.5960E-01 3.0090E-01 1.5400E+00 1.4050E+00 1.9100E-01

3.2860E-01 6.1260E-01 1.6540E-01 1.1290E-02 1.1430E-02 9.8060E-03 7.2370E-03

6.1020E-03 4.6970E-03 2.2480E-03 5.9120E-03 1.2360E-02 1.3000E-02 6.2480E-03

1.3720E-02 4.4050E-02 4.1640E-02 1.5680E-02 2.2150E-02 6.1130E-02 5.0490E-02

3.0870E-02 5.4590E-02 1.7740E-01 1.7190E-01 9.5980E-02 2.0290E-02 5.0290E-02

3.2130E-02 7.4400E-03 2.0510E-02 1.6250E-02 1.4710E-02 7.2350E-03 3.7290E-02

2.1180E-02 2.0180E-02 2.2980E-02 4.0280E-02 9.0940E-02 8.5800E-02 4.0940E-02

3.1820E-02 3.9630E-02 3.1640E-02 2.3290E-02 4.1010E-02 3.9700E-02 2.9040E-02

3.8090E-02 4.1160E-02 1.1940E-01 1.1700E-01 5.7700E-02 3.9880E-02 2.8400E-02

6.7970E-03 3.5800E-02 2.0680E-02 2.1110E-02 1.2570E-02 3.0260E-02 6.8750E-02

5.3100E-02 2.4330E-02 1.2930E-02 1.4450E-02 1.1130E-02 4.4020E-03 1.9070E-02

3.1050E-02 2.4500E-02 1.9650E-02 2.9890E-02 2.0040E-02 1.2420E-02 1.1070E-02

2.2750E-02 2.3480E-02 1.6470E-02 1.0440E-02 2.6810E-02 2.3470E-02 1.6410E-02

2.0410E-02 3.1380E+00 5.8200E-01 3.5240E-01 2.1910E+00 2.2560E+00 1.0640E-01

3.8520E-01 3.4250E-01 2.3610E-01 5.0950E-02 5.2430E-01 1.3140E+00 6.7690E-01

1.2390E-01 4.1320E-01 2.9280E-01 4.9520E-03 8.5840E-03 8.7320E-03 7.0760E-03

4.2440E-03 3.4900E-03 1.9170E-03 4.4330E-03 6.7570E-03 1.0500E-02 6.9410E-03

3.3460E-03 1.9260E-02 3.5930E-02 2.7990E-02 5.1430E-03 2.9710E-02 4.1170E-02

4.4950E-02 9.0780E-03 8.4180E-02 1.3670E-01 1.4500E-01 5.9540E-03 2.6920E-02

3.3350E-02 1.6390E-02 1.0840E-02 1.3430E-02 1.3520E-02 6.2450E-03 1.9090E-02

2.2210E-02 1.8130E-02 1.5910E-02 1.1980E-02 4.5170E-02 7.4540E-02 6.0760E-02

1.2820E-02 2.8580E-02 2.7590E-02 2.5290E-02 1.5820E-02 3.5800E-02 2.4870E-02

3.4390E-02 9.8200E-03 5.5130E-02 9.7030E-02 8.9610E-02 3.6180E-02 1.5510E-02

4.7730E-03 2.0860E-02 1.9780E-02 1.8410E-02 8.5740E-03 8.4050E-03 3.7650E-02

4.7700E-02 3.7770E-02 6.7390E-03 9.8440E-03 1.0590E-02 4.9950E-03 6.2820E-03

2.0680E-02 2.0660E-02 2.3080E-02 2.2420E-02 1.0980E-02 1.3140E-02 8.5680E-03

1.0210E-02 1.8990E-02 1.5000E-02 1.0650E-02 1.1070E-02 2.2410E-02 1.3920E-02

1.7940E-02 2.0470E+00 8.2300E-02 8.0890E-01 2.3140E+00 2.6860E-02 1.7820E-01

2.9440E-01 2.1390E-01 7.4690E-03 1.0590E-01 6.3250E-01 9.6340E-01 4.0400E-02

2.1030E-01 3.0260E-01 2.1870E-03 5.6580E-03 6.5630E-03 5.0780E-03 2.7440E-03

2.3720E-03 1.4580E-03 2.9560E-03 3.3830E-03 6.7100E-03 5.7500E-03 6.6490E-04

5.8200E-03 1.9920E-02 3.1170E-02 6.3190E-04 1.0230E-02 2.9240E-02 4.2490E-02

3.8350E-05 2.3230E-02 8.2980E-02 1.4360E-01 1.3650E-03 1.0620E-02 2.3430E-02

1.9670E-02 4.8930E-03 1.0230E-02 8.8320E-03 5.0410E-03 7.2850E-03 1.9500E-02

1.5570E-02 7.8690E-03 3.0160E-03 1.7400E-02 4.4510E-02 6.2440E-02 4.0050E-03

1.6620E-02 2.2570E-02 2.0140E-02 4.1730E-03 2.1670E-02 2.6770E-02 2.1310E-02

1.4750E-03 1.8030E-02 6.2350E-02 9.1890E-02 2.7520E-02 6.3050E-03 3.8830E-03

1.0030E-02 1.7730E-02 1.1940E-02 5.3930E-03 2.2210E-03 1.4770E-02 3.2980E-02

3.8030E-02 3.2540E-03 6.3340E-03 7.1120E-03 4.8430E-03 2.0560E-03 9.5960E-03

1.6970E-02 1.9000E-02 1.4940E-02 5.0670E-03 1.1400E-02 5.2830E-03 3.7770E-03

1.2260E-02 1.2930E-02 7.5910E-03 3.3330E-03 1.4470E-02 1.5560E-02 1.0200E-02

2.3730E-02 1.4010E-01 1.4410E+00 4.8120E-03 5.3660E-02 1.7540E-01 1.2270E-01

9.9220E-04 1.5180E-02 1.3630E-01 7.0130E-01 1.0770E-02 7.6970E-02 1.8890E-01

6.6640E-04 2.5030E-03 3.5270E-03 2.7820E-03 1.3350E-03 1.0960E-03 7.9090E-04

1.4780E-03 1.3300E-03 3.5660E-03 2.1110E-03 1.0210E-04 1.2510E-03 6.8770E-03

2.0330E-02 7.4910E-06 1.5340E-03 1.3470E-02 2.3800E-02 4.1950E-06 7.6490E-05

3.6220E-02 8.8510E-02 2.3250E-04 2.8790E-03 1.1110E-02 1.3330E-02 1.6920E-03

5.6740E-03 3.7990E-03 2.8650E-03 1.7950E-03 1.1290E-02 9.4200E-03 2.5970E-03

4.5630E-04 5.9310E-03 1.7910E-02 3.9650E-02 7.6090E-04 7.0170E-03 1.2900E-02

1.0480E-02 4.9750E-04 8.5080E-03 1.9010E-02 9.0500E-03 1.5590E-05 3.5880E-03

2.2260E-02 5.7970E-02 1.4880E-02 1.5680E-03 2.3440E-03 3.6190E-03 1.0830E-02

5.4000E-03 2.6910E-03 5.5940E-04 3.3830E-03 1.6180E-02 2.3650E-02 1.2150E-03

3.2130E-03 3.2630E-03 3.3230E-03 2.3640E-04 2.7600E-03 1.0110E-02 1.0410E-02

7.4710E-03 1.7930E-03 6.6800E-03 2.4050E-03 1.0470E-03 5.6930E-03 7.8540E-03

3.6880E-03 6.0400E-04 6.1500E-03 1.1290E-02 3.7370E-03 1.0620E+00 2.4260E-01

7.3180E-01 3.1580E-01 1.0210E-01 1.9270E-02 2.0360E+00 6.7690E-01 1.7920E-01

4.4040E-02 2.1330E+00 1.0200E-01 2.8190E-02 2.1620E-02 1.4310E-02 7.6000E-03

3.0820E-03 1.2420E-02 1.0640E-02 5.2590E-03 3.5830E-02 7.4130E-02 5.1180E-02

2.6540E-02 1.8470E-01 1.0160E-01 4.6950E-02 1.4680E-02 2.2910E-01 9.4480E-02

3.0780E-02 6.3190E-03 1.2020E-03 1.2140E-03 8.5370E-04 3.5380E-04 2.0610E-02

8.8370E-03 3.2250E-03 8.4700E-04 7.7580E-02 2.2580E-02 5.9170E-03 1.5100E-03

3.9240E-02 3.5540E-02 3.1980E-02 2.4860E-02 8.3710E-02 7.6790E-02 4.6720E-02

1.7450E-02 1.3570E-01 5.9670E-02 2.7680E-02 1.0940E-02 8.1040E-02 5.9190E-02

3.2620E-02 1.1560E-02 7.7710E-03 3.5530E-03 1.4060E-03 3.6720E-04 6.2500E-02

2.9550E-02 1.1600E-02 1.2410E-01 7.2600E-02 2.7150E-02 4.8940E-03 4.1140E-02

4.4180E-02 4.6400E-02 3.9760E-02 1.5380E-02 6.0990E-03 2.2440E-03 7.2870E-04

1.2400E-02 9.4040E-03 5.7440E-03 3.6010E-03 2.3100E-02 3.0310E-02 3.2160E-02

2.0130E-02 4.0990E-02 4.8490E-02 4.0350E-02 2.2430E-02 6.4460E-02 5.3860E-02

3.4040E-02 1.6930E-02 8.6570E-01 2.6840E-01 2.7580E-01 2.1350E-01 1.1430E-01

2.7770E-01 1.0180E+00 6.8100E-01 2.2240E-01 3.5230E-01 1.2840E+00 6.1050E-02

1.2290E-02 7.7080E-03 7.7350E-03 7.3130E-03 1.1540E-02 5.7090E-03 3.9920E-03

2.6880E-02 5.7130E-02 3.9760E-02 1.7460E-02 6.6590E-02 7.0390E-02 6.6930E-02

5.7070E-02 2.7740E-02 1.0790E-01 9.1730E-02 4.3180E-02 1.0500E-03 2.5830E-04

5.7610E-04 9.3430E-04 7.5040E-03 7.2010E-03 6.2090E-03 2.8750E-03 1.5460E-02

3.9510E-02 2.0880E-02 5.6020E-03 3.4910E-02 3.3040E-02 2.0940E-02 9.6990E-03

7.2440E-02 1.4890E-02 2.8490E-02 5.2660E-02 3.7620E-02 7.8630E-02 4.8290E-02

2.2160E-02 4.9310E-02 2.3520E-02 2.8490E-02 3.7730E-02 1.4000E-03 3.6530E-03

3.1470E-03 1.7200E-03 3.8020E-02 2.8030E-02 1.4260E-02 6.8500E-02 3.0020E-02

3.9900E-02 3.1000E-02 4.5490E-02 4.8590E-02 2.6990E-02 7.6160E-03 5.0120E-03

7.0830E-03 4.4630E-03 1.7850E-03 8.0220E-03 4.3390E-03 4.7410E-03 5.6060E-03

1.7330E-02 3.4030E-02 1.9910E-02 8.0110E-03 5.2050E-02 3.2630E-02 1.9860E-02

9.6150E-03 5.1360E-02 2.3170E-02 2.5280E-02 2.7250E-02 5.1220E-02 1.9440E-01

2.0740E-01 1.2770E-01 4.5740E-02 1.9270E-01 5.5090E-01 6.7390E-01 6.0740E-02

3.1140E-01 7.5940E-01 3.5430E-03 8.0430E-03 6.6800E-03 4.6750E-03 7.9000E-03

4.8980E-03 1.2990E-03 1.7920E-02 3.9080E-02 2.3480E-02 1.2260E-02 9.4350E-03

4.5250E-02 6.0210E-02 5.8900E-02 1.3360E-03 1.8980E-02 6.1970E-02 9.8070E-02

2.0710E-04 6.9080E-04 6.3360E-04 2.5840E-04 2.0690E-03 5.1160E-03 5.8640E-03

3.1890E-03 3.4860E-03 1.0720E-02 2.1750E-02 1.7440E-02 3.1640E-02 1.5940E-02

1.0470E-02 7.5560E-03 1.2350E-02 4.8740E-02 3.7110E-02 1.4130E-02 1.3150E-02

2.3250E-02 3.8300E-02 4.0590E-02 7.9520E-03 3.3280E-02 3.1100E-02 1.9870E-02

1.5590E-04 8.8440E-04 2.2010E-03 3.1850E-03 1.8680E-02 2.1420E-02 1.2920E-02

1.3270E-02 4.9640E-02 3.5910E-02 1.5590E-02 5.1090E-02 1.7610E-02 9.2550E-03

8.6810E-03 1.6140E-03 3.3260E-03 4.3000E-03 2.9900E-03 2.1780E-03 5.1830E-03

4.6530E-03 3.0230E-03 1.1550E-02 2.8590E-02 9.8760E-03 2.8380E-03 4.4050E-02

2.1670E-02 8.3040E-03 2.1760E-03 2.0220E-02 3.1880E-02 2.2290E-02 1.0290E-02

1.7740E+00 3.4640E-01 4.9770E-02 6.4720E+00 2.3430E+00 4.9710E-01 8.3030E-02

2.0700E+00 9.0960E-01 4.1930E-02 2.2400E-01 1.7260E-01 6.5770E-02 2.3490E-02

6.1170E-02 2.2440E-02 8.1440E-03 5.1920E-02 1.0380E-01 3.7520E-02 5.3960E-03

1.6270E-01 6.8930E-02 2.5860E-02 6.6460E-03 6.5740E-02 3.4590E-02 1.4690E-02

3.8750E-03 5.9830E-02 2.2150E-02 6.5650E-03 1.6670E-03 2.6670E-01 7.7240E-02

1.5100E-02 1.6580E-03 1.8810E-01 4.8090E-02 1.9210E-02 8.2370E-03 1.8830E-01

6.4120E-02 1.9150E-02 4.7320E-03 9.4980E-02 3.4590E-02 1.0560E-02 2.6940E-03

1.7530E-01 6.3240E-02 2.0110E-02 5.8060E-03 6.6550E-02 2.6710E-02 8.2340E-03

1.7070E-03 3.5470E-02 1.5920E-02 5.3150E-03 1.1180E-03 5.8910E-02 2.6420E-02

2.3080E-03 6.0680E-02 2.8190E-02 1.3330E-02 4.8360E-03 4.2690E-02 1.6750E-02

6.2570E-03 1.9390E-03 3.0790E-02 1.9510E-02 9.1420E-03 2.4380E-03 1.6280E-02

7.5750E-03 2.4700E-03 9.0740E-04 1.2830E-02 8.7450E-03 4.5460E-03 1.4720E-03

1.2290E-02 5.9460E-03 3.3230E-03 1.4030E-03 1.4970E-02 6.2530E-03 2.0460E-03

4.5540E-04 1.4760E+00 3.6090E-01 1.7540E+00 2.5170E+00 2.2300E+00 5.8530E-01

1.1760E+00 4.5880E-01 6.3130E-01 1.0070E-01 6.0410E-02 4.4130E-02 6.0780E-02

3.1670E-02 2.7350E-02 1.0330E-02 3.8900E-02 5.2810E-02 3.3470E-02 2.3850E-02

4.7240E-02 7.2890E-02 5.1040E-02 2.8900E-02 2.3670E-02 2.5260E-02 2.3540E-02

1.6550E-02 8.6280E-03 3.0050E-02 2.1450E-02 7.9570E-03 7.6460E-02 1.1130E-01

6.2340E-02 1.6660E-02 4.7840E-02 1.0450E-01 3.3800E-02 9.7990E-03 4.6470E-02

8.8490E-02 5.2450E-02 2.0490E-02 1.9730E-02 4.9440E-02 2.9680E-02 1.1870E-02

4.6720E-02 8.2460E-02 5.0240E-02 2.0430E-02 1.5810E-02 2.9210E-02 2.2520E-02

9.7090E-03 9.5420E-03 1.4200E-02 1.3550E-02 6.1820E-03 3.4840E-02 1.2840E-02

1.8120E-02 2.8170E-02 2.9820E-02 1.5070E-02 8.6880E-03 1.3030E-02 1.9490E-02

1.2320E-02 6.5110E-03 1.9510E-02 1.1120E-02 8.3430E-03 6.9370E-03 5.2600E-03

6.6530E-03 5.9620E-03 2.8390E-03 9.6230E-03 5.5470E-03 3.2540E-03 2.2710E-03

5.9460E-03 5.6210E-03 3.6140E-03 1.7620E-03 4.9610E-03 6.0050E-03 4.5870E-03

2.2490E-03 9.5510E-01 1.2900E-01 1.7760E+00 1.1200E+00 1.7100E+00 4.3710E-01

6.5150E-01 4.2730E-01 3.4850E-02 8.6620E-02 3.8340E-02 2.8910E-02 1.5530E-02

1.8460E-02 1.1140E-02 2.5920E-02 2.1160E-02 3.1490E-02 2.0970E-02 1.0840E-02

3.0730E-02 4.9650E-02 4.1740E-02 5.0200E-03 1.5640E-02 1.7950E-02 2.0670E-02

5.7880E-04 7.7800E-03 1.8870E-02 1.7660E-02 1.4840E-02 6.2170E-02 6.1220E-02

4.0080E-02 1.9130E-02 3.5260E-02 5.7590E-02 1.8630E-02 9.9420E-03 3.6050E-02

5.3990E-02 3.9450E-02 3.1020E-03 1.5800E-02 3.0300E-02 2.3660E-02 1.1040E-02

3.5480E-02 4.9500E-02 3.7340E-02 2.2720E-03 1.2790E-02 1.6860E-02 1.8350E-02

5.9510E-04 8.4200E-03 7.8700E-03 1.1400E-02 1.3720E-02 1.8460E-02 1.2000E-02

1.3320E-02 1.5070E-02 1.8160E-02 6.9750E-03 3.8500E-03 8.6200E-03 1.2050E-02

8.7740E-03 9.1420E-03 8.3410E-03 9.7330E-03 3.4760E-03 1.0920E-03 4.1530E-03

3.8230E-03 4.6840E-03 6.4160E-03 2.9570E-03 2.7870E-03 1.6380E-03 3.3220E-03

3.6130E-03 2.9080E-03 1.7770E-03 1.1060E-03 3.5910E-03 3.7120E-03 3.4620E-03

3.1420E-02 1.0460E-01 1.2230E+00 1.0090E+00 8.2040E-02 5.1480E-01 1.6220E-01

1.2050E-02 2.5150E-02 1.9890E-02 1.9280E-02 6.4300E-03 8.4660E-03 7.7770E-03

1.2950E-02 5.7530E-03 1.9580E-02 1.0600E-02 9.0500E-04 1.1110E-02 2.1130E-02

3.2940E-02 7.0590E-05 5.4020E-03 1.1300E-02 1.2810E-02 8.8680E-05 8.5850E-04

5.5120E-03 1.6880E-02 1.6580E-03 1.6470E-02 4.0010E-02 3.0780E-02 8.2370E-03

9.7060E-03 1.8700E-02 2.8140E-02 1.8440E-03 8.8980E-03 2.3820E-02 3.4220E-02

6.3090E-04 2.6420E-03 1.0690E-02 2.2530E-02 2.5080E-03 9.3400E-03 2.3270E-02

3.1730E-02 1.9560E-04 2.3210E-03 8.7370E-03 1.3420E-02 7.9810E-05 5.5310E-04

5.8920E-03 7.5010E-03 3.0860E-03 1.4550E-02 4.1420E-03 4.8360E-03 8.6850E-03

6.9720E-03 6.5680E-03 8.3520E-04 3.2850E-03 5.7550E-03 7.4060E-03 2.4380E-03

6.9370E-03 3.4760E-03 2.1830E-03 3.2620E-04 8.2620E-04 2.7840E-03 3.0940E-03

3.2080E-03 1.2040E-03 1.7170E-03 7.7010E-04 1.4030E-03 1.7620E-03 1.7770E-03

1.1140E-03 1.2670E-04 1.1070E-03 2.3770E-03 2.3150E-03 2.3850E+00 3.0180E-01

3.5490E-02 7.6940E+00 3.0580E-01 1.4460E-01 2.6120E-01 1.2510E-01 4.4000E-02

1.9190E-02 4.2770E-02 2.0380E-02 4.6800E-03 3.6070E-03 3.2730E-02 6.7700E-03

1.6840E-03 9.2470E-02 3.6480E-02 1.2340E-02 2.3080E-03 5.8890E-02 2.5610E-02

1.0820E-02 2.6050E-03 7.1390E-02 2.9480E-02 9.8950E-03 1.7250E-03 1.4240E-01

4.4760E-02 6.2820E-03 9.6130E-04 1.4080E-01 5.0070E-02 1.1090E-02 1.8050E-03

4.2560E-02 1.8020E-02 7.3200E-03 2.1540E-03 8.0760E-02 3.1540E-02 1.0060E-02

1.7850E-03 1.9790E-01 5.3080E-02 1.4020E-02 2.0440E-03 9.0110E-02 2.6070E-02

6.9820E-03 1.3990E-03 1.7870E-01 5.6400E-02 1.5630E-02 2.9960E-03 9.0300E-02

2.3510E-02 1.3390E-02 3.9400E-02 2.0610E-02 7.6770E-03 1.6120E-03 5.7430E-02

2.0310E-02 6.5050E-03 1.7650E-03 1.6980E-02 6.9700E-03 2.2000E-03 4.2710E-04

2.2320E-02 1.0760E-02 3.5790E-03 9.4650E-04 1.7840E-02 1.8110E-02 6.2810E-03

2.3390E-03 2.0290E-02 9.9160E-03 3.4790E-03 6.2820E-04 2.5090E-02 1.2470E-02

5.6010E-03 2.0380E-03 2.4880E+00 3.4730E-01 2.6620E+00 3.6920E+00 1.2740E-01

8.4290E-02 1.7860E-01 1.0950E-01 3.5910E-02 2.8640E-02 1.4850E-02 1.1200E-02

2.8850E-03 1.5320E-02 1.4260E-02 3.5340E-03 3.2430E-02 4.3050E-02 2.7060E-02

1.3620E-02 2.0290E-02 2.9660E-02 1.6910E-02 1.1760E-02 2.0920E-02 3.4130E-02

2.4000E-02 1.1320E-02 5.6690E-02 5.1620E-02 4.0010E-02 5.7760E-03 6.1190E-02

5.5250E-02 3.6480E-02 1.0450E-02 1.8000E-02 1.9910E-02 1.1190E-02 6.7420E-03

2.6750E-02 3.6440E-02 2.6060E-02 1.0650E-02 5.2990E-02 1.0440E-01 4.0950E-02

1.5480E-02 2.0630E-02 4.9320E-02 2.2590E-02 7.6990E-03 3.9650E-02 8.5670E-02

5.0780E-02 1.7550E-02 4.5460E-02 4.8680E-02 8.2420E-03 2.3350E-02 1.4920E-02

1.0530E-02 6.6340E-03 2.0310E-02 2.7120E-02 1.5380E-02 6.2650E-03 8.3120E-03

6.5660E-03 4.1280E-03 1.9570E-03 9.4200E-03 9.0840E-03 8.0450E-03 3.7800E-03

1.4270E-02 1.0220E-02 8.2350E-03 2.8340E-03 1.1390E-02 7.5140E-03 5.2870E-03

3.1210E-03 1.2460E-02 1.0340E-02 6.7300E-03 5.1040E-03 1.9230E+00 7.8720E-01

2.6390E+00 1.4480E+00 4.0340E-02 6.3880E-02 1.3730E-01 8.1660E-02 1.6190E-02

1.4940E-02 9.6890E-03 2.1640E-03 6.8310E-03 1.1280E-02 6.6500E-03 8.6570E-03

2.2020E-02 3.0950E-02 2.3690E-02 7.1270E-03 1.2150E-02 2.3700E-02 1.6130E-02

4.2930E-03 1.6490E-02 2.4740E-02 2.2030E-02 1.5300E-02 4.8790E-02 2.5340E-02

2.7120E-02 2.0680E-02 4.5240E-02 3.2690E-02 2.3790E-02 7.3180E-03 1.1170E-02

1.4660E-02 8.9480E-03 6.9810E-03 2.1890E-02 2.3970E-02 2.1770E-02 1.4000E-02

4.0880E-02 7.2470E-02 3.2880E-02 4.6610E-03 1.7060E-02 3.4490E-02 1.8870E-02

7.4150E-03 3.4610E-02 6.0280E-02 4.3760E-02 2.6380E-02 3.3410E-02 1.6760E-02

1.0910E-02 1.2230E-02 1.1930E-02 6.1280E-03 6.5050E-03 1.5380E-02 1.7910E-02

1.1900E-02 3.4270E-03 5.0740E-03 4.6390E-03 2.5560E-03 2.6140E-03 6.9640E-03

6.3560E-03 6.9430E-03 1.0710E-02 5.8920E-03 6.5150E-03 3.6760E-03 5.1670E-03

6.5460E-03 5.7650E-03 3.1910E-03 5.5990E-03 6.7260E-03 7.8140E-03 5.1430E-03

2.3400E-01 9.3550E-01 2.0660E+00 1.8440E-02 3.4720E-02 5.5990E-02 3.5620E-02

7.6750E-03 1.3310E-02 6.0390E-03 1.4420E-03 2.7950E-03 6.3200E-03 7.3190E-03

1.1400E-03 9.4030E-03 1.9160E-02 2.7340E-02 8.5390E-04 7.6420E-03 1.1210E-02

1.9670E-02 1.6170E-04 4.8890E-03 1.4290E-02 2.5780E-02 3.0270E-03 1.7350E-02

3.7150E-02 2.0200E-02 5.1960E-03 2.1810E-02 3.3700E-02 2.0860E-02 2.1540E-03

6.7410E-03 8.7310E-03 9.8610E-03 9.4060E-04 7.0430E-03 1.8100E-02 2.4160E-02

2.0440E-03 1.5480E-02 3.2850E-02 5.5820E-02 7.7710E-04 4.9580E-03 1.3860E-02

3.0310E-02 1.0670E-03 7.9280E-03 2.8210E-02 6.0580E-02 1.5800E-02 1.3880E-02

2.0870E-02 3.7670E-03 1.0370E-02 8.4730E-03 4.8160E-03 1.7660E-03 6.2650E-03

1.1900E-02 1.4400E-02 1.0460E-03 3.3870E-03 3.6640E-03 2.1970E-03 5.6140E-04

2.6640E-03 5.7760E-03 5.8480E-03 7.1370E-03 3.1720E-03 3.9360E-03 3.5430E-03

1.6240E-03 5.0420E-03 4.6410E-03 2.5340E-03 2.0380E-03 5.1030E-03 5.1420E-03

4.8580E-03 3.0880E-01 7.7540E-02 6.4720E-02 3.7900E-02 2.0970E-02 1.1010E-02

1.4430E-01 7.1850E-02 1.0450E-02 1.5540E-02 2.9830E-02 1.3400E-02 6.5220E-03

2.3160E-02 1.4100E-02 7.5080E-03 3.0610E-03 1.2180E-02 7.0660E-03 4.2010E-03

1.4900E-03 4.0440E-03 2.7860E-03 1.6890E-03 5.1900E-04 3.9260E-02 1.9490E-02

8.2350E-03 2.6190E-03 6.5380E-02 4.1490E-02 1.7320E-02 3.6850E-03 1.9310E-02

1.5970E-02 1.1260E-02 7.2220E-03 3.4860E-02 2.3550E-02 1.3280E-02 5.6250E-03

1.0900E-01 4.2660E-02 1.4830E-02 5.0770E-03 2.9190E-02 1.9630E-02 1.1890E-02

6.8440E-03 8.3090E-03 4.0640E-03 1.7960E-03 5.6640E-04 1.2610E-01 2.5870E-02

7.5510E-03 8.6750E-02 3.4060E-02 1.2050E-02 3.8000E-03 9.0140E-02 4.4250E-02

2.2330E-02 1.1360E-02 3.5310E-02 1.7710E-02 6.8250E-03 1.4350E-03 8.3690E-03

6.3260E-03 4.0000E-03 2.0950E-03 2.8210E-02 2.2510E-02 1.2170E-02 6.9980E-03

1.2630E-02 1.0500E-02 7.1750E-03 3.4200E-03 1.3320E-02 8.8020E-03 5.1610E-03

2.6270E-03 1.9320E-01 2.3880E-02 2.7370E-02 2.3090E-02 1.5480E-02 7.0440E-02

2.6460E-02 5.3680E-02 1.0360E-02 1.3370E-02 1.4200E-02 5.0130E-03 8.1210E-03

1.0160E-02 8.2740E-03 8.1580E-03 2.8160E-03 4.5240E-03 4.6620E-03 4.0730E-03

1.4750E-03 6.1470E-04 1.5440E-03 1.7790E-03 1.3530E-02 1.3990E-02 1.1830E-02

6.7980E-03 3.4230E-02 1.1860E-02 2.0850E-02 1.7750E-02 1.2920E-02 1.0170E-02

7.7910E-03 5.0430E-03 1.5550E-02 9.8070E-03 1.1830E-02 1.4290E-02 1.0080E-02

5.0910E-02 3.7990E-02 1.5760E-02 1.2480E-02 1.1570E-02 1.1080E-02 1.0020E-02

8.6030E-04 3.4420E-03 3.2960E-03 2.1610E-03 2.5870E-02 6.4770E-02 1.5550E-02

1.8060E-02 3.7770E-02 2.5010E-02 9.9860E-03 2.0680E-02 4.3950E-02 3.2650E-02

1.5770E-02 1.3380E-02 7.4500E-03 1.0930E-02 7.4030E-03 4.6360E-03 2.6390E-03

3.0070E-03 3.5700E-03 1.8810E-02 1.2170E-02 1.3870E-02 2.9750E-03 9.7210E-03

6.0940E-03 4.3450E-03 2.4290E-03 6.0520E-03 5.0170E-03 4.7010E-03 4.4200E-03

7.7700E-03 1.1650E-02 1.3530E-02 1.1990E-02 1.0420E-02 5.3090E-02 1.1630E-02

5.1790E-03 6.4920E-03 5.0120E-03 5.0400E-03 7.4580E-04 4.5930E-03 5.5490E-03

6.5120E-03 1.0380E-04 1.6840E-03 2.7990E-03 3.2540E-03 1.2060E-04 8.4640E-04

1.0820E-03 9.6510E-04 2.7740E-03 8.2400E-03 7.8610E-03 4.6900E-03 2.3770E-03

2.2450E-02 1.3180E-02 3.6170E-03 6.2830E-03 5.1840E-03 3.8510E-03 2.3950E-03

1.1830E-03 9.3030E-03 9.1520E-03 5.8870E-03 2.9760E-03 5.1350E-03 2.1190E-02

2.7330E-02 3.2520E-03 6.4110E-03 6.8890E-03 5.7620E-03 5.8940E-05 5.0250E-04

1.6630E-03 2.5800E-03 7.5500E-03 1.5550E-02 2.9310E-02 4.3360E-03 1.0170E-02

1.7490E-02 1.3250E-02 8.6320E-03 8.9490E-03 1.7640E-02 2.0860E-02 9.5660E-04

9.0520E-03 6.2750E-03 2.5060E-03 8.2100E-04 2.5790E-03 2.2280E-03 1.2620E-03

9.4050E-03 6.9950E-03 2.9750E-03 4.0820E-03 4.4470E-03 3.7330E-03 2.0410E-03

9.8080E-04 1.7400E-03 3.1630E-03 2.8850E-03 1.9990E-03 4.7770E+00 4.8480E-01

1.3320E-01 1.9460E+00 2.7930E-01 5.3370E-02 2.2990E-02 3.4660E-02 1.3520E-02

2.6990E-03 1.3110E+00 1.4090E-01 1.9070E-02 2.7450E-03 1.2710E-01 3.7420E-02

1.0170E-02 1.4940E-03 1.3560E-01 4.6060E-02 1.2710E-02 1.3380E-03 1.5340E-01

2.8970E-02 1.0240E-02 3.4310E-03 2.8730E-01 3.8320E-02 1.2090E-02 2.9190E-03

4.1920E-01 7.3710E-02 1.3890E-02 2.9680E-03 3.7030E-01 6.5200E-02 1.4350E-02

2.5040E-03 8.9240E-01 1.1990E-01 1.3910E-02 2.6840E-03 1.2040E+00 1.7080E-01

2.8600E-02 4.9290E-03 1.1930E-01 4.7020E-02 1.4100E-02 2.5140E-03 3.0030E-02

9.2520E-03 1.3980E-03 4.4750E-02 1.3440E-02 4.1200E-03 1.2210E-03 1.1960E-01

3.3400E-02 1.3190E-02 3.7350E-03 1.4260E+01 3.7410E-01 5.3840E-02 2.4230E-02

2.9930E+01 3.6750E+00 3.1980E-01 4.5020E-02 6.8410E-02 5.3470E-02 2.5460E-02

3.1840E-03 5.6140E+00 1.7450E-01 8.4790E-03 3.6670E-03 1.7400E+01 2.1990E+00

1.0450E-01 1.2720E-02 5.3380E+00 4.6690E-01 8.2650E-01 8.4720E-01 1.5430E-01

1.8400E-02 2.0890E-02 1.2380E-02 6.7780E-03 4.9650E-02 9.7240E-01 1.5930E-01

2.1620E-02 2.4680E-02 6.5230E-02 3.4000E-02 1.1800E-02 4.2020E-02 6.9200E-02

6.0000E-02 1.4870E-02 3.7020E-02 8.2040E-02 1.7610E-02 6.1960E-03 6.4480E-02

1.6580E-01 2.5130E-02 9.9000E-03 7.0420E-02 2.4460E-01 6.8060E-02 1.4800E-02

3.6480E-02 2.2570E-01 6.6550E-02 1.6820E-02 1.1670E-01 5.6380E-01 1.3170E-01

1.5100E-02 6.4380E-02 8.8260E-01 1.8060E-01 3.2510E-02 3.5650E-02 5.6240E-02

3.9450E-02 1.6030E-02 1.6150E-02 1.0900E-02 5.3710E-03 1.7360E-02 2.2580E-02

1.0020E-02 2.8300E-03 3.3160E-02 6.5340E-02 2.3380E-02 1.2500E-02 2.5230E+00

9.2820E+00 3.4410E-01 3.1560E-02 1.1460E+00 2.1500E+01 4.3000E+00 3.7540E-01

5.4720E-02 3.5430E-02 1.5290E-02 1.7150E-02 8.3290E-01 3.6210E+00 1.7380E-01

5.7330E-03 2.1770E+00 1.0950E+01 2.5770E+00 1.2750E-01 4.0230E+00 3.1530E-01

6.6390E-01 3.8860E-01 1.3800E-02 1.0980E-02 1.1880E-02 7.2100E-03 9.0870E-03

4.4880E-02 7.2400E-01 1.2550E-01 4.7340E-03 2.0810E-02 4.7010E-02 2.9330E-02

1.5440E-03 3.8890E-02 4.7670E-02 5.1180E-02 1.3750E-02 2.8650E-02 5.5050E-02

1.0540E-02 1.9440E-02 5.5540E-02 1.0820E-01 1.5670E-02 1.3900E-02 6.3960E-02

1.6670E-01 5.0290E-02 8.4880E-03 3.3370E-02 1.8390E-01 5.5330E-02 1.3440E-02

1.3130E-01 4.2280E-01 1.0050E-01 1.4090E-02 6.9430E-02 6.8340E-01 1.4600E-01

7.2430E-03 2.9710E-02 3.8960E-02 3.4770E-02 7.7020E-03 1.0160E-02 6.8400E-03

6.6610E-03 1.3040E-02 1.4670E-02 6.1080E-03 1.3090E-02 2.3340E-02 4.8030E-02

1.8300E-02 2.3460E-01 2.6130E+00 5.9360E+00 2.2890E-01 1.0020E-01 1.3600E+00

1.5640E+01 3.3410E+00 4.1050E-02 1.8790E-02 1.7840E-02 1.5030E-02 8.0750E-02

9.7330E-01 2.2960E+00 1.2070E-01 9.5100E-02 2.5740E+00 7.2670E+00 1.9520E+00

1.1260E-01 3.3690E-01 4.6210E-01 9.1990E-03 4.8530E-03 8.9150E-03 5.7860E-03

1.3760E-03 9.8180E-03 3.5390E-02 5.5420E-01 1.6870E-04 5.4050E-03 1.7360E-02

4.7530E-02 8.2610E-05 1.8850E-03 3.0800E-02 5.2050E-02 6.1980E-03 1.1410E-02

2.0990E-02 3.1080E-02 6.1940E-03 1.9150E-02 4.2420E-02 6.6320E-02 2.9670E-03

1.4800E-02 5.1690E-02 1.3040E-01 1.1750E-03 9.4990E-03 2.6750E-02 1.6780E-01

2.6100E-03 1.4960E-02 9.9330E-02 3.0080E-01 2.5050E-03 1.5690E-02 5.5640E-02

5.4130E-01 6.6790E-04 8.0400E-03 2.4550E-02 4.0170E-02 2.8900E-03 7.6570E-03

5.8120E-03 2.4280E-03 5.7920E-03 9.3810E-03 7.7680E-03 3.7330E-03 1.2470E-02

1.8270E-02 3.2820E-02 4.6120E-02 2.7100E-01 1.9790E+00 3.6490E+00 2.5340E-02

1.0780E-01 1.0410E+00 1.2420E+01 2.7360E-02 7.5800E-03 2.0990E-02 7.0970E-03

7.7140E-03 1.0120E-01 7.4490E-01 1.5240E+00 9.9630E-03 1.2580E-01 1.9500E+00

5.8230E+00 1.6340E+00 1.8790E-01 7.0940E-01 6.4970E-01 2.9390E-01 1.1010E-02

3.7260E-02 1.9390E-02 9.4800E-03 4.5970E-03 1.1080E-02 6.0090E-03 3.0080E-03

1.0470E-03 1.7720E-02 8.7610E-03 3.9700E-03 1.4300E-03 6.3520E-02 4.4850E-02

3.3290E-02 1.8620E-02 4.3000E-01 1.1260E-01 2.2730E-02 5.3680E-03 3.9530E-02

2.1810E-02 1.2050E-02 5.5480E-03 2.6420E-02 1.5000E-02 8.5200E-03 4.6240E-03

3.0730E-02 1.8880E-02 9.6160E-03 4.1630E-03 3.7270E-02 1.8510E-02 8.4100E-03

3.5870E-03 2.6850E-02 1.6510E-02 7.6100E-03 3.4090E-03 8.1290E-01 3.5690E-01

1.0070E-02 5.2800E-01 1.4480E-01 3.1500E-02 5.3360E-03 6.7890E-02 4.9870E-02

2.8600E-02 1.2540E-02 1.0970E+01 2.6890E+00 4.9410E-01 5.2960E-02 3.4270E-01

1.6460E-01 8.0330E-02 4.0670E-02 5.9980E+00 8.5730E+00 3.7290E+00 8.3000E-02

9.3100E+00 2.3120E+00 3.2040E-01 1.6870E-02 6.0460E-02 2.4670E-02 9.5790E-03

3.5710E-03 1.2900E+00 4.6930E-01 2.8850E-01 9.4410E-02 2.5380E-01 7.4950E-03

1.5540E-02 1.4110E-02 9.4580E-03 2.0800E-03 4.5850E-03 4.3090E-03 3.4250E-03

2.2250E-03 6.9670E-03 7.1780E-03 5.0460E-03 3.8670E-02 4.1800E-02 2.1270E-02

5.9070E-03 1.8200E-02 2.2360E-01 1.1780E-01 2.2870E-02 1.4290E-02 1.4750E-02

1.3680E-02 1.0320E-02 7.4360E-03 1.1930E-02 1.0350E-02 6.8520E-03 1.1640E-02

1.1730E-02 1.0540E-02 8.7740E-03 6.6280E-03 1.5260E-02 1.3900E-02 9.4720E-03

6.5330E-03 1.0240E-02 1.0310E-02 9.4740E-03 3.5450E-01 1.1270E-01 3.1790E-01

3.0910E-02 2.6450E-01 1.4580E-01 3.3810E-02 3.8860E-02 2.0280E-02 2.2840E-02

2.5610E-02 2.3060E-01 5.4190E+00 2.8530E+00 5.4820E-01 5.8120E-02 1.5110E-01

1.2890E-01 7.4340E-02 3.9830E+00 3.6920E+00 1.2900E+00 3.3180E+00 1.7580E-01

4.5400E+00 2.4300E+00 4.8260E-01 8.1590E-03 2.6780E-02 2.0790E-02 9.8350E-03

2.3310E-01 1.0950E-02 2.5120E-01 5.2040E-02 1.4300E-03 3.9800E-03 7.7770E-03

9.6300E-03 1.0050E-04 1.2560E-03 2.4390E-03 3.4070E-03 3.0350E-05 1.1550E-03

3.4770E-03 5.7830E-03 2.5930E-02 9.8740E-03 1.0050E-02 6.5600E-03 6.8490E-03

8.1440E-03 8.9440E-02 8.6590E-02 3.3610E-03 7.8430E-03 8.6260E-03 6.7640E-03

2.2470E-03 3.7150E-03 5.4890E-03 6.5420E-03 1.4240E-03 6.5220E-03 6.7700E-03

5.5600E-03 1.1640E-03 3.7270E-03 7.7250E-03 9.9440E-03 7.4630E-04 3.7480E-03

6.4850E-03 6.9740E-03 1.0020E-02 3.1750E-01 6.5490E-02 5.3500E-03 1.8430E-02

1.1020E-01 1.0270E-01 6.1970E-03 2.2120E-02 1.7110E-02 7.5030E-03 6.1470E-02

1.2410E-01 2.1710E+00 2.1110E+00 2.2050E-02 2.7830E-02 6.7330E-02 9.4590E-02

1.9820E+00 8.2980E-02 3.2570E+00 7.4480E-01 8.3910E-03 1.2050E-01 1.8700E+00

1.9320E+00 1.9630E-03 4.4590E-03 1.1620E-02 1.6170E-02 1.3800E+00 9.2030E-01

4.6030E-01 6.2220E-02 5.1850E-02 4.1480E-02 3.1110E-02 2.9320E-04 2.5130E-04

2.0940E-04 1.6750E-04 1.3270E-03 1.1620E-03 9.9560E-04 8.2960E-04 3.5930E+00

2.7050E+00 1.8080E+00 9.0580E-01 1.0490E-01 7.8670E-02 5.2470E-02 2.6250E-02

4.4200E-03 3.5370E-03 2.6530E-03 1.7680E-03 2.0110E-02 1.6750E-02 1.3400E-02

1.0050E-02 2.0210E-02 1.6170E-02 1.2130E-02 8.0830E-03 1.6360E-02 1.3630E-02

1.0900E-02 8.1790E-03 2.5430E-04 2.1790E-04 1.8160E-04 1.4520E-04 3.0580E-02

2.0380E-02 1.0190E-02 2.7820E-02 2.0960E-02 1.4000E-02 7.0050E-03 1.6580E-02

1.3260E-02 9.9490E-03 6.6330E-03 5.9060E-02 4.4380E-02 2.9620E-02 1.4820E-02

7.3330E-03 6.1110E-03 4.8900E-03 3.6670E-03 2.0990E-02 1.5060E-02 1.0030E-02

5.0220E-03 4.2540E-02 3.2960E-02 2.1990E-02 1.1000E-02 3.1200E-03 2.4960E-03

1.8720E-03 1.2480E-03 2.3170E+00 1.1480E+00 3.1510E-02 2.1680E-02 1.2390E-02

5.4950E-03 6.4290E-02 2.2830E-02 8.5440E-03 2.3580E-03 1.1040E-03 9.1880E-04

5.9810E-04 3.2710E-04 6.2180E+00 4.0910E+00 1.6430E+00 3.2090E-01 8.1200E-02

4.7350E-02 2.1300E-02 6.8030E-03 9.9010E-02 7.3130E-02 5.8840E-02 4.1530E-02

5.6030E-02 4.2300E-02 2.8080E-02 1.6130E-02 3.7180E-02 2.2270E-02 1.2630E-02

6.4230E-03 2.4610E-02 1.1360E-02 4.5480E-03 1.4370E-03 1.8090E-02 6.5440E-03

2.6100E-03 1.1220E-03 3.1850E-02 3.1930E-02 2.0080E-02 5.6600E-02 3.2630E-02

1.5420E-02 5.2740E-03 6.1420E-02 3.1020E-02 1.5090E-02 6.3420E-03 7.3080E-02

4.5970E-02 2.1950E-02 7.8110E-03 7.0160E-03 7.2010E-03 3.4180E-03 1.3450E-03

1.9790E-02 3.3570E-02 3.3810E-02 2.1750E-02 6.1040E-02 4.5110E-02 2.0720E-02

5.3460E-03 4.2970E-02 1.5780E-02 5.9040E-03 2.1190E-03 7.8740E-01 1.4380E-02

4.1800E-03 9.3030E-03 1.2710E-02 2.8210E-03 2.8110E-02 2.7450E-02 1.1520E-02

6.2270E-04 3.0900E-04 3.9380E-04 6.2100E-04 3.4230E+00 9.0750E-01 2.0090E+00

1.8820E+00 3.6830E-02 2.3300E-02 2.5400E-02 1.7400E-02 5.8890E-02 6.2620E-02

4.0580E-02 1.7950E-02 3.1180E-02 2.0480E-02 2.1020E-02 2.2400E-02 1.4850E-02

1.4420E-02 1.2780E-02 9.6130E-03 3.1010E-03 1.0090E-02 9.1270E-03 5.6600E-03

1.1350E-03 5.8730E-03 5.5830E-03 3.4090E-03 3.1860E-02 1.8210E-02 5.8090E-03

2.5090E-02 1.9300E-02 1.7670E-02 1.1110E-02 1.6660E-02 2.2930E-02 2.1180E-02

1.4150E-02 3.8360E-02 2.1640E-02 2.3270E-02 1.6680E-02 3.2420E-03 2.1240E-03

2.4650E-03 3.9940E-03 1.3190E-02 3.3790E-02 2.0090E-02 5.5420E-03 3.9830E-02

8.6210E-03 2.0270E-02 1.9190E-02 4.8150E-03 1.7220E-02 1.3210E-02 6.2600E-03

9.1470E-04 8.4840E-03 8.2140E-03 2.4410E-03 1.0310E-04 1.6800E-03 1.0040E-02

2.1790E-02 6.0230E-05 3.5260E-04 3.5330E-04 1.8020E-04 1.7060E-01 2.3850E+00

1.2820E+00 2.7580E-01 7.1850E-03 2.1830E-02 1.6060E-02 6.1100E-03 3.6640E-02

1.8670E-02 1.7770E-02 1.6210E-02 7.8020E-03 1.6340E-02 1.4290E-02 9.0740E-03

4.3290E-03 7.5870E-03 8.0120E-03 6.1420E-03 2.5960E-04 1.8610E-03 4.9770E-03

6.8940E-03 7.8380E-05 6.7230E-04 2.7190E-03 4.5300E-03 1.9990E-02 5.8070E-03

2.2650E-03 5.9410E-03 1.4290E-02 1.1260E-02 5.4250E-03 3.4910E-03 9.6450E-03

1.2140E-02 1.1320E-02 8.5070E-03 2.2120E-02 1.4230E-02 5.2120E-03 3.9030E-04

1.8920E-03 2.1830E-03 1.2150E-03 6.5970E-03 2.1720E-02 5.5390E-03 2.4350E-03

5.4290E-03 2.5330E-02 1.2080E-02 1.5220E-03 1.1210E-03 2.4650E-03 8.3940E-03

9.7940E-03 1.5290E+00 5.2410E-02 6.6680E-03 2.6280E+00 1.0230E+00 1.0640E-01

6.5480E-03 4.9850E+00 1.1710E+00 1.7100E-01 1.1080E-02 5.9750E-02 1.3160E-02

3.0710E-03 7.2530E-04 2.3640E+00 2.4070E-01 6.1700E-03 8.3420E-04 2.2350E+00

4.4270E-01 4.6060E-02 2.1710E-03 9.2690E-01 3.3240E-01 3.9300E-02 1.9990E-03

4.3170E-01 1.4140E-01 3.8100E-02 6.6940E-03 6.8510E-01 1.8700E-01 4.6530E-02

7.7180E-03 2.8260E-01 1.4570E-01 1.8990E-02 1.6830E-03 3.8180E-02 7.1840E-03

1.7580E-04 1.9120E-01 2.2540E-02 1.6730E-03 9.5920E-05 2.1200E-01 4.1370E-02

3.4080E-03 3.8500E-04 2.2430E-01 2.9010E-02 8.0030E-03 6.9890E-04 8.2700E-02

2.8480E-02 5.3450E-03 7.1720E-04 2.3720E-02 1.0580E-02 5.7300E-03 4.2840E-04

7.2150E-02 7.8650E-03 1.7420E-03 1.4600E-04 1.1330E-01 3.1160E-02 8.2450E-03

1.6400E-03 8.1700E+00 6.2080E-02 7.7860E-01 3.7150E+00 1.1850E+00 1.2630E-01

9.8660E-01 4.9220E+00 2.1830E+00 2.0480E-01 2.1010E-02 2.7740E-02 8.5780E-03

2.4610E-03 6.3560E-01 1.2830E+00 2.4960E-01 4.7690E-03 5.7600E-01 1.1990E+00

4.5550E-01 5.4170E-02 3.3230E-01 9.0610E-01 3.5780E-01 4.6100E-02 1.4920E-01

2.1620E-01 9.8090E-02 3.4160E-02 1.8670E-01 3.6740E-01 1.6160E-01 5.1010E-02

1.2160E-01 3.2080E-01 1.6180E-01 2.1940E-02 1.8840E-02 1.4430E-02 4.4960E-03

5.3510E-02 1.0300E-01 2.0500E-02 1.7760E-03 5.4140E-02 1.1230E-01 4.4200E-02

3.7820E-03 6.1490E-02 1.2620E-01 1.7110E-02 7.9450E-03 2.8460E-02 8.6520E-02

2.9040E-02 5.9390E-03 1.9770E-02 8.4990E-03 2.0090E-03 3.3650E-03 2.0210E-02

4.2490E-02 5.2860E-03 1.7060E-03 3.8580E-02 5.6600E-02 2.5660E-02 8.5410E-03

1.7830E+00 4.6180E-02 9.0200E-01 2.7540E+00 9.4620E-01 1.2890E-02 1.2080E+00

6.3190E+00 1.7260E+00 7.2120E-03 1.8210E-02 1.7800E-02 5.7130E-03 1.2220E-01

6.6430E-01 7.7550E-01 1.7530E-01 9.6390E-02 5.9190E-01 7.6730E-01 3.5590E-01

3.9280E-02 3.5770E-01 6.3240E-01 2.8720E-01 4.7070E-02 1.2070E-01 1.5340E-01

7.9760E-02 4.6370E-02 1.6150E-01 2.7200E-01 1.4030E-01 8.1860E-03 1.3710E-01

2.0210E-01 1.3070E-01 7.9440E-03 1.3860E-02 8.1620E-03 1.1720E-02 5.5720E-02

6.3670E-02 1.4240E-02 8.5260E-03 5.7080E-02 7.2050E-02 3.4040E-02 1.9660E-02

5.1830E-02 8.5910E-02 1.1670E-02 5.3380E-03 2.9040E-02 6.2910E-02 2.3170E-02

1.5810E-02 4.6560E-03 3.4760E-03 3.1350E-03 5.5500E-03 1.8520E-02 3.0390E-02

3.6500E-03 1.0870E-02 3.1660E-02 3.9230E-02 2.0890E-02 1.8270E-03 5.3710E-02

7.0720E-01 2.7220E+00 4.4140E-04 1.5380E-02 9.3810E-01 6.0560E+00 2.4180E-03

7.4220E-03 1.4220E-02 1.2210E-02 1.5380E-02 1.5800E-01 5.3260E-01 5.9990E-01

8.9590E-03 1.1790E-01 4.7970E-01 7.5910E-01 1.9870E-03 4.6100E-02 2.8720E-01

6.7440E-01 1.1530E-02 5.0000E-02 1.0190E-01 1.3520E-01 7.6940E-03 5.0990E-02

1.4030E-01 2.6490E-01 8.0750E-04 9.2260E-03 1.0810E-01 2.6040E-01 2.4370E-03

1.0010E-02 9.9810E-03 1.7770E-03 1.4520E-02 4.4460E-02 4.8000E-02 9.2260E-04

1.0120E-02 4.5750E-02 7.1970E-02 4.8630E-03 2.2210E-02 4.1810E-02 5.7190E-02

7.1620E-04 5.9380E-03 2.3170E-02 6.0400E-02 1.1860E-02 2.2690E-03 4.5880E-03

1.0160E-03 1.1520E-03 6.2670E-03 1.4900E-02 1.8340E-02 2.9210E-03 1.1860E-02

2.6710E-02 3.5610E-02 2.5310E+00 2.3490E-01 8.4290E-03 5.7960E+00 9.2700E-01

1.4250E-01 7.7110E-03 3.4450E-02 8.2520E-03 2.6370E-03 3.8740E-05 6.1390E-02

1.8740E-02 2.2390E-04 6.4890E-06 1.8630E-01 3.2180E-02 2.5320E-03 7.2120E-05

8.4360E-01 2.9110E-01 2.0420E-02 2.1920E-04 1.2710E+00 1.6740E-01 2.8060E-02

2.8630E-03 3.3160E-01 2.4100E-01 2.9360E-02 3.7780E-03 1.0470E+00 4.1700E-01

5.8460E-02 3.4600E-03 1.1540E-02 6.4120E-04 2.4630E-05 6.1570E-02 1.2230E-02

3.4620E-03 3.3070E-05 2.2640E-01 1.3350E-02 1.6060E-03 2.0540E-04 3.4290E-02

1.0190E-02 2.6660E-04 3.3810E-05 2.0690E-01 5.0150E-02 4.6440E-03 2.9160E-04

2.0430E-04 1.9280E-02 2.9560E-03 2.0880E-05 3.9470E-02 1.0760E-02 3.3230E-03

1.8920E-05 3.7980E-01 3.3010E-02 3.3700E-03 5.3960E-05 4.6320E+00 2.7560E-01

6.9000E-01 5.4340E+00 1.7880E+00 2.5210E-01 1.4600E-02 1.8020E-02 3.9000E-03

2.9430E-03 3.3520E-02 2.1300E-02 1.8670E-02 2.4070E-04 4.9180E-02 9.5570E-02

3.3680E-02 2.9430E-03 3.6220E-01 1.1340E+00 3.3860E-01 2.3910E-02 3.0190E-01

7.7380E-01 1.4500E-01 2.9260E-02 2.8140E-01 6.2650E-01 2.4020E-01 3.2290E-02

2.6130E-01 1.2460E+00 4.4980E-01 6.7290E-02 5.1810E-03 5.3200E-03 3.8760E-04

2.3890E-02 3.1990E-02 6.2160E-03 3.8130E-03 3.8800E-02 1.5370E-01 1.3650E-02

1.7320E-03 1.6210E-02 1.1840E-02 1.0140E-02 2.6300E-04 6.0030E-02 1.1840E-01

5.0000E-02 5.3280E-03 1.7510E-04 9.9090E-03 7.4370E-03 1.7950E-03 1.5780E-02

1.7490E-02 4.8500E-03 3.5960E-03 8.3720E-02 2.4220E-01 3.6290E-02 5.8740E-03

3.6340E+00 1.0680E-01 1.4140E+00 6.9550E+00 2.3220E+00 6.2360E-03 1.0490E-02

1.3080E-02 2.8790E-03 8.9390E-03 2.5410E-02 7.9540E-03 1.3230E-02 9.5440E-03

5.0570E-02 6.3110E-02 2.6280E-02 4.2390E-02 4.1910E-01 8.4060E-01 2.6840E-01

6.8630E-02 2.9780E-01 5.5850E-01 1.1760E-01 4.8560E-02 2.8660E-01 4.3500E-01

1.9950E-01 5.8220E-02 4.4570E-01 9.4540E-01 3.7220E-01 1.9440E-03 4.6080E-03

2.1720E-03 9.2550E-03 1.8090E-02 2.3070E-02 4.5680E-03 5.6430E-03 4.3380E-02

1.1350E-01 1.0460E-02 4.9810E-03 1.4210E-02 5.6830E-03 7.1390E-03 8.5040E-03

6.0810E-02 8.6570E-02 4.1490E-02 1.4590E-04 4.4220E-03 7.4410E-03 4.0880E-03

7.8200E-03 1.1400E-02 1.5100E-02 3.5420E-03 1.5070E-02 8.8490E-02 1.7590E-01

2.8930E-02 1.1030E-03 1.2370E-01 1.9140E+00 7.5030E+00 1.7640E-03 6.9680E-03

9.2520E-03 8.8770E-03 1.3910E-03 1.1000E-02 2.1720E-02 1.1430E-02 9.9450E-04

1.1430E-02 4.1880E-02 6.2400E-02 2.1220E-03 5.0960E-02 3.4250E-01 8.8700E-01

1.1550E-02 7.8960E-02 2.4980E-01 5.0550E-01 6.3060E-03 5.5170E-02 2.3400E-01

4.9040E-01 3.4600E-03 6.7110E-02 3.7000E-01 1.0420E+00 8.2960E-04 2.6440E-03

3.8130E-03 2.3910E-03 1.0570E-02 1.5540E-02 1.5660E-02 7.3020E-04 6.6500E-03

3.3400E-02 9.1730E-02 1.1200E-03 6.0790E-03 1.2030E-02 6.6260E-03 7.3280E-04

9.8990E-03 5.0740E-02 1.0190E-01 1.1670E-04 1.4790E-03 5.5600E-03 5.7210E-03

2.2220E-03 8.7250E-03 1.0160E-02 8.5680E-03 1.1800E-03 1.8010E-02 7.2540E-02

1.5550E-01 9.7690E-01 2.7110E-02 1.0120E-03 1.6440E-01 2.7430E-02 1.0360E-04

1.6200E-05 1.2870E-02 8.9460E-04 2.3790E-05 1.6190E-06 2.8720E-02 7.3650E-03

4.6640E-04 9.5780E-06 1.7900E+00 1.6590E-01 2.9030E-03 3.0470E-05 1.0480E-01

2.3360E-02 3.1870E-03 3.5690E-05 3.4570E-01 1.0200E-01 1.0190E-02 9.2680E-04

1.0780E+00 2.1640E-01 5.6620E-02 3.7670E-03 4.7600E-04 2.4600E-04 2.8900E-05

1.5760E-02 2.3460E-03 1.8350E-04 3.1860E-05 8.5250E-02 1.3840E-02 1.9590E-03

8.3530E-05 3.6570E-02 7.1070E-03 2.7330E-04 3.5890E-05 4.7940E-01 5.8240E-02

6.3870E-03 4.5340E-04 1.1320E-03 7.9340E-04 4.4090E-04 1.0180E-04 3.1170E-02

3.4290E-03 1.1810E-04 1.7230E-06 3.7080E-02 1.0490E-02 1.5670E-03 3.1110E-05

2.0770E+00 5.2140E-02 6.4770E-02 7.6760E-02 2.9290E-02 9.2010E-05 4.1190E-03

6.8280E-03 8.7360E-04 2.3890E-05 1.0900E-02 1.2770E-02 7.7700E-03 5.3570E-04

2.9420E-01 1.8350E+00 2.0180E-01 3.3310E-03 3.6480E-02 5.4260E-02 2.0950E-02

3.6860E-03 1.0200E-01 4.4580E-01 1.1340E-01 1.1410E-02 2.6820E-01 1.4090E+00

3.9190E-01 6.3870E-02 3.1240E-04 2.3130E-04 1.4110E-04 6.1980E-03 7.4830E-03

2.1280E-03 1.3670E-04 2.5040E-02 4.9110E-02 1.2090E-02 2.2120E-03 1.5520E-02

1.4810E-02 6.5330E-03 2.4470E-04 1.2600E-01 5.3170E-01 6.0730E-02 7.3280E-03

9.9070E-04 6.3500E-04 2.9920E-04 2.3320E-04 1.2530E-02 1.5410E-02 3.2980E-03

1.2690E-04 1.4960E-02 1.6500E-02 9.8350E-03 1.8800E-03 2.2060E+00 1.8950E-02

6.1560E-02 4.4950E-02 2.0750E-02 1.0030E-03 4.2950E-03 4.3280E-03 6.2070E-04

2.5130E-03 1.0830E-02 7.9920E-03 6.0720E-03 4.0230E-02 6.1720E-01 2.3420E+00

1.5580E-01 9.9520E-03 3.3210E-02 3.7270E-02 1.7790E-02 2.4920E-02 1.6690E-01

3.4100E-01 8.8980E-02 7.4500E-02 4.6050E-01 1.0680E+00 3.2930E-01 1.9610E-04

1.8960E-04 1.1830E-04 1.8990E-03 5.5350E-03 4.5780E-03 1.5040E-03 6.6440E-03

2.3850E-02 3.5730E-02 1.0010E-02 4.9380E-03 1.4060E-02 9.5400E-03 4.5970E-03

1.5910E-02 1.4010E-01 4.1610E-01 5.1190E-02 8.4920E-04 4.5440E-04 3.1950E-04

2.2700E-04 2.8620E-03 1.2290E-02 9.5670E-03 2.3490E-03 4.1670E-03 1.3640E-02

1.0930E-02 7.9930E-03 3.0400E-03 2.3450E-02 5.2340E-02 4.3150E-02 1.4280E-04

1.2000E-03 3.4710E-03 3.6700E-03 3.0350E-04 2.9750E-03 9.2090E-03 1.0340E-02

2.0260E-03 4.8580E-02 4.8960E-01 2.1280E+00 1.3770E-03 1.1600E-02 2.9920E-02

3.9440E-02 2.7790E-03 2.8820E-02 1.3870E-01 3.5170E-01 6.8070E-03 8.4530E-02

3.9040E-01 1.1340E+00 1.2940E-04 1.8850E-04 1.7100E-04 4.1920E-04 2.2690E-03

4.6830E-03 4.1010E-03 9.4100E-04 7.7610E-03 2.0480E-02 3.4310E-02 1.0540E-03

5.9090E-03 1.2000E-02 9.1700E-03 1.5360E-03 1.8550E-02 1.1490E-01 3.9020E-01

7.0760E-04 2.8630E-04 3.8680E-04 1.6040E-04 4.7240E-04 3.5480E-03 1.0360E-02

8.4000E-03 6.7790E-04 4.8490E-03 1.1980E-02 1.3150E-02 3.3150E+00 4.9420E-01

2.9230E-02 1.1120E-01 5.1800E-02 3.2130E-02 1.6220E-02 8.2950E-02 5.5370E-02

3.0150E-02 1.5960E-02 7.6920E-02 3.5750E-02 1.3050E-02 3.2360E-03 4.8310E-02

2.5910E-02 1.1300E-02 3.2640E-03 5.5670E-02 2.4040E-02 1.0980E-02 3.4710E-03

8.2500E-02 3.1230E-02 8.4780E-03 1.3470E-03 9.2110E-02 6.1290E-02 9.1410E-03

3.3150E-02 1.7770E-02 8.5200E-03 3.2900E-03 9.1050E-02 4.2790E-02 1.1630E-02

3.1000E-03 5.9490E-02 3.0770E-02 1.1370E-02 5.0350E-03 6.1720E-02 1.8870E-02

6.7970E-03 1.7860E-03 1.1610E-01 1.0860E-01 7.1340E-02 4.0170E-03 5.4290E-02

2.7720E-02 9.6970E-03 2.8220E-03 4.5780E-02 1.7900E-02 5.7970E-03 1.0940E-03

2.9680E+00 5.9280E-01 5.1800E-02 7.4930E-02 3.1140E-02 1.1760E-02 4.9830E-02

3.4640E-02 3.5240E-02 2.0630E-02 2.7370E-02 3.0180E-02 2.6590E-02 1.4710E-02

2.5470E-02 1.6410E-02 1.4760E-02 1.1410E-02 1.9130E-02 1.4490E-02 1.4450E-02

1.1540E-02 1.5370E-02 3.7260E-02 2.9520E-02 1.0530E-02 6.8830E-02 1.6600E-02

3.6190E-02 1.7750E-02 1.3760E-02 9.8030E-03 5.0150E-03 3.4740E-02 3.3180E-02

3.3860E-02 1.4060E-02 3.0650E-02 2.0190E-02 2.1550E-02 7.8430E-03 9.7610E-03

3.0260E-02 1.9220E-02 6.0460E-03 8.6870E-02 8.0410E-02 7.8590E-03 4.9050E-02

2.7710E-02 1.7680E-02 1.8100E-02 7.4300E-03 1.4730E-02 1.3260E-02 1.5290E-02

6.5320E-03 1.9810E+00 3.2130E-02 3.1140E-02 3.4780E-02 1.0320E-02 2.2250E-02

3.2330E-02 1.7450E-02 2.1720E-02 4.8580E-03 1.8740E-02 1.9040E-02 2.1850E-02

7.3820E-03 1.3010E-02 1.2530E-02 1.0960E-02 5.4390E-03 1.1630E-02 1.0780E-02

1.1740E-02 3.7850E-04 1.5370E-02 2.1370E-02 2.4660E-02 3.4240E-02 3.0700E-02

1.7720E-02 8.5130E-03 9.7930E-03 7.5880E-03 4.5270E-03 5.7300E-03 2.8660E-02

1.5080E-02 2.3500E-02 1.1330E-02 2.1540E-02 8.7090E-03 1.1290E-02 1.8210E-03

6.8220E-03 2.1350E-02 1.3970E-02 5.7830E-02 3.3840E-02 3.6070E-02 2.2090E-02

9.6940E-03 1.8100E-02 8.8390E-03 1.0170E-02 2.7620E-03 1.2780E-02 7.8050E-03

9.9070E-03 1.6220E-02 1.1760E-02 1.0320E-02 1.3580E-02 9.2580E-03 1.1740E-02

1.7600E-02 7.8650E-03 4.7130E-04 4.8790E-03 1.3270E-02 1.3950E-02 1.2220E-03

7.9470E-03 8.2110E-03 5.3280E-03 8.5250E-04 5.0670E-03 7.7510E-03 6.0670E-03

3.4650E-05 3.7420E-04 1.0850E-02 1.9640E-02 9.4500E-03 2.6910E-02 2.9320E-03

3.2910E-03 5.0090E-03 4.5250E-03 2.7820E-03 1.3180E-03 5.0160E-03 1.7600E-02

1.1760E-02 5.0350E-03 7.1560E-03 1.1260E-02 3.1800E-03 6.6090E-04 1.0260E-03

3.9750E-03 1.3100E-02 2.8890E-02 7.1420E-03 3.7470E-02 1.2700E-03 2.8220E-03

7.4270E-03 1.0160E-02 3.1410E-03 2.7600E-04 2.8730E-03 8.3030E-03 5.0770E-03

1.1190E+00 6.3160E-02 9.0160E-03 4.1330E+00 1.3430E+00 2.8020E-01 3.1370E-02

8.8450E+00 1.9340E+00 3.1110E-01 3.2700E-02 1.4360E-01 5.6730E-02 2.0680E-02

5.5120E-03 1.6980E-01 6.0750E-02 1.8920E-02 5.0480E-03 3.4780E-02 1.6400E-02

7.6880E-03 2.1730E-03 3.3060E-01 1.2060E-01 2.0510E-02 5.9510E-01 2.8080E-01

8.0930E-02 1.2690E-02 4.3740E-01 1.3080E-01 2.8770E-02 5.4280E-03 1.5560E-01

8.1820E-02 2.5360E-02 7.9590E-03 3.1490E-02 1.3810E-02 5.4960E-03 1.7960E-03

1.7310E-02 1.9290E-02 1.2160E-02 7.0550E-03 5.9570E-02 3.5440E-02 1.7510E-02

6.0980E-03 7.0110E-02 3.3780E-02 1.3860E-02 4.9680E-03 1.2380E+00 6.7330E-02

9.5270E-01 1.8010E+00 1.2550E+00 3.5040E-01 4.2590E-01 5.2120E+00 2.1800E+00

4.0770E-01 4.4250E-02 6.3170E-02 3.3110E-02 2.2880E-02 2.8390E-02 1.0810E-01

6.4860E-02 2.2330E-02 9.9880E-03 1.7370E-02 9.6590E-03 8.5260E-03 1.6820E-01

1.0360E-01 7.2990E-02 2.7700E-01 1.8450E-01 1.8580E-01 8.0550E-02 8.7990E-02

2.1050E-01 1.2160E-01 3.3970E-02 8.1650E-02 4.8380E-02 5.8060E-02 1.8870E-02

9.7310E-03 1.4430E-02 1.1050E-02 5.7420E-03 1.2980E-02 1.3950E-02 9.6000E-03

4.8270E-03 3.5410E-02 2.3800E-02 1.8160E-02 1.1020E-02 2.8510E-02 2.6010E-02

2.2760E-02 1.2800E-02 8.6590E-01 7.8530E-02 9.1560E-01 9.3970E-01 9.6940E-01

3.0190E-03 4.4700E-01 3.2910E+00 1.7340E+00 1.3020E-02 2.1740E-02 4.5100E-02

2.4560E-02 6.1130E-03 2.3440E-02 8.2330E-02 3.4890E-02 3.6190E-03 3.6250E-03

1.4780E-02 8.6690E-03 6.9260E-02 1.0130E-01 6.6060E-02 8.0460E-02 1.8460E-01

1.1170E-01 1.0960E-01 1.0140E-02 8.0940E-02 1.1490E-01 9.3370E-02 2.5320E-02

5.7980E-02 1.9500E-02 3.2410E-02 2.4690E-03 6.4470E-03 9.9930E-03 8.9160E-03

8.6470E-03 1.1060E-02 6.7170E-03 2.8870E-03 1.7500E-02 1.8120E-02 1.6150E-02

7.9540E-03 8.4870E-03 1.9100E-02 1.3950E-02 1.6720E-02 2.5280E-03 8.8690E-02

6.3690E-01 7.3110E-01 2.7800E-04 3.0460E-03 3.1310E-01 2.4130E+00 1.6720E-03

1.2950E-02 1.6090E-02 2.4150E-02 4.1660E-04 5.6210E-03 1.6290E-02 3.6570E-02

9.6860E-06 4.0020E-03 2.8870E-03 8.3630E-03 2.0470E-02 6.0120E-02 3.2400E-02

1.2690E-02 8.0180E-02 1.0930E-01 3.9730E-02 1.7570E-03 9.3130E-03 5.5020E-02

8.4130E-02 7.9590E-03 1.8840E-02 3.3310E-02 7.8660E-03 4.8240E-04 2.1540E-03

4.2450E-03 6.8380E-03 4.3220E-03 5.2830E-03 3.0230E-03 1.3590E-03 6.0980E-03

1.1420E-02 7.9490E-03 4.5890E-03 2.5700E-03 6.7690E-03 1.1780E-02 7.7650E-03

2.9820E+00 2.6860E-01 1.5180E-02 7.5190E+00 1.8830E+00 2.8950E-01 2.2130E-02

4.7290E-01 1.5130E-01 3.2060E-02 5.3420E-03 7.6970E-01 2.5650E-01 5.6800E-02

8.8200E-03 4.1800E-01 1.1590E-01 1.8670E-02 1.4440E-03 4.1230E-01 2.2050E-02

3.2090E-03 5.5650E-01 1.1180E-01 1.3740E-02 7.2930E-04 7.2050E-01 2.4230E-01

5.4710E-02 6.1720E-03 1.4170E-01 4.7840E-02 9.2750E-03 2.9730E-03 8.2490E-02

3.4730E-02 1.3070E-02 3.8070E-03 1.9020E-02 6.1960E-02 1.1530E-02 7.3990E-03

6.3710E-02 2.8380E-02 1.0960E-02 2.1320E-03 1.0160E-01 3.2190E-02 7.5290E-03

1.2640E-03 3.2850E+00 3.2880E-01 1.4280E+00 4.0400E+00 1.9960E+00 3.5820E-01

1.5050E-01 2.0800E-01 1.3850E-01 3.4530E-02 2.1770E-01 3.7780E-01 2.4100E-01

6.7010E-02 7.3630E-02 2.1970E-01 1.2820E-01 2.2670E-02 1.4700E-01 1.9000E-01

1.2520E-02 1.6710E-01 2.7440E-01 9.6750E-02 1.4720E-02 2.4060E-01 3.1440E-01

2.0160E-01 6.3690E-02 5.9340E-02 5.3010E-02 4.2490E-02 6.2980E-03 3.0200E-02

3.8660E-02 2.5490E-02 1.3350E-02 1.5220E-02 2.8430E-02 3.2960E-02 3.7180E-03

3.4190E-02 2.7320E-02 1.4520E-02 1.0070E-02 3.7630E-02 3.5650E-02 2.7350E-02

8.2310E-03 2.5190E+00 1.1750E-01 1.5310E+00 2.6170E+00 1.6060E+00 3.1950E-02

1.3780E-01 1.2480E-01 1.0850E-01 3.1090E-02 1.9310E-01 2.4800E-01 2.0280E-01

1.8150E-03 8.4330E-02 1.4370E-01 1.0500E-01 4.2290E-02 1.4060E-01 7.9370E-02

3.7490E-02 1.5150E-01 1.5940E-01 6.3450E-02 5.4450E-02 1.9460E-01 1.9820E-01

1.6350E-01 1.8390E-02 5.0880E-02 2.6980E-02 2.7730E-02 9.6670E-03 2.1620E-02

2.7750E-02 2.1840E-02 1.1410E-02 1.4880E-02 2.2700E-02 1.1440E-02 1.6710E-02

1.8180E-02 2.1410E-02 8.2740E-03 7.5040E-03 2.7280E-02 2.1240E-02 2.1600E-02

2.7090E-03 1.4110E-01 1.1850E+00 2.5880E+00 5.3420E-03 3.4440E-02 1.0820E-01

1.1830E-01 2.7610E-03 3.5660E-02 1.5540E-01 2.5880E-01 9.3100E-05 2.0710E-03

6.4740E-02 1.5550E-01 9.2650E-03 5.6190E-02 1.0910E-01 5.2920E-03 4.4910E-02

1.1630E-01 1.1060E-01 6.1730E-03 6.3510E-02 1.5680E-01 1.7980E-01 5.9620E-03

1.9040E-02 3.7350E-02 1.8760E-02 2.1670E-03 9.6720E-03 1.7830E-02 2.4430E-02

7.6080E-03 8.9380E-03 8.5780E-03 1.5140E-02 5.4060E-03 1.5510E-02 1.2500E-02

1.0070E-02 1.2550E-03 8.2200E-03 2.1570E-02 2.0770E-02 2.6890E+00 1.0300E-01

6.1600E-03 5.1700E-01 1.2430E-01 2.5030E-02 5.2470E-03 3.2990E-01 8.4480E-02

1.3250E-02 6.0060E-04 2.5280E-01 7.8060E-02 1.9050E-02 2.5150E-03 2.3170E-02

8.4860E-03 1.0850E-03 7.3850E-01 5.5740E-02 1.0700E-02 1.9880E-03 5.1470E-01

1.0820E-01 1.1530E-02 1.3950E-03 5.9240E-02 1.6060E-02 2.1430E-03 5.4670E-04

2.6870E-01 6.5280E-02 9.6870E-03 1.8420E-03 3.0960E-02 3.0180E-02 1.5590E-02

3.3820E-03 8.5990E-02 2.0030E-02 6.5040E-03 5.3990E-04 1.6280E-01 4.7800E-02

1.1100E-02 1.4120E-03 3.3160E+00 1.2340E-01 1.5440E-01 2.7200E-01 1.0910E-01

2.5790E-02 8.4260E-02 1.7590E-01 8.8490E-02 1.5670E-02 6.7920E-02 1.3790E-01

7.0950E-02 2.1540E-02 1.3780E-02 6.9280E-03 5.0600E-03 1.8370E-01 4.3500E-01

4.4020E-02 9.5470E-03 1.3870E-01 2.6980E-01 1.0900E-01 1.2720E-02 2.3890E-02

2.7490E-02 1.3060E-02 1.6210E-03 6.4920E-02 1.6400E-01 6.6380E-02 1.0370E-02

2.5810E-02 2.1980E-02 1.0520E-02 8.4290E-03 3.6070E-02 4.4560E-02 1.0180E-02

6.6640E-03 5.6770E-02 7.9610E-02 3.7510E-02 1.2170E-02 2.5440E+00 4.0710E-02

1.3890E-01 1.8430E-01 8.6550E-02 1.3220E-02 8.8220E-02 1.2130E-01 7.3150E-02

1.4120E-02 6.1310E-02 9.9150E-02 6.2080E-02 7.7020E-03 7.5420E-03 5.2620E-03

4.0470E-02 1.8720E-01 2.7970E-01 2.9820E-02 2.3060E-02 1.3950E-01 1.7590E-01

7.9030E-02 8.0600E-03 2.0210E-02 1.5660E-02 8.8740E-03 9.6550E-03 6.6040E-02

1.2760E-01 5.3880E-02 2.0640E-02 1.3910E-02 1.1120E-02 7.6830E-03 1.4550E-02

2.3190E-02 3.2050E-02 6.9270E-03 1.7860E-02 4.5830E-02 5.5740E-02 3.1050E-02

8.8300E-03 4.3660E-02 1.1430E-01 1.7040E-01 6.0000E-04 1.5660E-02 7.2980E-02

1.2800E-01 1.3740E-03 1.5870E-02 5.2890E-02 1.0600E-01 3.4730E-03 7.8000E-03

4.1060E-03 8.8870E-03 4.7020E-02 1.4870E-01 1.9950E-01 3.0600E-03 2.7090E-02

1.1320E-01 1.7280E-01 2.0260E-03 8.7760E-03 1.6520E-02 1.2690E-02 1.8300E-03

1.0350E-02 5.3670E-02 1.3460E-01 1.5480E-02 7.5400E-03 1.1980E-02 5.0830E-03

4.0880E-03 1.4370E-02 1.8840E-02 1.9710E-02 2.9100E-03 1.9090E-02 3.9290E-02

5.0740E-02 1.6620E+00 5.7660E-02 5.1410E-03 5.5740E+00 1.2830E+00 1.7660E-01

1.2140E-02 1.1460E+01 1.9390E+00 2.1940E-01 1.2810E-02 4.5320E-01 5.5400E-02

1.9060E-02 5.5870E-01 1.8530E-01 3.0040E-02 7.9020E-03 5.6320E-01 1.2160E-01

2.1750E-02 3.1690E-03 2.1150E-01 7.0350E-02 8.0120E-03 2.2570E-03 8.5070E-02

3.6190E-02 1.1600E-02 2.4120E-03 1.6000E-02 2.9590E-02 1.1050E-02 4.9420E-03

4.6300E-02 2.1870E-02 6.7380E-03 1.1590E-03 9.7020E-02 2.9010E-02 7.7230E-03

1.3500E-03 2.0210E+00 6.8550E-02 9.4090E-01 3.1150E+00 1.3970E+00 2.1630E-01

6.9150E-01 7.6710E+00 2.3060E+00 2.7170E-01 1.8450E-01 2.1130E-01 2.6530E-02

2.3020E-01 2.1610E-01 1.6060E-01 2.2400E-02 1.2140E-01 2.9720E-01 1.1720E-01

2.3090E-02 8.7180E-02 7.5320E-02 6.1450E-02 6.9840E-03 1.8510E-02 6.0220E-02

3.4320E-02 1.2930E-02 1.2800E-02 1.7400E-02 1.4330E-02 4.1570E-03 2.5280E-02

1.6870E-02 1.2300E-02 6.6940E-03 2.8990E-02 4.8930E-02 2.3170E-02 8.2530E-03

1.5200E+00 6.1190E-02 1.0360E+00 2.0230E+00 1.1150E+00 5.0450E-03 8.1450E-01

5.5250E+00 1.8320E+00 7.1680E-02 1.5840E-01 8.6940E-02 6.5560E-02 1.9540E-01

9.7110E-02 1.0690E-01 2.1740E-02 1.1710E-01 1.8970E-01 9.0450E-02 2.2850E-02

7.4180E-02 3.1190E-02 4.0540E-02 6.0720E-03 2.2370E-02 4.4230E-02 3.1080E-02

9.5990E-03 1.0570E-02 1.0900E-02 5.8830E-03 1.0680E-02 1.4430E-02 1.2880E-02

7.6120E-03 7.7180E-03 2.3170E-02 3.0020E-02 1.8380E-02 1.0380E-03 7.2910E-02

7.9570E-01 1.9660E+00 4.5760E-04 5.5230E-03 6.1460E-01 4.9100E+00 2.9040E-02

6.6660E-02 1.1090E-01 1.7500E-02 6.9240E-02 1.4610E-01 8.1370E-02 3.1690E-03

2.3070E-02 9.0420E-02 1.7140E-01 4.9410E-03 2.2150E-02 5.5100E-02 2.9770E-02

1.2430E-03 7.2430E-03 2.2320E-02 4.4910E-02 6.3990E-03 5.6820E-03 6.2630E-03

5.7100E-03 3.1740E-03 1.0670E-02 1.0470E-02 5.8720E-03 1.3500E-03 8.2520E-03

1.8380E-02 2.6010E-02 3.4230E+00 2.3620E-01 1.4910E-02 6.9060E+00 1.4590E+00

2.7660E-01 1.4520E-02 8.7130E-02 4.3290E-02 1.1330E-02 2.7550E-01 1.8480E-02

4.2440E-03 7.7670E-04 6.8330E-01 1.5940E-01 3.7470E-02 7.7810E-03 1.0960E-01

1.5280E-02 4.9170E-03 6.4830E-04 2.3480E-01 5.9830E-02 1.0450E-02 1.2420E-03

3.9230E-03 2.5110E-02 5.8720E-03 3.9840E-04 1.0270E-01 2.0030E-02 7.1480E-03

1.1630E-03 1.8910E-01 6.1590E-02 4.9040E-03 3.8430E-04 4.0310E+00 2.8270E-01

1.1030E+00 7.2980E+00 2.7310E+00 3.2930E-01 5.6840E-02 2.9000E-02 2.2520E-02

6.1790E-02 1.6640E-01 1.3440E-02 3.7920E-03 1.9930E-01 3.7110E-01 1.3410E-01

3.6540E-02 3.2390E-02 6.0840E-02 9.7020E-03 3.5380E-03 6.5090E-02 1.2630E-01

5.8340E-02 1.1750E-02 3.2690E-03 1.4000E-02 9.3190E-03 3.4930E-03 4.0190E-02

5.3710E-02 1.1040E-02 6.9280E-03 7.9910E-02 1.4820E-01 6.7060E-02 5.4790E-03

3.1400E+00 1.2850E-01 2.1740E+00 5.3230E+00 2.1940E+00 3.9820E-02 3.3200E-02

1.8680E-02 1.4120E-02 6.3020E-02 1.0860E-01 9.1110E-03 5.4780E-02 1.7490E-01

2.5660E-01 1.0740E-01 1.1380E-02 2.9050E-02 3.9860E-02 6.5020E-03 1.0130E-02

5.8130E-02 8.8410E-02 4.8380E-02 2.6150E-03 6.5010E-03 9.1240E-03 5.8260E-03

1.5730E-02 2.8250E-02 3.8300E-02 7.1890E-03 1.2000E-02 8.5260E-02 9.1660E-02

5.1470E-02 3.6020E-04 1.5220E-01 1.7120E+00 5.5050E+00 2.2950E-02 2.9070E-02

1.3710E-02 3.2830E-03 1.6330E-02 5.0070E-02 7.6340E-02 1.2880E-02 5.9070E-02

1.4420E-01 2.2900E-01 3.2570E-03 1.0700E-02 2.3190E-02 2.7490E-02 1.2270E-03

1.1710E-02 4.8250E-02 9.2640E-02 1.9610E-03 2.3390E-03 7.4490E-03 6.0880E-03

4.8020E-03 1.4210E-02 2.2540E-02 2.3400E-02 1.1410E-03 1.4380E-02 6.8250E-02

9.7910E-02 1.4120E+00 1.0330E-01 6.1670E-03 1.6580E-02 1.9670E-03 1.0290E-04

7.0030E-02 2.4120E-02 7.5500E-03 1.6910E-04 1.9740E+00 1.3880E-01 1.9760E-02

2.5640E-03 3.0110E-02 8.3430E-03 1.5280E-03 1.3930E-04 5.5810E-01 9.3550E-02

1.1710E-02 1.4640E-03 4.3620E-04 2.6150E-02 3.5110E-03 2.4030E-04 3.4110E-02

7.9080E-03 7.1940E-04 5.0670E-05 3.5410E-01 2.3140E-02 3.9500E-03 2.5580E-04

2.5520E+00 1.1970E-01 8.2150E-03 6.6500E-03 1.1780E-03 3.5910E-02 3.8470E-02

1.1680E-02 8.1810E-03 3.5620E-01 1.3190E+00 1.2800E-01 2.1370E-02 1.3360E-02

1.3580E-02 5.9700E-03 1.4120E-03 1.1310E-01 3.0340E-01 9.9970E-02 1.4360E-02

3.7390E-04 1.3420E-02 1.0080E-02 2.1360E-03 1.4670E-02 1.4910E-02 6.0190E-03

6.8100E-04 5.3180E-02 1.7610E-01 2.0990E-02 4.3950E-03 3.0220E+00 3.5490E-03

6.4910E-03 3.3840E-03 1.7140E-02 2.1460E-02 2.5480E-02 8.6010E-03 6.0550E-02

3.9360E-01 9.7230E-01 1.0340E-01 4.6640E-03 1.0630E-02 8.8670E-03 4.1950E-03

1.8460E-02 1.2020E-01 2.2510E-01 8.0010E-02 3.1160E-04 5.9730E-03 1.0090E-02

5.5420E-03 4.6690E-03 1.1490E-02 9.0870E-03 4.1950E-03 1.0420E-02 5.4550E-02

1.3040E-01 1.7240E-02 1.1140E-03 4.4610E-03 5.0910E-03 5.0260E-03 1.8970E-02

1.9200E-02 1.5040E-02 8.8520E-03 7.0530E-02 3.2110E-01 8.0580E-01 1.4840E-03

6.1980E-03 8.9670E-03 6.9230E-03 2.6880E-03 2.1070E-02 9.9610E-02 2.3430E-01

2.4930E-04 1.7610E-03 7.5340E-03 7.7690E-03 1.0610E-03 5.8010E-03 9.6330E-03

7.1230E-03 1.4630E-03 1.2190E-02 4.5100E-02 1.2100E-01 5.9090E-01 3.9260E-02

2.2140E+00 1.0790E+00 3.6900E-01 6.4250E-02 7.5050E+00 2.6290E+00 7.0850E-01

1.2300E-01 5.4380E-02 3.0760E-02 1.4740E-02 5.9080E-03 2.0270E-02 1.4310E-02

8.6090E-03 4.3440E-03 2.8580E-02 1.0830E-01 9.6060E-02 5.9370E-02 9.1260E-02

5.4480E-02 3.0780E-02 1.3950E-02 4.1380E-02 2.6120E-02 1.7530E-02 1.1430E-02

4.9730E-01 7.3700E-01 6.4130E-01 6.6570E-01 4.4340E-01 2.8280E-01 3.4880E+00

2.5760E+00 1.0050E+00 2.3050E-02 2.1760E-02 1.6820E-02 9.5280E-03 1.1510E-02

5.8640E-03 6.9610E-03 9.3730E-03 1.9050E-02 9.6060E-02 6.2090E-02 1.8410E-02

4.3060E-02 3.9590E-02 2.9980E-02 1.4100E-02 1.7870E-02 2.2230E-02 1.5900E-02

8.3030E-03 2.7870E-02 5.1740E-01 4.5850E-01 2.3840E-01 1.9230E-02 1.7890E-01

1.4460E+00 2.0270E+00 6.1400E-03 1.1900E-02 1.0550E-02 6.1140E-03 1.1330E-03

6.7570E-03 5.2660E-03 3.1970E-03 9.5270E-03 5.9350E-02 1.8560E-02 1.0040E-02

1.8010E-02 1.8640E-02 1.6610E-02 9.9280E-03 9.6360E-03 6.7730E-03 8.2260E-03

7.8260E-03 2.8580E+00 4.5120E-01 3.0410E-02 7.8620E+00 2.8530E+00 6.1570E-01

7.2890E-02 1.0780E-01 5.3560E-02 1.6020E-02 2.6960E-03 6.3720E-02 3.2030E-02

1.5170E-02 6.3150E-03 1.9530E-01 1.3030E-01 3.8530E-02 1.5970E-02 1.4360E-01

7.2780E-02 2.7950E-02 1.0320E-02 1.3520E-01 5.4500E-02 1.4780E-02 2.1050E-03

2.5370E+00 5.3330E-01 2.1380E+00 3.0670E+00 2.6280E+00 7.6240E-01 5.3530E-02

3.2110E-02 3.7210E-02 1.3980E-02 2.4400E-02 2.4800E-02 2.1210E-02 1.4380E-02

1.4600E-01 6.2810E-02 6.3580E-02 1.6730E-02 7.2770E-02 4.7150E-02 4.8920E-02

1.7420E-02 4.3510E-02 5.0800E-02 4.4120E-02 1.7630E-02 1.6890E+00 1.7080E-01

2.0720E+00 1.4700E+00 2.0300E+00 1.6020E-02 3.7200E-02 1.5390E-02 2.1100E-02

7.2530E-03 1.5560E-02 1.6690E-02 1.6480E-02 9.7210E-02 2.8880E-02 3.8890E-02

2.5840E-02 2.7960E-02 4.8920E-02 2.1210E-02 2.6920E-02 5.9800E-03 3.4980E-02

2.8830E-02 3.4750E-02 8.4370E-03 1.8560E-01 1.4350E+00 1.2400E+00 2.6960E-03

1.3970E-02 2.1100E-02 5.6040E-03 1.0510E-03 6.1470E-03 9.9120E-03 1.0270E-02

4.8540E-02 1.2390E-02 1.5120E-02 1.9630E-02 1.0310E-02 1.7420E-02 2.6920E-02

7.4980E-03 3.0560E-04 6.6850E-03 2.3370E-02 2.0160E-02 2.6760E+00 1.9100E-01

1.1760E-02 1.7350E-01 6.0290E-02 1.3410E-02 3.5730E-03 1.2380E-01 5.9780E-02

1.8990E-02 4.0400E-03 3.7030E-02 3.7330E-01 3.8350E-02 5.5890E-03 4.1410E-01

1.2300E-01 1.5540E-02 4.0860E-03 1.2390E-01 6.0700E-02 2.1310E-02 4.1540E-03

3.0550E+00 2.3180E-01 7.3970E-02 6.3170E-02 4.9690E-02 9.9220E-03 5.3480E-02

4.9400E-02 4.3320E-02 2.0710E-02 2.9630E-02 1.4470E-01 1.6600E-01 2.1840E-02

1.6660E-01 1.4950E-01 1.1600E-01 1.1810E-02 6.0590E-02 3.9410E-02 3.6390E-02

2.3260E-02 2.3280E+00 2.3750E-02 6.0730E-02 3.0730E-02 3.3180E-02 1.2030E-02

3.8650E-02 2.9940E-02 3.6910E-02 2.2220E-02 4.8070E-02 1.2700E-01 7.3410E-02

3.9650E-02 1.3930E-01 6.0530E-02 8.4290E-02 2.1300E-02 3.6370E-02 2.9820E-02

3.0300E-02 7.1730E-03 2.3680E-02 4.4710E-02 2.3700E-02 2.3650E-03 1.2500E-02

3.1480E-02 3.2750E-02 1.4810E-02 1.4240E-02 5.8260E-02 9.4080E-02 8.6330E-03

4.3350E-02 1.1320E-01 5.8170E-02 4.1540E-03 2.3250E-02 3.0280E-02 2.2030E-02

1.5700E+00 2.5820E-01 7.3480E-02 6.2360E+00 1.5470E+00 3.0940E-01 4.9580E-02

1.1640E+00 2.0620E+00 1.1640E+00 8.8540E-02 1.7060E+00 5.6140E-01 9.8950E-02

6.4620E-03 2.2230E+00 6.7560E-01 1.3470E-01 1.6580E-02 1.4640E+00 1.9430E-01

4.7600E-01 3.5800E+00 1.6110E+00 3.6910E-01 8.7010E-01 1.3860E+00 3.1790E-01

7.7970E-01 5.5680E-01 6.3830E-01 4.7300E-01 1.1440E-01 4.5100E-01 1.0220E+00

6.4990E-01 1.6640E-01 9.6350E-01 3.6490E-02 4.3240E-01 2.2340E+00 1.2730E+00

5.7880E-01 5.7760E-01 6.6610E-01 4.1950E-01 9.7620E-02 4.6970E-01 3.1230E-01

3.0980E-01 3.5000E-02 4.4870E-01 5.4100E-01 5.0060E-01 9.8930E-03 2.7640E-02

2.9380E-01 1.6580E+00 2.8910E-01 1.2960E-01 6.0870E-01 8.6850E-02 6.4610E-03

1.1330E-01 3.1030E-01 1.6570E-01 3.3560E-03 3.8790E-02 3.1230E-01 4.1140E-01

3.2690E+00 2.5450E-01 3.0420E-02 1.0050E-01 7.9820E-02 2.8970E-02 5.7450E-03

5.1400E+00 2.2890E-01 5.8220E-03 1.3180E-03 1.0560E+01 2.0330E+00 1.6820E-01

7.8640E-03 3.8200E+00 2.9340E-01 8.3720E-02 4.9810E-02 2.8710E-02 1.5590E-02

1.1360E+00 3.0960E+00 2.2930E-01 4.8300E-03 2.6630E+00 5.5180E+00 2.1790E+00

1.9290E-01 2.9810E+00 6.6970E-02 2.8530E-02 2.9780E-02 1.8480E-02 1.8310E-01

1.2780E+00 1.9610E+00 1.5970E-01 4.0240E-01 2.8390E+00 3.5350E+00 1.6810E+00

5.0230E-02 1.4620E-02 2.5880E-02 1.6170E-02 1.7860E-02 2.3680E-01 1.0150E+00

1.4310E+00 3.4460E-02 4.9380E-01 2.2780E+00 3.5590E+00 5.5050E-01 3.6700E-01

1.8350E-01 2.0920E+00 1.5700E+00 1.0500E+00 5.2600E-01 1.9180E-02 1.5340E-02

1.1510E-02 7.6720E-03 2.1170E+00 1.0200E+00 4.3690E+00 2.9880E+00 1.2130E+00

2.3890E-01 3.7810E-01 1.5440E-01 6.3430E-02 2.9570E-02 7.4690E-01 2.5630E+00

4.7210E-01 1.4310E+00 1.3780E+00 4.4040E-02 1.8470E-01 1.3330E-01 5.3660E-02

1.2110E-01 1.7680E+00 9.0050E-01 1.2550E-01 2.1430E-02 1.9080E-02 7.1910E-02

9.5850E-02 2.0860E+00 2.7290E-01 3.2840E-02 1.8320E+00 6.1990E-01 1.7390E-01

4.5340E-02 1.9590E+00 2.9680E-01 4.4860E-01 8.4430E-01 5.3780E-01 1.7610E-01

1.3040E+00 8.3800E-02 3.8350E-01 4.7690E-01 4.0200E-01 1.9040E-02 6.3520E-02

2.5370E-01 3.2900E-01 4.0790E+00 4.0020E-01 2.2400E-02 4.4850E+00 4.8950E-01

3.4520E+00

60000.00

4.6360E+00 1.5690E+00 6.8870E-01 2.8770E-01 1.7970E+00 7.4440E-01 2.2430E-01

5.7080E-02 5.4750E+00 5.0390E-01 1.8030E-01 6.4480E-02 6.6000E-01 3.6960E-01

2.8990E-02 2.6920E-01 7.6900E-02 5.8950E-03 6.6140E-01 3.2480E-01 9.9020E-02

1.6860E-02 4.3550E-01 2.1540E-01 1.1470E-01 3.8960E-02 5.1110E-01 2.3720E-01

8.6350E-02 1.9170E-02 2.9300E-01 1.6320E-01 7.9900E-02 4.1240E-02 3.5730E+01

8.9000E+00 2.7550E-01 8.6020E-02 3.1100E-02 4.1130E+01 7.2990E+00 7.2990E-01

4.9540E-02 2.2230E-02 1.0590E-02 2.0520E+01 1.5070E-01 3.7520E-02 1.1760E+00

2.0760E-01 6.4490E-03 1.4040E-03 1.8580E+00 2.3490E-01 2.4960E-02 8.5840E-03

7.3390E-01 1.0940E-02 5.7620E-03 1.7150E-01 1.2800E-01 5.5430E-02 1.2710E-02

9.6170E-02 6.7640E-02 2.8730E-02 8.8240E-03 2.0950E-02 6.6580E-03 2.1690E-03

7.1790E-02 3.5530E-02 1.2530E-02 3.2330E-03 2.8960E-02 1.9100E-02 8.3740E-03

2.0230E-03 7.2670E-02 4.0860E-02 1.3880E-02 2.4900E-03 5.2160E-02 2.0780E-02

4.7850E-03 5.1530E-04 3.8960E-02 1.5290E-02 5.9750E-03 1.7320E-03 3.3700E-02

1.1100E-02 3.3700E-03 1.0600E-03 5.6080E-02 2.5540E-02 1.1030E-02 3.8020E-03

7.4840E-02 2.8140E-02 7.4520E-03 1.0940E-03 4.9000E-02 1.5460E-02 3.7610E-03

6.8200E-04 5.0150E-02 2.3640E-02 8.6620E-03 1.8460E-03 3.7880E-02 1.3140E-02

6.2240E-03 3.2030E-02 2.0580E-02 7.3710E-03 1.6120E-03 2.9490E-02 1.6490E-02

1.0090E-02 7.0690E-03 1.3500E-02 1.0090E-02 3.7830E-03 8.9430E-04 1.1090E-02

8.5730E-03 4.5770E-03 1.4850E-03 1.8320E-02 9.6840E-03 7.6350E-03 4.4240E-03

1.5000E-02 1.0150E-02 5.5610E-03 2.5070E-03 1.9700E-02 1.3530E-02 6.1700E-03

1.8130E-03 4.5250E+00 1.3740E+00 4.4920E-01 8.1350E-01 7.1730E-01 5.3820E-01

2.0450E-01 1.4400E+00 3.2770E+00 3.2870E-01 1.0690E-01 4.8520E-01 1.5620E-01

2.0960E-01 1.4880E-01 8.9550E-02 4.3890E-02 2.9350E-01 2.3380E-01 2.5240E-01

1.0320E-01 2.2690E-01 2.2790E-01 9.8260E-02 9.5860E-02 2.1940E-01 2.3260E-01

1.5850E-01 8.5540E-02 1.8660E-01 1.3710E-01 1.1140E-01 2.9570E-02 8.0560E+00

1.6060E+01 1.1850E+01 3.0250E-01 6.5410E-02 4.1210E-01 2.8870E+01 1.0500E+01

1.5310E+00 5.8040E-02 1.0540E-02 5.8170E+00 1.0510E+01 9.3190E-02 3.8640E-01

5.2170E-01 2.0070E-01 5.0560E-03 3.6000E-01 1.0810E+00 2.3920E-01 2.0780E-02

2.7720E-01 3.1900E-01 4.2580E-03 1.2900E-01 4.6170E-02 6.5040E-02 5.2060E-02

7.7230E-02 4.5990E-02 2.8050E-02 7.0600E-03 1.2020E-02 8.6340E-03 3.1390E-03

3.4530E-02 2.6850E-02 2.5040E-02 1.2070E-02 1.9690E-02 1.0340E-02 1.0870E-02

8.4430E-03 3.5690E-02 2.3150E-02 3.0820E-02 1.4470E-02 2.6460E-02 1.7740E-02

1.3790E-02 4.4380E-03 1.9540E-02 1.7230E-02 8.4430E-03 4.0970E-03 1.2690E-02

1.5500E-02 8.5790E-03 2.9000E-03 2.4880E-02 2.5930E-02 1.6410E-02 9.9440E-03

3.1320E-02 3.0430E-02 2.0340E-02 7.5220E-03 1.5280E-02 2.3350E-02 1.2640E-02

3.8460E-03 2.1380E-02 2.0760E-02 1.6630E-02 8.7460E-03 2.2600E-02 1.7990E-02

5.5350E-03 2.2780E-02 9.7000E-03 1.1010E-02 5.7680E-03 1.7190E-02 1.5540E-02

1.2170E-02 5.0670E-03 1.0770E-02 3.9490E-03 5.1160E-03 2.8690E-03 8.2420E-03

3.9850E-03 4.1670E-03 4.1950E-03 1.4660E-02 8.5110E-03 6.0720E-03 2.8120E-03

1.1090E-02 6.9200E-03 5.8640E-03 2.4880E-03 1.3750E-02 6.6910E-03 7.1010E-03

5.4250E-03 3.3900E+00 8.9880E-01 2.9960E-01 5.7310E-01 4.5320E-01 3.8230E-01

3.8890E-01 1.5250E+00 1.7940E+00 1.7540E-01 2.8010E-01 1.8580E-01 1.7290E-01

7.2450E-02 8.5050E-02 5.4480E-02 8.3050E-02 2.1860E-01 1.5830E-01 2.0260E-01

1.2410E-01 1.1930E-01 1.6610E-01 7.8100E-02 8.3200E-02 1.5580E-01 1.6240E-01

1.2970E-01 1.1130E-01 1.2430E-01 6.2090E-02 5.0720E-02 2.1060E-01 1.1190E+01

4.9730E+00 1.0840E+01 2.2720E-01 5.0260E-02 4.3180E-01 1.8660E+01 1.0640E+01

2.0400E+00 5.6540E-02 1.0140E+00 7.3630E+00 3.8690E+00 9.2880E-02 3.5990E-01

2.6540E-01 1.1660E-01 4.7090E-02 4.3130E-01 6.4470E-01 1.5250E-01 8.7550E-02

2.5930E-01 1.0370E-01 6.5450E-02 5.7640E-02 4.3960E-02 5.3560E-02 5.5620E-02

3.6180E-02 2.0890E-02 5.2950E-03 6.6750E-03 7.2790E-03 3.8890E-03 1.2550E-02

2.3230E-02 1.8330E-02 1.9750E-02 7.0030E-03 9.4400E-03 8.0560E-03 1.0720E-02

1.0220E-02 2.5540E-02 1.6410E-02 2.5920E-02 1.0930E-02 1.6440E-02 1.1290E-02

8.3660E-03 9.7010E-03 1.2190E-02 1.0410E-02 4.6840E-03 4.4110E-03 1.0180E-02

9.5640E-03 5.9480E-03 1.0510E-02 1.6170E-02 1.8040E-02 1.3150E-02 1.0450E-02

2.3060E-02 1.9290E-02 1.4850E-02 3.7430E-03 1.3020E-02 1.5090E-02 9.4380E-03

7.1770E-03 1.4730E-02 1.4720E-02 1.4000E-02 1.3920E-02 1.4130E-02 6.6380E-03

1.2270E-02 1.0620E-02 7.6150E-03 6.4410E-03 1.0570E-02 1.2590E-02 8.1180E-03

6.3200E-03 5.9710E-03 4.5990E-03 3.3570E-03 2.9370E-03 4.3690E-03 3.7190E-03

3.4760E-03 3.8790E-03 1.1150E-02 6.9350E-03 4.2500E-03 1.8610E-03 7.2060E-03

6.1880E-03 3.7040E-03 2.6760E-03 7.1360E-03 6.6190E-03 5.4060E-03 5.5710E-03

2.0330E+00 9.1470E-02 3.0550E-01 3.7680E-01 3.6490E-01 1.4230E-01 4.1110E-01

1.2460E+00 7.8580E-01 1.2690E-01 2.1000E-01 8.8960E-02 2.8960E-02 6.5850E-02

4.6160E-02 1.2160E-02 1.0750E-01 1.3970E-01 1.8220E-01 5.5990E-02 8.1460E-02

1.0940E-01 7.9040E-02 2.3170E-02 8.1280E-02 1.2160E-01 1.2920E-01 6.6820E-02

7.4030E-02 5.4700E-02 3.7680E-02 5.0360E-02 2.8420E-01 1.0450E+01 6.0120E-01

6.9980E+00 2.5900E-02 3.7700E-02 3.2060E-01 1.0680E+01 8.6560E+00 1.8520E+00

4.5270E-02 2.4270E+00 5.6570E+00 1.3640E-02 1.3970E-01 2.3020E-01 1.7110E-01

8.9170E-03 7.1030E-02 3.8480E-01 3.8260E-01 2.2550E-02 1.2480E-01 1.5280E-01

2.3160E-02 5.2430E-02 4.1600E-02 2.9900E-02 3.5840E-02 2.7120E-02 1.2170E-02

3.5300E-03 3.4860E-03 4.8380E-03 3.5750E-03 3.4210E-03 1.2900E-02 1.5620E-02

1.7240E-02 1.8120E-03 6.8890E-03 7.0970E-03 7.5460E-03 1.3190E-03 1.3350E-02

1.5810E-02 2.1480E-02 3.4400E-03 1.0630E-02 1.0290E-02 6.8660E-03 4.3800E-03

7.3920E-03 8.1620E-03 4.8110E-03 1.4790E-03 4.3850E-03 7.0310E-03 6.7960E-03

3.8840E-03 8.7740E-03 1.2870E-02 1.3060E-02 2.5580E-03 1.1400E-02 1.5570E-02

1.5120E-02 7.4740E-04 4.5020E-03 1.0170E-02 1.1980E-02 1.6020E-03 7.4620E-03

1.1210E-02 1.3410E-02 8.0450E-03 8.4220E-03 6.3450E-03 5.1910E-03 9.3360E-03

6.4990E-03 3.6840E-03 6.8210E-03 6.7140E-03 6.1830E-03 5.5360E-03 2.6630E-03

4.4270E-03 2.7740E-03 1.4050E-03 1.6470E-03 3.2690E-03 3.0280E-03 2.3530E-03

7.3290E-03 4.9240E-03 2.5870E-03 1.1860E-03 4.4010E-03 4.3430E-03 2.9040E-03

1.6750E-03 2.8010E-03 5.5010E-03 4.7090E-03 3.4750E-03 2.3670E-02 9.8910E-02

2.3750E-01 2.0900E-01 5.5720E-02 1.0220E-01 3.2920E-01 8.0400E-01 4.1130E-02

1.4090E-01 2.9860E-02 8.7730E-03 3.5810E-02 2.5980E-02 7.3440E-04 1.9150E-02

1.0350E-01 9.7300E-02 1.7030E-02 5.4580E-02 3.4270E-02 5.7190E-02 3.3590E-03

3.2120E-02 6.2220E-02 7.9310E-02 3.2860E-02 2.6650E-02 4.1920E-02 1.5170E-02

1.3860E-02 6.5380E-02 2.2610E-01 6.8710E+00 2.0730E+00 1.2640E-02 1.1050E-02

2.0810E-02 1.7620E-01 4.7650E+00 5.8820E+00 1.5000E-02 4.7800E-02 3.9930E+00

1.4150E-03 2.3040E-02 1.3110E-01 1.2150E-01 4.2440E-03 4.1970E-03 7.1530E-02

3.4330E-01 4.8500E-03 3.6530E-02 1.0870E-01 4.6040E-03 2.8970E-02 3.0350E-02

8.9690E-03 1.8250E-02 1.4570E-02 5.4720E-03 1.7650E-03 1.5050E-03 2.3340E-03

2.1250E-03 7.4920E-04 4.1190E-03 1.0540E-02 9.2250E-03 2.0280E-04 2.6060E-03

5.6990E-03 3.7130E-03 3.7650E-06 2.2330E-03 1.3160E-02 1.0680E-02 7.2590E-04

4.6060E-03 6.9890E-03 3.3300E-03 1.5860E-03 3.6550E-03 3.9490E-03 3.1550E-03

4.8650E-04 1.3840E-03 3.4990E-03 4.6050E-03 1.0820E-03 3.9660E-03 5.9680E-03

8.2750E-03 3.4880E-04 3.6870E-03 9.0950E-03 9.5070E-03 1.2320E-04 1.0210E-03

4.0670E-03 8.3810E-03 1.6510E-04 2.3450E-03 6.3100E-03 7.9450E-03 3.8200E-03

3.6700E-03 3.9130E-03 1.6210E-03 5.1970E-03 4.5500E-03 1.0630E-03 3.5700E-03

2.2560E-03 3.7400E-03 3.0590E-03 8.7500E-04 2.6150E-03 1.8920E-03 2.6420E-04

3.7870E-04 1.9000E-03 1.9110E-03 9.5820E-04 3.6640E-03 2.5600E-03 1.1990E-03

5.8840E-04 2.0500E-03 2.0630E-03 1.9280E-03 6.1110E-04 7.6500E-04 2.9850E-03

3.1140E-03 1.3800E-03 1.5600E+01 4.9530E+00 2.2270E+00 2.0390E+00 7.2640E-01

1.6820E-01 3.7950E-02 1.2700E+00 5.0140E-01 1.7390E-01 5.7570E-01 1.1800E-01

3.3290E-02 1.7190E+00 5.8420E-01 1.6360E-01 4.4500E-02 1.7090E+00 5.0900E-01

1.5590E-01 4.9700E-02 1.2130E+00 4.7210E-01 1.5340E-01 5.0610E-02 8.7700E-01

3.8650E-01 1.6810E-01 6.5420E-02 6.2590E-01 2.7030E-01 9.9470E-02 3.0120E-02

5.8370E-03 5.9750E-01 3.0070E-01 1.2820E-01 4.4150E-02 1.1400E-02 2.0470E-03

2.1740E-01 9.5710E-02 1.8840E-02 1.1960E+01 3.0280E-01 8.9570E-02 1.9130E-02

5.7260E+00 7.1520E-01 1.0490E-01 2.7910E-02 3.6500E-01 1.4220E-01 2.0610E-02

7.9950E-01 3.5620E-01 1.7310E-01 9.5920E-02 5.6730E-02 2.5970E-02 1.1160E-02

8.4070E-02 1.2150E-01 7.2630E-02 9.6900E-03 4.4660E+00 4.6300E-01 3.6730E-02

4.2280E-03 2.0130E-01 9.3590E-02 2.3850E-02 2.8540E-03 2.2950E-01 1.6280E-01

2.9360E-02 2.8070E-03 2.0840E+00 4.4940E-02 8.4090E-03 1.2950E-03 8.5620E-01

2.8560E-02 5.8580E-03 1.7700E-03 1.0480E+00 1.3980E-01 1.6210E-02 2.7040E-03

1.5340E+00 1.7280E-01 2.4130E-02 3.7480E-03 3.7120E+00 5.3380E-01 1.9930E-02

3.5110E-03 1.0050E+00 1.2180E-01 2.6100E-02 3.4780E-03 2.7720E-01 1.0100E-01

2.5770E-02 3.1050E-03 3.0390E-02 1.2790E-02 2.3550E-03 4.0770E-01 3.3940E-02

1.1330E-02 2.3240E-03 6.0670E-02 2.0710E-02 6.2480E-03 1.2980E-03 1.5740E-01

1.5990E-02 4.1230E-03 8.1350E-04 8.0010E-02 2.3620E-02 7.0270E-03 1.1440E-03

2.3190E-02 8.6820E-03 5.5320E-03 7.6460E-04 1.0430E-01 8.5780E-03 2.3170E-03

3.6280E-04 1.8450E-01 3.6630E-02 5.5260E-03 1.0220E-03 1.8030E+01 4.7690E+00

8.8790E-01 8.1450E-01 5.5740E-01 1.4160E-01 7.6530E-01 5.5530E-01 2.3150E-01

2.7150E-01 2.5090E-01 6.1080E-02 4.1380E-01 8.9990E-01 5.4990E-01 1.7320E-01

5.0530E-01 8.9790E-01 4.1260E-01 1.4310E-01 3.8940E-01 6.0880E-01 3.9730E-01

1.5030E-01 4.4560E-01 4.2350E-01 2.3770E-01 9.6700E-02 2.3240E-01 2.8900E-01

1.8690E-01 9.5310E-02 3.8310E-02 2.1990E-01 2.2080E-01 2.0150E-01 1.3560E-01

6.6270E-02 2.1510E-02 1.2260E-01 7.7490E-02 6.5290E-02 1.6440E+00 7.9670E+00

2.0340E-01 7.3120E-02 7.2030E-01 3.5860E+00 7.5930E-01 1.0330E-01 2.1950E-01

1.2180E-01 8.3790E-02 3.5600E-01 4.0690E-01 2.6250E-01 1.1400E-01 3.6890E-02

2.6970E-02 1.1340E-02 6.7240E-02 9.0860E-02 2.8970E-02 4.3410E-02 9.2310E-02

3.1990E+00 5.6880E-01 4.2780E-02 6.5320E-02 1.4740E-01 8.7940E-02 2.8070E-02

9.1550E-02 2.8690E-01 1.7620E-01 3.5340E-02 2.7650E-01 1.3890E+00 3.2830E-02

7.8380E-03 1.5660E-01 5.6300E-01 1.9640E-02 4.8150E-03 1.3940E-01 6.5780E-01

1.4990E-01 1.7820E-02 7.2490E-02 9.9590E-01 1.9150E-01 2.7550E-02 3.9670E-01

3.3050E+00 4.7960E-01 2.1750E-02 7.1220E-02 7.0480E-01 1.3470E-01 3.0130E-02

7.2990E-02 1.2850E-01 9.2500E-02 3.0380E-02 1.8760E-02 1.0820E-02 7.1020E-03

7.5860E-02 2.5620E-01 1.8700E-02 9.9120E-03 2.0690E-02 3.0190E-02 1.4980E-02

6.5830E-03 3.2540E-02 9.5550E-02 1.0850E-02 3.5260E-03 1.9280E-02 4.5660E-02

1.9750E-02 7.9320E-03 1.8560E-02 6.6770E-03 2.6140E-03 3.1980E-03 2.0190E-02

6.4230E-02 6.1370E-03 1.9850E-03 3.2210E-02 1.0990E-01 3.6020E-02 5.9940E-03

1.4680E+01 3.0510E-01 6.8540E-01 4.6070E-01 3.5850E-01 4.4900E-01 4.4950E-01

2.6090E-01 1.2110E-01 1.9970E-01 1.1640E-01 7.7820E-02 3.8460E-01 6.1030E-01

4.5990E-01 1.5440E-01 4.0990E-01 5.9270E-01 3.1520E-01 1.0970E-01 3.3160E-01

4.0590E-01 3.2440E-01 2.2870E-01 2.9710E-01 2.5130E-01 1.2930E-01 7.5560E-02

1.6110E-01 1.9030E-01 1.4200E-01 6.8500E-02 4.3940E-02 1.5850E-01 1.4740E-01

1.2930E-01 1.0710E-01 6.3540E-02 5.5610E-02 7.4000E-02 6.9300E-02 2.0570E-01

1.8870E+00 5.1970E+00 1.2850E-01 1.0370E-01 7.4670E-01 2.4060E+00 5.7600E-01

1.1110E-01 1.2280E-01 8.3350E-02 1.7310E-01 2.6250E-01 2.4330E-01 1.7550E-01

2.3730E-02 2.1140E-02 1.1360E-02 5.0440E-02 5.1200E-02 4.0330E-02 3.0560E-02

1.2960E-02 9.8340E-02 3.3540E+00 4.3880E-01 9.7110E-03 6.0550E-02 1.0380E-01

7.5030E-02 1.0470E-03 1.0500E-01 1.9090E-01 1.4530E-01 2.7330E-02 3.2620E-01

9.0360E-01 2.1730E-02 1.5710E-02 1.3950E-01 3.6220E-01 1.2790E-02 1.6010E-02

1.4970E-01 4.4390E-01 1.1460E-01 1.3200E-02 6.4360E-02 7.3580E-01 1.5120E-01

1.9150E-02 4.7690E-01 2.2320E+00 3.6010E-01 1.5910E-02 5.6880E-02 5.2230E-01

1.0960E-01 1.0550E-02 6.6160E-02 8.5810E-02 7.9620E-02 1.0120E-02 1.0460E-02

6.8010E-03 1.9230E-02 7.0130E-02 1.6900E-01 1.2580E-02 6.2420E-03 1.4980E-02

2.0600E-02 1.1980E-02 7.5470E-03 2.9780E-02 6.1450E-02 6.8820E-03 4.8150E-03

1.5800E-02 3.2630E-02 1.6770E-02 1.3920E-02 3.6710E-03 2.9530E-03 2.0940E-03

4.0200E-03 1.9970E-02 4.1240E-02 4.0230E-03 5.5120E-03 3.5980E-02 7.3920E-02

2.7700E-02 8.7990E-02 3.0760E-01 5.0900E-01 3.0540E-01 2.4050E-01 3.1480E-01

2.2550E-01 5.2240E-02 1.1030E-01 1.2830E-01 2.1400E-02 7.2670E-02 3.0300E-01

6.2650E-01 4.9590E-02 1.4270E-01 3.1470E-01 4.7640E-01 3.3980E-02 9.9650E-02

2.6080E-01 3.8510E-01 1.1490E-01 1.6720E-01 1.9070E-01 1.3220E-01 1.5690E-02

7.3940E-02 1.1910E-01 1.2940E-01 8.4800E-02 4.9210E-03 4.0640E-02 1.0260E-01

1.2400E-01 1.0340E-01 5.6910E-02 1.7470E-02 6.2360E-02 5.2680E-02 4.4170E-02

2.2800E-01 1.4360E+00 3.2330E+00 2.7710E-02 1.0340E-01 5.7580E-01 1.8960E+00

4.4220E-02 1.0900E-01 5.9630E-02 9.5910E-02 1.1400E-01 1.7550E-01 1.8430E-01

1.4210E-02 1.3510E-02 9.4250E-03 3.3620E-02 2.1270E-02 4.8960E-02 1.1690E-02

2.2240E-03 1.3890E-02 7.6800E-02 2.5460E+00 2.4420E-04 1.1290E-02 4.8880E-02

1.0330E-01 9.8930E-05 1.1390E-03 7.9900E-02 2.1030E-01 3.6980E-03 3.3350E-02

2.3510E-01 5.6590E-01 3.2740E-03 1.8050E-02 1.1600E-01 2.5260E-01 2.6580E-03

1.7730E-02 1.1450E-01 3.4840E-01 1.6160E-03 1.4480E-02 5.1680E-02 5.7030E-01

3.3330E-03 2.1410E-02 4.8460E-01 1.7410E+00 1.4010E-03 1.8070E-02 4.7120E-02

4.0610E-01 9.8300E-05 1.2360E-02 5.4320E-02 9.3550E-02 4.6340E-03 8.7680E-03

4.8740E-03 5.5290E-03 1.9070E-02 5.4530E-02 1.0260E-01 1.2970E-03 6.5810E-03

1.1980E-02 1.7020E-02 1.9800E-03 7.7270E-03 2.3020E-02 3.8110E-02 5.1170E-04

5.3410E-03 1.3160E-02 2.8210E-02 9.2780E-03 1.6740E-03 3.1920E-03 9.5440E-04

9.5750E-04 4.4050E-03 1.4790E-02 2.5680E-02 9.4430E-04 6.0330E-03 2.7700E-02

5.8620E-02 1.1170E+01 3.3580E+00 1.3730E+00 1.1260E+00 5.2840E-01 7.2170E-02

2.4390E-01 9.6970E-02 2.1000E-02 3.7390E-01 1.9340E-01 8.5240E-02 2.3610E-02

3.4420E-01 1.7160E-01 8.4140E-02 3.7150E-02 3.4210E-01 1.6730E-01 7.3020E-02

2.7300E-02 2.6260E-01 1.3830E-01 7.5540E-02 3.4230E-02 1.8760E+00 6.9990E-01

1.9070E-01 3.9620E-02 8.2140E-03 2.5490E+00 8.2780E-01 2.2880E-01 5.5160E-02

1.4390E-02 4.7730E-03 1.2620E+00 1.6680E-01 1.6270E-02 2.8980E+01 4.6850E+00

7.2440E-02 1.2330E-02 4.0470E+01 5.0880E+00 3.6390E-01 5.9590E-02 1.8850E+01

1.0140E-01 3.1040E-02 8.2410E-02 5.1600E-02 2.7260E-02 1.1430E-02 4.8360E-02

3.0120E-02 1.3360E-02 4.4260E-03 1.9750E-02 4.3250E-03 1.9520E-03 8.7460E-02

4.3380E-02 1.8290E-02 4.6800E-03 1.1620E-02 6.6330E-03 3.2940E-03 1.2880E-03

2.9270E-02 1.6050E-02 7.3320E-03 2.0760E-03 2.3640E-01 4.3890E-02 4.6200E-03

9.4610E-04 2.8540E-01 5.3390E-02 8.9640E-03 2.9280E-03 2.8610E-02 1.0630E-02

4.5510E-03 1.3650E-03 4.8050E-02 2.5440E-02 1.1460E-02 3.9520E-03 2.4580E-01

4.7230E-02 1.0950E-02 2.6210E-03 2.3020E-02 1.0610E-02 4.1930E-03 1.0670E-03

2.5700E-02 1.0900E-02 4.5430E-03 1.6150E-03 1.3840E-01 1.6100E-02 8.4060E-03

2.9500E-02 1.5750E-02 6.6480E-03 2.0410E-03 1.2870E-02 7.7480E-03 4.7240E-03

2.8230E-03 1.9810E-02 1.3860E-02 6.8190E-03 2.2500E-03 4.6810E-03 3.2520E-03

1.9870E-03 9.1760E-04 1.1240E-02 2.3440E-02 2.4190E-03 1.2600E-03 8.2770E-03

3.6230E-03 1.6570E-03 7.0000E-04 2.4610E-02 5.1600E-03 1.2730E-03 4.2890E-04

1.1030E+01 2.0930E+00 6.6420E-01 2.9600E-01 3.3270E-01 1.3050E-01 8.6130E-02

5.5120E-02 1.2980E-01 1.5410E-01 1.3130E-01 9.3830E-02 1.4440E-01 1.5880E-01

1.0880E-01 6.6360E-02 1.1800E-01 1.5670E-01 1.1820E-01 7.1970E-02 1.3070E-01

1.4660E-01 8.0760E-02 3.2730E-02 3.7170E-01 8.7820E-01 6.2200E-01 2.5860E-01

5.2450E-02 5.4830E-02 1.3190E+00 8.9540E-01 3.7170E-01 1.0260E-01 1.7370E-02

2.9680E-01 6.5870E-01 1.2840E-01 4.6480E+00 1.4520E+01 6.0070E+00 7.2610E-02

3.5180E-01 2.7800E+01 5.9670E+00 4.3450E-01 4.3350E+00 9.8410E+00 5.3540E-02

4.6290E-02 3.1400E-02 2.8360E-02 2.2330E-02 3.4810E-02 2.1600E-02 1.2510E-02

3.4060E-03 6.9460E-03 9.6080E-03 1.8200E-03 3.1840E-02 3.5580E-02 2.7930E-02

2.0240E-02 4.8520E-03 4.7410E-03 4.1420E-03 3.4340E-03 1.0270E-02 1.1740E-02

1.0550E-02 8.3300E-03 4.8070E-02 1.2080E-01 5.0930E-02 4.2430E-03 5.7340E-02

1.3920E-01 4.9990E-02 6.2900E-03 8.2700E-03 1.3460E-02 7.6550E-03 4.5800E-03

1.9150E-02 2.0290E-02 1.6000E-02 1.1770E-02 2.0850E-02 1.6090E-01 4.5260E-02

1.1750E-02 8.0430E-03 9.7500E-03 7.3530E-03 5.0200E-03 6.5110E-03 1.1540E-02

7.8280E-03 4.8140E-03 4.3390E-02 7.2610E-02 5.7220E-03 1.5730E-02 1.1000E-02

8.5350E-03 5.3420E-03 6.8140E-03 6.6760E-03 4.8030E-03 2.8470E-03 1.3860E-02

6.9410E-03 6.6380E-03 4.6460E-03 2.7550E-03 1.8740E-03 1.7080E-03 1.6800E-03

8.4310E-03 7.2850E-03 1.2280E-02 8.7140E-04 3.6220E-03 3.4750E-03 2.2140E-03

8.6280E-04 1.8060E-03 1.2570E-02 5.2410E-03 1.1740E-03 7.1190E+00 2.8320E-01

3.5380E-01 2.2660E-01 5.8040E-02 7.4700E-02 4.8170E-02 2.9890E-02 8.3520E-02

1.0970E-01 1.1370E-01 5.9700E-02 8.7050E-02 1.0090E-01 7.2360E-02 3.5990E-02

7.8540E-02 1.0370E-01 9.3080E-02 7.2360E-02 8.0770E-02 7.3220E-02 3.6260E-02

3.2920E-02 3.6540E-01 4.5280E-01 3.9290E-01 2.2680E-01 1.7660E-02 3.4270E-02

6.1150E-01 6.6590E-01 3.8390E-01 1.2580E-01 4.2080E-02 3.2460E-01 3.5430E-01

7.3590E-02 5.9940E+00 6.7680E+00 4.2610E+00 8.2120E-02 2.9390E-01 1.8070E+01

4.7980E+00 5.3770E-01 5.0280E+00 3.9160E+00 1.9550E-02 2.5360E-02 2.2310E-02

1.8560E-02 2.1930E-02 1.6070E-02 8.4600E-03 2.2120E-03 3.3440E-03 5.5140E-03

3.8530E-03 8.1720E-03 1.9160E-02 2.6180E-02 2.3240E-02 1.4500E-03 2.8230E-03

3.5570E-03 3.5380E-03 2.3360E-03 6.4760E-03 8.8660E-03 9.6510E-03 4.5310E-03

5.0840E-02 5.5290E-02 3.4900E-02 8.8610E-03 4.9800E-02 6.7440E-02 4.1690E-02

2.9670E-03 5.4320E-03 9.0410E-03 5.6510E-03 5.8850E-03 1.1120E-02 1.4960E-02

1.2700E-02 5.8870E-03 1.3180E-02 1.0130E-01 3.4210E-02 1.8950E-03 4.8090E-03

7.5740E-03 6.0630E-03 1.8840E-03 4.1060E-03 8.0270E-03 6.6040E-03 1.5080E-02

3.8730E-02 2.7550E-02 6.6450E-03 8.5330E-03 7.4630E-03 4.2040E-03 3.7270E-03

3.9280E-03 3.6860E-03 2.6810E-03 6.8200E-03 6.6370E-03 5.1300E-03 2.7990E-03

1.1840E-03 1.3840E-03 1.4070E-03 1.2410E-03 5.6210E-03 2.6880E-03 6.8290E-03

4.5020E-03 1.6580E-03 2.2150E-03 1.8990E-03 1.0400E-03 7.3290E-04 1.0340E-03

8.5910E-03 3.1240E-03 7.8080E-02 2.6430E-01 8.9050E-02 1.9140E-02 4.4940E-02

2.6250E-02 1.6390E-03 3.0950E-02 5.9270E-02 7.6140E-02 1.9660E-02 3.9150E-02

4.8950E-02 5.1950E-02 7.8930E-03 2.9020E-02 5.1120E-02 6.6960E-02 3.4210E-02

3.2730E-02 3.6260E-02 2.8610E-02 8.5380E-03 2.5100E-02 2.1260E-01 2.8960E-01

1.9850E-01 6.2630E-03 9.9170E-03 1.7520E-02 2.2160E-01 3.7510E-01 2.8800E-01

4.8970E-03 5.4220E-02 3.0000E-01 1.1690E-02 7.1470E-02 4.2590E+00 4.1910E+00

3.6750E-02 3.9410E-02 1.9660E-01 1.1320E+01 2.3680E-02 8.2240E-01 3.8830E+00

5.8460E-03 1.4020E-02 1.3920E-02 8.8780E-03 1.0300E-02 8.7970E-03 4.0610E-03

1.1060E-03 1.5070E-03 1.6430E-03 3.0540E-03 4.6000E-04 8.5590E-03 1.3220E-02

1.5880E-02 2.2570E-04 1.3370E-03 1.9430E-03 2.1990E-03 5.0980E-06 2.5470E-03

4.8180E-03 6.2450E-03 9.4450E-04 4.2400E-03 3.4880E-02 3.4170E-02 2.9150E-03

6.2580E-03 4.1670E-02 3.8830E-02 5.4630E-04 2.6460E-03 3.3160E-03 4.9480E-03

8.2240E-04 5.1400E-03 7.2040E-03 8.5320E-03 8.9190E-04 5.6050E-03 8.4490E-03

6.4870E-02 1.1930E-04 1.9190E-03 3.3130E-03 4.9510E-03 2.5980E-04 1.6330E-03

2.8390E-03 5.7040E-03 6.2410E-03 8.3980E-03 2.6440E-02 2.0410E-03 5.3410E-03

4.2030E-03 2.2400E-03 1.7110E-03 1.7640E-03 1.8200E-03 1.7070E-03 2.2500E-03

4.6460E-03 2.7990E-03 9.7000E-04 3.2280E-04 8.7710E-04 8.0140E-04 6.7530E-04

2.8100E-03 9.3780E-04 1.9490E-03 3.8270E-03 7.0000E-04 8.6280E-04 1.0390E-03

6.2520E-04 2.0600E-04 5.2430E-04 5.8000E-04 4.5460E-03 9.2000E-01 3.8320E-01

3.4770E+00 2.3220E-01 6.9840E-02 1.6620E-01 9.0660E-02 4.7030E-02 2.3490E-02

6.0300E-01 2.8080E-01 1.2390E-01 5.3790E-02 1.5490E-01 9.9630E-02 5.8360E-02

3.0730E-02 5.3920E-01 3.3610E-01 1.6080E-01 5.5420E-02 2.3350E-01 1.5880E-01

9.1330E-02 4.5290E-02 1.7130E-02 2.4300E-01 1.9660E-01 1.3240E-01 7.4860E-02

3.4720E-02 1.2020E-02 2.2130E-01 1.3230E-01 4.0450E-02 3.3000E+00 8.8090E-01

1.8520E-01 4.6240E-02 4.9350E-01 3.8820E-01 2.1120E-01 7.5540E-02 7.2750E+00

3.1550E+00 4.4410E-02 3.1650E-01 1.3810E-01 5.5010E-02 2.2280E-02 2.8340E-01

1.5670E-01 8.6780E-02 7.5480E-01 7.8350E-01 4.7980E-01 1.8200E-02 1.0930E-01

5.0080E-02 2.0040E-02 8.2610E-03 1.5080E-02 8.5370E-03 4.2520E-03 1.7250E-03

2.6770E-02 1.3320E-02 5.7350E-03 1.8390E-03 1.2550E+00 3.9780E-01 7.5820E-02

9.6250E-03 1.6800E+00 3.9770E-01 5.8640E-02 5.6440E-03 6.6680E-02 2.8450E-02

1.0410E-02 3.2190E-03 1.1610E-01 5.4540E-02 2.2800E-02 8.0790E-03 3.8220E-02

2.3550E-02 1.3920E-02 6.1900E-03 1.0260E-02 5.7850E-03 3.0630E-03 1.5980E-03

6.5670E-03 3.9640E-03 1.9970E-03 7.9140E-04 1.5540E+00 6.7850E-01 1.5360E-02

8.6980E-01 2.7510E-01 4.2970E-02 9.4610E-03 1.2350E-01 1.0000E-01 5.8690E-02

2.5410E-02 1.0600E+00 2.7940E-01 6.8230E-02 1.7740E-02 1.8040E-01 8.0560E-02

3.1680E-02 9.2360E-03 7.0960E-01 2.2630E-01 1.1240E-01 1.5540E-02 2.8500E-01

9.9770E-02 4.4040E-02 2.1240E-02 6.3430E-02 2.8430E-02 1.0870E-02 3.1790E-03

3.9580E-01 2.3210E-01 2.1590E+00 1.3030E-01 3.1460E-02 7.3550E-02 6.7790E-02

4.5590E-02 1.1610E-01 2.7360E-01 2.1280E-01 1.1080E-01 5.9960E-02 5.9750E-02

5.8290E-02 5.1730E-02 2.6590E-01 1.7690E-01 1.7590E-01 1.1760E-01 1.0030E-01

8.4920E-02 8.0000E-02 6.5620E-02 3.7030E-02 1.5120E-01 5.7050E-02 5.6720E-02

7.5270E-02 7.5220E-02 4.6500E-02 1.1190E-01 4.8920E-02 1.0100E-01 1.6770E-01

1.6960E+00 8.9740E-01 1.8750E-01 3.2010E-01 7.6560E-02 1.5710E-01 2.2460E-01

3.1460E+00 9.5280E-01 2.8750E+00 4.9700E-02 1.3850E-01 1.0930E-01 5.6530E-02

1.5630E-01 1.5590E-01 3.9730E-02 4.6440E-01 3.6510E-01 1.3520E-01 3.9650E-01

1.2250E-02 4.7690E-02 4.1650E-02 2.3690E-02 3.2440E-03 5.6070E-03 5.6950E-03

4.9740E-03 2.5000E-03 1.0820E-02 1.0990E-02 7.3840E-03 3.5580E-02 6.4150E-01

3.5940E-01 8.2650E-02 2.4030E-02 8.7530E-01 4.3220E-01 1.0380E-01 9.1960E-03

2.8000E-02 2.2560E-02 1.2030E-02 1.6330E-02 4.8220E-02 4.3350E-02 2.6830E-02

1.4810E-02 1.3760E-02 1.3430E-02 1.0240E-02 2.4160E-03 4.8950E-03 4.1760E-03

2.4580E-03 1.3990E-03 2.7550E-03 2.5500E-03 2.2260E-03 6.7540E-01 2.1350E-01

6.0890E-01 3.5160E-02 4.2280E-01 2.3710E-01 4.6440E-02 8.1240E-02 2.8100E-02

4.1360E-02 5.1990E-02 4.3020E-02 5.6130E-01 2.8860E-01 5.1640E-02 1.6480E-02

7.6200E-02 6.7320E-02 3.8860E-02 4.7270E-01 1.1200E-01 3.9970E-02 8.6360E-02

4.7470E-02 1.5750E-01 8.1290E-02 1.7120E-02 1.1480E-02 2.5080E-02 2.1330E-02

1.3000E-02 6.9720E-02 1.3030E-01 1.0570E+00 9.0840E-03 1.7200E-02 3.3800E-02

4.7930E-02 3.4530E-02 5.9820E-02 1.2090E-01 1.3870E-01 1.4180E-02 3.1940E-02

3.6470E-02 3.2330E-02 6.0460E-02 1.5100E-01 1.0750E-01 4.6980E-02 2.0810E-02

5.4160E-02 5.2710E-02 3.7910E-02 1.9120E-02 1.9190E-03 7.6600E-02 7.5230E-02

4.8060E-02 2.2120E-02 6.9180E-03 1.7070E-02 8.0840E-02 3.3430E-02 5.6870E-02

8.2710E-02 6.8580E-01 6.4990E-01 2.0830E-02 2.0200E-01 1.3240E-01 3.3560E-02

4.2800E-02 2.8740E+00 5.7840E-01 1.1380E-02 2.7120E-02 6.3740E-02 7.4880E-02

8.6590E-02 3.9720E-02 4.7070E-02 2.4990E-01 1.8270E-02 3.6160E-01 7.9580E-02

3.4020E-03 6.7520E-03 2.1230E-02 3.1290E-02 3.4020E-04 1.8880E-03 3.4220E-03

4.1350E-03 8.0300E-05 1.4780E-03 5.2260E-03 9.0010E-03 8.7940E-03 2.1450E-02

3.2040E-01 3.6600E-01 6.5690E-03 1.3610E-02 4.7040E-01 3.4530E-01 1.3220E-03

5.5520E-03 1.3550E-02 1.5590E-02 2.1600E-03 9.4690E-03 2.3490E-02 3.2620E-02

3.9390E-03 7.6440E-03 8.2970E-03 5.7130E-03 7.8540E-04 1.1270E-03 2.0610E-03

2.5230E-03 9.9780E-05 8.8460E-04 1.5730E-03 2.2180E-03 1.4790E-02 6.0790E-01

1.2550E-01 1.1640E-02 1.7260E-02 1.7030E-01 2.3310E-01 1.2780E-02 4.7530E-02

3.1850E-02 9.2740E-03 2.3830E-02 1.4240E-02 2.1780E-01 2.1280E-01 1.5900E-03

8.0910E-03 3.5410E-02 5.1770E-02 2.3600E-01 1.5400E-02 8.6310E-02 1.7840E-02

2.9280E-02 1.3360E-02 5.6170E-02 5.2500E-02 9.1460E-04 7.0710E-03 1.3250E-02

1.4160E-02 2.9860E+00 5.2190E-01 4.0270E-01 2.1540E-01 1.1520E-01 5.9110E-02

5.4030E-01 3.6990E-01 2.5850E-01 1.7340E-01 3.0380E-01 1.9400E-01 1.1280E-01

5.7470E-02 4.1420E-01 2.8930E-01 1.7840E-01 7.3140E-02 7.9250E-02 4.9420E-02

2.7310E-02 1.3990E-02 5.6280E-03 9.0920E-02 5.2400E-02 2.8330E-02 1.4180E-02

6.3790E-03 2.3060E-03 3.8730E-02 2.6710E-02 1.1930E-02 3.0130E-01 1.2980E-01

5.0850E-02 1.8000E-02 1.2020E-01 7.5810E-02 4.0960E-02 1.8280E-02 4.6060E-01

2.2840E-01 1.7500E-02 1.7240E-01 8.5030E-02 4.1160E-02 1.9520E-02 1.9890E-01

1.8750E-01 1.2050E-01 7.6360E+00 1.2480E+01 5.3830E+00 1.4790E-01 3.5960E-02

1.9940E-02 1.1610E-02 7.0350E-03 1.3210E-02 7.3110E-03 3.5560E-03 1.3610E-03

2.7380E-02 1.3980E-02 6.2090E-03 2.0130E-03 2.2850E+01 5.4530E+00 7.7040E-01

3.2150E-02 7.3340E-02 3.0890E-02 1.9660E-02 1.3040E-02 2.9380E-02 1.7970E-02

1.1200E-02 6.2640E-03 2.5440E-02 1.8540E-02 1.4540E-02 1.3510E-02 2.6430E-02

1.6510E-02 8.2390E-03 3.4910E-03 9.3340E-03 5.8360E-03 3.9080E-03 1.8900E-03

1.2770E-02 8.5680E-03 4.9520E-03 2.2520E-03 4.5000E-01 1.6210E-01 5.3680E-03

3.0860E-02 1.7160E-02 1.0130E-02 5.1480E-03 2.7200E-02 1.9690E-02 1.1380E-02

6.8030E-03 1.7460E-01 3.8970E-02 1.2430E-02 5.0800E-03 2.1350E-02 1.0310E-02

4.6490E-03 1.9010E-03 9.0670E-02 7.6690E-02 4.1130E-02 4.0040E-03 3.2430E-02

1.2100E-02 6.6860E-03 3.3300E-03 9.0020E-03 5.1690E-03 2.4810E-03 8.9140E-04

2.1340E+00 8.4050E-02 1.7220E-01 1.6360E-01 1.1200E-01 2.6520E-01 3.0430E-01

2.1410E-01 1.1290E-01 1.1440E-01 1.1620E-01 1.1430E-01 1.0270E-01 2.4130E-01

1.8870E-01 1.4230E-01 7.8460E-02 2.9060E-02 3.1110E-02 2.7570E-02 2.0280E-02

1.0560E-02 1.7780E-02 3.1580E-02 3.1260E-02 2.4730E-02 1.6270E-02 7.8840E-03

2.3350E-02 1.1210E-02 1.6940E-02 6.9990E-02 1.4260E-01 9.6490E-02 3.6570E-02

5.2140E-02 4.1120E-02 4.1140E-02 3.6250E-02 1.9740E-01 6.0290E-02 1.9020E-01

4.1830E-02 7.6060E-02 6.1320E-02 3.4650E-02 1.8710E-01 1.1860E-01 3.1190E-02

5.0810E+00 5.3590E+00 2.1760E+00 6.4310E+00 9.3990E-03 1.8050E-02 1.4440E-02

8.4410E-03 2.8070E-03 4.8920E-03 5.0470E-03 4.2090E-03 3.1610E-03 1.0850E-02

1.1030E-02 8.0520E-03 3.1340E-01 1.5560E+01 6.1630E+00 1.1440E+00 2.1400E-02

3.6520E-02 2.1420E-02 5.7980E-03 1.1580E-02 1.4880E-02 1.1190E-02 6.4740E-03

1.3080E-02 1.5580E-02 1.1610E-02 6.3820E-03 1.0550E-02 8.6570E-03 8.9130E-03

7.6700E-03 3.3230E-03 4.2000E-03 3.5840E-03 2.6050E-03 4.9580E-03 4.0940E-03

4.6660E-03 5.3030E-03 1.4720E-01 4.5940E-02 1.2660E-01 1.3720E-02 1.7340E-02

9.7270E-03 4.0430E-03 1.3480E-02 1.1300E-02 9.3190E-03 7.6800E-03 1.0430E-02

6.4930E-02 3.9720E-02 1.2030E-02 3.3540E-03 9.1950E-03 8.0960E-03 4.8950E-03

4.3870E-02 4.0920E-02 1.6530E-02 2.7610E-02 7.8460E-03 1.9150E-02 1.0490E-02

2.9080E-03 3.1730E-03 2.8680E-03 2.9200E-03 2.5070E-03 2.2740E-02 4.3330E-02

8.1150E-02 1.1450E-01 1.3680E-01 1.0240E-01 1.0300E-01 9.5500E-02 2.4260E-02

6.1500E-02 7.1740E-02 6.4270E-02 9.0110E-02 1.0690E-01 8.0220E-02 4.1190E-02

7.2280E-03 1.4700E-02 1.6310E-02 1.3420E-02 7.4050E-03 2.0830E-03 8.6450E-03

1.4530E-02 1.6760E-02 1.4320E-02 8.2140E-03 6.6910E-03 1.3610E-02 5.3930E-03

2.1530E-02 3.5990E-02 6.4780E-02 5.3180E-02 1.0140E-02 2.9180E-02 2.7310E-02

1.8420E-02 1.4090E-02 1.7370E-01 3.7600E-02 1.3410E-02 2.1020E-02 3.5680E-02

3.7870E-02 1.2420E-01 3.1160E-02 1.6500E-02 2.5330E+00 1.2790E-01 4.8540E+00

1.0550E+00 4.2920E-03 4.0640E-03 7.1180E-03 9.1910E-03 1.0050E-04 1.6770E-03

2.9690E-03 3.6740E-03 3.2220E-05 1.9030E-03 5.5980E-03 9.0410E-03 7.6190E-03

2.2980E-01 6.2810E+00 6.1720E+00 1.7880E-02 6.3140E-03 1.4080E-02 1.1990E-02

4.9560E-03 4.7900E-03 5.8610E-03 5.5030E-03 8.2490E-03 4.7560E-03 5.0590E-03

5.4350E-03 1.8030E-03 6.3470E-03 6.0550E-03 3.9940E-03 6.2910E-04 1.6130E-03

1.9540E-03 2.0430E-03 3.9530E-04 2.9020E-03 3.3490E-03 2.8190E-03 4.7710E-03

1.3030E-01 2.6750E-02 6.9360E-03 4.5740E-03 5.5570E-03 5.0810E-03 5.0600E-03

8.3330E-03 5.4230E-03 2.7280E-03 6.5260E-03 4.3960E-03 3.0460E-02 2.9450E-02

7.1310E-04 1.7730E-03 4.2830E-03 5.8920E-03 2.1120E-02 3.9480E-03 2.7530E-02

6.5620E-03 4.5480E-03 2.5130E-03 6.3750E-03 5.2170E-03 3.6690E-04 1.9240E-03

1.9870E-03 1.4830E-03 8.2790E+00 4.9520E-01 8.1950E-02 3.0780E+00 7.6430E-01

1.1220E-01 1.7080E-02 3.1490E+00 9.5780E-01 2.4960E-01 3.2590E-02 6.4930E-01

3.8260E-01 8.8930E-02 1.9530E-02 1.8520E-01 8.3540E-02 3.2020E-02 9.1570E-03

1.1860E-03 1.8930E-01 8.6510E-02 3.4000E-02 1.0940E-02 2.5450E-03 3.1330E-04

1.2830E-01 4.5790E-02 6.4770E-03 1.8620E-01 5.3600E-02 1.3680E-02 2.5750E-03

2.1920E-01 7.4380E-02 1.9380E-02 3.4840E-03 5.5770E-02 2.1120E-02 2.6760E-03

9.2180E-01 2.1850E-01 1.1270E-01 2.2770E-02 1.1220E-01 1.8160E-02 2.2190E-03

7.7790E-03 1.2640E-02 7.2480E-03 1.0050E-03 2.1810E+01 6.9590E-01 1.9940E-02

8.0620E-04 3.4620E+01 2.7350E+00 7.2210E-02 1.2490E-03 4.8150E+01 3.4020E+00

1.0770E-01 2.8180E-03 1.8830E-02 4.7770E-03 9.4850E-04 1.2540E-04 3.7400E-02

7.2630E-03 6.0830E-04 7.2680E-05 4.8050E-02 1.5690E-02 3.4120E-03 1.9550E-04

7.9310E+00 2.1560E-01 7.6500E-03 3.0650E-03 1.2900E-01 3.8820E-02 9.0770E-03

1.2270E-03 8.1410E-01 8.8650E-02 1.8030E-02 3.5100E-03 2.5150E+00 2.1910E-01

2.3620E-02 3.2610E-03 8.2470E-03 8.3330E-04 4.0830E-05 2.3260E-02 5.4630E-03

7.4400E-04 5.5880E-05 3.4830E-02 6.5060E-03 1.6140E-03 2.0370E-04 3.8690E-02

7.8600E-03 7.2990E-04 1.2640E-04 4.2220E-01 1.7660E-02 2.6940E-03 4.0780E-04

3.5760E-03 3.5930E-03 1.8540E-03 4.3050E-04 2.7880E-02 5.2630E-03 1.2400E-03

2.1380E-05 4.5430E-02 9.4410E-03 1.6220E-03 1.9440E-04 1.1360E+01 5.6070E-01

1.0630E+00 1.5280E+00 7.2150E-01 1.1800E-01 1.0450E+00 1.8320E+00 9.7250E-01

2.7400E-01 5.6860E-01 5.7270E-01 2.7910E-01 7.2300E-02 9.0970E-02 8.6380E-02

5.3280E-02 2.8680E-02 1.2780E-02 7.5420E-02 8.0600E-02 6.2440E-02 3.6630E-02

1.6460E-02 4.9870E-03 7.4160E-02 4.9970E-02 3.0550E-02 8.6740E-02 8.4410E-02

3.6560E-02 1.1680E-02 9.4130E-02 9.9500E-02 5.7960E-02 1.9750E-02 3.7470E-02

1.9000E-02 1.2130E-02 3.0900E-01 6.5410E-01 3.4940E-01 1.1290E-01 5.8040E-02

4.5150E-02 1.0270E-02 6.6670E-03 9.9150E-03 3.6790E-03 4.2180E-03 2.0280E+00

1.6150E+01 8.6230E-01 2.0790E-02 2.5980E+00 3.8850E+01 3.3610E+00 8.4700E-02

2.4500E-01 4.5900E+01 4.4810E+00 1.2590E-01 8.2050E-03 8.5330E-03 3.3870E-03

8.7810E-04 1.3480E-02 1.6770E-02 6.6280E-03 6.3040E-04 1.9760E-02 1.9970E-02

1.2830E-02 4.0740E-03 5.8070E-01 5.8850E+00 2.5950E-01 7.9850E-03 5.1020E-02

5.9660E-02 3.2720E-02 1.0150E-02 1.1220E-01 5.8140E-01 8.0710E-02 1.8870E-02

2.2390E-01 1.9050E+00 2.5080E-01 2.5930E-02 4.0050E-03 3.3480E-03 5.0030E-04

8.8000E-03 7.6950E-03 4.4940E-03 7.4830E-04 9.0600E-03 1.4080E-02 6.0460E-03

1.7530E-03 1.6240E-02 2.0940E-02 6.7770E-03 6.4620E-04 5.1200E-02 3.0080E-01

1.8080E-02 2.9530E-03 3.0650E-03 2.7670E-03 1.3250E-03 9.8400E-04 8.0420E-03

1.7110E-02 2.1650E-03 1.2530E-03 1.3950E-02 2.4320E-02 9.9880E-03 1.7630E-03

9.9900E+00 2.6730E-01 9.9690E-01 1.0140E+00 5.7380E-01 2.9350E-01 1.0630E+00

1.3800E+00 8.4380E-01 2.4190E-01 4.6930E-01 3.6750E-01 1.9010E-01 3.8570E-02

5.9230E-02 6.3130E-02 4.5300E-02 2.1520E-02 2.2210E-02 5.4510E-02 5.6580E-02

4.7080E-02 3.3310E-02 1.7110E-02 3.6760E-02 4.9180E-02 4.3060E-02 3.6760E-02

6.4810E-02 5.6920E-02 2.4950E-02 3.3660E-02 7.4530E-02 6.9890E-02 4.8320E-02

2.1810E-02 2.0820E-02 1.4390E-02 1.1350E-01 3.3880E-01 7.1240E-01 2.8870E-01

2.7320E-02 4.4110E-02 2.3290E-02 5.5560E-03 6.5790E-03 4.4670E-03 3.7720E-03

9.7080E-02 2.6020E+00 1.2600E+01 6.6200E-01 3.3510E-02 3.2690E+00 2.1020E+01

2.5880E+00 6.7520E-03 7.8930E-01 4.1650E+01 3.5410E+00 3.0960E-03 6.5020E-03

6.0100E-03 2.3730E-03 4.2650E-03 1.2980E-02 9.1520E-03 4.6610E-03 6.2210E-03

1.6040E-02 1.2970E-02 1.0800E-02 2.9880E-02 7.3070E-01 4.6370E+00 2.0070E-01

1.7540E-02 4.1190E-02 4.1900E-02 2.7480E-02 2.4260E-02 1.1160E-01 4.5850E-01

6.8890E-02 2.3590E-02 2.4430E-01 1.5340E+00 1.9990E-01 1.7840E-03 3.2420E-03

1.6550E-03 3.2150E-03 8.4750E-03 6.0890E-03 3.1820E-03 3.4430E-03 8.5940E-03

1.1770E-02 4.9330E-03 4.5810E-03 1.3270E-02 1.3560E-02 4.7350E-03 4.3270E-03

5.5240E-02 2.3520E-01 1.4830E-02 2.5540E-03 1.8220E-03 1.4000E-03 9.7510E-04

4.0520E-03 8.3980E-03 1.1540E-02 1.5750E-03 3.7710E-03 1.4710E-02 1.6760E-02

8.0480E-03 5.0220E-02 3.0500E-01 8.5110E-01 1.0870E+00 5.0460E-02 3.6410E-01

9.7690E-01 1.5430E+00 8.7670E-02 2.6480E-01 3.9040E-01 2.8070E-01 1.0030E-02

3.8200E-02 5.2070E-02 5.0340E-02 3.1080E-02 3.6270E-03 2.0170E-02 4.0330E-02

5.0080E-02 4.4300E-02 2.5640E-02 1.2920E-02 4.4090E-02 4.5900E-02 1.2430E-02

3.8700E-02 5.3960E-02 4.0880E-02 8.5160E-03 3.5820E-02 6.5910E-02 7.0620E-02

1.0450E-02 2.2570E-02 1.2560E-02 5.2520E-02 2.1320E-01 4.4820E-01 6.6190E-01

1.0950E-02 3.1490E-02 3.3280E-02 4.4450E-03 3.6020E-03 6.4250E-03 2.0430E-03

9.9500E-03 1.1780E-01 2.4180E+00 1.8110E+01 1.2340E-03 8.4690E-02 2.5310E+00

1.9030E+01 1.2610E-03 1.8320E-02 1.1720E+00 3.7840E+01 8.8480E-04 3.4490E-03

5.4840E-03 4.2800E-03 8.9030E-04 5.3050E-03 1.0910E-02 8.7080E-03 1.2320E-03

7.1640E-03 1.4370E-02 1.5630E-02 2.7080E-03 3.7400E-02 5.6730E-01 3.6920E+00

3.7400E-03 1.9820E-02 3.8620E-02 4.1770E-02 4.9730E-03 2.6160E-02 9.4070E-02

4.2520E-01 3.2560E-03 2.5920E-02 2.1700E-01 1.3830E+00 5.3850E-04 2.1500E-03

2.5720E-03 7.3020E-04 3.7020E-03 7.5930E-03 5.2140E-03 6.2350E-04 3.9170E-03

7.3920E-03 1.1960E-02 1.0300E-03 5.9830E-03 1.1000E-02 1.0610E-02 6.1100E-04

5.0530E-03 4.5360E-02 2.0730E-01 2.0440E-03 1.0880E-03 1.5460E-03 6.8190E-04

1.0600E-03 4.4950E-03 7.0730E-03 8.4530E-03 6.4210E-04 3.8760E-03 1.2490E-02

1.6370E-02 6.0170E+00 3.3000E-01 8.0810E-02 1.5170E+00 6.0060E-01 1.8130E-01

4.4080E-02 1.7040E+00 7.0530E-01 1.9930E-01 4.3920E-02 1.1500E-01 5.8180E-02

2.9260E-02 1.5250E-02 6.8470E-03 1.7450E-01 1.0250E-01 5.9700E-02 3.2070E-02

1.4980E-02 5.4070E-03 1.1230E-01 5.8020E-02 1.5090E-02 6.2770E-01 9.1690E-02

2.7820E-02 9.4200E-03 3.4420E-01 1.0670E-01 3.8130E-02 1.3490E-02 1.0960E-01

4.9770E-02 9.4450E-03 7.0740E-01 4.4220E-01 1.4230E-01 4.8840E-02 1.5150E-01

7.1890E-02 3.1910E-02 9.2290E-02 1.0540E-01 5.3730E-02 2.3050E-02 1.0140E+01

9.5560E-01 6.3710E-02 5.4880E-03 1.7670E-01 9.1680E-02 2.2720E-02 3.2710E-03

2.4560E-01 9.4310E-02 2.7980E-02 3.1680E-03 2.2800E-01 2.5660E-02 1.5950E-02

8.1300E-03 2.0710E+01 4.9570E-01 1.8580E-02 6.8200E-04 2.5900E+01 2.9570E+00

1.3860E-01 9.4010E-04 2.8490E+01 2.7670E+00 1.5310E-01 6.0130E-03 1.1120E+00

1.6130E-01 1.0490E-02 1.5020E-03 1.0790E+00 1.4100E-01 1.7180E-02 3.3170E-03

6.1640E-02 2.9380E-02 1.0680E-02 2.1360E-03 4.0520E-02 1.1490E-02 1.9840E-03

8.7960E-01 4.8230E-02 7.0950E-03 1.9570E-03 4.4540E-01 6.9570E-02 1.0590E-02

2.4000E-03 7.6320E-02 1.5620E-02 4.3070E-03 1.1860E-03 1.2530E-01 3.4210E-02

7.0210E-03 1.9300E-03 1.0530E-02 7.9530E-03 4.7700E-03 1.8790E-03 3.0930E-02

1.0360E-02 5.1050E-03 1.2910E-03 1.0020E-01 4.5520E-02 8.7810E-03 3.5940E-03

7.2110E+00 3.3550E-01 4.7750E-01 7.7470E-01 5.0780E-01 1.9280E-01 8.0880E-01

7.7850E-01 4.7620E-01 1.6900E-01 5.3100E-02 5.7190E-02 4.0650E-02 2.1670E-02

8.2750E-03 8.3740E-02 8.2940E-02 5.9300E-02 4.1150E-02 2.8540E-02 1.5420E-02

7.0060E-02 3.9800E-02 3.8500E-02 1.5380E-01 3.6250E-01 6.7280E-02 1.8270E-02

1.0610E-01 1.8390E-01 7.9660E-02 3.3610E-02 7.0860E-02 3.6050E-02 2.8170E-02

4.4210E-01 3.6460E-01 3.4740E-01 1.2710E-01 1.0030E-01 7.4980E-02 3.0180E-02

7.3830E-02 7.1350E-02 4.8210E-02 2.3530E-02 2.8890E-01 7.5500E+00 1.2390E+00

8.0060E-02 6.7870E-02 1.2510E-01 8.6300E-02 2.6470E-02 5.2490E-02 2.6400E-01

1.5390E-01 3.3110E-02 4.4770E-02 1.5400E-01 1.5240E-02 5.9450E-03 2.8410E+00

1.3580E+01 4.4340E-01 1.0210E-02 2.9250E+00 1.6490E+01 3.5410E+00 1.6000E-01

6.2420E-01 2.0870E+01 4.0080E+00 1.9260E-01 1.5440E-01 6.9940E-01 1.7140E-01

1.0600E-02 4.1820E-02 7.8100E-01 1.4750E-01 1.8820E-02 2.4060E-02 2.5280E-02

2.1800E-02 1.1960E-02 2.0620E-02 1.5320E-02 6.2510E-03 1.6330E-01 5.2790E-01

4.0860E-02 5.4320E-03 6.8540E-02 2.6110E-01 7.1160E-02 1.0810E-02 2.0600E-02

3.7760E-02 1.1000E-02 3.7210E-03 1.7520E-02 7.7900E-02 3.0480E-02 7.3900E-03

8.4210E-03 5.9780E-03 3.4580E-03 2.1230E-03 1.1440E-02 1.3890E-02 8.6550E-03

3.1810E-03 2.7450E-02 6.2690E-02 4.9110E-02 7.4330E-03 5.4190E+00 1.2120E-01

4.2650E-01 5.2220E-01 4.2580E-01 3.1820E-01 5.9480E-01 4.7580E-01 3.0140E-01

2.5990E-02 3.7350E-02 3.4350E-02 2.5310E-02 1.3360E-02 4.0360E-02 4.2490E-02

5.4820E-02 4.9070E-02 3.1970E-02 1.4440E-02 3.5210E-02 3.9480E-02 3.6580E-02

4.5710E-02 1.3750E-01 2.2510E-01 4.0980E-02 3.8120E-02 7.9260E-02 1.2560E-01

6.0310E-02 3.8730E-02 3.7420E-02 2.5240E-02 1.4230E-01 3.4740E-01 3.6270E-01

2.6360E-01 6.6370E-02 5.7200E-02 3.0380E-02 5.5370E-02 4.7760E-02 3.9760E-02

2.1910E-02 1.1540E-02 3.4870E-01 5.5730E+00 9.5700E-01 8.8540E-03 6.4670E-02

8.2360E-02 7.3370E-02 3.2490E-03 8.9200E-02 1.7920E-01 1.2750E-01 2.0550E-02

4.8710E-02 9.7020E-02 5.5700E-03 2.2150E-01 3.4220E+00 8.7160E+00 3.0590E-01

1.4210E-01 3.9250E+00 1.0580E+01 2.7520E+00 7.9580E-03 7.6270E-01 1.5410E+01

3.0780E+00 9.0390E-03 1.6760E-01 4.6860E-01 1.3100E-01 7.9800E-03 3.9870E-02

7.6980E-01 1.2550E-01 6.2260E-03 1.7790E-02 1.8250E-02 2.0060E-02 9.9320E-03

1.3710E-02 8.6900E-03 2.3070E-02 1.6090E-01 3.4300E-01 2.6040E-02 1.0320E-02

7.0320E-02 1.6110E-01 5.4480E-02 6.8320E-03 1.7250E-02 2.3230E-02 6.8930E-03

4.5910E-03 1.4720E-02 5.9310E-02 2.5300E-02 6.3160E-03 3.9600E-03 2.8730E-03

1.6070E-03 6.9390E-03 8.9300E-03 9.9300E-03 3.6800E-03 5.7730E-03 2.4540E-02

4.5470E-02 3.6890E-02 2.5810E-02 1.2830E-01 3.4090E-01 4.9900E-01 1.0130E-01

3.1710E-01 4.3310E-01 2.8370E-01 1.4030E-02 1.7020E-02 2.3190E-02 2.2660E-02

1.3880E-02 1.3010E-02 3.1220E-02 3.3680E-02 3.2930E-02 2.8000E-02 1.6550E-02

1.3340E-02 3.5740E-02 2.5170E-02 1.7430E-02 3.9880E-02 1.0060E-01 1.4040E-01

1.3490E-02 3.3610E-02 6.0120E-02 9.4410E-02 1.7180E-02 3.4350E-02 1.5960E-02

4.8810E-02 1.2710E-01 2.6360E-01 3.0190E-01 4.0740E-02 3.5530E-02 2.6070E-02

3.6910E-02 2.9200E-02 2.7870E-02 1.6000E-02 2.4510E-03 1.4120E-02 2.6600E-01

4.3140E+00 6.2880E-04 9.9680E-03 5.1760E-02 9.0750E-02 2.1160E-04 3.5780E-03

6.8660E-02 1.9390E-01 1.3110E-02 1.0900E-02 2.9040E-02 5.6400E-02 1.3570E-02

3.0880E-01 2.6180E+00 7.5960E+00 9.3960E-04 1.5640E-01 2.9770E+00 8.7610E+00

2.4360E-03 8.1600E-03 5.7370E-01 1.1980E+01 1.4850E-03 1.0580E-02 1.3260E-01

3.7360E-01 2.3510E-03 8.1540E-03 3.1720E-02 6.4630E-01 6.0090E-04 6.8570E-03

1.5380E-02 1.8730E-02 4.1060E-03 9.5620E-03 8.0930E-03 4.1970E-03 2.4230E-02

1.2260E-01 2.2030E-01 2.3320E-03 1.0780E-02 5.3930E-02 1.3060E-01 2.2450E-03

7.4920E-03 1.4300E-02 1.3550E-02 1.1270E-03 4.4400E-03 1.1710E-02 5.1030E-02

4.2110E-03 2.4210E-03 2.2720E-03 1.0810E-03 2.7900E-03 4.2770E-03 5.0260E-03

4.1950E-03 2.0440E-03 6.9990E-03 2.1360E-02 3.8750E-02 6.3870E+00 2.8710E-01

4.9690E-02 1.6370E+00 4.5470E-01 1.4170E-01 3.9870E-02 1.1860E-01 5.4150E-02

2.1470E-02 7.5780E-03 1.9950E-03 1.6960E-01 9.4910E-02 4.6980E-02 1.9680E-02

6.3980E-03 1.3450E-03 7.7250E-02 1.7500E-02 4.8020E-03 1.8940E-01 6.4910E-02

2.0310E-02 4.0690E-03 7.9490E-01 7.6810E-02 2.2580E-02 7.2790E-03 8.3610E-02

1.8570E-02 5.3570E-03 1.0780E+00 3.3360E-01 8.5010E-02 2.8990E-02 1.1980E-01

3.8320E-02 5.9610E-03 4.5400E-03 2.1960E-02 4.6030E-03 1.9410E-03 2.2270E+00

2.1640E-01 2.1060E-02 2.7510E-03 4.0320E+00 3.5790E-01 3.7720E-02 5.4300E-03

9.0790E-02 8.5300E-02 2.7910E-02 5.0560E-03 2.0110E-02 1.1460E-02 3.3240E-03

5.0620E-04 5.1170E-02 1.4120E-02 3.4990E-03 3.3840E-04 9.7680E-01 3.5130E-02

5.6220E-03 1.5780E-03 3.6690E-01 6.2710E-02 1.2330E-02 2.1640E-03 2.3790E+01

5.6300E-01 1.5040E-02 7.9180E-04 3.1230E+01 2.7050E+00 1.1030E-01 6.5020E-04

4.4050E+01 3.0610E+00 1.3940E-01 1.0870E-02 3.1780E-02 5.8240E-03 2.1510E-03

6.8570E-02 2.4590E-02 1.0270E-02 2.6090E-03 2.1870E+00 8.1510E-02 1.2380E-02

4.5810E-03 5.0730E-02 1.1760E-02 2.7260E-03 3.7790E-04 2.2700E-01 3.3280E-02

4.4610E-03 6.8550E-04 2.5660E-03 1.5050E-02 4.5110E-03 1.1630E-03 2.3240E-02

6.7320E-03 2.6030E-03 5.6610E-04 1.4750E-01 2.5580E-02 3.7650E-03 5.3500E-04

9.0660E+00 3.1440E-01 6.7450E-01 9.1760E-01 3.0990E-01 1.0190E-01 5.4160E-02

5.8550E-02 3.5190E-02 1.8600E-02 7.9770E-03 8.3310E-02 6.9180E-02 5.5930E-02

3.9540E-02 2.3600E-02 1.0540E-02 3.4950E-02 3.6670E-02 1.1320E-02 9.0500E-02

8.5760E-02 4.1530E-02 1.5920E-02 1.2890E-01 5.3820E-01 6.1980E-02 2.0200E-02

4.3620E-02 3.6070E-02 9.4160E-03 3.9590E-01 5.3480E-01 2.8100E-01 7.4430E-02

7.2430E-02 4.7560E-02 2.1640E-02 3.7830E-03 1.2590E-02 1.0410E-02 2.4100E-03

1.9950E-01 1.4960E+00 2.4390E-01 2.4400E-02 1.6640E-01 3.1900E+00 4.2860E-01

4.2520E-02 7.0820E-02 1.0350E-01 6.7030E-02 3.0800E-02 1.4320E-02 7.4940E-03

5.8550E-03 2.7960E-03 2.1050E-02 2.1160E-02 1.1170E-02 2.7830E-03 1.2010E-01

6.9910E-01 3.3310E-02 5.4700E-03 6.2610E-02 2.3650E-01 5.6830E-02 1.3360E-02

2.3180E+00 1.7180E+01 6.6510E-01 2.1040E-02 2.6870E+00 2.2220E+01 3.3440E+00

1.1690E-01 4.1530E-01 3.5890E+01 3.9530E+00 1.6630E-01 1.5820E-02 1.4180E-02

2.9470E-03 3.2970E-02 3.0940E-02 1.4380E-02 6.7540E-03 2.2140E-01 1.4550E+00

8.0340E-02 1.1060E-02 1.9770E-02 2.3980E-02 8.5850E-03 2.4540E-03 3.3020E-02

1.4960E-01 3.5270E-02 6.8950E-03 2.1390E-03 9.2200E-03 5.9630E-03 1.8940E-03

9.7220E-03 1.0290E-02 6.0530E-03 2.2050E-03 3.1940E-02 8.7980E-02 1.7890E-02

3.9180E-03 7.0590E+00 2.7870E-01 5.6680E-01 5.8800E-01 1.9940E-01 2.2470E-02

3.5660E-02 4.0280E-02 2.8670E-02 1.2980E-02 3.1200E-02 5.0120E-02 4.9860E-02

4.3550E-02 3.3090E-02 1.8100E-02 1.4630E-02 2.9600E-02 2.2100E-02 4.0010E-02

6.3090E-02 5.6660E-02 2.6580E-02 3.2270E-02 1.2250E-01 3.9500E-01 4.8460E-02

2.2350E-02 3.1990E-02 1.7320E-02 1.2060E-01 3.3710E-01 3.4690E-01 2.1470E-01

3.7870E-02 4.7110E-02 2.7860E-02 3.0270E-03 5.3440E-03 8.7880E-03 4.4610E-03

2.1600E-02 2.4360E-01 1.1220E+00 1.9350E-01 2.0630E-02 1.8160E-01 2.5220E+00

3.1860E-01 1.9150E-02 5.4280E-02 8.2270E-02 6.5340E-02 6.5600E-03 7.2230E-03

6.4400E-03 3.7580E-03 8.6500E-03 1.7490E-02 1.3870E-02 8.0670E-03 1.0750E-02

1.3080E-01 5.1710E-01 2.5630E-02 1.2310E-02 5.6820E-02 1.7890E-01 4.8060E-02

1.3870E-01 2.8790E+00 1.2630E+01 4.9980E-01 9.8540E-02 3.3340E+00 1.6730E+01

2.5600E+00 3.7590E-03 1.4550E+00 2.8480E+01 3.0450E+00 7.8750E-03 1.2270E-02

6.2250E-03 1.8030E-02 2.0940E-02 1.8970E-02 8.9050E-03 2.4470E-02 2.6350E-01

1.1600E+00 6.1770E-02 6.6480E-03 1.4950E-02 1.5640E-02 5.6820E-03 4.4100E-03

3.5250E-02 1.1060E-01 2.7710E-02 1.7110E-03 3.7580E-03 5.6650E-03 2.8000E-03

5.9490E-03 7.2860E-03 6.4760E-03 4.0150E-03 5.8680E-03 3.1110E-02 6.2940E-02

1.5130E-02 1.1420E-01 2.7800E-01 4.3940E-01 3.9950E-01 7.2950E-03 2.0480E-02

2.8950E-02 2.8590E-02 1.8220E-02 6.3870E-03 2.7680E-02 4.0970E-02 4.2350E-02

3.3630E-02 1.8310E-02 5.9190E-03 1.5740E-02 2.8040E-02 1.5690E-02 3.8890E-02

4.9130E-02 3.6090E-02 1.0590E-02 3.1730E-02 9.9130E-02 3.0910E-01 1.1210E-02

2.1080E-02 2.1510E-02 4.1850E-02 1.1620E-01 2.7700E-01 3.3340E-01 1.7490E-02

3.8690E-02 2.8930E-02 2.2700E-03 3.2600E-03 4.9530E-03 5.4880E-03 2.6910E-03

2.5300E-02 1.9340E-01 9.9000E-01 3.1590E-03 2.2600E-02 1.4740E-01 2.1340E+00

1.1370E-03 2.1080E-02 5.1930E-02 8.6930E-02 2.1790E-03 6.3420E-03 5.6920E-03

3.4500E-03 2.2710E-03 9.6510E-03 1.4230E-02 9.9540E-03 2.5460E-03 1.1240E-02

1.0310E-01 3.9920E-01 2.1620E-03 1.3360E-02 4.8060E-02 1.5720E-01 8.3280E-03

1.7090E-01 2.2130E+00 9.8140E+00 6.4890E-04 1.1580E-01 2.5630E+00 1.4370E+01

4.7420E-04 4.5510E-03 1.1260E+00 2.3760E+01 4.0400E-03 7.0860E-03 8.4610E-03

7.2110E-03 1.4870E-02 1.5770E-02 1.1950E-02 6.6480E-03 2.6210E-02 2.0430E-01

8.9790E-01 2.0900E-03 7.1400E-03 1.2000E-02 1.0220E-02 6.7980E-04 4.8700E-03

2.7710E-02 9.6810E-02 1.2830E-03 2.4480E-03 3.8250E-03 2.7590E-03 2.1100E-03

3.8440E-03 6.4550E-03 4.5780E-03 1.0160E-03 6.4710E-03 2.5700E-02 5.2760E-02

3.8920E+00 3.9760E-01 1.5450E-01 6.1900E-02 4.2220E-02 2.5480E-02 1.4330E-02

6.4920E-03 7.1100E-02 5.1220E-02 3.7060E-02 2.6870E-02 1.8180E-02 9.3370E-03

5.5740E-02 3.1080E-02 1.9240E-02 1.2810E+00 8.7430E-01 1.9460E-01 6.4910E-02

8.5100E-01 1.1560E-01 3.2220E-01 9.1590E-02 1.4920E+00 2.0780E-01 5.4920E-02

6.3570E-01 3.5960E-01 1.9110E-01 9.4660E-02 5.6190E-01 3.3870E-01 3.9320E-02

2.1420E-02 2.3800E-01 3.2170E-02 1.6450E-02 9.2450E-02 4.0090E-02 1.2790E-02

2.8170E-03 7.6930E-02 3.1600E-02 1.0760E-02 2.9440E-03 6.7100E-02 2.7650E-02

9.6140E-03 2.1160E-03 3.3140E-02 1.7890E-02 9.8760E-03 4.6430E-03 2.7070E+00

5.0630E-01 2.7270E-02 5.6690E-03 2.4120E+00 3.4980E-01 3.7580E-02 6.9290E-03

7.7320E-02 4.0130E-02 1.7050E-02 5.8350E-03 3.2550E+00 4.5940E-01 4.4700E-02

8.8220E-03 9.6980E-02 3.7900E-02 1.5440E-02 5.6100E-03 1.1300E-01 5.1570E-02

2.4180E-02 1.0400E-02 1.4410E+01 1.9400E-01 7.2160E-03 1.9090E+01 3.4880E+00

1.1400E-01 5.3280E-03 3.4550E+01 3.7170E+00 2.9660E-01 1.7170E-02 1.7160E-01

5.1300E-02 1.1470E-02 2.2120E-03 2.6360E-02 1.4450E-02 6.8800E-03 2.6700E-03

2.8740E-02 1.7580E-01 1.8000E-02 8.5350E-03 4.9580E-02 2.6140E-02 1.0160E-02

2.7240E-03 9.7340E-02 2.3400E-02 6.4960E-03 1.3180E-03 4.3100E+00 2.3130E-01

3.7100E-02 2.7520E-02 2.4520E-02 1.6570E-02 7.0440E-03 4.1780E-02 3.9630E-02

3.5010E-02 2.4860E-02 1.3800E-02 5.5150E-03 3.2870E-02 3.0520E-02 1.6210E-02

2.0880E-01 8.3410E-01 7.0560E-02 1.4230E-01 4.3830E-01 1.1170E-01 8.5900E-02

4.5960E-02 2.4280E-01 6.5660E-01 7.8560E-02 3.1190E-01 2.8900E-01 2.1980E-01

1.4080E-01 3.9290E-01 9.1560E-02 2.1640E-01 1.6060E-02 7.5010E-02 1.0550E-01

1.1100E-02 2.7020E-02 3.6300E-02 3.2910E-02 1.4860E-02 1.6470E-02 3.6010E-02

2.6290E-02 1.2020E-02 1.4020E-02 2.8290E-02 2.3430E-02 1.1440E-02 1.6950E-02

1.8530E-02 1.0160E-02 4.1180E-03 4.9920E-01 1.3370E+00 5.7170E-01 2.5040E-02

6.7620E-02 1.6030E+00 4.0490E-01 4.4200E-02 2.9800E-02 3.1580E-02 2.7400E-02

1.7730E-02 7.6760E-02 2.1960E+00 5.4470E-01 5.3290E-02 2.3670E-02 5.1520E-02

2.9700E-02 1.5280E-02 3.4370E-02 5.8650E-02 3.6260E-02 2.3840E-02 3.4290E+00

7.3950E+00 1.3590E-01 3.4760E+00 9.4110E+00 3.9680E+00 1.3480E-01 5.5030E-01

1.7930E+01 4.5220E+00 3.9470E-01 5.1110E-02 7.3690E-02 4.0990E-02 1.1080E-02

1.1260E-02 1.0100E-02 9.6820E-03 6.6370E-03 2.1560E-02 4.1080E-02 9.1760E-02

7.0420E-03 2.6080E-02 1.8330E-02 1.4720E-02 8.8790E-03 9.5520E-03 5.7800E-02

1.9670E-02 5.6290E-03 2.9540E+00 1.8000E-02 2.2460E-02 1.4850E-02 1.2090E-02

8.1040E-03 2.5160E-02 2.8110E-02 1.9630E-02 1.4700E-02 1.1900E-02 7.2200E-03

1.9710E-02 1.8830E-02 1.4460E-02 1.2170E-01 2.3770E-01 4.7740E-01 3.9820E-02

1.2390E-01 6.7340E-02 7.5280E-02 5.7200E-02 9.4100E-02 1.8310E-01 2.4810E-01

1.4210E-01 1.8240E-01 1.7610E-01 1.4100E-01 1.7470E-01 1.8370E-01 1.1020E-01

1.0710E-02 2.8500E-02 6.5130E-02 4.6910E-02 3.8170E-03 2.3160E-02 2.0670E-02

2.6890E-02 2.9770E-03 1.2120E-02 2.2900E-02 2.2050E-02 1.4760E-03 1.1820E-02

1.7430E-02 2.0340E-02 9.7580E-03 9.4680E-03 9.7190E-03 4.3390E-03 2.1930E-02

5.7010E-01 6.3060E-01 4.0090E-01 1.2420E-02 6.4370E-02 1.0350E+00 3.0900E-01

8.1580E-03 1.9870E-02 2.0530E-02 2.2080E-02 1.3550E-02 7.4800E-02 1.4200E+00

4.1420E-01 7.5320E-03 1.5100E-02 3.2150E-02 2.3100E-02 1.1390E-02 1.7010E-02

4.0810E-02 3.0300E-02 4.5870E-01 3.8630E+00 3.0000E+00 1.0730E-01 3.9650E+00

4.4640E+00 2.7970E+00 1.3730E-02 6.2470E-01 1.1470E+01 3.4670E+00 1.1490E-02

4.0950E-02 4.1040E-02 2.5520E-02 3.5960E-03 7.6430E-03 7.5360E-03 7.3860E-03

1.4370E-02 1.5860E-02 4.5430E-02 3.4950E-02 1.0140E-02 1.3860E-02 1.3000E-02

7.0130E-03 2.9030E-03 5.6500E-03 3.8070E-02 1.4530E-02 7.8350E-03 8.3400E-03

1.0420E-02 7.4170E-03 3.0050E-03 1.4590E-02 8.4750E-03 1.0260E-02 9.8260E-03

6.9130E-03 3.3050E-03 9.5690E-03 7.9880E-03 8.9000E-03 5.4730E-02 1.2430E-01

2.4590E-01 2.8600E-02 4.4720E-02 9.9920E-02 3.7870E-02 4.1640E-02 3.6570E-02

6.5970E-02 1.1320E-01 5.3030E-02 8.4260E-02 9.9520E-02 8.5260E-02 4.6420E-02

1.6600E-01 2.0450E-02 5.3540E-03 1.2230E-02 1.4050E-02 4.3070E-02 3.9380E-04

3.6200E-03 1.6070E-02 1.7190E-02 3.7810E-04 2.6490E-03 8.4640E-03 1.8200E-02

1.3320E-05 1.5990E-03 8.3840E-03 1.6240E-02 4.6200E-03 4.0890E-03 3.8810E-03

3.5320E-03 5.1780E-03 2.4110E-02 4.0020E-01 3.8350E-01 2.7930E-03 1.0540E-02

4.2350E-02 6.5290E-01 1.3730E-03 7.3180E-03 1.3300E-02 1.3360E-02 2.8850E-03

1.1720E-02 5.0390E-02 8.9540E-01 1.7670E-03 5.6290E-03 9.8930E-03 2.2450E-02

2.4460E-03 9.6210E-03 1.1180E-02 2.7090E-02 1.6490E-02 7.1400E-01 2.9270E+00

4.7570E-03 1.4160E-01 2.7960E+00 2.7150E+00 6.1130E-03 7.2900E-03 4.3310E-01

7.3150E+00 2.2040E-03 1.1070E-02 2.5510E-02 1.9460E-02 6.8020E-04 3.2050E-03

4.8780E-03 4.0280E-03 7.1850E-03 6.4150E-03 8.6330E-03 3.1830E-02 2.6040E-03

8.8710E-03 8.4850E-03 5.4710E-03 5.0220E-04 2.6840E-03 3.5520E-03 2.2820E-02

3.5890E+00 9.1190E-01 1.6230E-01 6.8600E-02 8.3280E+00 3.6430E+00 1.0370E+00

1.9930E-01 3.3390E-02 7.4880E-03 3.1910E+00 1.2710E+00 4.3230E-02 2.6170E+00

3.7800E-01 7.2900E-02 7.3760E-03 1.7530E+00 5.5350E-01 9.0830E-02 6.6480E-03

5.6660E-01 1.3960E-01 8.1050E-03 3.3440E-02 2.0330E-02 9.4160E-03 3.4030E-03

1.5290E-02 1.1820E-02 6.5350E-03 5.3100E-02 1.1560E-01 7.1800E-03 2.1720E-03

2.1770E-01 1.8890E-01 8.8460E-02 2.0360E-02 1.7770E-01 8.6720E-02 2.5790E-02

4.0280E-03 1.1670E-01 3.4870E-02 7.6990E-03 8.7910E-04 1.1860E-01 3.6640E-02

6.3480E-03 1.0200E-04 1.0980E-01 5.6780E-02 4.9970E-02 3.2480E-02 1.9050E-01

4.5710E-02 1.1520E-02 2.4200E-03 4.5210E-02 1.4770E-02 3.9610E-03 1.0040E-03

8.6090E-02 7.7060E-02 4.5480E-02 1.4820E-02 1.9410E-01 4.3430E-02 7.0910E-03

6.7970E-04 3.5550E-02 1.5140E-02 4.3900E-03 8.7770E-04 5.1080E-02 4.0500E-02

8.3580E-03 5.6630E-02 2.5800E-02 1.4740E-02 7.2500E-03 4.9710E-02 2.3700E-02

8.2350E-03 2.1610E-03 7.2050E-02 7.4340E-02 3.7440E-02 8.6890E-03 4.7600E-02

2.6620E-02 9.2460E-03 1.9340E-03 3.8080E-02 2.3190E-02 1.0680E-02 6.3940E-03

2.0530E-02 1.0510E-02 5.4830E-03 2.6490E-03 3.1980E-02 1.5830E-02 6.0000E-03

1.4580E-03 3.0060E+00 1.2980E+00 1.0390E-01 2.7580E+00 2.7290E+00 3.2400E+00

1.5720E+00 3.6960E-01 5.0140E-02 1.7620E+00 9.8300E-01 8.4720E-01 7.8990E-01

1.3330E+00 2.6660E-01 6.7840E-02 6.3850E-01 7.0660E-01 4.7870E-01 9.8040E-02

2.9900E-01 1.9200E-01 8.0510E-02 2.1130E-02 1.3990E-02 1.0400E-02 7.8740E-03

1.3640E-02 9.5940E-03 4.4710E-03 4.2480E-02 4.7080E-02 4.9230E-02 3.5080E-03

1.8130E-01 5.3630E-02 9.6360E-02 8.7310E-02 7.8570E-02 6.1880E-02 6.7890E-02

2.7140E-02 2.6160E-02 6.4420E-02 2.9570E-02 8.1330E-03 5.1110E-02 4.2150E-02

2.5780E-02 6.7170E-03 7.3060E-02 8.5240E-02 3.7760E-02 9.8300E-03 5.6320E-02

9.7310E-02 3.5860E-02 1.0700E-02 1.4510E-02 2.1300E-02 1.2010E-02 3.9260E-03

7.6220E-02 3.5120E-02 2.8770E-02 3.8630E-02 4.3760E-02 1.0370E-01 4.1100E-02

7.7010E-03 1.3580E-02 1.4330E-02 1.2140E-02 4.5900E-03 4.2860E-02 1.6760E-02

1.8280E-02 3.1590E-02 2.9350E-02 1.6840E-02 5.4520E-03 2.5310E-02 2.0800E-02

1.5560E-02 7.4820E-03 7.4350E-02 2.4440E-02 2.6620E-02 2.8610E-02 2.5790E-02

1.5040E-02 1.8240E-02 9.2630E-03 3.0460E-02 1.5450E-02 1.2930E-02 3.8400E-03

1.2350E-02 9.9420E-03 6.5170E-03 2.2210E-03 1.6800E-02 1.2340E-02 9.3910E-03

5.6010E-03 1.6110E+00 1.0960E+00 2.0130E-01 2.9140E+00 1.0360E+00 1.9710E+00

1.5470E+00 4.1100E-01 7.8020E-01 9.5420E-01 9.6780E-01 2.1840E-01 7.1870E-01

7.4380E-01 1.6020E-01 1.6130E-01 5.3560E-01 4.1410E-01 3.2970E-01 1.3830E-01

1.7990E-01 1.1040E-01 1.0880E-02 1.0790E-02 1.0710E-02 8.1290E-03 1.0750E-02

6.8190E-03 2.9190E-03 3.1860E-02 1.7040E-02 4.0490E-02 1.7260E-02 8.7000E-02

8.1480E-02 5.3520E-02 9.1220E-02 2.1670E-02 5.8730E-02 4.1810E-02 5.4410E-02

2.9930E-03 2.5070E-02 4.3380E-02 2.4240E-02 1.8290E-02 3.5070E-02 2.5370E-02

1.5820E-02 5.4050E-02 5.8510E-02 3.3410E-02 9.1360E-03 1.5880E-02 4.9390E-02

5.9890E-02 2.4930E-02 3.9370E-03 1.2250E-02 1.3740E-02 8.8950E-03 4.8670E-02

2.6590E-02 3.3510E-02 2.5200E-02 6.8010E-03 4.5980E-02 6.5520E-02 2.8910E-02

3.5890E-03 1.0710E-02 9.6060E-03 9.5820E-03 3.1180E-02 1.7690E-02 1.3060E-02

1.8800E-02 2.1990E-02 1.4090E-02 7.3040E-03 1.0420E-02 1.5910E-02 1.2540E-02

1.1410E-02 5.0870E-02 2.1870E-02 2.7590E-02 1.5310E-02 9.4120E-03 1.6350E-02

1.0690E-02 1.4800E-02 2.2850E-02 1.0830E-02 9.4430E-03 3.9000E-03 7.4920E-03

7.8930E-03 5.0260E-03 2.9360E-03 7.3470E-03 9.7580E-03 8.8010E-03 7.2320E-03

1.0810E+00 3.5070E-02 2.1460E-01 2.2240E+00 8.0290E-01 9.2260E-01 1.2150E+00

2.2280E-01 8.1980E-01 7.5630E-01 5.5220E-02 2.5670E-01 5.5350E-01 3.6110E-01

2.1880E-02 2.2770E-01 3.4280E-01 3.6630E-01 5.2750E-02 1.3310E-01 9.9860E-02

4.6080E-03 8.1410E-03 8.4470E-03 6.2180E-03 7.4570E-03 4.2370E-03 1.9920E-03

2.1240E-02 5.4460E-03 2.0870E-02 2.4830E-02 2.6210E-02 7.4050E-02 5.7840E-02

4.7460E-02 2.8510E-03 2.8720E-02 3.7220E-02 4.8950E-02 1.4550E-04 5.0670E-03

2.3610E-02 3.3840E-02 4.6590E-03 2.0060E-02 2.3460E-02 1.6220E-02 4.3290E-02

2.2550E-02 2.1680E-02 1.3580E-02 4.5010E-03 1.7000E-02 3.9810E-02 3.8740E-02

8.8850E-04 4.5720E-03 9.3900E-03 1.1780E-02 2.2040E-02 3.0280E-02 2.4720E-02

1.2310E-02 6.0590E-04 1.0350E-02 3.9350E-02 4.7850E-02 6.1580E-04 4.6530E-03

7.4110E-03 9.7340E-03 1.6500E-02 1.6480E-02 6.0300E-03 1.1490E-02 1.1790E-02

1.0970E-02 7.1350E-03 3.4610E-03 9.6850E-03 1.0660E-02 9.7140E-03 2.5210E-02

2.9780E-02 1.7460E-02 5.3300E-03 2.2750E-03 1.0010E-02 1.0450E-02 1.1440E-02

1.5230E-02 7.2180E-03 5.1750E-03 3.6950E-03 4.4520E-03 4.7070E-03 3.9240E-03

2.4640E-03 2.4820E-03 6.3780E-03 7.1490E-03 6.0830E-03 6.5710E-03 3.6690E-02

1.5390E-01 1.2540E+00 1.0030E+00 2.5600E-01 1.7280E-02 4.8360E-01 4.0260E-01

1.0690E-02 7.6260E-02 2.0350E-01 3.2240E-01 1.1380E-03 3.7240E-02 2.1490E-01

2.2530E-01 1.4830E-02 6.9740E-02 5.8300E-02 1.5070E-03 4.2190E-03 4.0120E-03

3.0940E-03 3.8410E-03 1.8700E-03 9.9330E-04 1.0620E-02 1.7030E-03 7.0370E-03

1.7240E-02 3.2690E-03 3.7800E-02 5.0020E-02 1.3580E-02 8.0240E-05 4.7890E-03

2.7990E-02 2.6040E-02 1.8750E-05 2.0020E-04 5.0790E-03 2.6000E-02 5.7320E-04

7.6040E-03 1.4360E-02 8.5620E-03 2.4790E-02 5.7830E-03 1.0200E-02 9.8180E-03

9.8890E-04 5.0530E-03 1.1910E-02 3.0170E-02 1.8620E-04 1.0710E-03 4.0690E-03

7.8730E-03 6.3790E-03 2.2420E-02 1.1180E-02 4.7760E-03 3.4260E-05 9.8070E-04

1.0510E-02 3.7540E-02 3.3390E-05 9.5610E-04 4.4990E-03 5.8150E-03 6.7540E-03

1.0630E-02 1.7910E-03 5.7460E-03 4.6180E-03 6.3700E-03 4.2560E-03 1.1170E-03

3.8370E-03 6.8880E-03 5.5660E-03 8.5550E-03 2.2940E-02 7.5570E-03 6.8010E-04

3.3020E-04 3.1590E-03 8.3180E-03 5.2760E-03 7.6160E-03 3.6900E-03 2.0580E-03

2.3040E-03 2.1320E-03 1.8800E-03 2.3840E-03 1.3140E-03 5.7040E-04 3.0080E-03

4.1480E-03 3.3230E-03 3.8710E+00 4.0310E-01 2.9390E-02 6.0440E-03 1.3490E-03

9.3230E+00 1.7120E-01 7.1400E-02 1.6410E+00 3.7920E-01 1.7270E-02 2.7680E-03

2.3830E+00 3.6650E-01 2.9820E-02 2.4270E-03 1.5720E+00 1.6020E-02 1.1300E-02

3.2030E-02 1.6410E-02 6.4170E-03 1.5530E-03 1.0650E-02 5.4570E-03 2.6930E-03

8.3540E-03 3.9710E-02 8.9040E-03 1.4510E-03 1.3520E-01 2.9250E-02 5.0470E-03

6.1700E-04 1.8330E-01 5.5990E-02 1.1380E-02 1.1270E-03 5.5490E-01 1.7230E-01

3.1180E-02 2.9840E-03 1.4440E-01 1.8460E-02 1.0310E-03 6.8230E-05 5.0690E-02

2.5130E-02 9.3220E-03 1.4920E-03 6.9990E-02 5.5280E-02 2.4730E-02 4.2720E-03

2.8670E-01 8.1010E-02 1.9010E-02 2.9810E-03 1.1780E-01 5.0710E-02 1.4730E-02

1.8220E-03 1.1580E-01 7.5580E-02 2.5030E-02 3.5080E-03 4.1830E-01 1.0470E-01

2.1890E-02 2.3160E-03 3.9080E-02 3.9780E-02 3.4230E-02 6.6190E-02 4.5110E-02

1.9620E-02 3.3470E-03 2.0750E-01 5.1790E-02 7.4600E-03 1.3330E-03 4.2230E-02

1.4780E-02 5.8580E-03 1.2600E-03 9.1080E-02 3.8120E-02 9.6360E-03 1.9040E-03

4.3280E-02 4.4280E-02 1.9830E-02 6.8010E-04 7.1800E-02 2.9880E-02 6.4990E-03

6.3740E-04 7.0500E-02 4.4930E-02 1.2690E-02 1.4380E-03 4.7220E+00 6.9730E-01

4.4510E-02 6.9990E-03 3.7920E+00 4.1010E+00 9.6070E-02 7.7280E-01 6.0890E-01

3.0550E-01 1.3070E-02 1.2780E+00 2.4490E+00 3.2020E-01 2.7590E-02 7.4290E-01

5.8420E-01 6.0570E-03 1.9660E-02 1.2680E-02 9.0130E-03 4.9440E-03 7.8870E-03

5.4050E-03 2.2800E-03 6.9630E-03 2.1680E-02 1.4030E-02 4.2660E-03 4.7130E-02

6.6580E-02 2.4290E-02 4.6620E-03 6.7910E-02 7.0930E-02 4.5600E-02 1.0680E-02

1.9990E-01 2.5550E-01 1.4950E-01 2.9390E-02 5.7590E-02 6.3720E-02 1.4440E-02

8.4060E-04 3.3270E-02 2.0750E-02 1.1120E-02 7.0530E-03 5.6670E-02 2.3150E-02

2.4610E-02 2.1470E-02 1.1260E-01 1.3660E-01 5.8040E-02 1.7410E-02 6.5330E-02

4.3500E-02 3.1450E-02 1.3200E-02 7.9770E-02 3.3620E-02 4.7190E-02 2.2910E-02

1.3400E-01 1.7710E-01 8.4610E-02 2.0510E-02 3.8940E-02 3.9700E-02 1.3810E-02

5.2000E-02 2.7330E-02 1.7920E-02 1.4570E-02 8.5670E-02 9.0360E-02 4.1070E-02

6.4510E-03 2.3390E-02 1.8730E-02 7.2000E-03 4.0730E-03 4.5660E-02 3.4720E-02

2.7810E-02 8.7410E-03 3.6070E-02 3.1530E-02 1.2420E-02 9.9660E-03 4.3090E-02

2.4450E-02 1.7810E-02 5.3230E-03 5.0000E-02 1.8680E-02 2.7790E-02 1.1500E-02

4.1840E+00 7.5900E-01 4.1480E-02 1.2970E+00 3.8090E+00 1.3120E+00 3.1070E-01

5.6400E-01 3.3230E-01 1.5290E-01 2.8610E-01 1.4600E+00 1.3320E+00 1.8170E-01

3.1670E-01 5.9080E-01 1.5940E-01 1.0900E-02 1.0670E-02 9.1740E-03 6.9520E-03

6.0030E-03 4.5100E-03 2.1660E-03 5.5700E-03 1.2200E-02 1.3730E-02 6.2480E-03

1.3370E-02 4.3430E-02 4.1130E-02 1.5320E-02 2.1990E-02 6.1940E-02 5.0940E-02

3.0650E-02 5.5490E-02 1.8000E-01 1.7440E-01 9.7480E-02 2.0140E-02 4.9920E-02

3.1900E-02 7.3860E-03 2.0350E-02 1.6120E-02 1.4590E-02 7.1500E-03 3.6980E-02

2.1320E-02 2.0040E-02 2.2790E-02 4.0740E-02 9.2080E-02 8.6950E-02 4.1380E-02

3.1250E-02 3.8520E-02 3.0880E-02 2.2790E-02 4.0680E-02 3.9380E-02 2.8810E-02

3.7780E-02 4.0830E-02 1.1860E-01 1.1620E-01 5.7250E-02 3.9690E-02 2.8240E-02

6.6740E-03 3.5530E-02 2.0530E-02 2.0960E-02 1.2480E-02 3.0750E-02 6.9920E-02

5.3970E-02 2.4740E-02 1.2830E-02 1.4350E-02 1.1060E-02 4.3700E-03 1.8920E-02

3.0820E-02 2.4320E-02 1.9500E-02 2.8850E-02 1.9870E-02 1.2320E-02 1.0970E-02

2.2570E-02 2.3300E-02 1.6350E-02 1.0360E-02 2.6580E-02 2.3270E-02 1.6270E-02

2.0230E-02 3.1230E+00 5.8250E-01 3.5520E-01 2.2040E+00 2.2700E+00 1.0150E-01

3.6620E-01 3.2260E-01 2.2460E-01 4.8800E-02 4.9770E-01 1.2470E+00 6.4240E-01

1.1940E-01 3.9840E-01 2.8240E-01 4.6990E-03 8.1600E-03 8.1600E-03 6.6610E-03

4.2330E-03 3.3360E-03 1.8060E-03 4.1770E-03 6.6040E-03 1.0910E-02 7.2700E-03

3.2330E-03 1.8980E-02 3.5490E-02 2.7550E-02 5.1070E-03 2.9500E-02 4.1520E-02

4.5300E-02 9.2470E-03 8.5500E-02 1.3870E-01 1.4720E-01 5.9110E-03 2.6720E-02

3.3110E-02 1.6280E-02 1.0750E-02 1.3410E-02 1.3410E-02 6.1520E-03 1.8930E-02

2.2020E-02 1.8000E-02 1.5770E-02 1.1890E-02 4.5670E-02 7.5550E-02 6.1490E-02

1.2710E-02 2.7930E-02 2.6970E-02 2.4640E-02 1.5690E-02 3.5520E-02 2.4670E-02

3.4110E-02 9.7420E-03 5.4700E-02 9.6380E-02 8.9010E-02 3.6170E-02 1.5380E-02

4.7020E-03 2.0710E-02 1.9640E-02 1.8280E-02 8.5110E-03 8.3450E-03 3.8300E-02

4.8470E-02 3.8420E-02 6.6910E-03 9.7740E-03 1.0520E-02 4.9600E-03 6.2340E-03

2.0520E-02 2.0510E-02 2.2900E-02 2.1640E-02 1.0880E-02 1.3040E-02 8.5020E-03

1.0130E-02 1.8840E-02 1.4880E-02 1.0570E-02 1.0970E-02 2.2220E-02 1.3800E-02

1.7790E-02 2.0390E+00 8.4050E-02 8.1280E-01 2.3300E+00 2.5610E-02 1.7000E-01

2.7900E-01 2.0190E-01 7.2850E-03 1.0090E-01 6.0020E-01 9.1370E-01 3.8890E-02

2.0270E-01 2.9180E-01 2.1270E-03 5.4730E-03 6.1900E-03 4.6150E-03 2.7950E-03

2.2800E-03 1.3490E-03 2.7850E-03 3.2650E-03 6.7050E-03 6.1590E-03 6.4000E-04

5.6330E-03 1.9600E-02 3.0780E-02 6.2750E-04 1.0150E-02 2.9490E-02 4.2930E-02

3.8120E-05 2.3630E-02 8.4240E-02 1.4570E-01 1.3550E-03 1.0540E-02 2.3260E-02

1.9530E-02 4.8530E-03 1.0140E-02 8.7730E-03 4.9620E-03 7.2240E-03 1.9330E-02

1.5440E-02 7.8140E-03 2.9940E-03 1.7270E-02 4.5040E-02 6.3250E-02 4.0230E-03

1.6400E-02 2.2030E-02 1.9530E-02 4.1400E-03 2.1500E-02 2.6560E-02 2.1140E-02

1.4630E-03 1.7880E-02 6.3320E-02 9.1280E-02 2.7530E-02 6.2150E-03 3.8300E-03

9.9530E-03 1.7600E-02 1.1850E-02 5.3550E-03 2.2050E-03 1.5010E-02 3.3530E-02

3.8670E-02 3.2520E-03 6.2890E-03 7.0620E-03 4.8090E-03 2.1650E-03 9.5230E-03

1.6840E-02 1.8860E-02 1.4430E-02 5.0230E-03 1.1310E-02 5.2430E-03 3.7480E-03

1.2170E-02 1.2830E-02 7.5330E-03 3.3050E-03 1.4350E-02 1.5430E-02 1.0120E-02

2.4770E-02 1.3980E-01 1.4510E+00 4.5800E-03 5.1240E-02 1.6720E-01 1.1520E-01

1.0060E-03 1.4660E-02 1.2960E-01 6.6510E-01 1.0360E-02 7.4160E-02 1.8220E-01

6.4720E-04 2.3760E-03 3.3580E-03 2.5400E-03 1.3630E-03 1.0540E-03 7.2460E-04

1.3930E-03 1.2650E-03 3.5690E-03 2.2100E-03 1.0030E-04 1.1920E-03 6.6840E-03

2.0090E-02 7.4480E-06 1.5240E-03 1.3380E-02 2.3950E-02 4.1690E-06 7.6020E-05

3.6810E-02 8.9780E-02 2.3490E-04 2.8580E-03 1.1030E-02 1.3240E-02 1.6780E-03

5.6270E-03 3.7130E-03 2.8350E-03 1.7800E-03 1.1200E-02 9.3410E-03 2.5790E-03

4.6600E-04 5.8820E-03 1.8080E-02 4.0190E-02 7.5920E-04 6.9730E-03 1.2580E-02

1.0160E-02 4.9350E-04 8.4400E-03 1.8860E-02 8.9900E-03 1.5480E-05 3.5590E-03

2.2080E-02 5.7580E-02 1.4890E-02 1.5290E-03 2.3230E-03 3.5930E-03 1.0750E-02

5.3600E-03 2.6720E-03 5.5540E-04 3.3580E-03 1.6460E-02 2.4040E-02 1.2140E-03

3.1900E-03 3.2400E-03 3.3790E-03 2.4390E-04 2.7390E-03 1.0030E-02 1.0330E-02

7.2130E-03 1.7780E-03 6.6230E-03 2.3860E-03 1.0390E-03 5.6490E-03 7.7930E-03

3.6600E-03 5.9880E-04 6.0970E-03 1.1190E-02 3.7050E-03 1.0410E+00 2.4210E-01

6.7880E-01 2.9880E-01 9.7900E-02 1.8510E-02 1.9600E+00 6.5140E-01 1.7240E-01

4.2360E-02 2.0290E+00 9.4020E-02 2.6740E-02 2.1570E-02 1.4350E-02 7.6150E-03

3.0600E-03 1.2100E-02 1.0490E-02 5.2410E-03 3.6830E-02 7.4250E-02 5.2180E-02

2.6780E-02 1.8240E-01 1.0040E-01 4.6480E-02 1.4480E-02 2.3230E-01 9.5790E-02

3.1220E-02 6.4140E-03 1.2690E-03 1.2680E-03 8.8890E-04 3.6890E-04 2.0940E-02

9.0200E-03 3.3060E-03 8.5710E-04 7.7020E-02 2.2420E-02 5.8740E-03 1.4380E-03

3.8960E-02 3.5240E-02 3.1710E-02 2.4660E-02 8.3010E-02 7.6150E-02 4.6330E-02

1.7310E-02 1.3470E-01 5.9260E-02 2.7840E-02 1.0780E-02 8.0390E-02 5.8710E-02

3.2360E-02 1.1460E-02 7.6530E-03 3.5420E-03 1.4290E-03 3.6480E-04 6.2060E-02

2.9330E-02 1.1520E-02 1.2510E-01 7.3070E-02 2.7330E-02 4.9350E-03 4.0850E-02

4.3860E-02 4.6010E-02 3.9420E-02 1.5660E-02 6.1350E-03 2.2350E-03 7.2420E-04

1.2300E-02 9.3330E-03 5.7010E-03 3.8260E-03 2.2810E-02 3.0080E-02 3.1920E-02

1.9980E-02 4.0670E-02 4.8070E-02 4.0000E-02 2.2220E-02 6.3900E-02 5.3400E-02

3.3750E-02 1.6780E-02 8.4580E-01 2.5610E-01 2.5170E-01 1.9920E-01 1.0950E-01

2.6710E-01 9.7980E-01 6.5590E-01 2.1400E-01 3.3230E-01 1.2240E+00 5.5520E-02

1.2360E-02 7.5790E-03 7.7020E-03 7.3770E-03 1.1370E-02 5.6370E-03 3.8750E-03

2.7620E-02 5.8040E-02 3.9250E-02 1.8050E-02 6.5710E-02 6.9550E-02 6.6120E-02

5.6490E-02 2.8130E-02 1.0940E-01 9.3000E-02 4.3780E-02 1.0950E-03 2.7770E-04

6.3050E-04 9.7370E-04 7.7060E-03 7.0410E-03 6.3290E-03 2.9730E-03 1.5350E-02

3.9220E-02 2.0730E-02 5.7020E-03 3.4620E-02 3.2760E-02 2.0770E-02 9.6180E-03

7.1840E-02 1.4770E-02 2.8260E-02 5.2230E-02 3.7360E-02 8.1180E-02 4.7960E-02

2.2010E-02 4.8920E-02 2.3510E-02 2.8260E-02 3.7420E-02 1.4380E-03 3.5910E-03

3.1010E-03 1.7270E-03 3.8430E-02 2.7830E-02 1.4150E-02 6.8920E-02 2.9800E-02

4.0190E-02 3.1170E-02 4.5110E-02 4.8230E-02 2.6790E-02 7.5590E-03 5.0140E-03

7.2390E-03 4.5270E-03 1.7830E-03 7.9610E-03 4.3060E-03 4.7060E-03 5.5640E-03

1.7110E-02 3.3770E-02 1.9760E-02 7.9500E-03 5.1600E-02 3.2350E-02 1.9690E-02

9.5420E-03 5.0910E-02 2.2990E-02 2.5060E-02 2.7010E-02 4.9170E-02 1.8540E-01

1.9260E-01 1.1670E-01 4.4000E-02 1.8540E-01 5.3060E-01 6.4920E-01 5.7160E-02

2.9380E-01 7.2380E-01 3.5090E-03 8.1080E-03 6.6200E-03 4.6220E-03 7.8450E-03

4.7500E-03 1.2490E-03 1.8420E-02 3.9470E-02 2.4000E-02 1.1830E-02 9.3070E-03

4.4660E-02 5.9460E-02 5.8190E-02 1.3620E-03 1.9250E-02 6.2830E-02 9.9420E-02

2.2510E-04 7.2010E-04 6.6350E-04 2.7780E-04 2.1080E-03 5.2620E-03 5.9660E-03

3.1260E-03 3.3980E-03 1.0640E-02 2.1590E-02 1.7310E-02 3.1380E-02 1.5810E-02

1.0380E-02 7.5230E-03 1.2240E-02 4.8330E-02 3.6810E-02 1.4010E-02 1.3110E-02

2.3090E-02 3.8030E-02 4.0310E-02 7.8890E-03 3.3010E-02 3.0850E-02 1.9710E-02

1.5490E-04 8.9820E-04 2.1800E-03 3.1130E-03 1.8550E-02 2.1600E-02 1.2840E-02

1.3380E-02 4.9930E-02 3.6170E-02 1.5740E-02 5.0650E-02 1.7460E-02 9.1890E-03

8.8770E-03 1.6060E-03 3.3330E-03 4.3760E-03 3.0630E-03 2.2180E-03 5.1440E-03

4.6180E-03 3.0000E-03 1.1400E-02 2.8370E-02 9.8020E-03 2.8180E-03 4.3670E-02

2.1500E-02 8.2400E-03 2.1590E-03 2.0050E-02 3.1600E-02 2.2100E-02 1.0210E-02

1.7510E+00 3.4020E-01 4.7460E-02 6.4240E+00 2.3170E+00 4.8610E-01 7.8870E-02

2.0770E+00 9.2030E-01 3.9710E-02 2.1480E-01 1.6850E-01 6.2900E-02 2.2020E-02

5.6570E-02 2.0510E-02 7.4870E-03 5.2430E-02 1.0350E-01 3.6670E-02 5.0930E-03

1.6080E-01 6.7950E-02 2.5470E-02 6.5430E-03 6.3990E-02 3.3710E-02 1.4310E-02

3.8010E-03 5.7510E-02 2.1380E-02 6.3820E-03 1.7660E-03 2.6600E-01 7.6860E-02

1.4920E-02 1.6240E-03 1.8700E-01 4.7900E-02 1.9010E-02 8.1490E-03 1.8650E-01

6.2850E-02 1.8730E-02 4.6040E-03 9.3360E-02 3.4290E-02 1.0450E-02 2.6790E-03

1.7220E-01 6.2450E-02 1.9850E-02 5.7230E-03 6.6130E-02 2.6700E-02 8.1790E-03

1.6950E-03 3.4520E-02 1.5510E-02 5.2400E-03 1.1120E-03 5.8350E-02 2.6240E-02

2.3620E-03 5.9160E-02 2.7500E-02 1.3000E-02 4.7610E-03 4.2420E-02 1.6300E-02

6.0380E-03 1.8600E-03 3.0360E-02 1.9460E-02 9.1530E-03 2.3910E-03 1.5940E-02

7.5740E-03 2.4090E-03 9.1370E-04 1.3160E-02 8.5340E-03 4.4590E-03 1.4530E-03

1.2020E-02 5.8080E-03 3.4260E-03 1.4520E-03 1.4840E-02 6.2130E-03 2.0360E-03

4.5630E-04 1.4560E+00 3.5740E-01 1.7320E+00 2.5010E+00 2.2170E+00 5.7580E-01

1.1850E+00 4.5380E-01 6.4120E-01 9.5380E-02 5.3520E-02 3.9150E-02 5.8790E-02

2.9170E-02 2.5560E-02 9.3330E-03 3.9270E-02 5.1890E-02 3.3390E-02 2.3630E-02

4.7240E-02 7.2310E-02 5.0660E-02 2.8470E-02 2.3090E-02 2.4530E-02 2.3010E-02

1.5980E-02 8.3960E-03 2.8890E-02 2.0830E-02 7.7350E-03 7.5980E-02 1.1050E-01

6.2140E-02 1.6500E-02 4.7610E-02 1.0340E-01 3.3610E-02 9.7290E-03 4.5430E-02

8.8060E-02 5.1760E-02 1.9990E-02 1.9580E-02 4.9550E-02 2.9090E-02 1.1830E-02

4.6130E-02 8.1550E-02 4.9550E-02 2.0210E-02 1.5610E-02 2.9220E-02 2.2570E-02

9.6860E-03 9.3080E-03 1.3910E-02 1.3140E-02 6.0580E-03 3.4690E-02 1.2450E-02

1.8090E-02 2.7480E-02 2.9770E-02 1.4740E-02 8.5870E-03 1.2630E-02 1.9470E-02

1.2300E-02 6.5090E-03 1.9460E-02 1.0900E-02 8.1430E-03 6.8950E-03 5.2930E-03

6.4550E-03 5.9050E-03 2.8610E-03 9.8690E-03 5.4310E-03 3.1820E-03 2.2210E-03

5.8070E-03 5.4900E-03 3.5440E-03 1.8120E-03 4.9310E-03 5.9430E-03 4.5580E-03

2.2340E-03 9.4550E-01 1.2150E-01 1.7640E+00 1.1100E+00 1.7020E+00 4.3850E-01

6.5800E-01 4.2950E-01 3.2470E-02 8.3730E-02 3.4030E-02 2.5650E-02 1.4110E-02

1.7010E-02 1.0290E-02 2.6160E-02 2.0730E-02 3.1330E-02 2.0930E-02 1.0670E-02

3.0500E-02 4.9180E-02 4.1330E-02 4.8770E-03 1.5300E-02 1.7350E-02 2.0170E-02

5.9850E-04 7.4810E-03 1.8200E-02 1.6970E-02 1.4630E-02 6.1940E-02 6.0380E-02

3.9980E-02 1.8910E-02 3.5700E-02 5.6530E-02 1.8550E-02 9.6910E-03 3.5380E-02

5.3620E-02 3.8940E-02 3.0870E-03 1.5470E-02 3.0210E-02 2.3170E-02 1.0870E-02

3.5040E-02 4.9010E-02 3.6850E-02 2.2550E-03 1.2550E-02 1.6750E-02 1.8390E-02

5.9030E-04 8.1330E-03 7.7150E-03 1.1050E-02 1.3670E-02 1.8310E-02 1.1880E-02

1.2990E-02 1.4730E-02 1.7650E-02 6.8360E-03 3.6940E-03 8.4070E-03 1.1740E-02

8.6420E-03 9.1530E-03 8.1410E-03 9.6260E-03 3.4020E-03 1.1160E-03 4.1350E-03

3.7020E-03 4.6130E-03 6.5790E-03 2.9050E-03 2.7220E-03 1.5970E-03 3.4250E-03

3.5420E-03 2.8290E-03 1.7470E-03 1.1010E-03 3.5720E-03 3.6680E-03 3.4390E-03

2.9350E-02 9.9130E-02 1.2170E+00 1.0050E+00 8.0730E-02 5.2370E-01 1.6180E-01

1.1250E-02 2.3630E-02 1.7650E-02 1.7140E-02 5.8450E-03 7.6910E-03 7.2910E-03

1.3070E-02 5.5320E-03 1.9260E-02 1.0330E-02 8.8950E-04 1.0940E-02 2.0940E-02

3.2620E-02 7.0640E-05 5.2150E-03 1.1050E-02 1.2440E-02 9.2290E-05 9.6800E-04

5.3000E-03 1.6500E-02 1.6240E-03 1.6290E-02 3.9890E-02 3.0390E-02 8.1490E-03

9.6130E-03 1.8620E-02 2.7720E-02 1.8280E-03 8.6160E-03 2.3400E-02 3.3920E-02

6.2940E-04 2.6290E-03 1.0470E-02 2.2510E-02 2.4670E-03 9.2390E-03 2.3060E-02

3.1320E-02 1.9490E-04 2.3030E-03 8.4990E-03 1.3340E-02 7.9080E-05 5.4870E-04

5.6850E-03 7.3150E-03 3.0730E-03 1.4490E-02 3.9890E-03 4.7610E-03 8.5830E-03

6.8330E-03 6.4290E-03 7.9990E-04 3.1550E-03 5.7810E-03 7.4280E-03 2.3910E-03

6.8950E-03 3.4020E-03 2.1140E-03 3.4070E-04 8.6250E-04 2.7730E-03 3.0440E-03

3.2890E-03 1.1860E-03 1.6760E-03 7.4860E-04 1.4520E-03 1.8120E-03 1.7470E-03

1.0870E-03 1.2670E-04 1.0980E-03 2.3640E-03 2.2900E-03 2.3520E+00 2.9020E-01

3.3640E-02 7.7200E+00 2.8580E-01 1.3390E-01 2.5490E-01 1.2090E-01 4.0910E-02

1.7830E-02 3.9530E-02 1.8890E-02 4.4050E-03 3.5120E-03 3.1630E-02 6.5280E-03

1.5670E-03 8.9730E-02 3.5700E-02 1.2130E-02 2.2530E-03 5.7560E-02 2.5150E-02

1.0670E-02 2.5940E-03 7.1060E-02 2.9290E-02 9.8260E-03 1.7190E-03 1.4280E-01

4.4140E-02 6.1600E-03 9.3580E-04 1.3950E-01 4.9840E-02 1.0830E-02 1.7730E-03

4.2380E-02 1.7970E-02 7.3490E-03 2.1370E-03 8.0590E-02 3.1890E-02 1.0600E-02

1.7720E-03 1.9420E-01 5.2110E-02 1.3710E-02 2.0200E-03 8.8580E-02 2.5550E-02

6.8270E-03 1.3700E-03 1.7860E-01 5.5410E-02 1.5330E-02 2.9320E-03 8.9530E-02

2.3020E-02 1.3190E-02 3.8570E-02 2.0270E-02 7.5840E-03 1.5840E-03 5.6600E-02

2.0050E-02 6.4370E-03 1.7670E-03 1.6970E-02 6.9430E-03 2.1790E-03 4.2300E-04

2.2190E-02 1.0920E-02 3.5310E-03 9.4860E-04 1.6940E-02 1.7980E-02 6.2120E-03

2.2590E-03 2.0190E-02 9.8190E-03 3.4280E-03 6.2560E-04 2.5550E-02 1.2510E-02

5.4780E-03 2.0110E-03 2.4710E+00 3.3470E-01 2.6550E+00 3.7030E+00 1.2020E-01

7.8430E-02 1.7820E-01 1.0820E-01 3.3570E-02 2.6490E-02 1.3730E-02 1.0340E-02

2.8090E-03 1.4790E-02 1.3800E-02 3.4100E-03 3.2060E-02 4.1860E-02 2.6370E-02

1.3370E-02 1.9960E-02 2.8960E-02 1.6570E-02 1.1590E-02 2.0760E-02 3.4150E-02

2.3880E-02 1.1230E-02 5.5970E-02 5.1520E-02 3.9880E-02 5.5600E-03 6.0670E-02

5.4560E-02 3.6490E-02 1.0180E-02 1.7950E-02 1.9680E-02 1.1090E-02 6.7460E-03

2.7010E-02 3.6380E-02 2.6400E-02 1.1130E-02 5.2010E-02 1.0270E-01 4.0160E-02

1.5080E-02 2.0190E-02 4.8830E-02 2.2070E-02 7.5260E-03 3.8760E-02 8.5340E-02

4.9830E-02 1.7200E-02 4.4710E-02 4.8280E-02 8.0450E-03 2.2930E-02 1.4590E-02

1.0350E-02 6.5380E-03 2.0050E-02 2.6790E-02 1.5230E-02 6.1580E-03 8.2860E-03

6.5320E-03 4.1020E-03 1.9390E-03 9.5540E-03 9.0300E-03 8.1630E-03 3.7350E-03

1.3560E-02 1.0110E-02 8.1320E-03 2.8070E-03 1.1280E-02 7.4830E-03 5.2620E-03

3.0550E-03 1.2500E-02 1.0320E-02 6.7050E-03 5.0870E-03 1.9110E+00 7.7300E-01

2.6470E+00 1.4540E+00 3.7200E-02 6.0680E-02 1.3750E-01 8.0830E-02 1.5070E-02

1.3870E-02 8.9080E-03 2.1070E-03 6.5840E-03 1.0890E-02 6.4360E-03 8.4250E-03

2.1200E-02 3.0080E-02 2.3090E-02 7.0450E-03 1.1960E-02 2.3170E-02 1.5800E-02

4.1670E-03 1.6390E-02 2.4730E-02 2.1900E-02 1.5170E-02 4.8790E-02 2.5240E-02

2.7030E-02 2.0350E-02 4.5140E-02 3.1960E-02 2.3810E-02 7.3470E-03 1.1070E-02

1.4600E-02 8.9510E-03 7.4030E-03 2.2120E-02 2.3910E-02 2.2000E-02 1.3690E-02

4.0080E-02 7.1310E-02 3.2210E-02 4.5590E-03 1.6590E-02 3.4220E-02 1.8450E-02

7.2290E-03 3.3820E-02 6.0180E-02 4.3060E-02 2.5970E-02 3.3070E-02 1.6600E-02

1.0730E-02 1.2010E-02 1.1600E-02 6.0160E-03 6.4370E-03 1.5230E-02 1.7620E-02

1.1730E-02 3.4030E-03 5.0430E-03 4.6170E-03 2.5400E-03 2.5690E-03 7.0480E-03

6.3200E-03 7.0570E-03 1.0170E-02 5.8150E-03 6.4540E-03 3.6560E-03 5.1020E-03

6.5880E-03 5.6770E-03 3.1770E-03 5.4760E-03 6.7010E-03 7.7740E-03 5.1320E-03

2.2210E-01 9.3540E-01 2.0730E+00 1.7060E-02 3.2320E-02 5.4030E-02 3.2330E-02

7.1540E-03 1.2250E-02 5.5510E-03 1.4050E-03 2.6420E-03 6.1130E-03 7.0850E-03

1.1160E-03 9.1410E-03 1.8700E-02 2.6520E-02 8.5810E-04 7.5370E-03 1.1000E-02

1.9200E-02 1.7720E-04 4.7370E-03 1.4190E-02 2.5770E-02 2.9970E-03 1.7220E-02

3.7160E-02 2.0170E-02 5.1140E-03 2.1520E-02 3.3640E-02 2.0620E-02 2.1370E-03

6.7450E-03 8.6470E-03 9.7140E-03 9.3390E-04 7.3870E-03 1.8260E-02 2.4140E-02

2.0200E-03 1.5070E-02 3.2170E-02 5.4760E-02 7.8160E-04 4.8490E-03 1.3490E-02

2.9880E-02 1.0580E-03 7.7210E-03 2.7560E-02 6.0530E-02 1.5540E-02 1.3600E-02

2.0800E-02 3.6850E-03 1.0210E-02 8.3070E-03 4.6940E-03 1.7680E-03 6.1580E-03

1.1740E-02 1.4190E-02 1.0360E-03 3.3660E-03 3.6410E-03 2.1790E-03 5.5970E-04

2.6230E-03 5.8590E-03 5.8150E-03 6.7780E-03 3.0930E-03 3.9150E-03 3.5230E-03

1.6140E-03 4.9630E-03 4.6660E-03 2.5240E-03 2.0110E-03 5.0860E-03 5.1300E-03

4.8670E-03 3.0660E-01 7.8850E-02 5.7830E-02 3.3960E-02 1.8720E-02 9.8080E-03

1.4800E-01 7.2760E-02 9.5130E-03 1.4920E-02 2.8640E-02 1.2990E-02 6.3920E-03

2.2810E-02 1.3720E-02 7.2640E-03 2.9330E-03 1.2090E-02 7.0170E-03 4.3230E-03

1.5270E-03 4.7140E-03 3.1790E-03 1.8930E-03 5.1760E-04 3.7560E-02 1.8630E-02

8.0360E-03 2.6170E-03 6.5130E-02 4.1350E-02 1.7240E-02 3.6030E-03 1.9380E-02

1.6070E-02 1.1090E-02 7.1080E-03 3.4730E-02 2.3410E-02 1.3230E-02 5.6320E-03

1.0860E-01 4.2320E-02 1.4590E-02 4.9220E-03 2.8930E-02 1.9410E-02 1.1590E-02

6.7610E-03 8.1870E-03 4.0130E-03 1.7900E-03 5.6660E-04 1.2500E-01 2.5130E-02

7.3700E-03 8.5760E-02 3.3560E-02 1.1870E-02 3.7290E-03 8.8230E-02 4.3480E-02

2.1950E-02 1.1190E-02 3.6170E-02 1.7710E-02 6.8000E-03 1.4210E-03 8.3100E-03

6.2470E-03 3.9320E-03 2.0500E-03 2.7720E-02 2.2220E-02 1.1960E-02 6.8890E-03

1.2630E-02 1.0540E-02 7.2250E-03 3.3980E-03 1.3210E-02 8.7850E-03 5.1590E-03

2.6200E-03 1.8870E-01 2.1470E-02 2.4310E-02 2.0630E-02 1.3920E-02 7.1390E-02

2.6240E-02 5.5440E-02 9.9430E-03 1.2960E-02 1.3230E-02 4.9800E-03 7.8910E-03

1.0920E-02 8.1680E-03 7.9430E-03 2.7930E-03 4.4930E-03 4.6290E-03 4.0450E-03

1.6140E-03 6.2400E-04 1.8070E-03 2.0200E-03 1.2930E-02 1.3430E-02 1.1310E-02

6.4820E-03 3.4150E-02 1.1660E-02 2.0770E-02 1.7730E-02 1.2650E-02 1.0280E-02

7.8370E-03 4.9070E-03 1.5480E-02 9.7690E-03 1.1750E-02 1.4240E-02 9.7640E-03

5.0680E-02 3.7860E-02 1.5680E-02 1.2250E-02 1.1480E-02 1.0970E-02 9.9180E-03

8.5900E-04 3.3930E-03 3.2480E-03 2.1380E-03 2.5120E-02 6.4250E-02 1.5330E-02

1.7820E-02 3.7390E-02 2.4730E-02 9.9040E-03 2.0210E-02 4.3400E-02 3.2090E-02

1.5320E-02 1.3310E-02 7.4840E-03 1.1190E-02 7.3900E-03 4.5540E-03 2.6170E-03

2.9820E-03 3.5300E-03 1.8480E-02 1.1960E-02 1.4170E-02 2.9150E-03 9.7660E-03

6.1290E-03 4.3500E-03 2.4230E-03 5.9610E-03 4.9370E-03 4.6610E-03 4.5850E-03

6.8980E-03 1.0510E-02 1.2120E-02 1.0730E-02 9.4890E-03 5.4860E-02 1.1920E-02

4.9740E-03 6.3590E-03 4.9790E-03 4.6440E-03 7.0010E-04 4.3770E-03 5.4200E-03

7.0200E-03 9.9030E-05 1.6670E-03 2.7800E-03 3.2310E-03 1.2060E-04 9.2850E-04

1.2390E-03 1.1720E-03 2.7980E-03 7.9770E-03 7.5210E-03 4.5610E-03 2.2470E-03

2.2390E-02 1.3140E-02 3.5780E-03 6.2310E-03 5.0660E-03 3.8460E-03 2.3970E-03

1.1730E-03 9.2440E-03 9.1110E-03 5.8320E-03 2.8600E-03 4.9910E-03 2.1130E-02

2.7240E-02 3.1470E-03 6.2450E-03 6.8170E-03 5.7350E-03 5.9390E-05 4.9990E-04

1.6420E-03 2.5360E-03 7.3680E-03 1.5330E-02 2.8950E-02 4.2380E-03 1.0060E-02

1.7270E-02 1.3060E-02 8.5440E-03 8.6980E-03 1.7230E-02 2.0600E-02 9.6300E-04

9.0140E-03 6.2700E-03 2.5240E-03 7.8740E-04 2.5390E-03 2.2080E-03 1.2630E-03

9.2420E-03 6.8850E-03 2.9150E-03 4.0960E-03 4.4100E-03 3.7320E-03 2.0340E-03

1.0440E-03 1.7280E-03 3.1340E-03 2.8370E-03 1.9590E-03 4.4580E+00 4.5390E-01

1.2520E-01 1.8750E+00 2.6920E-01 5.5150E-02 2.1500E-02 3.1570E-02 1.2570E-02

2.4820E-03 1.3690E+00 1.4430E-01 1.8900E-02 2.7420E-03 1.2100E-01 3.4770E-02

9.5480E-03 1.3830E-03 1.3010E-01 4.3580E-02 1.2890E-02 1.3020E-03 1.5630E-01

2.9550E-02 1.0270E-02 3.4560E-03 2.9460E-01 3.8650E-02 1.2160E-02 2.9590E-03

4.2310E-01 7.3340E-02 1.3210E-02 2.8400E-03 3.9500E-01 6.5770E-02 1.4340E-02

2.5050E-03 9.0780E-01 1.2160E-01 1.4140E-02 2.8120E-03 1.2180E+00 1.7140E-01

2.8810E-02 4.9920E-03 1.1330E-01 4.5370E-02 1.3410E-02 2.4100E-03 3.0240E-02

9.2370E-03 1.4150E-03 4.5040E-02 1.3350E-02 4.1380E-03 1.2390E-03 1.2080E-01

3.2450E-02 1.2530E-02 3.5480E-03 1.4650E+01 3.6580E-01 5.1220E-02 2.4040E-02

2.9990E+01 3.6780E+00 3.2060E-01 4.8450E-02 6.2240E-02 5.2880E-02 2.5230E-02

3.1590E-03 5.7200E+00 1.7430E-01 8.7260E-03 3.9630E-03 1.7610E+01 2.2330E+00

1.0540E-01 1.4270E-02 4.9780E+00 4.3690E-01 7.9750E-01 8.1820E-01 1.4690E-01

1.7200E-02 1.9260E-02 1.1200E-02 6.2210E-03 4.9010E-02 1.0170E+00 1.6410E-01

2.1430E-02 2.2620E-02 6.3360E-02 3.1820E-02 1.1080E-02 4.1230E-02 6.7270E-02

5.6350E-02 1.5070E-02 3.7140E-02 8.3360E-02 1.7910E-02 6.0760E-03 6.5170E-02

1.6920E-01 2.5460E-02 9.9150E-03 6.9610E-02 2.4760E-01 6.8550E-02 1.3980E-02

3.6450E-02 2.3230E-01 6.7450E-02 1.7090E-02 1.1860E-01 5.7440E-01 1.3390E-01

1.5300E-02 6.3200E-02 8.9370E-01 1.8170E-01 3.2820E-02 3.4430E-02 5.3490E-02

3.8010E-02 1.5250E-02 1.6090E-02 1.1040E-02 5.3190E-03 1.7330E-02 2.3570E-02

1.0110E-02 2.8210E-03 3.2180E-02 6.5810E-02 2.3350E-02 1.1990E-02 2.6330E+00

9.5500E+00 3.3300E-01 2.9450E-02 1.1150E+00 2.1660E+01 4.3080E+00 3.7490E-01

4.9780E-02 3.5080E-02 1.5170E-02 1.7610E-02 8.4770E-01 3.6940E+00 1.6920E-01

6.1160E-03 2.2070E+00 1.1080E+01 2.6160E+00 1.3000E-01 3.7530E+00 3.0480E-01

6.3870E-01 3.7380E-01 1.2900E-02 1.0180E-02 1.0820E-02 6.5400E-03 8.9730E-03

4.4350E-02 7.5790E-01 1.2910E-01 4.3740E-03 1.9020E-02 4.5990E-02 2.7420E-02

1.5520E-03 3.6070E-02 4.6860E-02 4.8100E-02 1.3640E-02 2.8530E-02 5.6240E-02

1.0820E-02 1.9610E-02 5.6290E-02 1.1020E-01 1.5870E-02 1.3220E-02 6.3360E-02

1.6870E-01 4.9760E-02 8.3560E-03 3.3560E-02 1.8890E-01 5.6040E-02 1.3650E-02

1.3370E-01 4.4280E-01 1.0220E-01 1.3710E-02 7.0180E-02 6.9270E-01 1.4690E-01

6.8910E-03 2.8810E-02 3.6980E-02 3.3500E-02 7.7180E-03 1.0240E-02 6.9550E-03

6.6530E-03 1.2970E-02 1.5380E-02 6.1360E-03 1.2420E-02 2.3300E-02 4.8490E-02

1.8260E-02 2.3830E-01 2.7110E+00 6.1120E+00 2.2160E-01 1.0340E-01 1.3430E+00

1.5770E+01 3.3450E+00 3.7350E-02 1.8640E-02 1.7660E-02 1.5600E-02 8.2030E-02

9.8830E-01 2.3440E+00 1.1800E-01 9.3700E-02 2.6120E+00 7.3580E+00 1.9810E+00

1.1140E-01 3.2190E-01 4.4450E-01 8.6030E-03 4.4970E-03 8.1420E-03 5.2290E-03

1.3850E-03 9.7070E-03 3.4520E-02 5.7950E-01 1.7000E-04 4.9910E-03 1.5880E-02

4.5620E-02 8.1290E-05 1.8770E-03 2.8610E-02 5.0320E-02 6.2000E-03 1.1260E-02

2.0980E-02 3.1660E-02 6.2450E-03 1.9280E-02 4.3190E-02 6.7800E-02 2.8390E-03

1.3980E-02 5.1810E-02 1.3190E-01 1.1820E-03 9.3340E-03 2.6700E-02 1.7490E-01

2.7260E-03 1.5140E-02 1.0080E-01 3.0670E-01 2.5950E-03 1.5310E-02 5.6190E-02

5.4920E-01 6.4520E-04 7.6370E-03 2.3660E-02 3.8190E-02 2.8620E-03 7.6200E-03

5.9390E-03 2.4480E-03 5.7750E-03 9.3780E-03 7.9150E-03 3.5480E-03 1.1960E-02

1.8230E-02 3.2880E-02 4.4910E-02 2.7570E-01 2.0540E+00 3.7320E+00 2.7410E-02

1.1210E-01 1.0300E+00 1.2520E+01 2.4890E-02 7.5520E-03 2.1660E-02 7.0160E-03

8.0670E-03 1.0240E-01 7.5630E-01 1.5670E+00 1.0810E-02 1.2750E-01 1.9790E+00

5.8950E+00 1.5280E+00 1.8060E-01 7.6320E-01 7.0850E-01 3.1930E-01 1.0660E-02

3.4620E-02 1.8410E-02 9.1780E-03 4.5410E-03 1.0530E-02 5.7150E-03 2.9590E-03

9.8630E-04 1.7770E-02 8.4670E-03 3.8510E-03 1.4590E-03 6.2290E-02 4.2770E-02

3.1370E-02 1.7490E-02 4.8900E-01 1.2580E-01 2.3760E-02 5.1930E-03 3.7030E-02

2.0060E-02 1.1540E-02 5.3690E-03 2.4130E-02 1.3890E-02 8.0310E-03 4.4800E-03

2.8310E-02 1.7650E-02 9.0690E-03 3.9570E-03 3.3300E-02 1.6580E-02 7.5980E-03

3.3500E-03 2.6320E-02 1.6610E-02 7.5010E-03 3.4140E-03 8.1550E-01 3.5830E-01

1.0180E-02 5.2680E-01 1.4460E-01 3.1920E-02 5.3020E-03 6.6380E-02 4.9210E-02

2.8310E-02 1.2370E-02 1.1180E+01 2.7110E+00 5.0290E-01 4.7700E-02 3.1430E-01

1.4850E-01 7.2460E-02 3.6720E-02 6.2680E+00 8.7040E+00 3.8010E+00 7.9670E-02

9.4230E+00 2.3490E+00 3.2150E-01 1.6590E-02 6.0460E-02 2.4440E-02 9.5180E-03

3.5630E-03 1.2010E+00 5.0470E-01 3.1330E-01 1.0160E-01 2.7760E-01 7.2640E-03

1.4380E-02 1.3140E-02 8.9840E-03 1.9420E-03 4.4310E-03 4.1460E-03 3.2570E-03

2.2540E-03 6.9860E-03 7.1980E-03 4.8770E-03 3.6450E-02 4.0480E-02 2.0740E-02

5.7730E-03 1.7770E-02 2.5470E-01 1.3370E-01 2.5330E-02 1.3710E-02 1.3680E-02

1.2840E-02 9.7610E-03 7.1030E-03 1.0980E-02 9.4980E-03 6.3050E-03 1.1020E-02

1.1060E-02 9.7220E-03 8.2130E-03 5.9970E-03 1.3670E-02 1.2440E-02 8.6610E-03

6.5520E-03 1.0140E-02 1.0110E-02 9.5210E-03 3.5540E-01 1.1290E-01 3.1910E-01

3.0880E-02 2.6430E-01 1.4580E-01 3.3740E-02 3.8460E-02 2.0320E-02 2.2290E-02

2.5350E-02 2.1460E-01 5.4700E+00 2.8810E+00 5.5250E-01 5.2330E-02 1.3660E-01

1.1650E-01 6.7210E-02 4.1580E+00 3.7550E+00 1.3050E+00 3.3830E+00 1.6900E-01

4.5500E+00 2.4400E+00 4.8440E-01 8.1230E-03 2.6720E-02 2.0790E-02 9.7390E-03

2.5050E-01 1.0590E-02 2.7470E-01 5.6680E-02 1.4070E-03 3.8410E-03 7.3110E-03

8.7990E-03 9.0590E-05 1.1870E-03 2.3190E-03 3.2780E-03 2.8960E-05 1.1490E-03

3.3560E-03 5.7960E-03 2.4340E-02 9.3960E-03 1.0040E-02 6.5340E-03 6.6090E-03

7.9940E-03 1.0180E-01 9.9040E-02 3.2840E-03 7.5460E-03 8.1030E-03 6.1770E-03

2.2310E-03 3.5100E-03 5.0220E-03 5.9220E-03 1.3610E-03 6.1640E-03 6.2550E-03

5.2030E-03 1.1210E-03 3.3560E-03 6.9010E-03 8.8780E-03 7.2160E-04 3.7600E-03

6.5290E-03 6.7970E-03 1.0120E-02 3.1870E-01 6.5680E-02 5.2560E-03 1.8370E-02

1.1020E-01 1.0260E-01 5.9730E-03 2.1780E-02 1.7020E-02 7.3450E-03 5.4600E-02

1.1710E-01 2.1920E+00 2.1340E+00 2.0220E-02 2.5150E-02 6.1680E-02 8.6870E-02

2.0660E+00 7.9650E-02 3.3060E+00 7.5650E-01 8.3780E-03 1.1520E-01 1.8760E+00

1.9710E+00 1.9600E-03 4.4530E-03 1.1490E-02 1.6630E-02 1.3000E+00 8.6670E-01

4.3350E-01 6.1790E-02 5.1490E-02 4.1190E-02 3.0890E-02 2.9900E-04 2.5630E-04

2.1360E-04 1.7090E-04 1.4150E-03 1.2380E-03 1.0610E-03 8.8430E-04 3.5710E+00

2.6890E+00 1.7980E+00 9.0090E-01 1.0510E-01 7.8870E-02 5.2610E-02 2.6320E-02

4.3840E-03 3.5080E-03 2.6310E-03 1.7540E-03 1.9980E-02 1.6650E-02 1.3320E-02

9.9920E-03 2.0050E-02 1.6040E-02 1.2030E-02 8.0200E-03 1.6700E-02 1.3900E-02

1.1120E-02 8.3460E-03 2.5870E-04 2.2170E-04 1.8480E-04 1.4780E-04 3.1660E-02

2.1100E-02 1.0550E-02 2.8020E-02 2.1130E-02 1.4110E-02 7.0640E-03 1.6470E-02

1.3180E-02 9.8860E-03 6.5900E-03 6.2020E-02 4.6610E-02 3.1110E-02 1.5570E-02

7.3860E-03 6.1560E-03 4.9250E-03 3.6940E-03 2.0300E-02 1.5040E-02 1.0020E-02

5.0150E-03 4.2260E-02 3.3010E-02 2.2030E-02 1.1020E-02 3.0920E-03 2.4730E-03

1.8550E-03 1.2370E-03 2.2750E+00 1.1360E+00 3.2080E-02 2.1970E-02 1.2570E-02

5.5540E-03 6.7680E-02 2.2720E-02 8.5000E-03 2.3460E-03 1.1200E-03 9.3520E-04

6.0470E-04 3.3250E-04 6.1550E+00 4.0600E+00 1.6290E+00 3.1520E-01 8.1310E-02

4.7610E-02 2.1420E-02 6.8160E-03 1.0040E-01 7.2500E-02 5.7800E-02 4.0070E-02

5.5680E-02 4.1990E-02 2.7890E-02 1.6000E-02 3.7190E-02 2.2130E-02 1.2550E-02

6.3850E-03 2.4420E-02 1.1270E-02 4.5120E-03 1.4260E-03 1.8920E-02 6.5030E-03

2.5930E-03 1.1920E-03 3.2020E-02 3.2040E-02 2.0130E-02 5.6320E-02 3.2440E-02

1.5290E-02 5.0740E-03 6.1970E-02 3.1220E-02 1.5260E-02 6.4270E-03 7.3250E-02

4.6380E-02 2.2280E-02 8.1490E-03 6.9740E-03 7.7030E-03 3.4850E-03 1.3570E-03

1.9760E-02 3.3570E-02 3.3950E-02 2.1870E-02 6.1850E-02 4.5720E-02 2.0970E-02

5.3640E-03 4.4240E-02 1.5930E-02 5.9510E-03 2.1360E-03 7.6340E-01 1.4680E-02

4.0460E-03 9.3530E-03 1.2940E-02 2.8010E-03 2.9630E-02 2.9060E-02 1.1460E-02

6.2890E-04 3.1250E-04 3.9890E-04 6.3230E-04 3.4020E+00 8.8120E-01 1.9920E+00

1.8740E+00 3.7120E-02 2.3120E-02 2.5460E-02 1.7560E-02 5.7880E-02 6.2050E-02

4.0420E-02 1.8050E-02 3.0970E-02 2.0470E-02 2.0860E-02 2.2260E-02 1.4760E-02

1.4340E-02 1.2700E-02 9.5510E-03 3.0770E-03 1.0010E-02 9.0540E-03 5.6140E-03

1.1260E-03 5.8380E-03 5.5490E-03 3.3880E-03 3.1960E-02 1.8280E-02 5.8610E-03

2.4910E-02 1.8900E-02 1.7580E-02 1.1140E-02 1.6420E-02 2.2950E-02 2.1370E-02

1.4290E-02 3.9460E-02 2.1690E-02 2.3370E-02 1.6800E-02 3.2690E-03 2.1080E-03

2.4500E-03 4.2740E-03 1.3170E-02 3.3910E-02 2.0130E-02 5.5370E-03 4.0370E-02

8.6390E-03 2.0540E-02 1.9480E-02 4.8390E-03 1.7410E-02 1.3350E-02 6.3110E-03

8.9100E-04 8.6870E-03 8.3200E-03 2.4310E-03 1.0070E-04 1.6680E-03 1.0140E-02

2.2950E-02 5.9900E-05 3.5540E-04 3.5930E-04 1.8230E-04 1.6350E-01 2.3750E+00

1.2710E+00 2.6780E-01 7.1760E-03 2.2050E-02 1.6080E-02 5.9810E-03 3.5070E-02

1.8490E-02 1.8420E-02 1.6380E-02 7.7700E-03 1.6230E-02 1.4200E-02 9.0850E-03

4.3040E-03 7.5390E-03 8.0090E-03 6.1110E-03 2.5780E-04 1.8470E-03 4.9370E-03

6.8380E-03 7.7810E-05 6.6720E-04 2.7020E-03 4.5020E-03 2.0040E-02 5.8580E-03

2.3620E-03 5.6650E-03 1.4360E-02 1.1290E-02 5.3670E-03 3.5350E-03 9.7500E-03

1.2020E-02 1.1280E-02 8.8940E-03 2.2750E-02 1.4240E-02 5.1450E-03 3.8920E-04

1.9090E-03 2.2490E-03 1.2060E-03 6.5900E-03 2.1830E-02 5.5350E-03 2.4140E-03

5.7850E-03 2.5710E-02 1.2250E-02 1.5240E-03 1.1130E-03 2.4480E-03 8.6260E-03

9.9870E-03 1.4720E+00 5.3920E-02 6.9820E-03 2.5470E+00 1.0010E+00 1.0380E-01

6.7710E-03 4.9030E+00 1.1330E+00 1.6860E-01 1.1380E-02 6.0270E-02 1.3360E-02

3.0500E-03 7.2020E-04 2.3370E+00 2.3260E-01 6.4090E-03 8.4270E-04 2.2170E+00

4.3640E-01 4.5850E-02 2.2240E-03 9.4240E-01 3.2360E-01 3.9700E-02 1.9890E-03

4.2900E-01 1.4520E-01 3.8930E-02 6.6510E-03 6.8420E-01 1.8670E-01 4.6380E-02

7.6660E-03 2.8030E-01 1.3960E-01 1.8640E-02 1.6960E-03 3.7920E-02 7.2970E-03

1.7460E-04 1.9030E-01 2.2440E-02 1.6650E-03 9.6530E-05 2.1420E-01 4.1780E-02

3.3860E-03 3.8450E-04 2.4050E-01 2.9710E-02 8.0120E-03 6.8470E-04 8.3220E-02

2.8140E-02 5.3660E-03 6.8400E-04 2.2450E-02 1.0790E-02 5.7730E-03 4.2520E-04

7.2870E-02 7.8070E-03 1.7340E-03 1.4480E-04 1.1320E-01 3.1070E-02 8.2520E-03

1.7040E-03 9.2470E+00 6.3860E-02 7.6010E-01 3.6850E+00 1.1590E+00 1.2320E-01

9.5880E-01 4.8330E+00 2.1440E+00 2.0210E-01 2.1090E-02 2.7680E-02 8.5240E-03

2.4440E-03 6.2570E-01 1.2730E+00 2.4200E-01 4.7580E-03 5.6830E-01 1.1940E+00

4.4850E-01 5.3870E-02 3.2350E-01 8.9720E-01 3.4570E-01 4.6350E-02 1.4830E-01

2.1480E-01 9.7490E-02 3.3950E-02 1.8640E-01 3.6570E-01 1.6100E-01 5.0880E-02

1.1580E-01 3.2270E-01 1.5390E-01 2.1510E-02 1.8720E-02 1.4310E-02 4.5680E-03

5.3250E-02 1.0260E-01 2.0480E-02 1.7660E-03 5.4680E-02 1.1340E-01 4.4640E-02

3.7570E-03 6.3300E-02 1.3480E-01 1.7790E-02 7.7820E-03 2.8120E-02 8.6470E-02

2.9190E-02 5.9700E-03 1.8710E-02 8.6750E-03 1.9920E-03 3.3780E-03 2.0410E-02

4.3640E-02 5.2470E-03 1.7320E-03 3.8560E-02 5.6590E-02 2.5640E-02 8.5480E-03

1.7280E+00 4.5510E-02 8.7870E-01 2.7370E+00 9.2620E-01 1.3830E-02 1.1720E+00

6.2950E+00 1.6960E+00 7.1640E-03 1.8460E-02 1.7780E-02 5.7120E-03 1.1920E-01

6.5390E-01 7.7000E-01 1.7040E-01 9.5200E-02 5.8450E-01 7.6460E-01 3.5080E-01

3.9690E-02 3.4570E-01 6.3030E-01 2.7840E-01 4.6770E-02 1.2000E-01 1.5300E-01

7.9270E-02 4.6210E-02 1.6090E-01 2.7270E-01 1.4040E-01 8.1280E-03 1.2930E-01

2.0130E-01 1.2470E-01 7.8910E-03 1.3760E-02 8.1060E-03 1.1670E-02 5.6220E-02

6.3510E-02 1.4200E-02 8.6040E-03 5.7660E-02 7.2830E-02 3.4380E-02 2.0090E-02

5.3610E-02 9.1750E-02 1.2150E-02 5.3580E-03 2.9190E-02 6.2890E-02 2.2980E-02

1.4970E-02 4.7100E-03 3.5460E-03 3.1970E-03 5.6000E-03 1.8710E-02 3.1800E-02

3.6230E-03 1.0790E-02 3.1630E-02 3.9240E-02 2.0870E-02 1.9670E-03 5.2690E-02

6.8960E-01 2.6940E+00 4.5550E-04 1.6690E-02 9.1270E-01 6.0120E+00 2.4020E-03

7.3720E-03 1.4380E-02 1.2140E-02 1.5780E-02 1.5560E-01 5.2410E-01 5.9470E-01

9.0220E-03 1.1720E-01 4.7390E-01 7.5380E-01 1.9760E-03 4.6350E-02 2.7840E-01

6.6840E-01 1.1450E-02 4.9680E-02 1.0120E-01 1.3440E-01 7.6420E-03 5.0860E-02

1.4030E-01 2.6420E-01 8.1710E-04 9.1610E-03 1.0240E-01 2.5850E-01 2.4210E-03

9.9480E-03 9.8980E-03 1.7880E-03 1.4440E-02 4.4660E-02 4.7800E-02 9.1970E-04

1.0220E-02 4.6220E-02 7.2730E-02 4.8880E-03 2.2770E-02 4.3250E-02 6.1140E-02

6.8280E-04 5.9690E-03 2.2980E-02 6.0520E-02 1.1230E-02 2.3240E-03 4.6070E-03

1.0180E-03 1.1440E-03 6.3070E-03 1.5040E-02 1.8510E-02 3.0420E-03 1.1790E-02

2.6690E-02 3.5600E-02 2.4790E+00 2.3260E-01 9.1610E-03 5.7970E+00 9.0940E-01

1.3790E-01 7.5780E-03 3.4210E-02 8.1960E-03 2.6150E-03 3.8770E-05 6.2780E-02

1.8690E-02 2.2210E-04 6.4460E-06 1.8960E-01 3.1970E-02 2.5160E-03 7.1670E-05

8.1530E-01 2.8210E-01 2.0350E-02 2.2140E-04 1.2680E+00 1.6710E-01 2.7730E-02

2.7980E-03 3.2940E-01 2.4070E-01 2.9160E-02 3.7610E-03 1.0410E+00 4.1070E-01

5.8030E-02 3.4350E-03 1.1470E-02 6.3600E-04 2.4490E-05 6.1050E-02 1.2130E-02

3.4330E-03 3.2820E-05 2.2810E-01 1.3240E-02 1.5930E-03 2.0870E-04 3.4080E-02

1.0130E-02 2.7760E-04 3.4710E-05 2.0720E-01 5.4410E-02 4.6130E-03 3.0100E-04

2.1990E-04 1.8830E-02 2.9090E-03 2.0730E-05 4.1400E-02 1.0770E-02 3.2730E-03

1.8780E-05 3.8510E-01 3.3600E-02 3.3420E-03 5.3660E-05 4.5820E+00 2.7310E-01

6.7040E-01 5.4390E+00 1.7240E+00 2.4390E-01 1.4500E-02 1.7990E-02 3.8740E-03

2.9360E-03 3.5720E-02 2.2970E-02 1.8590E-02 2.3870E-04 4.8880E-02 9.6750E-02

3.3460E-02 2.9250E-03 3.5190E-01 1.1290E+00 3.2870E-01 2.3690E-02 3.0140E-01

7.7390E-01 1.4280E-01 2.8930E-02 2.7950E-01 6.2600E-01 2.3850E-01 3.2070E-02

2.5640E-01 1.2440E+00 4.4290E-01 6.6790E-02 5.1460E-03 5.3940E-03 3.8440E-04

2.4030E-02 3.1720E-02 6.1390E-03 3.7810E-03 3.9040E-02 1.5500E-01 1.3680E-02

1.7180E-03 1.6100E-02 1.1770E-02 1.0080E-02 2.8040E-04 6.4720E-02 1.1960E-01

5.3290E-02 5.2920E-03 1.8850E-04 9.6950E-03 7.2750E-03 1.7600E-03 1.5660E-02

1.8090E-02 4.8400E-03 3.5190E-03 8.9020E-02 2.4540E-01 3.8970E-02 6.7010E-03

3.5970E+00 1.0380E-01 1.3460E+00 6.9500E+00 2.2470E+00 6.1860E-03 1.0550E-02

1.3020E-02 2.8590E-03 8.9620E-03 2.5620E-02 8.0910E-03 1.3180E-02 9.4840E-03

5.0270E-02 6.3750E-02 2.6110E-02 4.1430E-02 4.0840E-01 8.4080E-01 2.6110E-01

6.8680E-02 2.9640E-01 5.5890E-01 1.1580E-01 4.8220E-02 2.8510E-01 4.3270E-01

1.9920E-01 5.7800E-02 4.3870E-01 9.4530E-01 3.6690E-01 1.9310E-03 4.5770E-03

2.1570E-03 9.1780E-03 1.7940E-02 2.2880E-02 4.5100E-03 5.6080E-03 4.3650E-02

1.1450E-01 1.0380E-02 4.9500E-03 1.4120E-02 5.7390E-03 7.0950E-03 8.6800E-03

6.4400E-02 8.7610E-02 4.4560E-02 1.5710E-04 4.3400E-03 7.2740E-03 3.9940E-03

7.8250E-03 1.2190E-02 1.5800E-02 3.5380E-03 1.6480E-02 9.3230E-02 1.7830E-01

3.1140E-02 1.1100E-03 1.2030E-01 1.8420E+00 7.4500E+00 1.7490E-03 6.9120E-03

9.3260E-03 8.9480E-03 1.3820E-03 1.1020E-02 2.1930E-02 1.1810E-02 9.8830E-04

1.1360E-02 4.1640E-02 6.2090E-02 2.0950E-03 4.9830E-02 3.3500E-01 8.8720E-01

1.1500E-02 7.9060E-02 2.4930E-01 5.0560E-01 6.2730E-03 5.4780E-02 2.2970E-01

4.8950E-01 3.4350E-03 6.6610E-02 3.6460E-01 1.0400E+00 9.0000E-04 2.6260E-03

3.7870E-03 2.3710E-03 1.0480E-02 1.5410E-02 1.5530E-02 7.2470E-04 6.6090E-03

3.3250E-02 9.1370E-02 1.2200E-03 6.0410E-03 1.1960E-02 6.5840E-03 7.5560E-04

1.0100E-02 5.4190E-02 1.0670E-01 1.2560E-04 1.4670E-03 5.4340E-03 5.5860E-03

2.2250E-03 8.7290E-03 1.0840E-02 8.9260E-03 1.1710E-03 1.9680E-02 7.6670E-02

1.5760E-01 9.6540E-01 2.6290E-02 1.0240E-03 1.6330E-01 2.7030E-02 1.0270E-04

1.6060E-05 1.2840E-02 8.8830E-04 2.3620E-05 1.6090E-06 2.8530E-02 7.3180E-03

4.6300E-04 9.5060E-06 1.7770E+00 1.6270E-01 2.9460E-03 3.0230E-05 1.0500E-01

2.3270E-02 3.1620E-03 3.5440E-05 3.4940E-01 1.0130E-01 1.0180E-02 9.5700E-04

1.0830E+00 2.1510E-01 5.6480E-02 3.7540E-03 4.7270E-04 2.8060E-04 3.1420E-05

1.5760E-02 2.3300E-03 1.9130E-04 3.2030E-05 8.4660E-02 1.3750E-02 1.9550E-03

7.6550E-05 3.7800E-02 7.4040E-03 2.9070E-04 3.4490E-05 4.8740E-01 5.8100E-02

6.4260E-03 5.1780E-04 1.1370E-03 8.2170E-04 4.5820E-04 1.0700E-04 3.1620E-02

3.4000E-03 1.1720E-04 1.7120E-06 3.7660E-02 1.0670E-02 1.6440E-03 3.0880E-05

2.0370E+00 5.0490E-02 6.4340E-02 7.6670E-02 2.9220E-02 9.1230E-05 4.1250E-03

6.7830E-03 8.6710E-04 2.3710E-05 1.0820E-02 1.2680E-02 7.7170E-03 5.3190E-04

2.9180E-01 1.8250E+00 1.9770E-01 3.3800E-03 3.6330E-02 5.4620E-02 2.0870E-02

3.6570E-03 1.0200E-01 4.4510E-01 1.1340E-01 1.1390E-02 2.6970E-01 1.4200E+00

3.8970E-01 6.3710E-02 3.1020E-04 2.4370E-04 1.6180E-04 6.2910E-03 7.4480E-03

2.1130E-03 1.3670E-04 2.4870E-02 4.8760E-02 1.2010E-02 2.2140E-03 1.6000E-02

1.5040E-02 6.6670E-03 2.6290E-04 1.2910E-01 5.4210E-01 6.1860E-02 7.3620E-03

9.9480E-04 6.5830E-04 3.1120E-04 2.4190E-04 1.2930E-02 1.5450E-02 3.2710E-03

1.2600E-04 1.5210E-02 1.6690E-02 1.0060E-02 1.9710E-03 2.1490E+00 1.8890E-02

6.1140E-02 4.4870E-02 2.0700E-02 1.0080E-03 4.2960E-03 4.2980E-03 6.1610E-04

2.4960E-03 1.0760E-02 7.9380E-03 6.0300E-03 4.0930E-02 6.1660E-01 2.3340E+00

1.5290E-01 9.9520E-03 3.3140E-02 3.7180E-02 1.7780E-02 2.4810E-02 1.6620E-01

3.4110E-01 8.8450E-02 7.3950E-02 4.5800E-01 1.0670E+00 3.2740E-01 2.0230E-04

1.8830E-04 1.1750E-04 1.9380E-03 5.5250E-03 4.5520E-03 1.4930E-03 6.7040E-03

2.3670E-02 3.5470E-02 9.9420E-03 5.1190E-03 1.4490E-02 1.0160E-02 4.6870E-03

1.5930E-02 1.4350E-01 4.2420E-01 5.2230E-02 8.5270E-04 4.7230E-04 3.3150E-04

2.3490E-04 2.8420E-03 1.2640E-02 9.5460E-03 2.3300E-03 4.2150E-03 1.3920E-02

1.1010E-02 8.1600E-03 3.0160E-03 2.3380E-02 5.1990E-02 4.3120E-02 1.4180E-04

1.1920E-03 3.4490E-03 3.6480E-03 3.0150E-04 2.9550E-03 9.1460E-03 1.0270E-02

2.0680E-03 4.8390E-02 4.8970E-01 2.1220E+00 1.3670E-03 1.1590E-02 2.9960E-02

3.9540E-02 2.8040E-03 2.8720E-02 1.3820E-01 3.5170E-01 6.7900E-03 8.3920E-02

3.8830E-01 1.1330E+00 1.4090E-04 1.8720E-04 1.8160E-04 4.3000E-04 2.3140E-03

4.6760E-03 4.0850E-03 9.2820E-04 7.8400E-03 2.0330E-02 3.4060E-02 1.1270E-03

6.1010E-03 1.2360E-02 9.7050E-03 1.5950E-03 1.8570E-02 1.1780E-01 3.9810E-01

7.1060E-04 2.9870E-04 4.0040E-04 1.6580E-04 4.6910E-04 3.5240E-03 1.0660E-02

8.4480E-03 7.0940E-04 4.9050E-03 1.2200E-02 1.3340E-02 3.2670E+00 4.8710E-01

2.8260E-02 1.0880E-01 5.1480E-02 3.1920E-02 1.6110E-02 8.2450E-02 5.5380E-02

3.0090E-02 1.5920E-02 7.6440E-02 3.5510E-02 1.2970E-02 3.2150E-03 4.8800E-02

2.5760E-02 1.1230E-02 3.2450E-03 5.8220E-02 2.3890E-02 1.0870E-02 3.4060E-03

8.1990E-02 3.1030E-02 8.4250E-03 1.3390E-03 9.2450E-02 6.2050E-02 9.1560E-03

3.3900E-02 1.7890E-02 8.5740E-03 3.3070E-03 9.2870E-02 4.3810E-02 1.1420E-02

3.0550E-03 5.9840E-02 3.0980E-02 1.1160E-02 5.0500E-03 6.4290E-02 1.9320E-02

7.2660E-03 1.6820E-03 1.2310E-01 1.1040E-01 7.2460E-02 3.9850E-03 5.4630E-02

2.7940E-02 9.7790E-03 2.8410E-03 4.7610E-02 1.8130E-02 5.8780E-03 1.1060E-03

2.9270E+00 5.8490E-01 5.1480E-02 7.3570E-02 3.1510E-02 1.1690E-02 4.9790E-02

3.4880E-02 3.5030E-02 2.0600E-02 2.7770E-02 3.0000E-02 2.6420E-02 1.4620E-02

2.5960E-02 1.6600E-02 1.4680E-02 1.1340E-02 1.9000E-02 1.4380E-02 1.4340E-02

1.1460E-02 1.5280E-02 3.7020E-02 2.9340E-02 1.0460E-02 6.9490E-02 1.6610E-02

3.6380E-02 1.7870E-02 1.4050E-02 9.7380E-03 5.0620E-03 3.5560E-02 3.4070E-02

3.5560E-02 1.4520E-02 3.0840E-02 1.9780E-02 2.1760E-02 8.1710E-03 9.9150E-03

3.1110E-02 2.0390E-02 6.1590E-03 9.2110E-02 8.1640E-02 7.8110E-03 4.9850E-02

2.7930E-02 1.7770E-02 1.8230E-02 7.5000E-03 1.4920E-02 1.3390E-02 1.5860E-02

6.6200E-03 1.9550E+00 3.1920E-02 3.1510E-02 3.3750E-02 1.0310E-02 2.2200E-02

3.2130E-02 1.7540E-02 2.1860E-02 4.8260E-03 1.8610E-02 1.8930E-02 2.1710E-02

7.3380E-03 1.2930E-02 1.2670E-02 1.1030E-02 5.4650E-03 1.1550E-02 1.0700E-02

1.1650E-02 3.7590E-04 1.5280E-02 2.1230E-02 2.4510E-02 3.4870E-02 3.0880E-02

1.7730E-02 8.5670E-03 9.7280E-03 7.7500E-03 4.4970E-03 5.6590E-03 3.0090E-02

1.5210E-02 2.3750E-02 1.1120E-02 2.1750E-02 8.6690E-03 1.1460E-02 1.7010E-03

6.7750E-03 2.2510E-02 1.4560E-02 6.1290E-02 3.4330E-02 3.6650E-02 2.2460E-02

9.7740E-03 1.8230E-02 8.7750E-03 1.0240E-02 2.7410E-03 1.3240E-02 7.8790E-03

1.0040E-02 1.6110E-02 1.1690E-02 1.0310E-02 1.3070E-02 9.2070E-03 1.1700E-02

1.7730E-02 7.9920E-03 4.6820E-04 4.8470E-03 1.3410E-02 1.3860E-02 1.2140E-03

8.0980E-03 8.2470E-03 5.3350E-03 8.4220E-04 5.0990E-03 7.7030E-03 6.0220E-03

3.4410E-05 3.7170E-04 1.0780E-02 1.9510E-02 9.4940E-03 2.6980E-02 2.9240E-03

3.3070E-03 5.0550E-03 4.4950E-03 2.9550E-03 1.2910E-03 5.0350E-03 1.7770E-02

1.1940E-02 5.0500E-03 7.2340E-03 1.1430E-02 3.0890E-03 6.5180E-04 9.9490E-04

3.9490E-03 1.3510E-02 3.0610E-02 7.2370E-03 3.8060E-02 1.2990E-03 2.8410E-03

7.4970E-03 1.0230E-02 3.1460E-03 2.7390E-04 2.8510E-03 8.5690E-03 5.1270E-03

1.0940E+00 6.3910E-02 9.7720E-03 4.0690E+00 1.3160E+00 2.7420E-01 3.0900E-02

8.7970E+00 1.9150E+00 3.0800E-01 3.3540E-02 1.4580E-01 5.8000E-02 2.0610E-02

5.6040E-03 1.7060E-01 6.1430E-02 1.9140E-02 5.2830E-03 3.4290E-02 1.6300E-02

7.6940E-03 2.1470E-03 3.3550E-01 1.1950E-01 2.0260E-02 5.8710E-01 2.7900E-01

8.0710E-02 1.2650E-02 4.3210E-01 1.2910E-01 2.8340E-02 5.4260E-03 1.5800E-01

8.5670E-02 2.6040E-02 8.1780E-03 3.1370E-02 1.3780E-02 5.4880E-03 1.7300E-03

1.7130E-02 1.9430E-02 1.2150E-02 7.1660E-03 5.9820E-02 3.5640E-02 1.7590E-02

6.0550E-03 7.1840E-02 3.3960E-02 1.3920E-02 4.9890E-03 1.2070E+00 6.7110E-02

9.3200E-01 1.7810E+00 1.2340E+00 3.4260E-01 4.1500E-01 5.1860E+00 2.1620E+00

4.0390E-01 4.5390E-02 6.2670E-02 3.2900E-02 2.3350E-02 2.8970E-02 1.0900E-01

6.5690E-02 2.2560E-02 1.0020E-02 1.7050E-02 9.5350E-03 8.5270E-03 1.6770E-01

1.0440E-01 7.2330E-02 2.7490E-01 1.8200E-01 1.8510E-01 7.9760E-02 8.6810E-02

2.0930E-01 1.1930E-01 3.3930E-02 8.5480E-02 4.8540E-02 6.0630E-02 1.9610E-02

9.6450E-03 1.4390E-02 1.1020E-02 5.7420E-03 1.2840E-02 1.4030E-02 9.6340E-03

4.9450E-03 3.5600E-02 2.3640E-02 1.8290E-02 1.1070E-02 2.8600E-02 2.6500E-02

2.2950E-02 1.2840E-02 8.4370E-01 7.6570E-02 8.9790E-01 9.3090E-01 9.5340E-01

3.0350E-03 4.3390E-01 3.2790E+00 1.7200E+00 1.2960E-02 2.1600E-02 4.4730E-02

2.4410E-02 6.2940E-03 2.3960E-02 8.3200E-02 3.4830E-02 3.6290E-03 3.5790E-03

1.4740E-02 8.5710E-03 6.8570E-02 1.0300E-01 6.7010E-02 8.0190E-02 1.8380E-01

1.0920E-01 1.0920E-01 1.0120E-02 7.8890E-02 1.1490E-01 9.1840E-02 2.6010E-02

6.0540E-02 1.9380E-02 3.3190E-02 2.4670E-03 6.4330E-03 1.0070E-02 8.8970E-03

8.5550E-03 1.0980E-02 6.7860E-03 2.8870E-03 1.7580E-02 1.8240E-02 1.6490E-02

8.0230E-03 8.3570E-03 1.9200E-02 1.3880E-02 1.7100E-02 2.5080E-03 8.5900E-02

6.2570E-01 7.2350E-01 2.7760E-04 3.0580E-03 3.0380E-01 2.4010E+00 1.6490E-03

1.2900E-02 1.6600E-02 2.3960E-02 4.1340E-04 5.6800E-03 1.6660E-02 3.6120E-02

9.6150E-06 4.0120E-03 2.9020E-03 8.2580E-03 2.0290E-02 5.9550E-02 3.2390E-02

1.2650E-02 7.9370E-02 1.0890E-01 3.8570E-02 1.7430E-03 9.2860E-03 5.3500E-02

8.3520E-02 8.1780E-03 1.9570E-02 3.4500E-02 7.8640E-03 4.8080E-04 2.1510E-03

4.2140E-03 6.8870E-03 4.2760E-03 5.3660E-03 3.0410E-03 1.3480E-03 6.0550E-03

1.1810E-02 8.0160E-03 4.6670E-03 2.5500E-03 6.7890E-03 1.1840E-02 7.7370E-03

2.9270E+00 2.6340E-01 1.5500E-02 7.4060E+00 1.8400E+00 2.8360E-01 2.2030E-02

4.7280E-01 1.5060E-01 3.2080E-02 5.3010E-03 7.6710E-01 2.5840E-01 5.7760E-02

9.5360E-03 4.2450E-01 1.1540E-01 1.8650E-02 1.4340E-03 4.1330E-01 2.2760E-02

3.1980E-03 5.4710E-01 1.1150E-01 1.3640E-02 7.1930E-04 7.2190E-01 2.4290E-01

5.4520E-02 6.1510E-03 1.4260E-01 4.8260E-02 9.3540E-03 2.9500E-03 8.2150E-02

3.4580E-02 1.3010E-02 3.8670E-03 1.8170E-02 6.2780E-02 1.1450E-02 7.3490E-03

6.4260E-02 2.8640E-02 1.0890E-02 2.1110E-03 1.0470E-01 3.2070E-02 7.4900E-03

1.2590E-03 3.2280E+00 3.2250E-01 1.3920E+00 4.0020E+00 1.9540E+00 3.5150E-01

1.4980E-01 2.0760E-01 1.3840E-01 3.4490E-02 2.2310E-01 3.7670E-01 2.4030E-01

6.8050E-02 7.3300E-02 2.1880E-01 1.2970E-01 2.2630E-02 1.4740E-01 1.9050E-01

1.2860E-02 1.6580E-01 2.7100E-01 9.6670E-02 1.4500E-02 2.4120E-01 3.1460E-01

2.0240E-01 6.3190E-02 5.9790E-02 5.3830E-02 4.2960E-02 6.3150E-03 3.0050E-02

3.8560E-02 2.5420E-02 1.3290E-02 1.4540E-02 2.8720E-02 3.3370E-02 3.6870E-03

3.4580E-02 2.7520E-02 1.4680E-02 1.0200E-02 3.8810E-02 3.5560E-02 2.7290E-02

8.1900E-03 2.4750E+00 1.1540E-01 1.4940E+00 2.5990E+00 1.5720E+00 3.1970E-02

1.3780E-01 1.2500E-01 1.0850E-01 3.1880E-02 1.9270E-01 2.4750E-01 2.0240E-01

1.8020E-03 8.5320E-02 1.4320E-01 1.0640E-01 4.2410E-02 1.4090E-01 7.9610E-02

3.6990E-02 1.5170E-01 1.5820E-01 6.2070E-02 5.4250E-02 1.9240E-01 1.9760E-01

1.6440E-01 1.8550E-02 5.1360E-02 2.7890E-02 2.8030E-02 9.6040E-03 2.1540E-02

2.7710E-02 2.1780E-02 1.0910E-02 1.4960E-02 2.2990E-02 1.1610E-02 1.6920E-02

1.8360E-02 2.1590E-02 8.3630E-03 7.4590E-03 2.7210E-02 2.1190E-02 2.1560E-02

2.8320E-03 1.3830E-01 1.1560E+00 2.5600E+00 5.3010E-03 3.4400E-02 1.0820E-01

1.1810E-01 2.8380E-03 3.6300E-02 1.5490E-01 2.5820E-01 9.2550E-05 2.0570E-03

6.5690E-02 1.5480E-01 9.2090E-03 5.6390E-02 1.0940E-01 5.2750E-03 4.4180E-02

1.1640E-01 1.0930E-01 6.1520E-03 6.2990E-02 1.5520E-01 1.8000E-01 6.0360E-03

1.9370E-02 3.7690E-02 1.8790E-02 2.1530E-03 9.6170E-03 1.7770E-02 2.4460E-02

7.2700E-03 8.9640E-03 8.6810E-03 1.5360E-02 5.3660E-03 1.5690E-02 1.2620E-02

1.0300E-02 1.2480E-03 8.1760E-03 2.1520E-02 2.0740E-02 2.6340E+00 1.0220E-01

7.0450E-03 5.2030E-01 1.2510E-01 2.4880E-02 5.2190E-03 3.3050E-01 8.4000E-02

1.3260E-02 5.9850E-04 2.5130E-01 7.7570E-02 1.8910E-02 2.4970E-03 2.3530E-02

8.4290E-03 1.0770E-03 7.4030E-01 5.6210E-02 1.0660E-02 1.9910E-03 5.1950E-01

1.0990E-01 1.1490E-02 1.4000E-03 5.8000E-02 1.6440E-02 2.1110E-03 5.2720E-04

2.7350E-01 6.6690E-02 9.6380E-03 1.8650E-03 2.9370E-02 2.9920E-02 1.5480E-02

3.3540E-03 8.6710E-02 1.9860E-02 6.4490E-03 5.3580E-04 1.6450E-01 4.8330E-02

1.1030E-02 1.4060E-03 3.2460E+00 1.2230E-01 1.5530E-01 2.7390E-01 1.0980E-01

2.5660E-02 8.3780E-02 1.7860E-01 8.8730E-02 1.5680E-02 6.7460E-02 1.3950E-01

7.0480E-02 2.1380E-02 1.3690E-02 6.8810E-03 5.0810E-03 1.8420E-01 4.3590E-01

4.4210E-02 9.5420E-03 1.4060E-01 2.7200E-01 1.1040E-01 1.2660E-02 2.3680E-02

2.7720E-02 1.2880E-02 1.5880E-03 6.6270E-02 1.6990E-01 6.7800E-02 1.0310E-02

2.4480E-02 2.1800E-02 1.0430E-02 8.3700E-03 3.6670E-02 4.4940E-02 1.0100E-02

6.6070E-03 5.7350E-02 8.0460E-02 3.7980E-02 1.2090E-02 2.4910E+00 4.1060E-02

1.3980E-01 1.8560E-01 8.7020E-02 1.3240E-02 8.8450E-02 1.2390E-01 7.3460E-02

1.4020E-02 6.0900E-02 9.9220E-02 6.1670E-02 7.6490E-03 7.4900E-03 5.2260E-03

4.0290E-02 1.8780E-01 2.8020E-01 2.9930E-02 2.2970E-02 1.4110E-01 1.7740E-01

7.8650E-02 8.2680E-03 1.9700E-02 1.5850E-02 8.7480E-03 9.6010E-03 6.7390E-02

1.3250E-01 5.5080E-02 1.9580E-02 1.3790E-02 1.1030E-02 7.6190E-03 1.4820E-02

2.3390E-02 3.2290E-02 6.8710E-03 1.8350E-02 4.6360E-02 5.6310E-02 3.1420E-02

8.7840E-03 4.3990E-02 1.1500E-01 1.7150E-01 5.9790E-04 1.5660E-02 7.3290E-02

1.2800E-01 1.3650E-03 1.5750E-02 5.2530E-02 1.0530E-01 3.4490E-03 7.7480E-03

4.0780E-03 8.8680E-03 4.6810E-02 1.4920E-01 1.9990E-01 3.0610E-03 2.6970E-02

1.1460E-01 1.7420E-01 1.9860E-03 8.9850E-03 1.6320E-02 1.2770E-02 1.8510E-03

1.0290E-02 5.4820E-02 1.4020E-01 1.4680E-02 7.4770E-03 1.1890E-02 5.0400E-03

4.1580E-03 1.4280E-02 1.8990E-02 1.9870E-02 2.8900E-03 1.9290E-02 3.9740E-02

5.1290E-02 1.6240E+00 5.7650E-02 5.8530E-03 5.4940E+00 1.2520E+00 1.7220E-01

1.2250E-02 1.1370E+01 1.9030E+00 2.1330E-01 1.2480E-02 4.5650E-01 5.4940E-02

1.8900E-02 5.5600E-01 1.8500E-01 2.9790E-02 7.8380E-03 5.5170E-01 1.1840E-01

2.1590E-02 3.1430E-03 2.2020E-01 7.4010E-02 7.9620E-03 2.2420E-03 8.7670E-02

3.8750E-02 1.2600E-02 2.6410E-03 1.6040E-02 3.0090E-02 1.1280E-02 5.2380E-03

4.6630E-02 2.2030E-02 6.7100E-03 1.1590E-03 9.7580E-02 2.9360E-02 7.8110E-03

1.3420E-03 1.9730E+00 6.7930E-02 9.1400E-01 3.0940E+00 1.3640E+00 2.1080E-01

6.6340E-01 7.6460E+00 2.2680E+00 2.6420E-01 1.8410E-01 2.1050E-01 2.6410E-02

2.3020E-01 2.1590E-01 1.5970E-01 2.2610E-02 1.1830E-01 2.9330E-01 1.1410E-01

2.2670E-02 9.0140E-02 7.6770E-02 6.4370E-02 7.1740E-03 1.9200E-02 6.3690E-02

3.7840E-02 1.4000E-02 1.2830E-02 1.7720E-02 1.4530E-02 4.1210E-03 2.5470E-02

1.6940E-02 1.2430E-02 6.8680E-03 2.9340E-02 4.9880E-02 2.3470E-02 8.3420E-03

1.4820E+00 5.9980E-02 1.0060E+00 2.0160E+00 1.0890E+00 5.0350E-03 7.8020E-01

5.5150E+00 1.8030E+00 7.1210E-02 1.5990E-01 8.7270E-02 6.5150E-02 1.9440E-01

9.6160E-02 1.0630E-01 2.1570E-02 1.1400E-01 1.8730E-01 8.8000E-02 2.3470E-02

7.7410E-02 3.1060E-02 4.2280E-02 6.6140E-03 2.4060E-02 4.7570E-02 3.4630E-02

9.6220E-03 1.0760E-02 1.1070E-02 5.9900E-03 1.0700E-02 1.4570E-02 1.2910E-02

7.7010E-03 7.8050E-03 2.3470E-02 2.9750E-02 1.8620E-02 1.0470E-03 7.1170E-02

7.7290E-01 1.9470E+00 4.5730E-04 5.4890E-03 5.8890E-01 4.8920E+00 2.8840E-02

6.6020E-02 1.1110E-01 1.7360E-02 6.9100E-02 1.4540E-01 8.0870E-02 3.1430E-03

2.2660E-02 8.7970E-02 1.6980E-01 4.9130E-03 2.2610E-02 5.7310E-02 3.0710E-02

1.3610E-03 7.8110E-03 2.4060E-02 4.9820E-02 6.4150E-03 5.7460E-03 6.3980E-03

5.7890E-03 3.1880E-03 1.0680E-02 1.0570E-02 5.9010E-03 1.3410E-03 8.3400E-03

1.8610E-02 2.6080E-02 3.3620E+00 2.3360E-01 1.5760E-02 6.8850E+00 1.4200E+00

2.6990E-01 1.4610E-02 9.2870E-02 4.3850E-02 1.1040E-02 2.7920E-01 1.8510E-02

4.2580E-03 7.9670E-04 6.8000E-01 1.5890E-01 3.8870E-02 7.7370E-03 1.0970E-01

1.5490E-02 5.3110E-03 6.3870E-04 2.3160E-01 5.9040E-02 1.0440E-02 1.2050E-03

3.6810E-03 2.5300E-02 5.9140E-03 3.9500E-04 1.0330E-01 1.9520E-02 7.0250E-03

1.1220E-03 1.8990E-01 6.1950E-02 5.0040E-03 3.8640E-04 3.9600E+00 2.7920E-01

1.0630E+00 7.2570E+00 2.6700E+00 3.2110E-01 5.6650E-02 2.8980E-02 2.2970E-02

6.1650E-02 1.6880E-01 1.3490E-02 3.7930E-03 1.9870E-01 3.6940E-01 1.3300E-01

3.6260E-02 3.2440E-02 6.0790E-02 9.7530E-03 3.5680E-03 6.6860E-02 1.2460E-01

5.7660E-02 1.1710E-02 3.0670E-03 1.4260E-02 9.4110E-03 3.5090E-03 4.0570E-02

5.3980E-02 1.0880E-02 7.0150E-03 8.0480E-02 1.4960E-01 6.7470E-02 5.5620E-03

3.0860E+00 1.2560E-01 2.1160E+00 5.3050E+00 2.1440E+00 4.0350E-02 3.5300E-02

1.8610E-02 1.4120E-02 6.2870E-02 1.1020E-01 9.1490E-03 5.4370E-02 1.7410E-01

2.5490E-01 1.0680E-01 1.2030E-02 2.9090E-02 3.9850E-02 6.5380E-03 1.0050E-02

5.7420E-02 8.7240E-02 4.7810E-02 2.4530E-03 6.6030E-03 9.2040E-03 5.9360E-03

1.6100E-02 2.8460E-02 3.8520E-02 7.0900E-03 1.2070E-02 8.5980E-02 9.2590E-02

5.1790E-02 3.5790E-04 1.4860E-01 1.6660E+00 5.4620E+00 2.2960E-02 2.8930E-02

1.4330E-02 3.3120E-03 1.6320E-02 4.9960E-02 7.7500E-02 1.2800E-02 5.9350E-02

1.4320E-01 2.2760E-01 3.4450E-03 1.0740E-02 2.3230E-02 2.7470E-02 1.1890E-03

1.1670E-02 4.7670E-02 9.1510E-02 1.8400E-03 2.3700E-03 7.5560E-03 6.1210E-03

4.7430E-03 1.3880E-02 2.2710E-02 2.3510E-02 1.1370E-03 1.4450E-02 6.8820E-02

9.8880E-02 1.3970E+00 1.0350E-01 7.0650E-03 1.6600E-02 1.9530E-03 1.0200E-04

6.9550E-02 2.3950E-02 7.4870E-03 1.6780E-04 1.9790E+00 1.3760E-01 1.9600E-02

2.5430E-03 2.9720E-02 8.7600E-03 1.6450E-03 1.4080E-04 5.6980E-01 9.4320E-02

1.2110E-02 1.6230E-03 4.6520E-04 2.6670E-02 3.4860E-03 2.7250E-04 3.4350E-02

8.1590E-03 7.4220E-04 5.0290E-05 3.7700E-01 2.3410E-02 3.9760E-03 2.6010E-04

2.4820E+00 1.1960E-01 8.2310E-03 6.6560E-03 1.1700E-03 3.5660E-02 3.9830E-02

1.1600E-02 8.1130E-03 3.5430E-01 1.3250E+00 1.2740E-01 2.1240E-02 1.3410E-02

1.3440E-02 5.9510E-03 1.5080E-03 1.1360E-01 3.0410E-01 1.0090E-01 1.5110E-02

3.9890E-04 1.3700E-02 1.0280E-02 2.1210E-03 1.4920E-02 1.5060E-02 5.8280E-03

6.9520E-04 5.3930E-02 1.7940E-01 2.1370E-02 4.4130E-03 2.9420E+00 3.5630E-03

6.4970E-03 3.3900E-03 1.7020E-02 2.1310E-02 2.5270E-02 8.5430E-03 6.0150E-02

3.9540E-01 9.7780E-01 1.0320E-01 4.6780E-03 1.0470E-02 8.9440E-03 4.1830E-03

1.8770E-02 1.2070E-01 2.2630E-01 8.0600E-02 3.3240E-04 6.1030E-03 1.0290E-02

5.6570E-03 4.7470E-03 1.1060E-02 9.2540E-03 4.0480E-03 1.0580E-02 5.5360E-02

1.3290E-01 1.7560E-02 1.1070E-03 4.4710E-03 5.0910E-03 4.9910E-03 1.8840E-02

1.9070E-02 1.4940E-02 8.7840E-03 7.0070E-02 3.2110E-01 8.0260E-01 1.5970E-03

6.5650E-03 8.8440E-03 6.8490E-03 2.9430E-03 2.1340E-02 1.0020E-01 2.3580E-01

2.6590E-04 1.7490E-03 7.6950E-03 7.9180E-03 1.0880E-03 5.9710E-03 9.2600E-03

6.8390E-03 1.4890E-03 1.2370E-02 4.5780E-02 1.2560E-01 5.7940E-01 3.8580E-02

2.1720E+00 1.0640E+00 3.6550E-01 6.3830E-02 7.4500E+00 2.6060E+00 7.0170E-01

1.2150E-01 5.4860E-02 3.0990E-02 1.4820E-02 6.0820E-03 2.0210E-02 1.4210E-02

8.5510E-03 4.3620E-03 2.7670E-02 1.0860E-01 9.8040E-02 6.0800E-02 9.1320E-02

5.4500E-02 3.0760E-02 1.3930E-02 4.1480E-02 2.6180E-02 1.7560E-02 1.1440E-02

4.8670E-01 7.3040E-01 6.2530E-01 6.5440E-01 4.3840E-01 2.7180E-01 3.4720E+00

2.5610E+00 9.9390E-01 2.3170E-02 2.2510E-02 1.6960E-02 9.6120E-03 1.1790E-02

5.9630E-03 6.9170E-03 9.5590E-03 1.8450E-02 9.8040E-02 6.2710E-02 1.8490E-02

4.3060E-02 3.9390E-02 3.0330E-02 1.4130E-02 1.7900E-02 2.2270E-02 1.5930E-02

8.3310E-03 2.7070E-02 5.1260E-01 4.5000E-01 2.3190E-01 1.9200E-02 1.7200E-01

1.4350E+00 2.0170E+00 6.1140E-03 1.1980E-02 1.0650E-02 6.2400E-03 1.1160E-03

6.8930E-03 5.2300E-03 3.2650E-03 9.2250E-03 6.0780E-02 1.8670E-02 9.8010E-03

1.7980E-02 1.8670E-02 1.6610E-02 1.0020E-02 9.6420E-03 6.7910E-03 8.3280E-03

7.8460E-03 2.8400E+00 4.4900E-01 3.0040E-02 7.8030E+00 2.8280E+00 6.0700E-01

7.2190E-02 1.0820E-01 5.3580E-02 1.6080E-02 2.6790E-03 6.4390E-02 3.1890E-02

1.5080E-02 6.6920E-03 2.0420E-01 1.2850E-01 3.8530E-02 1.5910E-02 1.4510E-01

7.2810E-02 2.7890E-02 1.0270E-02 1.3700E-01 5.5280E-02 1.4960E-02 2.0900E-03

2.5180E+00 5.3110E-01 2.1190E+00 3.0450E+00 2.6160E+00 7.5130E-01 5.3550E-02

3.2750E-02 3.7400E-02 1.4130E-02 2.4260E-02 2.4710E-02 2.1120E-02 1.4310E-02

1.5260E-01 6.3210E-02 6.2880E-02 1.6760E-02 7.2800E-02 4.6840E-02 4.8960E-02

1.7430E-02 4.4250E-02 5.1400E-02 4.4830E-02 1.7830E-02 1.6760E+00 1.6560E-01

2.0630E+00 1.4520E+00 2.0210E+00 1.6080E-02 3.7380E-02 1.5280E-02 2.1080E-02

7.2470E-03 1.5480E-02 1.6640E-02 1.6420E-02 1.0160E-01 2.8820E-02 3.8430E-02

2.5970E-02 2.7900E-02 4.8960E-02 2.1320E-02 2.6960E-02 5.9340E-03 3.5500E-02

2.9200E-02 3.5770E-02 8.3760E-03 1.7840E-01 1.4300E+00 1.2320E+00 2.6790E-03

1.4130E-02 2.1080E-02 5.6390E-03 1.0170E-03 6.1090E-03 9.8680E-03 1.0260E-02

5.0710E-02 1.2360E-02 1.5290E-02 1.9530E-02 1.0270E-02 1.7430E-02 2.6960E-02

7.4550E-03 3.0340E-04 6.6340E-03 2.3630E-02 2.0400E-02 2.6210E+00 1.8710E-01

1.2340E-02 1.7520E-01 5.9310E-02 1.2930E-02 3.4750E-03 1.2310E-01 5.9430E-02

1.9580E-02 4.0510E-03 3.7290E-02 3.7730E-01 3.9280E-02 5.7660E-03 4.2640E-01

1.2460E-01 1.5800E-02 4.1740E-03 1.2580E-01 6.1070E-02 2.1440E-02 4.2790E-03

2.9970E+00 2.2680E-01 7.3050E-02 6.3600E-02 4.9760E-02 9.3700E-03 5.3150E-02

5.0030E-02 4.3070E-02 2.1450E-02 2.9840E-02 1.4600E-01 1.6800E-01 2.2250E-02

1.7100E-01 1.5400E-01 1.1790E-01 1.1770E-02 6.0940E-02 3.9170E-02 3.6170E-02

2.3400E-02 2.2840E+00 2.2910E-02 6.1390E-02 3.0070E-02 3.3570E-02 1.2250E-02

3.8420E-02 3.0390E-02 3.6700E-02 2.2380E-02 4.8340E-02 1.2840E-01 7.4180E-02

3.9890E-02 1.4150E-01 6.1190E-02 8.6980E-02 2.1420E-02 3.6150E-02 2.9620E-02

3.0110E-02 6.8420E-03 2.2950E-02 4.5260E-02 2.4100E-02 2.3660E-03 1.2780E-02

3.1300E-02 3.2590E-02 1.4920E-02 1.4500E-02 5.8700E-02 9.5300E-02 8.5410E-03

4.3750E-02 1.1680E-01 5.9990E-02 4.2790E-03 2.3390E-02 3.0100E-02 2.1900E-02

1.5340E+00 2.5520E-01 7.1180E-02 6.1670E+00 1.5220E+00 3.0200E-01 4.7670E-02

1.1570E+00 2.0500E+00 1.1610E+00 8.6200E-02 1.6910E+00 5.5920E-01 9.8600E-02

6.6470E-03 2.2110E+00 6.7010E-01 1.3330E-01 1.6410E-02 1.4320E+00 1.9140E-01

4.6230E-01 3.5520E+00 1.5870E+00 3.6170E-01 8.6460E-01 1.3830E+00 3.1090E-01

7.7890E-01 5.5390E-01 6.3060E-01 4.7290E-01 1.1280E-01 4.4600E-01 1.0180E+00

6.4690E-01 1.6470E-01 9.3750E-01 3.4780E-02 4.2220E-01 2.2210E+00 1.2550E+00

5.7510E-01 5.7530E-01 6.6290E-01 4.1780E-01 9.7110E-02 4.6910E-01 3.0580E-01

3.0990E-01 3.4270E-02 4.4590E-01 5.3780E-01 4.9810E-01 9.3740E-03 2.6450E-02

2.8710E-01 1.6450E+00 2.8720E-01 1.2800E-01 6.0840E-01 8.4830E-02 6.6450E-03

1.1160E-01 3.1070E-01 1.6340E-01 3.3290E-03 3.8330E-02 3.1030E-01 4.0960E-01

3.1640E+00 2.4900E-01 3.1840E-02 9.7260E-02 8.0560E-02 2.9390E-02 5.6820E-03

5.1390E+00 2.2620E-01 5.8970E-03 1.3640E-03 1.0540E+01 2.0160E+00 1.6640E-01

7.9810E-03 3.6970E+00 2.8700E-01 8.1050E-02 5.0370E-02 2.8510E-02 1.5800E-02

1.1340E+00 3.0960E+00 2.2450E-01 4.8680E-03 2.6440E+00 5.5130E+00 2.1620E+00

1.8950E-01 2.8870E+00 6.4840E-02 2.8900E-02 3.0060E-02 1.8660E-02 1.8290E-01

1.2780E+00 1.9620E+00 1.5630E-01 3.9710E-01 2.8240E+00 3.5320E+00 1.6670E+00

4.8630E-02 1.4840E-02 2.6160E-02 1.6060E-02 1.7860E-02 2.3630E-01 1.0150E+00

1.4320E+00 3.4380E-02 4.8860E-01 2.2650E+00 3.5550E+00 5.2970E-01 3.5310E-01

1.7660E-01 2.0910E+00 1.5690E+00 1.0490E+00 5.2580E-01 1.9340E-02 1.5470E-02

1.1600E-02 7.7350E-03 2.0840E+00 1.0100E+00 4.3540E+00 2.9790E+00 1.2080E+00

2.3610E-01 3.8200E-01 1.5590E-01 6.3890E-02 2.9720E-02 7.2450E-01 2.5610E+00

4.5600E-01 1.4270E+00 1.3780E+00 4.3730E-02 1.8660E-01 1.3470E-01 5.4190E-02

1.1650E-01 1.7680E+00 8.9860E-01 1.2050E-01 2.1280E-02 1.9450E-02 7.2680E-02

9.6920E-02 2.0630E+00 2.7110E-01 3.3020E-02 1.7820E+00 6.0560E-01 1.7190E-01

4.5010E-02 1.9280E+00 2.9370E-01 4.3930E-01 8.2020E-01 5.2340E-01 1.7230E-01

1.2740E+00 8.4260E-02 3.7440E-01 4.6590E-01 3.9070E-01 1.8890E-02 6.2420E-02

2.4720E-01 3.1890E-01 4.0280E+00 3.9160E-01 2.2100E-02 4.4510E+00 4.7950E-01

3.4260E+00

70000.00

4.3860E+00 1.4890E+00 6.5770E-01 2.7650E-01 1.6600E+00 6.8580E-01 2.0450E-01

5.1530E-02 5.0400E+00 4.6510E-01 1.6760E-01 6.0430E-02 6.1450E-01 3.4590E-01

2.6490E-02 2.6670E-01 7.5200E-02 5.4570E-03 6.6410E-01 3.2580E-01 9.9070E-02

1.6710E-02 4.3490E-01 2.1540E-01 1.1500E-01 3.9030E-02 5.1780E-01 2.3810E-01

8.6580E-02 1.9070E-02 2.9330E-01 1.6380E-01 8.0510E-02 4.1630E-02 3.7910E+01

9.4240E+00 2.5030E-01 7.5370E-02 2.7130E-02 4.3180E+01 7.7140E+00 7.6530E-01

4.8890E-02 2.2350E-02 1.0690E-02 2.1920E+01 1.4650E-01 3.6950E-02 1.1350E+00

1.9990E-01 6.0110E-03 1.3240E-03 1.7840E+00 2.2540E-01 2.3970E-02 8.2990E-03

7.1050E-01 1.0370E-02 5.4570E-03 1.7760E-01 1.3270E-01 5.7410E-02 1.3110E-02

9.9080E-02 7.0160E-02 2.9900E-02 8.8090E-03 2.0620E-02 6.5560E-03 2.1480E-03

7.1810E-02 3.5620E-02 1.2510E-02 3.1840E-03 2.8780E-02 1.9390E-02 8.4690E-03

2.0480E-03 7.3130E-02 4.1110E-02 1.3960E-02 2.5040E-03 5.2150E-02 2.0720E-02

4.7780E-03 5.1170E-04 3.8910E-02 1.5240E-02 5.9590E-03 1.7240E-03 3.3450E-02

1.1020E-02 3.3450E-03 1.0520E-03 5.5670E-02 2.5350E-02 1.0950E-02 3.7750E-03

7.4430E-02 2.8030E-02 7.4340E-03 1.0860E-03 4.8920E-02 1.5460E-02 3.7340E-03

6.7730E-04 5.0120E-02 2.3640E-02 8.6660E-03 1.8330E-03 3.7890E-02 1.3070E-02

6.1870E-03 3.1930E-02 2.0530E-02 7.3690E-03 1.6110E-03 2.9490E-02 1.6470E-02

1.0080E-02 7.0620E-03 1.3470E-02 1.0090E-02 3.7560E-03 8.8780E-04 1.1020E-02

8.5170E-03 4.5470E-03 1.4750E-03 1.7950E-02 9.6620E-03 7.6110E-03 4.4130E-03

1.4890E-02 1.0070E-02 5.5600E-03 2.5040E-03 1.9680E-02 1.3510E-02 6.1580E-03

1.8080E-03 4.2800E+00 1.3050E+00 4.2510E-01 7.5010E-01 6.6020E-01 4.9850E-01

1.8690E-01 1.3270E+00 3.0190E+00 3.0340E-01 9.8750E-02 4.5280E-01 1.4390E-01

1.9650E-01 1.4670E-01 8.8730E-02 4.3030E-02 2.9450E-01 2.3430E-01 2.5340E-01

1.0340E-01 2.2740E-01 2.2740E-01 9.7440E-02 9.6120E-02 2.2190E-01 2.3300E-01

1.5900E-01 8.5890E-02 1.8730E-01 1.3710E-01 1.1180E-01 2.9640E-02 8.4550E+00

1.7030E+01 1.2620E+01 2.7920E-01 5.7670E-02 3.9780E-01 3.0480E+01 1.1150E+01

1.6170E+00 5.6460E-02 1.0370E-02 6.1690E+00 1.1220E+01 9.0490E-02 3.7250E-01

5.0360E-01 1.9360E-01 4.6910E-03 3.4560E-01 1.0380E+00 2.2960E-01 1.9900E-02

2.6830E-01 3.0880E-01 4.0420E-03 1.3370E-01 4.7100E-02 6.7430E-02 5.3970E-02

7.9290E-02 4.7620E-02 2.8920E-02 7.0470E-03 1.1840E-02 8.5130E-03 3.0870E-03

3.4620E-02 2.6690E-02 2.5160E-02 1.2070E-02 2.0060E-02 1.0280E-02 1.0800E-02

8.5590E-03 3.5910E-02 2.3360E-02 3.1010E-02 1.4560E-02 2.6370E-02 1.7740E-02

1.3780E-02 4.4300E-03 1.9460E-02 1.7210E-02 8.4030E-03 4.0890E-03 1.2600E-02

1.5380E-02 8.5770E-03 2.8790E-03 2.4700E-02 2.5740E-02 1.6290E-02 9.8720E-03

3.1180E-02 3.0310E-02 2.0250E-02 7.4990E-03 1.5280E-02 2.3290E-02 1.2630E-02

3.8190E-03 2.1370E-02 2.0740E-02 1.6620E-02 8.7490E-03 2.2560E-02 1.7950E-02

5.5460E-03 2.2730E-02 9.6760E-03 1.0980E-02 5.7660E-03 1.7180E-02 1.5430E-02

1.2160E-02 5.0610E-03 1.0760E-02 3.9490E-03 5.1090E-03 2.8490E-03 8.1870E-03

3.9590E-03 4.1400E-03 4.1670E-03 1.4360E-02 8.4870E-03 6.0610E-03 2.8020E-03

1.1010E-02 6.8690E-03 5.8200E-03 2.4700E-03 1.3730E-02 6.6840E-03 7.0930E-03

5.4150E-03 3.2010E+00 8.5370E-01 2.7440E-01 5.3020E-01 4.1620E-01 3.5380E-01

3.5960E-01 1.4050E+00 1.6530E+00 1.6150E-01 2.6150E-01 1.7240E-01 1.6150E-01

7.1120E-02 8.4250E-02 5.3800E-02 8.3110E-02 2.1950E-01 1.5850E-01 2.0340E-01

1.2440E-01 1.1850E-01 1.6590E-01 7.7570E-02 8.3670E-02 1.5640E-01 1.6290E-01

1.3020E-01 1.1180E-01 1.2440E-01 6.1790E-02 5.0910E-02 1.9430E-01 1.1820E+01

5.2420E+00 1.1570E+01 2.1160E-01 4.9650E-02 4.1640E-01 1.9800E+01 1.1330E+01

2.1620E+00 5.4540E-02 1.0650E+00 7.8290E+00 4.1290E+00 8.9340E-02 3.4730E-01

2.5610E-01 1.1250E-01 4.5180E-02 4.1420E-01 6.1930E-01 1.4640E-01 8.4590E-02

2.5100E-01 1.0030E-01 6.7820E-02 5.9700E-02 4.5420E-02 5.5550E-02 5.6700E-02

3.7370E-02 2.1540E-02 5.2850E-03 6.5770E-03 7.1690E-03 3.8250E-03 1.2550E-02

2.3310E-02 1.8220E-02 1.9840E-02 7.0800E-03 9.3830E-03 8.0060E-03 1.0860E-02

1.0280E-02 2.5700E-02 1.6560E-02 2.6080E-02 1.0900E-02 1.6430E-02 1.1290E-02

8.3650E-03 9.6690E-03 1.2180E-02 1.0360E-02 4.6630E-03 4.3790E-03 1.0180E-02

9.4950E-03 5.9490E-03 1.0440E-02 1.6050E-02 1.7910E-02 1.3060E-02 1.0410E-02

2.3070E-02 1.9170E-02 1.4790E-02 3.7170E-03 1.3000E-02 1.5050E-02 9.4360E-03

7.1800E-03 1.4730E-02 1.4720E-02 1.3990E-02 1.3910E-02 1.4100E-02 6.6300E-03

1.2250E-02 1.0590E-02 7.6050E-03 6.4190E-03 1.0560E-02 1.2580E-02 8.0610E-03

6.3140E-03 5.9280E-03 4.5930E-03 3.3560E-03 2.9300E-03 4.3400E-03 3.6940E-03

3.4530E-03 3.8530E-03 1.0970E-02 6.9160E-03 4.2410E-03 1.8550E-03 7.1520E-03

6.1420E-03 3.6760E-03 2.6550E-03 7.1230E-03 6.6120E-03 5.3990E-03 5.5640E-03

1.9210E+00 8.2970E-02 2.8180E-01 3.4730E-01 3.3750E-01 1.3240E-01 3.7900E-01

1.1480E+00 7.2370E-01 1.1830E-01 1.9620E-01 8.2500E-02 2.8160E-02 6.4990E-02

4.5860E-02 1.2030E-02 1.0790E-01 1.4010E-01 1.8290E-01 5.6140E-02 8.1420E-02

1.0910E-01 7.8710E-02 2.3150E-02 8.1620E-02 1.2210E-01 1.2960E-01 6.7360E-02

7.4220E-02 5.4550E-02 3.7620E-02 4.4800E-02 2.6320E-01 1.1090E+01 5.9010E-01

7.4670E+00 2.6060E-02 3.6960E-02 3.0910E-01 1.1350E+01 9.2370E+00 1.9650E+00

4.4340E-02 2.5680E+00 6.0210E+00 1.3030E-02 1.3470E-01 2.2230E-01 1.6520E-01

8.5980E-03 6.8130E-02 3.6970E-01 3.6770E-01 2.1700E-02 1.2080E-01 1.4800E-01

2.3950E-02 5.4370E-02 4.3070E-02 3.0950E-02 3.6590E-02 2.7930E-02 1.2510E-02

3.5240E-03 3.4390E-03 4.7600E-03 3.5200E-03 3.3700E-03 1.2960E-02 1.5600E-02

1.7260E-02 1.8330E-03 6.9880E-03 7.0530E-03 7.4990E-03 1.3260E-03 1.3430E-02

1.5910E-02 2.1610E-02 3.4350E-03 1.0590E-02 1.0290E-02 6.8610E-03 4.3660E-03

7.3620E-03 8.1580E-03 4.8000E-03 1.4690E-03 4.3530E-03 6.9800E-03 6.7470E-03

3.8560E-03 8.7090E-03 1.2770E-02 1.2960E-02 2.5550E-03 1.1360E-02 1.5480E-02

1.5040E-02 7.4220E-04 4.4700E-03 1.0150E-02 1.1960E-02 1.5910E-03 7.4630E-03

1.1210E-02 1.3400E-02 7.9990E-03 8.4050E-03 6.3230E-03 5.1880E-03 9.3140E-03

6.4820E-03 3.6830E-03 6.8140E-03 6.7070E-03 6.1830E-03 5.5360E-03 2.6430E-03

4.4220E-03 2.7690E-03 1.4000E-03 1.6360E-03 3.2480E-03 3.0080E-03 2.3370E-03

7.1800E-03 4.9110E-03 2.5790E-03 1.1840E-03 4.3990E-03 4.3110E-03 2.8820E-03

1.6630E-03 2.7960E-03 5.4930E-03 4.7040E-03 3.4730E-03 2.1320E-02 9.0050E-02

2.2030E-01 1.9280E-01 5.2110E-02 9.4180E-02 3.0310E-01 7.4050E-01 3.8200E-02

1.3200E-01 2.7330E-02 8.4400E-03 3.5330E-02 2.5910E-02 6.7660E-04 1.9080E-02

1.0400E-01 9.7610E-02 1.7060E-02 5.4770E-02 3.3900E-02 5.7100E-02 3.2920E-03

3.2270E-02 6.2510E-02 7.9490E-02 3.3150E-02 2.6710E-02 4.2020E-02 1.5000E-02

1.2310E-02 5.7670E-02 2.1050E-01 7.3040E+00 2.2000E+00 1.2770E-02 1.1020E-02

2.0160E-02 1.6980E-01 5.0680E+00 6.2850E+00 1.4770E-02 4.6290E-02 4.2430E+00

1.3280E-03 2.2100E-02 1.2660E-01 1.1740E-01 4.1070E-03 4.0030E-03 6.8630E-02

3.3000E-01 4.6250E-03 3.5350E-02 1.0530E-01 4.7370E-03 3.0040E-02 3.1490E-02

9.1330E-03 1.8980E-02 1.4960E-02 5.6430E-03 1.7620E-03 1.4870E-03 2.2930E-03

2.0920E-03 7.3060E-04 4.1000E-03 1.0620E-02 9.1900E-03 2.0410E-04 2.6370E-03

5.8010E-03 3.6900E-03 3.6040E-06 2.2460E-03 1.3240E-02 1.0780E-02 7.2560E-04

4.5940E-03 6.9840E-03 3.3290E-03 1.5800E-03 3.6470E-03 3.9420E-03 3.1430E-03

4.8650E-04 1.3740E-03 3.4980E-03 4.5720E-03 1.0750E-03 3.9370E-03 5.9240E-03

8.2140E-03 3.4630E-04 3.6770E-03 9.0550E-03 9.4860E-03 1.2480E-04 1.0140E-03

4.0390E-03 8.3590E-03 1.6390E-04 2.3290E-03 6.3080E-03 7.9380E-03 3.7990E-03

3.6650E-03 3.9050E-03 1.6200E-03 5.1920E-03 4.5490E-03 1.0620E-03 3.5670E-03

2.2520E-03 3.7360E-03 3.0620E-03 8.6870E-04 2.6150E-03 1.8860E-03 2.6300E-04

3.7620E-04 1.8880E-03 1.8980E-03 9.5200E-04 3.5900E-03 2.5530E-03 1.1940E-03

5.8800E-04 2.0470E-03 2.0480E-03 1.9140E-03 6.0650E-04 7.6300E-04 2.9800E-03

3.1100E-03 1.3790E-03 1.7380E+01 5.5970E+00 2.6240E+00 1.9890E+00 6.9990E-01

1.5790E-01 3.5770E-02 1.2560E+00 4.9200E-01 1.7180E-01 5.5890E-01 1.1180E-01

3.1630E-02 1.6730E+00 5.6090E-01 1.5660E-01 4.2900E-02 1.6370E+00 4.8530E-01

1.4860E-01 4.7640E-02 1.1690E+00 4.4980E-01 1.4520E-01 4.8060E-02 8.2310E-01

3.6150E-01 1.5710E-01 6.1270E-02 6.1020E-01 2.6270E-01 9.6630E-02 2.9010E-02

5.4650E-03 5.7880E-01 2.9180E-01 1.2440E-01 4.2740E-02 1.0940E-02 1.9250E-03

2.0990E-01 9.3680E-02 1.8220E-02 1.2640E+01 2.9570E-01 8.7400E-02 1.7890E-02

5.9930E+00 7.1640E-01 1.0100E-01 2.6220E-02 3.5450E-01 1.3830E-01 1.9120E-02

7.2020E-01 3.1930E-01 1.5410E-01 8.4960E-02 5.1510E-02 2.3690E-02 1.0260E-02

7.8770E-02 1.1470E-01 6.8470E-02 8.9670E-03 4.6230E+00 4.7500E-01 3.7550E-02

4.2450E-03 1.9840E-01 9.2480E-02 2.3750E-02 2.8120E-03 2.2810E-01 1.6060E-01

2.8830E-02 2.7680E-03 2.1650E+00 4.5790E-02 8.4840E-03 1.3380E-03 8.7470E-01

2.9390E-02 5.8800E-03 1.8220E-03 1.0850E+00 1.4320E-01 1.6260E-02 2.7600E-03

1.5680E+00 1.7460E-01 2.4280E-02 3.8200E-03 3.8800E+00 5.6640E-01 2.0330E-02

3.7160E-03 1.0520E+00 1.2350E-01 2.6430E-02 3.4850E-03 2.7600E-01 1.0060E-01

2.5710E-02 3.0930E-03 3.0250E-02 1.2930E-02 2.3270E-03 4.3360E-01 3.4210E-02

1.1380E-02 2.3670E-03 6.1830E-02 2.0780E-02 6.1740E-03 1.2810E-03 1.6930E-01

1.6080E-02 4.1080E-03 8.3080E-04 8.1540E-02 2.3530E-02 7.0110E-03 1.1410E-03

2.2980E-02 8.6550E-03 5.6780E-03 7.5680E-04 1.1220E-01 8.5540E-03 2.3870E-03

3.6320E-04 1.8880E-01 3.7820E-02 5.5260E-03 1.0420E-03 2.0290E+01 5.3350E+00

8.5820E-01 7.8810E-01 5.4530E-01 1.3270E-01 7.5380E-01 5.5090E-01 2.2460E-01

2.6170E-01 2.4420E-01 5.7970E-02 3.9470E-01 8.8220E-01 5.2830E-01 1.6570E-01

4.8210E-01 8.6100E-01 3.9350E-01 1.3610E-01 3.7130E-01 5.8580E-01 3.7940E-01

1.4210E-01 4.1770E-01 3.9670E-01 2.2290E-01 9.0190E-02 2.2700E-01 2.7920E-01

1.8100E-01 9.2720E-02 3.7400E-02 2.1370E-01 2.1240E-01 1.9510E-01 1.3170E-01

6.4390E-02 2.0870E-02 1.1930E-01 7.3950E-02 6.3990E-02 1.7170E+00 8.4370E+00

1.9890E-01 7.0910E-02 7.2350E-01 3.7650E+00 7.7020E-01 1.0030E-01 2.1330E-01

1.1830E-01 8.1970E-02 3.1910E-01 3.6560E-01 2.3580E-01 1.0190E-01 3.3570E-02

2.4610E-02 1.0290E-02 6.3000E-02 8.5670E-02 2.7230E-02 4.1060E-02 9.0640E-02

3.3220E+00 5.8560E-01 4.3650E-02 6.4550E-02 1.4590E-01 8.7020E-02 2.7950E-02

9.0080E-02 2.8390E-01 1.7380E-01 3.4710E-02 2.8590E-01 1.4430E+00 3.3100E-02

7.8740E-03 1.6460E-01 5.7540E-01 1.9720E-02 4.9390E-03 1.4270E-01 6.8170E-01

1.5420E-01 1.7840E-02 7.2880E-02 1.0020E+00 1.9420E-01 2.7670E-02 4.1220E-01

3.5150E+00 5.0030E-01 2.2070E-02 7.1470E-02 7.4140E-01 1.3940E-01 3.0460E-02

7.2580E-02 1.2820E-01 9.2380E-02 3.0290E-02 1.8670E-02 1.0790E-02 7.1690E-03

7.9040E-02 2.7360E-01 1.8690E-02 9.9080E-03 2.0750E-02 3.1030E-02 1.5170E-02

6.5140E-03 3.3920E-02 1.0380E-01 1.0780E-02 3.4760E-03 1.9150E-02 4.7470E-02

1.9850E-02 7.9080E-03 1.8390E-02 6.7760E-03 2.6660E-03 3.2760E-03 2.1120E-02

6.9610E-02 6.1240E-03 2.0010E-03 3.2670E-02 1.1280E-01 3.7460E-02 5.9850E-03

1.6750E+01 2.9010E-01 6.7080E-01 4.3980E-01 3.5000E-01 4.4470E-01 4.4130E-01

2.5550E-01 1.1590E-01 1.9390E-01 1.1280E-01 7.4800E-02 3.6610E-01 6.0020E-01

4.4130E-01 1.4730E-01 3.9110E-01 5.6810E-01 3.0040E-01 1.0380E-01 3.1680E-01

3.8980E-01 3.0950E-01 2.1400E-01 2.7860E-01 2.3490E-01 1.2130E-01 7.3500E-02

1.5630E-01 1.8420E-01 1.3770E-01 6.6650E-02 4.2410E-02 1.5400E-01 1.4250E-01

1.2500E-01 1.0390E-01 6.1860E-02 5.4280E-02 7.1410E-02 6.7170E-02 2.0570E-01

1.9850E+00 5.5040E+00 1.2590E-01 9.9630E-02 7.5420E-01 2.5270E+00 5.8430E-01

1.0740E-01 1.1900E-01 8.1210E-02 1.5410E-01 2.3580E-01 2.1860E-01 1.5810E-01

2.1700E-02 1.9230E-02 1.0310E-02 4.7260E-02 4.8160E-02 3.8040E-02 2.8870E-02

1.2700E-02 9.8430E-02 3.5310E+00 4.5170E-01 9.6500E-03 5.9820E-02 1.0330E-01

7.4210E-02 9.6730E-04 1.0330E-01 1.8910E-01 1.4340E-01 2.7840E-02 3.3800E-01

9.3910E-01 2.1880E-02 1.5810E-02 1.4220E-01 3.6990E-01 1.2890E-02 1.6020E-02

1.5400E-01 4.6010E-01 1.1790E-01 1.3220E-02 6.4620E-02 7.4030E-01 1.5330E-01

1.9400E-02 4.9700E-01 2.3740E+00 3.7530E-01 1.5920E-02 5.7320E-02 5.4960E-01

1.1320E-01 1.0460E-02 6.5630E-02 8.5640E-02 7.9460E-02 1.0080E-02 1.0420E-02

6.7660E-03 1.9450E-02 7.4020E-02 1.8030E-01 1.2770E-02 6.1660E-03 1.5160E-02

2.1120E-02 1.2110E-02 7.5580E-03 3.1600E-02 6.6700E-02 6.8060E-03 4.7970E-03

1.5880E-02 3.3970E-02 1.6810E-02 1.3790E-02 3.7140E-03 2.9470E-03 2.0840E-03

4.0320E-03 2.1160E-02 4.4700E-02 4.0180E-03 5.5090E-03 3.7410E-02 7.5860E-02

2.8770E-02 8.2940E-02 2.9410E-01 4.9890E-01 2.9620E-01 2.3680E-01 3.1260E-01

2.2150E-01 4.9710E-02 1.0610E-01 1.2580E-01 2.0710E-02 6.9710E-02 2.8830E-01

6.1110E-01 4.7540E-02 1.3580E-01 2.9990E-01 4.5630E-01 3.2350E-02 9.4010E-02

2.4890E-01 3.7020E-01 1.0760E-01 1.5620E-01 1.7890E-01 1.2390E-01 1.4880E-02

7.2090E-02 1.1590E-01 1.2550E-01 8.2060E-02 4.6270E-03 3.9380E-02 9.9780E-02

1.2040E-01 1.0010E-01 5.4970E-02 1.6940E-02 6.1080E-02 5.0470E-02 4.2020E-02

2.3060E-01 1.5110E+00 3.4260E+00 2.5960E-02 1.0050E-01 5.8410E-01 1.9910E+00

4.2240E-02 1.0680E-01 5.8200E-02 8.4950E-02 1.0190E-01 1.5810E-01 1.6620E-01

1.3040E-02 1.2240E-02 8.5630E-03 3.1500E-02 1.9910E-02 4.6380E-02 1.1050E-02

2.2590E-03 1.3600E-02 7.6860E-02 2.6800E+00 2.4320E-04 1.1210E-02 4.8300E-02

1.0220E-01 9.6350E-05 1.0500E-03 7.8600E-02 2.0740E-01 3.7500E-03 3.4020E-02

2.4130E-01 5.8800E-01 3.2680E-03 1.8320E-02 1.2000E-01 2.6250E-01 2.7040E-03

1.7740E-02 1.1780E-01 3.6110E-01 1.6300E-03 1.4490E-02 5.1880E-02 5.7370E-01

3.5050E-03 2.1670E-02 5.1490E-01 1.8530E+00 1.4330E-03 1.8050E-02 4.7440E-02

4.2680E-01 9.9950E-05 1.2250E-02 5.3980E-02 9.3160E-02 4.7070E-03 8.7170E-03

4.8550E-03 5.5960E-03 1.9270E-02 5.7600E-02 1.0960E-01 1.2800E-03 6.5120E-03

1.2100E-02 1.7580E-02 1.9750E-03 7.7000E-03 2.4380E-02 4.1370E-02 5.2340E-04

5.3120E-03 1.3230E-02 2.9230E-02 9.1930E-03 1.7110E-03 3.1790E-03 9.4970E-04

9.5480E-04 4.4390E-03 1.5660E-02 2.7820E-02 9.4840E-04 6.0320E-03 2.8770E-02

6.0140E-02 1.3300E+01 3.9360E+00 1.6050E+00 1.0830E+00 5.1600E-01 6.6990E-02

2.2780E-01 9.0950E-02 1.9190E-02 3.4810E-01 1.7980E-01 7.9200E-02 2.1830E-02

3.2050E-01 1.5960E-01 7.8520E-02 3.4500E-02 3.1840E-01 1.5470E-01 6.7220E-02

2.4940E-02 2.4230E-01 1.2690E-01 6.9030E-02 3.1280E-02 1.7740E+00 6.5420E-01

1.7640E-01 3.5790E-02 7.2170E-03 2.4110E+00 7.8090E-01 2.1470E-01 5.1180E-02

1.3160E-02 4.3570E-03 1.1990E+00 1.5770E-01 1.5020E-02 3.0780E+01 4.8880E+00

7.1950E-02 1.2490E-02 4.2630E+01 5.3590E+00 3.6990E-01 5.7380E-02 2.0070E+01

1.0180E-01 3.2340E-02 7.7370E-02 4.8480E-02 2.5540E-02 1.0520E-02 4.5590E-02

2.8590E-02 1.2740E-02 4.2770E-03 2.0790E-02 4.1970E-03 1.8930E-03 8.2660E-02

4.1020E-02 1.7340E-02 4.4450E-03 1.1710E-02 6.6620E-03 3.3080E-03 1.2960E-03

2.9430E-02 1.6080E-02 7.3060E-03 2.0620E-03 2.4840E-01 4.4900E-02 4.5820E-03

9.4690E-04 2.9950E-01 5.4510E-02 8.6950E-03 2.8450E-03 2.8620E-02 1.0420E-02

4.5520E-03 1.3560E-03 4.6790E-02 2.4910E-02 1.1230E-02 3.9290E-03 2.5620E-01

4.7810E-02 1.0730E-02 2.5640E-03 2.2540E-02 1.0420E-02 4.1330E-03 1.0580E-03

2.6140E-02 1.0920E-02 4.5260E-03 1.6300E-03 1.4580E-01 1.5470E-02 8.0330E-03

2.9330E-02 1.5430E-02 6.4870E-03 2.0220E-03 1.2850E-02 7.7020E-03 4.6730E-03

2.7920E-03 1.8580E-02 1.2950E-02 6.3710E-03 2.0950E-03 4.6590E-03 3.2370E-03

1.9820E-03 9.1380E-04 1.1020E-02 2.8180E-02 2.3980E-03 1.2490E-03 9.2570E-03

3.7810E-03 1.6400E-03 6.9260E-04 2.8850E-02 5.8660E-03 1.3300E-03 4.2850E-04

1.3070E+01 2.4050E+00 6.4510E-01 2.7480E-01 3.2730E-01 1.2200E-01 7.9790E-02

5.2000E-02 1.2060E-01 1.4310E-01 1.2240E-01 8.7250E-02 1.3420E-01 1.4810E-01

1.0080E-01 6.1790E-02 1.0910E-01 1.4510E-01 1.0950E-01 6.6460E-02 1.2030E-01

1.3420E-01 7.4350E-02 2.9950E-02 3.4760E-01 8.2640E-01 5.8410E-01 2.4140E-01

4.8090E-02 4.8830E-02 1.2490E+00 8.4710E-01 3.5060E-01 9.6080E-02 1.5940E-02

2.8130E-01 6.2610E-01 1.2150E-01 4.8460E+00 1.5410E+01 6.3880E+00 7.1810E-02

3.6210E-01 2.9330E+01 6.2020E+00 4.4690E-01 4.6120E+00 1.0480E+01 5.3780E-02

4.3550E-02 2.8810E-02 2.6540E-02 2.1040E-02 3.2980E-02 2.0360E-02 1.1830E-02

3.3160E-03 6.9110E-03 1.0110E-02 1.7740E-03 3.0140E-02 3.3660E-02 2.6430E-02

1.9150E-02 4.8760E-03 4.7920E-03 4.1660E-03 3.4530E-03 1.0230E-02 1.1820E-02

1.0620E-02 8.3180E-03 4.9740E-02 1.2690E-01 5.3470E-02 4.1750E-03 5.9280E-02

1.4640E-01 5.1500E-02 6.0960E-03 8.0750E-03 1.3540E-02 7.6490E-03 4.5700E-03

1.8780E-02 1.9780E-02 1.5620E-02 1.1520E-02 2.0150E-02 1.6870E-01 4.6660E-02

1.1500E-02 8.0660E-03 9.5450E-03 7.2090E-03 5.0290E-03 6.4890E-03 1.1650E-02

7.8080E-03 4.7920E-03 4.4530E-02 7.6410E-02 5.5260E-03 1.5410E-02 1.1100E-02

8.4360E-03 5.2400E-03 6.7550E-03 6.6650E-03 4.7830E-03 2.8260E-03 1.2950E-02

6.5260E-03 6.2170E-03 4.3340E-03 2.7430E-03 1.8660E-03 1.7000E-03 1.6730E-03

8.2640E-03 8.3750E-03 1.4780E-02 8.6340E-04 3.7810E-03 3.8970E-03 2.4030E-03

8.5410E-04 1.8010E-03 1.5230E-02 5.9810E-03 1.2470E-03 8.4400E+00 2.7420E-01

3.4100E-01 2.1820E-01 5.3950E-02 6.9780E-02 4.5050E-02 2.7440E-02 7.8120E-02

1.0130E-01 1.0610E-01 5.5680E-02 8.1120E-02 9.4290E-02 6.7090E-02 3.2980E-02

7.2720E-02 9.5870E-02 8.6330E-02 6.6290E-02 7.4360E-02 6.6810E-02 3.3520E-02

2.8940E-02 3.4160E-01 4.2540E-01 3.6930E-01 2.1300E-01 1.5990E-02 3.0480E-02

5.7860E-01 6.3040E-01 3.6300E-01 1.1860E-01 3.9450E-02 3.0830E-01 3.3680E-01

7.4560E-02 6.3710E+00 7.1840E+00 4.5310E+00 8.0870E-02 2.9460E-01 1.9070E+01

5.0630E+00 5.7070E-01 5.3510E+00 4.1680E+00 1.8200E-02 2.3920E-02 2.0610E-02

1.7500E-02 2.0950E-02 1.5190E-02 7.9740E-03 2.1380E-03 3.2640E-03 5.7220E-03

4.0710E-03 7.7280E-03 1.8140E-02 2.4740E-02 2.1970E-02 1.4430E-03 2.8280E-03

3.5930E-03 3.5560E-03 2.2960E-03 6.5060E-03 8.8870E-03 9.7060E-03 4.4650E-03

5.3370E-02 5.8070E-02 3.6700E-02 8.5600E-03 5.1280E-02 7.0690E-02 4.3800E-02

2.9790E-03 5.4140E-03 9.0630E-03 5.6470E-03 5.8130E-03 1.0820E-02 1.4680E-02

1.2360E-02 5.6750E-03 1.2750E-02 1.0650E-01 3.5270E-02 1.9110E-03 4.7240E-03

7.6080E-03 5.9400E-03 1.9030E-03 4.0870E-03 8.1070E-03 6.5890E-03 1.4740E-02

4.0630E-02 2.9140E-02 6.4840E-03 8.4320E-03 7.3860E-03 4.1810E-03 3.6870E-03

3.8890E-03 3.6860E-03 2.6740E-03 6.3710E-03 6.2160E-03 4.8010E-03 2.6280E-03

1.1790E-03 1.3770E-03 1.3970E-03 1.2340E-03 5.5100E-03 2.8420E-03 8.1090E-03

5.4810E-03 1.6400E-03 2.4030E-03 2.1180E-03 1.1600E-03 7.3190E-04 1.0310E-03

1.0370E-02 3.6360E-03 7.4110E-02 2.5990E-01 8.2450E-02 1.7620E-02 4.2430E-02

2.4400E-02 1.5370E-03 2.8370E-02 5.5420E-02 7.0840E-02 1.8110E-02 3.6490E-02

4.5650E-02 4.8660E-02 7.1570E-03 2.6690E-02 4.7410E-02 6.2050E-02 3.1260E-02

2.9950E-02 3.3520E-02 2.6150E-02 7.5020E-03 2.2050E-02 1.9880E-01 2.7260E-01

1.8730E-01 5.7500E-03 8.9040E-03 1.5530E-02 2.0920E-01 3.5510E-01 2.7300E-01

4.4450E-03 5.1210E-02 2.8540E-01 1.1740E-02 7.0460E-02 4.5280E+00 4.4510E+00

3.6970E-02 3.8540E-02 2.0040E-01 1.1950E+01 2.3890E-02 8.7470E-01 4.1300E+00

5.3350E-03 1.3190E-02 1.3150E-02 8.1410E-03 9.8420E-03 8.3070E-03 3.8050E-03

1.0690E-03 1.4640E-03 1.6390E-03 3.2540E-03 4.3010E-04 8.0750E-03 1.2500E-02

1.5020E-02 2.2650E-04 1.3460E-03 1.9450E-03 2.2220E-03 4.6920E-06 2.5050E-03

4.8380E-03 6.2930E-03 9.4520E-04 4.1730E-03 3.6680E-02 3.5910E-02 2.8290E-03

6.0510E-03 4.3780E-02 4.0960E-02 5.4400E-04 2.6400E-03 3.2930E-03 4.9640E-03

8.1550E-04 5.0230E-03 6.9810E-03 8.3140E-03 8.7940E-04 5.3890E-03 8.1820E-03

6.8060E-02 1.2090E-04 1.9170E-03 3.2500E-03 4.9500E-03 2.5950E-04 1.6310E-03

2.8250E-03 5.7740E-03 5.9590E-03 8.6130E-03 2.8080E-02 2.0210E-03 5.2400E-03

4.1800E-03 2.2840E-03 1.6920E-03 1.7520E-03 1.8000E-03 1.7130E-03 2.0950E-03

4.3340E-03 2.6280E-03 9.2090E-04 3.1900E-04 8.7270E-04 7.9700E-04 6.8760E-04

2.7550E-03 9.2960E-04 2.1640E-03 4.7890E-03 6.9260E-04 8.5400E-04 1.1590E-03

7.3320E-04 2.0490E-04 5.2320E-04 5.7830E-04 5.6000E-03 8.8940E-01 3.7540E-01

3.3930E+00 2.1760E-01 6.5760E-02 1.5780E-01 8.6010E-02 4.4490E-02 2.2150E-02

5.8050E-01 2.6790E-01 1.1700E-01 5.0750E-02 1.4340E-01 9.1940E-02 5.3640E-02

2.8210E-02 5.0500E-01 3.1570E-01 1.5030E-01 5.1440E-02 2.2010E-01 1.4900E-01

8.5870E-02 4.2850E-02 1.6220E-02 2.3570E-01 1.9240E-01 1.3010E-01 7.3700E-02

3.4190E-02 1.1830E-02 2.1650E-01 1.2860E-01 3.8480E-02 3.3770E+00 8.9400E-01

1.8350E-01 4.4860E-02 4.7690E-01 3.7570E-01 2.0440E-01 7.3010E-02 7.5140E+00

3.2570E+00 4.5150E-02 3.0840E-01 1.3330E-01 5.2430E-02 2.0960E-02 2.7020E-01

1.5190E-01 8.4630E-02 8.2750E-01 8.5190E-01 5.5440E-01 1.7730E-02 1.0090E-01

4.6680E-02 1.8670E-02 8.1470E-03 1.3420E-02 7.6840E-03 3.8450E-03 1.5670E-03

2.4570E-02 1.2280E-02 5.3260E-03 1.7360E-03 1.4110E+00 4.4400E-01 8.4690E-02

1.0460E-02 1.7320E+00 4.0960E-01 6.0510E-02 5.6380E-03 6.6180E-02 2.8080E-02

1.0220E-02 3.1620E-03 1.1560E-01 5.4230E-02 2.2650E-02 8.0180E-03 3.8620E-02

2.3720E-02 1.4190E-02 6.2780E-03 1.0230E-02 5.7430E-03 2.9870E-03 1.5280E-03

6.4630E-03 4.0370E-03 2.0740E-03 8.3600E-04 1.6010E+00 6.9930E-01 1.5760E-02

9.0310E-01 2.8790E-01 4.3740E-02 9.4340E-03 1.2280E-01 9.9660E-02 5.8470E-02

2.5260E-02 1.0980E+00 2.8810E-01 6.9960E-02 1.7750E-02 1.7880E-01 7.9810E-02

3.1330E-02 9.0820E-03 7.6850E-01 2.3970E-01 1.1830E-01 1.5530E-02 2.9260E-01

1.0110E-01 4.4010E-02 2.1120E-02 6.2870E-02 2.8170E-02 1.0780E-02 3.1490E-03

3.7360E-01 2.1750E-01 2.1130E+00 1.2160E-01 2.9670E-02 6.9800E-02 6.4360E-02

4.3270E-02 1.0910E-01 2.6420E-01 2.0500E-01 1.0570E-01 5.4930E-02 5.5380E-02

5.3960E-02 4.7710E-02 2.5060E-01 1.6220E-01 1.6460E-01 1.1160E-01 9.4310E-02

8.0170E-02 7.5340E-02 6.1370E-02 3.4510E-02 1.4980E-01 5.4500E-02 5.4220E-02

7.3300E-02 7.3920E-02 4.5930E-02 1.0860E-01 4.7160E-02 9.9010E-02 1.6200E-01

1.7390E+00 9.1540E-01 1.8910E-01 3.1040E-01 7.2590E-02 1.5160E-01 2.1790E-01

3.2470E+00 9.8220E-01 2.9710E+00 4.6430E-02 1.3560E-01 1.0670E-01 5.4260E-02

1.5150E-01 1.4950E-01 3.7520E-02 4.9940E-01 4.0140E-01 1.4770E-01 4.3530E-01

1.1520E-02 4.4150E-02 3.8580E-02 2.2150E-02 2.9170E-03 4.9460E-03 5.0240E-03

4.5160E-03 2.3740E-03 9.9250E-03 1.0090E-02 6.7990E-03 3.6740E-02 7.0600E-01

3.9670E-01 9.1610E-02 2.4000E-02 9.0320E-01 4.4250E-01 1.0930E-01 8.9230E-03

2.7900E-02 2.2390E-02 1.1830E-02 1.6210E-02 4.8050E-02 4.3170E-02 2.6670E-02

1.4830E-02 1.3980E-02 1.3580E-02 1.0250E-02 2.3320E-03 4.8550E-03 4.1590E-03

2.4470E-03 1.4750E-03 2.7460E-03 2.5060E-03 2.2760E-03 6.9560E-01 2.1950E-01

6.2760E-01 3.5120E-02 4.3540E-01 2.4630E-01 4.7800E-02 8.0710E-02 2.7930E-02

4.1130E-02 5.1710E-02 4.3030E-02 5.8070E-01 2.9860E-01 5.3400E-02 1.6410E-02

7.5380E-02 6.6670E-02 3.8570E-02 5.1180E-01 1.1780E-01 4.1710E-02 9.1770E-02

4.7380E-02 1.6150E-01 8.3410E-02 1.7460E-02 1.1400E-02 2.4860E-02 2.1150E-02

1.2890E-02 6.5660E-02 1.2160E-01 1.0350E+00 8.5280E-03 1.6210E-02 3.2100E-02

4.5590E-02 3.2530E-02 5.6160E-02 1.1620E-01 1.3420E-01 1.2970E-02 2.9280E-02

3.3730E-02 3.0060E-02 5.5730E-02 1.4350E-01 1.0080E-01 4.3010E-02 2.0170E-02

5.0520E-02 4.9290E-02 3.5640E-02 1.8070E-02 1.7320E-03 7.5900E-02 7.4070E-02

4.6740E-02 2.0990E-02 6.2680E-03 1.5860E-02 7.9200E-02 3.2810E-02 5.5120E-02

7.9960E-02 7.0280E-01 6.6600E-01 1.9730E-02 1.9610E-01 1.2800E-01 3.1810E-02

4.3450E-02 2.9690E+00 5.9740E-01 1.0610E-02 2.5350E-02 6.1950E-02 7.3660E-02

8.4440E-02 3.7510E-02 4.4420E-02 2.7450E-01 1.7890E-02 3.9460E-01 8.7630E-02

3.5770E-03 6.3640E-03 1.9550E-02 2.8730E-02 3.1670E-04 1.6970E-03 3.0770E-03

3.6470E-03 8.8560E-05 1.3960E-03 4.8010E-03 8.2320E-03 9.4110E-03 2.2200E-02

3.5820E-01 4.1420E-01 6.5500E-03 1.3800E-02 4.9620E-01 3.5650E-01 1.3150E-03

5.3620E-03 1.3430E-02 1.5550E-02 2.1410E-03 9.4670E-03 2.3370E-02 3.2570E-02

4.0300E-03 7.6090E-03 8.3620E-03 5.7990E-03 7.2040E-04 1.1000E-03 2.0560E-03

2.5210E-03 9.8550E-05 9.4010E-04 1.5940E-03 2.2250E-03 1.5010E-02 6.2640E-01

1.2920E-01 1.1600E-02 1.7230E-02 1.7530E-01 2.4700E-01 1.2730E-02 4.7270E-02

3.1690E-02 9.1640E-03 2.3750E-02 1.4300E-02 2.2570E-01 2.2060E-01 1.4840E-03

8.0020E-03 3.5120E-02 5.1250E-02 2.5550E-01 1.5370E-02 9.1710E-02 1.8930E-02

2.9110E-02 1.3320E-02 5.7850E-02 5.4180E-02 9.0360E-04 7.0050E-03 1.3130E-02

1.4050E-02 2.8200E+00 4.9860E-01 3.8420E-01 2.0580E-01 1.0950E-01 5.5850E-02

5.0600E-01 3.4720E-01 2.4270E-01 1.6820E-01 2.8880E-01 1.8170E-01 1.0500E-01

5.3050E-02 3.8050E-01 2.6470E-01 1.6240E-01 6.6900E-02 7.5370E-02 4.6520E-02

2.5410E-02 1.2920E-02 5.1490E-03 8.4560E-02 4.8750E-02 2.6340E-02 1.3150E-02

5.8910E-03 2.1180E-03 3.5610E-02 2.4530E-02 1.0920E-02 2.8380E-01 1.2170E-01

4.6640E-02 1.6200E-02 1.1040E-01 6.9910E-02 3.7710E-02 1.6700E-02 5.2080E-01

2.5940E-01 1.8570E-02 1.6740E-01 8.0770E-02 3.8420E-02 1.8020E-02 1.9050E-01

1.8130E-01 1.1770E-01 7.9630E+00 1.2800E+01 5.5230E+00 1.4890E-01 3.3900E-02

1.8950E-02 1.1170E-02 6.8440E-03 1.2160E-02 6.7910E-03 3.3360E-03 1.3030E-03

2.5930E-02 1.3200E-02 5.8590E-03 1.8970E-03 2.3440E+01 5.5890E+00 7.9360E-01

3.4020E-02 7.7610E-02 3.1000E-02 1.9590E-02 1.3710E-02 2.9100E-02 1.8030E-02

1.1360E-02 6.2610E-03 2.5300E-02 1.8330E-02 1.4310E-02 1.4220E-02 2.7760E-02

1.7500E-02 8.6300E-03 3.6760E-03 9.3370E-03 5.8270E-03 4.0800E-03 1.9590E-03

1.2770E-02 8.5750E-03 4.9600E-03 2.2600E-03 4.8230E-01 1.7190E-01 5.8100E-03

3.1460E-02 1.7460E-02 1.0130E-02 5.1450E-03 2.8580E-02 2.0420E-02 1.1220E-02

6.6660E-03 1.8830E-01 4.0980E-02 1.2840E-02 5.4690E-03 2.1400E-02 1.0320E-02

4.6510E-03 1.8910E-03 9.7330E-02 9.2200E-02 4.8370E-02 4.0140E-03 3.4250E-02

1.2290E-02 6.7140E-03 3.3270E-03 9.0070E-03 5.1680E-03 2.4790E-03 8.8510E-04

2.0120E+00 7.9630E-02 1.6410E-01 1.5600E-01 1.0700E-01 2.4910E-01 2.8540E-01

2.0090E-01 1.0610E-01 1.0600E-01 1.0950E-01 1.0770E-01 9.6110E-02 2.2050E-01

1.7240E-01 1.3040E-01 7.1940E-02 2.7010E-02 2.9270E-02 2.6040E-02 1.9180E-02

9.9950E-03 1.6500E-02 2.9270E-02 2.9010E-02 2.3000E-02 1.5160E-02 7.3650E-03

2.1430E-02 1.0280E-02 1.5550E-02 6.3170E-02 1.3640E-01 9.2750E-02 3.4310E-02

4.8360E-02 3.7410E-02 3.7730E-02 3.3660E-02 2.2120E-01 6.5100E-02 2.1720E-01

3.8640E-02 7.3760E-02 5.9550E-02 3.2980E-02 1.8080E-01 1.1420E-01 2.9660E-02

5.2960E+00 5.4940E+00 2.2390E+00 6.7870E+00 9.1010E-03 1.7260E-02 1.3640E-02

7.9930E-03 2.6730E-03 4.4910E-03 4.6490E-03 3.9080E-03 2.9680E-03 1.0300E-02

1.0430E-02 7.6030E-03 3.0950E-01 1.6360E+01 6.3280E+00 1.1700E+00 2.0850E-02

3.7860E-02 2.2290E-02 6.0430E-03 1.1740E-02 1.4880E-02 1.1150E-02 6.4600E-03

1.2860E-02 1.5430E-02 1.1520E-02 6.3330E-03 1.1070E-02 9.0350E-03 9.3550E-03

7.9990E-03 3.4130E-03 4.1950E-03 3.5630E-03 2.5890E-03 4.9670E-03 4.0970E-03

4.6680E-03 5.3060E-03 1.5400E-01 4.7770E-02 1.3190E-01 1.4370E-02 1.7540E-02

9.9430E-03 4.4550E-03 1.3340E-02 1.1710E-02 9.5820E-03 7.9630E-03 1.0670E-02

6.8470E-02 4.2600E-02 1.3260E-02 3.3520E-03 9.2130E-03 8.1140E-03 4.9060E-03

4.5440E-02 4.8060E-02 1.8800E-02 3.3610E-02 7.8450E-03 2.0370E-02 1.1170E-02

3.0770E-03 3.1680E-03 2.8550E-03 2.9040E-03 2.4910E-03 2.1270E-02 4.1110E-02

7.7670E-02 1.0940E-01 1.2800E-01 9.6080E-02 9.6710E-02 8.9320E-02 2.2200E-02

5.6940E-02 6.7490E-02 6.1010E-02 8.2530E-02 9.8030E-02 7.3750E-02 3.7950E-02

6.5210E-03 1.3780E-02 1.5450E-02 1.2780E-02 7.0560E-03 1.8580E-03 8.0400E-03

1.3550E-02 1.5590E-02 1.3320E-02 7.6300E-03 6.1150E-03 1.2500E-02 4.9490E-03

1.9310E-02 3.2640E-02 6.2070E-02 5.2150E-02 9.0750E-03 2.7180E-02 2.5200E-02

1.6770E-02 1.4420E-02 1.9690E-01 4.2360E-02 1.2280E-02 1.9530E-02 3.4720E-02

3.7200E-02 1.2270E-01 2.9630E-02 1.5090E-02 2.6390E+00 1.2340E-01 4.9840E+00

1.0800E+00 4.2960E-03 3.9130E-03 6.7070E-03 8.5960E-03 9.0190E-05 1.5930E-03

2.7520E-03 3.3580E-03 3.0450E-05 1.7820E-03 5.2950E-03 8.5760E-03 8.2030E-03

2.2760E-01 6.5970E+00 6.4860E+00 1.8760E-02 6.2440E-03 1.5220E-02 1.3080E-02

4.9540E-03 4.8160E-03 5.8340E-03 5.4590E-03 8.1290E-03 4.6830E-03 5.0860E-03

5.4240E-03 1.9110E-03 6.7910E-03 6.3770E-03 4.1190E-03 6.0760E-04 1.6100E-03

1.9430E-03 2.0340E-03 3.9240E-04 2.9060E-03 3.3500E-03 2.8170E-03 5.0580E-03

1.3640E-01 2.7950E-02 6.9040E-03 4.8870E-03 5.6830E-03 5.3060E-03 4.8960E-03

8.8870E-03 5.6040E-03 2.7400E-03 6.9440E-03 4.7140E-03 3.2900E-02 3.1930E-02

7.5770E-04 1.7740E-03 4.2930E-03 5.9090E-03 2.1760E-02 3.9470E-03 3.3490E-02

7.7550E-03 4.5440E-03 2.5180E-03 6.7760E-03 5.5620E-03 3.6580E-04 1.9230E-03

1.9760E-03 1.4770E-03 7.8690E+00 4.7340E-01 7.9600E-02 2.9330E+00 7.2760E-01

1.0630E-01 1.6200E-02 3.0080E+00 9.1360E-01 2.3770E-01 3.1460E-02 6.0970E-01

3.5490E-01 8.2210E-02 1.8060E-02 1.7680E-01 7.8550E-02 2.9910E-02 8.5340E-03

1.1030E-03 1.7640E-01 8.0390E-02 3.1490E-02 1.0160E-02 2.3560E-03 2.8930E-04

1.1750E-01 4.2220E-02 5.9700E-03 1.6780E-01 4.8720E-02 1.2470E-02 2.3530E-03

1.9760E-01 6.7310E-02 1.7680E-02 3.1520E-03 5.1300E-02 1.9190E-02 2.4400E-03

8.7200E-01 1.9900E-01 1.0070E-01 2.0200E-02 1.0300E-01 1.6550E-02 1.9730E-03

7.5290E-03 1.1980E-02 6.8510E-03 9.6880E-04 2.2830E+01 6.8910E-01 2.2460E-02

7.6980E-04 3.5860E+01 2.7900E+00 7.1190E-02 1.3730E-03 5.0280E+01 3.4720E+00

1.0760E-01 2.9220E-03 1.8770E-02 4.7740E-03 9.4820E-04 1.2550E-04 3.8070E-02

7.0450E-03 5.8940E-04 7.2230E-05 4.8810E-02 1.5620E-02 3.3880E-03 2.0480E-04

8.2670E+00 2.1410E-01 8.2050E-03 3.5630E-03 1.2960E-01 3.8800E-02 9.0800E-03

1.2270E-03 8.3820E-01 9.1510E-02 1.8140E-02 3.6150E-03 2.5930E+00 2.2170E-01

2.3610E-02 3.2430E-03 8.2100E-03 8.3640E-04 4.0580E-05 2.4620E-02 5.5690E-03

7.4150E-04 5.5790E-05 3.7140E-02 6.5950E-03 1.7240E-03 2.1610E-04 3.8660E-02

8.3040E-03 7.4020E-04 1.2220E-04 5.0590E-01 1.7830E-02 2.7910E-03 4.6790E-04

3.5030E-03 3.5250E-03 1.8400E-03 4.2890E-04 2.9270E-02 5.6820E-03 1.3270E-03

2.1230E-05 4.5620E-02 9.4800E-03 1.6860E-03 2.0540E-04 1.0710E+01 5.3440E-01

1.0120E+00 1.4530E+00 6.8590E-01 1.1180E-01 9.9600E-01 1.7450E+00 9.1260E-01

2.6090E-01 5.3180E-01 5.3430E-01 2.5930E-01 6.6820E-02 8.5710E-02 8.2580E-02

5.0440E-02 2.6850E-02 1.1910E-02 6.9920E-02 7.5120E-02 5.8170E-02 3.3990E-02

1.5310E-02 4.6190E-03 6.8090E-02 4.5680E-02 2.8170E-02 7.8420E-02 7.5950E-02

3.3210E-02 1.0640E-02 8.5090E-02 8.9590E-02 5.2300E-02 1.8020E-02 3.4410E-02

1.7550E-02 1.1040E-02 2.8320E-01 6.2930E-01 3.1430E-01 1.0100E-01 5.2880E-02

4.1380E-02 9.3720E-03 6.4530E-03 9.3550E-03 3.4960E-03 4.0060E-03 2.0720E+00

1.6990E+01 8.5080E-01 2.2970E-02 2.6320E+00 4.1180E+01 3.4240E+00 8.3380E-02

2.3830E-01 4.8060E+01 4.5830E+00 1.2570E-01 8.1900E-03 8.4940E-03 3.3630E-03

8.7960E-04 1.3180E-02 1.7180E-02 6.4340E-03 6.3940E-04 1.9660E-02 2.0210E-02

1.2800E-02 4.1190E-03 5.8840E-01 6.1180E+00 2.5600E-01 8.3950E-03 5.1160E-02

5.9820E-02 3.3010E-02 1.0300E-02 1.1200E-01 6.0270E-01 8.3120E-02 1.8910E-02

2.2770E-01 1.9710E+00 2.5470E-01 2.5910E-02 3.9930E-03 3.3300E-03 5.0240E-04

8.9330E-03 7.7920E-03 4.5970E-03 7.4610E-04 9.1930E-03 1.4540E-02 6.2380E-03

1.8760E-03 1.6840E-02 2.1260E-02 7.0970E-03 6.4120E-04 5.8410E-02 3.6470E-01

1.8260E-02 3.0410E-03 3.0030E-03 2.7260E-03 1.2990E-03 9.7580E-04 8.0580E-03

1.8110E-02 2.1490E-03 1.3320E-03 1.4000E-02 2.4560E-02 1.0350E-02 1.8330E-03

9.3460E+00 2.5390E-01 9.4840E-01 9.6330E-01 5.4540E-01 2.8200E-01 1.0020E+00

1.3060E+00 7.9330E-01 2.2500E-01 4.3670E-01 3.4250E-01 1.7660E-01 3.6100E-02

5.6010E-02 6.0200E-02 4.2960E-02 2.0190E-02 2.0630E-02 5.0670E-02 5.2710E-02

4.3870E-02 3.1000E-02 1.5870E-02 3.3860E-02 4.5040E-02 3.9530E-02 3.3420E-02

5.8720E-02 5.1530E-02 2.2660E-02 3.0610E-02 6.7190E-02 6.3010E-02 4.3640E-02

1.9940E-02 1.9160E-02 1.3220E-02 1.0240E-01 3.1280E-01 6.7130E-01 2.5970E-01

2.4870E-02 4.0480E-02 2.1230E-02 5.3770E-03 6.2190E-03 4.2230E-03 3.5750E-03

1.0000E-01 2.6590E+00 1.3270E+01 6.5450E-01 3.2790E-02 3.3170E+00 2.1880E+01

2.6350E+00 7.1280E-03 7.5920E-01 4.3810E+01 3.6490E+00 3.0900E-03 6.4900E-03

6.0630E-03 2.3570E-03 4.1760E-03 1.3110E-02 9.3100E-03 4.5240E-03 6.1760E-03

1.5980E-02 1.2860E-02 1.0760E-02 3.0540E-02 7.4160E-01 4.8230E+00 1.9850E-01

1.7790E-02 4.1140E-02 4.2010E-02 2.7760E-02 2.4340E-02 1.1150E-01 4.7640E-01

7.0970E-02 2.3580E-02 2.4710E-01 1.5890E+00 2.0260E-01 1.7890E-03 3.2260E-03

1.6500E-03 3.2780E-03 8.9500E-03 6.4800E-03 3.2550E-03 3.7000E-03 8.8710E-03

1.2500E-02 5.0880E-03 4.7380E-03 1.3380E-02 1.3890E-02 4.9630E-03 4.5230E-03

6.3230E-02 2.8600E-01 1.4980E-02 2.5030E-03 1.8050E-03 1.3730E-03 9.5930E-04

4.3570E-03 8.8440E-03 1.2240E-02 1.5620E-03 3.8910E-03 1.5160E-02 1.6930E-02

8.3500E-03 4.7640E-02 2.8970E-01 8.0970E-01 1.0340E+00 4.8370E-02 3.4620E-01

9.1870E-01 1.4600E+00 8.1300E-02 2.4580E-01 3.6370E-01 2.6200E-01 9.3550E-03

3.5750E-02 4.9120E-02 4.7940E-02 2.9780E-02 3.3580E-03 1.8740E-02 3.7400E-02

4.6660E-02 4.1290E-02 2.3910E-02 1.1920E-02 4.0500E-02 4.1930E-02 1.1240E-02

3.5200E-02 4.8890E-02 3.6770E-02 7.7270E-03 3.2520E-02 5.9480E-02 6.3630E-02

9.5050E-03 2.0700E-02 1.1610E-02 4.6780E-02 1.9120E-01 4.0640E-01 6.2060E-01

9.9310E-03 2.8730E-02 3.0540E-02 4.3020E-03 3.4400E-03 6.0920E-03 1.9330E-03

1.1630E-02 1.2050E-01 2.5090E+00 1.9330E+01 1.3500E-03 8.3370E-02 2.5690E+00

1.9770E+01 1.3410E-03 1.9150E-02 1.1220E+00 3.9860E+01 8.8260E-04 3.4430E-03

5.4740E-03 4.2610E-03 8.6860E-04 5.3040E-03 1.1020E-02 8.9030E-03 1.3060E-03

7.1140E-03 1.4320E-02 1.6040E-02 3.0440E-03 3.8560E-02 5.7620E-01 3.7970E+00

3.7310E-03 2.0220E-02 3.9030E-02 4.1720E-02 5.0780E-03 2.6190E-02 9.4080E-02

4.4360E-01 3.2370E-03 2.5900E-02 2.2270E-01 1.4300E+00 5.3980E-04 2.1450E-03

2.5580E-03 7.2470E-04 3.7730E-03 8.0340E-03 5.6470E-03 6.6330E-04 4.2160E-03

7.6280E-03 1.2720E-02 1.0570E-03 6.2940E-03 1.1100E-02 1.0770E-02 6.7340E-04

5.2740E-03 5.1870E-02 2.4990E-01 2.0020E-03 1.0800E-03 1.5270E-03 6.6460E-04

1.1450E-03 4.8210E-03 7.4470E-03 8.9530E-03 6.6520E-04 3.8860E-03 1.2890E-02

1.6430E-02 5.6540E+00 3.1300E-01 7.7990E-02 1.4320E+00 5.6910E-01 1.7070E-01

4.1940E-02 1.6150E+00 6.6320E-01 1.8500E-01 4.0900E-02 1.0900E-01 5.4750E-02

2.7400E-02 1.4230E-02 6.3770E-03 1.6120E-01 9.4350E-02 5.4990E-02 2.9530E-02

1.3790E-02 4.9800E-03 1.0450E-01 5.3890E-02 1.3900E-02 6.1050E-01 8.5030E-02

2.5960E-02 8.8630E-03 3.3650E-01 9.9260E-02 3.4800E-02 1.2380E-02 9.9360E-02

4.4970E-02 8.5140E-03 6.6620E-01 4.1030E-01 1.2970E-01 4.3930E-02 1.4160E-01

6.8930E-02 3.1340E-02 8.5700E-02 9.6260E-02 4.8610E-02 2.0680E-02 1.0520E+01

9.6090E-01 6.2360E-02 5.6600E-03 1.5750E-01 8.1440E-02 2.0330E-02 2.9270E-03

2.1730E-01 8.3900E-02 2.5100E-02 2.9340E-03 2.4280E-01 2.5490E-02 1.5690E-02

7.9500E-03 2.1400E+01 5.2490E-01 2.1550E-02 6.9330E-04 2.6640E+01 3.0260E+00

1.4560E-01 9.7540E-04 2.9220E+01 2.8130E+00 1.5430E-01 6.2900E-03 1.1970E+00

1.7270E-01 1.0970E-02 1.6110E-03 1.2210E+00 1.5500E-01 1.8400E-02 3.5990E-03

6.1430E-02 2.9290E-02 1.0640E-02 2.1290E-03 4.0280E-02 1.1730E-02 2.0790E-03

9.0100E-01 4.9090E-02 7.2500E-03 2.0340E-03 4.5670E-01 7.0190E-02 1.0730E-02

2.4850E-03 8.9280E-02 1.6170E-02 4.4080E-03 1.2390E-03 1.5240E-01 3.7490E-02

7.0860E-03 1.9500E-03 1.0900E-02 7.9760E-03 4.7700E-03 1.8610E-03 3.4030E-02

1.0700E-02 5.5350E-03 1.3200E-03 1.2210E-01 5.1870E-02 9.5940E-03 4.1130E-03

6.7630E+00 3.1700E-01 4.5610E-01 7.2580E-01 4.8020E-01 1.8140E-01 7.6480E-01

7.3330E-01 4.4830E-01 1.5800E-01 4.9990E-02 5.3850E-02 3.8310E-02 2.0380E-02

7.7510E-03 7.7130E-02 7.6560E-02 5.4720E-02 3.7910E-02 2.6290E-02 1.4190E-02

6.5150E-02 3.6880E-02 3.5800E-02 1.4560E-01 3.5520E-01 6.2310E-02 1.6920E-02

9.8640E-02 1.8310E-01 7.5450E-02 3.0580E-02 6.4070E-02 3.2700E-02 2.5470E-02

4.1010E-01 3.3920E-01 3.2290E-01 1.1650E-01 9.4910E-02 7.1460E-02 2.8450E-02

6.8560E-02 6.4410E-02 4.3180E-02 2.1380E-02 2.7880E-01 7.8710E+00 1.2640E+00

7.8940E-02 6.1070E-02 1.1060E-01 7.6690E-02 2.3680E-02 4.7330E-02 2.3100E-01

1.3610E-01 2.9510E-02 4.5330E-02 1.6300E-01 1.5230E-02 5.8730E-03 2.9330E+00

1.4050E+01 4.4320E-01 1.1640E-02 2.9880E+00 1.6970E+01 3.6240E+00 1.6570E-01

6.0530E-01 2.1450E+01 4.1430E+00 1.9430E-01 1.6450E-01 7.5500E-01 1.8530E-01

1.0710E-02 4.3930E-02 8.6290E-01 1.6170E-01 2.0080E-02 2.3980E-02 2.5180E-02

2.1740E-02 1.1920E-02 2.0530E-02 1.5210E-02 6.2410E-03 1.6890E-01 5.3800E-01

4.1020E-02 5.4970E-03 6.8970E-02 2.6740E-01 7.1880E-02 1.0910E-02 2.1780E-02

4.5710E-02 1.1390E-02 3.9050E-03 1.7450E-02 9.8510E-02 3.4190E-02 7.4910E-03

8.7190E-03 5.9850E-03 3.4330E-03 2.1200E-03 1.1740E-02 1.5340E-02 9.3100E-03

3.4450E-03 3.0650E-02 8.0230E-02 5.7090E-02 7.9380E-03 5.0820E+00 1.1490E-01

4.0380E-01 4.8910E-01 4.0280E-01 2.9660E-01 5.5940E-01 4.4160E-01 2.8430E-01

2.4310E-02 3.5180E-02 3.2410E-02 2.3900E-02 1.2630E-02 3.7150E-02 3.9120E-02

5.0560E-02 4.5260E-02 2.9480E-02 1.3310E-02 3.2640E-02 3.6690E-02 3.4060E-02

4.2570E-02 1.3140E-01 2.2060E-01 3.7690E-02 3.4790E-02 7.4980E-02 1.2490E-01

5.7020E-02 3.5020E-02 3.3910E-02 2.2870E-02 1.2970E-01 3.2290E-01 3.3150E-01

2.4540E-01 6.3870E-02 5.3820E-02 2.8210E-02 5.1420E-02 4.3090E-02 3.6320E-02

2.0110E-02 1.1040E-02 3.3850E-01 5.8190E+00 9.7620E-01 7.8460E-03 5.8230E-02

7.2710E-02 6.5190E-02 3.2130E-03 7.9700E-02 1.5660E-01 1.1290E-01 2.0350E-02

5.1490E-02 1.0360E-01 5.5430E-03 2.2800E-01 3.5300E+00 9.0200E+00 3.0490E-01

1.5440E-01 4.0840E+00 1.0820E+01 2.8300E+00 8.2000E-03 7.3960E-01 1.5850E+01

3.1820E+00 9.1280E-03 1.8040E-01 5.0640E-01 1.4160E-01 8.4570E-03 4.1590E-02

8.6580E-01 1.3840E-01 6.2030E-03 1.7750E-02 1.8170E-02 2.0000E-02 1.0110E-02

1.3620E-02 8.6440E-03 2.3860E-02 1.6360E-01 3.5190E-01 2.5660E-02 1.0410E-02

7.0870E-02 1.6300E-01 5.5020E-02 6.9300E-03 1.8840E-02 2.8210E-02 7.1200E-03

4.5690E-03 1.4720E-02 7.5580E-02 2.8290E-02 6.5400E-03 3.9300E-03 2.8520E-03

1.5950E-03 7.3100E-03 9.4400E-03 1.0950E-02 3.8530E-03 5.9650E-03 2.8770E-02

5.8360E-02 4.2770E-02 2.4470E-02 1.2110E-01 3.2300E-01 4.6750E-01 9.4780E-02

2.9540E-01 4.0760E-01 2.6750E-01 1.3080E-02 1.5950E-02 2.1890E-02 2.1440E-02

1.3140E-02 1.1980E-02 2.8730E-02 3.1030E-02 3.0360E-02 2.5850E-02 1.5320E-02

1.2300E-02 3.3300E-02 2.3410E-02 1.6250E-02 3.6800E-02 9.6210E-02 1.3750E-01

1.2380E-02 3.0570E-02 5.6800E-02 9.4120E-02 1.5520E-02 3.1060E-02 1.4480E-02

4.3900E-02 1.1650E-01 2.4540E-01 2.7690E-01 3.9760E-02 3.3010E-02 2.4500E-02

3.4280E-02 2.6270E-02 2.5860E-02 1.4370E-02 2.5720E-03 1.3930E-02 2.5870E-01

4.4930E+00 5.6950E-04 8.8350E-03 4.6590E-02 8.0340E-02 1.9360E-04 3.5410E-03

6.1460E-02 1.7010E-01 1.2900E-02 1.0870E-02 3.0620E-02 6.0320E-02 1.5260E-02

3.1930E-01 2.7000E+00 8.0600E+00 9.7470E-04 1.6120E-01 3.0990E+00 9.0180E+00

2.5930E-03 8.4270E-03 5.5700E-01 1.2310E+01 1.5910E-03 1.0680E-02 1.4200E-01

4.0350E-01 2.6160E-03 8.5500E-03 3.3100E-02 7.2930E-01 6.0630E-04 6.8300E-03

1.5340E-02 1.8670E-02 4.2800E-03 9.5270E-03 8.0340E-03 4.3250E-03 2.4590E-02

1.2470E-01 2.2570E-01 2.4020E-03 1.0880E-02 5.4360E-02 1.3210E-01 2.2570E-03

7.9130E-03 1.5810E-02 1.6330E-02 1.1220E-03 4.4200E-03 1.1710E-02 6.3930E-02

4.3600E-03 2.4020E-03 2.2720E-03 1.0890E-03 2.9640E-03 4.3390E-03 5.2400E-03

4.5670E-03 2.2430E-03 7.4140E-03 2.5320E-02 5.0010E-02 5.9880E+00 2.7140E-01

4.6950E-02 1.5430E+00 4.2250E-01 1.3410E-01 3.7730E-02 1.1460E-01 5.1840E-02

2.0400E-02 7.1990E-03 1.8920E-03 1.5840E-01 8.8120E-02 4.3470E-02 1.8180E-02

5.8980E-03 1.2400E-03 7.2350E-02 1.6240E-02 4.4290E-03 1.7080E-01 5.8880E-02

1.8410E-02 3.6930E-03 8.0540E-01 7.0100E-02 2.0610E-02 6.6300E-03 7.5890E-02

1.6700E-02 4.7890E-03 1.0130E+00 3.1590E-01 7.6900E-02 2.5780E-02 1.1160E-01

3.5310E-02 5.4910E-03 4.6220E-03 2.3370E-02 4.5620E-03 1.9500E-03 2.3130E+00

2.2130E-01 2.0580E-02 2.8310E-03 4.2040E+00 3.6490E-01 3.8160E-02 5.5310E-03

9.1510E-02 8.6240E-02 2.8280E-02 5.1670E-03 1.9810E-02 1.1810E-02 3.3230E-03

5.1250E-04 5.0840E-02 1.3730E-02 3.7630E-03 3.2960E-04 1.0630E+00 3.5970E-02

5.6760E-03 1.6050E-03 4.4380E-01 6.8780E-02 1.2390E-02 2.1730E-03 2.4640E+01

5.5910E-01 1.7890E-02 8.1230E-04 3.2260E+01 2.7660E+00 1.1540E-01 6.5030E-04

4.5850E+01 3.1130E+00 1.4160E-01 1.2380E-02 3.1810E-02 5.7770E-03 2.1520E-03

6.9800E-02 2.4360E-02 1.0540E-02 2.6100E-03 2.2850E+00 8.3080E-02 1.2570E-02

4.7170E-03 5.1830E-02 1.1520E-02 2.6420E-03 3.7970E-04 2.5560E-01 3.5660E-02

4.4280E-03 6.9170E-04 3.0650E-03 1.6650E-02 5.0090E-03 1.2800E-03 2.3770E-02

6.5750E-03 2.7140E-03 6.0280E-04 1.6890E-01 2.7310E-02 3.9070E-03 5.3880E-04

8.4330E+00 2.9550E-01 6.3240E-01 8.6650E-01 2.8630E-01 9.5620E-02 5.1980E-02

5.6180E-02 3.3790E-02 1.7740E-02 7.5900E-03 7.7160E-02 6.4650E-02 5.2210E-02

3.6720E-02 2.1820E-02 9.7390E-03 3.2620E-02 3.4350E-02 1.0520E-02 8.1740E-02

7.7420E-02 3.7440E-02 1.4490E-02 1.2340E-01 5.5180E-01 5.6530E-02 1.8430E-02

3.9260E-02 3.2710E-02 8.4730E-03 3.7540E-01 5.0600E-01 2.6530E-01 6.7670E-02

6.7200E-02 4.6530E-02 1.9950E-02 3.8510E-03 1.3430E-02 1.1160E-02 2.4710E-03

2.0040E-01 1.5660E+00 2.5060E-01 2.3980E-02 1.6560E-01 3.3360E+00 4.3880E-01

4.2950E-02 7.1580E-02 1.0280E-01 6.7290E-02 3.1190E-02 1.4760E-02 7.4050E-03

5.7860E-03 2.7370E-03 2.0500E-02 2.1100E-02 1.0810E-02 2.8760E-03 1.2780E-01

7.6250E-01 3.3840E-02 5.5570E-03 6.8680E-02 2.9240E-01 6.3740E-02 1.3420E-02

2.3760E+00 1.7820E+01 6.5500E-01 2.4780E-02 2.7460E+00 2.2990E+01 3.4230E+00

1.1850E-01 4.0010E-01 3.7450E+01 4.0270E+00 1.6850E-01 1.5790E-02 1.4200E-02

2.9900E-03 3.2610E-02 3.1460E-02 1.4260E-02 6.6160E-03 2.2570E-01 1.5060E+00

8.1080E-02 1.1130E-02 1.9980E-02 2.4600E-02 8.5600E-03 2.3670E-03 3.5360E-02

1.6860E-01 3.8140E-02 7.4040E-03 2.5550E-03 1.0260E-02 6.5610E-03 2.0460E-03

9.5410E-03 1.0680E-02 6.0630E-03 2.3960E-03 3.4590E-02 1.0290E-01 1.8570E-02

4.0560E-03 6.5580E+00 2.6090E-01 5.2840E-01 5.5530E-01 1.8400E-01 2.1430E-02

3.4300E-02 3.8600E-02 2.7490E-02 1.2490E-02 2.8820E-02 4.6540E-02 4.6590E-02

4.0690E-02 3.0790E-02 1.6780E-02 1.3590E-02 2.7720E-02 2.0680E-02 3.6180E-02

5.6860E-02 5.1170E-02 2.3940E-02 2.9810E-02 1.1810E-01 4.0600E-01 4.4190E-02

2.0110E-02 2.9020E-02 1.5730E-02 1.1010E-01 3.1870E-01 3.2700E-01 2.0150E-01

3.4660E-02 4.5930E-02 2.5890E-02 3.0810E-03 5.2830E-03 9.3860E-03 4.7320E-03

2.1490E-02 2.5030E-01 1.1770E+00 1.9870E-01 2.0640E-02 1.7970E-01 2.6400E+00

3.2090E-01 1.9420E-02 5.4430E-02 8.2640E-02 6.6020E-02 6.5440E-03 7.1330E-03

6.5190E-03 3.7030E-03 8.9000E-03 1.7300E-02 1.4130E-02 7.9500E-03 1.0900E-02

1.3930E-01 5.6470E-01 2.6030E-02 1.2360E-02 6.3730E-02 2.2180E-01 5.3500E-02

1.4320E-01 2.9530E+00 1.3110E+01 4.9230E-01 1.0190E-01 3.4110E+00 1.7320E+01

2.6190E+00 3.8770E-03 1.4560E+00 2.9740E+01 3.1010E+00 7.8510E-03 1.2290E-02

6.2220E-03 1.8350E-02 2.0710E-02 1.8640E-02 8.8120E-03 2.4600E-02 2.7040E-01

1.2170E+00 6.2440E-02 6.4900E-03 1.5050E-02 1.6050E-02 5.6080E-03 4.3630E-03

3.8110E-02 1.2490E-01 2.9830E-02 2.0430E-03 4.0260E-03 6.2600E-03 3.0510E-03

6.4170E-03 7.2170E-03 6.4830E-03 4.0230E-03 6.0860E-03 3.4070E-02 7.4070E-02

1.5860E-02 1.0790E-01 2.5930E-01 4.0930E-01 3.7760E-01 6.9310E-03 1.9480E-02

2.7790E-02 2.7520E-02 1.7550E-02 5.8890E-03 2.5590E-02 3.7960E-02 3.9440E-02

3.1470E-02 1.7190E-02 5.4730E-03 1.4660E-02 2.6310E-02 1.4220E-02 3.5280E-02

4.4260E-02 3.2520E-02 9.6340E-03 2.9380E-02 9.6110E-02 3.1620E-01 1.0070E-02

1.9160E-02 1.9490E-02 3.7360E-02 1.0680E-01 2.6430E-01 3.1540E-01 1.6140E-02

3.5860E-02 2.8480E-02 2.3110E-03 3.2510E-03 5.1560E-03 5.8460E-03 2.7580E-03

2.5200E-02 1.9860E-01 1.0330E+00 3.2530E-03 2.2560E-02 1.4640E-01 2.2290E+00

1.1590E-03 2.1410E-02 5.2440E-02 8.6060E-02 2.1840E-03 6.2950E-03 5.6050E-03

3.5530E-03 2.3730E-03 9.9000E-03 1.4070E-02 9.9630E-03 2.6120E-03 1.1280E-02

1.0980E-01 4.3510E-01 2.1700E-03 1.3410E-02 5.3500E-02 1.9290E-01 9.7580E-03

1.7530E-01 2.2690E+00 1.0170E+01 6.4860E-04 1.1710E-01 2.6230E+00 1.4860E+01

4.8630E-04 4.7080E-03 1.1310E+00 2.4780E+01 4.0300E-03 7.0640E-03 8.4750E-03

7.1640E-03 1.4650E-02 1.5580E-02 1.2070E-02 6.8010E-03 2.6330E-02 2.0960E-01

9.3970E-01 2.1300E-03 6.9690E-03 1.2070E-02 1.0360E-02 6.8420E-04 4.8270E-03

2.9820E-02 1.0960E-01 1.5330E-03 2.7020E-03 4.1910E-03 2.9630E-03 2.2760E-03

3.7450E-03 6.6070E-03 4.7570E-03 1.0210E-03 6.7100E-03 2.8100E-02 6.1280E-02

3.6370E+00 3.7280E-01 1.4480E-01 5.9040E-02 4.0310E-02 2.4280E-02 1.3590E-02

6.1340E-03 6.6890E-02 4.8390E-02 3.5050E-02 2.5420E-02 1.7200E-02 8.8330E-03

5.3490E-02 2.9830E-02 1.8400E-02 1.4050E+00 9.6350E-01 2.0790E-01 6.9400E-02

9.0280E-01 1.0430E-01 3.4080E-01 9.5260E-02 1.6690E+00 2.2710E-01 5.8660E-02

5.8420E-01 3.3100E-01 1.7490E-01 8.5720E-02 5.5090E-01 3.3440E-01 3.8160E-02

2.0460E-02 2.4890E-01 3.0640E-02 1.5410E-02 8.3920E-02 3.6280E-02 1.1620E-02

2.5900E-03 7.2800E-02 2.9920E-02 1.0150E-02 2.8090E-03 6.4050E-02 2.5660E-02

8.8750E-03 1.9460E-03 3.2930E-02 1.7750E-02 9.6420E-03 4.5320E-03 2.8430E+00

5.3210E-01 2.8760E-02 6.2630E-03 2.5240E+00 3.6290E-01 3.7720E-02 6.9540E-03

7.3080E-02 3.8180E-02 1.6140E-02 5.5870E-03 3.3580E+00 4.7340E-01 4.4990E-02

9.3800E-03 9.1700E-02 3.6220E-02 1.5080E-02 5.4070E-03 1.0770E-01 4.9510E-02

2.3420E-02 1.0270E-02 1.4880E+01 1.9140E-01 7.5650E-03 1.9610E+01 3.5780E+00

1.1420E-01 5.9770E-03 3.6130E+01 3.8020E+00 3.0140E-01 1.7690E-02 1.8310E-01

5.3110E-02 1.1380E-02 2.2100E-03 2.6310E-02 1.4400E-02 6.8410E-03 2.6630E-03

2.8370E-02 1.8800E-01 1.8030E-02 8.5590E-03 5.0170E-02 2.6360E-02 1.0170E-02

2.7460E-03 1.2380E-01 2.6860E-02 6.8460E-03 1.3140E-03 4.0280E+00 2.1540E-01

3.5470E-02 2.6040E-02 2.3310E-02 1.5840E-02 6.7890E-03 3.9560E-02 3.7290E-02

3.3020E-02 2.3500E-02 1.3050E-02 5.2130E-03 3.1550E-02 2.9210E-02 1.5590E-02

2.1240E-01 9.1810E-01 6.5540E-02 1.5260E-01 4.5840E-01 1.0100E-01 7.7520E-02

4.1450E-02 2.5170E-01 7.2950E-01 8.3710E-02 2.8690E-01 2.6400E-01 2.0070E-01

1.3050E-01 3.8690E-01 8.6770E-02 2.1310E-01 1.5340E-02 7.5520E-02 1.0710E-01

1.0400E-02 2.4400E-02 3.3190E-02 2.9690E-02 1.3500E-02 1.5390E-02 3.4170E-02

2.4820E-02 1.1270E-02 1.2740E-02 2.6820E-02 2.1830E-02 1.0560E-02 1.6620E-02

1.8540E-02 1.0190E-02 4.0020E-03 5.2360E-01 1.4040E+00 6.0140E-01 2.6010E-02

6.5480E-02 1.6830E+00 4.2170E-01 4.4540E-02 2.8300E-02 3.0190E-02 2.6150E-02

1.6830E-02 7.5630E-02 2.2770E+00 5.6380E-01 5.3620E-02 2.2850E-02 4.9480E-02

2.8210E-02 1.4910E-02 3.4420E-02 5.6440E-02 3.4480E-02 2.3020E-02 3.5340E+00

7.6420E+00 1.3410E-01 3.5640E+00 9.6700E+00 4.0770E+00 1.3350E-01 5.4580E-01

1.8450E+01 4.6320E+00 4.0120E-01 5.2870E-02 7.9270E-02 4.3330E-02 1.1020E-02

1.1220E-02 1.0070E-02 9.7930E-03 6.5690E-03 2.1280E-02 4.1780E-02 9.8300E-02

7.0410E-03 2.6290E-02 1.8670E-02 1.5010E-02 8.9800E-03 9.5360E-03 7.5670E-02

2.3750E-02 5.8760E-03 2.7650E+00 1.7100E-02 2.1430E-02 1.4120E-02 1.1520E-02

7.7480E-03 2.3790E-02 2.6650E-02 1.8480E-02 1.3740E-02 1.1170E-02 6.8210E-03

1.8880E-02 1.8070E-02 1.3880E-02 1.2680E-01 2.5550E-01 5.2370E-01 3.7230E-02

1.2750E-01 6.0820E-02 6.8050E-02 5.1600E-02 9.8330E-02 1.8710E-01 2.7330E-01

1.3010E-01 1.6660E-01 1.6150E-01 1.3020E-01 1.7220E-01 1.8040E-01 1.0720E-01

1.0230E-02 2.7340E-02 6.7870E-02 4.9220E-02 3.6310E-03 2.0860E-02 1.9060E-02

2.4270E-02 2.8700E-03 1.1010E-02 2.1780E-02 2.0810E-02 1.3570E-03 1.0730E-02

1.6390E-02 1.8940E-02 9.5030E-03 9.3440E-03 9.8480E-03 4.4280E-03 2.2120E-02

5.9930E-01 6.6200E-01 4.2170E-01 1.2430E-02 6.3600E-02 1.0880E+00 3.2180E-01

7.7670E-03 1.8950E-02 1.9350E-02 2.1090E-02 1.3890E-02 7.5200E-02 1.4730E+00

4.2750E-01 7.4820E-03 1.4180E-02 3.0530E-02 2.1890E-02 1.1240E-02 1.6160E-02

3.9140E-02 2.8920E-02 4.7060E-01 3.9880E+00 3.0980E+00 1.0690E-01 4.0730E+00

4.5830E+00 2.8750E+00 1.4550E-02 6.2220E-01 1.1810E+01 3.5510E+00 1.1410E-02

4.3280E-02 4.3750E-02 2.7130E-02 3.5690E-03 7.8850E-03 7.5270E-03 7.3740E-03

1.4180E-02 1.6020E-02 4.8210E-02 3.7400E-02 1.0140E-02 1.3980E-02 1.3150E-02

7.1010E-03 2.8940E-03 5.6040E-03 4.9760E-02 1.7610E-02 7.3940E-03 8.0180E-03

9.9970E-03 7.0580E-03 2.8300E-03 1.3800E-02 8.0030E-03 9.7190E-03 9.2670E-03

6.4900E-03 3.0800E-03 9.1460E-03 7.6950E-03 8.5310E-03 5.8080E-02 1.3250E-01

2.6790E-01 2.6960E-02 4.6230E-02 1.0350E-01 3.4090E-02 3.7620E-02 3.8410E-02

6.8920E-02 1.1610E-01 4.7690E-02 7.7890E-02 9.1930E-02 7.8330E-02 4.5680E-02

1.6330E-01 1.8970E-02 5.1130E-03 1.1480E-02 1.3960E-02 4.5560E-02 3.5750E-04

3.4030E-03 1.4480E-02 1.5700E-02 3.6400E-04 2.5260E-03 7.6770E-03 1.7250E-02

1.2780E-05 1.4700E-03 7.5600E-03 1.5560E-02 4.5040E-03 3.9670E-03 3.8330E-03

3.5850E-03 5.6460E-03 2.4850E-02 4.2090E-01 4.0280E-01 2.7830E-03 1.0580E-02

4.1630E-02 6.8570E-01 1.2710E-03 7.0040E-03 1.2700E-02 1.2640E-02 2.9340E-03

1.2010E-02 5.0650E-02 9.2890E-01 1.6870E-03 5.5490E-03 9.3610E-03 2.1490E-02

2.3930E-03 9.6380E-03 1.0590E-02 2.5970E-02 1.6430E-02 7.3330E-01 3.0250E+00

5.2900E-03 1.4270E-01 2.8730E+00 2.7900E+00 6.3880E-03 7.9380E-03 4.3100E-01

7.5280E+00 2.2000E-03 1.1000E-02 2.7120E-02 2.1010E-02 6.6630E-04 3.1710E-03

5.0080E-03 4.0240E-03 7.0920E-03 6.4220E-03 8.7600E-03 3.4230E-02 2.6020E-03

8.9710E-03 8.8430E-03 5.8280E-03 5.0060E-04 2.6750E-03 3.5230E-03 3.0070E-02

3.5590E+00 8.9890E-01 1.5660E-01 6.6660E-02 8.2500E+00 3.6210E+00 1.0320E+00

1.9900E-01 3.3660E-02 7.5950E-03 3.1510E+00 1.2840E+00 4.4230E-02 2.5070E+00

3.6190E-01 7.0440E-02 7.5270E-03 1.6640E+00 5.2900E-01 8.7200E-02 6.4550E-03

5.3000E-01 1.3570E-01 7.6890E-03 3.2410E-02 2.0380E-02 9.4230E-03 3.3890E-03

1.4880E-02 1.1730E-02 6.4520E-03 5.3530E-02 1.1660E-01 6.9230E-03 2.1020E-03

2.1650E-01 1.9050E-01 8.9280E-02 2.0550E-02 1.8150E-01 8.8490E-02 2.6310E-02

4.1110E-03 1.1970E-01 3.6560E-02 8.1130E-03 9.2500E-04 1.1860E-01 3.6380E-02

6.3030E-03 1.0120E-04 1.0910E-01 5.6360E-02 4.9550E-02 3.2210E-02 1.9480E-01

4.6630E-02 1.1740E-02 2.4020E-03 4.4870E-02 1.4660E-02 3.9310E-03 1.0270E-03

8.5470E-02 7.6430E-02 4.5100E-02 1.4700E-02 1.9280E-01 4.3130E-02 7.0420E-03

6.7500E-04 3.5260E-02 1.5020E-02 4.3580E-03 8.9960E-04 5.0700E-02 4.1110E-02

8.1710E-03 5.6210E-02 2.5610E-02 1.4900E-02 7.1870E-03 4.9350E-02 2.3530E-02

8.1750E-03 2.1450E-03 7.1440E-02 7.3710E-02 3.7120E-02 8.6150E-03 4.7220E-02

2.6400E-02 9.1710E-03 1.9180E-03 3.6980E-02 2.2990E-02 1.0590E-02 6.3330E-03

2.0400E-02 1.0430E-02 5.4410E-03 2.6250E-03 3.1730E-02 1.5690E-02 5.9470E-03

1.4540E-03 2.9710E+00 1.2830E+00 9.8070E-02 2.7460E+00 2.6930E+00 3.2240E+00

1.5660E+00 3.6790E-01 5.0360E-02 1.7570E+00 9.5750E-01 8.5650E-01 7.5640E-01

1.2780E+00 2.5520E-01 6.4970E-02 6.0930E-01 6.6770E-01 4.5700E-01 9.4090E-02

2.8300E-01 1.7740E-01 7.8330E-02 2.1140E-02 1.3590E-02 1.0210E-02 7.9260E-03

1.3440E-02 9.3800E-03 4.4480E-03 4.2820E-02 4.7240E-02 4.9670E-02 3.3950E-03

1.8280E-01 5.3770E-02 9.7100E-02 8.8150E-02 8.0170E-02 6.3260E-02 6.9280E-02

2.7690E-02 2.7440E-02 6.6080E-02 3.0350E-02 8.5630E-03 5.0750E-02 4.1880E-02

2.5600E-02 6.6700E-03 7.3820E-02 8.4630E-02 3.7480E-02 9.7570E-03 5.7480E-02

9.9580E-02 3.6600E-02 1.0890E-02 1.4390E-02 2.1140E-02 1.1920E-02 3.8930E-03

7.5590E-02 3.4870E-02 2.8560E-02 3.8310E-02 4.3460E-02 1.0300E-01 4.0820E-02

7.6480E-03 1.3470E-02 1.4210E-02 1.2040E-02 4.5570E-03 4.2540E-02 1.6730E-02

1.8140E-02 3.1360E-02 2.9130E-02 1.6720E-02 5.5080E-03 2.5130E-02 2.1050E-02

1.5450E-02 7.4270E-03 7.3720E-02 2.4230E-02 2.6400E-02 2.8370E-02 2.5590E-02

1.4920E-02 1.8090E-02 9.1880E-03 2.9590E-02 1.5310E-02 1.2810E-02 3.8060E-03

1.2250E-02 9.8640E-03 6.4660E-03 2.1990E-03 1.6650E-02 1.2240E-02 9.3100E-03

5.5520E-03 1.5830E+00 1.0880E+00 2.0000E-01 2.9080E+00 1.0110E+00 1.9600E+00

1.5450E+00 4.0850E-01 7.8510E-01 9.3850E-01 9.6490E-01 2.0950E-01 6.8890E-01

7.1310E-01 1.5320E-01 1.5460E-01 5.0970E-01 3.9130E-01 3.1490E-01 1.3210E-01

1.6750E-01 1.0450E-01 1.0930E-02 1.0490E-02 1.0550E-02 8.1080E-03 1.0630E-02

6.6750E-03 2.8550E-03 3.2120E-02 1.6940E-02 4.0830E-02 1.7350E-02 8.7840E-02

8.2010E-02 5.3630E-02 9.1960E-02 2.2110E-02 5.9950E-02 4.2730E-02 5.5520E-02

3.1620E-03 2.5730E-02 4.4510E-02 2.5420E-02 1.8160E-02 3.4820E-02 2.5240E-02

1.5710E-02 5.3590E-02 5.8970E-02 3.3540E-02 9.0680E-03 1.6180E-02 5.0460E-02

6.1280E-02 2.5440E-02 3.9080E-03 1.2160E-02 1.3640E-02 8.8190E-03 4.8260E-02

2.6400E-02 3.3240E-02 2.5000E-02 6.7550E-03 4.5660E-02 6.5070E-02 2.8720E-02

3.5640E-03 1.0620E-02 9.5260E-03 9.5040E-03 3.1560E-02 1.7940E-02 1.2960E-02

1.8660E-02 2.1820E-02 1.3980E-02 7.2490E-03 1.0340E-02 1.5790E-02 1.2450E-02

1.1330E-02 5.0440E-02 2.1710E-02 2.7350E-02 1.5180E-02 9.3360E-03 1.6220E-02

1.0610E-02 1.4680E-02 2.2190E-02 1.0740E-02 9.3600E-03 3.8700E-03 7.4330E-03

7.8310E-03 5.0170E-03 2.9130E-03 7.2820E-03 9.6820E-03 8.7320E-03 7.1690E-03

1.0650E+00 3.5830E-02 2.1090E-01 2.2250E+00 7.8830E-01 9.1130E-01 1.2140E+00

2.2500E-01 8.1980E-01 7.4480E-01 5.3450E-02 2.4570E-01 5.3040E-01 3.4600E-01

2.1090E-02 2.1790E-01 3.2530E-01 3.4780E-01 5.0700E-02 1.2600E-01 9.2700E-02

4.6220E-03 8.1690E-03 8.3490E-03 6.0880E-03 7.3640E-03 4.1790E-03 1.9360E-03

2.1410E-02 5.3190E-03 2.0980E-02 2.5430E-02 2.6460E-02 7.4720E-02 5.7550E-02

4.7180E-02 2.9100E-03 2.9290E-02 3.8010E-02 4.9980E-02 1.4460E-04 5.3380E-03

2.4230E-02 3.4720E-02 4.6260E-03 1.9920E-02 2.3450E-02 1.6220E-02 4.2920E-02

2.2380E-02 2.1780E-02 1.3640E-02 4.5840E-03 1.7340E-02 4.0680E-02 3.9630E-02

8.8190E-04 4.5330E-03 9.3200E-03 1.1860E-02 2.1860E-02 3.0030E-02 2.4520E-02

1.2220E-02 6.0150E-04 1.0280E-02 3.9080E-02 4.7520E-02 6.3030E-04 4.6150E-03

7.3500E-03 9.6550E-03 1.6490E-02 1.6350E-02 5.9850E-03 1.1400E-02 1.1700E-02

1.0890E-02 7.0820E-03 3.4360E-03 9.6150E-03 1.0580E-02 9.6430E-03 2.5000E-02

2.9530E-02 1.7310E-02 5.4640E-03 2.2570E-03 9.9310E-03 1.0360E-02 1.1350E-02

1.4790E-02 7.1490E-03 5.1300E-03 3.6620E-03 4.4170E-03 4.6700E-03 3.8940E-03

2.4450E-03 2.4600E-03 6.3220E-03 7.0930E-03 6.0360E-03 6.6430E-03 3.7630E-02

1.5080E-01 1.2540E+00 9.9870E-01 2.4930E-01 1.7680E-02 4.8890E-01 3.9280E-01

1.0630E-02 7.2940E-02 1.9470E-01 3.0920E-01 1.1260E-03 3.5820E-02 2.0550E-01

2.1290E-01 1.4290E-02 6.6870E-02 5.3530E-02 1.5000E-03 4.2310E-03 3.9250E-03

2.9660E-03 3.7980E-03 1.8410E-03 9.5360E-04 1.0710E-02 1.6540E-03 7.0230E-03

1.7680E-02 3.3000E-03 3.8160E-02 5.0460E-02 1.3540E-02 8.5980E-05 4.8850E-03

2.8550E-02 2.6610E-02 1.8630E-05 1.9900E-04 5.3380E-03 2.6670E-02 5.6910E-04

7.5500E-03 1.4250E-02 8.4550E-03 2.4580E-02 5.7400E-03 1.0370E-02 9.7260E-03

9.8050E-04 5.1440E-03 1.1820E-02 3.0880E-02 1.8490E-04 1.0620E-03 4.0340E-03

7.8820E-03 6.3270E-03 2.2240E-02 1.1100E-02 4.7420E-03 3.4020E-05 9.7260E-04

1.0440E-02 3.7280E-02 3.3150E-05 9.7730E-04 4.4620E-03 5.7670E-03 6.7020E-03

1.0550E-02 1.8080E-03 5.6960E-03 4.6690E-03 6.3220E-03 4.2240E-03 1.1530E-03

3.8090E-03 6.8380E-03 5.6020E-03 8.4820E-03 2.2740E-02 7.7700E-03 6.8830E-04

3.2790E-04 3.1340E-03 8.2510E-03 5.2340E-03 7.3970E-03 3.6540E-03 2.0420E-03

2.2840E-03 2.1130E-03 1.8680E-03 2.3660E-03 1.3130E-03 5.6830E-04 2.9820E-03

4.1120E-03 3.2970E-03 3.8510E+00 4.0300E-01 2.9370E-02 6.4700E-03 1.5150E-03

9.3430E+00 1.7020E-01 7.4850E-02 1.5580E+00 3.6360E-01 1.6410E-02 2.6480E-03

2.2610E+00 3.4980E-01 2.8880E-02 2.4440E-03 1.5160E+00 1.5400E-02 1.0940E-02

3.0410E-02 1.6000E-02 6.2870E-03 1.5200E-03 1.0250E-02 5.4940E-03 2.7630E-03

7.9440E-03 4.1430E-02 8.5430E-03 1.3690E-03 1.3400E-01 2.8730E-02 4.9030E-03

6.0210E-04 1.8510E-01 5.5570E-02 1.1290E-02 1.1180E-03 5.6210E-01 1.7470E-01

3.1640E-02 3.0870E-03 1.4330E-01 1.8320E-02 1.0180E-03 6.7750E-05 5.0450E-02

2.4930E-02 9.2430E-03 1.4800E-03 7.0440E-02 5.4810E-02 2.4520E-02 4.2360E-03

2.9030E-01 8.1890E-02 1.8860E-02 3.0280E-03 1.1500E-01 4.9810E-02 1.4690E-02

1.8150E-03 1.1480E-01 7.4960E-02 2.4820E-02 3.4790E-03 4.2460E-01 1.0390E-01

2.1710E-02 2.2970E-03 3.8750E-02 3.9800E-02 3.4330E-02 6.5700E-02 4.4770E-02

1.9470E-02 3.3220E-03 2.1090E-01 5.2650E-02 7.4040E-03 1.3230E-03 4.1920E-02

1.4670E-02 5.8550E-03 1.2550E-03 9.0360E-02 3.7820E-02 9.5580E-03 1.9860E-03

4.2150E-02 4.3940E-02 1.9640E-02 6.7410E-04 7.1240E-02 2.9650E-02 6.4420E-03

6.3250E-04 6.9880E-02 4.4540E-02 1.2580E-02 1.4250E-03 4.7020E+00 6.9940E-01

4.3910E-02 6.9800E-03 3.8010E+00 4.1190E+00 9.5570E-02 7.3620E-01 5.7560E-01

2.9320E-01 1.2390E-02 1.2160E+00 2.3280E+00 3.0520E-01 2.6660E-02 7.1640E-01

5.6350E-01 5.8070E-03 1.8990E-02 1.1970E-02 8.7250E-03 4.8260E-03 7.6420E-03

5.2970E-03 2.2870E-03 6.6210E-03 2.1890E-02 1.4660E-02 4.0970E-03 4.6800E-02

6.6110E-02 2.4020E-02 4.5270E-03 6.7400E-02 7.1300E-02 4.5250E-02 1.0600E-02

2.0260E-01 2.5870E-01 1.5150E-01 2.9820E-02 5.7160E-02 6.3250E-02 1.4330E-02

8.2640E-04 3.3170E-02 2.0620E-02 1.1050E-02 6.9930E-03 5.6190E-02 2.3260E-02

2.4400E-02 2.1290E-02 1.1390E-01 1.3840E-01 5.8650E-02 1.7280E-02 6.4210E-02

4.2490E-02 3.0820E-02 1.3150E-02 7.9110E-02 3.3370E-02 4.6800E-02 2.2720E-02

1.3300E-01 1.7580E-01 8.3920E-02 2.0340E-02 3.8460E-02 3.9600E-02 1.3760E-02

5.1610E-02 2.7130E-02 1.7790E-02 1.4440E-02 8.7090E-02 9.1840E-02 4.1800E-02

6.4030E-03 2.3220E-02 1.8590E-02 7.1480E-03 4.0710E-03 4.5300E-02 3.4440E-02

2.7590E-02 8.6710E-03 3.5130E-02 3.1250E-02 1.2320E-02 9.8710E-03 4.2750E-02

2.4260E-02 1.7670E-02 5.2770E-03 4.9560E-02 1.8510E-02 2.7540E-02 1.1400E-02

4.1680E+00 7.6030E-01 4.0470E-02 1.3020E+00 3.8250E+00 1.3160E+00 2.9660E-01

5.3550E-01 3.1480E-01 1.4670E-01 2.7290E-01 1.3880E+00 1.2660E+00 1.7340E-01

3.0540E-01 5.6980E-01 1.5360E-01 1.0640E-02 1.0120E-02 8.7250E-03 6.7700E-03

5.9450E-03 4.3760E-03 2.1070E-03 5.2970E-03 1.2120E-02 1.4400E-02 6.2770E-03

1.3110E-02 4.3030E-02 4.0810E-02 1.5050E-02 2.1830E-02 6.2620E-02 5.1320E-02

3.0420E-02 5.6280E-02 1.8240E-01 1.7660E-01 9.8830E-02 1.9990E-02 4.9550E-02

3.1660E-02 7.3310E-03 2.0190E-02 1.6010E-02 1.4460E-02 7.0690E-03 3.6670E-02

2.1460E-02 1.9890E-02 2.2600E-02 4.1200E-02 9.3220E-02 8.8100E-02 4.1820E-02

3.0760E-02 3.7560E-02 3.0220E-02 2.2360E-02 4.0350E-02 3.9060E-02 2.8580E-02

3.7470E-02 4.0500E-02 1.1780E-01 1.1540E-01 5.6780E-02 3.9570E-02 2.8140E-02

6.5680E-03 3.5270E-02 2.0380E-02 2.0800E-02 1.2380E-02 3.1250E-02 7.1110E-02

5.4850E-02 2.5160E-02 1.2740E-02 1.4240E-02 1.0970E-02 4.3380E-03 1.8770E-02

3.0580E-02 2.4120E-02 1.9340E-02 2.8100E-02 1.9690E-02 1.2230E-02 1.0870E-02

2.2400E-02 2.3120E-02 1.6220E-02 1.0280E-02 2.6350E-02 2.3070E-02 1.6130E-02

2.0050E-02 3.1080E+00 5.8340E-01 3.5780E-01 2.2140E+00 2.2800E+00 9.7110E-02

3.4930E-01 3.0530E-01 2.1420E-01 4.6830E-02 4.7380E-01 1.1860E+00 6.1140E-01

1.1510E-01 3.8420E-01 2.7230E-01 4.5140E-03 7.8740E-03 7.7530E-03 6.3740E-03

4.2290E-03 3.2260E-03 1.7280E-03 3.9720E-03 6.5110E-03 1.1310E-02 7.5750E-03

3.1470E-03 1.8790E-02 3.5220E-02 2.7240E-02 5.0680E-03 2.9280E-02 4.1820E-02

4.5640E-02 9.3960E-03 8.6670E-02 1.4040E-01 1.4910E-01 5.8670E-03 2.6520E-02

3.2860E-02 1.6150E-02 1.0660E-02 1.3400E-02 1.3290E-02 6.0760E-03 1.8770E-02

2.1840E-02 1.7860E-02 1.5640E-02 1.1800E-02 4.6170E-02 7.6550E-02 6.2210E-02

1.2640E-02 2.7400E-02 2.6430E-02 2.4090E-02 1.5560E-02 3.5220E-02 2.4470E-02

3.3830E-02 9.6610E-03 5.4250E-02 9.5720E-02 8.8400E-02 3.6210E-02 1.5300E-02

4.6500E-03 2.0550E-02 1.9490E-02 1.8140E-02 8.4480E-03 8.2850E-03 3.8950E-02

4.9250E-02 3.9070E-02 6.6420E-03 9.7020E-03 1.0440E-02 4.9230E-03 6.1840E-03

2.0360E-02 2.0340E-02 2.2720E-02 2.1070E-02 1.0790E-02 1.2940E-02 8.4360E-03

1.0060E-02 1.8700E-02 1.4770E-02 1.0490E-02 1.0870E-02 2.2020E-02 1.3680E-02

1.7630E-02 2.0320E+00 8.5800E-02 8.1540E-01 2.3410E+00 2.4500E-02 1.6250E-01

2.6540E-01 1.9140E-01 7.1030E-03 9.6390E-02 5.7110E-01 8.6910E-01 3.7500E-02

1.9540E-01 2.8150E-01 2.0850E-03 5.3580E-03 5.9320E-03 4.2690E-03 2.8480E-03

2.2180E-03 1.2700E-03 2.6480E-03 3.1830E-03 6.7220E-03 6.5280E-03 6.2070E-04

5.4870E-03 1.9370E-02 3.0530E-02 6.2280E-04 1.0080E-02 2.9730E-02 4.3310E-02

3.7860E-05 2.3970E-02 8.5370E-02 1.4760E-01 1.3450E-03 1.0460E-02 2.3090E-02

1.9380E-02 4.8120E-03 1.0050E-02 8.7290E-03 4.8970E-03 7.1630E-03 1.9170E-02

1.5310E-02 7.7590E-03 2.9720E-03 1.7150E-02 4.5580E-02 6.4060E-02 4.0440E-03

1.6240E-02 2.1570E-02 1.9000E-02 4.1050E-03 2.1320E-02 2.6340E-02 2.0970E-02

1.4510E-03 1.7740E-02 6.4290E-02 9.0650E-02 2.7590E-02 6.1470E-03 3.7940E-03

9.8780E-03 1.7470E-02 1.1760E-02 5.3160E-03 2.1890E-03 1.5250E-02 3.4090E-02

3.9320E-02 3.2500E-03 6.2430E-03 7.0100E-03 4.7730E-03 2.2620E-03 9.4460E-03

1.6700E-02 1.8710E-02 1.4050E-02 4.9790E-03 1.1210E-02 5.2020E-03 3.7190E-03

1.2070E-02 1.2730E-02 7.4740E-03 3.2760E-03 1.4220E-02 1.5290E-02 1.0030E-02

2.5830E-02 1.3950E-01 1.4590E+00 4.3760E-03 4.9050E-02 1.5980E-01 1.0870E-01

1.0140E-03 1.4170E-02 1.2360E-01 6.3250E-01 9.9950E-03 7.1470E-02 1.7570E-01

6.3320E-04 2.2820E-03 3.2460E-03 2.3630E-03 1.3890E-03 1.0270E-03 6.7490E-04

1.3240E-03 1.2170E-03 3.5860E-03 2.3100E-03 9.9040E-05 1.1430E-03 6.5340E-03

1.9950E-02 7.4020E-06 1.5120E-03 1.3270E-02 2.4090E-02 4.1410E-06 7.5520E-05

3.7330E-02 9.0920E-02 2.3730E-04 2.8360E-03 1.0950E-02 1.3140E-02 1.6640E-03

5.5790E-03 3.6420E-03 2.8110E-03 1.7650E-03 1.1100E-02 9.2620E-03 2.5610E-03

4.7580E-04 5.8330E-03 1.8250E-02 4.0720E-02 7.5640E-04 6.9420E-03 1.2320E-02

9.8680E-03 4.8940E-04 8.3700E-03 1.8710E-02 8.9280E-03 1.5370E-05 3.5300E-03

2.1900E-02 5.7180E-02 1.4930E-02 1.4980E-03 2.3120E-03 3.5660E-03 1.0670E-02

5.3200E-03 2.6530E-03 5.5140E-04 3.3330E-03 1.6750E-02 2.4430E-02 1.2130E-03

3.1670E-03 3.2160E-03 3.4350E-03 2.5070E-04 2.7170E-03 9.9530E-03 1.0250E-02

7.0250E-03 1.7620E-03 6.5650E-03 2.3680E-03 1.0310E-03 5.6050E-03 7.7330E-03

3.6310E-03 5.9360E-04 6.0430E-03 1.1090E-02 3.6720E-03 1.0250E+00 2.4220E-01

6.3410E-01 2.8390E-01 9.4020E-02 1.7810E-02 1.8870E+00 6.2730E-01 1.6600E-01

4.0820E-02 1.9340E+00 8.7280E-02 2.5430E-02 2.1540E-02 1.4390E-02 7.6280E-03

3.0430E-03 1.1860E-02 1.0390E-02 5.2260E-03 3.7800E-02 7.4580E-02 5.3070E-02

2.7030E-02 1.8070E-01 9.9390E-02 4.6150E-02 1.4340E-02 2.3480E-01 9.6840E-02

3.1570E-02 6.4930E-03 1.3350E-03 1.3220E-03 9.2380E-04 3.8410E-04 2.1260E-02

9.2030E-03 3.3870E-03 8.6850E-04 7.6450E-02 2.2260E-02 5.8300E-03 1.3760E-03

3.8660E-02 3.4940E-02 3.1440E-02 2.4450E-02 8.2310E-02 7.5510E-02 4.5940E-02

1.7160E-02 1.3380E-01 5.8830E-02 2.8000E-02 1.0640E-02 7.9730E-02 5.8230E-02

3.2100E-02 1.1370E-02 7.5530E-03 3.5340E-03 1.4500E-03 3.6230E-04 6.1620E-02

2.9110E-02 1.1430E-02 1.2600E-01 7.3540E-02 2.7510E-02 4.9770E-03 4.0560E-02

4.3530E-02 4.5610E-02 3.9080E-02 1.5920E-02 6.1700E-03 2.2260E-03 7.1960E-04

1.2210E-02 9.2590E-03 5.6560E-03 4.0290E-03 2.2660E-02 2.9850E-02 3.1670E-02

1.9830E-02 4.0350E-02 4.7640E-02 3.9650E-02 2.2010E-02 6.3340E-02 5.2930E-02

3.3450E-02 1.6630E-02 8.2890E-01 2.4490E-01 2.3180E-01 1.8710E-01 1.0510E-01

2.5710E-01 9.4380E-01 6.3190E-01 2.0610E-01 3.1450E-01 1.1690E+00 5.0940E-02

1.2420E-02 7.4790E-03 7.6800E-03 7.4310E-03 1.1240E-02 5.5820E-03 3.7870E-03

2.8350E-02 5.8860E-02 3.8940E-02 1.8580E-02 6.5060E-02 6.8870E-02 6.5470E-02

5.6080E-02 2.8450E-02 1.1060E-01 9.4030E-02 4.4260E-02 1.1400E-03 2.9710E-04

6.8290E-04 1.0130E-03 7.9080E-03 6.9170E-03 6.4470E-03 3.0720E-03 1.5240E-02

3.8930E-02 2.0570E-02 5.8030E-03 3.4330E-02 3.2490E-02 2.0590E-02 9.5370E-03

7.1240E-02 1.4640E-02 2.8020E-02 5.1790E-02 3.7090E-02 8.3570E-02 4.7610E-02

2.1850E-02 4.8510E-02 2.3500E-02 2.8020E-02 3.7120E-02 1.4730E-03 3.5390E-03

3.0620E-03 1.7350E-03 3.8830E-02 2.7630E-02 1.4050E-02 6.9350E-02 2.9580E-02

4.0480E-02 3.1350E-02 4.4730E-02 4.7870E-02 2.6590E-02 7.5030E-03 5.0160E-03

7.3940E-03 4.5910E-03 1.7800E-03 7.8980E-03 4.2710E-03 4.6680E-03 5.5200E-03

1.7000E-02 3.3510E-02 1.9610E-02 7.8890E-03 5.1150E-02 3.2070E-02 1.9520E-02

9.4670E-03 5.0470E-02 2.2820E-02 2.4840E-02 2.6770E-02 4.7280E-02 1.7720E-01

1.8010E-01 1.0750E-01 4.2410E-02 1.7840E-01 5.1110E-01 6.2550E-01 5.3990E-02

2.7820E-01 6.9110E-01 3.4810E-03 8.1620E-03 6.5830E-03 4.5810E-03 7.8040E-03

4.6400E-03 1.2120E-03 1.8900E-02 3.9850E-02 2.4500E-02 1.1520E-02 9.2130E-03

4.4210E-02 5.8880E-02 5.7630E-02 1.3860E-03 1.9460E-02 6.3520E-02 1.0050E-01

2.4300E-04 7.4950E-04 6.9320E-04 2.9700E-04 2.1470E-03 5.4090E-03 6.0640E-03

3.0770E-03 3.3260E-03 1.0560E-02 2.1430E-02 1.7180E-02 3.1110E-02 1.5680E-02

1.0290E-02 7.4990E-03 1.2140E-02 4.7930E-02 3.6500E-02 1.3890E-02 1.3090E-02

2.2920E-02 3.7760E-02 4.0020E-02 7.8240E-03 3.2740E-02 3.0590E-02 1.9550E-02

1.5380E-04 9.1240E-04 2.1640E-03 3.0510E-03 1.8420E-02 2.1780E-02 1.2770E-02

1.3480E-02 5.0230E-02 3.6440E-02 1.5880E-02 5.0220E-02 1.7310E-02 9.1230E-03

9.0750E-03 1.5960E-03 3.3380E-03 4.4520E-03 3.1350E-03 2.2610E-03 5.1040E-03

4.5820E-03 2.9760E-03 1.1330E-02 2.8160E-02 9.7260E-03 2.7980E-03 4.3290E-02

2.1330E-02 8.1760E-03 2.1420E-03 1.9870E-02 3.1320E-02 2.1910E-02 1.0130E-02

1.7320E+00 3.3510E-01 4.5530E-02 6.3840E+00 2.2940E+00 4.7690E-01 7.5470E-02

2.0840E+00 9.3020E-01 3.7940E-02 2.0810E-01 1.6520E-01 6.0640E-02 2.0880E-02

5.2900E-02 1.9010E-02 6.9830E-03 5.3070E-02 1.0350E-01 3.5960E-02 4.8460E-03

1.5920E-01 6.7120E-02 2.5180E-02 6.4830E-03 6.2660E-02 3.3030E-02 1.4020E-02

3.7490E-03 5.5620E-02 2.0750E-02 6.2340E-03 1.8600E-03 2.6520E-01 7.6510E-02

1.4780E-02 1.5940E-03 1.8580E-01 4.7760E-02 1.8830E-02 8.0690E-03 1.8490E-01

6.1710E-02 1.8370E-02 4.4850E-03 9.1970E-02 3.4050E-02 1.0340E-02 2.6630E-03

1.6960E-01 6.1780E-02 1.9640E-02 5.6700E-03 6.5700E-02 2.6710E-02 8.1240E-03

1.6830E-03 3.3710E-02 1.5160E-02 5.1740E-03 1.1060E-03 5.7800E-02 2.6070E-02

2.4270E-03 5.7860E-02 2.6920E-02 1.2730E-02 4.6980E-03 4.2300E-02 1.5930E-02

5.8650E-03 1.7990E-03 3.0080E-02 1.9450E-02 9.1840E-03 2.3510E-03 1.5660E-02

7.5990E-03 2.3590E-03 9.2410E-04 1.3530E-02 8.3690E-03 4.3910E-03 1.4390E-03

1.1800E-02 5.6910E-03 3.5230E-03 1.5000E-03 1.4720E-02 6.1760E-03 2.0280E-03

4.5740E-04 1.4390E+00 3.5460E-01 1.7120E+00 2.4880E+00 2.2060E+00 5.6780E-01

1.1940E+00 4.4980E-01 6.5010E-01 9.1200E-02 4.8130E-02 3.5250E-02 5.7230E-02

2.7220E-02 2.4170E-02 8.5330E-03 3.9740E-02 5.1140E-02 3.3510E-02 2.3490E-02

4.7370E-02 7.1850E-02 5.0340E-02 2.8120E-02 2.2640E-02 2.3980E-02 2.2590E-02

1.5490E-02 8.2130E-03 2.7940E-02 2.0350E-02 7.5550E-03 7.5530E-02 1.0980E-01

6.1930E-02 1.6380E-02 4.7420E-02 1.0230E-01 3.3440E-02 9.6830E-03 4.4540E-02

8.7650E-02 5.1130E-02 1.9560E-02 1.9470E-02 4.9680E-02 2.8570E-02 1.1800E-02

4.5610E-02 8.0870E-02 4.8950E-02 2.0010E-02 1.5470E-02 2.9230E-02 2.2630E-02

9.6760E-03 9.1060E-03 1.3660E-02 1.2790E-02 5.9510E-03 3.4530E-02 1.2110E-02

1.8040E-02 2.6900E-02 2.9820E-02 1.4460E-02 8.5470E-03 1.2310E-02 1.9520E-02

1.2320E-02 6.5510E-03 1.9450E-02 1.0750E-02 7.9790E-03 6.8640E-03 5.3380E-03

6.2990E-03 5.8690E-03 2.8950E-03 1.0150E-02 5.3400E-03 3.1280E-03 2.1810E-03

5.6890E-03 5.3820E-03 3.4830E-03 1.8580E-03 4.9040E-03 5.8910E-03 4.5300E-03

2.2210E-03 9.3790E-01 1.1540E-01 1.7540E+00 1.1020E+00 1.6950E+00 4.3970E-01

6.6410E-01 4.3170E-01 3.0600E-02 8.1420E-02 3.0640E-02 2.3100E-02 1.2970E-02

1.5850E-02 9.6270E-03 2.6470E-02 2.0410E-02 3.1320E-02 2.0980E-02 1.0570E-02

3.0330E-02 4.8780E-02 4.0940E-02 4.7740E-03 1.5020E-02 1.6900E-02 1.9790E-02

6.1450E-04 7.2490E-03 1.7630E-02 1.6410E-02 1.4450E-02 6.1700E-02 5.9570E-02

3.9880E-02 1.8720E-02 3.6160E-02 5.5530E-02 1.8460E-02 9.4750E-03 3.4810E-02

5.3250E-02 3.8490E-02 3.0720E-03 1.5190E-02 3.0110E-02 2.2740E-02 1.0750E-02

3.4660E-02 4.8650E-02 3.6420E-02 2.2380E-03 1.2380E-02 1.6640E-02 1.8440E-02

5.8540E-04 7.8890E-03 7.5840E-03 1.0750E-02 1.3620E-02 1.8160E-02 1.1770E-02

1.2720E-02 1.4450E-02 1.7220E-02 6.7200E-03 3.5720E-03 8.2340E-03 1.1480E-02

8.5370E-03 9.1840E-03 7.9770E-03 9.5410E-03 3.3590E-03 1.1460E-03 4.1230E-03

3.6070E-03 4.5550E-03 6.7660E-03 2.8650E-03 2.6710E-03 1.5650E-03 3.5220E-03

3.4810E-03 2.7650E-03 1.7220E-03 1.0980E-03 3.5530E-03 3.6330E-03 3.4160E-03

2.7650E-02 9.4630E-02 1.2110E+00 1.0010E+00 7.9570E-02 5.3190E-01 1.6160E-01

1.0640E-02 2.2420E-02 1.5900E-02 1.5490E-02 5.3770E-03 7.0670E-03 6.9070E-03

1.3230E-02 5.3560E-03 1.8990E-02 1.0110E-02 8.8830E-04 1.0830E-02 2.0790E-02

3.2340E-02 7.0580E-05 5.0770E-03 1.0850E-02 1.2160E-02 9.5530E-05 1.0610E-03

5.1360E-03 1.6220E-02 1.5940E-03 1.6130E-02 3.9780E-02 3.0010E-02 8.0690E-03

9.5460E-03 1.8540E-02 2.7330E-02 1.8130E-03 8.3710E-03 2.3040E-02 3.3630E-02

6.2780E-04 2.6160E-03 1.0280E-02 2.2520E-02 2.4440E-03 9.1540E-03 2.2870E-02

3.0990E-02 1.9410E-04 2.2840E-03 8.2930E-03 1.3250E-02 7.8340E-05 5.4420E-04

5.5100E-03 7.1590E-03 3.0610E-03 1.4430E-02 3.8590E-03 4.6980E-03 8.5420E-03

6.7160E-03 6.3130E-03 7.7260E-04 3.0530E-03 5.8250E-03 7.4610E-03 2.3520E-03

6.8640E-03 3.3590E-03 2.0630E-03 3.5430E-04 9.0160E-04 2.7660E-03 3.0160E-03

3.3830E-03 1.1730E-03 1.6440E-03 7.3230E-04 1.5000E-03 1.8570E-03 1.7220E-03

1.0660E-03 1.2710E-04 1.0920E-03 2.3510E-03 2.2680E-03 2.3260E+00 2.8120E-01

3.2380E-02 7.7380E+00 2.6850E-01 1.2510E-01 2.5040E-01 1.1760E-01 3.8470E-02

1.6780E-02 3.6800E-02 1.7610E-02 4.1690E-03 3.4390E-03 3.0780E-02 6.3410E-03

1.4780E-03 8.7340E-02 3.5030E-02 1.1920E-02 2.1990E-03 5.6490E-02 2.4790E-02

1.0560E-02 2.5860E-03 7.0990E-02 2.9250E-02 9.8190E-03 1.7220E-03 1.4330E-01

4.3600E-02 6.0730E-03 9.1280E-04 1.3830E-01 4.9510E-02 1.0570E-02 1.7420E-03

4.2220E-02 1.7920E-02 7.3780E-03 2.1190E-03 8.0450E-02 3.2260E-02 1.1150E-02

1.7590E-03 1.9070E-01 5.1160E-02 1.3400E-02 1.9960E-03 8.7270E-02 2.5150E-02

6.6960E-03 1.3460E-03 1.7850E-01 5.4670E-02 1.5120E-02 2.8870E-03 8.8800E-02

2.2580E-02 1.3000E-02 3.7940E-02 1.9990E-02 7.5120E-03 1.5640E-03 5.5990E-02

1.9870E-02 6.3930E-03 1.7670E-03 1.6960E-02 6.9140E-03 2.1570E-03 4.1880E-04

2.2060E-02 1.1110E-02 3.4880E-03 9.5620E-04 1.6240E-02 1.7910E-02 6.1680E-03

2.1960E-03 2.0150E-02 9.7490E-03 3.3910E-03 6.2370E-04 2.5960E-02 1.2560E-02

5.3720E-03 1.9960E-03 2.4590E+00 3.2490E-01 2.6480E+00 3.7110E+00 1.1410E-01

7.3940E-02 1.7820E-01 1.0720E-01 3.1720E-02 2.4640E-02 1.2770E-02 9.6080E-03

2.7510E-03 1.4370E-02 1.3470E-02 3.3110E-03 3.1750E-02 4.0870E-02 2.5790E-02

1.3130E-02 1.9700E-02 2.8400E-02 1.6300E-02 1.1440E-02 2.0730E-02 3.4240E-02

2.3860E-02 1.1210E-02 5.5330E-02 5.1400E-02 3.9780E-02 5.3790E-03 6.0100E-02

5.3910E-02 3.6480E-02 9.8970E-03 1.7910E-02 1.9480E-02 1.1000E-02 6.7500E-03

2.7300E-02 3.6320E-02 2.6750E-02 1.1630E-02 5.1050E-02 1.0110E-01 3.9420E-02

1.4690E-02 1.9860E-02 4.8400E-02 2.1640E-02 7.3800E-03 3.8090E-02 8.5090E-02

4.9010E-02 1.6950E-02 4.4000E-02 4.7880E-02 7.8690E-03 2.2610E-02 1.4340E-02

1.0220E-02 6.4550E-03 1.9870E-02 2.6530E-02 1.5120E-02 6.0860E-03 8.2590E-03

6.5030E-03 4.0760E-03 1.9210E-03 9.7070E-03 8.9720E-03 8.2790E-03 3.6950E-03

1.2990E-02 1.0030E-02 8.0580E-03 2.7920E-03 1.1210E-02 7.4750E-03 5.2440E-03

3.0070E-03 1.2540E-02 1.0320E-02 6.6880E-03 5.0900E-03 1.9040E+00 7.6090E-01

2.6540E+00 1.4580E+00 3.4750E-02 5.8260E-02 1.3780E-01 8.0190E-02 1.4120E-02

1.2980E-02 8.2390E-03 2.0630E-03 6.3950E-03 1.0580E-02 6.2690E-03 8.2010E-03

2.0510E-02 2.9310E-02 2.2600E-02 6.9810E-03 1.1810E-02 2.2740E-02 1.5550E-02

4.0630E-03 1.6370E-02 2.4780E-02 2.1870E-02 1.5100E-02 4.8810E-02 2.5140E-02

2.6960E-02 1.9990E-02 4.5030E-02 3.1270E-02 2.3830E-02 7.3760E-03 1.0980E-02

1.4550E-02 8.9580E-03 7.8250E-03 2.2360E-02 2.3850E-02 2.2250E-02 1.3380E-02

3.9320E-02 7.0200E-02 3.1570E-02 4.4710E-03 1.6190E-02 3.3980E-02 1.8110E-02

7.0970E-03 3.3190E-02 6.0130E-02 4.2530E-02 2.5580E-02 3.2760E-02 1.6440E-02

1.0570E-02 1.1850E-02 1.1320E-02 5.9360E-03 6.3920E-03 1.5120E-02 1.7400E-02

1.1620E-02 3.3780E-03 5.0100E-03 4.5930E-03 2.5230E-03 2.5300E-03 7.1350E-03

6.2810E-03 7.1720E-03 9.7440E-03 5.7630E-03 6.4150E-03 3.6470E-03 5.0540E-03

6.6260E-03 5.6220E-03 3.1670E-03 5.3700E-03 6.6830E-03 7.7720E-03 5.1270E-03

2.1210E-01 9.3530E-01 2.0780E+00 1.5980E-02 3.0430E-02 5.2570E-02 2.9720E-02

6.7060E-03 1.1340E-02 5.1410E-03 1.3750E-03 2.5240E-03 5.9500E-03 6.9060E-03

1.0930E-03 8.8890E-03 1.8320E-02 2.5840E-02 8.6180E-04 7.4550E-03 1.0840E-02

1.8830E-02 1.9040E-04 4.6110E-03 1.4170E-02 2.5840E-02 2.9770E-03 1.7150E-02

3.7180E-02 2.0130E-02 5.0250E-03 2.1200E-02 3.3570E-02 2.0390E-02 2.1190E-03

6.7480E-03 8.5710E-03 9.5800E-03 9.2720E-04 7.7410E-03 1.8440E-02 2.4110E-02

1.9960E-03 1.4680E-02 3.1530E-02 5.3780E-02 7.9110E-04 4.7550E-03 1.3190E-02

2.9490E-02 1.0490E-03 7.5750E-03 2.7050E-02 6.0520E-02 1.5300E-02 1.3340E-02

2.0720E-02 3.6160E-03 1.0090E-02 8.1870E-03 4.6040E-03 1.7680E-03 6.0860E-03

1.1620E-02 1.4030E-02 1.0260E-03 3.3450E-03 3.6180E-03 2.1660E-03 5.6140E-04

2.5880E-03 5.9450E-03 5.7790E-03 6.4960E-03 3.0340E-03 3.9070E-03 3.5100E-03

1.6070E-03 4.9050E-03 4.6890E-03 2.5230E-03 1.9960E-03 5.0890E-03 5.1240E-03

4.8840E-03 3.0560E-01 8.0310E-02 5.2350E-02 3.0820E-02 1.6950E-02 8.8580E-03

1.5150E-01 7.3710E-02 8.7660E-03 1.4480E-02 2.7960E-02 1.2710E-02 6.3100E-03

2.2550E-02 1.3460E-02 7.0900E-03 2.8430E-03 1.2000E-02 6.9640E-03 4.4450E-03

1.5650E-03 5.3000E-03 3.5190E-03 2.0670E-03 5.1560E-04 3.6140E-02 1.7920E-02

7.9070E-03 2.6360E-03 6.4860E-02 4.1200E-02 1.7140E-02 3.5320E-03 1.9510E-02

1.6220E-02 1.0950E-02 7.0210E-03 3.4580E-02 2.3260E-02 1.3180E-02 5.6390E-03

1.0820E-01 4.2020E-02 1.4390E-02 4.7980E-03 2.8740E-02 1.9250E-02 1.1330E-02

6.7190E-03 8.0670E-03 3.9610E-03 1.7810E-03 5.6650E-04 1.2400E-01 2.4500E-02

7.2420E-03 8.4930E-02 3.3140E-02 1.1730E-02 3.6710E-03 8.6550E-02 4.2830E-02

2.1630E-02 1.1060E-02 3.6910E-02 1.7690E-02 6.7730E-03 1.4080E-03 8.2610E-03

6.1820E-03 3.8760E-03 2.0140E-03 2.7410E-02 2.1970E-02 1.1800E-02 6.8040E-03

1.2630E-02 1.0590E-02 7.2790E-03 3.3760E-03 1.3160E-02 8.7990E-03 5.1780E-03

2.6290E-03 1.8530E-01 1.9540E-02 2.1900E-02 1.8670E-02 1.2680E-02 7.2370E-02

2.6120E-02 5.7030E-02 9.6450E-03 1.2680E-02 1.2500E-02 5.0190E-03 7.7550E-03

1.1640E-02 8.0920E-03 7.7860E-03 2.7650E-03 4.4590E-03 4.5950E-03 4.0150E-03

1.7320E-03 6.2980E-04 2.0370E-03 2.2290E-03 1.2430E-02 1.2960E-02 1.0890E-02

6.2220E-03 3.4050E-02 1.1490E-02 2.0690E-02 1.7700E-02 1.2440E-02 1.0420E-02

7.9060E-03 4.7950E-03 1.5410E-02 9.7310E-03 1.1680E-02 1.4180E-02 9.5220E-03

5.0450E-02 3.7720E-02 1.5610E-02 1.2080E-02 1.1430E-02 1.0890E-02 9.8480E-03

8.5740E-04 3.3450E-03 3.2010E-03 2.1130E-03 2.4500E-02 6.3730E-02 1.5170E-02

1.7620E-02 3.7090E-02 2.4500E-02 9.8430E-03 1.9820E-02 4.2930E-02 3.1610E-02

1.4940E-02 1.3230E-02 7.5160E-03 1.1410E-02 7.3750E-03 4.4850E-03 2.6000E-03

2.9620E-03 3.4960E-03 1.8270E-02 1.1800E-02 1.4450E-02 2.8680E-03 9.8180E-03

6.1650E-03 4.3580E-03 2.4200E-03 5.8780E-03 4.8900E-03 4.6410E-03 4.7380E-03

6.2120E-03 9.5930E-03 1.1000E-02 9.7450E-03 8.7430E-03 5.6460E-02 1.2180E-02

4.8270E-03 6.2740E-03 5.0180E-03 4.3620E-03 6.6950E-04 4.2210E-03 5.3260E-03

7.4930E-03 9.5640E-05 1.6480E-03 2.7590E-03 3.2070E-03 1.2060E-04 9.9900E-04

1.3740E-03 1.3630E-03 2.8420E-03 7.7880E-03 7.2370E-03 4.4650E-03 2.1400E-03

2.2330E-02 1.3090E-02 3.5450E-03 6.1780E-03 4.9710E-03 3.8570E-03 2.4040E-03

1.1630E-03 9.1840E-03 9.0650E-03 5.7780E-03 2.7670E-03 4.8810E-03 2.1070E-02

2.7150E-02 3.0690E-03 6.1030E-03 6.7670E-03 5.7130E-03 5.9840E-05 4.9700E-04

1.6200E-03 2.4930E-03 7.2390E-03 1.5170E-02 2.8610E-02 4.1570E-03 9.9820E-03

1.7090E-02 1.2900E-02 8.4810E-03 8.4940E-03 1.6870E-02 2.0380E-02 9.7060E-04

8.9730E-03 6.2640E-03 2.5420E-03 7.6070E-04 2.5050E-03 2.1920E-03 1.2640E-03

9.1370E-03 6.7990E-03 2.8670E-03 4.1050E-03 4.3720E-03 3.7360E-03 2.0300E-03

1.0990E-03 1.7300E-03 3.1050E-03 2.7960E-03 1.9310E-03 4.1850E+00 4.2790E-01

1.1950E-01 1.8040E+00 2.5940E-01 5.6710E-02 2.0330E-02 2.9160E-02 1.1830E-02

2.3160E-03 1.4260E+00 1.4780E-01 1.8820E-02 2.7460E-03 1.1620E-01 3.2740E-02

9.1100E-03 1.2980E-03 1.2580E-01 4.1660E-02 1.3180E-02 1.2780E-03 1.5930E-01

3.0200E-02 1.0340E-02 3.4950E-03 3.0200E-01 3.8970E-02 1.2220E-02 3.0000E-03

4.2710E-01 7.3260E-02 1.2680E-02 2.7440E-03 4.1920E-01 6.6340E-02 1.4340E-02

2.5060E-03 9.2310E-01 1.2330E-01 1.4360E-02 2.9400E-03 1.2320E+00 1.7190E-01

2.9040E-02 5.0630E-03 1.0840E-01 4.4240E-02 1.2860E-02 2.3250E-03 3.0450E-02

9.2590E-03 1.4400E-03 4.5410E-02 1.3270E-02 4.1500E-03 1.2540E-03 1.2200E-01

3.1700E-02 1.2000E-02 3.3970E-03 1.5040E+01 3.6120E-01 4.9640E-02 2.4230E-02

3.0040E+01 3.6800E+00 3.2290E-01 5.2250E-02 5.7620E-02 5.2370E-02 2.5030E-02

3.1330E-03 5.8280E+00 1.7470E-01 8.9980E-03 4.2770E-03 1.7810E+01 2.2680E+00

1.0680E-01 1.5830E-02 4.6710E+00 4.1090E-01 7.6850E-01 7.8810E-01 1.3990E-01

1.6270E-02 1.8020E-02 1.0290E-02 5.8000E-03 4.8690E-02 1.0610E+00 1.6890E-01

2.1330E-02 2.1040E-02 6.1860E-02 3.0160E-02 1.0570E-02 4.0890E-02 6.5820E-02

5.3370E-02 1.5410E-02 3.7470E-02 8.4680E-02 1.8300E-02 6.0190E-03 6.5860E-02

1.7250E-01 2.5780E-02 9.9300E-03 6.9170E-02 2.5060E-01 6.9180E-02 1.3310E-02

3.6560E-02 2.3890E-01 6.8360E-02 1.7380E-02 1.2050E-01 5.8500E-01 1.3620E-01

1.5510E-02 6.2400E-02 9.0460E-01 1.8280E-01 3.3170E-02 3.3620E-02 5.1280E-02

3.7000E-02 1.4610E-02 1.6020E-02 1.1160E-02 5.2800E-03 1.7320E-02 2.4610E-02

1.0220E-02 2.8120E-03 3.1410E-02 6.6330E-02 2.3410E-02 1.1600E-02 2.7340E+00

9.8180E+00 3.2500E-01 2.7900E-02 1.0950E+00 2.1820E+01 4.3140E+00 3.7570E-01

4.6090E-02 3.4780E-02 1.5060E-02 1.8040E-02 8.6250E-01 3.7680E+00 1.6570E-01

6.5360E-03 2.2360E+00 1.1220E+01 2.6560E+00 1.3320E-01 3.5220E+00 2.9380E-01

6.1320E-01 3.5910E-01 1.2200E-02 9.5680E-03 9.9960E-03 6.0350E-03 8.9200E-03

4.4080E-02 7.9030E-01 1.3280E-01 4.0980E-03 1.7660E-02 4.5160E-02 2.5980E-02

1.5720E-03 3.3760E-02 4.6320E-02 4.5580E-02 1.3660E-02 2.8560E-02 5.7450E-02

1.1150E-02 1.9790E-02 5.7050E-02 1.1230E-01 1.6070E-02 1.2680E-02 6.2970E-02

1.7080E-01 4.9410E-02 8.2520E-03 3.3800E-02 1.9400E-01 5.6750E-02 1.3850E-02

1.3600E-01 4.6190E-01 1.0390E-01 1.3430E-02 7.0970E-02 7.0190E-01 1.4780E-01

6.6040E-03 2.8230E-02 3.5380E-02 3.2620E-02 7.7540E-03 1.0330E-02 7.0590E-03

6.6450E-03 1.2920E-02 1.6090E-02 6.1760E-03 1.1880E-02 2.3350E-02 4.8980E-02

1.8300E-02 2.4280E-01 2.8080E+00 6.2880E+00 2.1630E-01 1.0760E-01 1.3360E+00

1.5890E+01 3.3490E+00 3.4580E-02 1.8510E-02 1.7500E-02 1.6120E-02 8.3310E-02

1.0030E+00 2.3930E+00 1.1590E-01 9.2780E-02 2.6510E+00 7.4500E+00 2.0110E+00

1.0980E-01 3.0720E-01 4.2650E-01 8.1350E-03 4.2240E-03 7.5610E-03 4.8120E-03

1.3950E-03 9.6620E-03 3.3880E-02 6.0380E-01 1.7250E-04 4.6740E-03 1.4750E-02

4.4120E-02 8.0590E-05 1.8690E-03 2.6820E-02 4.9020E-02 6.2320E-03 1.1190E-02

2.1090E-02 3.2240E-02 6.2960E-03 1.9410E-02 4.3970E-02 6.9280E-02 2.7420E-03

1.3310E-02 5.2060E-02 1.3350E-01 1.1880E-03 9.1970E-03 2.6720E-02 1.8190E-01

2.8420E-03 1.5310E-02 1.0230E-01 3.1260E-01 2.6960E-03 1.5020E-02 5.6790E-02

5.5700E-01 6.2720E-04 7.3080E-03 2.3060E-02 3.6600E-02 2.8450E-03 7.5910E-03

6.0410E-03 2.4640E-03 5.7600E-03 9.3990E-03 8.0770E-03 3.3990E-03 1.1570E-02

1.8260E-02 3.2930E-02 4.4370E-02 2.8090E-01 2.1280E+00 3.8150E+00 2.9640E-02

1.1710E-01 1.0260E+00 1.2600E+01 2.3040E-02 7.5270E-03 2.2290E-02 6.9440E-03

8.4560E-03 1.0360E-01 7.6780E-01 1.6090E+00 1.1660E-02 1.3010E-01 2.0090E+00

5.9670E+00 1.4360E+00 1.7320E-01 8.1340E-01 7.6360E-01 3.4320E-01 1.0440E-02

3.2660E-02 1.7770E-02 8.9970E-03 4.5090E-03 1.0110E-02 5.4920E-03 2.9510E-03

9.4310E-04 1.7970E-02 8.2000E-03 3.7430E-03 1.5000E-03 6.1340E-02 4.1260E-02

3.0000E-02 1.6670E-02 5.4570E-01 1.3860E-01 2.4790E-02 5.0810E-03 3.5260E-02

1.8670E-02 1.1200E-02 5.2530E-03 2.2360E-02 1.3020E-02 7.6450E-03 4.3590E-03

2.6460E-02 1.6680E-02 8.6240E-03 3.7820E-03 3.0320E-02 1.5120E-02 6.9860E-03

3.1800E-03 2.6240E-02 1.6940E-02 7.5160E-03 3.4690E-03 8.1820E-01 3.5980E-01

1.0270E-02 5.2550E-01 1.4440E-01 3.2260E-02 5.2780E-03 6.5170E-02 4.8780E-02

2.8130E-02 1.2250E-02 1.1390E+01 2.7320E+00 5.1190E-01 4.3640E-02 2.9290E-01

1.3610E-01 6.6400E-02 3.3690E-02 6.5190E+00 8.8360E+00 3.8740E+00 7.6800E-02

9.5370E+00 2.3850E+00 3.2250E-01 1.6330E-02 6.0520E-02 2.4230E-02 9.4650E-03

3.5560E-03 1.1260E+00 5.3770E-01 3.3660E-01 1.0840E-01 2.9980E-01 7.1190E-03

1.3490E-02 1.2430E-02 8.6760E-03 1.8350E-03 4.3280E-03 4.0430E-03 3.1300E-03

2.3020E-03 7.0660E-03 7.2800E-03 4.7230E-03 3.4870E-02 3.9500E-02 2.0340E-02

5.6810E-03 1.7500E-02 2.8450E-01 1.4890E-01 2.7720E-02 1.3320E-02 1.2890E-02

1.2240E-02 9.3800E-03 6.8290E-03 1.0250E-02 8.8360E-03 5.8800E-03 1.0520E-02

1.0620E-02 9.0940E-03 7.7710E-03 5.5210E-03 1.2470E-02 1.1330E-02 8.1160E-03

6.6670E-03 1.0200E-02 1.0080E-02 9.7050E-03 3.5640E-01 1.1310E-01 3.2030E-01

3.0810E-02 2.6400E-01 1.4580E-01 3.3670E-02 3.8220E-02 2.0430E-02 2.1840E-02

2.5200E-02 2.0180E-01 5.5200E+00 2.9100E+00 5.5670E-01 4.7870E-02 1.2530E-01

1.0680E-01 6.1710E-02 4.3210E+00 3.8180E+00 1.3210E+00 3.4480E+00 1.6300E-01

4.5610E+00 2.4510E+00 4.8610E-01 8.0950E-03 2.6680E-02 2.0820E-02 9.6550E-03

2.6690E-01 1.0370E-02 2.9660E-01 6.1020E-02 1.3900E-03 3.7600E-03 6.9920E-03

8.1620E-03 8.3160E-05 1.1370E-03 2.2280E-03 3.1870E-03 2.7930E-05 1.1550E-03

3.2460E-03 5.8590E-03 2.3190E-02 9.0520E-03 1.0020E-02 6.5070E-03 6.4500E-03

7.9120E-03 1.1370E-01 1.1090E-01 3.2360E-03 7.3590E-03 7.7330E-03 5.7440E-03

2.2160E-03 3.3430E-03 4.6600E-03 5.4430E-03 1.3130E-03 5.8760E-03 5.8630E-03

4.9760E-03 1.0890E-03 3.0770E-03 6.2820E-03 8.0790E-03 7.0240E-04 3.8300E-03

6.6720E-03 6.7550E-03 1.0200E-02 3.1980E-01 6.5870E-02 5.1850E-03 1.8270E-02

1.1010E-01 1.0250E-01 5.7950E-03 2.1540E-02 1.6980E-02 7.2180E-03 4.9370E-02

1.1140E-01 2.2140E+00 2.1580E+00 1.8850E-02 2.3100E-02 5.7430E-02 8.1040E-02

2.1420E+00 7.6760E-02 3.3550E+00 7.6830E-01 8.3710E-03 1.1060E-01 1.8810E+00

2.0110E+00 1.9570E-03 4.4500E-03 1.1380E-02 1.7040E-02 1.2380E+00 8.2530E-01

4.1280E-01 6.1320E-02 5.1100E-02 4.0880E-02 3.0660E-02 3.0240E-04 2.5920E-04

2.1600E-04 1.7280E-04 1.4830E-03 1.2980E-03 1.1120E-03 9.2690E-04 3.5480E+00

2.6720E+00 1.7870E+00 8.9580E-01 1.0550E-01 7.9120E-02 5.2780E-02 2.6400E-02

4.3470E-03 3.4780E-03 2.6090E-03 1.7390E-03 1.9860E-02 1.6540E-02 1.3240E-02

9.9290E-03 1.9880E-02 1.5910E-02 1.1930E-02 7.9540E-03 1.7030E-02 1.4180E-02

1.1350E-02 8.5120E-03 2.6310E-04 2.2550E-04 1.8790E-04 1.5030E-04 3.2900E-02

2.1930E-02 1.0970E-02 2.8240E-02 2.1320E-02 1.4240E-02 7.1290E-03 1.6540E-02

1.3230E-02 9.9240E-03 6.6160E-03 6.4880E-02 4.8770E-02 3.2560E-02 1.6290E-02

7.4260E-03 6.1890E-03 4.9520E-03 3.7140E-03 1.9780E-02 1.5020E-02 9.9990E-03

5.0080E-03 4.1970E-02 3.3070E-02 2.2070E-02 1.1040E-02 3.0630E-03 2.4510E-03

1.8380E-03 1.2250E-03 2.2390E+00 1.1260E+00 3.2560E-02 2.2250E-02 1.2750E-02

5.6100E-03 7.0690E-02 2.2590E-02 8.4510E-03 2.3320E-03 1.1360E-03 9.5070E-04

6.1100E-04 3.3780E-04 6.0960E+00 4.0310E+00 1.6150E+00 3.0990E-01 8.1420E-02

4.7860E-02 2.1530E-02 6.8280E-03 1.0190E-01 7.2230E-02 5.7140E-02 3.9000E-02

5.5310E-02 4.1680E-02 2.7700E-02 1.5870E-02 3.7190E-02 2.1990E-02 1.2470E-02

6.3450E-03 2.4220E-02 1.1180E-02 4.4750E-03 1.4150E-03 1.9760E-02 6.4620E-03

2.5770E-03 1.2630E-03 3.2180E-02 3.2150E-02 2.0180E-02 5.6150E-02 3.2340E-02

1.5240E-02 4.9040E-03 6.2520E-02 3.1520E-02 1.5490E-02 6.5450E-03 7.3440E-02

4.6800E-02 2.2590E-02 8.4800E-03 6.9310E-03 8.1660E-03 3.5470E-03 1.3690E-03

1.9730E-02 3.3570E-02 3.4080E-02 2.1980E-02 6.2660E-02 4.6330E-02 2.1220E-02

5.3920E-03 4.5380E-02 1.6070E-02 5.9990E-03 2.1520E-03 7.4410E-01 1.4980E-02

3.9430E-03 9.4000E-03 1.3160E-02 2.7810E-03 3.0940E-02 3.0430E-02 1.1400E-02

6.3480E-04 3.1590E-04 4.0370E-04 6.4280E-04 3.3800E+00 8.5810E-01 1.9750E+00

1.8660E+00 3.7410E-02 2.2980E-02 2.5530E-02 1.7720E-02 5.7250E-02 6.1880E-02

4.0430E-02 1.8200E-02 3.0750E-02 2.0530E-02 2.0700E-02 2.2110E-02 1.4660E-02

1.4250E-02 1.2620E-02 9.4880E-03 3.0510E-03 9.9250E-03 8.9790E-03 5.5680E-03

1.1170E-03 5.8010E-03 5.5140E-03 3.3660E-03 3.2070E-02 1.8340E-02 5.9120E-03

2.4830E-02 1.8550E-02 1.7540E-02 1.1170E-02 1.6200E-02 2.2980E-02 2.1560E-02

1.4470E-02 4.0610E-02 2.1740E-02 2.3480E-02 1.6920E-02 3.2970E-03 2.0920E-03

2.4350E-03 4.5340E-03 1.3150E-02 3.4040E-02 2.0160E-02 5.5320E-03 4.0910E-02

8.6670E-03 2.0820E-02 1.9770E-02 4.8640E-03 1.7600E-02 1.3490E-02 6.3630E-03

8.7080E-04 8.8870E-03 8.4220E-03 2.4380E-03 9.8880E-05 1.6550E-03 1.0230E-02

2.3960E-02 5.9530E-05 3.5800E-04 3.6490E-04 1.8420E-04 1.5700E-01 2.3650E+00

1.2600E+00 2.6080E-01 7.1660E-03 2.2270E-02 1.6110E-02 5.8690E-03 3.3920E-02

1.8370E-02 1.9130E-02 1.6570E-02 7.7780E-03 1.6110E-02 1.4110E-02 9.1230E-03

4.2780E-03 7.4890E-03 8.0050E-03 6.0790E-03 2.5590E-04 1.8320E-03 4.8960E-03

6.7820E-03 7.7210E-05 6.6200E-04 2.6850E-03 4.4740E-03 2.0080E-02 5.9090E-03

2.4550E-03 5.4320E-03 1.4430E-02 1.1330E-02 5.3130E-03 3.6000E-03 9.9140E-03

1.1900E-02 1.1250E-02 9.2730E-03 2.3420E-02 1.4260E-02 5.0920E-03 3.8810E-04

1.9280E-03 2.3140E-03 1.1970E-03 6.5800E-03 2.1930E-02 5.5300E-03 2.3940E-03

6.1490E-03 2.6090E-02 1.2420E-02 1.5270E-03 1.1050E-03 2.4300E-03 8.8340E-03

1.0170E-02 1.4220E+00 5.6090E-02 7.4020E-03 2.4740E+00 9.8160E-01 1.0180E-01

7.0130E-03 4.8230E+00 1.0990E+00 1.6640E-01 1.1670E-02 6.0560E-02 1.3550E-02

3.0290E-03 7.1500E-04 2.3140E+00 2.2570E-01 6.6480E-03 8.5110E-04 2.2000E+00

4.3090E-01 4.5640E-02 2.2760E-03 9.5780E-01 3.1780E-01 4.0610E-02 1.9800E-03

4.2620E-01 1.4910E-01 3.9760E-02 6.6370E-03 6.8330E-01 1.8640E-01 4.6200E-02

7.6140E-03 2.7900E-01 1.3500E-01 1.8380E-02 1.7080E-03 3.7650E-02 7.4100E-03

1.7340E-04 1.8950E-01 2.2330E-02 1.6570E-03 9.7140E-05 2.1640E-01 4.2190E-02

3.3650E-03 3.8400E-04 2.5670E-01 3.0440E-02 8.0700E-03 6.7320E-04 8.4030E-02

2.7930E-02 5.4390E-03 6.6140E-04 2.1370E-02 1.1000E-02 5.8440E-03 4.2200E-04

7.3590E-02 7.7480E-03 1.7320E-03 1.4370E-04 1.1320E-01 3.1010E-02 8.2590E-03

1.7620E-03 1.0320E+01 6.6300E-02 7.4460E-01 3.6510E+00 1.1370E+00 1.2070E-01

9.3230E-01 4.7490E+00 2.1060E+00 1.9970E-01 2.1150E-02 2.7600E-02 8.4680E-03

2.4270E-03 6.1810E-01 1.2640E+00 2.3600E-01 4.7460E-03 5.6160E-01 1.1870E+00

4.4230E-01 5.3570E-02 3.1770E-01 8.8990E-01 3.3670E-01 4.7190E-02 1.4730E-01

2.1340E-01 9.6860E-02 3.3720E-02 1.8610E-01 3.6400E-01 1.6040E-01 5.0720E-02

1.1130E-01 3.2420E-01 1.4770E-01 2.1180E-02 1.8590E-02 1.4190E-02 4.6410E-03

5.2980E-02 1.0220E-01 2.0480E-02 1.7560E-03 5.5220E-02 1.1460E-01 4.5090E-02

3.7310E-03 6.5100E-02 1.4330E-01 1.8430E-02 7.6280E-03 2.7900E-02 8.6540E-02

2.9440E-02 6.0560E-03 1.7810E-02 8.8520E-03 1.9750E-03 3.4100E-03 2.0610E-02

4.4810E-02 5.2070E-03 1.7760E-03 3.8540E-02 5.6590E-02 2.5620E-02 8.5550E-03

1.6800E+00 4.5100E-02 8.5890E-01 2.7160E+00 9.0900E-01 1.4820E-02 1.1380E+00

6.2650E+00 1.6670E+00 7.1150E-03 1.8650E-02 1.7740E-02 5.7130E-03 1.1670E-01

6.4540E-01 7.6510E-01 1.6660E-01 9.4120E-02 5.7800E-01 7.6150E-01 3.4640E-01

4.0590E-02 3.3660E-01 6.2850E-01 2.7210E-01 4.6470E-02 1.1920E-01 1.5250E-01

7.8760E-02 4.6030E-02 1.6030E-01 2.7340E-01 1.4040E-01 8.0690E-03 1.2310E-01

2.0050E-01 1.2010E-01 7.8380E-03 1.3660E-02 8.0500E-03 1.1630E-02 5.6670E-02

6.3350E-02 1.4190E-02 8.6820E-03 5.8240E-02 7.3610E-02 3.4720E-02 2.0550E-02

5.5320E-02 9.7620E-02 1.2600E-02 5.4300E-03 2.9430E-02 6.2940E-02 2.2860E-02

1.4250E-02 4.7800E-03 3.6160E-03 3.2590E-03 5.6500E-03 1.8890E-02 3.3120E-02

3.5960E-03 1.0720E-02 3.1610E-02 3.9250E-02 2.0860E-02 2.1230E-03 5.1960E-02

6.7480E-01 2.6660E+00 4.7380E-04 1.8050E-02 8.8820E-01 5.9650E+00 2.3850E-03

7.3210E-03 1.4490E-02 1.2060E-02 1.6300E-02 1.5400E-01 5.1730E-01 5.9030E-01

9.0860E-03 1.1650E-01 4.6870E-01 7.4840E-01 1.9650E-03 4.7190E-02 2.7210E-01

6.6380E-01 1.1380E-02 4.9360E-02 1.0060E-01 1.3360E-01 7.5880E-03 5.0690E-02

1.4030E-01 2.6350E-01 8.2650E-04 9.0940E-03 9.7850E-02 2.5680E-01 2.4040E-03

9.8810E-03 9.8150E-03 1.7990E-03 1.4370E-02 4.4810E-02 4.7590E-02 9.1670E-04

1.0320E-02 4.6690E-02 7.3500E-02 4.9330E-03 2.3350E-02 4.4640E-02 6.5040E-02

6.6010E-04 6.0540E-03 2.2850E-02 6.0710E-02 1.0690E-02 2.3790E-03 4.6510E-03

1.0240E-03 1.1360E-03 6.3530E-03 1.5190E-02 1.8690E-02 3.1530E-03 1.1740E-02

2.6680E-02 3.5590E-02 2.4340E+00 2.3080E-01 1.0020E-02 5.7900E+00 8.9380E-01

1.3390E-01 7.4660E-03 3.3970E-02 8.1380E-03 2.5930E-03 3.9160E-05 6.4130E-02

1.8660E-02 2.2020E-04 6.4030E-06 1.9300E-01 3.1750E-02 2.5000E-03 7.1220E-05

7.9200E-01 2.7490E-01 2.0360E-02 2.2350E-04 1.2640E+00 1.6700E-01 2.7510E-02

2.7540E-03 3.2730E-01 2.4080E-01 2.8950E-02 3.7430E-03 1.0360E+00 4.0530E-01

5.7590E-02 3.4090E-03 1.1390E-02 6.3070E-04 2.4350E-05 6.0530E-02 1.2030E-02

3.4040E-03 3.2570E-05 2.2980E-01 1.3130E-02 1.5800E-03 2.1200E-04 3.3850E-02

1.0060E-02 2.9170E-04 3.5840E-05 2.0780E-01 5.8680E-02 4.5790E-03 3.1150E-04

2.3620E-04 1.8640E-02 2.8910E-03 2.0590E-05 4.3140E-02 1.0790E-02 3.2380E-03

1.8630E-05 3.9050E-01 3.4290E-02 3.3140E-03 5.3350E-05 4.5370E+00 2.7100E-01

6.5310E-01 5.4380E+00 1.6710E+00 2.3680E-01 1.4400E-02 1.7950E-02 3.8480E-03

2.9260E-03 3.7960E-02 2.4700E-02 1.8540E-02 2.3660E-04 4.8570E-02 9.7920E-02

3.3230E-02 2.9060E-03 3.4330E-01 1.1260E+00 3.2070E-01 2.3580E-02 3.0120E-01

7.7380E-01 1.4090E-01 2.8740E-02 2.7810E-01 6.2560E-01 2.3800E-01 3.1830E-02

2.5200E-01 1.2410E+00 4.3700E-01 6.6270E-02 5.1100E-03 5.4680E-03 3.8130E-04

2.4300E-02 3.1450E-02 6.0690E-03 3.7490E-03 3.9290E-02 1.5630E-01 1.3710E-02

1.7040E-03 1.6000E-02 1.1690E-02 1.0010E-02 3.0040E-04 6.9400E-02 1.2090E-01

5.6590E-02 5.2540E-03 2.0240E-04 9.6030E-03 7.2090E-03 1.7460E-03 1.5580E-02

1.8640E-02 4.8340E-03 3.4600E-03 9.4490E-02 2.4860E-01 4.1940E-02 7.5520E-03

3.5640E+00 1.0120E-01 1.2890E+00 6.9410E+00 2.1840E+00 6.1350E-03 1.0620E-02

1.3000E-02 2.8400E-03 8.9860E-03 2.5840E-02 8.2340E-03 1.3160E-02 9.4220E-03

4.9960E-02 6.4390E-02 2.5930E-02 4.0680E-02 3.9960E-01 8.4140E-01 2.5520E-01

6.8820E-02 2.9520E-01 5.5920E-01 1.1410E-01 4.7870E-02 2.8480E-01 4.3030E-01

1.9970E-01 5.7360E-02 4.3270E-01 9.4500E-01 3.6230E-01 1.9170E-03 4.5450E-03

2.1420E-03 9.1000E-03 1.7790E-02 2.2680E-02 4.4550E-03 5.5730E-03 4.3920E-02

1.1560E-01 1.0300E-02 4.9180E-03 1.4030E-02 5.8140E-03 7.0490E-03 8.8620E-03

6.7990E-02 8.8750E-02 4.7620E-02 1.6870E-04 4.3090E-03 7.2030E-03 3.9520E-03

7.8470E-03 1.2950E-02 1.6440E-02 3.5380E-03 1.7950E-02 9.8110E-02 1.8070E-01

3.3590E-02 1.1160E-03 1.1720E-01 1.7810E+00 7.4010E+00 1.7350E-03 6.8550E-03

9.4000E-03 9.0200E-03 1.3730E-03 1.1040E-02 2.2150E-02 1.2180E-02 9.8200E-04

1.1280E-02 4.1390E-02 6.1770E-02 2.0760E-03 4.8920E-02 3.2900E-01 8.8840E-01

1.1500E-02 7.9240E-02 2.4880E-01 5.0570E-01 6.2390E-03 5.4370E-02 2.2610E-01

4.8910E-01 3.4090E-03 6.6100E-02 3.6000E-01 1.0380E+00 9.6720E-04 2.6080E-03

3.7610E-03 2.3510E-03 1.0390E-02 1.5280E-02 1.5400E-02 7.1900E-04 6.5690E-03

3.3100E-02 9.1020E-02 1.3180E-03 6.0020E-03 1.1880E-02 6.5410E-03 7.7970E-04

1.0310E-02 5.7640E-02 1.1140E-01 1.3500E-04 1.4670E-03 5.3780E-03 5.5260E-03

2.2340E-03 8.7510E-03 1.1500E-02 9.2520E-03 1.1630E-03 2.1410E-02 8.0930E-02

1.5980E-01 9.5630E-01 2.5800E-02 1.0420E-03 1.6220E-01 2.6650E-02 1.0180E-04

1.5920E-05 1.2820E-02 8.8190E-04 2.3440E-05 1.5990E-06 2.8340E-02 7.2690E-03

4.5960E-04 9.4330E-06 1.7650E+00 1.6030E-01 2.9890E-03 2.9980E-05 1.0520E-01

2.3170E-02 3.1360E-03 3.5180E-05 3.5310E-01 1.0060E-01 1.0160E-02 9.8710E-04

1.0880E+00 2.1370E-01 5.6280E-02 3.7390E-03 4.6940E-04 3.1460E-04 3.3710E-05

1.5750E-02 2.3130E-03 2.0020E-04 3.2300E-05 8.4070E-02 1.3650E-02 1.9630E-03

7.1380E-05 3.8950E-02 7.7200E-03 3.0710E-04 3.3340E-05 4.9510E-01 5.7940E-02

6.4630E-03 5.8220E-04 1.1400E-03 8.5030E-04 4.7550E-04 1.1230E-04 3.2180E-02

3.3710E-03 1.1640E-04 1.7010E-06 3.8240E-02 1.0860E-02 1.7080E-03 3.0660E-05

2.0030E+00 4.9350E-02 6.3890E-02 7.6590E-02 2.9170E-02 9.0440E-05 4.1310E-03

6.7520E-03 8.6040E-04 2.3530E-05 1.0750E-02 1.2600E-02 7.6640E-03 5.2790E-04

2.8990E-01 1.8150E+00 1.9460E-01 3.4300E-03 3.6170E-02 5.4930E-02 2.0780E-02

3.6270E-03 1.0200E-01 4.4430E-01 1.1340E-01 1.1370E-02 2.7120E-01 1.4320E+00

3.8730E-01 6.3490E-02 3.0800E-04 2.5610E-04 1.8210E-04 6.3850E-03 7.4180E-03

2.0980E-03 1.3750E-04 2.4690E-02 4.8400E-02 1.1920E-02 2.2280E-03 1.6440E-02

1.5270E-02 6.7980E-03 2.8000E-04 1.3210E-01 5.5230E-01 6.3220E-02 7.3940E-03

9.9780E-04 6.8190E-04 3.2330E-04 2.5070E-04 1.3330E-02 1.5560E-02 3.2430E-03

1.2510E-04 1.5460E-02 1.6890E-02 1.0290E-02 2.0410E-03 2.1040E+00 1.8830E-02

6.0720E-02 4.4790E-02 2.0670E-02 1.0130E-03 4.2980E-03 4.2770E-03 6.1140E-04

2.4800E-03 1.0690E-02 7.8830E-03 5.9880E-03 4.1760E-02 6.1580E-01 2.3260E+00

1.5060E-01 9.9500E-03 3.3100E-02 3.7090E-02 1.7760E-02 2.4710E-02 1.6550E-01

3.4110E-01 8.7900E-02 7.3390E-02 4.5550E-01 1.0670E+00 3.2540E-01 2.0890E-04

1.8700E-04 1.1670E-04 1.9780E-03 5.5160E-03 4.5300E-03 1.4820E-03 6.7730E-03

2.3500E-02 3.5200E-02 9.8700E-03 5.2840E-03 1.4880E-02 1.0810E-02 4.7750E-03

1.5950E-02 1.4670E-01 4.3220E-01 5.3450E-02 8.5520E-04 4.9030E-04 3.4370E-04

2.4280E-04 2.8220E-03 1.2990E-02 9.5710E-03 2.3100E-03 4.2640E-03 1.4190E-02

1.1100E-02 8.3280E-03 2.9900E-03 2.3290E-02 5.1630E-02 4.3090E-02 1.4080E-04

1.1840E-03 3.4260E-03 3.6320E-03 2.9950E-04 2.9340E-03 9.0830E-03 1.0200E-02

2.1110E-03 4.8190E-02 4.8970E-01 2.1160E+00 1.3570E-03 1.1580E-02 2.9990E-02

3.9630E-02 2.8290E-03 2.8600E-02 1.3770E-01 3.5180E-01 6.7670E-03 8.3300E-02

3.8610E-01 1.1310E+00 1.5240E-04 1.8580E-04 1.9220E-04 4.4090E-04 2.3590E-03

4.6700E-03 4.0710E-03 9.2000E-04 7.9300E-03 2.0180E-02 3.3810E-02 1.1980E-03

6.2730E-03 1.2680E-02 1.0270E-02 1.6540E-03 1.8580E-02 1.2060E-01 4.0600E-01

7.1260E-04 3.1120E-04 4.1400E-04 1.7130E-04 4.6580E-04 3.5000E-03 1.0970E-02

8.5340E-03 7.4100E-04 4.9620E-03 1.2430E-02 1.3530E-02 3.2260E+00 4.8090E-01

2.7460E-02 1.0690E-01 5.1150E-02 3.1700E-02 1.6000E-02 8.1950E-02 5.5580E-02

3.0190E-02 1.5980E-02 7.5940E-02 3.5280E-02 1.2880E-02 3.1930E-03 4.9280E-02

2.5600E-02 1.1160E-02 3.2250E-03 6.0490E-02 2.3740E-02 1.0770E-02 3.3490E-03

8.1450E-02 3.0830E-02 8.3720E-03 1.3300E-03 9.2790E-02 6.2800E-02 9.2700E-03

3.4680E-02 1.8130E-02 8.6990E-03 3.3510E-03 9.4630E-02 4.4750E-02 1.1230E-02

3.0320E-03 6.0230E-02 3.1210E-02 1.1010E-02 5.0790E-03 6.6670E-02 1.9760E-02

7.7450E-03 1.6050E-03 1.2970E-01 1.1220E-01 7.3590E-02 3.9530E-03 5.4970E-02

2.8160E-02 9.8610E-03 2.8600E-03 4.9230E-02 1.8360E-02 5.9590E-03 1.1200E-03

2.8930E+00 5.7800E-01 5.1150E-02 7.2430E-02 3.1890E-02 1.1610E-02 4.9950E-02

3.5150E-02 3.4810E-02 2.0650E-02 2.8200E-02 2.9810E-02 2.6250E-02 1.4520E-02

2.6450E-02 1.6780E-02 1.4590E-02 1.1270E-02 1.8870E-02 1.4270E-02 1.4230E-02

1.1380E-02 1.5180E-02 3.6770E-02 2.9150E-02 1.0390E-02 7.0160E-02 1.6690E-02

3.6570E-02 1.8100E-02 1.4340E-02 9.6730E-03 5.1510E-03 3.6330E-02 3.4890E-02

3.7440E-02 1.4970E-02 3.1050E-02 1.9460E-02 2.1970E-02 8.4830E-03 1.0070E-02

3.1950E-02 2.1550E-02 6.2690E-03 9.7020E-02 8.2870E-02 7.7610E-03 5.0660E-02

2.8140E-02 1.7860E-02 1.8350E-02 7.5700E-03 1.5120E-02 1.3530E-02 1.6360E-02

6.7080E-03 1.9330E+00 3.1700E-02 3.1890E-02 3.2900E-02 1.0310E-02 2.2270E-02

3.1930E-02 1.7660E-02 2.2030E-02 4.7930E-03 1.8490E-02 1.8810E-02 2.1560E-02

7.2920E-03 1.2840E-02 1.2800E-02 1.1120E-02 5.5240E-03 1.1480E-02 1.0610E-02

1.1560E-02 3.7330E-04 1.5180E-02 2.1080E-02 2.4350E-02 3.5500E-02 3.1050E-02

1.7740E-02 8.6910E-03 9.6630E-03 7.9310E-03 4.4670E-03 5.6270E-03 3.1680E-02

1.5340E-02 2.4020E-02 1.0970E-02 2.1950E-02 8.6780E-03 1.1630E-02 1.6090E-03

6.7260E-03 2.3610E-02 1.5100E-02 6.4550E-02 3.4830E-02 3.7240E-02 2.2830E-02

9.8560E-03 1.8350E-02 8.7110E-03 1.0300E-02 2.7200E-03 1.3650E-02 7.9530E-03

1.0170E-02 1.6000E-02 1.1610E-02 1.0320E-02 1.2650E-02 9.2130E-03 1.1720E-02

1.7890E-02 8.1060E-03 4.6510E-04 4.8140E-03 1.3600E-02 1.3780E-02 1.2070E-03

8.2460E-03 8.2990E-03 5.3420E-03 8.3250E-04 5.1590E-03 7.6540E-03 5.9750E-03

3.4170E-05 3.6910E-04 1.0710E-02 1.9390E-02 9.6020E-03 2.7050E-02 2.9200E-03

3.3510E-03 5.1450E-03 4.4650E-03 3.1110E-03 1.2770E-03 5.0700E-03 1.7960E-02

1.2100E-02 5.0790E-03 7.3170E-03 1.1590E-02 3.0220E-03 6.5160E-04 9.7280E-04

3.9210E-03 1.3930E-02 3.2230E-02 7.3320E-03 3.8670E-02 1.3320E-03 2.8600E-03

7.5670E-03 1.0300E-02 3.1540E-03 2.7190E-04 2.8300E-03 8.8070E-03 5.1780E-03

1.0760E+00 6.5260E-02 1.0560E-02 4.0120E+00 1.2930E+00 2.6900E-01 3.0520E-02

8.7410E+00 1.8970E+00 3.0520E-01 3.4420E-02 1.4800E-01 5.9310E-02 2.0530E-02

5.7110E-03 1.7140E-01 6.2100E-02 1.9370E-02 5.5180E-03 3.3980E-02 1.6270E-02

7.7200E-03 2.1240E-03 3.4100E-01 1.1870E-01 2.0100E-02 5.8000E-01 2.7740E-01

8.0560E-02 1.2610E-02 4.2760E-01 1.2780E-01 2.7960E-02 5.4230E-03 1.6030E-01

8.9410E-02 2.6660E-02 8.3730E-03 3.1310E-02 1.3800E-02 5.5040E-03 1.6780E-03

1.6990E-02 1.9570E-02 1.2240E-02 7.3330E-03 6.0080E-02 3.5830E-02 1.7670E-02

6.0110E-03 7.3400E-02 3.4170E-02 1.4000E-02 5.0310E-03 1.1830E+00 6.7520E-02

9.1410E-01 1.7620E+00 1.2150E+00 3.3580E-01 4.0540E-01 5.1570E+00 2.1450E+00

4.0040E-01 4.6560E-02 6.2190E-02 3.2690E-02 2.3850E-02 2.9560E-02 1.1000E-01

6.6500E-02 2.2800E-02 1.0080E-02 1.6830E-02 9.4610E-03 8.5520E-03 1.6740E-01

1.0550E-01 7.1810E-02 2.7310E-01 1.8000E-01 1.8460E-01 7.9140E-02 8.5950E-02

2.0820E-01 1.1740E-01 3.3970E-02 8.9200E-02 4.8740E-02 6.3140E-02 2.0310E-02

9.6150E-03 1.4370E-02 1.1010E-02 5.7650E-03 1.2730E-02 1.4180E-02 9.7090E-03

5.0600E-03 3.5790E-02 2.3480E-02 1.8420E-02 1.1120E-02 2.8750E-02 2.6940E-02

2.3140E-02 1.2900E-02 8.2590E-01 7.4900E-02 8.8280E-01 9.2280E-01 9.3960E-01

3.0540E-03 4.2240E-01 3.2650E+00 1.7060E+00 1.2880E-02 2.1460E-02 4.4380E-02

2.4250E-02 6.4750E-03 2.4480E-02 8.4060E-02 3.4760E-02 3.6470E-03 3.5380E-03

1.4750E-02 8.5150E-03 6.8060E-02 1.0490E-01 6.8060E-02 8.0010E-02 1.8300E-01

1.0700E-01 1.0900E-01 1.0100E-02 7.7210E-02 1.1480E-01 9.0560E-02 2.6640E-02

6.3040E-02 1.9290E-02 3.3940E-02 2.4750E-03 6.4470E-03 1.0140E-02 8.8990E-03

8.4810E-03 1.0900E-02 6.8560E-03 2.8870E-03 1.7660E-02 1.8370E-02 1.6840E-02

8.0910E-03 8.2410E-03 1.9330E-02 1.3820E-02 1.7500E-02 2.4880E-03 8.3460E-02

6.1610E-01 7.1650E-01 2.7710E-04 3.0740E-03 2.9560E-01 2.3870E+00 1.6300E-03

1.2850E-02 1.7110E-02 2.3770E-02 4.1000E-04 5.7380E-03 1.7030E-02 3.5720E-02

9.5430E-06 4.0310E-03 2.9240E-03 8.1940E-03 2.0180E-02 5.9090E-02 3.2440E-02

1.2610E-02 7.8710E-02 1.0860E-01 3.7560E-02 1.7290E-03 9.2550E-03 5.2260E-02

8.2960E-02 8.3730E-03 2.0260E-02 3.5660E-02 7.8690E-03 4.8440E-04 2.1540E-03

4.2020E-03 6.9360E-03 4.2380E-03 5.4880E-03 3.0600E-03 1.3360E-03 6.0110E-03

1.2210E-02 8.0830E-03 4.7400E-03 2.5310E-03 6.8190E-03 1.1920E-02 7.7090E-03

2.8790E+00 2.5910E-01 1.6050E-02 7.3030E+00 1.8030E+00 2.7860E-01 2.1980E-02

4.7260E-01 1.5000E-01 3.2090E-02 5.2590E-03 7.6440E-01 2.6020E-01 5.8690E-02

1.0250E-02 4.3090E-01 1.1480E-01 1.8620E-02 1.4230E-03 4.1430E-01 2.3490E-02

3.1860E-03 5.3930E-01 1.1180E-01 1.3580E-02 7.1140E-04 7.2400E-01 2.4400E-01

5.4430E-02 6.1300E-03 1.4350E-01 4.8710E-02 9.4510E-03 2.9260E-03 8.1780E-02

3.4420E-02 1.2940E-02 3.9310E-03 1.7590E-02 6.3610E-02 1.1370E-02 7.2980E-03

6.4810E-02 2.8930E-02 1.0810E-02 2.1050E-03 1.0770E-01 3.1950E-02 7.4510E-03

1.2540E-03 3.1810E+00 3.1700E-01 1.3610E+00 3.9650E+00 1.9180E+00 3.4570E-01

1.4920E-01 2.0730E-01 1.3820E-01 3.4440E-02 2.2840E-01 3.7550E-01 2.3960E-01

6.9050E-02 7.2960E-02 2.1780E-01 1.3120E-01 2.2590E-02 1.4780E-01 1.9090E-01

1.3220E-02 1.6500E-01 2.6810E-01 9.7180E-02 1.4360E-02 2.4220E-01 3.1510E-01

2.0350E-01 6.2820E-02 6.0290E-02 5.4670E-02 4.3430E-02 6.3450E-03 2.9880E-02

3.8450E-02 2.5340E-02 1.3220E-02 1.4070E-02 2.9010E-02 3.3780E-02 3.6560E-03

3.4980E-02 2.7730E-02 1.4850E-02 1.0320E-02 3.9910E-02 3.5460E-02 2.7230E-02

8.1480E-03 2.4380E+00 1.1380E-01 1.4610E+00 2.5810E+00 1.5420E+00 3.1980E-02

1.3760E-01 1.2530E-01 1.0840E-01 3.2650E-02 1.9220E-01 2.4700E-01 2.0190E-01

1.7880E-03 8.6420E-02 1.4270E-01 1.0790E-01 4.2530E-02 1.4130E-01 7.9860E-02

3.6620E-02 1.5250E-01 1.5710E-01 6.1150E-02 5.4150E-02 1.9040E-01 1.9730E-01

1.6530E-01 1.8720E-02 5.1840E-02 2.8700E-02 2.8320E-02 9.5400E-03 2.1450E-02

2.7650E-02 2.1710E-02 1.0550E-02 1.5050E-02 2.3280E-02 1.1780E-02 1.7130E-02

1.8540E-02 2.1770E-02 8.4530E-03 7.4140E-03 2.7140E-02 2.1140E-02 2.1510E-02

2.9560E-03 1.3600E-01 1.1300E+00 2.5330E+00 5.2590E-03 3.4350E-02 1.0810E-01

1.1790E-01 2.9130E-03 3.6940E-02 1.5440E-01 2.5750E-01 9.1980E-05 2.0420E-03

6.6710E-02 1.5410E-01 9.1530E-03 5.6590E-02 1.0970E-01 5.2690E-03 4.3630E-02

1.1710E-01 1.0810E-01 6.1310E-03 6.2610E-02 1.5380E-01 1.8040E-01 6.1210E-03

1.9660E-02 3.8020E-02 1.8830E-02 2.1390E-03 9.5580E-03 1.7710E-02 2.4470E-02

7.0350E-03 8.9900E-03 8.7850E-03 1.5590E-02 5.3260E-03 1.5890E-02 1.2740E-02

1.0500E-02 1.2400E-03 8.1310E-03 2.1460E-02 2.0720E-02 2.5910E+00 1.0210E-01

8.0670E-03 5.2340E-01 1.2590E-01 2.4710E-02 5.1910E-03 3.3170E-01 8.3650E-02

1.3290E-02 5.9640E-04 2.4960E-01 7.7070E-02 1.8760E-02 2.4790E-03 2.3880E-02

8.3710E-03 1.0680E-03 7.4200E-01 5.6690E-02 1.0610E-02 1.9930E-03 5.2440E-01

1.1160E-01 1.1440E-02 1.4060E-03 5.6970E-02 1.6920E-02 2.0920E-03 5.1400E-04

2.7820E-01 6.8090E-02 9.5850E-03 1.8930E-03 2.8210E-02 2.9670E-02 1.5370E-02

3.3250E-03 8.7650E-02 1.9690E-02 6.3950E-03 5.3160E-04 1.6620E-01 4.8870E-02

1.0950E-02 1.4010E-03 3.1890E+00 1.2200E-01 1.5630E-01 2.7580E-01 1.1040E-01

2.5520E-02 8.3420E-02 1.8130E-01 8.9180E-02 1.5690E-02 6.6990E-02 1.4150E-01

7.0000E-02 2.1210E-02 1.3600E-02 6.8320E-03 5.1050E-03 1.8470E-01 4.3680E-01

4.4480E-02 9.5370E-03 1.4260E-01 2.7410E-01 1.1180E-01 1.2600E-02 2.3630E-02

2.8020E-02 1.2800E-02 1.5620E-03 6.7610E-02 1.7550E-01 6.9200E-02 1.0260E-02

2.3510E-02 2.1610E-02 1.0340E-02 8.3100E-03 3.7270E-02 4.5430E-02 1.0010E-02

6.5500E-03 5.7940E-02 8.1310E-02 3.8450E-02 1.2010E-02 2.4490E+00 4.1410E-02

1.4060E-01 1.8700E-01 8.7490E-02 1.3260E-02 8.8900E-02 1.2630E-01 7.3940E-02

1.3900E-02 6.0480E-02 9.9300E-02 6.1240E-02 7.5970E-03 7.4380E-03 5.1900E-03

4.0110E-02 1.8840E-01 2.8070E-01 3.0110E-02 2.2870E-02 1.4280E-01 1.7900E-01

7.8270E-02 8.5210E-03 1.9290E-02 1.6070E-02 8.6890E-03 9.5440E-03 6.8730E-02

1.3700E-01 5.6270E-02 1.8800E-02 1.3670E-02 1.0930E-02 7.5530E-03 1.5080E-02

2.3650E-02 3.2620E-02 6.8130E-03 1.8830E-02 4.6900E-02 5.6890E-02 3.1800E-02

8.7350E-03 4.4310E-02 1.1570E-01 1.7270E-01 5.9580E-04 1.5680E-02 7.3780E-02

1.2810E-01 1.3550E-03 1.5620E-02 5.2170E-02 1.0450E-01 3.4250E-03 7.6940E-03

4.0490E-03 8.8480E-03 4.6590E-02 1.4970E-01 2.0040E-01 3.0620E-03 2.6840E-02

1.1600E-01 1.7570E-01 1.9590E-03 9.2410E-03 1.6210E-02 1.2880E-02 1.8780E-03

1.0230E-02 5.5970E-02 1.4540E-01 1.4100E-02 7.4120E-03 1.1810E-02 4.9960E-03

4.2290E-03 1.4180E-02 1.9200E-02 2.0070E-02 2.8700E-03 1.9480E-02 4.0190E-02

5.1850E-02 1.5940E+00 5.8070E-02 6.6570E-03 5.4200E+00 1.2240E+00 1.6840E-01

1.2350E-02 1.1270E+01 1.8680E+00 2.0770E-01 1.2180E-02 4.5980E-01 5.4480E-02

1.8740E-02 5.5350E-01 1.8480E-01 2.9550E-02 7.7740E-03 5.4190E-01 1.1590E-01

2.1460E-02 3.1180E-03 2.2860E-01 7.7350E-02 7.9100E-03 2.2270E-03 8.9980E-02

4.0970E-02 1.3460E-02 2.8450E-03 1.6360E-02 3.0590E-02 1.1500E-02 5.5520E-03

4.6970E-02 2.2190E-02 6.6960E-03 1.1600E-03 9.8150E-02 2.9710E-02 7.9000E-03

1.3320E-03 1.9360E+00 6.7800E-02 8.9080E-01 3.0710E+00 1.3360E+00 2.0600E-01

6.3740E-01 7.6140E+00 2.2320E+00 2.5740E-01 1.8370E-01 2.0970E-01 2.6310E-02

2.3050E-01 2.1550E-01 1.5890E-01 2.2930E-02 1.1570E-01 2.9010E-01 1.1160E-01

2.2340E-02 9.2750E-02 7.8110E-02 6.7210E-02 7.3620E-03 1.9950E-02 6.6660E-02

4.1080E-02 1.4900E-02 1.3090E-02 1.8030E-02 1.4740E-02 4.0860E-03 2.5650E-02

1.7010E-02 1.2560E-02 7.0470E-03 2.9680E-02 5.0860E-02 2.3770E-02 8.4310E-03

1.4520E+00 5.8920E-02 9.8060E-01 2.0080E+00 1.0660E+00 5.0430E-03 7.4880E-01

5.5010E+00 1.7740E+00 7.0730E-02 1.6140E-01 8.7600E-02 6.4750E-02 1.9350E-01

9.5280E-02 1.0580E-01 2.1450E-02 1.1150E-01 1.8510E-01 8.6010E-02 2.4070E-02

8.0570E-02 3.0920E-02 4.3960E-02 7.1230E-03 2.5640E-02 5.0500E-02 3.7920E-02

9.8150E-03 1.0950E-02 1.1240E-02 6.0980E-03 1.0730E-02 1.4710E-02 1.2940E-02

7.7910E-03 7.8930E-03 2.3770E-02 2.9530E-02 1.8850E-02 1.0550E-03 6.9620E-02

7.5320E-01 1.9280E+00 4.5860E-04 5.4750E-03 5.6540E-01 4.8700E+00 2.8640E-02

6.5440E-02 1.1120E-01 1.7230E-02 6.8960E-02 1.4480E-01 8.0340E-02 3.1180E-03

2.2330E-02 8.5980E-02 1.6840E-01 4.8830E-03 2.3070E-02 5.9470E-02 3.1620E-02

1.4670E-03 8.3130E-03 2.5570E-02 5.4380E-02 6.5430E-03 5.8280E-03 6.5330E-03

5.8690E-03 3.2010E-03 1.0700E-02 1.0680E-02 5.9290E-03 1.3310E-03 8.4290E-03

1.8850E-02 2.6150E-02 3.3090E+00 2.3150E-01 1.6640E-02 6.8600E+00 1.3860E+00

2.6410E-01 1.4690E-02 9.9020E-02 4.4600E-02 1.0780E-02 2.8290E-01 1.8540E-02

4.2710E-03 8.1680E-04 6.7810E-01 1.5860E-01 4.0650E-02 7.6930E-03 1.0970E-01

1.5690E-02 5.6890E-03 6.2910E-04 2.2900E-01 5.8450E-02 1.0450E-02 1.1820E-03

3.5080E-03 2.5880E-02 6.0050E-03 3.9170E-04 1.0390E-01 1.9180E-02 6.9600E-03

1.0860E-03 1.9080E-01 6.2420E-02 5.1130E-03 3.8850E-04 3.9000E+00 2.7620E-01

1.0290E+00 7.2160E+00 2.6150E+00 3.1390E-01 5.6690E-02 2.9040E-02 2.3490E-02

6.1500E-02 1.7110E-01 1.3540E-02 3.7940E-03 1.9860E-01 3.6830E-01 1.3220E-01

3.5990E-02 3.2510E-02 6.0730E-02 9.8190E-03 3.6010E-03 6.8840E-02 1.2320E-01

5.7120E-02 1.1710E-02 2.9240E-03 1.4670E-02 9.6510E-03 3.5590E-03 4.0950E-02

5.4240E-02 1.0800E-02 7.1420E-03 8.1130E-02 1.5110E-01 6.7990E-02 5.6610E-03

3.0400E+00 1.2310E-01 2.0640E+00 5.2840E+00 2.1000E+00 4.1010E-02 3.7570E-02

1.8610E-02 1.4120E-02 6.2720E-02 1.1180E-01 9.1860E-03 5.3950E-02 1.7380E-01

2.5330E-01 1.0630E-01 1.2680E-02 2.9130E-02 3.9840E-02 6.5850E-03 9.9960E-03

5.6860E-02 8.6310E-02 4.7380E-02 2.3390E-03 6.7650E-03 9.4230E-03 6.1160E-03

1.6520E-02 2.8660E-02 3.8740E-02 7.0360E-03 1.2160E-02 8.6750E-02 9.3520E-02

5.2190E-02 3.5550E-04 1.4530E-01 1.6250E+00 5.4210E+00 2.3070E-02 2.8920E-02

1.4950E-02 3.3410E-03 1.6320E-02 4.9840E-02 7.8660E-02 1.2720E-02 5.9720E-02

1.4240E-01 2.2660E-01 3.6250E-03 1.0800E-02 2.3270E-02 2.7460E-02 1.1640E-03

1.1650E-02 4.7230E-02 9.0600E-02 1.7540E-03 2.4180E-03 7.7470E-03 6.2620E-03

4.7190E-03 1.3660E-02 2.2870E-02 2.3620E-02 1.1330E-03 1.4570E-02 6.9450E-02

9.9870E-02 1.3830E+00 1.0430E-01 8.0830E-03 1.6610E-02 1.9390E-03 1.0120E-04

6.9060E-02 2.3780E-02 7.4240E-03 1.6660E-04 1.9840E+00 1.3660E-01 1.9440E-02

2.5230E-03 2.9380E-02 9.2270E-03 1.7450E-03 1.4300E-04 5.8140E-01 9.5070E-02

1.2520E-02 1.7830E-03 4.9420E-04 2.7200E-02 3.4610E-03 3.0220E-04 3.5000E-02

8.4590E-03 7.6340E-04 4.9900E-05 3.9760E-01 2.3700E-02 4.0170E-03 2.6460E-04

2.4230E+00 1.2020E-01 8.2480E-03 6.6620E-03 1.1620E-03 3.5410E-02 4.1100E-02

1.1520E-02 8.0440E-03 3.5230E-01 1.3300E+00 1.2720E-01 2.1090E-02 1.3490E-02

1.3320E-02 5.9580E-03 1.5890E-03 1.1410E-01 3.0480E-01 1.0180E-01 1.5870E-02

4.2380E-04 1.3990E-02 1.0480E-02 2.1050E-03 1.5290E-02 1.5380E-02 5.6750E-03

7.0790E-04 5.4690E-02 1.8270E-01 2.1720E-02 4.4500E-03 2.8780E+00 3.5780E-03

6.5030E-03 3.3950E-03 1.6900E-02 2.1170E-02 2.5060E-02 8.4840E-03 5.9750E-02

3.9730E-01 9.8340E-01 1.0340E-01 4.7000E-03 1.0340E-02 9.0290E-03 4.1890E-03

1.9070E-02 1.2110E-01 2.2740E-01 8.1170E-02 3.5310E-04 6.2340E-03 1.0490E-02

5.7730E-03 4.8540E-03 1.0700E-02 9.5040E-03 3.9290E-03 1.0740E-02 5.6170E-02

1.3550E-01 1.7850E-02 1.0990E-03 4.4800E-03 5.0920E-03 4.9550E-03 1.8710E-02

1.8930E-02 1.4830E-02 8.7140E-03 6.9610E-02 3.2110E-01 7.9920E-01 1.7070E-03

6.9470E-03 8.7380E-03 6.7820E-03 3.2000E-03 2.1610E-02 1.0070E-01 2.3730E-01

2.8250E-04 1.7370E-03 7.8560E-03 8.0690E-03 1.1150E-03 6.1690E-03 8.9500E-03

6.6040E-03 1.5160E-03 1.2560E-02 4.6470E-02 1.3000E-01 5.7020E-01 3.8100E-02

2.1360E+00 1.0510E+00 3.6260E-01 6.3600E-02 7.3940E+00 2.5830E+00 6.9470E-01

1.2010E-01 5.5360E-02 3.1210E-02 1.4900E-02 6.2600E-03 2.0150E-02 1.4130E-02

8.5080E-03 4.3740E-03 2.6970E-02 1.0890E-01 9.9980E-02 6.2190E-02 9.1380E-02

5.4520E-02 3.0740E-02 1.3910E-02 4.1590E-02 2.6230E-02 1.7590E-02 1.1450E-02

4.7820E-01 7.2460E-01 6.1180E-01 6.4450E-01 4.3390E-01 2.6170E-01 3.4550E+00

2.5460E+00 9.8310E-01 2.3290E-02 2.3330E-02 1.7100E-02 9.6940E-03 1.2040E-02

6.0650E-03 6.8780E-03 9.7330E-03 1.7980E-02 9.9980E-02 6.3330E-02 1.8560E-02

4.3070E-02 3.9230E-02 3.0680E-02 1.4160E-02 1.7940E-02 2.2310E-02 1.5970E-02

8.3600E-03 2.6430E-02 5.0830E-01 4.4270E-01 2.2640E-01 1.9170E-02 1.6570E-01

1.4240E+00 2.0070E+00 6.0980E-03 1.2070E-02 1.0760E-02 6.3600E-03 1.1000E-03

7.0140E-03 5.2040E-03 3.3350E-03 8.9910E-03 6.2170E-02 1.8790E-02 9.5910E-03

1.7940E-02 1.8700E-02 1.6620E-02 1.0120E-02 9.6480E-03 6.8100E-03 8.4270E-03

7.8670E-03 2.8240E+00 4.4630E-01 2.9700E-02 7.7460E+00 2.8050E+00 5.9900E-01

7.1570E-02 1.0880E-01 5.3710E-02 1.6140E-02 2.6620E-03 6.5050E-02 3.1740E-02

1.4990E-02 7.0590E-03 2.1270E-01 1.2700E-01 3.8520E-02 1.5850E-02 1.4650E-01

7.2830E-02 2.7830E-02 1.0230E-02 1.3880E-01 5.6060E-02 1.5140E-02 2.0760E-03

2.5030E+00 5.2850E-01 2.1000E+00 3.0240E+00 2.6030E+00 7.4100E-01 5.3670E-02

3.3360E-02 3.7640E-02 1.4300E-02 2.4120E-02 2.4620E-02 2.1030E-02 1.4230E-02

1.5890E-01 6.3610E-02 6.2260E-02 1.6800E-02 7.2830E-02 4.6550E-02 4.9010E-02

1.7450E-02 4.4960E-02 5.2000E-02 4.5560E-02 1.8040E-02 1.6650E+00 1.6090E-01

2.0540E+00 1.4350E+00 2.0120E+00 1.6140E-02 3.7620E-02 1.5180E-02 2.1110E-02

7.2520E-03 1.5400E-02 1.6580E-02 1.6360E-02 1.0580E-01 2.8760E-02 3.8040E-02

2.6190E-02 2.7840E-02 4.9010E-02 2.1410E-02 2.7010E-02 5.8890E-03 3.6050E-02

2.9530E-02 3.6880E-02 8.3160E-03 1.7190E-01 1.4240E+00 1.2240E+00 2.6620E-03

1.4290E-02 2.1110E-02 5.6790E-03 9.9160E-04 6.0700E-03 9.8210E-03 1.0240E-02

5.2780E-02 1.2320E-02 1.5480E-02 1.9490E-02 1.0220E-02 1.7440E-02 2.7010E-02

7.4130E-03 3.0110E-04 6.5820E-03 2.3930E-02 2.0630E-02 2.5770E+00 1.8410E-01

1.3050E-02 1.7710E-01 5.8670E-02 1.2580E-02 3.3980E-03 1.2240E-01 5.9060E-02

2.0210E-02 4.0830E-03 3.7470E-02 3.8140E-01 4.0110E-02 5.9400E-03 4.3830E-01

1.2610E-01 1.6050E-02 4.2500E-03 1.2760E-01 6.1450E-02 2.1570E-02 4.3870E-03

2.9500E+00 2.2280E-01 7.2480E-02 6.4090E-02 4.9930E-02 8.9640E-03 5.2810E-02

5.0690E-02 4.2810E-02 2.2220E-02 2.9980E-02 1.4720E-01 1.7000E-01 2.2630E-02

1.7540E-01 1.5840E-01 1.1980E-01 1.1730E-02 6.1300E-02 3.8930E-02 3.5940E-02

2.3540E-02 2.2480E+00 2.2310E-02 6.2080E-02 2.9560E-02 3.3980E-02 1.2510E-02

3.8180E-02 3.0830E-02 3.6480E-02 2.2480E-02 4.8610E-02 1.2980E-01 7.4960E-02

4.0140E-02 1.4380E-01 6.1870E-02 8.9590E-02 2.1540E-02 3.5920E-02 2.9430E-02

2.9920E-02 6.5950E-03 2.2430E-02 4.5830E-02 2.4480E-02 2.3780E-03 1.3100E-02

3.1110E-02 3.2420E-02 1.4990E-02 1.4760E-02 5.9130E-02 9.6540E-02 8.4620E-03

4.4160E-02 1.2020E-01 6.1770E-02 4.3870E-03 2.3530E-02 2.9910E-02 2.1770E-02

1.5050E+00 2.5360E-01 6.9620E-02 6.0970E+00 1.4970E+00 2.9530E-01 4.6230E-02

1.1490E+00 2.0400E+00 1.1580E+00 8.4150E-02 1.6790E+00 5.5740E-01 9.8320E-02

6.8400E-03 2.1980E+00 6.6510E-01 1.3200E-01 1.6280E-02 1.4060E+00 1.8880E-01

4.4960E-01 3.5220E+00 1.5650E+00 3.5470E-01 8.5880E-01 1.3790E+00 3.0450E-01

7.7810E-01 5.5160E-01 6.2440E-01 4.7280E-01 1.1140E-01 4.4160E-01 1.0140E+00

6.4410E-01 1.6310E-01 9.1660E-01 3.3650E-02 4.1230E-01 2.2060E+00 1.2370E+00

5.7120E-01 5.7290E-01 6.5990E-01 4.1620E-01 9.6680E-02 4.6870E-01 3.0030E-01

3.1000E-01 3.3670E-02 4.4340E-01 5.3470E-01 4.9590E-01 9.0170E-03 2.5650E-02

2.8060E-01 1.6300E+00 2.8520E-01 1.2650E-01 6.0790E-01 8.3030E-02 6.8390E-03

1.1010E-01 3.1110E-01 1.6140E-01 3.3020E-03 3.7890E-02 3.0860E-01 4.0780E-01

3.0850E+00 2.4590E-01 3.3780E-02 9.4940E-02 8.1300E-02 2.9810E-02 5.6190E-03

5.1380E+00 2.2380E-01 5.9730E-03 1.4110E-03 1.0510E+01 2.0000E+00 1.6500E-01

8.1000E-03 3.6030E+00 2.8320E-01 7.9120E-02 5.0930E-02 2.8310E-02 1.6020E-02

1.1330E+00 3.0970E+00 2.2020E-01 4.9070E-03 2.6250E+00 5.5080E+00 2.1460E+00

1.8670E-01 2.8160E+00 6.3290E-02 2.9280E-02 3.0350E-02 1.8850E-02 1.8260E-01

1.2780E+00 1.9640E+00 1.5320E-01 3.9250E-01 2.8090E+00 3.5280E+00 1.6540E+00

4.7470E-02 1.5070E-02 2.6450E-02 1.5940E-02 1.7870E-02 2.3580E-01 1.0150E+00

1.4320E+00 3.4290E-02 4.8420E-01 2.2520E+00 3.5500E+00 5.1290E-01 3.4190E-01

1.7100E-01 2.0910E+00 1.5670E+00 1.0490E+00 5.2560E-01 1.9500E-02 1.5590E-02

1.1700E-02 7.7980E-03 2.0560E+00 1.0010E+00 4.3370E+00 2.9710E+00 1.2040E+00

2.3350E-01 3.8590E-01 1.5740E-01 6.4350E-02 2.9870E-02 7.0570E-01 2.5580E+00

4.4180E-01 1.4230E+00 1.3770E+00 4.3420E-02 1.8850E-01 1.3610E-01 5.4720E-02

1.1230E-01 1.7680E+00 8.9650E-01 1.1610E-01 2.1130E-02 1.9820E-02 7.3460E-02

9.8000E-02 2.0440E+00 2.6960E-01 3.3240E-02 1.7410E+00 5.9350E-01 1.7030E-01

4.4680E-02 1.9030E+00 2.9090E-01 4.3130E-01 7.9990E-01 5.1100E-01 1.6920E-01

1.2500E+00 8.4790E-02 3.6670E-01 4.5680E-01 3.8100E-01 1.8730E-02 6.1490E-02

2.4170E-01 3.1030E-01 3.9850E+00 3.8370E-01 2.1900E-02 4.4220E+00 4.7050E-01

3.4040E+00

80000.00

4.1590E+00 1.4130E+00 6.2840E-01 2.6590E-01 1.5460E+00 6.3740E-01 1.8820E-01

4.6980E-02 4.6770E+00 4.3120E-01 1.5640E-01 5.6820E-02 5.7590E-01 3.2580E-01

2.4350E-02 2.6480E-01 7.3850E-02 5.0810E-03 6.6620E-01 3.2670E-01 9.9100E-02

1.6580E-02 4.3440E-01 2.1560E-01 1.1530E-01 3.9130E-02 5.2310E-01 2.3890E-01

8.6770E-02 1.8990E-02 2.9380E-01 1.6440E-01 8.1050E-02 4.1970E-02 3.9970E+01

9.9280E+00 2.3090E-01 6.7320E-02 2.4140E-02 4.5120E+01 8.1060E+00 7.9960E-01

4.8450E-02 2.2520E-02 1.0800E-02 2.3250E+01 1.4290E-01 3.6520E-02 1.0970E+00

1.9280E-01 5.6470E-03 1.2570E-03 1.7170E+00 2.1670E-01 2.3070E-02 8.0350E-03

6.8810E-01 9.8910E-03 5.1950E-03 1.8310E-01 1.3700E-01 5.9180E-02 1.3460E-02

1.0170E-01 7.2370E-02 3.0940E-02 8.7910E-03 2.0360E-02 6.4750E-03 2.1310E-03

7.1830E-02 3.5710E-02 1.2500E-02 3.1510E-03 2.8590E-02 1.9650E-02 8.5490E-03

2.0680E-03 7.3510E-02 4.1310E-02 1.4030E-02 2.5150E-03 5.2130E-02 2.0650E-02

4.7710E-03 5.0800E-04 3.8850E-02 1.5190E-02 5.9420E-03 1.7160E-03 3.3210E-02

1.0940E-02 3.3210E-03 1.0450E-03 5.5250E-02 2.5160E-02 1.0870E-02 3.7470E-03

7.4000E-02 2.7920E-02 7.4140E-03 1.0780E-03 4.8830E-02 1.5470E-02 3.7080E-03

6.7250E-04 5.0080E-02 2.3630E-02 8.6680E-03 1.8210E-03 3.7860E-02 1.3000E-02

6.1510E-03 3.1830E-02 2.0490E-02 7.3660E-03 1.6100E-03 2.9490E-02 1.6450E-02

1.0070E-02 7.0550E-03 1.3440E-02 1.0080E-02 3.7280E-03 8.8120E-04 1.0940E-02

8.4580E-03 4.5160E-03 1.4650E-03 1.7650E-02 9.6390E-03 7.5870E-03 4.4030E-03

1.4770E-02 9.9940E-03 5.5580E-03 2.5000E-03 1.9660E-02 1.3490E-02 6.1460E-03

1.8040E-03 4.0610E+00 1.2390E+00 4.0210E-01 6.9760E-01 6.1320E-01 4.6550E-01

1.7240E-01 1.2310E+00 2.8040E+00 2.8130E-01 9.1580E-02 4.2530E-01 1.3360E-01

1.8530E-01 1.4500E-01 8.8110E-02 4.2350E-02 2.9540E-01 2.3460E-01 2.5430E-01

1.0350E-01 2.2800E-01 2.2710E-01 9.6780E-02 9.6410E-02 2.2390E-01 2.3350E-01

1.5940E-01 8.6190E-02 1.8800E-01 1.3730E-01 1.1230E-01 2.9730E-02 8.8350E+00

1.7950E+01 1.3350E+01 2.6090E-01 5.1820E-02 3.8560E-01 3.2010E+01 1.1760E+01

1.6990E+00 5.5210E-02 1.0260E-02 6.4940E+00 1.1880E+01 8.8110E-02 3.5960E-01

4.8670E-01 1.8690E-01 4.3890E-03 3.3240E-01 9.9940E-01 2.2080E-01 1.9110E-02

2.5970E-01 2.9910E-01 3.8570E-03 1.3790E-01 4.7930E-02 6.9590E-02 5.5680E-02

8.1080E-02 4.9090E-02 2.9700E-02 7.0330E-03 1.1690E-02 8.4190E-03 3.0450E-03

3.4700E-02 2.6570E-02 2.5250E-02 1.2080E-02 2.0350E-02 1.0210E-02 1.0730E-02

8.6580E-03 3.6080E-02 2.3540E-02 3.1170E-02 1.4620E-02 2.6280E-02 1.7730E-02

1.3780E-02 4.4220E-03 1.9380E-02 1.7190E-02 8.3630E-03 4.0820E-03 1.2510E-02

1.5270E-02 8.5730E-03 2.8580E-03 2.4520E-02 2.5550E-02 1.6160E-02 9.7990E-03

3.1050E-02 3.0180E-02 2.0160E-02 7.4740E-03 1.5290E-02 2.3230E-02 1.2620E-02

3.7920E-03 2.1370E-02 2.0730E-02 1.6610E-02 8.7510E-03 2.2510E-02 1.7910E-02

5.5550E-03 2.2670E-02 9.6520E-03 1.0940E-02 5.7640E-03 1.7160E-02 1.5320E-02

1.2150E-02 5.0530E-03 1.0750E-02 3.9490E-03 5.1010E-03 2.8270E-03 8.1310E-03

3.9320E-03 4.1110E-03 4.1380E-03 1.4120E-02 8.4640E-03 6.0490E-03 2.7910E-03

1.0920E-02 6.8170E-03 5.7760E-03 2.4510E-03 1.3710E-02 6.6770E-03 7.0840E-03

5.4060E-03 3.0350E+00 8.1010E-01 2.5360E-01 4.9460E-01 3.8580E-01 3.3010E-01

3.3430E-01 1.3040E+00 1.5340E+00 1.4930E-01 2.4560E-01 1.6100E-01 1.5180E-01

7.0040E-02 8.3630E-02 5.3270E-02 8.3150E-02 2.2020E-01 1.5870E-01 2.0400E-01

1.2470E-01 1.1800E-01 1.6570E-01 7.7130E-02 8.4040E-02 1.5690E-01 1.6330E-01

1.3060E-01 1.1230E-01 1.2460E-01 6.1590E-02 5.1100E-02 1.8160E-01 1.2410E+01

5.4990E+00 1.2260E+01 1.9920E-01 4.9270E-02 4.0300E-01 2.0860E+01 1.1980E+01

2.2780E+00 5.2850E-02 1.1110E+00 8.2610E+00 4.3730E+00 8.6100E-02 3.3560E-01

2.4740E-01 1.0870E-01 4.3450E-02 3.9850E-01 5.9600E-01 1.4070E-01 8.1810E-02

2.4310E-01 9.7180E-02 6.9940E-02 6.1560E-02 4.6750E-02 5.7350E-02 5.7500E-02

3.8440E-02 2.2120E-02 5.2750E-03 6.5000E-03 7.0840E-03 3.7750E-03 1.2550E-02

2.3370E-02 1.8130E-02 1.9900E-02 7.1450E-03 9.3220E-03 7.9530E-03 1.0990E-02

1.0330E-02 2.5830E-02 1.6690E-02 2.6210E-02 1.0870E-02 1.6420E-02 1.1290E-02

8.3630E-03 9.6360E-03 1.2170E-02 1.0310E-02 4.6410E-03 4.3470E-03 1.0180E-02

9.4260E-03 5.9490E-03 1.0360E-02 1.5930E-02 1.7780E-02 1.2960E-02 1.0380E-02

2.3070E-02 1.9060E-02 1.4720E-02 3.6910E-03 1.2990E-02 1.5020E-02 9.4330E-03

7.1830E-03 1.4720E-02 1.4710E-02 1.3990E-02 1.3900E-02 1.4060E-02 6.6200E-03

1.2240E-02 1.0550E-02 7.5950E-03 6.3970E-03 1.0540E-02 1.2570E-02 8.0050E-03

6.3070E-03 5.8840E-03 4.5850E-03 3.3550E-03 2.9230E-03 4.3100E-03 3.6690E-03

3.4290E-03 3.8260E-03 1.0830E-02 6.8970E-03 4.2320E-03 1.8500E-03 7.0970E-03

6.0960E-03 3.6480E-03 2.6350E-03 7.1110E-03 6.6050E-03 5.3930E-03 5.5570E-03

1.8220E+00 7.5990E-02 2.6220E-01 3.2290E-01 3.1480E-01 1.2370E-01 3.5140E-01

1.0650E+00 6.7160E-01 1.1090E-01 1.8440E-01 7.7070E-02 2.7490E-02 6.4330E-02

4.5650E-02 1.1910E-02 1.0820E-01 1.4040E-01 1.8350E-01 5.6310E-02 8.1440E-02

1.0880E-01 7.8450E-02 2.3130E-02 8.1900E-02 1.2250E-01 1.3010E-01 6.7850E-02

7.4450E-02 5.4470E-02 3.7610E-02 4.0610E-02 2.4650E-01 1.1690E+01 5.8210E-01

7.9120E+00 2.6280E-02 3.6520E-02 2.9890E-01 1.1990E+01 9.7850E+00 2.0720E+00

4.3560E-02 2.6990E+00 6.3570E+00 1.2490E-02 1.3010E-01 2.1480E-01 1.5970E-01

8.3050E-03 6.5470E-02 3.5580E-01 3.5390E-01 2.0920E-02 1.1700E-01 1.4340E-01

2.4660E-02 5.6110E-02 4.4390E-02 3.1900E-02 3.7130E-02 2.8660E-02 1.2820E-02

3.5170E-03 3.4030E-03 4.6980E-03 3.4770E-03 3.3340E-03 1.3000E-02 1.5590E-02

1.7270E-02 1.8510E-03 7.0700E-03 7.0070E-03 7.4500E-03 1.3320E-03 1.3490E-02

1.5990E-02 2.1730E-02 3.4280E-03 1.0560E-02 1.0290E-02 6.8550E-03 4.3520E-03

7.3320E-03 8.1520E-03 4.7880E-03 1.4580E-03 4.3210E-03 6.9290E-03 6.6980E-03

3.8280E-03 8.6440E-03 1.2670E-02 1.2860E-02 2.5520E-03 1.1310E-02 1.5400E-02

1.4950E-02 7.3690E-04 4.4380E-03 1.0140E-02 1.1940E-02 1.5800E-03 7.4630E-03

1.1210E-02 1.3390E-02 7.9540E-03 8.3860E-03 6.3000E-03 5.1840E-03 9.2910E-03

6.4660E-03 3.6800E-03 6.8070E-03 6.6990E-03 6.1820E-03 5.5370E-03 2.6240E-03

4.4180E-03 2.7640E-03 1.3950E-03 1.6250E-03 3.2250E-03 2.9880E-03 2.3210E-03

7.0590E-03 4.8980E-03 2.5720E-03 1.1810E-03 4.3970E-03 4.2780E-03 2.8600E-03

1.6500E-03 2.7900E-03 5.4850E-03 4.6990E-03 3.4700E-03 1.9390E-02 8.2780E-02

2.0600E-01 1.7940E-01 4.8910E-02 8.7200E-02 2.8090E-01 6.8750E-01 3.5700E-02

1.2440E-01 2.5220E-02 8.1620E-03 3.4970E-02 2.5860E-02 6.2610E-04 1.9010E-02

1.0440E-01 9.7870E-02 1.7100E-02 5.4960E-02 3.3590E-02 5.7050E-02 3.2380E-03

3.2390E-02 6.2750E-02 7.9670E-02 3.3410E-02 2.6780E-02 4.2130E-02 1.4860E-02

1.1130E-02 5.1840E-02 1.9800E-01 7.7140E+00 2.3200E+00 1.2910E-02 1.1030E-02

1.9730E-02 1.6410E-01 5.3530E+00 6.6650E+00 1.4590E-02 4.4950E-02 4.4740E+00

1.2560E-03 2.1240E-02 1.2230E-01 1.1350E-01 3.9790E-03 3.8310E-03 6.5980E-02

3.1770E-01 4.4280E-03 3.4220E-02 1.0200E-01 4.8620E-03 3.0990E-02 3.2530E-02

9.2850E-03 1.9620E-02 1.5310E-02 5.7990E-03 1.7580E-03 1.4740E-03 2.2610E-03

2.0680E-03 7.1820E-04 4.0890E-03 1.0680E-02 9.1630E-03 2.0530E-04 2.6650E-03

5.8830E-03 3.6660E-03 3.5130E-06 2.2560E-03 1.3300E-02 1.0860E-02 7.2530E-04

4.5830E-03 6.9780E-03 3.3270E-03 1.5740E-03 3.6380E-03 3.9350E-03 3.1290E-03

4.8650E-04 1.3640E-03 3.4950E-03 4.5390E-03 1.0670E-03 3.9080E-03 5.8800E-03

8.1530E-03 3.4370E-04 3.6660E-03 9.0130E-03 9.4540E-03 1.2630E-04 1.0070E-03

4.0090E-03 8.3370E-03 1.6280E-04 2.3130E-03 6.3060E-03 7.9310E-03 3.7770E-03

3.6590E-03 3.8950E-03 1.6190E-03 5.1870E-03 4.5470E-03 1.0620E-03 3.5630E-03

2.2490E-03 3.7320E-03 3.0650E-03 8.6230E-04 2.6140E-03 1.8790E-03 2.6170E-04

3.7370E-04 1.8750E-03 1.8850E-03 9.4550E-04 3.5300E-03 2.5470E-03 1.1900E-03

5.8750E-04 2.0450E-03 2.0320E-03 1.8990E-03 6.0200E-04 7.6090E-04 2.9750E-03

3.1070E-03 1.3790E-03 1.8910E+01 6.1750E+00 2.9860E+00 1.9470E+00 6.7620E-01

1.4830E-01 3.3650E-02 1.2460E+00 4.8110E-01 1.6920E-01 5.4390E-01 1.0600E-01

3.0050E-02 1.6250E+00 5.3760E-01 1.4950E-01 4.1070E-02 1.5670E+00 4.6230E-01

1.4130E-01 4.5400E-02 1.1270E+00 4.2920E-01 1.3750E-01 4.5480E-02 7.7310E-01

3.3850E-01 1.4690E-01 5.7330E-02 5.9660E-01 2.5620E-01 9.4150E-02 2.8060E-02

5.1590E-03 5.6230E-01 2.8390E-01 1.2100E-01 4.1500E-02 1.0550E-02 1.8230E-03

2.0320E-01 9.1780E-02 1.7680E-02 1.3290E+01 2.9090E-01 8.6060E-02 1.6900E-02

6.2460E+00 7.1880E-01 9.7870E-02 2.4870E-02 3.4580E-01 1.3500E-01 1.7900E-02

6.5730E-01 2.8990E-01 1.3900E-01 7.6210E-02 4.7290E-02 2.1840E-02 9.5230E-03

7.4600E-02 1.0930E-01 6.5210E-02 8.3990E-03 4.7790E+00 4.8660E-01 3.8520E-02

4.2870E-03 1.9530E-01 9.1360E-02 2.3610E-02 2.7740E-03 2.2690E-01 1.5840E-01

2.8340E-02 2.7360E-03 2.2450E+00 4.6640E-02 8.5600E-03 1.3820E-03 8.9320E-01

3.0180E-02 5.9160E-03 1.8730E-03 1.1210E+00 1.4650E-01 1.6310E-02 2.8150E-03

1.6030E+00 1.7650E-01 2.4430E-02 3.8920E-03 4.0480E+00 5.9730E-01 2.0730E-02

3.9200E-03 1.0970E+00 1.2510E-01 2.6710E-02 3.4900E-03 2.7470E-01 1.0020E-01

2.5600E-02 3.0790E-03 3.0100E-02 1.3110E-02 2.3060E-03 4.5850E-01 3.4470E-02

1.1430E-02 2.4120E-03 6.2960E-02 2.0820E-02 6.1080E-03 1.2690E-03 1.8090E-01

1.6190E-02 4.0990E-03 8.4910E-04 8.2900E-02 2.3430E-02 6.9890E-03 1.1390E-03

2.2820E-02 8.6250E-03 5.7930E-03 7.5020E-04 1.1990E-01 8.5310E-03 2.4520E-03

3.6360E-04 1.9300E-01 3.8930E-02 5.5260E-03 1.0620E-03 2.2240E+01 5.8220E+00

8.3180E-01 7.6490E-01 5.3510E-01 1.2450E-01 7.4250E-01 5.4830E-01 2.1740E-01

2.5290E-01 2.3820E-01 5.5140E-02 3.7580E-01 8.6320E-01 5.0720E-01 1.5800E-01

4.5940E-01 8.2440E-01 3.7510E-01 1.2940E-01 3.5420E-01 5.6410E-01 3.6280E-01

1.3450E-01 3.9170E-01 3.7180E-01 2.0920E-01 8.4200E-02 2.2220E-01 2.7120E-01

1.7610E-01 9.0450E-02 3.6590E-02 2.0800E-01 2.0520E-01 1.8940E-01 1.2810E-01

6.2690E-02 2.0290E-02 1.1640E-01 7.0860E-02 6.2760E-02 1.7880E+00 8.8800E+00

1.9570E-01 6.9210E-02 7.2800E-01 3.9350E+00 7.8160E-01 9.7850E-02 2.0820E-01

1.1560E-01 8.0460E-02 2.8980E-01 3.3280E-01 2.1460E-01 9.2290E-02 3.0880E-02

2.2690E-02 9.4510E-03 5.9670E-02 8.1590E-02 2.5860E-02 3.9230E-02 8.9400E-02

3.4440E+00 6.0160E-01 4.4660E-02 6.3760E-02 1.4450E-01 8.6080E-02 2.7770E-02

8.8620E-02 2.8130E-01 1.7150E-01 3.4120E-02 2.9530E-01 1.4980E+00 3.3370E-02

7.9170E-03 1.7210E-01 5.8790E-01 1.9840E-02 5.0720E-03 1.4590E-01 7.0570E-01

1.5860E-01 1.7860E-02 7.3290E-02 1.0080E+00 1.9690E-01 2.7780E-02 4.2770E-01

3.7140E+00 5.2100E-01 2.2380E-02 7.1600E-02 7.7590E-01 1.4380E-01 3.0740E-02

7.2080E-02 1.2770E-01 9.2090E-02 3.0130E-02 1.8580E-02 1.0760E-02 7.2460E-03

8.2110E-02 2.9040E-01 1.8700E-02 9.9040E-03 2.0800E-02 3.1840E-02 1.5330E-02

6.4490E-03 3.5290E-02 1.1180E-01 1.0710E-02 3.4340E-03 1.9020E-02 4.9040E-02

1.9940E-02 7.8770E-03 1.8260E-02 6.8530E-03 2.7090E-03 3.3340E-03 2.2030E-02

7.4910E-02 6.1110E-03 2.0140E-03 3.3120E-02 1.1570E-01 3.8820E-02 5.9760E-03

1.8590E+01 2.7640E-01 6.5850E-01 4.2120E-01 3.4270E-01 4.4070E-01 4.3410E-01

2.5080E-01 1.1120E-01 1.8860E-01 1.0960E-01 7.1430E-02 3.4830E-01 5.8890E-01

4.2310E-01 1.4020E-01 3.7300E-01 5.4370E-01 2.8620E-01 9.8120E-02 3.0310E-01

3.7480E-01 2.9570E-01 2.0030E-01 2.6140E-01 2.1980E-01 1.1390E-01 7.1680E-02

1.5220E-01 1.7910E-01 1.3410E-01 6.5020E-02 4.1090E-02 1.5000E-01 1.3810E-01

1.2120E-01 1.0110E-01 6.0320E-02 5.3050E-02 6.9100E-02 6.5250E-02 2.0680E-01

2.0780E+00 5.7930E+00 1.2420E-01 9.6300E-02 7.6210E-01 2.6420E+00 5.9310E-01

1.0450E-01 1.1590E-01 7.9430E-02 1.3890E-01 2.1460E-01 1.9890E-01 1.4430E-01

2.0070E-02 1.7680E-02 9.4510E-03 4.4760E-02 4.5780E-02 3.6230E-02 2.7550E-02

1.2540E-02 9.8890E-02 3.6950E+00 4.6390E-01 9.5740E-03 5.9080E-02 1.0270E-01

7.3380E-02 9.0970E-04 1.0160E-01 1.8760E-01 1.4140E-01 2.8360E-02 3.4980E-01

9.7460E-01 2.2030E-02 1.5920E-02 1.4480E-01 3.7750E-01 1.3020E-02 1.6030E-02

1.5830E-01 4.7630E-01 1.2110E-01 1.3250E-02 6.4910E-02 7.4490E-01 1.5530E-01

1.9660E-02 5.1720E-01 2.5080E+00 3.9050E-01 1.5930E-02 5.7700E-02 5.7540E-01

1.1660E-01 1.0360E-02 6.5040E-02 8.5410E-02 7.9160E-02 1.0040E-02 1.0370E-02

6.7300E-03 1.9660E-02 7.7710E-02 1.9110E-01 1.2930E-02 6.0980E-03 1.5320E-02

2.1630E-02 1.2220E-02 7.5780E-03 3.3390E-02 7.1840E-02 6.7400E-03 4.7740E-03

1.5940E-02 3.5130E-02 1.6840E-02 1.3690E-02 3.7520E-03 2.9400E-03 2.0740E-03

4.0440E-03 2.2320E-02 4.8110E-02 4.0140E-03 5.5050E-03 3.8760E-02 7.7800E-02

2.9770E-02 7.8160E-02 2.8210E-01 4.9050E-01 2.8830E-01 2.3230E-01 3.1060E-01

2.1840E-01 4.7330E-02 1.0220E-01 1.2370E-01 1.9870E-02 6.6470E-02 2.7420E-01

5.9540E-01 4.5310E-02 1.2900E-01 2.8580E-01 4.3660E-01 3.0650E-02 8.8760E-02

2.3800E-01 3.5640E-01 1.0070E-01 1.4610E-01 1.6800E-01 1.1620E-01 1.4200E-02

7.0440E-02 1.1310E-01 1.2220E-01 7.9810E-02 4.3810E-03 3.8270E-02 9.7220E-02

1.1720E-01 9.7170E-02 5.3280E-02 1.6470E-02 5.9870E-02 4.8520E-02 4.0360E-02

2.3380E-01 1.5830E+00 3.6070E+00 2.4540E-02 9.8170E-02 5.9270E-01 2.0810E+00

4.0610E-02 1.0510E-01 5.7080E-02 7.6200E-02 9.2270E-02 1.4430E-01 1.5190E-01

1.2090E-02 1.1220E-02 7.8600E-03 2.9830E-02 1.8840E-02 4.4350E-02 1.0550E-02

2.3040E-03 1.3420E-02 7.7220E-02 2.8040E+00 2.4450E-04 1.1120E-02 4.7700E-02

1.0110E-01 9.5220E-05 9.8500E-04 7.7310E-02 2.0480E-01 3.8020E-03 3.4700E-02

2.4740E-01 6.1020E-01 3.2650E-03 1.8590E-02 1.2410E-01 2.7230E-01 2.7500E-03

1.7740E-02 1.2100E-01 3.7370E-01 1.6430E-03 1.4500E-02 5.2090E-02 5.7710E-01

3.6770E-03 2.1920E-02 5.4360E-01 1.9570E+00 1.4660E-03 1.8030E-02 4.7720E-02

4.4630E-01 1.0160E-04 1.2120E-02 5.3580E-02 9.2720E-02 4.7960E-03 8.6650E-03

4.8370E-03 5.6650E-03 1.9460E-02 6.0530E-02 1.1640E-01 1.2670E-03 6.4460E-03

1.2210E-02 1.8090E-02 1.9690E-03 7.6800E-03 2.5710E-02 4.4560E-02 5.3480E-04

5.2790E-03 1.3270E-02 3.0110E-02 9.1280E-03 1.7450E-03 3.1660E-03 9.4470E-04

9.5210E-04 4.4730E-03 1.6510E-02 2.9940E-02 9.5250E-04 6.0310E-03 2.9770E-02

6.1670E-02 1.5230E+01 4.4600E+00 1.8110E+00 1.0450E+00 5.0540E-01 6.2430E-02

2.1440E-01 8.6040E-02 1.7680E-02 3.2660E-01 1.6850E-01 7.4220E-02 2.0340E-02

3.0010E-01 1.4940E-01 7.3820E-02 3.2310E-02 2.9880E-01 1.4440E-01 6.2510E-02

2.3030E-02 2.2520E-01 1.1760E-01 6.3760E-02 2.8860E-02 1.6850E+00 6.1590E-01

1.6460E-01 3.2770E-02 6.4520E-03 2.2920E+00 7.4060E-01 2.0270E-01 4.7900E-02

1.2170E-02 4.0220E-03 1.1440E+00 1.4970E-01 1.4000E-02 3.2470E+01 5.0750E+00

7.1960E-02 1.2760E-02 4.4660E+01 5.6160E+00 3.7640E-01 5.5800E-02 2.1190E+01

1.0240E-01 3.3890E-02 7.3440E-02 4.6020E-02 2.4200E-02 9.8140E-03 4.3320E-02

2.7330E-02 1.2220E-02 4.1610E-03 2.1760E-02 4.0920E-03 1.8430E-03 7.8570E-02

3.9010E-02 1.6530E-02 4.2520E-03 1.1780E-02 6.6920E-03 3.3210E-03 1.3020E-03

2.9540E-02 1.6100E-02 7.2840E-03 2.0520E-03 2.6000E-01 4.5930E-02 4.5590E-03

9.5060E-04 3.1280E-01 5.5630E-02 8.4570E-03 2.7720E-03 2.8600E-02 1.0230E-02

4.5480E-03 1.3460E-03 4.5640E-02 2.4420E-02 1.1010E-02 3.9040E-03 2.6620E-01

4.8450E-02 1.0570E-02 2.5160E-03 2.2130E-02 1.0250E-02 4.0810E-03 1.0510E-03

2.6480E-02 1.0920E-02 4.5070E-03 1.6420E-03 1.5310E-01 1.4900E-02 7.6960E-03

2.9250E-02 1.5150E-02 6.3440E-03 2.0020E-03 1.2830E-02 7.6530E-03 4.6210E-03

2.7610E-03 1.7610E-02 1.2220E-02 6.0060E-03 1.9680E-03 4.6370E-03 3.2220E-03

1.9760E-03 9.1010E-04 1.0850E-02 3.3630E-02 2.3770E-03 1.2390E-03 1.0220E-02

3.9440E-03 1.6240E-03 6.8580E-04 3.3410E-02 6.5830E-03 1.3880E-03 4.2830E-04

1.4890E+01 2.6710E+00 6.2860E-01 2.5600E-01 3.2290E-01 1.1480E-01 7.4450E-02

4.9470E-02 1.1290E-01 1.3390E-01 1.1500E-01 8.1850E-02 1.2560E-01 1.3890E-01

9.3930E-02 5.7900E-02 1.0180E-01 1.3540E-01 1.0230E-01 6.1970E-02 1.1170E-01

1.2400E-01 6.9050E-02 2.7700E-02 3.2720E-01 7.8200E-01 5.5180E-01 2.2700E-01

4.4570E-02 4.4160E-02 1.1880E+00 8.0510E-01 3.3250E-01 9.0600E-02 1.4780E-02

2.6770E-01 5.9730E-01 1.1560E-01 5.0300E+00 1.6250E+01 6.7460E+00 7.1480E-02

3.7500E-01 3.0750E+01 6.4200E+00 4.5880E-01 4.8700E+00 1.1060E+01 5.4140E-02

4.1380E-02 2.6800E-02 2.5070E-02 2.0030E-02 3.1470E-02 1.9330E-02 1.1270E-02

3.2490E-03 6.9050E-03 1.0590E-02 1.7370E-03 2.8690E-02 3.2020E-02 2.5170E-02

1.8220E-02 4.9010E-03 4.8370E-03 4.1890E-03 3.4720E-03 1.0180E-02 1.1870E-02

1.0670E-02 8.3050E-03 5.1310E-02 1.3260E-01 5.5930E-02 4.1220E-03 6.1180E-02

1.5320E-01 5.3030E-02 5.9250E-03 7.9040E-03 1.3600E-02 7.6410E-03 4.5510E-03

1.8420E-02 1.9300E-02 1.5270E-02 1.1280E-02 1.9560E-02 1.7600E-01 4.8030E-02

1.1310E-02 8.0810E-03 9.3710E-03 7.0860E-03 5.0330E-03 6.4640E-03 1.1730E-02

7.7830E-03 4.7670E-03 4.5730E-02 8.0190E-02 5.3540E-03 1.5130E-02 1.1210E-02

8.3630E-03 5.1420E-03 6.6950E-03 6.6550E-03 4.7620E-03 2.8050E-03 1.2220E-02

6.2040E-03 5.8820E-03 4.0820E-03 2.7300E-03 1.8590E-03 1.6920E-03 1.6650E-03

8.1360E-03 9.6200E-03 1.7640E-02 8.5540E-04 3.9440E-03 4.3310E-03 2.5950E-03

8.4620E-04 1.7970E-03 1.8200E-02 6.7400E-03 1.3210E-03 9.6070E+00 2.6640E-01

3.2980E-01 2.1090E-01 5.0560E-02 6.5660E-02 4.2430E-02 2.5430E-02 7.3590E-02

9.4390E-02 9.9660E-02 5.2320E-02 7.6190E-02 8.8560E-02 6.2570E-02 3.0550E-02

6.7960E-02 8.9440E-02 8.0770E-02 6.1350E-02 6.9050E-02 6.1560E-02 3.1230E-02

2.5890E-02 3.2160E-01 4.0200E-01 3.4920E-01 2.0130E-01 1.4660E-02 2.7530E-02

5.5000E-01 5.9950E-01 3.4480E-01 1.1240E-01 3.7240E-02 2.9390E-01 3.2130E-01

7.6320E-02 6.7250E+00 7.5740E+00 4.7850E+00 8.0480E-02 2.9690E-01 2.0010E+01

5.3120E+00 6.0230E-01 5.6500E+00 4.4010E+00 1.7140E-02 2.2770E-02 1.9300E-02

1.6660E-02 2.0140E-02 1.4460E-02 7.5790E-03 2.0800E-03 3.2010E-03 5.9230E-03

4.2750E-03 7.3570E-03 1.7280E-02 2.3520E-02 2.0910E-02 1.4350E-03 2.8350E-03

3.6240E-03 3.5750E-03 2.2640E-03 6.5210E-03 8.9040E-03 9.7410E-03 4.4130E-03

5.5800E-02 6.0740E-02 3.8450E-02 8.2890E-03 5.2770E-02 7.3750E-02 4.5800E-02

2.9850E-03 5.3960E-03 9.0740E-03 5.6380E-03 5.7390E-03 1.0550E-02 1.4400E-02

1.2050E-02 5.4900E-03 1.2400E-02 1.1130E-01 3.6320E-02 1.9260E-03 4.6510E-03

7.6310E-03 5.8340E-03 1.9180E-03 4.0660E-03 8.1640E-03 6.5700E-03 1.4440E-02

4.2520E-02 3.0710E-02 6.3400E-03 8.3590E-03 7.3320E-03 4.1720E-03 3.6460E-03

3.8500E-03 3.6870E-03 2.6650E-03 6.0070E-03 5.8810E-03 4.5400E-03 2.4950E-03

1.1730E-03 1.3700E-03 1.3890E-03 1.2280E-03 5.4250E-03 3.0060E-03 9.5660E-03

6.6100E-03 1.6250E-03 2.5950E-03 2.3370E-03 1.2830E-03 7.3120E-04 1.0290E-03

1.2340E-02 4.1820E-03 7.0640E-02 2.5620E-01 7.6600E-02 1.6360E-02 4.0380E-02

2.2840E-02 1.4390E-03 2.6260E-02 5.2200E-02 6.6440E-02 1.6800E-02 3.4220E-02

4.2910E-02 4.5840E-02 6.5570E-03 2.4820E-02 4.4370E-02 5.7970E-02 2.8850E-02

2.7700E-02 3.1230E-02 2.4120E-02 6.7080E-03 1.9700E-02 1.8720E-01 2.5790E-01

1.7770E-01 5.3340E-03 8.1060E-03 1.3980E-02 1.9850E-01 3.3770E-01 2.5990E-01

4.0860E-03 4.8620E-02 2.7250E-01 1.1890E-02 6.9910E-02 4.7800E+00 4.6940E+00

3.7730E-02 3.8020E-02 2.0510E-01 1.2530E+01 2.4250E-02 9.2360E-01 4.3570E+00

4.9350E-03 1.2540E-02 1.2530E-02 7.5710E-03 9.4630E-03 7.9050E-03 3.5970E-03

1.0400E-03 1.4280E-03 1.6410E-03 3.4440E-03 4.0700E-04 7.6680E-03 1.1900E-02

1.4280E-02 2.2730E-04 1.3550E-03 1.9500E-03 2.2430E-03 4.3880E-06 2.4700E-03

4.8470E-03 6.3280E-03 9.4880E-04 4.1190E-03 3.8420E-02 3.7560E-02 2.7520E-03

5.8670E-03 4.5780E-02 4.2970E-02 5.4150E-04 2.6280E-03 3.2730E-03 4.9740E-03

8.0860E-04 4.9140E-03 6.7820E-03 8.1180E-03 8.7080E-04 5.2060E-03 7.9700E-03

7.1070E-02 1.2260E-04 1.9160E-03 3.1960E-03 4.9440E-03 2.5910E-04 1.6280E-03

2.8100E-03 5.8220E-03 5.7030E-03 8.8400E-03 2.9690E-02 2.0010E-03 5.1410E-03

4.1710E-03 2.3320E-03 1.6730E-03 1.7400E-03 1.7800E-03 1.7190E-03 1.9680E-03

4.0820E-03 2.4950E-03 8.8570E-04 3.1580E-04 8.6850E-04 7.9240E-04 6.9960E-04

2.7120E-03 9.2140E-04 2.3960E-03 5.9120E-03 6.8570E-04 8.4610E-04 1.2830E-03

8.4610E-04 2.0420E-04 5.2230E-04 5.7660E-04 6.7900E-03 8.6670E-01 3.7040E-01

3.3050E+00 2.0450E-01 6.2160E-02 1.4940E-01 8.1400E-02 4.2000E-02 2.0870E-02

5.5910E-01 2.5590E-01 1.1070E-01 4.8130E-02 1.3330E-01 8.5260E-02 4.9550E-02

2.6060E-02 4.7620E-01 2.9870E-01 1.4160E-01 4.8180E-02 2.0910E-01 1.4090E-01

8.1400E-02 4.0860E-02 1.5490E-02 2.2970E-01 1.8890E-01 1.2820E-01 7.2690E-02

3.3730E-02 1.1670E-02 2.1250E-01 1.2560E-01 3.6810E-02 3.4500E+00 9.0680E-01

1.8250E-01 4.3820E-02 4.6370E-01 3.6570E-01 1.9900E-01 7.1010E-02 7.7320E+00

3.3500E+00 4.6100E-02 3.0200E-01 1.2940E-01 5.0320E-02 1.9830E-02 2.5870E-01

1.4810E-01 8.2950E-02 9.0070E-01 9.2100E-01 6.3140E-01 1.7550E-02 9.4500E-02

4.4170E-02 1.7630E-02 8.1320E-03 1.2160E-02 7.0380E-03 3.5390E-03 1.4490E-03

2.2810E-02 1.1450E-02 5.0010E-03 1.6570E-03 1.5710E+00 4.9040E-01 9.3590E-02

1.1300E-02 1.7850E+00 4.2150E-01 6.2380E-02 5.6320E-03 6.5670E-02 2.7730E-02

1.0060E-02 3.1160E-03 1.1510E-01 5.3920E-02 2.2490E-02 7.9570E-03 3.8950E-02

2.3880E-02 1.4420E-02 6.3730E-03 1.0200E-02 5.7050E-03 2.9250E-03 1.4730E-03

6.3810E-03 4.1020E-03 2.1430E-03 8.7680E-04 1.6480E+00 7.2010E-01 1.6180E-02

9.3650E-01 2.9980E-01 4.4510E-02 9.4080E-03 1.2190E-01 9.9200E-02 5.8190E-02

2.5110E-02 1.1350E+00 2.9680E-01 7.1500E-02 1.7740E-02 1.7720E-01 7.9070E-02

3.0980E-02 8.9380E-03 8.2510E-01 2.5280E-01 1.2410E-01 1.5520E-02 3.0010E-01

1.0230E-01 4.3980E-02 2.1000E-02 6.2300E-02 2.7920E-02 1.0680E-02 3.1180E-03

3.5520E-01 2.0440E-01 2.0640E+00 1.1380E-01 2.7960E-02 6.6050E-02 6.0920E-02

4.0970E-02 1.0290E-01 2.5540E-01 1.9770E-01 1.0090E-01 5.0600E-02 5.1520E-02

5.0150E-02 4.4230E-02 2.3790E-01 1.4980E-01 1.5510E-01 1.0660E-01 8.9380E-02

7.6340E-02 7.1560E-02 5.7880E-02 3.2420E-02 1.4840E-01 5.2420E-02 5.2160E-02

7.1650E-02 7.2800E-02 4.5420E-02 1.0590E-01 4.5680E-02 9.7320E-02 1.5750E-01

1.7790E+00 9.3190E-01 1.9080E-01 3.0270E-01 6.9460E-02 1.4730E-01 2.1250E-01

3.3390E+00 1.0090E+00 3.0580E+00 4.3680E-02 1.3350E-01 1.0460E-01 5.2410E-02

1.4760E-01 1.4410E-01 3.5650E-02 5.3390E-01 4.3880E-01 1.6070E-01 4.7410E-01

1.0960E-02 4.1490E-02 3.6270E-02 2.1020E-02 2.6660E-03 4.4390E-03 4.5060E-03

4.1690E-03 2.2750E-03 9.2070E-03 9.3720E-03 6.3320E-03 3.7890E-02 7.7070E-01

4.3420E-01 1.0060E-01 2.3970E-02 9.3110E-01 4.5280E-01 1.1450E-01 8.6990E-03

2.7780E-02 2.2220E-02 1.1660E-02 1.6070E-02 4.7870E-02 4.2990E-02 2.6500E-02

1.4870E-02 1.4170E-02 1.3700E-02 1.0270E-02 2.2640E-03 4.8200E-03 4.1420E-03

2.4370E-03 1.5460E-03 2.7380E-03 2.4710E-03 2.3210E-03 7.1570E-01 2.2560E-01

6.4650E-01 3.5080E-02 4.4800E-01 2.5550E-01 4.9170E-02 8.0190E-02 2.7700E-02

4.0860E-02 5.1420E-02 4.3050E-02 6.0000E-01 3.0870E-01 5.5170E-02 1.6300E-02

7.4620E-02 6.6040E-02 3.8230E-02 5.4930E-01 1.2350E-01 4.3400E-02 9.7060E-02

4.7270E-02 1.6560E-01 8.5520E-02 1.7810E-02 1.1300E-02 2.4650E-02 2.0960E-02

1.2780E-02 6.2070E-02 1.1380E-01 1.0110E+00 8.0030E-03 1.5260E-02 3.0410E-02

4.3220E-02 3.0850E-02 5.2900E-02 1.1170E-01 1.2990E-01 1.1930E-02 2.6990E-02

3.1340E-02 2.8020E-02 5.1830E-02 1.3730E-01 9.5200E-02 3.9660E-02 1.9660E-02

4.7510E-02 4.6480E-02 3.3790E-02 1.7220E-02 1.5820E-03 7.5260E-02 7.3060E-02

4.5630E-02 2.0060E-02 5.7430E-03 1.4840E-02 7.7820E-02 3.2290E-02 5.3800E-02

7.7780E-02 7.1860E-01 6.8050E-01 1.8860E-02 1.9130E-01 1.2460E-01 3.0430E-02

4.4280E-02 3.0560E+00 6.1470E-01 9.9470E-03 2.3870E-02 6.0530E-02 7.2790E-02

8.2780E-02 3.5640E-02 4.2040E-02 2.9930E-01 1.7800E-02 4.2750E-01 9.5720E-02

3.7670E-03 6.0690E-03 1.8260E-02 2.6760E-02 2.9950E-04 1.5510E-03 2.8170E-03

3.2730E-03 9.6430E-05 1.3310E-03 4.4610E-03 7.6170E-03 1.0030E-02 2.2950E-02

3.9600E-01 4.6250E-01 6.5310E-03 1.4000E-02 5.2030E-01 3.6770E-01 1.3130E-03

5.2050E-03 1.3310E-02 1.5490E-02 2.1230E-03 9.4640E-03 2.3250E-02 3.2520E-02

4.1230E-03 7.5940E-03 8.4190E-03 5.8710E-03 6.6870E-04 1.0780E-03 2.0510E-03

2.5190E-03 9.7660E-05 9.8900E-04 1.6120E-03 2.2250E-03 1.5260E-02 6.4510E-01

1.3290E-01 1.1560E-02 1.7190E-02 1.8030E-01 2.6020E-01 1.2660E-02 4.7010E-02

3.1510E-02 9.0450E-03 2.3660E-02 1.4370E-02 2.3350E-01 2.2830E-01 1.4000E-03

7.9110E-03 3.4810E-02 5.0720E-02 2.7410E-01 1.5340E-02 9.6970E-02 1.9980E-02

2.8930E-02 1.3290E-02 5.9540E-02 5.5860E-02 8.9240E-04 6.9380E-03 1.3020E-02

1.3930E-02 2.6640E+00 4.7440E-01 3.6830E-01 1.9720E-01 1.0440E-01 5.2820E-02

4.7640E-01 3.2810E-01 2.2960E-01 1.6530E-01 2.7710E-01 1.7170E-01 9.8460E-02

4.9360E-02 3.5310E-01 2.4490E-01 1.4980E-01 6.1910E-02 7.2150E-02 4.4120E-02

2.3830E-02 1.2040E-02 4.7540E-03 7.9420E-02 4.5820E-02 2.4750E-02 1.2330E-02

5.5030E-03 1.9690E-03 3.3150E-02 2.2810E-02 1.0120E-02 2.6990E-01 1.1560E-01

4.3370E-02 1.4800E-02 1.0250E-01 6.5160E-02 3.5120E-02 1.5440E-02 5.8130E-01

2.9040E-01 1.9690E-02 1.6390E-01 7.7510E-02 3.6300E-02 1.6870E-02 1.8440E-01

1.7690E-01 1.1580E-01 8.2570E+00 1.3120E+01 5.6630E+00 1.5090E-01 3.2310E-02

1.8170E-02 1.0820E-02 6.6920E-03 1.1370E-02 6.4000E-03 3.1730E-03 1.2620E-03

2.4810E-02 1.2600E-02 5.5840E-03 1.8060E-03 2.4040E+01 5.7250E+00 8.1690E-01

3.5860E-02 8.1830E-02 3.1250E-02 1.9670E-02 1.4390E-02 2.8840E-02 1.8120E-02

1.1530E-02 6.2850E-03 2.5180E-02 1.8180E-02 1.4140E-02 1.5030E-02 2.8980E-02

1.8430E-02 8.9880E-03 3.8470E-03 9.3380E-03 5.8180E-03 4.2360E-03 2.0240E-03

1.2770E-02 8.5820E-03 4.9680E-03 2.2680E-03 5.1330E-01 1.8170E-01 6.2830E-03

3.2070E-02 1.7770E-02 1.0140E-02 5.1530E-03 2.9790E-02 2.1130E-02 1.1100E-02

6.5630E-03 2.0150E-01 4.2990E-02 1.3250E-02 5.8560E-03 2.1450E-02 1.0340E-02

4.6520E-03 1.8830E-03 1.0400E-01 1.0920E-01 5.6130E-02 4.0240E-03 3.5950E-02

1.2480E-02 6.7430E-03 3.3240E-03 9.0120E-03 5.1670E-03 2.4770E-03 8.7880E-04

1.9020E+00 7.5540E-02 1.5710E-01 1.4940E-01 1.0260E-01 2.3580E-01 2.6960E-01

1.8980E-01 1.0030E-01 9.9160E-02 1.0390E-01 1.0220E-01 9.0720E-02 2.0390E-01

1.5940E-01 1.2090E-01 6.6660E-02 2.5300E-02 2.7770E-02 2.4790E-02 1.8260E-02

9.5160E-03 1.5500E-02 2.7410E-02 2.7190E-02 2.1600E-02 1.4280E-02 6.9510E-03

1.9920E-02 9.5350E-03 1.4450E-02 5.7780E-02 1.3160E-01 9.0000E-02 3.2560E-02

4.5320E-02 3.4440E-02 3.4990E-02 3.1560E-02 2.4540E-01 7.0170E-02 2.4410E-01

3.6150E-02 7.2130E-02 5.8340E-02 3.1710E-02 1.7640E-01 1.1110E-01 2.8570E-02

5.4890E+00 5.6290E+00 2.2970E+00 7.1160E+00 8.8660E-03 1.6660E-02 1.3020E-02

7.6510E-03 2.5790E-03 4.1850E-03 4.3460E-03 3.6810E-03 2.8150E-03 9.8750E-03

9.9690E-03 7.2530E-03 3.0700E-01 1.7090E+01 6.4930E+00 1.1950E+00 2.0470E-02

3.9300E-02 2.3160E-02 6.2880E-03 1.1920E-02 1.4880E-02 1.1110E-02 6.4470E-03

1.2700E-02 1.5310E-02 1.1450E-02 6.2950E-03 1.1550E-02 9.3770E-03 9.7600E-03

8.2980E-03 3.4990E-03 4.1880E-03 3.5410E-03 2.5720E-03 4.9750E-03 4.1000E-03

4.6690E-03 5.3090E-03 1.6070E-01 4.9610E-02 1.3730E-01 1.5050E-02 1.7730E-02

1.0160E-02 4.8720E-03 1.3220E-02 1.2140E-02 9.8400E-03 8.2120E-03 1.0930E-02

7.2020E-02 4.5480E-02 1.4500E-02 3.3480E-03 9.2300E-03 8.1300E-03 4.9160E-03

4.7000E-02 5.5710E-02 2.1180E-02 4.0250E-02 7.8450E-03 2.1500E-02 1.1800E-02

3.2350E-03 3.1630E-03 2.8420E-03 2.8890E-03 2.4740E-03 1.9890E-02 3.9070E-02

7.4580E-02 1.0510E-01 1.2080E-01 9.0770E-02 9.1360E-02 8.3950E-02 2.0460E-02

5.3120E-02 6.4010E-02 5.8310E-02 7.6480E-02 9.0860E-02 6.8580E-02 3.5380E-02

5.9430E-03 1.3010E-02 1.4730E-02 1.2250E-02 6.7750E-03 1.6790E-03 7.5630E-03

1.2770E-02 1.4650E-02 1.2500E-02 7.1560E-03 5.6550E-03 1.1610E-02 4.5980E-03

1.7580E-02 2.9990E-02 5.9970E-02 5.1440E-02 8.2390E-03 2.5560E-02 2.3490E-02

1.5430E-02 1.4830E-02 2.2010E-01 4.7150E-02 1.1410E-02 1.8370E-02 3.4070E-02

3.6790E-02 1.2210E-01 2.8530E-02 1.3960E-02 2.7350E+00 1.2010E-01 5.1130E+00

1.1040E+00 4.3320E-03 3.7960E-03 6.3900E-03 8.1330E-03 8.2490E-05 1.5340E-03

2.5880E-03 3.1160E-03 2.9230E-05 1.6830E-03 5.0590E-03 8.2170E-03 8.7900E-03

2.2640E-01 6.8900E+00 6.7780E+00 1.9660E-02 6.1960E-03 1.6370E-02 1.4160E-02

4.9780E-03 4.8510E-03 5.8100E-03 5.4190E-03 8.0480E-03 4.6290E-03 5.1220E-03

5.4120E-03 2.0110E-03 7.2090E-03 6.6720E-03 4.2290E-03 5.9290E-04 1.6060E-03

1.9310E-03 2.0250E-03 3.8940E-04 2.9100E-03 3.3510E-03 2.8150E-03 5.3720E-03

1.4250E-01 2.9150E-02 6.8870E-03 5.2030E-03 5.8110E-03 5.5310E-03 4.7700E-03

9.3790E-03 5.7610E-03 2.7540E-03 7.3560E-03 5.0510E-03 3.5350E-02 3.4410E-02

8.0270E-04 1.7740E-03 4.3030E-03 5.9250E-03 2.2390E-02 3.9460E-03 4.0080E-02

9.0600E-03 4.5400E-03 2.5230E-03 7.1520E-03 5.8920E-03 3.6460E-04 1.9210E-03

1.9650E-03 1.4710E-03 7.4880E+00 4.5210E-01 7.7190E-02 2.7880E+00 6.9140E-01

1.0060E-01 1.5310E-02 2.8790E+00 8.7370E-01 2.2730E-01 3.0490E-02 5.7370E-01

3.3010E-01 7.6230E-02 1.6740E-02 1.6990E-01 7.4510E-02 2.8220E-02 8.0330E-03

1.0370E-03 1.6600E-01 7.5460E-02 2.9470E-02 9.5350E-03 2.2060E-03 2.7000E-04

1.0890E-01 3.9320E-02 5.5530E-03 1.5320E-01 4.4830E-02 1.1510E-02 2.1760E-03

1.8010E-01 6.1590E-02 1.6300E-02 2.8830E-03 4.7730E-02 1.7640E-02 2.2520E-03

8.3370E-01 1.8380E-01 9.1070E-02 1.8160E-02 9.5770E-02 1.5240E-02 1.7810E-03

7.3360E-03 1.1470E-02 6.5460E-03 9.3920E-04 2.3850E+01 6.8530E-01 2.5130E-02

7.4690E-04 3.7100E+01 2.8430E+00 7.0310E-02 1.5200E-03 5.2390E+01 3.5400E+00

1.0800E-01 3.0550E-03 1.8720E-02 4.7710E-03 9.4780E-04 1.2540E-04 3.8770E-02

6.8700E-03 5.7410E-04 7.2090E-05 4.9670E-02 1.5580E-02 3.3650E-03 2.1450E-04

8.6040E+00 2.1320E-01 8.7870E-03 4.0620E-03 1.3030E-01 3.8870E-02 9.1060E-03

1.2260E-03 8.6230E-01 9.4530E-02 1.8250E-02 3.7200E-03 2.6700E+00 2.2420E-01

2.3600E-02 3.2240E-03 8.1910E-03 8.3950E-04 4.0330E-05 2.5880E-02 5.6860E-03

7.3940E-04 5.5700E-05 3.9260E-02 6.7050E-03 1.8230E-03 2.2680E-04 3.8690E-02

8.7100E-03 7.5370E-04 1.1910E-04 5.9540E-01 1.8030E-02 2.8910E-03 5.3150E-04

3.4510E-03 3.4790E-03 1.8320E-03 4.2840E-04 3.0590E-02 6.0700E-03 1.4060E-03

2.1070E-05 4.5800E-02 9.5310E-03 1.7540E-03 2.1630E-04 1.0120E+01 5.0940E-01

9.6140E-01 1.3780E+00 6.5040E-01 1.0580E-01 9.5010E-01 1.6710E+00 8.6090E-01

2.4950E-01 4.9780E-01 4.9950E-01 2.4150E-01 6.1970E-02 8.1440E-02 7.9420E-02

4.8110E-02 2.5380E-02 1.1220E-02 6.5480E-02 7.0670E-02 5.4720E-02 3.1850E-02

1.4390E-02 4.3260E-03 6.3190E-02 4.2270E-02 2.6230E-02 7.1780E-02 6.9210E-02

3.0540E-02 9.8180E-03 7.7780E-02 8.1600E-02 4.7730E-02 1.6620E-02 3.1960E-02

1.6400E-02 1.0180E-02 2.6270E-01 6.1140E-01 2.8670E-01 9.1460E-02 4.8690E-02

3.8430E-02 8.6460E-03 6.2880E-03 8.9210E-03 3.3510E-03 3.8430E-03 2.1160E+00

1.7820E+01 8.4330E-01 2.5270E-02 2.6650E+00 4.3340E+01 3.4860E+00 8.2230E-02

2.3280E-01 5.0130E+01 4.6800E+00 1.2600E-01 8.1750E-03 8.4550E-03 3.3400E-03

8.8120E-04 1.2950E-02 1.7560E-02 6.2780E-03 6.5370E-04 1.9600E-02 2.0490E-02

1.2790E-02 4.1600E-03 5.9620E-01 6.3510E+00 2.5330E-01 8.8240E-03 5.1380E-02

5.9960E-02 3.3290E-02 1.0460E-02 1.1180E-01 6.2400E-01 8.5670E-02 1.8950E-02

2.3130E-01 2.0370E+00 2.5850E-01 2.5890E-02 3.9880E-03 3.3200E-03 5.0440E-04

9.0910E-03 7.9200E-03 4.7100E-03 7.4450E-04 9.3550E-03 1.5030E-02 6.4480E-03

1.9870E-03 1.7380E-02 2.1560E-02 7.3840E-03 6.3620E-04 6.5510E-02 4.3380E-01

1.8500E-02 3.1310E-03 2.9590E-03 2.6990E-03 1.2820E-03 9.7150E-04 8.0820E-03

1.9000E-02 2.1320E-03 1.4060E-03 1.4070E-02 2.4790E-02 1.0710E-02 1.9080E-03

8.7840E+00 2.4070E-01 9.0000E-01 9.1290E-01 5.1720E-01 2.7140E-01 9.4780E-01

1.2410E+00 7.4970E-01 2.0980E-01 4.0720E-01 3.2000E-01 1.6460E-01 3.4100E-02

5.3380E-02 5.7770E-02 4.1040E-02 1.9110E-02 1.9360E-02 4.7580E-02 4.9580E-02

4.1260E-02 2.9140E-02 1.4870E-02 3.1500E-02 4.1720E-02 3.6680E-02 3.0770E-02

5.3880E-02 4.7260E-02 2.0840E-02 2.8150E-02 6.1270E-02 5.7460E-02 3.9860E-02

1.8450E-02 1.7840E-02 1.2280E-02 9.3640E-02 2.9260E-01 6.4020E-01 2.3700E-01

2.2880E-02 3.7640E-02 1.9560E-02 5.2400E-03 5.9400E-03 4.0330E-03 3.4230E-03

1.0320E-01 2.7160E+00 1.3940E+01 6.4990E-01 3.2250E-02 3.3640E+00 2.2730E+01

2.6810E+00 7.5650E-03 7.3250E-01 4.5840E+01 3.7540E+00 3.0840E-03 6.4780E-03

6.1020E-03 2.3400E-03 4.1050E-03 1.3280E-02 9.4750E-03 4.4130E-03 6.1450E-03

1.5950E-02 1.2770E-02 1.0740E-02 3.1300E-02 7.5250E-01 5.0100E+00 1.9690E-01

1.8060E-02 4.1150E-02 4.2120E-02 2.8040E-02 2.4430E-02 1.1140E-01 4.9430E-01

7.3180E-02 2.3560E-02 2.4980E-01 1.6440E+00 2.0540E-01 1.7940E-03 3.2180E-03

1.6480E-03 3.3480E-03 9.3960E-03 6.8400E-03 3.3350E-03 3.9360E-03 9.1710E-03

1.3170E-02 5.2560E-03 4.8950E-03 1.3490E-02 1.4180E-02 5.1680E-03 4.7290E-03

7.1210E-02 3.4120E-01 1.5160E-02 2.4660E-03 1.7960E-03 1.3560E-03 9.4870E-04

4.6350E-03 9.2700E-03 1.2870E-02 1.5500E-03 4.0180E-03 1.5610E-02 1.7100E-02

8.6500E-03 4.5100E-02 2.7470E-01 7.6850E-01 9.8160E-01 4.6420E-02 3.3060E-01

8.6850E-01 1.3890E+00 7.5580E-02 2.2880E-01 3.3970E-01 2.4510E-01 8.8130E-03

3.3780E-02 4.6720E-02 4.5950E-02 2.8690E-02 3.1420E-03 1.7600E-02 3.5040E-02

4.3900E-02 3.8860E-02 2.2500E-02 1.1110E-02 3.7580E-02 3.8770E-02 1.0280E-02

3.2420E-02 4.4870E-02 3.3490E-02 7.0910E-03 2.9860E-02 5.4280E-02 5.8000E-02

8.7510E-03 1.9210E-02 1.0860E-02 4.2220E-02 1.7370E-01 3.7310E-01 5.8950E-01

9.1140E-03 2.6470E-02 2.8400E-02 4.1920E-03 3.3130E-03 5.8360E-03 1.8460E-03

1.3350E-02 1.2360E-01 2.5940E+00 2.0460E+01 1.4870E-03 8.2210E-02 2.6060E+00

2.0510E+01 1.4370E-03 2.0080E-02 1.0800E+00 4.1760E+01 8.8040E-04 3.4370E-03

5.4640E-03 4.2430E-03 8.5140E-04 5.3300E-03 1.1160E-02 9.0850E-03 1.3800E-03

7.0780E-03 1.4290E-02 1.6460E-02 3.3850E-03 3.9800E-02 5.8510E-01 3.9020E+00

3.7210E-03 2.0600E-02 3.9410E-02 4.1680E-02 5.1820E-03 2.6210E-02 9.4080E-02

4.6190E-01 3.2170E-03 2.5870E-02 2.2810E-01 1.4780E+00 5.4110E-04 2.1440E-03

2.5500E-03 7.2040E-04 3.8520E-03 8.4350E-03 6.0560E-03 6.9950E-04 4.4900E-03

7.8820E-03 1.3420E-02 1.0870E-03 6.5770E-03 1.1210E-02 1.0920E-02 7.3950E-04

5.5010E-03 5.8330E-02 2.9570E-01 1.9730E-03 1.0770E-03 1.5150E-03 6.5250E-04

1.2220E-03 5.1230E-03 7.8050E-03 9.3950E-03 6.8960E-04 3.9040E-03 1.3290E-02

1.6480E-02 5.3270E+00 2.9750E-01 7.5380E-02 1.3540E+00 5.4190E-01 1.6110E-01

4.0010E-02 1.5380E+00 6.2780E-01 1.7260E-01 3.8260E-02 1.0390E-01 5.1900E-02

2.5850E-02 1.3370E-02 5.9860E-03 1.5020E-01 8.7670E-02 5.1160E-02 2.7470E-02

1.2840E-02 4.6380E-03 9.8050E-02 5.0380E-02 1.2900E-02 5.9840E-01 7.9860E-02

2.4520E-02 8.4340E-03 3.3240E-01 9.3460E-02 3.2100E-02 1.1480E-02 9.1040E-02

4.1090E-02 7.7590E-03 6.3450E-01 3.8580E-01 1.1970E-01 4.0040E-02 1.3390E-01

6.6660E-02 3.0920E-02 8.0870E-02 8.9410E-02 4.4670E-02 1.8850E-02 1.0900E+01

9.6870E-01 6.1490E-02 5.8890E-03 1.4280E-01 7.3600E-02 1.8520E-02 2.6670E-03

1.9570E-01 7.5920E-02 2.2920E-02 2.7710E-03 2.5720E-01 2.5350E-02 1.5490E-02

7.8100E-03 2.2100E+01 5.5580E-01 2.4520E-02 7.0760E-04 2.7370E+01 3.0940E+00

1.5270E-01 1.0170E-03 2.9950E+01 2.8590E+00 1.5560E-01 6.5880E-03 1.2820E+00

1.8390E-01 1.1490E-02 1.7240E-03 1.3670E+00 1.6900E-01 1.9610E-02 3.8810E-03

6.1220E-02 2.9190E-02 1.0600E-02 2.1230E-03 4.0080E-02 1.1990E-02 2.1700E-03

9.2260E-01 5.0100E-02 7.4070E-03 2.1120E-03 4.6810E-01 7.0810E-02 1.0860E-02

2.5700E-03 1.0330E-01 1.6820E-02 4.5360E-03 1.2970E-03 1.8240E-01 4.0790E-02

7.1500E-03 1.9690E-03 1.1250E-02 7.9990E-03 4.7700E-03 1.8440E-03 3.7290E-02

1.1050E-02 5.9470E-03 1.3520E-03 1.4710E-01 5.8240E-02 1.0410E-02 4.6350E-03

6.3600E+00 3.0020E-01 4.3730E-01 6.8210E-01 4.5640E-01 1.7110E-01 7.2720E-01

6.9550E-01 4.2470E-01 1.4880E-01 4.7390E-02 5.1060E-02 3.6360E-02 1.9300E-02

7.3140E-03 7.1740E-02 7.1280E-02 5.0920E-02 3.5230E-02 2.4450E-02 1.3200E-02

6.1030E-02 3.4510E-02 3.3510E-02 1.3920E-01 3.5020E-01 5.8430E-02 1.5860E-02

9.2760E-02 1.8380E-01 7.2290E-02 2.8110E-02 5.8560E-02 2.9990E-02 2.3280E-02

3.8560E-01 3.1940E-01 3.0380E-01 1.0810E-01 9.0780E-02 6.8740E-02 2.7120E-02

6.4700E-02 5.9070E-02 3.9300E-02 1.9720E-02 2.7160E-01 8.1800E+00 1.2900E+00

7.8390E-02 5.5990E-02 9.9500E-02 6.9320E-02 2.1580E-02 4.3450E-02 2.0570E-01

1.2250E-01 2.6750E-02 4.5890E-02 1.7150E-01 1.5210E-02 5.8130E-03 3.0260E+00

1.4510E+01 4.4430E-01 1.3080E-02 3.0510E+00 1.7450E+01 3.7080E+00 1.7140E-01

5.8900E-01 2.2020E+01 4.2680E+00 1.9600E-01 1.7440E-01 8.0980E-01 1.9890E-01

1.0840E-02 4.6070E-02 9.4480E-01 1.7590E-01 2.1330E-02 2.3900E-02 2.5080E-02

2.1680E-02 1.1870E-02 2.0450E-02 1.5110E-02 6.2390E-03 1.7460E-01 5.4830E-01

4.1390E-02 5.5610E-03 6.9390E-02 2.7380E-01 7.2600E-02 1.1010E-02 2.3090E-02

5.4420E-02 1.1830E-02 4.1090E-03 1.7380E-02 1.2150E-01 3.8050E-02 7.5900E-03

8.9980E-03 5.9920E-03 3.4070E-03 2.1180E-03 1.2030E-02 1.6830E-02 9.9360E-03

3.6960E-03 3.4110E-02 1.0010E-01 6.5110E-02 8.4460E-03 4.7790E+00 1.0930E-01

3.8430E-01 4.5950E-01 3.8300E-01 2.7790E-01 5.2940E-01 4.1210E-01 2.6980E-01

2.2900E-02 3.3370E-02 3.0790E-02 2.2720E-02 1.2010E-02 3.4560E-02 3.6340E-02

4.7040E-02 4.2110E-02 2.7410E-02 1.2380E-02 3.0460E-02 3.4390E-02 3.1950E-02

4.0140E-02 1.2670E-01 2.1750E-01 3.5060E-02 3.2090E-02 7.1750E-02 1.2540E-01

5.4540E-02 3.2020E-02 3.1070E-02 2.0940E-02 1.1970E-01 3.0380E-01 3.0710E-01

2.3120E-01 6.1940E-02 5.1200E-02 2.6530E-02 4.8530E-02 3.9480E-02 3.3760E-02

1.8770E-02 1.0710E-02 3.3130E-01 6.0560E+00 9.9620E-01 7.0740E-03 5.3410E-02

6.5290E-02 5.8930E-02 3.2180E-03 7.2570E-02 1.3930E-01 1.0170E-01 2.0210E-02

5.4150E-02 1.1000E-01 5.5150E-03 2.3450E-01 3.6380E+00 9.3250E+00 3.0480E-01

1.6730E-01 4.2440E+00 1.1060E+01 2.9080E+00 8.4470E-03 7.1960E-01 1.6300E+01

3.2770E+00 9.2410E-03 1.9290E-01 5.4360E-01 1.5200E-01 8.9410E-03 4.3310E-02

9.6190E-01 1.5120E-01 6.1780E-03 1.7700E-02 1.8090E-02 1.9940E-02 1.0300E-02

1.3550E-02 8.6060E-03 2.4670E-02 1.6640E-01 3.6080E-01 2.5400E-02 1.0500E-02

7.1420E-02 1.6490E-01 5.5570E-02 7.0660E-03 2.0550E-02 3.3610E-02 7.3810E-03

4.5450E-03 1.4720E-02 9.3650E-02 3.1380E-02 6.7480E-03 3.9000E-03 2.8310E-03

1.5840E-03 7.6720E-03 9.9200E-03 1.1980E-02 4.0260E-03 6.1580E-03 3.3390E-02

7.2920E-02 4.8690E-02 2.3220E-02 1.1480E-01 3.0770E-01 4.3930E-01 8.9230E-02

2.7670E-01 3.8590E-01 2.5400E-01 1.2280E-02 1.5060E-02 2.0800E-02 2.0420E-02

1.2530E-02 1.1160E-02 2.6720E-02 2.8860E-02 2.8210E-02 2.4050E-02 1.4290E-02

1.1440E-02 3.1230E-02 2.1970E-02 1.5330E-02 3.4350E-02 9.2880E-02 1.3550E-01

1.1480E-02 2.8110E-02 5.4290E-02 9.4620E-02 1.4170E-02 2.8380E-02 1.3280E-02

4.0010E-02 1.0810E-01 2.3120E-01 2.5700E-01 3.9030E-02 3.1070E-02 2.3360E-02

3.2350E-02 2.4010E-02 2.4390E-02 1.3130E-02 2.7200E-03 1.3930E-02 2.5370E-01

4.6650E+00 5.2610E-04 7.9650E-03 4.2730E-02 7.2350E-02 1.7990E-04 3.5480E-03

5.6070E-02 1.5170E-01 1.2740E-02 1.0840E-02 3.2110E-02 6.4120E-02 1.6980E-02

3.2990E-01 2.7820E+00 8.4940E+00 1.0160E-03 1.6600E-01 3.2220E+00 9.2750E+00

2.7530E-03 8.6950E-03 5.4240E-01 1.2640E+01 1.7020E-03 1.0810E-02 1.5120E-01

4.3300E-01 2.8820E-03 8.9510E-03 3.4470E-02 8.1240E-01 6.1180E-04 6.8010E-03

1.5300E-02 1.8600E-02 4.4500E-03 9.5030E-03 7.9780E-03 4.4610E-03 2.4970E-02

1.2670E-01 2.3110E-01 2.4730E-03 1.0970E-02 5.4790E-02 1.3370E-01 2.2770E-03

8.3650E-03 1.7360E-02 1.9360E-02 1.1170E-03 4.3990E-03 1.1710E-02 7.8140E-02

4.4990E-03 2.3830E-03 2.2710E-03 1.0980E-03 3.1430E-03 4.4010E-03 5.4540E-03

4.9410E-03 2.4420E-03 7.8310E-03 2.9610E-02 6.2640E-02 5.6280E+00 2.5750E-01

4.4400E-02 1.4590E+00 3.9510E-01 1.2790E-01 3.5950E-02 1.1120E-01 4.9950E-02

1.9510E-02 6.8870E-03 1.8070E-03 1.4920E-01 8.2580E-02 4.0610E-02 1.6950E-02

5.4910E-03 1.1560E-03 6.8400E-02 1.5230E-02 4.1290E-03 1.5580E-01 5.4050E-02

1.6860E-02 3.3860E-03 8.1850E-01 6.4730E-02 1.9040E-02 6.1050E-03 6.9800E-02

1.5200E-02 4.3340E-03 9.6300E-01 3.0340E-01 7.0540E-02 2.3240E-02 1.0550E-01

3.2970E-02 5.1180E-03 4.7080E-03 2.4720E-02 4.5320E-03 1.9570E-03 2.3920E+00

2.2630E-01 2.0260E-02 2.9210E-03 4.3700E+00 3.7200E-01 3.8690E-02 5.6320E-03

9.2590E-02 8.7320E-02 2.8730E-02 5.2740E-03 1.9560E-02 1.2170E-02 3.3210E-03

5.1890E-04 5.0700E-02 1.3410E-02 4.0090E-03 3.2250E-04 1.1460E+00 3.6880E-02

5.7380E-03 1.6360E-03 5.2350E-01 7.4870E-02 1.2460E-02 2.1860E-03 2.5490E+01

5.5760E-01 2.0840E-02 8.3510E-04 3.3290E+01 2.8260E+00 1.2070E-01 6.5070E-04

4.7570E+01 3.1630E+00 1.4380E-01 1.3900E-02 3.1840E-02 5.7400E-03 2.1520E-03

7.0990E-02 2.4170E-02 1.0820E-02 2.6110E-03 2.3820E+00 8.4740E-02 1.2790E-02

4.8530E-03 5.2850E-02 1.1330E-02 2.5740E-03 3.8140E-04 2.8450E-01 3.8060E-02

4.4140E-03 7.0210E-04 3.5380E-03 1.8140E-02 5.4870E-03 1.3910E-03 2.4370E-02

6.4590E-03 2.8080E-03 6.3680E-04 1.9130E-01 2.8760E-02 4.0450E-03 5.4330E-04

7.8790E+00 2.7880E-01 5.9620E-01 8.2380E-01 2.6630E-01 9.0320E-02 5.0180E-02

5.4190E-02 3.2610E-02 1.7020E-02 7.2720E-03 7.2150E-02 6.0930E-02 4.9180E-02

3.4410E-02 2.0370E-02 9.0900E-03 3.0750E-02 3.2490E-02 9.8670E-03 7.4680E-02

7.0720E-02 3.4150E-02 1.3350E-02 1.1940E-01 5.6640E-01 5.2180E-02 1.7020E-02

3.5790E-02 3.0050E-02 7.7200E-03 3.6090E-01 4.8440E-01 2.5380E-01 6.2390E-02

6.3230E-02 4.6500E-02 1.8640E-02 3.9230E-03 1.4230E-02 1.1870E-02 2.5350E-03

2.0190E-01 1.6310E+00 2.5710E-01 2.3740E-02 1.6520E-01 3.4760E+00 4.4890E-01

4.3480E-02 7.2490E-02 1.0240E-01 6.7730E-02 3.1670E-02 1.5200E-02 7.3330E-03

5.7290E-03 2.6840E-03 2.0050E-02 2.1100E-02 1.0510E-02 2.9620E-03 1.3490E-01

8.2370E-01 3.4440E-02 5.6500E-03 7.4750E-02 3.5050E-01 7.0720E-02 1.3490E-02

2.4330E+00 1.8450E+01 6.4780E-01 2.8320E-02 2.8040E+00 2.3760E+01 3.5020E+00

1.2020E-01 3.8650E-01 3.8940E+01 4.0980E+00 1.7080E-01 1.5780E-02 1.4220E-02

3.0390E-03 3.2310E-02 3.1970E-02 1.4170E-02 6.5030E-03 2.3000E-01 1.5580E+00

8.1880E-02 1.1230E-02 2.0230E-02 2.5150E-02 8.5570E-03 2.2970E-03 3.7700E-02

1.8810E-01 4.0980E-02 7.8830E-03 2.9490E-03 1.1230E-02 7.1190E-03 2.2040E-03

9.4100E-03 1.1080E-02 6.0740E-03 2.5720E-03 3.7170E-02 1.1880E-01 1.9170E-02

4.1890E-03 6.1220E+00 2.4570E-01 4.9570E-01 5.2750E-01 1.7100E-01 2.0580E-02

3.3190E-02 3.7200E-02 2.6510E-02 1.2090E-02 2.6880E-02 4.3620E-02 4.3920E-02

3.8360E-02 2.8920E-02 1.5700E-02 1.2750E-02 2.6200E-02 1.9530E-02 3.3090E-02

5.1860E-02 4.6750E-02 2.1830E-02 2.7870E-02 1.1490E-01 4.1760E-01 4.0780E-02

1.8310E-02 2.6680E-02 1.4480E-02 1.0200E-01 3.0490E-01 3.1200E-01 1.9120E-01

3.2050E-02 4.5730E-02 2.4400E-02 3.1390E-03 5.2360E-03 9.9530E-03 4.9890E-03

2.1540E-02 2.5680E-01 1.2280E+00 2.0390E-01 2.0680E-02 1.7840E-01 2.7530E+00

3.2350E-01 1.9740E-02 5.4760E-02 8.3150E-02 6.6790E-02 6.5280E-03 7.0580E-03

6.5880E-03 3.6570E-03 9.1530E-03 1.7190E-02 1.4370E-02 7.8790E-03 1.1060E-02

1.4710E-01 6.1060E-01 2.6470E-02 1.2430E-02 7.0710E-02 2.6630E-01 5.8970E-02

1.4790E-01 3.0260E+00 1.3590E+01 4.8700E-01 1.0550E-01 3.4880E+00 1.7910E+01

2.6780E+00 4.0060E-03 1.4580E+00 3.0940E+01 3.1560E+00 7.8330E-03 1.2300E-02

6.2200E-03 1.8660E-02 2.0530E-02 1.8350E-02 8.7380E-03 2.4790E-02 2.7740E-01

1.2720E+00 6.3130E-02 6.3600E-03 1.5160E-02 1.6430E-02 5.5450E-03 4.3330E-03

4.0940E-02 1.3980E-01 3.1950E-02 2.3590E-03 4.3050E-03 6.8140E-03 3.2980E-03

6.8510E-03 7.1730E-03 6.4890E-03 4.0320E-03 6.3010E-03 3.6950E-02 8.5990E-02

1.6490E-02 1.0250E-01 2.4350E-01 3.8380E-01 3.5930E-01 6.6310E-03 1.8640E-02

2.6830E-02 2.6640E-02 1.7000E-02 5.4840E-03 2.3900E-02 3.5510E-02 3.7060E-02

2.9700E-02 1.6270E-02 5.1130E-03 1.3800E-02 2.4900E-02 1.3020E-02 3.2400E-02

4.0360E-02 2.9650E-02 8.8600E-03 2.7530E-02 9.4030E-02 3.2390E-01 9.1630E-03

1.7640E-02 1.7900E-02 3.3800E-02 9.9430E-02 2.5540E-01 3.0180E-01 1.5080E-02

3.3710E-02 2.8650E-02 2.3540E-03 3.2450E-03 5.3620E-03 6.1880E-03 2.8370E-03

2.5280E-02 2.0370E-01 1.0730E+00 3.3460E-03 2.2560E-02 1.4580E-01 2.3200E+00

1.1810E-03 2.1790E-02 5.3040E-02 8.5460E-02 2.1900E-03 6.2540E-03 5.5320E-03

3.6520E-03 2.4750E-03 1.0150E-02 1.3990E-02 9.9960E-03 2.6830E-03 1.1330E-02

1.1600E-01 4.6970E-01 2.1830E-03 1.3490E-02 5.8970E-02 2.3000E-01 1.1250E-02

1.7970E-01 2.3240E+00 1.0530E+01 6.4870E-04 1.1860E-01 2.6830E+00 1.5350E+01

5.0100E-04 4.8760E-03 1.1370E+00 2.5740E+01 4.0230E-03 7.0480E-03 8.4880E-03

7.1260E-03 1.4470E-02 1.5410E-02 1.2190E-02 6.9540E-03 2.6490E-02 2.1480E-01

9.8090E-01 2.1770E-03 6.8280E-03 1.2140E-02 1.0490E-02 6.9280E-04 4.8020E-03

3.1940E-02 1.2270E-01 1.7690E-03 2.9470E-03 4.5520E-03 3.1680E-03 2.4270E-03

3.6700E-03 6.7770E-03 4.9400E-03 1.0260E-03 6.9450E-03 3.0410E-02 7.0350E-02

3.4110E+00 3.5150E-01 1.3640E-01 5.6570E-02 3.8650E-02 2.3230E-02 1.2950E-02

5.8150E-03 6.3350E-02 4.5970E-02 3.3310E-02 2.4140E-02 1.6330E-02 8.3850E-03

5.1540E-02 2.8740E-02 1.7670E-02 1.5180E+00 1.0420E+00 2.1970E-01 7.3390E-02

9.5310E-01 9.5120E-02 3.5700E-01 9.8570E-02 1.8330E+00 2.4480E-01 6.2100E-02

5.4370E-01 3.0840E-01 1.6210E-01 7.8600E-02 5.4290E-01 3.3130E-01 3.7200E-02

1.9840E-02 2.5950E-01 2.9650E-02 1.4690E-02 7.7340E-02 3.3340E-02 1.0720E-02

2.4200E-03 6.9850E-02 2.8720E-02 9.7290E-03 2.7160E-03 6.2050E-02 2.4230E-02

8.3330E-03 1.8200E-03 3.2890E-02 1.7710E-02 9.4680E-03 4.4490E-03 2.9750E+00

5.5720E-01 3.0210E-02 6.8440E-03 2.6350E+00 3.7600E-01 3.8090E-02 7.0150E-03

6.9760E-02 3.6730E-02 1.5460E-02 5.4090E-03 3.4530E+00 4.8660E-01 4.5420E-02

9.9390E-03 8.7520E-02 3.4950E-02 1.4850E-02 5.2440E-03 1.0360E-01 4.7880E-02

2.2820E-02 1.0180E-02 1.5350E+01 1.8960E-01 7.9160E-03 2.0130E+01 3.6680E+00

1.1450E-01 6.6280E-03 3.7620E+01 3.8870E+00 3.0630E-01 1.8210E-02 1.9450E-01

5.4930E-02 1.1320E-02 2.2150E-03 2.6250E-02 1.4340E-02 6.8060E-03 2.6550E-03

2.8010E-02 1.9920E-01 1.8070E-02 8.5850E-03 5.0760E-02 2.6590E-02 1.0170E-02

2.7670E-03 1.5360E-01 3.0620E-02 7.1860E-03 1.3110E-03 3.7800E+00 2.0170E-01

3.4050E-02 2.4750E-02 2.2250E-02 1.5210E-02 6.5670E-03 3.7640E-02 3.5290E-02

3.1320E-02 2.2330E-02 1.2400E-02 4.9570E-03 3.0400E-02 2.8080E-02 1.5050E-02

2.1670E-01 9.9330E-01 6.1400E-02 1.6160E-01 4.7630E-01 9.2270E-02 7.0660E-02

3.7770E-02 2.6110E-01 7.9720E-01 8.8820E-02 2.6720E-01 2.4430E-01 1.8560E-01

1.2230E-01 3.8250E-01 8.2940E-02 2.1060E-01 1.4880E-02 7.6520E-02 1.0900E-01

9.8730E-03 2.2380E-02 3.0780E-02 2.7210E-02 1.2450E-02 1.4610E-02 3.2860E-02

2.3760E-02 1.0720E-02 1.1780E-02 2.5810E-02 2.0700E-02 9.9260E-03 1.6390E-02

1.8630E-02 1.0280E-02 3.9170E-03 5.4740E-01 1.4700E+00 6.3030E-01 2.7020E-02

6.3940E-02 1.7610E+00 4.3840E-01 4.5100E-02 2.7190E-02 2.9160E-02 2.5240E-02

1.6160E-02 7.4920E-02 2.3540E+00 5.8200E-01 5.4110E-02 2.2270E-02 4.7890E-02

2.7070E-02 1.4680E-02 3.4670E-02 5.4820E-02 3.3090E-02 2.2360E-02 3.6410E+00

7.8900E+00 1.3300E-01 3.6520E+00 9.9300E+00 4.1870E+00 1.3280E-01 5.4330E-01

1.8970E+01 4.7420E+00 4.0770E-01 5.4650E-02 8.4850E-02 4.5660E-02 1.0970E-02

1.1170E-02 1.0040E-02 9.8860E-03 6.5090E-03 2.1010E-02 4.2490E-02 1.0430E-01

7.0400E-03 2.6510E-02 1.9020E-02 1.5310E-02 9.0790E-03 9.5200E-03 9.5980E-02

2.8300E-02 6.1420E-03 2.5990E+00 1.6320E-02 2.0530E-02 1.3500E-02 1.1040E-02

7.4390E-03 2.2580E-02 2.5390E-02 1.7500E-02 1.2920E-02 1.0540E-02 6.4820E-03

1.8160E-02 1.7410E-02 1.3390E-02 1.3170E-01 2.7250E-01 5.6480E-01 3.5090E-02

1.3090E-01 5.5500E-02 6.2150E-02 4.7030E-02 1.0270E-01 1.9130E-01 2.9700E-01

1.2060E-01 1.5400E-01 1.4980E-01 1.2170E-01 1.7040E-01 1.7790E-01 1.0480E-01

9.9200E-03 2.6600E-02 7.0610E-02 5.1440E-02 3.5050E-03 1.9120E-02 1.7820E-02

2.2240E-02 2.8000E-03 1.0160E-02 2.0990E-02 1.9920E-02 1.2660E-03 9.9180E-03

1.5650E-02 1.7930E-02 9.3100E-03 9.2650E-03 1.0030E-02 4.5400E-03 2.2390E-02

6.2780E-01 6.9260E-01 4.4200E-01 1.2510E-02 6.3140E-02 1.1400E+00 3.3460E-01

7.4830E-03 1.8280E-02 1.8420E-02 2.0360E-02 1.4320E-02 7.5860E-02 1.5240E+00

4.3980E-01 7.4800E-03 1.3460E-02 2.9240E-02 2.0960E-02 1.1140E-02 1.5490E-02

3.7840E-02 2.7840E-02 4.8250E-01 4.1130E+00 3.1950E+00 1.0700E-01 4.1820E+00

4.7030E+00 2.9520E+00 1.5360E-02 6.2180E-01 1.2160E+01 3.6350E+00 1.1350E-02

4.5600E-02 4.6430E-02 2.8750E-02 3.5440E-03 8.1170E-03 7.5150E-03 7.3610E-03

1.4010E-02 1.6190E-02 5.0800E-02 3.9670E-02 1.0140E-02 1.4100E-02 1.3300E-02

7.1900E-03 2.8840E-03 5.5570E-03 6.3040E-02 2.1070E-02 7.0010E-03 7.7360E-03

9.6320E-03 6.7500E-03 2.6830E-03 1.3100E-02 7.5940E-03 9.2580E-03 8.7940E-03

6.1380E-03 2.8950E-03 8.7790E-03 7.4370E-03 8.2140E-03 6.1110E-02 1.3980E-01

2.8770E-01 2.5590E-02 4.7620E-02 1.0660E-01 3.1010E-02 3.4340E-02 4.0160E-02

7.1950E-02 1.1910E-01 4.3430E-02 7.2790E-02 8.6010E-02 7.2900E-02 4.5140E-02

1.6130E-01 1.7790E-02 4.9600E-03 1.0950E-02 1.3970E-02 4.7920E-02 3.3030E-04

3.2450E-03 1.3270E-02 1.4540E-02 3.5510E-04 2.4420E-03 7.0760E-03 1.6570E-02

1.2450E-05 1.3710E-03 6.9230E-03 1.5130E-02 4.4160E-03 3.8770E-03 3.8020E-03

3.6560E-03 6.1050E-03 2.5640E-02 4.4090E-01 4.2160E-01 2.7920E-03 1.0690E-02

4.1140E-02 7.1780E-01 1.1910E-03 6.7840E-03 1.2260E-02 1.2070E-02 2.9990E-03

1.2370E-02 5.1080E-02 9.6040E-01 1.6210E-03 5.5130E-03 8.9580E-03 2.0730E-02

2.3500E-03 9.7020E-03 1.0130E-02 2.5130E-02 1.6410E-02 7.5280E-01 3.1220E+00

5.8260E-03 1.4440E-01 2.9510E+00 2.8660E+00 6.6640E-03 8.5890E-03 4.3020E-01

7.7420E+00 2.2020E-03 1.0950E-02 2.8740E-02 2.2580E-02 6.5490E-04 3.1370E-03

5.1330E-03 4.0190E-03 7.0030E-03 6.4290E-03 8.8870E-03 3.6480E-02 2.6000E-03

9.0670E-03 9.1820E-03 6.1660E-03 4.9900E-04 2.6670E-03 3.4940E-03 3.8330E-02

3.5310E+00 8.8750E-01 1.5230E-01 6.5250E-02 8.1750E+00 3.5990E+00 1.0270E+00

1.9870E-01 3.3920E-02 7.6990E-03 3.1170E+00 1.2960E+00 4.5250E-02 2.4060E+00

3.4710E-01 6.8200E-02 7.6680E-03 1.5840E+00 5.0670E-01 8.3900E-02 6.2940E-03

4.9860E-01 1.3190E-01 7.3440E-03 3.1610E-02 2.0450E-02 9.4270E-03 3.3770E-03

1.4590E-02 1.1670E-02 6.3860E-03 5.3970E-02 1.1770E-01 6.7440E-03 2.0520E-03

2.1510E-01 1.9200E-01 9.0060E-02 2.0740E-02 1.8530E-01 9.0250E-02 2.6830E-02

4.1940E-03 1.2250E-01 3.8080E-02 8.4820E-03 9.6980E-04 1.1860E-01 3.6120E-02

6.2580E-03 1.0050E-04 1.0830E-01 5.5930E-02 4.9120E-02 3.1930E-02 1.9920E-01

4.7550E-02 1.1950E-02 2.3840E-03 4.4530E-02 1.4550E-02 3.9020E-03 1.0500E-03

8.4840E-02 7.5780E-02 4.4720E-02 1.4570E-02 1.9140E-01 4.2830E-02 6.9920E-03

6.7020E-04 3.4960E-02 1.4890E-02 4.3260E-03 9.2150E-04 5.0320E-02 4.1690E-02

8.0100E-03 5.5780E-02 2.5410E-02 1.5060E-02 7.1240E-03 4.8980E-02 2.3360E-02

8.1150E-03 2.1290E-03 7.0830E-02 7.3080E-02 3.6800E-02 8.5390E-03 4.6830E-02

2.6180E-02 9.0950E-03 1.9020E-03 3.6080E-02 2.2780E-02 1.0490E-02 6.2720E-03

2.0250E-02 1.0350E-02 5.3980E-03 2.6020E-03 3.1480E-02 1.5550E-02 5.8940E-03

1.4510E-03 2.9410E+00 1.2700E+00 9.3400E-02 2.7320E+00 2.6610E+00 3.2070E+00

1.5600E+00 3.6610E-01 5.0540E-02 1.7530E+00 9.3640E-01 8.6450E-01 7.2570E-01

1.2280E+00 2.4480E-01 6.2340E-02 5.8280E-01 6.3340E-01 4.3730E-01 9.0490E-02

2.6890E-01 1.6510E-01 7.6200E-02 2.1190E-02 1.3310E-02 1.0060E-02 7.9770E-03

1.3300E-02 9.2180E-03 4.4370E-03 4.3170E-02 4.7500E-02 5.0160E-02 3.3180E-03

1.8430E-01 5.3930E-02 9.7810E-02 8.8940E-02 8.1760E-02 6.4630E-02 7.0670E-02

2.8230E-02 2.8590E-02 6.7580E-02 3.1060E-02 8.9470E-03 5.0380E-02 4.1630E-02

2.5410E-02 6.6220E-03 7.4580E-02 8.4020E-02 3.7200E-02 9.6830E-03 5.8640E-02

1.0190E-01 3.7350E-02 1.1090E-02 1.4260E-02 2.0980E-02 1.1830E-02 3.8590E-03

7.4950E-02 3.4610E-02 2.8350E-02 3.7990E-02 4.3160E-02 1.0220E-01 4.0530E-02

7.5940E-03 1.3350E-02 1.4090E-02 1.1940E-02 4.5230E-03 4.2220E-02 1.6720E-02

1.8000E-02 3.1120E-02 2.8910E-02 1.6590E-02 5.5590E-03 2.4940E-02 2.1280E-02

1.5330E-02 7.3730E-03 7.3090E-02 2.4030E-02 2.6170E-02 2.8130E-02 2.5370E-02

1.4790E-02 1.7940E-02 9.1110E-03 2.8860E-02 1.5170E-02 1.2700E-02 3.7720E-03

1.2160E-02 9.7860E-03 6.4150E-03 2.1790E-03 1.6510E-02 1.2150E-02 9.2280E-03

5.5020E-03 1.5590E+00 1.0790E+00 1.9890E-01 2.8990E+00 9.9010E-01 1.9500E+00

1.5410E+00 4.0570E-01 7.8940E-01 9.2550E-01 9.6270E-01 2.0140E-01 6.6130E-01

6.8470E-01 1.4680E-01 1.4840E-01 4.8630E-01 3.7130E-01 3.0150E-01 1.2660E-01

1.5690E-01 9.9260E-02 1.0980E-02 1.0260E-02 1.0430E-02 8.1100E-03 1.0550E-02

6.5700E-03 2.8120E-03 3.2380E-02 1.6900E-02 4.1220E-02 1.7470E-02 8.8640E-02

8.2520E-02 5.3750E-02 9.2650E-02 2.2540E-02 6.1150E-02 4.3660E-02 5.6630E-02

3.3250E-03 2.6330E-02 4.5520E-02 2.6500E-02 1.8030E-02 3.4570E-02 2.5110E-02

1.5590E-02 5.3130E-02 5.9430E-02 3.3680E-02 8.9990E-03 1.6490E-02 5.1530E-02

6.2670E-02 2.5950E-02 3.8780E-03 1.2070E-02 1.3540E-02 8.7430E-03 4.7860E-02

2.6200E-02 3.2960E-02 2.4790E-02 6.7070E-03 4.5340E-02 6.4610E-02 2.8510E-02

3.5370E-03 1.0530E-02 9.4450E-03 9.4240E-03 3.1930E-02 1.8190E-02 1.2860E-02

1.8510E-02 2.1660E-02 1.3870E-02 7.1940E-03 1.0270E-02 1.5680E-02 1.2360E-02

1.1250E-02 5.0000E-02 2.1540E-02 2.7120E-02 1.5050E-02 9.2580E-03 1.6080E-02

1.0520E-02 1.4560E-02 2.1650E-02 1.0640E-02 9.2760E-03 3.8400E-03 7.3750E-03

7.7690E-03 5.0130E-03 2.8900E-03 7.2170E-03 9.6060E-03 8.6630E-03 7.1060E-03

1.0510E+00 3.6580E-02 2.0740E-01 2.2230E+00 7.7530E-01 9.0090E-01 1.2130E+00

2.2700E-01 8.2000E-01 7.3530E-01 5.1830E-02 2.3570E-01 5.0910E-01 3.3210E-01

2.0380E-02 2.0890E-01 3.0980E-01 3.3130E-01 4.8840E-02 1.1970E-01 8.6600E-02

4.6350E-03 8.2040E-03 8.2860E-03 6.0020E-03 7.2930E-03 4.1420E-03 1.8980E-03

2.1590E-02 5.2310E-03 2.1120E-02 2.6020E-02 2.6700E-02 7.5360E-02 5.7220E-02

4.6880E-02 2.9680E-03 2.9860E-02 3.8800E-02 5.1020E-02 1.4360E-04 5.5800E-03

2.4790E-02 3.5520E-02 4.5930E-03 1.9770E-02 2.3440E-02 1.6230E-02 4.2550E-02

2.2210E-02 2.1870E-02 1.3700E-02 4.6680E-03 1.7670E-02 4.1560E-02 4.0520E-02

8.7520E-04 4.4940E-03 9.2490E-03 1.1940E-02 2.1670E-02 2.9780E-02 2.4310E-02

1.2130E-02 5.9710E-04 1.0200E-02 3.8800E-02 4.7180E-02 6.4480E-04 4.5760E-03

7.2880E-03 9.5740E-03 1.6500E-02 1.6230E-02 5.9400E-03 1.1300E-02 1.1620E-02

1.0810E-02 7.0280E-03 3.4110E-03 9.5440E-03 1.0500E-02 9.5730E-03 2.4780E-02

2.9280E-02 1.7160E-02 5.5840E-03 2.2380E-03 9.8480E-03 1.0280E-02 1.1250E-02

1.4430E-02 7.0800E-03 5.0840E-03 3.6300E-03 4.3820E-03 4.6330E-03 3.8640E-03

2.4260E-03 2.4380E-03 6.2660E-03 7.0370E-03 5.9880E-03 6.7160E-03 3.8540E-02

1.4800E-01 1.2520E+00 9.9380E-01 2.4360E-01 1.8090E-02 4.9350E-01 3.8470E-01

1.0570E-02 6.9900E-02 1.8670E-01 2.9690E-01 1.1210E-03 3.4530E-02 1.9690E-01

2.0200E-01 1.3800E-02 6.4260E-02 4.9510E-02 1.4950E-03 4.2390E-03 3.8590E-03

2.8740E-03 3.7660E-03 1.8250E-03 9.2440E-04 1.0800E-02 1.6210E-03 7.0310E-03

1.8110E-02 3.3280E-03 3.8500E-02 5.0870E-02 1.3510E-02 9.1460E-05 4.9810E-03

2.9100E-02 2.7180E-02 1.8510E-05 1.9760E-04 5.5690E-03 2.7280E-02 5.6500E-04

7.4950E-03 1.4150E-02 8.3550E-03 2.4370E-02 5.6960E-03 1.0540E-02 9.6390E-03

9.7210E-04 5.2350E-03 1.1740E-02 3.1590E-02 1.8360E-04 1.0530E-03 3.9990E-03

7.8900E-03 6.2730E-03 2.2050E-02 1.1020E-02 4.7070E-03 3.3780E-05 9.6440E-04

1.0360E-02 3.7020E-02 3.2910E-05 9.9850E-04 4.4250E-03 5.7180E-03 6.6610E-03

1.0470E-02 1.8280E-03 5.6460E-03 4.7200E-03 6.2740E-03 4.1910E-03 1.1860E-03

3.7810E-03 6.7880E-03 5.6340E-03 8.4080E-03 2.2550E-02 7.9650E-03 6.9580E-04

3.2550E-04 3.1080E-03 8.1820E-03 5.1900E-03 7.2160E-03 3.6190E-03 2.0250E-03

2.2640E-03 2.0940E-03 1.8580E-03 2.3470E-03 1.3120E-03 5.6620E-04 2.9550E-03

4.0760E-03 3.2710E-03 3.8320E+00 4.0370E-01 2.9660E-02 6.9840E-03 1.7080E-03

9.3500E+00 1.6930E-01 7.8210E-02 1.4840E+00 3.4920E-01 1.5650E-02 2.5420E-03

2.1530E+00 3.3470E-01 2.7980E-02 2.4480E-03 1.4630E+00 1.4880E-02 1.0620E-02

2.9220E-02 1.5750E-02 6.1920E-03 1.4950E-03 9.9710E-03 5.5370E-03 2.8230E-03

7.6050E-03 4.3000E-02 8.2570E-03 1.3060E-03 1.3320E-01 2.8330E-02 4.7880E-03

5.9050E-04 1.8670E-01 5.5120E-02 1.1200E-02 1.1090E-03 5.6860E-01 1.7680E-01

3.2060E-02 3.1790E-03 1.4220E-01 1.8180E-02 1.0060E-03 6.7260E-05 5.0260E-02

2.4720E-02 9.1640E-03 1.4670E-03 7.0890E-02 5.4340E-02 2.4310E-02 4.2000E-03

2.9390E-01 8.2770E-02 1.8720E-02 3.0760E-03 1.1250E-01 4.9010E-02 1.4660E-02

1.8070E-03 1.1380E-01 7.4320E-02 2.4610E-02 3.4490E-03 4.3090E-01 1.0300E-01

2.1530E-02 2.2770E-03 3.8510E-02 3.9850E-02 3.4440E-02 6.5200E-02 4.4430E-02

1.9320E-02 3.2970E-03 2.1440E-01 5.3510E-02 7.3480E-03 1.3140E-03 4.1610E-02

1.4560E-02 5.8500E-03 1.2490E-03 8.9620E-02 3.7500E-02 9.4790E-03 2.0580E-03

4.1300E-02 4.3590E-02 1.9450E-02 6.6810E-04 7.0680E-02 2.9420E-02 6.3840E-03

6.2760E-04 6.9250E-02 4.4140E-02 1.2460E-02 1.4120E-03 4.6830E+00 7.0180E-01

4.3710E-02 7.0430E-03 3.8050E+00 4.1300E+00 9.5190E-02 7.0330E-01 5.4620E-01

2.8180E-01 1.1810E-02 1.1600E+00 2.2190E+00 2.9170E-01 2.5790E-02 6.9110E-01

5.4370E-01 5.6000E-03 1.8540E-02 1.1440E-02 8.5300E-03 4.7520E-03 7.4500E-03

5.2220E-03 2.2970E-03 6.3380E-03 2.2110E-02 1.5240E-02 3.9630E-03 4.6610E-02

6.5840E-02 2.3830E-02 4.4200E-03 6.6860E-02 7.1620E-02 4.4890E-02 1.0520E-02

2.0510E-01 2.6170E-01 1.5330E-01 3.0220E-02 5.6730E-02 6.2770E-02 1.4220E-02

8.1360E-04 3.3100E-02 2.0520E-02 1.0990E-02 6.9330E-03 5.5710E-02 2.3380E-02

2.4190E-02 2.1100E-02 1.1520E-01 1.4030E-01 5.9260E-02 1.7150E-02 6.3270E-02

4.1600E-02 3.0290E-02 1.3110E-02 7.8440E-02 3.3130E-02 4.6400E-02 2.2530E-02

1.3200E-01 1.7460E-01 8.3220E-02 2.0170E-02 3.8010E-02 3.9550E-02 1.3730E-02

5.1220E-02 2.6920E-02 1.7650E-02 1.4320E-02 8.8510E-02 9.3320E-02 4.2530E-02

6.3540E-03 2.3050E-02 1.8450E-02 7.0940E-03 4.0670E-03 4.4920E-02 3.4160E-02

2.7360E-02 8.5990E-03 3.4420E-02 3.0980E-02 1.2220E-02 9.7750E-03 4.2420E-02

2.4070E-02 1.7530E-02 5.2290E-03 4.9110E-02 1.8350E-02 2.7300E-02 1.1300E-02

4.1520E+00 7.6180E-01 3.9750E-02 1.3040E+00 3.8360E+00 1.3190E+00 2.8390E-01

5.1000E-01 2.9930E-01 1.4100E-01 2.6090E-01 1.3240E+00 1.2070E+00 1.6580E-01

2.9460E-01 5.4970E-01 1.4820E-01 1.0470E-02 9.7260E-03 8.3960E-03 6.6530E-03

5.9110E-03 4.2780E-03 2.0630E-03 5.0700E-03 1.2080E-02 1.5010E-02 6.3240E-03

1.2900E-02 4.2760E-02 4.0620E-02 1.4840E-02 2.1660E-02 6.3200E-02 5.1650E-02

3.0180E-02 5.7000E-02 1.8450E-01 1.7870E-01 1.0000E-01 1.9840E-02 4.9180E-02

3.1420E-02 7.2760E-03 2.0030E-02 1.5930E-02 1.4340E-02 6.9920E-03 3.6350E-02

2.1590E-02 1.9740E-02 2.2400E-02 4.1660E-02 9.4360E-02 8.9250E-02 4.2270E-02

3.0320E-02 3.6730E-02 2.9640E-02 2.1980E-02 4.0000E-02 3.8730E-02 2.8340E-02

3.7150E-02 4.0160E-02 1.1700E-01 1.1460E-01 5.6310E-02 3.9500E-02 2.8080E-02

6.4730E-03 3.5000E-02 2.0220E-02 2.0640E-02 1.2290E-02 3.1750E-02 7.2300E-02

5.5730E-02 2.5570E-02 1.2640E-02 1.4130E-02 1.0890E-02 4.3060E-03 1.8620E-02

3.0330E-02 2.3930E-02 1.9180E-02 2.7530E-02 1.9520E-02 1.2130E-02 1.0780E-02

2.2220E-02 2.2940E-02 1.6090E-02 1.0190E-02 2.6110E-02 2.2860E-02 1.5990E-02

1.9880E-02 3.0940E+00 5.8440E-01 3.5990E-01 2.2200E+00 2.2870E+00 9.3080E-02

3.3400E-01 2.9000E-01 2.0490E-01 4.5030E-02 4.5220E-01 1.1310E+00 5.8330E-01

1.1100E-01 3.7070E-01 2.6270E-01 4.3740E-03 7.6770E-03 7.4540E-03 6.1690E-03

4.2270E-03 3.1450E-03 1.6720E-03 3.8020E-03 6.4540E-03 1.1670E-02 7.8560E-03

3.0800E-03 1.8680E-02 3.5060E-02 2.7020E-02 5.0280E-03 2.9050E-02 4.2080E-02

4.5970E-02 9.5300E-03 8.7740E-02 1.4200E-01 1.5090E-01 5.8220E-03 2.6320E-02

3.2610E-02 1.6030E-02 1.0570E-02 1.3400E-02 1.3180E-02 6.0130E-03 1.8610E-02

2.1650E-02 1.7730E-02 1.5510E-02 1.1710E-02 4.6670E-02 7.7560E-02 6.2940E-02

1.2580E-02 2.6960E-02 2.5960E-02 2.3620E-02 1.5430E-02 3.4930E-02 2.4260E-02

3.3540E-02 9.5800E-03 5.3800E-02 9.5050E-02 8.7780E-02 3.6290E-02 1.5240E-02

4.6140E-03 2.0390E-02 1.9340E-02 1.8000E-02 8.3830E-03 8.2240E-03 3.9610E-02

5.0030E-02 3.9720E-02 6.5930E-03 9.6300E-03 1.0360E-02 4.8860E-03 6.1320E-03

2.0190E-02 2.0180E-02 2.2530E-02 2.0650E-02 1.0690E-02 1.2840E-02 8.3700E-03

9.9760E-03 1.8550E-02 1.4650E-02 1.0400E-02 1.0780E-02 2.1830E-02 1.3560E-02

1.7470E-02 2.0250E+00 8.7480E-02 8.1690E-01 2.3490E+00 2.3490E-02 1.5570E-01

2.5320E-01 1.8210E-01 6.9220E-03 9.2300E-02 5.4490E-01 8.2880E-01 3.6220E-02

1.8850E-01 2.7150E-01 2.0530E-03 5.2860E-03 5.7490E-03 4.0020E-03 2.9010E-03

2.1760E-03 1.2100E-03 2.5350E-03 3.1230E-03 6.7540E-03 6.8600E-03 6.0540E-04

5.3720E-03 1.9210E-02 3.0380E-02 6.1790E-04 9.9980E-03 2.9960E-02 4.3630E-02

3.7600E-05 2.4290E-02 8.6390E-02 1.4930E-01 1.3350E-03 1.0380E-02 2.2910E-02

1.9230E-02 4.7710E-03 9.9640E-03 8.6940E-03 4.8400E-03 7.1010E-03 1.9000E-02

1.5180E-02 7.7030E-03 2.9500E-03 1.7020E-02 4.6110E-02 6.4870E-02 4.0680E-03

1.6110E-02 2.1180E-02 1.8530E-02 4.0700E-03 2.1140E-02 2.6120E-02 2.0790E-02

1.4390E-03 1.7590E-02 6.5260E-02 9.0010E-02 2.7660E-02 6.0960E-03 3.7690E-03

9.8030E-03 1.7340E-02 1.1670E-02 5.2770E-03 2.1730E-03 1.5500E-02 3.4650E-02

3.9960E-02 3.2480E-03 6.1960E-03 6.9570E-03 4.7380E-03 2.3470E-03 9.3680E-03

1.6560E-02 1.8560E-02 1.3760E-02 4.9340E-03 1.1110E-02 5.1610E-03 3.6900E-03

1.1980E-02 1.2630E-02 7.4150E-03 3.2460E-03 1.4090E-02 1.5160E-02 9.9370E-03

2.6880E-02 1.3910E-01 1.4640E+00 4.1930E-03 4.7040E-02 1.5300E-01 1.0290E-01

1.0160E-03 1.3700E-02 1.1820E-01 6.0310E-01 9.6670E-03 6.8930E-02 1.6950E-01

6.2280E-04 2.2130E-03 3.1700E-03 2.2300E-03 1.4110E-03 1.0100E-03 6.3640E-04

1.2680E-03 1.1810E-03 3.6090E-03 2.4100E-03 9.8140E-05 1.1020E-03 6.4160E-03

1.9870E-02 7.3530E-06 1.5000E-03 1.3170E-02 2.4210E-02 4.1120E-06 7.4990E-05

3.7800E-02 9.1960E-02 2.3970E-04 2.8150E-03 1.0870E-02 1.3040E-02 1.6500E-03

5.5310E-03 3.5820E-03 2.7910E-03 1.7500E-03 1.1010E-02 9.1820E-03 2.5420E-03

4.8560E-04 5.7820E-03 1.8420E-02 4.1260E-02 7.5280E-04 6.9190E-03 1.2100E-02

9.6080E-03 4.8520E-04 8.2990E-03 1.8550E-02 8.8640E-03 1.5250E-05 3.5000E-03

2.1710E-02 5.6780E-02 1.4970E-02 1.4730E-03 2.3070E-03 3.5390E-03 1.0590E-02

5.2790E-03 2.6330E-03 5.4730E-04 3.3070E-03 1.7040E-02 2.4830E-02 1.2120E-03

3.1430E-03 3.1920E-03 3.4920E-03 2.5670E-04 2.6950E-03 9.8700E-03 1.0170E-02

6.8820E-03 1.7460E-03 6.5060E-03 2.3490E-03 1.0230E-03 5.5610E-03 7.6720E-03

3.6030E-03 5.8830E-04 5.9900E-03 1.0990E-02 3.6400E-03 1.0110E+00 2.4250E-01

5.9570E-01 2.7060E-01 9.0460E-02 1.7170E-02 1.8190E+00 6.0450E-01 1.6000E-01

3.9400E-02 1.8470E+00 8.1520E-02 2.4240E-02 2.1510E-02 1.4430E-02 7.6400E-03

3.0280E-03 1.1680E-02 1.0300E-02 5.2130E-03 3.8770E-02 7.5000E-02 5.3870E-02

2.7270E-02 1.7920E-01 9.8610E-02 4.5910E-02 1.4220E-02 2.3680E-01 9.7720E-02

3.1860E-02 6.5600E-03 1.4000E-03 1.3750E-03 9.5840E-04 3.9940E-04 2.1570E-02

9.3880E-03 3.4690E-03 8.8060E-04 7.5880E-02 2.2090E-02 5.7860E-03 1.3230E-03

3.8370E-02 3.4640E-02 3.1170E-02 2.4240E-02 8.1610E-02 7.4860E-02 4.5550E-02

1.7010E-02 1.3280E-01 5.8390E-02 2.8160E-02 1.0510E-02 7.9050E-02 5.7740E-02

3.1830E-02 1.1270E-02 7.4650E-03 3.5270E-03 1.4690E-03 3.5980E-04 6.1170E-02

2.8890E-02 1.1350E-02 1.2700E-01 7.4020E-02 2.7690E-02 5.0200E-03 4.0260E-02

4.3200E-02 4.5210E-02 3.8740E-02 1.6190E-02 6.2050E-03 2.2170E-03 7.1490E-04

1.2100E-02 9.1820E-03 5.6090E-03 4.2130E-03 2.2590E-02 2.9620E-02 3.1430E-02

1.9670E-02 4.0040E-02 4.7220E-02 3.9300E-02 2.1800E-02 6.2770E-02 5.2460E-02

3.3150E-02 1.6480E-02 8.1410E-01 2.3490E-01 2.1500E-01 1.7650E-01 1.0110E-01

2.4770E-01 9.0980E-01 6.0920E-01 1.9860E-01 2.9870E-01 1.1190E+00 4.7090E-02

1.2480E-02 7.3970E-03 7.6620E-03 7.4750E-03 1.1140E-02 5.5380E-03 3.7190E-03

2.9080E-02 5.9620E-02 3.8740E-02 1.9060E-02 6.4540E-02 6.8300E-02 6.4940E-02

5.5780E-02 2.8710E-02 1.1160E-01 9.4870E-02 4.4660E-02 1.1850E-03 3.1650E-04

7.3290E-04 1.0520E-03 8.1120E-03 6.8160E-03 6.5630E-03 3.1710E-03 1.5120E-02

3.8640E-02 2.0420E-02 5.9050E-03 3.4030E-02 3.2210E-02 2.0420E-02 9.4540E-03

7.0630E-02 1.4520E-02 2.7780E-02 5.1340E-02 3.6810E-02 8.5780E-02 4.7270E-02

2.1690E-02 4.8110E-02 2.3490E-02 2.7790E-02 3.6800E-02 1.5060E-03 3.4930E-03

3.0280E-03 1.7420E-03 3.9240E-02 2.7430E-02 1.3940E-02 6.9780E-02 2.9350E-02

4.0770E-02 3.1530E-02 4.4340E-02 4.7510E-02 2.6390E-02 7.4460E-03 5.0170E-03

7.5490E-03 4.6540E-03 1.7770E-03 7.8330E-03 4.2360E-03 4.6290E-03 5.4740E-03

1.6950E-02 3.3250E-02 1.9450E-02 7.8270E-03 5.0690E-02 3.1780E-02 1.9340E-02

9.3930E-03 5.0010E-02 2.2640E-02 2.4620E-02 2.6530E-02 4.5540E-02 1.6990E-01

1.6940E-01 9.9800E-02 4.0960E-02 1.7190E-01 4.9280E-01 6.0310E-01 5.1180E-02

2.6430E-01 6.6110E-01 3.4570E-03 8.2070E-03 6.5600E-03 4.5470E-03 7.7690E-03

4.5550E-03 1.1840E-03 1.9390E-02 4.0230E-02 2.4960E-02 1.1290E-02 9.1390E-03

4.3860E-02 5.8410E-02 5.7160E-02 1.4080E-03 1.9640E-02 6.4080E-02 1.0140E-01

2.6060E-04 7.7890E-04 7.2260E-04 3.1620E-04 2.1860E-03 5.5560E-03 6.1580E-03

3.0370E-03 3.2670E-03 1.0490E-02 2.1270E-02 1.7060E-02 3.0850E-02 1.5540E-02

1.0200E-02 7.4800E-03 1.2040E-02 4.7510E-02 3.6180E-02 1.3780E-02 1.3100E-02

2.2750E-02 3.7490E-02 3.9730E-02 7.7580E-03 3.2460E-02 3.0330E-02 1.9380E-02

1.5280E-04 9.2660E-04 2.1490E-03 2.9960E-03 1.8280E-02 2.1960E-02 1.2700E-02

1.3590E-02 5.0530E-02 3.6710E-02 1.6030E-02 4.9780E-02 1.7170E-02 9.0560E-03

9.2730E-03 1.5870E-03 3.3440E-03 4.5280E-03 3.2080E-03 2.3050E-03 5.0620E-03

4.5440E-03 2.9510E-03 1.1300E-02 2.7940E-02 9.6500E-03 2.7770E-03 4.2900E-02

2.1170E-02 8.1120E-03 2.1250E-03 1.9700E-02 3.1040E-02 2.1710E-02 1.0050E-02

1.7170E+00 3.3110E-01 4.3960E-02 6.3470E+00 2.2740E+00 4.6920E-01 7.2690E-02

2.0900E+00 9.3930E-01 3.6550E-02 2.0300E-01 1.6250E-01 5.8810E-02 1.9980E-02

4.9900E-02 1.7810E-02 6.5850E-03 5.3720E-02 1.0380E-01 3.5360E-02 4.6400E-03

1.5770E-01 6.6390E-02 2.4940E-02 6.4530E-03 6.1640E-02 3.2520E-02 1.3810E-02

3.7140E-03 5.4030E-02 2.0230E-02 6.1090E-03 1.9450E-03 2.6420E-01 7.6170E-02

1.4650E-02 1.5680E-03 1.8470E-01 4.7630E-02 1.8670E-02 7.9930E-03 1.8350E-01

6.0670E-02 1.8060E-02 4.3760E-03 9.0740E-02 3.3850E-02 1.0240E-02 2.6470E-03

1.6720E-01 6.1170E-02 1.9470E-02 5.6380E-03 6.5270E-02 2.6740E-02 8.0690E-03

1.6710E-03 3.3010E-02 1.4860E-02 5.1130E-03 1.1000E-03 5.7260E-02 2.5890E-02

2.4990E-03 5.6750E-02 2.6420E-02 1.2490E-02 4.6450E-03 4.2270E-02 1.5630E-02

5.7240E-03 1.7500E-03 2.9910E-02 1.9480E-02 9.2280E-03 2.3160E-03 1.5430E-02

7.6400E-03 2.3160E-03 9.3690E-04 1.3890E-02 8.2390E-03 4.3360E-03 1.4270E-03

1.1610E-02 5.5880E-03 3.6070E-03 1.5430E-03 1.4620E-02 6.1420E-03 2.0210E-03

4.5850E-04 1.4250E+00 3.5240E-01 1.6950E+00 2.4770E+00 2.1960E+00 5.6100E-01

1.2020E+00 4.4640E-01 6.5800E-01 8.7850E-02 4.3800E-02 3.2120E-02 5.5980E-02

2.5670E-02 2.3070E-02 7.8760E-03 4.0230E-02 5.0500E-02 3.3720E-02 2.3400E-02

4.7530E-02 7.1470E-02 5.0040E-02 2.7830E-02 2.2300E-02 2.3580E-02 2.2270E-02

1.5070E-02 8.0640E-03 2.7130E-02 1.9960E-02 7.4040E-03 7.5120E-02 1.0910E-01

6.1710E-02 1.6270E-02 4.7260E-02 1.0130E-01 3.3280E-02 9.6530E-03 4.3780E-02

8.7230E-02 5.0560E-02 1.9190E-02 1.9350E-02 4.9800E-02 2.8110E-02 1.1790E-02

4.5150E-02 8.0310E-02 4.8410E-02 1.9840E-02 1.5370E-02 2.9230E-02 2.2690E-02

9.6760E-03 8.9300E-03 1.3440E-02 1.2480E-02 5.8570E-03 3.4350E-02 1.1820E-02

1.7980E-02 2.6400E-02 2.9910E-02 1.4220E-02 8.5420E-03 1.2050E-02 1.9600E-02

1.2360E-02 6.6130E-03 1.9480E-02 1.0670E-02 7.8400E-03 6.8400E-03 5.3890E-03

6.1710E-03 5.8470E-03 2.9350E-03 1.0410E-02 5.2670E-03 3.0850E-03 2.1490E-03

5.5870E-03 5.2900E-03 3.4290E-03 1.8960E-03 4.8790E-03 5.8450E-03 4.5030E-03

2.2100E-03 9.3230E-01 1.1040E-01 1.7450E+00 1.0950E+00 1.6900E+00 4.4070E-01

6.6960E-01 4.3370E-01 2.9120E-02 7.9550E-02 2.7910E-02 2.1050E-02 1.2030E-02

1.4910E-02 9.0900E-03 2.6790E-02 2.0150E-02 3.1380E-02 2.1070E-02 1.0510E-02

3.0170E-02 4.8440E-02 4.0580E-02 4.7030E-03 1.4800E-02 1.6580E-02 1.9490E-02

6.2750E-04 7.0640E-03 1.7150E-02 1.5940E-02 1.4300E-02 6.1460E-02 5.8800E-02

3.9770E-02 1.8550E-02 3.6600E-02 5.4600E-02 1.8380E-02 9.2890E-03 3.4320E-02

5.2880E-02 3.8070E-02 3.0570E-03 1.4920E-02 3.0020E-02 2.2360E-02 1.0650E-02

3.4320E-02 4.8370E-02 3.6020E-02 2.2200E-03 1.2270E-02 1.6530E-02 1.8500E-02

5.8050E-04 7.6790E-03 7.4710E-03 1.0490E-02 1.3560E-02 1.8010E-02 1.1660E-02

1.2480E-02 1.4210E-02 1.6850E-02 6.6200E-03 3.4720E-03 8.0880E-03 1.1260E-02

8.4470E-03 9.2270E-03 7.8380E-03 9.4700E-03 3.3380E-03 1.1790E-03 4.1140E-03

3.5280E-03 4.5050E-03 6.9430E-03 2.8320E-03 2.6310E-03 1.5390E-03 3.6060E-03

3.4260E-03 2.7110E-03 1.6990E-03 1.0960E-03 3.5340E-03 3.6030E-03 3.3940E-03

2.6270E-02 9.0930E-02 1.2050E+00 9.9810E-01 7.8520E-02 5.3920E-01 1.6160E-01

1.0160E-02 2.1440E-02 1.4500E-02 1.4180E-02 4.9940E-03 6.5550E-03 6.5980E-03

1.3390E-02 5.2110E-03 1.8750E-02 9.9230E-03 8.9760E-04 1.0750E-02 2.0640E-02

3.2090E-02 7.0450E-05 4.9780E-03 1.0690E-02 1.1950E-02 9.8460E-05 1.1380E-03

5.0040E-03 1.6000E-02 1.5680E-03 1.6000E-02 3.9650E-02 2.9650E-02 7.9930E-03

9.4980E-03 1.8450E-02 2.6950E-02 1.7970E-03 8.1590E-03 2.2730E-02 3.3360E-02

6.2620E-04 2.6020E-03 1.0110E-02 2.2530E-02 2.4340E-03 9.0800E-03 2.2690E-02

3.0710E-02 1.9340E-04 2.2660E-03 8.1120E-03 1.3160E-02 7.7580E-05 5.3960E-04

5.3590E-03 7.0240E-03 3.0480E-03 1.4360E-02 3.7450E-03 4.6450E-03 8.5360E-03

6.6160E-03 6.2130E-03 7.5090E-04 2.9690E-03 5.8730E-03 7.4940E-03 2.3160E-03

6.8400E-03 3.3380E-03 2.0230E-03 3.6660E-04 9.4240E-04 2.7600E-03 3.0030E-03

3.4710E-03 1.1620E-03 1.6180E-03 7.1960E-04 1.5430E-03 1.8950E-03 1.6990E-03

1.0480E-03 1.2770E-04 1.0870E-03 2.3380E-03 2.2490E-03 2.3040E+00 2.7430E-01

3.1600E-02 7.7490E+00 2.5340E-01 1.1770E-01 2.4710E-01 1.1490E-01 3.6500E-02

1.5930E-02 3.4480E-02 1.6520E-02 3.9650E-03 3.3770E-03 3.0100E-02 6.1920E-03

1.4070E-03 8.5230E-02 3.4440E-02 1.1720E-02 2.1470E-03 5.5640E-02 2.4500E-02

1.0470E-02 2.5800E-03 7.1090E-02 2.9320E-02 9.8560E-03 1.7310E-03 1.4380E-01

4.3120E-02 6.0050E-03 8.9190E-04 1.3700E-01 4.9120E-02 1.0300E-02 1.7130E-03

4.2070E-02 1.7880E-02 7.4070E-03 2.1000E-03 8.0320E-02 3.2620E-02 1.1680E-02

1.7460E-03 1.8740E-01 5.0210E-02 1.3100E-02 1.9710E-03 8.6120E-02 2.4830E-02

6.5830E-03 1.3250E-03 1.7830E-01 5.4110E-02 1.4980E-02 2.8560E-03 8.8090E-02

2.2170E-02 1.2830E-02 3.7450E-02 1.9760E-02 7.4520E-03 1.5500E-03 5.5530E-02

1.9760E-02 6.3660E-03 1.7660E-03 1.6940E-02 6.8850E-03 2.1360E-03 4.1460E-04

2.1920E-02 1.1300E-02 3.4480E-03 9.6750E-04 1.5660E-02 1.7870E-02 6.1410E-03

2.1460E-03 2.0140E-02 9.6980E-03 3.3640E-03 6.2230E-04 2.6320E-02 1.2620E-02

5.2790E-03 1.9880E-03 2.4490E+00 3.1720E-01 2.6410E+00 3.7180E+00 1.0890E-01

7.0420E-02 1.7840E-01 1.0640E-01 3.0220E-02 2.3060E-02 1.1960E-02 8.9740E-03

2.7020E-03 1.4040E-02 1.3200E-02 3.2290E-03 3.1470E-02 4.0010E-02 2.5320E-02

1.2900E-02 1.9500E-02 2.7960E-02 1.6080E-02 1.1340E-02 2.0790E-02 3.4370E-02

2.3900E-02 1.1240E-02 5.4740E-02 5.1250E-02 3.9690E-02 5.2260E-03 5.9490E-02

5.3300E-02 3.6430E-02 9.6120E-03 1.7860E-02 1.9290E-02 1.0930E-02 6.7530E-03

2.7570E-02 3.6260E-02 2.7080E-02 1.2120E-02 5.0090E-02 9.9530E-02 3.8700E-02

1.4310E-02 1.9600E-02 4.8010E-02 2.1270E-02 7.2550E-03 3.7590E-02 8.4900E-02

4.8280E-02 1.6780E-02 4.3340E-02 4.7490E-02 7.7070E-03 2.2340E-02 1.4150E-02

1.0130E-02 6.3790E-03 1.9750E-02 2.6340E-02 1.5050E-02 6.0400E-03 8.2310E-03

6.4770E-03 4.0490E-03 1.9020E-03 9.8720E-03 8.9120E-03 8.3930E-03 3.6580E-03

1.2530E-02 9.9900E-03 8.0050E-03 2.7860E-03 1.1160E-02 7.4840E-03 5.2290E-03

2.9720E-03 1.2600E-02 1.0350E-02 6.6760E-03 5.1070E-03 1.9010E+00 7.5050E-01

2.6590E+00 1.4610E+00 3.2780E-02 5.6400E-02 1.3820E-01 7.9680E-02 1.3310E-02

1.2220E-02 7.6670E-03 2.0260E-03 6.2450E-03 1.0340E-02 6.1360E-03 7.9840E-03

1.9900E-02 2.8630E-02 2.2180E-02 6.9330E-03 1.1690E-02 2.2400E-02 1.5340E-02

3.9730E-03 1.6410E-02 2.4860E-02 2.1920E-02 1.5050E-02 4.8830E-02 2.5040E-02

2.6900E-02 1.9630E-02 4.4880E-02 3.0610E-02 2.3830E-02 7.4040E-03 1.0900E-02

1.4490E-02 8.9630E-03 8.2220E-03 2.2610E-02 2.3790E-02 2.2490E-02 1.3080E-02

3.8590E-02 6.9130E-02 3.0960E-02 4.3940E-03 1.5860E-02 3.3770E-02 1.7810E-02

7.0070E-03 3.2690E-02 6.0100E-02 4.2110E-02 2.5220E-02 3.2450E-02 1.6290E-02

1.0440E-02 1.1730E-02 1.1080E-02 5.8750E-03 6.3650E-03 1.5050E-02 1.7230E-02

1.1540E-02 3.3530E-03 4.9770E-03 4.5700E-03 2.5070E-03 2.4960E-03 7.2210E-03

6.2400E-03 7.2870E-03 9.3960E-03 5.7270E-03 6.3890E-03 3.6440E-03 5.0190E-03

6.6590E-03 5.5910E-03 3.1590E-03 5.2770E-03 6.6690E-03 7.7960E-03 5.1250E-03

2.0380E-01 9.3500E-01 2.0810E+00 1.5120E-02 2.8900E-02 5.1470E-02 2.7610E-02

6.3210E-03 1.0550E-02 4.7940E-03 1.3510E-03 2.4300E-03 5.8170E-03 6.7640E-03

1.0700E-03 8.6470E-03 1.7990E-02 2.5240E-02 8.6510E-04 7.3930E-03 1.0710E-02

1.8530E-02 2.0150E-04 4.5030E-03 1.4200E-02 2.5930E-02 2.9620E-03 1.7120E-02

3.7200E-02 2.0080E-02 4.9320E-03 2.0860E-02 3.3470E-02 2.0190E-02 2.1000E-03

6.7510E-03 8.5000E-03 9.4570E-03 9.2040E-04 8.0830E-03 1.8600E-02 2.4080E-02

1.9710E-03 1.4290E-02 3.0910E-02 5.2860E-02 8.0420E-04 4.6730E-03 1.2940E-02

2.9140E-02 1.0410E-03 7.4750E-03 2.6650E-02 6.0540E-02 1.5080E-02 1.3110E-02

2.0630E-02 3.5560E-03 9.9800E-03 8.0950E-03 4.5340E-03 1.7670E-03 6.0400E-03

1.1540E-02 1.3900E-02 1.0160E-03 3.3230E-03 3.5940E-03 2.1560E-03 5.6510E-04

2.5550E-03 6.0320E-03 5.7420E-03 6.2640E-03 2.9880E-03 3.9070E-03 3.5030E-03

1.6020E-03 4.8630E-03 4.7090E-03 2.5270E-03 1.9880E-03 5.1060E-03 5.1210E-03

4.9050E-03 3.0570E-01 8.1860E-02 4.7890E-02 2.8260E-02 1.5510E-02 8.0920E-03

1.5470E-01 7.4680E-02 8.1580E-03 1.4160E-02 2.7570E-02 1.2510E-02 6.2600E-03

2.2360E-02 1.3260E-02 6.9630E-03 2.7800E-03 1.1900E-02 6.9090E-03 4.5660E-03

1.6030E-03 5.7990E-03 3.8060E-03 2.2120E-03 5.1300E-04 3.4950E-02 1.7330E-02

7.8220E-03 2.6630E-03 6.4580E-02 4.1050E-02 1.7050E-02 3.4700E-03 1.9660E-02

1.6390E-02 1.0840E-02 6.9570E-03 3.4420E-02 2.3120E-02 1.3130E-02 5.6460E-03

1.0770E-01 4.1750E-02 1.4220E-02 4.6960E-03 2.8590E-02 1.9150E-02 1.1100E-02

6.7050E-03 7.9480E-03 3.9080E-03 1.7690E-03 5.6610E-04 1.2290E-01 2.3970E-02

7.1540E-03 8.4210E-02 3.2780E-02 1.1610E-02 3.6230E-03 8.5060E-02 4.2270E-02

2.1370E-02 1.0960E-02 3.7540E-02 1.7680E-02 6.7450E-03 1.3950E-03 8.2190E-03

6.1260E-03 3.8280E-03 1.9840E-03 2.7190E-02 2.1750E-02 1.1680E-02 6.7360E-03

1.2650E-02 1.0640E-02 7.3350E-03 3.3540E-03 1.3150E-02 8.8350E-03 5.2120E-03

2.6480E-03 1.8280E-01 1.7970E-02 1.9950E-02 1.7090E-02 1.1670E-02 7.3380E-02

2.6080E-02 5.8500E-02 9.4290E-03 1.2480E-02 1.1950E-02 5.0970E-03 7.6730E-03

1.2310E-02 8.0350E-03 7.6680E-03 2.7350E-03 4.4240E-03 4.5580E-03 3.9830E-03

1.8310E-03 6.3310E-04 2.2340E-03 2.4040E-03 1.2010E-02 1.2560E-02 1.0530E-02

6.0030E-03 3.3930E-02 1.1350E-02 2.0600E-02 1.7680E-02 1.2260E-02 1.0570E-02

7.9840E-03 4.7010E-03 1.5330E-02 9.6910E-03 1.1610E-02 1.4120E-02 9.3310E-03

5.0210E-02 3.7570E-02 1.5560E-02 1.1980E-02 1.1380E-02 1.0840E-02 9.8020E-03

8.5530E-04 3.2970E-03 3.1540E-03 2.0880E-03 2.3970E-02 6.3210E-02 1.5030E-02

1.7460E-02 3.6840E-02 2.4310E-02 9.7950E-03 1.9500E-02 4.2510E-02 3.1180E-02

1.4610E-02 1.3160E-02 7.5470E-03 1.1590E-02 7.3580E-03 4.4270E-03 2.5870E-03

2.9450E-03 3.4660E-03 1.8120E-02 1.1680E-02 1.4700E-02 2.8290E-03 9.8750E-03

6.2010E-03 4.3680E-03 2.4190E-03 5.8020E-03 4.8660E-03 4.6370E-03 4.8770E-03

5.6600E-03 8.8470E-03 1.0090E-02 8.9540E-03 8.1360E-03 5.7930E-02 1.2420E-02

4.7200E-03 6.2210E-03 5.0950E-03 4.1550E-03 6.4930E-04 4.1040E-03 5.2550E-03

7.9160E-03 9.3180E-05 1.6270E-03 2.7370E-03 3.1820E-03 1.2060E-04 1.0580E-03

1.4890E-03 1.5350E-03 2.8940E-03 7.6450E-03 6.9970E-03 4.3930E-03 2.0500E-03

2.2260E-02 1.3050E-02 3.5180E-03 6.1250E-03 4.8930E-03 3.8740E-03 2.4130E-03

1.1530E-03 9.1240E-03 9.0150E-03 5.7250E-03 2.6900E-03 4.7970E-03 2.1000E-02

2.7050E-02 3.0120E-03 5.9790E-03 6.7310E-03 5.6940E-03 6.0270E-05 4.9400E-04

1.5980E-03 2.4520E-03 7.1510E-03 1.5030E-02 2.8290E-02 4.0890E-03 9.9180E-03

1.6940E-02 1.2760E-02 8.4360E-03 8.3240E-03 1.6560E-02 2.0190E-02 9.7730E-04

8.9300E-03 6.2560E-03 2.5590E-03 7.3930E-04 2.4760E-03 2.1770E-03 1.2660E-03

9.0670E-03 6.7300E-03 2.8290E-03 4.1070E-03 4.3340E-03 3.7420E-03 2.0270E-03

1.1450E-03 1.7420E-03 3.0770E-03 2.7600E-03 1.9110E-03 3.9520E+00 4.0620E-01

1.1560E-01 1.7380E+00 2.5030E-01 5.8090E-02 1.9390E-02 2.7240E-02 1.1250E-02

2.1860E-03 1.4800E+00 1.5130E-01 1.8790E-02 2.7550E-03 1.1230E-01 3.1120E-02

8.8000E-03 1.2310E-03 1.2240E-01 4.0140E-02 1.3530E-02 1.2640E-03 1.6220E-01

3.0860E-02 1.0430E-02 3.5410E-03 3.0940E-01 3.9300E-02 1.2290E-02 3.0400E-03

4.3100E-01 7.3340E-02 1.2260E-02 2.6710E-03 4.4260E-01 6.6910E-02 1.4350E-02

2.5070E-03 9.3830E-01 1.2500E-01 1.4580E-02 3.0680E-03 1.2450E+00 1.7240E-01

2.9250E-02 5.1360E-03 1.0440E-01 4.3460E-02 1.2410E-02 2.2550E-03 3.0670E-02

9.2990E-03 1.4660E-03 4.5820E-02 1.3200E-02 4.1580E-03 1.2660E-03 1.2330E-01

3.1100E-02 1.1560E-02 3.2730E-03 1.5420E+01 3.5910E-01 4.8760E-02 2.4640E-02

3.0080E+01 3.6810E+00 3.2620E-01 5.6190E-02 5.4020E-02 5.1920E-02 2.4860E-02

3.1070E-03 5.9350E+00 1.7540E-01 9.2890E-03 4.6010E-03 1.8020E+01 2.3020E+00

1.0850E-01 1.7410E-02 4.4080E+00 3.8880E-01 7.4130E-01 7.5930E-01 1.3350E-01

1.5510E-02 1.7040E-02 9.5820E-03 5.4740E-03 4.8550E-02 1.1020E+00 1.7360E-01

2.1300E-02 1.9810E-02 6.0610E-02 2.8870E-02 1.0210E-02 4.0820E-02 6.4690E-02

5.0910E-02 1.5820E-02 3.7910E-02 8.5990E-02 1.8750E-02 5.9980E-03 6.6540E-02

1.7590E-01 2.6110E-02 9.9450E-03 6.8970E-02 2.5360E-01 6.9880E-02 1.2740E-02

3.6750E-02 2.4550E-01 6.9260E-02 1.7680E-02 1.2240E-01 5.9550E-01 1.3840E-01

1.5710E-02 6.1850E-02 9.1540E-01 1.8390E-01 3.3510E-02 3.3070E-02 4.9460E-02

3.6280E-02 1.4080E-02 1.5950E-02 1.1270E-02 5.2480E-03 1.7320E-02 2.5670E-02

1.0330E-02 2.8030E-03 3.0790E-02 6.6880E-02 2.3510E-02 1.1310E-02 2.8290E+00

1.0080E+01 3.1920E-01 2.6730E-02 1.0820E+00 2.1970E+01 4.3200E+00 3.7730E-01

4.3210E-02 3.4510E-02 1.4960E-02 1.8410E-02 8.7730E-01 3.8420E+00 1.6280E-01

6.9800E-03 2.2650E+00 1.1350E+01 2.6950E+00 1.3700E-01 3.3240E+00 2.8330E-01

5.8910E-01 3.4560E-01 1.1640E-02 9.0950E-03 9.3390E-03 5.6420E-03 8.9050E-03

4.3940E-02 8.2130E-01 1.3630E-01 3.8810E-03 1.6590E-02 4.4460E-02 2.4850E-02

1.6010E-03 3.1860E-02 4.5980E-02 4.3500E-02 1.3740E-02 2.8690E-02 5.8650E-02

1.1490E-02 1.9970E-02 5.7800E-02 1.1430E-01 1.6270E-02 1.2260E-02 6.2750E-02

1.7280E-01 4.9190E-02 8.1700E-03 3.4080E-02 1.9920E-01 5.7470E-02 1.4060E-02

1.3840E-01 4.7990E-01 1.0560E-01 1.3210E-02 7.1730E-02 7.1100E-01 1.4870E-01

6.3650E-03 2.7850E-02 3.4060E-02 3.1980E-02 7.8000E-03 1.0410E-02 7.1500E-03

6.6360E-03 1.2880E-02 1.6780E-02 6.2190E-03 1.1430E-02 2.3440E-02 4.9460E-02

1.8370E-02 2.4760E-01 2.9050E+00 6.4630E+00 2.1240E-01 1.1230E-01 1.3330E+00

1.6010E+01 3.3520E+00 3.2420E-02 1.8400E-02 1.7360E-02 1.6580E-02 8.4600E-02

1.0190E+00 2.4420E+00 1.1430E-01 9.2220E-02 2.6900E+00 7.5410E+00 2.0410E+00

1.0820E-01 2.9370E-01 4.0950E-01 7.7590E-03 4.0100E-03 7.1100E-03 4.4890E-03

1.4060E-03 9.6580E-03 3.3400E-02 6.2690E-01 1.7580E-04 4.4250E-03 1.3880E-02

4.2900E-02 8.0320E-05 1.8590E-03 2.5350E-02 4.8030E-02 6.2800E-03 1.1180E-02

2.1270E-02 3.2820E-02 6.3470E-03 1.9530E-02 4.4750E-02 7.0770E-02 2.6690E-03

1.2740E-02 5.2390E-02 1.3510E-01 1.1950E-03 9.0820E-03 2.6770E-02 1.8900E-01

2.9570E-03 1.5490E-02 1.0380E-01 3.1850E-01 2.8000E-03 1.4790E-02 5.7390E-02

5.6480E-01 6.1240E-04 7.0340E-03 2.2630E-02 3.5290E-02 2.8350E-03 7.5670E-03

6.1230E-03 2.4770E-03 5.7480E-03 9.4390E-03 8.2480E-03 3.2780E-03 1.1270E-02

1.8330E-02 3.2980E-02 4.4270E-02 2.8620E-01 2.2020E+00 3.8970E+00 3.1920E-02

1.2240E-01 1.0260E+00 1.2690E+01 2.1600E-02 7.5050E-03 2.2860E-02 6.8800E-03

8.8730E-03 1.0490E-01 7.7930E-01 1.6520E+00 1.2510E-02 1.3310E-01 2.0380E+00

6.0390E+00 1.3570E+00 1.6620E-01 8.6020E-01 8.1520E-01 3.6550E-01 1.0300E-02

3.1160E-02 1.7340E-02 8.8900E-03 4.4920E-03 9.7840E-03 5.3180E-03 2.9670E-03

9.1160E-04 1.8270E-02 7.9630E-03 3.6480E-03 1.5480E-03 6.0560E-02 4.0130E-02

2.8990E-02 1.6070E-02 5.9980E-01 1.5080E-01 2.5780E-02 5.0050E-03 3.3940E-02

1.7550E-02 1.0970E-02 5.1770E-03 2.0960E-02 1.2330E-02 7.3330E-03 4.2580E-03

2.5020E-02 1.5890E-02 8.2540E-03 3.6320E-03 2.8010E-02 1.3990E-02 6.5080E-03

3.0550E-03 2.6440E-02 1.7400E-02 7.6030E-03 3.5510E-03 8.2080E-01 3.6120E-01

1.0340E-02 5.2420E-01 1.4430E-01 3.2530E-02 5.2580E-03 6.4190E-02 4.8470E-02

2.8010E-02 1.2160E-02 1.1590E+01 2.7530E+00 5.2090E-01 4.0430E-02 2.7610E-01

1.2620E-01 6.1590E-02 3.1280E-02 6.7540E+00 8.9690E+00 3.9470E+00 7.4260E-02

9.6510E+00 2.4220E+00 3.2350E-01 1.6080E-02 6.0600E-02 2.4040E-02 9.4150E-03

3.5480E-03 1.0610E+00 5.6850E-01 3.5850E-01 1.1480E-01 3.2060E-01 7.0280E-03

1.2790E-02 1.1880E-02 8.4710E-03 1.7490E-03 4.2610E-03 3.9810E-03 3.0310E-03

2.3600E-03 7.1870E-03 7.4040E-03 4.5860E-03 3.3710E-02 3.8730E-02 2.0030E-02

5.6120E-03 1.7330E-02 3.1290E-01 1.6340E-01 3.0020E-02 1.3060E-02 1.2290E-02

1.1800E-02 9.1110E-03 6.6020E-03 9.6640E-03 8.3090E-03 5.5410E-03 1.0100E-02

1.0320E-02 8.5990E-03 7.4140E-03 5.1480E-03 1.1540E-02 1.0480E-02 7.7430E-03

6.8320E-03 1.0350E-02 1.0160E-02 9.9600E-03 3.5730E-01 1.1340E-01 3.2150E-01

3.0710E-02 2.6370E-01 1.4570E-01 3.3600E-02 3.8060E-02 2.0570E-02 2.1480E-02

2.5100E-02 1.9120E-01 5.5690E+00 2.9380E+00 5.6090E-01 4.4330E-02 1.1640E-01

9.9130E-02 5.7340E-02 4.4710E+00 3.8810E+00 1.3370E+00 3.5130E+00 1.5760E-01

4.5710E+00 2.4610E+00 4.8780E-01 8.0730E-03 2.6640E-02 2.0850E-02 9.5810E-03

2.8220E-01 1.0220E-02 3.1710E-01 6.5100E-02 1.3770E-03 3.7150E-03 6.7710E-03

7.6640E-03 7.7320E-05 1.1010E-03 2.1560E-03 3.1250E-03 2.7150E-05 1.1700E-03

3.1480E-03 5.9580E-03 2.2350E-02 8.7930E-03 9.9890E-03 6.4790E-03 6.3410E-03

7.8660E-03 1.2500E-01 1.2230E-01 3.2080E-03 7.2390E-03 7.4600E-03 5.4140E-03

2.2030E-03 3.2060E-03 4.3730E-03 5.0640E-03 1.2750E-03 5.6390E-03 5.5540E-03

4.8320E-03 1.0630E-03 2.8600E-03 5.8020E-03 7.4590E-03 6.8670E-04 3.9280E-03

6.8660E-03 6.8000E-03 1.0260E-02 3.2090E-01 6.6060E-02 5.1270E-03 1.8150E-02

1.1000E-01 1.0240E-01 5.6450E-03 2.1360E-02 1.6980E-02 7.1140E-03 4.5260E-02

1.0650E-01 2.2340E+00 2.1810E+00 1.7790E-02 2.1480E-02 5.4110E-02 7.6460E-02

2.2130E+00 7.4200E-02 3.4040E+00 7.8010E-01 8.3680E-03 1.0660E-01 1.8870E+00

2.0500E+00 1.9530E-03 4.4470E-03 1.1270E-02 1.7380E-02 1.1880E+00 7.9220E-01

3.9630E-01 6.0840E-02 5.0700E-02 4.0560E-02 3.0420E-02 3.0400E-04 2.6060E-04

2.1710E-04 1.7370E-04 1.5350E-03 1.3430E-03 1.1510E-03 9.5930E-04 3.5250E+00

2.6550E+00 1.7770E+00 8.9050E-01 1.0580E-01 7.9370E-02 5.2950E-02 2.6490E-02

4.3100E-03 3.4480E-03 2.5860E-03 1.7240E-03 1.9730E-02 1.6430E-02 1.3150E-02

9.8660E-03 1.9720E-02 1.5780E-02 1.1830E-02 7.8880E-03 1.7360E-02 1.4460E-02

1.1570E-02 8.6770E-03 2.6750E-04 2.2930E-04 1.9110E-04 1.5290E-04 3.4200E-02

2.2800E-02 1.1400E-02 2.8480E-02 2.1510E-02 1.4360E-02 7.1960E-03 1.6740E-02

1.3390E-02 1.0040E-02 6.6960E-03 6.7570E-02 5.0790E-02 3.3910E-02 1.6970E-02

7.4410E-03 6.2020E-03 4.9630E-03 3.7220E-03 1.9360E-02 1.4990E-02 9.9800E-03

4.9990E-03 4.1670E-02 3.3120E-02 2.2110E-02 1.1070E-02 3.0350E-03 2.4280E-03

1.8210E-03 1.2140E-03 2.2080E+00 1.1160E+00 3.2960E-02 2.2520E-02 1.2930E-02

5.6650E-03 7.3320E-02 2.2450E-02 8.4000E-03 2.3180E-03 1.1500E-03 9.6540E-04

6.1720E-04 3.4290E-04 6.0400E+00 4.0020E+00 1.6010E+00 3.0490E-01 8.1530E-02

4.8110E-02 2.1640E-02 6.8400E-03 1.0350E-01 7.2240E-02 5.6780E-02 3.8240E-02

5.4940E-02 4.1370E-02 2.7500E-02 1.5740E-02 3.7180E-02 2.1840E-02 1.2390E-02

6.3050E-03 2.4010E-02 1.1080E-02 4.4370E-03 1.4030E-03 2.0590E-02 6.4190E-03

2.5600E-03 1.3330E-03 3.2340E-02 3.2260E-02 2.0230E-02 5.6070E-02 3.2330E-02

1.5270E-02 4.7580E-03 6.3060E-02 3.1910E-02 1.5780E-02 6.6900E-03 7.3630E-02

4.7180E-02 2.2890E-02 8.7910E-03 6.8850E-03 8.5870E-03 3.6050E-03 1.3820E-03

1.9690E-02 3.3580E-02 3.4220E-02 2.2090E-02 6.3480E-02 4.6950E-02 2.1470E-02

5.4270E-03 4.6380E-02 1.6210E-02 6.0460E-03 2.1690E-03 7.2810E-01 1.5280E-02

3.8600E-03 9.4450E-03 1.3380E-02 2.7590E-03 3.2080E-02 3.1590E-02 1.1330E-02

6.4050E-04 3.1920E-04 4.0840E-04 6.5270E-04 3.3580E+00 8.3740E-01 1.9600E+00

1.8570E+00 3.7690E-02 2.2840E-02 2.5590E-02 1.7880E-02 5.6910E-02 6.1990E-02

4.0550E-02 1.8360E-02 3.0530E-02 2.0680E-02 2.0540E-02 2.1960E-02 1.4560E-02

1.4150E-02 1.2540E-02 9.4230E-03 3.0250E-03 9.8410E-03 8.9030E-03 5.5210E-03

1.1080E-03 5.7640E-03 5.4790E-03 3.3440E-03 3.2170E-02 1.8410E-02 5.9640E-03

2.4830E-02 1.8230E-02 1.7520E-02 1.1200E-02 1.5990E-02 2.3020E-02 2.1750E-02

1.4700E-02 4.1740E-02 2.1780E-02 2.3580E-02 1.7030E-02 3.3270E-03 2.0740E-03

2.4180E-03 4.7700E-03 1.3120E-02 3.4170E-02 2.0200E-02 5.5280E-03 4.1460E-02

8.7030E-03 2.1100E-02 2.0070E-02 4.8890E-03 1.7790E-02 1.3630E-02 6.4150E-03

8.5300E-04 9.0850E-03 8.5230E-03 2.4520E-03 9.7450E-05 1.6420E-03 1.0310E-02

2.4830E-02 5.9150E-05 3.6060E-04 3.7010E-04 1.8580E-04 1.5090E-01 2.3540E+00

1.2500E+00 2.5470E-01 7.1560E-03 2.2490E-02 1.6130E-02 5.7680E-03 3.3080E-02

1.8320E-02 1.9860E-02 1.6790E-02 7.8250E-03 1.6000E-02 1.4020E-02 9.1880E-03

4.2510E-03 7.4380E-03 8.0000E-03 6.0470E-03 2.5400E-04 1.8160E-03 4.8550E-03

6.7250E-03 7.6610E-05 6.5670E-04 2.6670E-03 4.4450E-03 2.0120E-02 5.9600E-03

2.5430E-03 5.2320E-03 1.4500E-02 1.1370E-02 5.2610E-03 3.6810E-03 1.0130E-02

1.1790E-02 1.1210E-02 9.6320E-03 2.4100E-02 1.4280E-02 5.0500E-03 3.8710E-04

1.9470E-03 2.3790E-03 1.1870E-03 6.5670E-03 2.2040E-02 5.5250E-03 2.3730E-03

6.4990E-03 2.6470E-02 1.2590E-02 1.5310E-03 1.0980E-03 2.4120E-03 9.0190E-03

1.0350E-02 1.3780E+00 5.8570E-02 7.8760E-03 2.4090E+00 9.6470E-01 1.0010E-01

7.2560E-03 4.7440E+00 1.0680E+00 1.6460E-01 1.1960E-02 6.0690E-02 1.3710E-02

3.0080E-03 7.0980E-04 2.2940E+00 2.1980E-01 6.8880E-03 8.5960E-04 2.1830E+00

4.2600E-01 4.5410E-02 2.3260E-03 9.7210E-01 3.1390E-01 4.1790E-02 1.9710E-03

4.2340E-01 1.5290E-01 4.0580E-02 6.6530E-03 6.8210E-01 1.8610E-01 4.6000E-02

7.5610E-03 2.7820E-01 1.3130E-01 1.8170E-02 1.7210E-03 3.7390E-02 7.5240E-03

1.7220E-04 1.8870E-01 2.2220E-02 1.6480E-03 9.7760E-05 2.1860E-01 4.2600E-02

3.3430E-03 3.8350E-04 2.7260E-01 3.1190E-02 8.1650E-03 6.6340E-04 8.4950E-02

2.7790E-02 5.5420E-03 6.4590E-04 2.0440E-02 1.1220E-02 5.9360E-03 4.1870E-04

7.4320E-02 7.6890E-03 1.7340E-03 1.4250E-04 1.1310E-01 3.0960E-02 8.2660E-03

1.8140E-03 1.1390E+01 6.9050E-02 7.3110E-01 3.6160E+00 1.1170E+00 1.1870E-01

9.0720E-01 4.6680E+00 2.0710E+00 1.9750E-01 2.1190E-02 2.7500E-02 8.4110E-03

2.4100E-03 6.1200E-01 1.2560E+00 2.3130E-01 4.7330E-03 5.5540E-01 1.1810E+00

4.3670E-01 5.3250E-02 3.1380E-01 8.8350E-01 3.2960E-01 4.8350E-02 1.4630E-01

2.1200E-01 9.6230E-02 3.3490E-02 1.8580E-01 3.6220E-01 1.5980E-01 5.0520E-02

1.0780E-01 3.2540E-01 1.4280E-01 2.0920E-02 1.8460E-02 1.4070E-02 4.7130E-03

5.2710E-02 1.0170E-01 2.0490E-02 1.7450E-03 5.5760E-02 1.1580E-01 4.5530E-02

3.7050E-03 6.6900E-02 1.5150E-01 1.9030E-02 7.4820E-03 2.7770E-02 8.6660E-02

2.9730E-02 6.1730E-03 1.7040E-02 9.0290E-03 1.9580E-03 3.4570E-03 2.0810E-02

4.5950E-02 5.1670E-03 1.8310E-03 3.8520E-02 5.6580E-02 2.5600E-02 8.5620E-03

1.6370E+00 4.4850E-02 8.4150E-01 2.6930E+00 8.9340E-01 1.5810E-02 1.1070E+00

6.2320E+00 1.6400E+00 7.0650E-03 1.8790E-02 1.7690E-02 5.7140E-03 1.1460E-01

6.3850E-01 7.6050E-01 1.6360E-01 9.3110E-02 5.7200E-01 7.5820E-01 3.4230E-01

4.1780E-02 3.2960E-01 6.2690E-01 2.6730E-01 4.6150E-02 1.1840E-01 1.5180E-01

7.8240E-02 4.5830E-02 1.5970E-01 2.7420E-01 1.4030E-01 8.0090E-03 1.1820E-01

1.9970E-01 1.1650E-01 7.7840E-03 1.3570E-02 7.9940E-03 1.1590E-02 5.7030E-02

6.3180E-02 1.4170E-02 8.7610E-03 5.8820E-02 7.4390E-02 3.5060E-02 2.1050E-02

5.6980E-02 1.0340E-01 1.3030E-02 5.5330E-03 2.9730E-02 6.3040E-02 2.2780E-02

1.3630E-02 4.8640E-03 3.6870E-03 3.3220E-03 5.7010E-03 1.9080E-02 3.4320E-02

3.5680E-03 1.0680E-02 3.1580E-02 3.9250E-02 2.0850E-02 2.2850E-03 5.1420E-02

6.6190E-01 2.6360E+00 4.9410E-04 1.9400E-02 8.6500E-01 5.9170E+00 2.3680E-03

7.2700E-03 1.4560E-02 1.1980E-02 1.6880E-02 1.5310E-01 5.1160E-01 5.8630E-01

9.1460E-03 1.1590E-01 4.6390E-01 7.4320E-01 1.9540E-03 4.8360E-02 2.6730E-01

6.5990E-01 1.1300E-02 4.9020E-02 9.9920E-02 1.3270E-01 7.5350E-03 5.0500E-02

1.4030E-01 2.6280E-01 8.3590E-04 9.0250E-03 9.4290E-02 2.5530E-01 2.3880E-03

9.8130E-03 9.7300E-03 1.8090E-03 1.4300E-02 4.4910E-02 4.7390E-02 9.1370E-04

1.0410E-02 4.7160E-02 7.4270E-02 4.9940E-03 2.3960E-02 4.5990E-02 6.8800E-02

6.4450E-04 6.1720E-03 2.2780E-02 6.0950E-02 1.0220E-02 2.4350E-03 4.7130E-03

1.0350E-03 1.1280E-03 6.4020E-03 1.5340E-02 1.8880E-02 3.2520E-03 1.1710E-02

2.6660E-02 3.5580E-02 2.3940E+00 2.2940E-01 1.0990E-02 5.7770E+00 8.7960E-01

1.3040E-01 7.3750E-03 3.3730E-02 8.0810E-03 2.5710E-03 3.9720E-05 6.5390E-02

1.8640E-02 2.1830E-04 6.3600E-06 1.9630E-01 3.1540E-02 2.4840E-03 7.0770E-05

7.7210E-01 2.6890E-01 2.0410E-02 2.2560E-04 1.2600E+00 1.6710E-01 2.7360E-02

2.7280E-03 3.2510E-01 2.4110E-01 2.8740E-02 3.7250E-03 1.0320E+00 4.0060E-01

5.7140E-02 3.3830E-03 1.1310E-02 6.2540E-04 2.4210E-05 6.0010E-02 1.1920E-02

3.3740E-03 3.2320E-05 2.3150E-01 1.3020E-02 1.5670E-03 2.1540E-04 3.3630E-02

9.9930E-03 3.0810E-04 3.7030E-05 2.0860E-01 6.2720E-02 4.5450E-03 3.2280E-04

2.5200E-04 1.8630E-02 2.8960E-03 2.0440E-05 4.4680E-02 1.0830E-02 3.2150E-03

1.8490E-05 3.9590E-01 3.5060E-02 3.2860E-03 5.3050E-05 4.4970E+00 2.6940E-01

6.3760E-01 5.4310E+00 1.6250E+00 2.3050E-01 1.4290E-02 1.7890E-02 3.8210E-03

2.9150E-03 4.0110E-02 2.6400E-02 1.8520E-02 2.3460E-04 4.8270E-02 9.9100E-02

3.3000E-02 2.8870E-03 3.3600E-01 1.1220E+00 3.1420E-01 2.3540E-02 3.0130E-01

7.7370E-01 1.3910E-01 2.8650E-02 2.7690E-01 6.2520E-01 2.3840E-01 3.1600E-02

2.4810E-01 1.2380E+00 4.3170E-01 6.5750E-02 5.0740E-03 5.5420E-03 3.7810E-04

2.4680E-02 3.1180E-02 6.0030E-03 3.7160E-03 3.9540E-02 1.5760E-01 1.3750E-02

1.6900E-03 1.5890E-02 1.1610E-02 9.9480E-03 3.2220E-04 7.3830E-02 1.2240E-01

5.9720E-02 5.2140E-03 2.1600E-04 9.6030E-03 7.2130E-03 1.7450E-03 1.5540E-02

1.9120E-02 4.8310E-03 3.4180E-03 9.9930E-02 2.5180E-01 4.5010E-02 8.3930E-03

3.5350E+00 9.8920E-02 1.2400E+00 6.9280E+00 2.1290E+00 6.0840E-03 1.0690E-02

1.3010E-02 2.8200E-03 9.0100E-03 2.6070E-02 8.3800E-03 1.3150E-02 9.3600E-03

4.9660E-02 6.5030E-02 2.5750E-02 4.0060E-02 3.9220E-01 8.4200E-01 2.5030E-01

6.9010E-02 2.9400E-01 5.5940E-01 1.1260E-01 4.7520E-02 2.8530E-01 4.2790E-01

2.0090E-01 5.6920E-02 4.2740E-01 9.4460E-01 3.5820E-01 1.9040E-03 4.5130E-03

2.1270E-03 9.0210E-03 1.7640E-02 2.2490E-02 4.4050E-03 5.5370E-03 4.4200E-02

1.1660E-01 1.0210E-02 4.8850E-03 1.3930E-02 5.9030E-03 7.0030E-03 9.0490E-03

7.1400E-02 8.9970E-02 5.0530E-02 1.8000E-04 4.3150E-03 7.2030E-03 3.9490E-03

7.8780E-03 1.3640E-02 1.7020E-02 3.5410E-03 1.9410E-02 1.0290E-01 1.8320E-01

3.6140E-02 1.1210E-03 1.1450E-01 1.7290E+00 7.3550E+00 1.7200E-03 6.7980E-03

9.4740E-03 9.0910E-03 1.3640E-03 1.1070E-02 2.2370E-02 1.2530E-02 9.7570E-04

1.1210E-02 4.1130E-02 6.1450E-02 2.0640E-03 4.8170E-02 3.2400E-01 8.9010E-01

1.1520E-02 7.9450E-02 2.4850E-01 5.0570E-01 6.2040E-03 5.3960E-02 2.2280E-01

4.8900E-01 3.3830E-03 6.5580E-02 3.5590E-01 1.0360E+00 1.0310E-03 2.5900E-03

3.7340E-03 2.3310E-03 1.0300E-02 1.5150E-02 1.5270E-02 7.1340E-04 6.5270E-03

3.2950E-02 9.0660E-02 1.4100E-03 5.9630E-03 1.1800E-02 6.4960E-03 8.0460E-04

1.0530E-02 6.0900E-02 1.1580E-01 1.4400E-04 1.4780E-03 5.3730E-03 5.5230E-03

2.2460E-03 8.7830E-03 1.2100E-02 9.5370E-03 1.1540E-03 2.3140E-02 8.5150E-02

1.6190E-01 9.4860E-01 2.5550E-02 1.0630E-03 1.6100E-01 2.6290E-02 1.0090E-04

1.5780E-05 1.2800E-02 8.7540E-04 2.3270E-05 1.5880E-06 2.8150E-02 7.2210E-03

4.5620E-04 9.3600E-06 1.7530E+00 1.5850E-01 3.0320E-03 2.9730E-05 1.0540E-01

2.3080E-02 3.1100E-03 3.4910E-05 3.5650E-01 9.9960E-02 1.0140E-02 1.0170E-03

1.0930E+00 2.1230E-01 5.6050E-02 3.7210E-03 4.6610E-04 3.4690E-04 3.5670E-05

1.5740E-02 2.2960E-03 2.0950E-04 3.2620E-05 8.3470E-02 1.3560E-02 1.9780E-03

6.7410E-05 4.0010E-02 8.0460E-03 3.2170E-04 3.2340E-05 5.0240E-01 5.7770E-02

6.4990E-03 6.4650E-04 1.1420E-03 8.7900E-04 4.9290E-04 1.1750E-04 3.2820E-02

3.3420E-03 1.1550E-04 1.6890E-06 3.8820E-02 1.1040E-02 1.7590E-03 3.0430E-05

1.9730E+00 4.8570E-02 6.3440E-02 7.6500E-02 2.9140E-02 8.9640E-05 4.1370E-03

6.7300E-03 8.5370E-04 2.3350E-05 1.0680E-02 1.2510E-02 7.6090E-03 5.2400E-04

2.8840E-01 1.8040E+00 1.9220E-01 3.4790E-03 3.6010E-02 5.5170E-02 2.0700E-02

3.5970E-03 1.0200E-01 4.4340E-01 1.1330E-01 1.1340E-02 2.7260E-01 1.4430E+00

3.8500E-01 6.3230E-02 3.0580E-04 2.6860E-04 2.0130E-04 6.4770E-03 7.3910E-03

2.0820E-03 1.3880E-04 2.4520E-02 4.8030E-02 1.1830E-02 2.2490E-03 1.6840E-02

1.5490E-02 6.9260E-03 2.9530E-04 1.3520E-01 5.6240E-01 6.4760E-02 7.4250E-03

9.9970E-04 7.0550E-04 3.3550E-04 2.5950E-04 1.3730E-02 1.5730E-02 3.2150E-03

1.2410E-04 1.5720E-02 1.7080E-02 1.0510E-02 2.0950E-03 2.0670E+00 1.8760E-02

6.0300E-02 4.4700E-02 2.0640E-02 1.0180E-03 4.2990E-03 4.2640E-03 6.0660E-04

2.4630E-03 1.0620E-02 7.8280E-03 5.9460E-03 4.2660E-02 6.1510E-01 2.3170E+00

1.4900E-01 9.9460E-03 3.3060E-02 3.6990E-02 1.7740E-02 2.4600E-02 1.6470E-01

3.4110E-01 8.7330E-02 7.2820E-02 4.5290E-01 1.0660E+00 3.2340E-01 2.1590E-04

1.8570E-04 1.1590E-04 2.0170E-03 5.5080E-03 4.5110E-03 1.4720E-03 6.8500E-03

2.3330E-02 3.4940E-02 9.7970E-03 5.4310E-03 1.5240E-02 1.1470E-02 4.8620E-03

1.5960E-02 1.5000E-01 4.4020E-01 5.4800E-02 8.5680E-04 5.0840E-04 3.5590E-04

2.5080E-04 2.8020E-03 1.3350E-02 9.6310E-03 2.2900E-03 4.3120E-03 1.4460E-02

1.1180E-02 8.4960E-03 2.9650E-03 2.3190E-02 5.1270E-02 4.3050E-02 1.3990E-04

1.1760E-03 3.4030E-03 3.6210E-03 2.9750E-04 2.9140E-03 9.0190E-03 1.0130E-02

2.1530E-03 4.7990E-02 4.8970E-01 2.1100E+00 1.3470E-03 1.1570E-02 3.0020E-02

3.9710E-02 2.8530E-03 2.8490E-02 1.3720E-01 3.5180E-01 6.7400E-03 8.2660E-02

3.8390E-01 1.1300E+00 1.6360E-04 1.8450E-04 2.0290E-04 4.5180E-04 2.4040E-03

4.6630E-03 4.0580E-03 9.1510E-04 8.0260E-03 2.0030E-02 3.3550E-02 1.2640E-03

6.4290E-03 1.2980E-02 1.0850E-02 1.7120E-03 1.8590E-02 1.2340E-01 4.1380E-01

7.1400E-04 3.2380E-04 4.2770E-04 1.7670E-04 4.6250E-04 3.4750E-03 1.1270E-02

8.6470E-03 7.7180E-04 5.0190E-03 1.2660E-02 1.3720E-02 3.1890E+00 4.7540E-01

2.6790E-02 1.0530E-01 5.0830E-02 3.1490E-02 1.5900E-02 8.1440E-02 5.5940E-02

3.0410E-02 1.6110E-02 7.5450E-02 3.5040E-02 1.2790E-02 3.1710E-03 4.9760E-02

2.5430E-02 1.1090E-02 3.2040E-03 6.2500E-02 2.3580E-02 1.0670E-02 3.2970E-03

8.0910E-02 3.0630E-02 8.3170E-03 1.3220E-03 9.3130E-02 6.3560E-02 9.4670E-03

3.5470E-02 1.8470E-02 8.8830E-03 3.4180E-03 9.6320E-02 4.5620E-02 1.1070E-02

3.0260E-03 6.0630E-02 3.1450E-02 1.0910E-02 5.1070E-03 6.8890E-02 2.0190E-02

8.2090E-03 1.5470E-03 1.3580E-01 1.1400E-01 7.4720E-02 3.9200E-03 5.5310E-02

2.8380E-02 9.9440E-03 2.8790E-03 5.0650E-02 1.8590E-02 6.0400E-03 1.1360E-03

2.8620E+00 5.7170E-01 5.0830E-02 7.1490E-02 3.2270E-02 1.1540E-02 5.0280E-02

3.5450E-02 3.4590E-02 2.0780E-02 2.8640E-02 2.9620E-02 2.6070E-02 1.4420E-02

2.6930E-02 1.6960E-02 1.4500E-02 1.1200E-02 1.8740E-02 1.4150E-02 1.4120E-02

1.1290E-02 1.5080E-02 3.6520E-02 2.8950E-02 1.0330E-02 7.0820E-02 1.6840E-02

3.6760E-02 1.8450E-02 1.4630E-02 9.6070E-03 5.2770E-03 3.7060E-02 3.5630E-02

3.9390E-02 1.5380E-02 3.1280E-02 1.9210E-02 2.2170E-02 8.7720E-03 1.0240E-02

3.2780E-02 2.2660E-02 6.3790E-03 1.0150E-01 8.4120E-02 7.7120E-03 5.1470E-02

2.8360E-02 1.7950E-02 1.8480E-02 7.6410E-03 1.5310E-02 1.3660E-02 1.6800E-02

6.7970E-03 1.9130E+00 3.1490E-02 3.2270E-02 3.2190E-02 1.0320E-02 2.2450E-02

3.1720E-02 1.7800E-02 2.2210E-02 4.7610E-03 1.8360E-02 1.8690E-02 2.1420E-02

7.2460E-03 1.2760E-02 1.2930E-02 1.1210E-02 5.6080E-03 1.1410E-02 1.0530E-02

1.1480E-02 3.7060E-04 1.5080E-02 2.0940E-02 2.4190E-02 3.6130E-02 3.1220E-02

1.7750E-02 8.8740E-03 9.5970E-03 8.1270E-03 4.4370E-03 5.6240E-03 3.3350E-02

1.5490E-02 2.4300E-02 1.0860E-02 2.2150E-02 8.7090E-03 1.1790E-02 1.5380E-03

6.6750E-03 2.4650E-02 1.5620E-02 6.7520E-02 3.5320E-02 3.7830E-02 2.3210E-02

9.9370E-03 1.8480E-02 8.6460E-03 1.0370E-02 2.7000E-03 1.4010E-02 8.0270E-03

1.0300E-02 1.5900E-02 1.1540E-02 1.0320E-02 1.2300E-02 9.2660E-03 1.1790E-02

1.8060E-02 8.2060E-03 4.6190E-04 4.7820E-03 1.3820E-02 1.3690E-02 1.1990E-03

8.3950E-03 8.3620E-03 5.3480E-03 8.2330E-04 5.2410E-03 7.6040E-03 5.9270E-03

3.3920E-05 3.6640E-04 1.0640E-02 1.9250E-02 9.7650E-03 2.7120E-02 2.9160E-03

3.4180E-03 5.2700E-03 4.4350E-03 3.2500E-03 1.2700E-03 5.1160E-03 1.8160E-02

1.2260E-02 5.1070E-03 7.4010E-03 1.1740E-02 2.9720E-03 6.5520E-04 9.5670E-04

3.8920E-03 1.4330E-02 3.3710E-02 7.4280E-03 3.9270E-02 1.3690E-03 2.8790E-03

7.6370E-03 1.0370E-02 3.1630E-03 2.6990E-04 2.8080E-03 9.0200E-03 5.2280E-03

1.0610E+00 6.7000E-02 1.1350E-02 3.9590E+00 1.2720E+00 2.6440E-01 3.0200E-02

8.6800E+00 1.8790E+00 3.0260E-01 3.5300E-02 1.5030E-01 6.0630E-02 2.0440E-02

5.8270E-03 1.7230E-01 6.2760E-02 1.9590E-02 5.7530E-03 3.3800E-02 1.6270E-02

7.7600E-03 2.1010E-03 3.4660E-01 1.1800E-01 2.0000E-02 5.7340E-01 2.7590E-01

8.0440E-02 1.2570E-02 4.2360E-01 1.2680E-01 2.7640E-02 5.4210E-03 1.6260E-01

9.2960E-02 2.7240E-02 8.5500E-03 3.1250E-02 1.3860E-02 5.5320E-03 1.6340E-03

1.6870E-02 1.9710E-02 1.2400E-02 7.5350E-03 6.0330E-02 3.6030E-02 1.7750E-02

5.9670E-03 7.4770E-02 3.4400E-02 1.4110E-02 5.0900E-03 1.1630E+00 6.8300E-02

8.9840E-01 1.7450E+00 1.1990E+00 3.2980E-01 3.9680E-01 5.1270E+00 2.1260E+00

3.9700E-01 4.7740E-02 6.1720E-02 3.2470E-02 2.4370E-02 3.0140E-02 1.1090E-01

6.7310E-02 2.3030E-02 1.0160E-02 1.6690E-02 9.4230E-03 8.5950E-03 1.6730E-01

1.0670E-01 7.1410E-02 2.7160E-01 1.7820E-01 1.8410E-01 7.8610E-02 8.5260E-02

2.0700E-01 1.1570E-01 3.4020E-02 9.2740E-02 4.8980E-02 6.5540E-02 2.0960E-02

9.6140E-03 1.4360E-02 1.1010E-02 5.7990E-03 1.2640E-02 1.4380E-02 9.8130E-03

5.1690E-03 3.5980E-02 2.3320E-02 1.8550E-02 1.1170E-02 2.8920E-02 2.7330E-02

2.3340E-02 1.2970E-02 8.1170E-01 7.3430E-02 8.6950E-01 9.1490E-01 9.2720E-01

3.0740E-03 4.1200E-01 3.2490E+00 1.6910E+00 1.2810E-02 2.1310E-02 4.4040E-02

2.4090E-02 6.6550E-03 2.4990E-02 8.4910E-02 3.4690E-02 3.6710E-03 3.5000E-03

1.4800E-02 8.4900E-03 6.7680E-02 1.0680E-01 6.9110E-02 7.9870E-02 1.8230E-01

1.0520E-01 1.0870E-01 1.0080E-02 7.5790E-02 1.1480E-01 8.9440E-02 2.7220E-02

6.5430E-02 1.9210E-02 3.4670E-02 2.4890E-03 6.4710E-03 1.0210E-02 8.9070E-03

8.4170E-03 1.0820E-02 6.9260E-03 2.8870E-03 1.7730E-02 1.8490E-02 1.7150E-02

8.1600E-03 8.1340E-03 1.9470E-02 1.3760E-02 1.7890E-02 2.4680E-03 8.1300E-02

6.0770E-01 7.1000E-01 2.7670E-04 3.0940E-03 2.8830E-01 2.3720E+00 1.6110E-03

1.2780E-02 1.7620E-02 2.3600E-02 4.0660E-04 5.7950E-03 1.7390E-02 3.5380E-02

9.4690E-06 4.0560E-03 2.9520E-03 8.1590E-03 2.0110E-02 5.8720E-02 3.2520E-02

1.2570E-02 7.8170E-02 1.0830E-01 3.6670E-02 1.7150E-03 9.2200E-03 5.1210E-02

8.2420E-02 8.5500E-03 2.0910E-02 3.6780E-02 7.8780E-03 4.9100E-04 2.1600E-03

4.1960E-03 6.9800E-03 4.2060E-03 5.6340E-03 3.0780E-03 1.3250E-03 5.9670E-03

1.2600E-02 8.1500E-03 4.8050E-03 2.5110E-03 6.8560E-03 1.2010E-02 7.6810E-03

2.8380E+00 2.5530E-01 1.6800E-02 7.2080E+00 1.7700E+00 2.7440E-01 2.1950E-02

4.7200E-01 1.4930E-01 3.2100E-02 5.2170E-03 7.6150E-01 2.6210E-01 5.9600E-02

1.0960E-02 4.3670E-01 1.1420E-01 1.8600E-02 1.4120E-03 4.1530E-01 2.4200E-02

3.1740E-03 5.3290E-01 1.1240E-01 1.3570E-02 7.0510E-04 7.2620E-01 2.4530E-01

5.4380E-02 6.1090E-03 1.4450E-01 4.9180E-02 9.5600E-03 2.9020E-03 8.1400E-02

3.4260E-02 1.2870E-02 3.9980E-03 1.7200E-02 6.4450E-02 1.1290E-02 7.2460E-03

6.5370E-02 2.9240E-02 1.0740E-02 2.1110E-03 1.1060E-01 3.1830E-02 7.4120E-03

1.2490E-03 3.1400E+00 3.1210E-01 1.3330E+00 3.9310E+00 1.8840E+00 3.4040E-01

1.4850E-01 2.0680E-01 1.3800E-01 3.4380E-02 2.3360E-01 3.7420E-01 2.3880E-01

7.0010E-02 7.2600E-02 2.1690E-01 1.3270E-01 2.2550E-02 1.4820E-01 1.9130E-01

1.3590E-02 1.6450E-01 2.6570E-01 9.7980E-02 1.4280E-02 2.4340E-01 3.1550E-01

2.0460E-01 6.2540E-02 6.0800E-02 5.5500E-02 4.3890E-02 6.3820E-03 2.9710E-02

3.8340E-02 2.5250E-02 1.3150E-02 1.3760E-02 2.9290E-02 3.4190E-02 3.6240E-03

3.5370E-02 2.7940E-02 1.5020E-02 1.0450E-02 4.0940E-02 3.5370E-02 2.7170E-02

8.1050E-03 2.4070E+00 1.1250E-01 1.4320E+00 2.5640E+00 1.5150E+00 3.1990E-02

1.3740E-01 1.2540E-01 1.0830E-01 3.3390E-02 1.9170E-01 2.4640E-01 2.0150E-01

1.7750E-03 8.7490E-02 1.4220E-01 1.0930E-01 4.2650E-02 1.4170E-01 8.0100E-02

3.6360E-02 1.5370E-01 1.5630E-01 6.0540E-02 5.4090E-02 1.8860E-01 1.9700E-01

1.6630E-01 1.8920E-02 5.2310E-02 2.9400E-02 2.8610E-02 9.4760E-03 2.1360E-02

2.7590E-02 2.1650E-02 1.0320E-02 1.5140E-02 2.3570E-02 1.1950E-02 1.7340E-02

1.8730E-02 2.1960E-02 8.5440E-03 7.3680E-03 2.7060E-02 2.1090E-02 2.1470E-02

3.0790E-03 1.3400E-01 1.1080E+00 2.5070E+00 5.2170E-03 3.4290E-02 1.0800E-01

1.1770E-01 2.9890E-03 3.7550E-02 1.5380E-01 2.5680E-01 9.1400E-05 2.0260E-03

6.7700E-02 1.5340E-01 9.0970E-03 5.6800E-02 1.1000E-01 5.2710E-03 4.3230E-02

1.1800E-01 1.0710E-01 6.1100E-03 6.2320E-02 1.5250E-01 1.8070E-01 6.2140E-03

1.9920E-02 3.8350E-02 1.8880E-02 2.1260E-03 9.4980E-03 1.7640E-02 2.4480E-02

6.8780E-03 9.0160E-03 8.8890E-03 1.5820E-02 5.2850E-03 1.6080E-02 1.2860E-02

1.0670E-02 1.2330E-03 8.0860E-03 2.1410E-02 2.0700E-02 2.5550E+00 1.0260E-01

9.1970E-03 5.2660E-01 1.2660E-01 2.4550E-02 5.1620E-03 3.3320E-01 8.3380E-02

1.3310E-02 5.9410E-04 2.4800E-01 7.6560E-02 1.8610E-02 2.4600E-03 2.4240E-02

8.3120E-03 1.0600E-03 7.4370E-01 5.7170E-02 1.0570E-02 1.9960E-03 5.2930E-01

1.1340E-01 1.1390E-02 1.4110E-03 5.6110E-02 1.7440E-02 2.0820E-03 5.0500E-04

2.8280E-01 6.9470E-02 9.5300E-03 1.9260E-03 2.7320E-02 2.9410E-02 1.5260E-02

3.2950E-03 8.8730E-02 1.9530E-02 6.3390E-03 5.2740E-04 1.6780E-01 4.9410E-02

1.0880E-02 1.3950E-03 3.1420E+00 1.2230E-01 1.5720E-01 2.7770E-01 1.1100E-01

2.5360E-02 8.3150E-02 1.8380E-01 8.9760E-02 1.5710E-02 6.6510E-02 1.4370E-01

6.9510E-02 2.1040E-02 1.3500E-02 6.7830E-03 5.1300E-03 1.8520E-01 4.3760E-01

4.4790E-02 9.5310E-03 1.4460E-01 2.7640E-01 1.1310E-01 1.2530E-02 2.3680E-02

2.8340E-02 1.2790E-02 1.5440E-03 6.8920E-02 1.8080E-01 7.0580E-02 1.0200E-02

2.2770E-02 2.1420E-02 1.0250E-02 8.2500E-03 3.7880E-02 4.5980E-02 9.9280E-03

6.4930E-03 5.8530E-02 8.2160E-02 3.8920E-02 1.1930E-02 2.4150E+00 4.1750E-02

1.4140E-01 1.8830E-01 8.7940E-02 1.3280E-02 8.9480E-02 1.2870E-01 7.4530E-02

1.3790E-02 6.0050E-02 9.9400E-02 6.0810E-02 7.5430E-03 7.3850E-03 5.1540E-03

3.9920E-02 1.8900E-01 2.8120E-01 3.0320E-02 2.2770E-02 1.4440E-01 1.8050E-01

7.7890E-02 8.7890E-03 1.8960E-02 1.6290E-02 8.6750E-03 9.4840E-03 7.0050E-02

1.4110E-01 5.7440E-02 1.8220E-02 1.3560E-02 1.0840E-02 7.4880E-03 1.5340E-02

2.3940E-02 3.3010E-02 6.7550E-03 1.9270E-02 4.7440E-02 5.7470E-02 3.2180E-02

8.6860E-03 4.4630E-02 1.1630E-01 1.7380E-01 5.9360E-04 1.5700E-02 7.4360E-02

1.2830E-01 1.3460E-03 1.5490E-02 5.1800E-02 1.0370E-01 3.4010E-03 7.6410E-03

4.0200E-03 8.8290E-03 4.6380E-02 1.5020E-01 2.0080E-01 3.0620E-03 2.6710E-02

1.1740E-01 1.7720E-01 1.9410E-03 9.5110E-03 1.6170E-02 1.3010E-02 1.9100E-03

1.0170E-02 5.7100E-02 1.5020E-01 1.3650E-02 7.3480E-03 1.1720E-02 4.9510E-03

4.2990E-03 1.4080E-02 1.9430E-02 2.0310E-02 2.8490E-03 1.9680E-02 4.0650E-02

5.2420E-02 1.5700E+00 5.8800E-02 7.5490E-03 5.3500E+00 1.1990E+00 1.6510E-01

1.2440E-02 1.1170E+01 1.8340E+00 2.0240E-01 1.1900E-02 4.6270E-01 5.4010E-02

1.8580E-02 5.5100E-01 1.8450E-01 2.9300E-02 7.7090E-03 5.3330E-01 1.1370E-01

2.1360E-02 3.0920E-03 2.3660E-01 8.0380E-02 7.8580E-03 2.2110E-03 9.2000E-02

4.2900E-02 1.4230E-02 3.0280E-03 1.6880E-02 3.1090E-02 1.1730E-02 5.8630E-03

4.7310E-02 2.2350E-02 6.6920E-03 1.1600E-03 9.8720E-02 3.0060E-02 7.9890E-03

1.3230E-03 1.9050E+00 6.8010E-02 8.7030E-01 3.0470E+00 1.3100E+00 2.0180E-01

6.1340E-01 7.5780E+00 2.1960E+00 2.5100E-01 1.8330E-01 2.0880E-01 2.6230E-02

2.3080E-01 2.1510E-01 1.5810E-01 2.3290E-02 1.1360E-01 2.8720E-01 1.0940E-01

2.2060E-02 9.5070E-02 7.9370E-02 6.9950E-02 7.5510E-03 2.0720E-02 6.9220E-02

4.4030E-02 1.5670E-02 1.3510E-02 1.8350E-02 1.4940E-02 4.0510E-03 2.5840E-02

1.7090E-02 1.2690E-02 7.2180E-03 3.0030E-02 5.1810E-02 2.4080E-02 8.5200E-03

1.4270E+00 5.7940E-02 9.5800E-01 1.9970E+00 1.0460E+00 5.0580E-03 7.1980E-01

5.4850E+00 1.7470E+00 7.0240E-02 1.6290E-01 8.7880E-02 6.4330E-02 1.9260E-01

9.4460E-02 1.0530E-01 2.1340E-02 1.0930E-01 1.8320E-01 8.4340E-02 2.4650E-02

8.3610E-02 3.0780E-02 4.5580E-02 7.5960E-03 2.7100E-02 5.3100E-02 4.0930E-02

1.0130E-02 1.1140E-02 1.1420E-02 6.2070E-03 1.0770E-02 1.4850E-02 1.2970E-02

7.8810E-03 7.9810E-03 2.4080E-02 2.9360E-02 1.9090E-02 1.0630E-03 6.8200E-02

7.3590E-01 1.9100E+00 4.6090E-04 5.4700E-03 5.4360E-01 4.8460E+00 2.8430E-02

6.4900E-02 1.1130E-01 1.7080E-02 6.8820E-02 1.4420E-01 7.9760E-02 3.0920E-03

2.2050E-02 8.4300E-02 1.6700E-01 4.8530E-03 2.3550E-02 6.1530E-02 3.2490E-02

1.5630E-03 8.7590E-03 2.6900E-02 5.8570E-02 6.7540E-03 5.9220E-03 6.6700E-03

5.9490E-03 3.2130E-03 1.0740E-02 1.0790E-02 5.9570E-03 1.3210E-03 8.5180E-03

1.9090E-02 2.6210E-02 3.2640E+00 2.2970E-01 1.7540E-02 6.8290E+00 1.3560E+00

2.5880E-01 1.4770E-02 1.0520E-01 4.5450E-02 1.0540E-02 2.8660E-01 1.8570E-02

4.2850E-03 8.3700E-04 6.7700E-01 1.5860E-01 4.2630E-02 7.6480E-03 1.0980E-01

1.5880E-02 6.0380E-03 6.1940E-04 2.2690E-01 5.7990E-02 1.0490E-02 1.1680E-03

3.3830E-03 2.6740E-02 6.1330E-03 3.8830E-04 1.0460E-01 1.8990E-02 6.9410E-03

1.0560E-03 1.9180E-01 6.2980E-02 5.2260E-03 3.9070E-04 3.8480E+00 2.7350E-01

9.9860E-01 7.1750E+00 2.5660E+00 3.0740E-01 5.6910E-02 2.9170E-02 2.4060E-02

6.1360E-02 1.7340E-01 1.3590E-02 3.7950E-03 1.9860E-01 3.6740E-01 1.3160E-01

3.5710E-02 3.2590E-02 6.0660E-02 9.8920E-03 3.6350E-03 7.0810E-02 1.2210E-01

5.6700E-02 1.1720E-02 2.8190E-03 1.5190E-02 9.9980E-03 3.6330E-03 4.1340E-02

5.4510E-02 1.0770E-02 7.2910E-03 8.1850E-02 1.5250E-01 6.8590E-02 5.7680E-03

2.9990E+00 1.2080E-01 2.0180E+00 5.2620E+00 2.0600E+00 4.1740E-02 3.9840E-02

1.8660E-02 1.4110E-02 6.2560E-02 1.1340E-01 9.2230E-03 5.3540E-02 1.7370E-01

2.5190E-01 1.0610E-01 1.3310E-02 2.9170E-02 3.9830E-02 6.6370E-03 9.9740E-03

5.6420E-02 8.5540E-02 4.7040E-02 2.2550E-03 6.9700E-03 9.7420E-03 6.3440E-03

1.6940E-02 2.8870E-02 3.8960E-02 7.0170E-03 1.2280E-02 8.7570E-02 9.4450E-02

5.2650E-02 3.5300E-04 1.4240E-01 1.5890E+00 5.3800E+00 2.3260E-02 2.9020E-02

1.5560E-02 3.3700E-03 1.6310E-02 4.9720E-02 7.9820E-02 1.2640E-02 6.0140E-02

1.4180E-01 2.2570E-01 3.7920E-03 1.0860E-02 2.3310E-02 2.7440E-02 1.1490E-03

1.1660E-02 4.6870E-02 8.9860E-02 1.6910E-03 2.4800E-03 7.9980E-03 6.4830E-03

4.7210E-03 1.3530E-02 2.3040E-02 2.3720E-02 1.1290E-03 1.4710E-02 7.0110E-02

1.0090E-01 1.3710E+00 1.0560E-01 9.2020E-03 1.6620E-02 1.9250E-03 1.0040E-04

6.8570E-02 2.3610E-02 7.3600E-03 1.6540E-04 1.9880E+00 1.3600E-01 1.9280E-02

2.5030E-03 2.9070E-02 9.7090E-03 1.8300E-03 1.4550E-04 5.9280E-01 9.5800E-02

1.2930E-02 1.9450E-03 5.2200E-04 2.7730E-02 3.4350E-03 3.2910E-04 3.5950E-02

8.7880E-03 7.8260E-04 4.9510E-05 4.1590E-01 2.4000E-02 4.0670E-03 2.6930E-04

2.3720E+00 1.2130E-01 8.2650E-03 6.6680E-03 1.1530E-03 3.5160E-02 4.2270E-02

1.1440E-02 7.9750E-03 3.5030E-01 1.3360E+00 1.2740E-01 2.0950E-02 1.3600E-02

1.3200E-02 5.9830E-03 1.6560E-03 1.1460E-01 3.0530E-01 1.0270E-01 1.6640E-02

4.4780E-04 1.4270E-02 1.0670E-02 2.0900E-03 1.5750E-02 1.5830E-02 5.5470E-03

7.1880E-04 5.5460E-02 1.8600E-01 2.2050E-02 4.5000E-03 2.8260E+00 3.5930E-03

6.5090E-03 3.3990E-03 1.6780E-02 2.1020E-02 2.4850E-02 8.4260E-03 5.9340E-02

3.9920E-01 9.8890E-01 1.0380E-01 4.7270E-03 1.0230E-02 9.1190E-03 4.2090E-03

1.9370E-02 1.2160E-01 2.2840E-01 8.1720E-02 3.7310E-04 6.3650E-03 1.0690E-02

5.8890E-03 4.9820E-03 1.0400E-02 9.8100E-03 3.8300E-03 1.0900E-02 5.6990E-02

1.3800E-01 1.8140E-02 1.0920E-03 4.4900E-03 5.0920E-03 4.9190E-03 1.8570E-02

1.8800E-02 1.4730E-02 8.6450E-03 6.9140E-02 3.2110E-01 7.9590E-01 1.8090E-03

7.3260E-03 8.6420E-03 6.7180E-03 3.4590E-03 2.1880E-02 1.0120E-01 2.3860E-01

2.9850E-04 1.7240E-03 8.0190E-03 8.2200E-03 1.1420E-03 6.3830E-03 8.6850E-03

6.4060E-03 1.5420E-03 1.2750E-02 4.7160E-02 1.3440E-01 5.6260E-01 3.7780E-02

2.1040E+00 1.0400E+00 3.6000E-01 6.3490E-02 7.3390E+00 2.5590E+00 6.8760E-01

1.1870E-01 5.5870E-02 3.1420E-02 1.4970E-02 6.4320E-03 2.0090E-02 1.4070E-02

8.4760E-03 4.3820E-03 2.6420E-02 1.0930E-01 1.0180E-01 6.3540E-02 9.1440E-02

5.4550E-02 3.0730E-02 1.3890E-02 4.1690E-02 2.6290E-02 1.7620E-02 1.1460E-02

4.7130E-01 7.1920E-01 6.0010E-01 6.3560E-01 4.2970E-01 2.5240E-01 3.4360E+00

2.5300E+00 9.7250E-01 2.3400E-02 2.4160E-02 1.7250E-02 9.7750E-03 1.2270E-02

6.1570E-03 6.8420E-03 9.8900E-03 1.7610E-02 1.0180E-01 6.3930E-02 1.8640E-02

4.3070E-02 3.9110E-02 3.1010E-02 1.4190E-02 1.7970E-02 2.2360E-02 1.6010E-02

8.3880E-03 2.5910E-02 5.0410E-01 4.3610E-01 2.2160E-01 1.9140E-02 1.5980E-01

1.4130E+00 1.9960E+00 6.0900E-03 1.2150E-02 1.0870E-02 6.4750E-03 1.0840E-03

7.1200E-03 5.1860E-03 3.3970E-03 8.8080E-03 6.3510E-02 1.8900E-02 9.4020E-03

1.7900E-02 1.8730E-02 1.6630E-02 1.0210E-02 9.6550E-03 6.8300E-03 8.5210E-03

7.8870E-03 2.8090E+00 4.4340E-01 2.9390E-02 7.6900E+00 2.7820E+00 5.9150E-01

7.1010E-02 1.0950E-01 5.3910E-02 1.6200E-02 2.6450E-03 6.5690E-02 3.1580E-02

1.4900E-02 7.4020E-03 2.2070E-01 1.2560E-01 3.8520E-02 1.5790E-02 1.4770E-01

7.2860E-02 2.7780E-02 1.0180E-02 1.4070E-01 5.6850E-02 1.5320E-02 2.0610E-03

2.4900E+00 5.2550E-01 2.0830E+00 3.0020E+00 2.5910E+00 7.3140E-01 5.3870E-02

3.3900E-02 3.7900E-02 1.4470E-02 2.3970E-02 2.4510E-02 2.0930E-02 1.4140E-02

1.6480E-01 6.3990E-02 6.1690E-02 1.6840E-02 7.2860E-02 4.6260E-02 4.9060E-02

1.7460E-02 4.5650E-02 5.2610E-02 4.6280E-02 1.8250E-02 1.6560E+00 1.5670E-01

2.0450E+00 1.4190E+00 2.0030E+00 1.6200E-02 3.7870E-02 1.5100E-02 2.1160E-02

7.2620E-03 1.5320E-02 1.6530E-02 1.6300E-02 1.0970E-01 2.8700E-02 3.7690E-02

2.6430E-02 2.7780E-02 4.9060E-02 2.1460E-02 2.7060E-02 5.8430E-03 3.6620E-02

2.9840E-02 3.8050E-02 8.2550E-03 1.6600E-01 1.4180E+00 1.2170E+00 2.6450E-03

1.4470E-02 2.1150E-02 5.7160E-03 9.7220E-04 6.0290E-03 9.7710E-03 1.0220E-02

5.4730E-02 1.2280E-02 1.5680E-02 1.9460E-02 1.0180E-02 1.7460E-02 2.7060E-02

7.3680E-03 2.9880E-04 6.5300E-03 2.4260E-02 2.0880E-02 2.5390E+00 1.8180E-01

1.3870E-02 1.7890E-01 5.8260E-02 1.2300E-02 3.3310E-03 1.2160E-01 5.8680E-02

2.0830E-02 4.1240E-03 3.7550E-02 3.8550E-01 4.0840E-02 6.1030E-03 4.4990E-01

1.2760E-01 1.6270E-02 4.3110E-03 1.2920E-01 6.1820E-02 2.1690E-02 4.4800E-03

2.9110E+00 2.1950E-01 7.2150E-02 6.4590E-02 5.0150E-02 8.6540E-03 5.2450E-02

5.1370E-02 4.2540E-02 2.2980E-02 3.0040E-02 1.4850E-01 1.7200E-01 2.2970E-02

1.7950E-01 1.6260E-01 1.2170E-01 1.1690E-02 6.1650E-02 3.8680E-02 3.5710E-02

2.3690E-02 2.2190E+00 2.1860E-02 6.2750E-02 2.9170E-02 3.4380E-02 1.2780E-02

3.7930E-02 3.1250E-02 3.6250E-02 2.2530E-02 4.8880E-02 1.3120E-01 7.5740E-02

4.0380E-02 1.4600E-01 6.2540E-02 9.2100E-02 2.1670E-02 3.5690E-02 2.9230E-02

2.9730E-02 6.4010E-03 2.2060E-02 4.6390E-02 2.4850E-02 2.3950E-03 1.3420E-02

3.0910E-02 3.2240E-02 1.5020E-02 1.5010E-02 5.9570E-02 9.7780E-02 8.3920E-03

4.4560E-02 1.2360E-01 6.3470E-02 4.4800E-03 2.3680E-02 2.9710E-02 2.1640E-02

1.4820E+00 2.5280E-01 6.8580E-02 6.0260E+00 1.4740E+00 2.8930E-01 4.5100E-02

1.1420E+00 2.0290E+00 1.1550E+00 8.2340E-02 1.6690E+00 5.5570E-01 9.8040E-02

7.0280E-03 2.1860E+00 6.6040E-01 1.3080E-01 1.6200E-02 1.3860E+00 1.8660E-01

4.3800E-01 3.4910E+00 1.5430E+00 3.4810E-01 8.5280E-01 1.3750E+00 2.9870E-01

7.7710E-01 5.4950E-01 6.1900E-01 4.7270E-01 1.1030E-01 4.3760E-01 1.0100E+00

6.4140E-01 1.6160E-01 8.9930E-01 3.2890E-02 4.0300E-01 2.1900E+00 1.2200E+00

5.6710E-01 5.7040E-01 6.5710E-01 4.1460E-01 9.6270E-02 4.6840E-01 2.9560E-01

3.1010E-01 3.3170E-02 4.4120E-01 5.3170E-01 4.9360E-01 8.7610E-03 2.5110E-02

2.7450E-01 1.6160E+00 2.8320E-01 1.2520E-01 6.0730E-01 8.1400E-02 7.0260E-03

1.0880E-01 3.1130E-01 1.5970E-01 3.2750E-03 3.7480E-02 3.0690E-01 4.0600E-01

3.0220E+00 2.4450E-01 3.6070E-02 9.3180E-02 8.2050E-02 3.0240E-02 5.5580E-03

5.1370E+00 2.2140E-01 6.0500E-03 1.4580E-03 1.0490E+01 1.9850E+00 1.6390E-01

8.2190E-03 3.5270E+00 2.8120E-01 7.7650E-02 5.1490E-02 2.8100E-02 1.6240E-02

1.1310E+00 3.0970E+00 2.1620E-01 4.9460E-03 2.6070E+00 5.5020E+00 2.1300E+00

1.8430E-01 2.7590E+00 6.2120E-02 2.9660E-02 3.0640E-02 1.9030E-02 1.8240E-01

1.2770E+00 1.9650E+00 1.5030E-01 3.8830E-01 2.7940E+00 3.5250E+00 1.6410E+00

4.6590E-02 1.5300E-02 2.6730E-02 1.5830E-02 1.7880E-02 2.3530E-01 1.0140E+00

1.4320E+00 3.4210E-02 4.8040E-01 2.2390E+00 3.5450E+00 4.9890E-01 3.3260E-01

1.6630E-01 2.0890E+00 1.5660E+00 1.0480E+00 5.2530E-01 1.9660E-02 1.5720E-02

1.1800E-02 7.8620E-03 2.0320E+00 9.9250E-01 4.3200E+00 2.9620E+00 1.2000E+00

2.3100E-01 3.8980E-01 1.5890E-01 6.4820E-02 3.0030E-02 6.8970E-01 2.5550E+00

4.2920E-01 1.4190E+00 1.3770E+00 4.3100E-02 1.9040E-01 1.3750E-01 5.5250E-02

1.0850E-01 1.7670E+00 8.9410E-01 1.1230E-01 2.0970E-02 2.0170E-02 7.4250E-02

9.9090E-02 2.0260E+00 2.6830E-01 3.3480E-02 1.7060E+00 5.8300E-01 1.6890E-01

4.4350E-02 1.8820E+00 2.8830E-01 4.2440E-01 7.8230E-01 5.0010E-01 1.6640E-01

1.2300E+00 8.5340E-02 3.6020E-01 4.4900E-01 3.7250E-01 1.8570E-02 6.0680E-02

2.3700E-01 3.0290E-01 3.9470E+00 3.7660E-01 2.1790E-02 4.3950E+00 4.6230E-01

3.3830E+00

90000.00

3.9570E+00 1.3430E+00 6.0160E-01 2.5610E-01 1.4510E+00 5.9670E-01 1.7460E-01

4.3190E-02 4.3680E+00 4.0170E-01 1.4660E-01 5.3640E-02 5.4300E-01 3.0850E-01

2.2520E-02 2.6330E-01 7.2760E-02 4.7560E-03 6.6810E-01 3.2750E-01 9.9120E-02

1.6460E-02 4.3420E-01 2.1580E-01 1.1560E-01 3.9220E-02 5.2750E-01 2.3950E-01

8.6950E-02 1.8920E-02 2.9440E-01 1.6500E-01 8.1540E-02 4.2270E-02 4.1910E+01

1.0410E+01 2.1550E-01 6.1020E-02 2.1810E-02 4.6970E+01 8.4770E+00 8.3240E-01

4.8140E-02 2.2730E-02 1.0920E-02 2.4490E+01 1.3960E-01 3.6170E-02 1.0610E+00

1.8630E-01 5.3370E-03 1.1990E-03 1.6540E+00 2.0870E-01 2.2240E-02 7.7900E-03

6.6690E-01 9.4690E-03 4.9660E-03 1.8800E-01 1.4080E-01 6.0770E-02 1.3780E-02

1.0400E-01 7.4320E-02 3.1870E-02 8.7720E-03 2.0160E-02 6.4080E-03 2.1160E-03

7.1810E-02 3.5760E-02 1.2500E-02 3.1270E-03 2.8390E-02 1.9890E-02 8.6150E-03

2.0860E-03 7.3820E-02 4.1470E-02 1.4080E-02 2.5240E-03 5.2100E-02 2.0580E-02

4.7640E-03 5.0420E-04 3.8790E-02 1.5130E-02 5.9250E-03 1.7090E-03 3.2960E-02

1.0860E-02 3.2960E-03 1.0370E-03 5.4830E-02 2.4970E-02 1.0790E-02 3.7190E-03

7.3560E-02 2.7800E-02 7.3930E-03 1.0700E-03 4.8730E-02 1.5470E-02 3.6810E-03

6.6760E-04 5.0040E-02 2.3620E-02 8.6700E-03 1.8070E-03 3.7820E-02 1.2930E-02

6.1140E-03 3.1730E-02 2.0450E-02 7.3630E-03 1.6090E-03 2.9480E-02 1.6430E-02

1.0060E-02 7.0480E-03 1.3410E-02 1.0070E-02 3.7000E-03 8.7460E-04 1.0860E-02

8.3980E-03 4.4840E-03 1.4550E-03 1.7390E-02 9.6160E-03 7.5630E-03 4.3920E-03

1.4660E-02 9.9160E-03 5.5570E-03 2.4960E-03 1.9640E-02 1.3470E-02 6.1340E-03

1.7990E-03 3.8660E+00 1.1790E+00 3.8090E-01 6.5330E-01 5.7360E-01 4.3760E-01

1.6030E-01 1.1490E+00 2.6210E+00 2.6190E-01 8.5340E-02 4.0180E-01 1.2480E-01

1.7570E-01 1.4370E-01 8.7640E-02 4.1810E-02 2.9610E-01 2.3500E-01 2.5500E-01

1.0360E-01 2.2860E-01 2.2690E-01 9.6240E-02 9.6690E-02 2.2550E-01 2.3390E-01

1.5970E-01 8.6450E-02 1.8870E-01 1.3740E-01 1.1270E-01 2.9830E-02 9.1970E+00

1.8820E+01 1.4040E+01 2.4600E-01 4.7230E-02 3.7490E-01 3.3440E+01 1.2340E+01

1.7770E+00 5.4180E-02 1.0190E-02 6.7960E+00 1.2500E+01 8.5990E-02 3.4760E-01

4.7080E-01 1.8080E-01 4.1340E-03 3.2020E-01 9.6330E-01 2.1270E-01 1.8380E-02

2.5160E-01 2.8980E-01 3.6960E-03 1.4170E-01 4.8690E-02 7.1530E-02 5.7220E-02

8.2650E-02 5.0400E-02 3.0400E-02 7.0180E-03 1.1570E-02 8.3440E-03 3.0100E-03

3.4750E-02 2.6470E-02 2.5300E-02 1.2090E-02 2.0590E-02 1.0140E-02 1.0660E-02

8.7400E-03 3.6220E-02 2.3700E-02 3.1290E-02 1.4680E-02 2.6180E-02 1.7720E-02

1.3770E-02 4.4140E-03 1.9300E-02 1.7150E-02 8.3220E-03 4.0740E-03 1.2420E-02

1.5160E-02 8.5700E-03 2.8370E-03 2.4330E-02 2.5360E-02 1.6040E-02 9.7250E-03

3.0900E-02 3.0050E-02 2.0060E-02 7.4490E-03 1.5290E-02 2.3170E-02 1.2610E-02

3.7640E-03 2.1370E-02 2.0710E-02 1.6600E-02 8.7520E-03 2.2460E-02 1.7860E-02

5.5600E-03 2.2620E-02 9.6270E-03 1.0900E-02 5.7620E-03 1.7140E-02 1.5210E-02

1.2140E-02 5.0460E-03 1.0740E-02 3.9490E-03 5.0930E-03 2.8060E-03 8.0730E-03

3.9050E-03 4.0820E-03 4.1090E-03 1.3910E-02 8.4400E-03 6.0370E-03 2.7810E-03

1.0840E-02 6.7650E-03 5.7310E-03 2.4320E-03 1.3690E-02 6.6700E-03 7.0750E-03

5.3960E-03 2.8890E+00 7.6930E-01 2.3620E-01 4.6450E-01 3.6030E-01 3.1010E-01

3.1220E-01 1.2180E+00 1.4340E+00 1.3870E-01 2.3210E-01 1.5140E-01 1.4360E-01

6.9140E-02 8.3170E-02 5.2850E-02 8.3190E-02 2.2080E-01 1.5890E-01 2.0460E-01

1.2500E-01 1.1750E-01 1.6570E-01 7.6790E-02 8.4360E-02 1.5740E-01 1.6360E-01

1.3100E-01 1.1280E-01 1.2490E-01 6.1460E-02 5.1310E-02 1.7140E-01 1.2970E+01

5.7440E+00 1.2920E+01 1.8890E-01 4.9040E-02 3.9110E-01 2.1860E+01 1.2600E+01

2.3880E+00 5.1410E-02 1.1540E+00 8.6600E+00 4.6020E+00 8.3120E-02 3.2470E-01

2.3920E-01 1.0510E-01 4.1850E-02 3.8400E-01 5.7440E-01 1.3560E-01 7.9190E-02

2.3560E-01 9.4170E-02 7.1840E-02 6.3240E-02 4.7950E-02 5.8970E-02 5.8080E-02

3.9410E-02 2.2630E-02 5.2630E-03 6.4360E-03 7.0150E-03 3.7340E-03 1.2550E-02

2.3400E-02 1.8060E-02 1.9950E-02 7.1990E-03 9.2600E-03 7.8990E-03 1.1110E-02

1.0360E-02 2.5930E-02 1.6800E-02 2.6310E-02 1.0840E-02 1.6410E-02 1.1290E-02

8.3580E-03 9.6030E-03 1.2150E-02 1.0260E-02 4.6200E-03 4.3150E-03 1.0180E-02

9.3560E-03 5.9490E-03 1.0280E-02 1.5810E-02 1.7640E-02 1.2860E-02 1.0340E-02

2.3050E-02 1.8940E-02 1.4650E-02 3.6640E-03 1.2970E-02 1.4980E-02 9.4300E-03

7.1850E-03 1.4710E-02 1.4700E-02 1.3980E-02 1.3880E-02 1.4020E-02 6.6070E-03

1.2220E-02 1.0510E-02 7.5840E-03 6.3750E-03 1.0530E-02 1.2570E-02 7.9480E-03

6.3000E-03 5.8390E-03 4.5770E-03 3.3530E-03 2.9150E-03 4.2800E-03 3.6430E-03

3.4050E-03 3.7990E-03 1.0720E-02 6.8770E-03 4.2230E-03 1.8440E-03 7.0420E-03

6.0490E-03 3.6200E-03 2.6150E-03 7.0980E-03 6.5970E-03 5.3860E-03 5.5500E-03

1.7350E+00 7.0150E-02 2.4560E-01 3.0240E-01 2.9570E-01 1.1600E-01 3.2760E-01

9.9510E-01 6.2720E-01 1.0460E-01 1.7430E-01 7.2440E-02 2.6950E-02 6.3800E-02

4.5510E-02 1.1810E-02 1.0840E-01 1.4070E-01 1.8400E-01 5.6470E-02 8.1500E-02

1.0870E-01 7.8270E-02 2.3120E-02 8.2150E-02 1.2290E-01 1.3050E-01 6.8290E-02

7.4690E-02 5.4440E-02 3.7630E-02 3.7340E-02 2.3300E-01 1.2260E+01 5.7620E-01

8.3340E+00 2.6530E-02 3.6280E-02 2.8980E-01 1.2590E+01 1.0300E+01 2.1730E+00

4.2880E-02 2.8190E+00 6.6680E+00 1.2010E-02 1.2580E-01 2.0780E-01 1.5460E-01

8.0350E-03 6.3040E-02 3.4300E-01 3.4110E-01 2.0200E-02 1.1340E-01 1.3900E-01

2.5300E-02 5.7670E-02 4.5590E-02 3.2770E-02 3.7520E-02 2.9310E-02 1.3110E-02

3.5090E-03 3.3720E-03 4.6480E-03 3.4430E-03 3.3080E-03 1.3030E-02 1.5570E-02

1.7270E-02 1.8670E-03 7.1390E-03 6.9590E-03 7.4000E-03 1.3360E-03 1.3540E-02

1.6050E-02 2.1820E-02 3.4220E-03 1.0520E-02 1.0290E-02 6.8480E-03 4.3370E-03

7.3020E-03 8.1440E-03 4.7750E-03 1.4470E-03 4.2890E-03 6.8780E-03 6.6480E-03

3.7990E-03 8.5780E-03 1.2580E-02 1.2770E-02 2.5480E-03 1.1260E-02 1.5310E-02

1.4860E-02 7.3160E-04 4.4050E-03 1.0120E-02 1.1920E-02 1.5680E-03 7.4620E-03

1.1200E-02 1.3380E-02 7.9070E-03 8.3660E-03 6.2760E-03 5.1800E-03 9.2680E-03

6.4490E-03 3.6760E-03 6.8000E-03 6.6910E-03 6.1810E-03 5.5360E-03 2.6040E-03

4.4120E-03 2.7580E-03 1.3890E-03 1.6140E-03 3.2020E-03 2.9670E-03 2.3050E-03

6.9570E-03 4.8850E-03 2.5640E-03 1.1790E-03 4.3940E-03 4.2450E-03 2.8380E-03

1.6370E-03 2.7840E-03 5.4760E-03 4.6930E-03 3.4670E-03 1.7780E-02 7.6700E-02

1.9390E-01 1.6820E-01 4.6080E-02 8.1130E-02 2.6190E-01 6.4250E-01 3.3540E-02

1.1790E-01 2.3440E-02 7.9260E-03 3.4700E-02 2.5840E-02 5.8210E-04 1.8950E-02

1.0480E-01 9.8100E-02 1.7140E-02 5.5150E-02 3.3350E-02 5.7040E-02 3.1930E-03

3.2500E-02 6.2970E-02 7.9860E-02 3.3630E-02 2.6860E-02 4.2260E-02 1.4760E-02

1.0200E-02 4.7290E-02 1.8780E-01 8.1010E+00 2.4330E+00 1.3060E-02 1.1070E-02

1.9440E-02 1.5910E-01 5.6220E+00 7.0240E+00 1.4450E-02 4.3750E-02 4.6880E+00

1.1950E-03 2.0460E-02 1.1840E-01 1.0990E-01 3.8600E-03 3.6770E-03 6.3540E-02

3.0630E-01 4.2520E-03 3.3150E-02 9.8880E-02 4.9770E-03 3.1840E-02 3.3450E-02

9.4260E-03 2.0180E-02 1.5630E-02 5.9400E-03 1.7540E-03 1.4620E-03 2.2340E-03

2.0480E-03 7.0960E-04 4.0810E-03 1.0720E-02 9.1360E-03 2.0640E-04 2.6880E-03

5.9480E-03 3.6400E-03 3.4680E-06 2.2640E-03 1.3350E-02 1.0940E-02 7.2500E-04

4.5710E-03 6.9700E-03 3.3250E-03 1.5680E-03 3.6300E-03 3.9260E-03 3.1150E-03

4.8650E-04 1.3540E-03 3.4930E-03 4.5050E-03 1.0590E-03 3.8790E-03 5.8350E-03

8.0910E-03 3.4120E-04 3.6540E-03 8.9710E-03 9.4150E-03 1.2780E-04 9.9920E-04

3.9800E-03 8.3130E-03 1.6160E-04 2.2960E-03 6.3030E-03 7.9220E-03 3.7540E-03

3.6520E-03 3.8820E-03 1.6190E-03 5.1820E-03 4.5440E-03 1.0610E-03 3.5600E-03

2.2450E-03 3.7280E-03 3.0680E-03 8.5570E-04 2.6130E-03 1.8720E-03 2.6050E-04

3.7110E-04 1.8610E-03 1.8720E-03 9.3880E-04 3.4790E-03 2.5400E-03 1.1850E-03

5.8710E-04 2.0430E-03 2.0160E-03 1.8840E-03 5.9740E-04 7.5890E-04 2.9690E-03

3.1040E-03 1.3780E-03 2.0230E+01 6.6940E+00 3.3110E+00 1.9120E+00 6.5540E-01

1.3960E-01 3.1690E-02 1.2380E+00 4.6950E-01 1.6620E-01 5.3080E-01 1.0060E-01

2.8580E-02 1.5790E+00 5.1540E-01 1.4250E-01 3.9210E-02 1.5000E+00 4.4080E-01

1.3440E-01 4.3180E-02 1.0890E+00 4.1050E-01 1.3040E-01 4.3010E-02 7.2780E-01

3.1770E-01 1.3750E-01 5.3710E-02 5.8440E-01 2.5030E-01 9.1900E-02 2.7220E-02

4.9010E-03 5.4720E-01 2.7650E-01 1.1780E-01 4.0360E-02 1.0210E-02 1.7350E-03

1.9710E-01 8.9950E-02 1.7180E-02 1.3900E+01 2.8760E-01 8.5300E-02 1.6100E-02

6.4850E+00 7.2210E-01 9.5360E-02 2.3790E-02 3.3840E-01 1.3230E-01 1.6890E-02

6.0630E-01 2.6610E-01 1.2660E-01 6.9090E-02 4.3800E-02 2.0330E-02 8.9120E-03

7.1210E-02 1.0500E-01 6.2550E-02 7.9360E-03 4.9340E+00 4.9790E-01 3.9570E-02

4.3470E-03 1.9210E-01 9.0230E-02 2.3430E-02 2.7380E-03 2.2560E-01 1.5620E-01

2.7880E-02 2.7080E-03 2.3260E+00 4.7490E-02 8.6350E-03 1.4260E-03 9.1180E-01

3.0920E-02 5.9640E-03 1.9250E-03 1.1570E+00 1.4980E-01 1.6370E-02 2.8710E-03

1.6360E+00 1.7840E-01 2.4580E-02 3.9630E-03 4.2150E+00 6.2680E-01 2.1130E-02

4.1250E-03 1.1390E+00 1.2670E-01 2.6940E-02 3.4940E-03 2.7310E-01 9.9540E-02

2.5440E-02 3.0610E-03 2.9960E-02 1.3290E-02 2.2900E-03 4.8240E-01 3.4690E-02

1.1480E-02 2.4560E-03 6.4040E-02 2.0850E-02 6.0450E-03 1.2590E-03 1.9230E-01

1.6310E-02 4.0960E-03 8.6790E-04 8.4100E-02 2.3330E-02 6.9620E-03 1.1370E-03

2.2680E-02 8.5920E-03 5.8800E-03 7.4450E-04 1.2750E-01 8.5080E-03 2.5100E-03

3.6390E-04 1.9730E-01 3.9960E-02 5.5260E-03 1.0820E-03 2.3920E+01 6.2420E+00

8.0870E-01 7.4490E-01 5.2680E-01 1.1720E-01 7.3180E-01 5.4720E-01 2.1030E-01

2.4510E-01 2.3300E-01 5.2630E-02 3.5790E-01 8.4470E-01 4.8750E-01 1.5060E-01

4.3810E-01 7.8970E-01 3.5810E-01 1.2300E-01 3.3870E-01 5.4430E-01 3.4780E-01

1.2750E-01 3.6820E-01 3.4930E-01 1.9680E-01 7.8800E-02 2.1770E-01 2.6430E-01

1.7170E-01 8.8390E-02 3.5830E-02 2.0280E-01 1.9900E-01 1.8430E-01 1.2490E-01

6.1130E-02 1.9770E-02 1.1360E-01 6.8130E-02 6.1570E-02 1.8570E+00 9.2970E+00

1.9350E-01 6.7890E-02 7.3350E-01 4.0960E+00 7.9350E-01 9.5880E-02 2.0380E-01

1.1340E-01 7.9190E-02 2.6590E-01 3.0620E-01 1.9740E-01 8.4440E-02 2.8670E-02

2.1100E-02 8.7600E-03 5.6960E-02 7.8280E-02 2.4730E-02 3.7740E-02 8.8460E-02

3.5650E+00 6.1700E-01 4.5770E-02 6.2950E-02 1.4310E-01 8.5120E-02 2.7550E-02

8.7140E-02 2.7880E-01 1.6920E-01 3.3550E-02 3.0480E-01 1.5530E+00 3.3640E-02

7.9650E-03 1.7910E-01 6.0040E-01 1.9980E-02 5.2040E-03 1.4920E-01 7.2980E-01

1.6300E-01 1.7880E-02 7.3700E-02 1.0140E+00 1.9950E-01 2.7900E-02 4.4320E-01

3.9020E+00 5.4160E-01 2.2700E-02 7.1630E-02 8.0860E-01 1.4800E-01 3.0960E-02

7.1500E-02 1.2720E-01 9.1650E-02 2.9930E-02 1.8490E-02 1.0730E-02 7.3250E-03

8.5040E-02 3.0650E-01 1.8710E-02 9.8980E-03 2.0820E-02 3.2630E-02 1.5470E-02

6.3840E-03 3.6620E-02 1.1960E-01 1.0650E-02 3.3980E-03 1.8890E-02 5.0400E-02

2.0010E-02 7.8390E-03 1.8150E-02 6.9090E-03 2.7430E-03 3.3750E-03 2.2910E-02

8.0110E-02 6.0970E-03 2.0230E-03 3.3580E-02 1.1850E-01 4.0090E-02 5.9670E-03

2.0250E+01 2.6410E-01 6.4840E-01 4.0480E-01 3.3670E-01 4.3760E-01 4.2800E-01

2.4680E-01 1.0690E-01 1.8400E-01 1.0670E-01 6.8040E-02 3.3170E-01 5.7770E-01

4.0610E-01 1.3330E-01 3.5620E-01 5.2050E-01 2.7310E-01 9.2860E-02 2.9070E-01

3.6120E-01 2.8330E-01 1.8780E-01 2.4590E-01 2.0620E-01 1.0740E-01 7.0010E-02

1.4850E-01 1.7480E-01 1.3090E-01 6.3550E-02 3.9930E-02 1.4630E-01 1.3430E-01

1.1780E-01 9.8470E-02 5.8890E-02 5.1890E-02 6.7000E-02 6.3480E-02 2.0840E-01

2.1670E+00 6.0650E+00 1.2300E-01 9.3570E-02 7.7040E-01 2.7490E+00 6.0210E-01

1.0190E-01 1.1320E-01 7.7900E-02 1.2660E-01 1.9740E-01 1.8280E-01 1.3310E-01

1.8720E-02 1.6400E-02 8.7470E-03 4.2720E-02 4.3840E-02 3.4770E-02 2.6470E-02

1.2450E-02 9.9620E-02 3.8480E+00 4.7580E-01 9.4850E-03 5.8320E-02 1.0200E-01

7.2540E-02 8.6680E-04 9.9850E-02 1.8620E-01 1.3950E-01 2.8880E-02 3.6160E-01

1.0100E+00 2.2180E-02 1.6020E-02 1.4750E-01 3.8520E-01 1.3170E-02 1.6040E-02

1.6260E-01 4.9250E-01 1.2440E-01 1.3270E-02 6.5200E-02 7.4950E-01 1.5730E-01

1.9910E-02 5.3730E-01 2.6360E+00 4.0570E-01 1.5920E-02 5.8040E-02 5.9990E-01

1.1980E-01 1.0250E-02 6.4410E-02 8.5130E-02 7.8750E-02 1.0000E-02 1.0330E-02

6.6940E-03 1.9840E-02 8.1200E-02 2.0160E-01 1.3070E-02 6.0340E-03 1.5470E-02

2.2130E-02 1.2310E-02 7.6040E-03 3.5140E-02 7.6870E-02 6.6820E-03 4.7470E-03

1.5970E-02 3.6150E-02 1.6870E-02 1.3610E-02 3.7850E-03 2.9320E-03 2.0630E-03

4.0550E-03 2.3450E-02 5.1470E-02 4.0090E-03 5.4990E-03 4.0020E-02 7.9750E-02

3.0720E-02 7.3770E-02 2.7140E-01 4.8380E-01 2.8150E-01 2.2730E-01 3.0920E-01

2.1600E-01 4.5160E-02 9.8830E-02 1.2200E-01 1.8980E-02 6.3250E-02 2.6110E-01

5.8040E-01 4.3090E-02 1.2270E-01 2.7280E-01 4.1810E-01 2.9000E-02 8.3970E-02

2.2820E-01 3.4390E-01 9.4340E-02 1.3700E-01 1.5820E-01 1.0930E-01 1.3620E-02

6.8930E-02 1.1050E-01 1.1930E-01 7.7880E-02 4.1710E-03 3.7240E-02 9.4840E-02

1.1420E-01 9.4540E-02 5.1770E-02 1.6030E-02 5.8710E-02 4.6780E-02 3.9080E-02

2.3730E-01 1.6520E+00 3.7780E+00 2.3390E-02 9.6290E-02 6.0170E-01 2.1660E+00

3.9260E-02 1.0380E-01 5.6160E-02 6.9080E-02 8.4420E-02 1.3310E-01 1.4030E-01

1.1300E-02 1.0370E-02 7.2760E-03 2.8480E-02 1.7970E-02 4.2700E-02 1.0140E-02

2.3580E-03 1.3300E-02 7.7800E-02 2.9190E+00 2.4700E-04 1.1000E-02 4.7100E-02

1.0010E-01 9.5090E-05 9.3620E-04 7.6000E-02 2.0250E-01 3.8540E-03 3.5370E-02

2.5360E-01 6.3240E-01 3.2650E-03 1.8860E-02 1.2810E-01 2.8210E-01 2.7960E-03

1.7750E-02 1.2430E-01 3.8640E-01 1.6570E-03 1.4500E-02 5.2310E-02 5.8050E-01

3.8490E-03 2.2170E-02 5.7100E-01 2.0570E+00 1.4990E-03 1.8000E-02 4.7950E-02

4.6490E-01 1.0320E-04 1.1980E-02 5.3130E-02 9.2230E-02 4.8940E-03 8.6120E-03

4.8180E-03 5.7310E-03 1.9640E-02 6.3320E-02 1.2290E-01 1.2570E-03 6.3810E-03

1.2300E-02 1.8560E-02 1.9630E-03 7.6660E-03 2.7000E-02 4.7680E-02 5.4550E-04

5.2420E-03 1.3290E-02 3.0880E-02 9.0730E-03 1.7760E-03 3.1510E-03 9.3930E-04

9.4940E-04 4.5070E-03 1.7350E-02 3.2030E-02 9.5650E-04 6.0300E-03 3.0720E-02

6.3200E-02 1.6960E+01 4.9300E+00 1.9910E+00 1.0120E+00 4.9650E-01 5.8450E-02

2.0300E-01 8.1980E-02 1.6410E-02 3.0840E-01 1.5900E-01 7.0070E-02 1.9090E-02

2.8250E-01 1.4070E-01 6.9850E-02 3.0460E-02 2.8230E-01 1.3590E-01 5.8610E-02

2.1450E-02 2.1080E-01 1.0980E-01 5.9420E-02 2.6850E-02 1.6060E+00 5.8290E-01

1.5470E-01 3.0310E-02 5.8450E-03 2.1860E+00 7.0510E-01 1.9230E-01 4.5110E-02

1.1340E-02 3.7460E-03 1.0940E+00 1.4280E-01 1.3150E-02 3.4060E+01 5.2510E+00

7.2310E-02 1.3110E-02 4.6570E+01 5.8610E+00 3.8300E-01 5.4640E-02 2.2240E+01

1.0320E-01 3.5610E-02 7.0310E-02 4.4030E-02 2.3140E-02 9.2510E-03 4.1450E-02

2.6280E-02 1.1790E-02 4.0670E-03 2.2670E-02 4.0020E-03 1.8000E-03 7.5040E-02

3.7270E-02 1.5830E-02 4.0890E-03 1.1850E-02 6.7170E-03 3.3320E-03 1.3050E-03

2.9590E-02 1.6090E-02 7.2590E-03 2.0430E-03 2.7120E-01 4.6950E-02 4.5460E-03

9.5630E-04 3.2550E-01 5.6750E-02 8.2480E-03 2.7080E-03 2.8560E-02 1.0060E-02

4.5370E-03 1.3350E-03 4.4580E-02 2.3950E-02 1.0810E-02 3.8750E-03 2.7580E-01

4.9150E-02 1.0430E-02 2.4740E-03 2.1770E-02 1.0100E-02 4.0330E-03 1.0440E-03

2.6720E-02 1.0920E-02 4.4850E-03 1.6510E-03 1.6040E-01 1.4390E-02 7.3920E-03

2.9220E-02 1.4910E-02 6.2140E-03 1.9820E-03 1.2810E-02 7.6030E-03 4.5700E-03

2.7290E-03 1.6840E-02 1.1620E-02 5.7030E-03 1.8620E-03 4.6140E-03 3.2070E-03

1.9690E-03 9.0650E-04 1.0700E-02 3.9750E-02 2.3560E-03 1.2280E-03 1.1190E-02

4.1100E-03 1.6090E-03 6.7940E-04 3.8340E-02 7.3120E-03 1.4460E-03 4.2820E-04

1.6490E+01 2.8970E+00 6.1460E-01 2.3950E-01 3.1940E-01 1.0880E-01 6.9910E-02

4.7380E-02 1.0650E-01 1.2620E-01 1.0880E-01 7.7360E-02 1.1830E-01 1.3100E-01

8.8030E-02 5.4580E-02 9.5800E-02 1.2730E-01 9.6330E-02 5.8260E-02 1.0460E-01

1.1540E-01 6.4600E-02 2.5850E-02 3.0980E-01 7.4330E-01 5.2380E-01 2.1460E-01

4.1650E-02 4.0410E-02 1.1340E+00 7.6790E-01 3.1660E-01 8.5870E-02 1.3820E-02

2.5570E-01 5.7150E-01 1.1030E-01 5.2030E+00 1.7040E+01 7.0830E+00 7.1450E-02

3.8920E-01 3.2100E+01 6.6240E+00 4.7030E-01 5.1110E+00 1.1610E+01 5.4600E-02

3.9630E-02 2.5210E-02 2.3860E-02 1.9210E-02 3.0210E-02 1.8490E-02 1.0800E-02

3.1950E-03 6.9180E-03 1.1040E-02 1.7050E-03 2.7450E-02 3.0610E-02 2.4080E-02

1.7420E-02 4.9220E-03 4.8740E-03 4.2090E-03 3.4880E-03 1.0140E-02 1.1900E-02

1.0690E-02 8.2860E-03 5.2800E-02 1.3810E-01 5.8300E-02 4.0790E-03 6.3040E-02

1.5960E-01 5.4550E-02 5.7750E-03 7.7510E-03 1.3640E-02 7.6270E-03 4.5240E-03

1.8080E-02 1.8860E-02 1.4950E-02 1.1060E-02 1.9060E-02 1.8300E-01 4.9380E-02

1.1150E-02 8.0830E-03 9.2190E-03 6.9770E-03 5.0300E-03 6.4360E-03 1.1770E-02

7.7500E-03 4.7410E-03 4.6970E-02 8.3950E-02 5.2010E-03 1.4880E-02 1.1340E-02

8.3100E-03 5.0450E-03 6.6340E-03 6.6440E-03 4.7390E-03 2.7830E-03 1.1620E-02

5.9500E-03 5.6090E-03 3.8720E-03 2.7170E-03 1.8520E-03 1.6830E-03 1.6570E-03

8.0270E-03 1.1010E-02 2.0850E-02 8.4740E-04 4.1100E-03 4.7770E-03 2.7890E-03

8.3880E-04 1.7940E-03 2.1490E-02 7.5300E-03 1.3940E-03 1.0630E+01 2.5970E-01

3.2020E-01 2.0460E-01 4.7710E-02 6.2180E-02 4.0220E-02 2.3750E-02 6.9740E-02

8.8590E-02 9.4250E-02 4.9480E-02 7.2060E-02 8.3580E-02 5.8670E-02 2.8540E-02

6.4000E-02 8.4070E-02 7.6130E-02 5.7270E-02 6.4610E-02 5.7200E-02 2.9280E-02

2.3460E-02 3.0440E-01 3.8180E-01 3.3170E-01 1.9110E-01 1.3580E-02 2.5160E-02

5.2460E-01 5.7210E-01 3.2880E-01 1.0700E-01 3.5340E-02 2.8110E-01 3.0750E-01

7.8630E-02 7.0590E+00 7.9410E+00 5.0230E+00 8.0670E-02 3.0030E-01 2.0890E+01

5.5470E+00 6.3240E-01 5.9280E+00 4.6170E+00 1.6290E-02 2.1830E-02 1.8270E-02

1.5970E-02 1.9470E-02 1.3850E-02 7.2540E-03 2.0330E-03 3.1500E-03 6.1150E-03

4.4630E-03 7.0380E-03 1.6540E-02 2.2460E-02 1.9990E-02 1.4260E-03 2.8420E-03

3.6500E-03 3.5900E-03 2.2370E-03 6.5200E-03 8.9110E-03 9.7530E-03 4.3710E-03

5.8150E-02 6.3320E-02 4.0130E-02 8.0480E-03 5.4260E-02 7.6660E-02 4.7710E-02

2.9850E-03 5.3740E-03 9.0720E-03 5.6230E-03 5.6650E-03 1.0300E-02 1.4120E-02

1.1770E-02 5.3270E-03 1.2110E-02 1.1600E-01 3.7350E-02 1.9370E-03 4.5840E-03

7.6400E-03 5.7400E-03 1.9310E-03 4.0430E-03 8.1980E-03 6.5450E-03 1.4180E-02

4.4390E-02 3.2260E-02 6.2090E-03 8.3060E-03 7.2940E-03 4.1740E-03 3.6060E-03

3.8100E-03 3.6870E-03 2.6570E-03 5.7030E-03 5.6080E-03 4.3280E-03 2.3890E-03

1.1680E-03 1.3630E-03 1.3830E-03 1.2220E-03 5.3520E-03 3.1780E-03 1.1200E-02

7.8840E-03 1.6100E-03 2.7900E-03 2.5590E-03 1.4100E-03 7.3080E-04 1.0270E-03

1.4510E-02 4.7670E-03 6.7640E-02 2.5330E-01 7.1450E-02 1.5300E-02 3.8680E-02

2.1500E-02 1.3500E-03 2.4520E-02 4.9470E-02 6.2740E-02 1.5680E-02 3.2280E-02

4.0610E-02 4.3410E-02 6.0620E-03 2.3270E-02 4.1850E-02 5.4550E-02 2.6840E-02

2.5850E-02 2.9280E-02 2.2420E-02 6.0800E-03 1.7840E-02 1.7720E-01 2.4520E-01

1.6920E-01 4.9870E-03 7.4570E-03 1.2750E-02 1.8900E-01 3.2230E-01 2.4820E-01

3.7940E-03 4.6350E-02 2.6090E-01 1.2130E-02 6.9670E-02 5.0180E+00 4.9230E+00

3.8840E-02 3.7730E-02 2.1040E-01 1.3080E+01 2.4730E-02 9.6930E-01 4.5670E+00

4.6180E-03 1.2020E-02 1.2010E-02 7.1210E-03 9.1470E-03 7.5700E-03 3.4260E-03

1.0170E-03 1.3960E-03 1.6470E-03 3.6210E-03 3.8850E-04 7.3200E-03 1.1380E-02

1.3650E-02 2.2780E-04 1.3620E-03 1.9540E-03 2.2600E-03 4.1550E-06 2.4400E-03

4.8450E-03 6.3470E-03 9.5420E-04 4.0750E-03 4.0100E-02 3.9150E-02 2.6850E-03

5.7040E-03 4.7670E-02 4.4870E-02 5.3860E-04 2.6110E-03 3.2520E-03 4.9800E-03

8.0160E-04 4.8110E-03 6.6030E-03 7.9380E-03 8.6490E-04 5.0490E-03 7.7970E-03

7.3930E-02 1.2440E-04 1.9140E-03 3.1470E-03 4.9290E-03 2.5860E-04 1.6240E-03

2.7940E-03 5.8500E-03 5.4720E-03 9.0740E-03 3.1270E-02 1.9810E-03 5.0440E-03

4.1730E-03 2.3820E-03 1.6530E-03 1.7270E-03 1.7600E-03 1.7240E-03 1.8620E-03

3.8720E-03 2.3890E-03 8.6050E-04 3.1300E-04 8.6430E-04 7.8780E-04 7.1060E-04

2.6760E-03 9.1320E-04 2.6480E-03 7.1850E-03 6.7940E-04 8.3870E-04 1.4100E-03

9.6460E-04 2.0370E-04 5.2160E-04 5.7490E-04 8.1160E-03 8.5020E-01 3.6770E-01

3.2160E+00 1.9300E-01 5.9020E-02 1.4140E-01 7.7050E-02 3.9660E-02 1.9690E-02

5.3930E-01 2.4500E-01 1.0510E-01 4.5900E-02 1.2450E-01 7.9480E-02 4.6010E-02

2.4210E-02 4.5180E-01 2.8440E-01 1.3430E-01 4.5470E-02 1.9970E-01 1.3400E-01

7.7620E-02 3.9180E-02 1.4890E-02 2.2440E-01 1.8560E-01 1.2630E-01 7.1750E-02

3.3300E-02 1.1520E-02 2.0890E-01 1.2290E-01 3.5380E-02 3.5180E+00 9.1940E-01

1.8180E-01 4.3020E-02 4.5280E-01 3.5730E-01 1.9440E-01 6.9380E-02 7.9340E+00

3.4360E+00 4.7170E-02 2.9700E-01 1.2630E-01 4.8570E-02 1.8860E-02 2.4880E-01

1.4500E-01 8.1620E-02 9.7420E-01 9.9050E-01 7.0960E-01 1.7580E-02 8.9480E-02

4.2250E-02 1.6810E-02 8.1780E-03 1.1160E-02 6.5310E-03 3.2990E-03 1.3560E-03

2.1360E-02 1.0770E-02 4.7360E-03 1.5940E-03 1.7350E+00 5.3680E-01 1.0250E-01

1.2150E-02 1.8370E+00 4.3350E-01 6.4250E-02 5.6250E-03 6.5130E-02 2.7390E-02

9.9130E-03 3.0790E-03 1.1450E-01 5.3610E-02 2.2340E-02 7.8950E-03 3.9230E-02

2.4030E-02 1.4620E-02 6.4650E-03 1.0170E-02 5.6700E-03 2.8730E-03 1.4280E-03

6.3120E-03 4.1540E-03 2.2000E-03 9.1280E-04 1.6950E+00 7.4090E-01 1.6620E-02

9.7000E-01 3.1090E-01 4.5290E-02 9.3800E-03 1.2100E-01 9.8660E-02 5.7870E-02

2.4930E-02 1.1720E+00 3.0540E-01 7.2890E-02 1.7730E-02 1.7540E-01 7.8330E-02

3.0620E-02 8.8000E-03 8.7960E-01 2.6570E-01 1.2970E-01 1.5520E-02 3.0760E-01

1.0360E-01 4.3950E-02 2.0880E-02 6.1730E-02 2.7660E-02 1.0580E-02 3.0870E-03

3.3980E-01 1.9290E-01 2.0130E+00 1.0680E-01 2.6380E-02 6.2490E-02 5.7650E-02

3.8790E-02 9.7510E-02 2.4740E-01 1.9110E-01 9.6560E-02 4.6860E-02 4.8120E-02

4.6800E-02 4.1220E-02 2.2730E-01 1.3940E-01 1.4720E-01 1.0240E-01 8.5160E-02

7.3160E-02 6.8390E-02 5.4930E-02 3.0650E-02 1.4710E-01 5.0650E-02 5.0410E-02

7.0180E-02 7.1760E-02 4.4930E-02 1.0350E-01 4.4400E-02 9.5820E-02 1.5380E-01

1.8170E+00 9.4720E-01 1.9250E-01 2.9630E-01 6.6890E-02 1.4370E-01 2.0800E-01

3.4250E+00 1.0340E+00 3.1390E+00 4.1330E-02 1.3190E-01 1.0310E-01 5.0890E-02

1.4450E-01 1.3930E-01 3.4050E-02 5.6790E-01 4.7680E-01 1.7400E-01 5.1280E-01

1.0500E-02 3.9420E-02 3.4470E-02 2.0160E-02 2.4690E-03 4.0390E-03 4.0950E-03

3.8960E-03 2.1950E-03 8.6180E-03 8.7800E-03 5.9490E-03 3.9050E-02 8.3550E-01

4.7170E-01 1.0960E-01 2.3940E-02 9.5920E-01 4.6320E-01 1.1940E-01 8.5100E-03

2.7630E-02 2.2030E-02 1.1490E-02 1.5940E-02 4.7690E-02 4.2800E-02 2.6330E-02

1.4930E-02 1.4340E-02 1.3810E-02 1.0300E-02 2.2080E-03 4.7890E-03 4.1260E-03

2.4260E-03 1.6080E-03 2.7290E-03 2.4420E-03 2.3570E-03 7.3600E-01 2.3170E-01

6.6530E-01 3.5030E-02 4.6070E-01 2.6480E-01 5.0550E-02 7.9660E-02 2.7420E-02

4.0560E-02 5.1110E-02 4.3070E-02 6.1940E-01 3.1870E-01 5.6930E-02 1.6180E-02

7.3900E-02 6.5420E-02 3.7860E-02 5.8540E-01 1.2900E-01 4.5040E-02 1.0220E-01

4.7140E-02 1.6960E-01 8.7600E-02 1.8150E-02 1.1210E-02 2.4430E-02 2.0770E-02

1.2670E-02 5.8940E-02 1.0680E-01 9.8690E-01 7.5220E-03 1.4390E-02 2.8800E-02

4.0940E-02 2.9450E-02 5.0020E-02 1.0760E-01 1.2580E-01 1.1030E-02 2.5030E-02

2.9270E-02 2.6200E-02 4.8590E-02 1.3220E-01 9.0500E-02 3.6820E-02 1.9230E-02

4.4960E-02 4.4100E-02 3.2240E-02 1.6510E-02 1.4590E-03 7.4600E-02 7.2110E-02

4.4650E-02 1.9280E-02 5.3110E-03 1.3960E-02 7.6590E-02 3.1830E-02 5.2770E-02

7.6010E-02 7.3350E-01 6.9390E-01 1.8140E-02 1.8730E-01 1.2170E-01 2.9300E-02

4.5210E-02 3.1360E+00 6.3090E-01 9.3760E-03 2.2610E-02 5.9380E-02 7.2170E-02

8.1490E-02 3.4030E-02 3.9910E-02 3.2410E-01 1.7930E-02 4.6040E-01 1.0380E-01

3.9590E-03 5.8380E-03 1.7240E-02 2.5210E-02 2.8610E-04 1.4350E-03 2.6120E-03

2.9770E-03 1.0380E-04 1.2780E-03 4.1830E-03 7.1120E-03 1.0650E-02 2.3700E-02

4.3390E-01 5.1100E-01 6.5120E-03 1.4190E-02 5.4290E-01 3.7890E-01 1.3130E-03

5.0720E-03 1.3190E-02 1.5420E-02 2.1060E-03 9.4560E-03 2.3130E-02 3.2460E-02

4.2110E-03 7.5930E-03 8.4680E-03 5.9310E-03 6.2670E-04 1.0590E-03 2.0460E-03

2.5170E-03 9.7030E-05 1.0310E-03 1.6260E-03 2.2190E-03 1.5520E-02 6.6380E-01

1.3660E-01 1.1520E-02 1.7160E-02 1.8540E-01 2.7280E-01 1.2560E-02 4.6740E-02

3.1310E-02 8.9190E-03 2.3550E-02 1.4460E-02 2.4140E-01 2.3610E-01 1.3320E-03

7.8180E-03 3.4510E-02 5.0190E-02 2.9200E-01 1.5300E-02 1.0210E-01 2.1010E-02

2.8750E-02 1.3250E-02 6.1200E-02 5.7520E-02 8.8130E-04 6.8680E-03 1.2900E-02

1.3810E-02 2.5210E+00 4.5110E-01 3.5440E-01 1.8960E-01 9.9790E-02 5.0090E-02

4.5070E-01 3.1200E-01 2.1880E-01 1.6400E-01 2.6770E-01 1.6330E-01 9.3030E-02

4.6260E-02 3.3050E-01 2.2870E-01 1.3960E-01 5.7880E-02 6.9440E-02 4.2100E-02

2.2500E-02 1.1300E-02 4.4250E-03 7.5200E-02 4.3420E-02 2.3450E-02 1.1660E-02

5.1890E-03 1.8490E-03 3.1160E-02 2.1420E-02 9.4660E-03 2.5860E-01 1.1060E-01

4.0760E-02 1.3680E-02 9.5990E-02 6.1240E-02 3.2990E-02 1.4430E-02 6.4140E-01

3.2090E-01 2.0800E-02 1.6150E-01 7.5000E-02 3.4630E-02 1.5950E-02 1.7990E-01

1.7380E-01 1.1450E-01 8.5250E+00 1.3440E+01 5.8040E+00 1.5350E-01 3.1040E-02

1.7540E-02 1.0540E-02 6.5650E-03 1.0740E-02 6.0960E-03 3.0490E-03 1.2330E-03

2.3910E-02 1.2110E-02 5.3630E-03 1.7330E-03 2.4640E+01 5.8610E+00 8.4020E-01

3.7660E-02 8.5980E-02 3.1600E-02 1.9870E-02 1.5050E-02 2.8570E-02 1.8210E-02

1.1690E-02 6.3240E-03 2.5090E-02 1.8070E-02 1.4020E-02 1.5870E-02 3.0040E-02

1.9240E-02 9.3030E-03 3.9980E-03 9.3380E-03 5.8090E-03 4.3730E-03 2.0800E-03

1.2770E-02 8.5880E-03 4.9750E-03 2.2750E-03 5.4290E-01 1.9150E-01 6.7780E-03

3.2690E-02 1.8080E-02 1.0150E-02 5.1680E-03 3.0830E-02 2.1800E-02 1.1000E-02

6.4850E-03 2.1420E-01 4.5000E-02 1.3660E-02 6.2310E-03 2.1490E-02 1.0350E-02

4.6510E-03 1.8750E-03 1.1060E-01 1.2750E-01 6.4390E-02 4.0340E-03 3.7530E-02

1.2670E-02 6.7720E-03 3.3210E-03 9.0170E-03 5.1660E-03 2.4740E-03 8.7240E-04

1.8030E+00 7.1850E-02 1.5090E-01 1.4360E-01 9.8760E-02 2.2470E-01 2.5620E-01

1.8030E-01 9.5300E-02 9.3440E-02 9.9250E-02 9.7720E-02 8.6260E-02 1.9040E-01

1.4870E-01 1.1300E-01 6.2320E-02 2.3860E-02 2.6530E-02 2.3750E-02 1.7490E-02

9.1080E-03 1.4690E-02 2.5880E-02 2.5690E-02 2.0460E-02 1.3560E-02 6.6140E-03

1.8690E-02 8.9310E-03 1.3560E-02 5.3410E-02 1.2780E-01 8.7910E-02 3.1170E-02

4.2820E-02 3.2030E-02 3.2730E-02 2.9830E-02 2.6950E-01 7.5410E-02 2.7060E-01

3.4170E-02 7.1000E-02 5.7530E-02 3.0740E-02 1.7320E-01 1.0890E-01 2.7760E-02

5.6660E+00 5.7640E+00 2.3510E+00 7.4210E+00 8.6730E-03 1.6190E-02 1.2510E-02

7.3800E-03 2.5090E-03 3.9440E-03 4.1080E-03 3.5040E-03 2.6900E-03 9.5350E-03

9.5990E-03 6.9700E-03 3.0550E-01 1.7780E+01 6.6580E+00 1.2210E+00 2.0200E-02

4.0830E-02 2.4040E-02 6.5340E-03 1.2100E-02 1.4880E-02 1.1080E-02 6.4350E-03

1.2580E-02 1.5230E-02 1.1390E-02 6.2650E-03 1.1970E-02 9.6720E-03 1.0110E-02

8.5600E-03 3.5780E-03 4.1820E-03 3.5190E-03 2.5550E-03 4.9840E-03 4.1020E-03

4.6700E-03 5.3110E-03 1.6750E-01 5.1460E-02 1.4260E-01 1.5710E-02 1.7930E-02

1.0390E-02 5.2820E-03 1.3130E-02 1.2560E-02 1.0080E-02 8.4240E-03 1.1200E-02

7.5570E-02 4.8360E-02 1.5730E-02 3.3450E-03 9.2440E-03 8.1450E-03 4.9250E-03

4.8560E-02 6.3850E-02 2.3670E-02 4.7470E-02 7.8440E-03 2.2560E-02 1.2390E-02

3.3840E-03 3.1580E-03 2.8290E-03 2.8730E-03 2.4580E-03 1.8620E-02 3.7230E-02

7.1860E-02 1.0130E-01 1.1480E-01 8.6290E-02 8.6750E-02 7.9270E-02 1.8970E-02

4.9890E-02 6.1130E-02 5.6060E-02 7.1580E-02 8.4990E-02 6.4400E-02 3.3310E-02

5.4650E-03 1.2350E-02 1.4130E-02 1.1810E-02 6.5440E-03 1.5340E-03 7.1790E-03

1.2130E-02 1.3880E-02 1.1820E-02 6.7640E-03 5.2790E-03 1.0890E-02 4.3140E-03

1.6190E-02 2.7830E-02 5.8300E-02 5.0950E-02 7.5650E-03 2.4230E-02 2.2070E-02

1.4330E-02 1.5260E-02 2.4310E-01 5.1910E-02 1.0720E-02 1.7450E-02 3.3650E-02

3.6560E-02 1.2190E-01 2.7720E-02 1.3040E-02 2.8220E+00 1.1770E-01 5.2420E+00

1.1280E+00 4.3870E-03 3.7030E-03 6.1360E-03 7.7600E-03 7.6550E-05 1.4900E-03

2.4600E-03 2.9240E-03 2.8380E-05 1.6010E-03 4.8690E-03 7.9280E-03 9.3770E-03

2.2580E-01 7.1640E+00 7.0500E+00 2.0520E-02 6.1640E-03 1.7510E-02 1.5250E-02

5.0160E-03 4.8880E-03 5.7870E-03 5.3800E-03 7.9960E-03 4.5900E-03 5.1630E-03

5.4000E-03 2.1000E-03 7.5840E-03 6.9320E-03 4.3220E-03 5.8260E-04 1.6020E-03

1.9190E-03 2.0150E-03 3.8640E-04 2.9130E-03 3.3520E-03 2.8130E-03 5.7070E-03

1.4860E-01 3.0360E-02 6.8810E-03 5.5130E-03 5.9420E-03 5.7570E-03 4.6730E-03

9.8030E-03 5.8940E-03 2.7680E-03 7.7520E-03 5.4010E-03 3.7790E-02 3.6890E-02

8.4560E-04 1.7750E-03 4.3120E-03 5.9390E-03 2.3030E-02 3.9450E-03 4.7240E-02

1.0470E-02 4.5370E-03 2.5280E-03 7.5050E-03 6.2100E-03 3.6340E-04 1.9190E-03

1.9540E-03 1.4650E-03 7.1430E+00 4.3250E-01 7.4980E-02 2.6500E+00 6.5740E-01

9.5200E-02 1.4460E-02 2.7630E+00 8.3840E-01 2.1830E-01 2.9690E-02 5.4190E-01

3.0820E-01 7.0960E-02 1.5560E-02 1.6400E-01 7.1180E-02 2.6830E-02 7.6230E-03

9.8260E-04 1.5740E-01 7.1420E-02 2.7810E-02 9.0300E-03 2.0830E-03 2.5420E-04

1.0190E-01 3.6920E-02 5.2050E-03 1.4120E-01 4.1650E-02 1.0730E-02 2.0330E-03

1.6580E-01 5.6880E-02 1.5170E-02 2.6610E-03 4.4810E-02 1.6380E-02 2.0990E-03

8.0350E-01 1.7180E-01 8.3280E-02 1.6510E-02 9.0080E-02 1.4160E-02 1.6260E-03

7.1830E-03 1.1060E-02 6.3030E-03 9.1470E-04 2.4870E+01 6.8360E-01 2.7910E-02

7.3300E-04 3.8330E+01 2.8960E+00 6.9530E-02 1.6840E-03 5.4460E+01 3.6060E+00

1.0860E-01 3.2090E-03 1.8660E-02 4.7680E-03 9.4740E-04 1.2520E-04 3.9430E-02

6.7260E-03 5.6200E-04 7.2200E-05 5.0570E-02 1.5550E-02 3.3410E-03 2.2430E-04

8.9410E+00 2.1280E-01 9.3880E-03 4.5590E-03 1.3090E-01 3.8980E-02 9.1480E-03

1.2260E-03 8.8630E-01 9.7620E-02 1.8350E-02 3.8250E-03 2.7470E+00 2.2680E-01

2.3580E-02 3.2050E-03 8.1860E-03 8.4260E-04 4.0080E-05 2.7020E-02 5.8080E-03

7.3770E-04 5.5610E-05 4.1150E-02 6.8260E-03 1.9110E-03 2.3560E-04 3.8750E-02

9.0640E-03 7.6900E-04 1.1690E-04 6.8970E-01 1.8250E-02 2.9930E-03 5.9770E-04

3.4140E-03 3.4490E-03 1.8300E-03 4.2870E-04 3.1810E-02 6.4210E-03 1.4780E-03

2.0920E-05 4.5980E-02 9.5890E-03 1.8250E-03 2.2700E-04 9.5950E+00 4.8660E-01

9.1360E-01 1.3070E+00 6.1670E-01 1.0020E-01 9.0830E-01 1.6080E+00 8.1650E-01

2.3950E-01 4.6730E-01 4.6860E-01 2.2580E-01 5.7710E-02 7.7900E-02 7.6740E-02

4.6170E-02 2.4170E-02 1.0650E-02 6.1820E-02 6.6990E-02 5.1890E-02 3.0080E-02

1.3640E-02 4.0880E-03 5.9150E-02 3.9480E-02 2.4630E-02 6.6340E-02 6.3710E-02

2.8360E-02 9.1480E-03 7.1760E-02 7.5020E-02 4.3960E-02 1.5470E-02 2.9960E-02

1.5470E-02 9.4630E-03 2.4600E-01 5.9810E-01 2.6460E-01 8.3730E-02 4.5200E-02

3.6100E-02 8.0430E-03 6.1560E-03 8.5720E-03 3.2330E-03 3.7130E-03 2.1600E+00

1.8650E+01 8.3860E-01 2.7630E-02 2.6980E+00 4.5370E+01 3.5480E+00 8.1190E-02

2.2800E-01 5.2110E+01 4.7720E+00 1.2650E-01 8.1590E-03 8.4150E-03 3.3160E-03

8.8270E-04 1.2760E-02 1.7900E-02 6.1490E-03 6.7140E-04 1.9570E-02 2.0780E-02

1.2790E-02 4.1980E-03 6.0390E-01 6.5850E+00 2.5110E-01 9.2670E-03 5.1620E-02

6.0090E-02 3.3530E-02 1.0630E-02 1.1160E-01 6.4530E-01 8.8290E-02 1.8990E-02

2.3490E-01 2.1030E+00 2.6230E-01 2.5870E-02 3.9880E-03 3.3160E-03 5.0640E-04

9.2620E-03 8.0640E-03 4.8250E-03 7.4330E-04 9.5330E-03 1.5520E-02 6.6600E-03

2.0850E-03 1.7870E-02 2.1840E-02 7.6290E-03 6.3110E-04 7.2460E-02 5.0750E-01

1.8760E-02 3.2230E-03 2.9260E-03 2.6830E-03 1.2700E-03 9.6990E-04 8.1100E-03

1.9770E-02 2.1150E-03 1.4750E-03 1.4140E-02 2.5020E-02 1.1050E-02 1.9850E-03

8.2940E+00 2.2830E-01 8.5400E-01 8.6520E-01 4.9050E-01 2.6200E-01 9.0120E-01

1.1860E+00 7.1220E-01 1.9620E-01 3.8080E-01 3.0000E-01 1.5390E-01 3.2460E-02

5.1190E-02 5.5720E-02 3.9440E-02 1.8230E-02 1.8340E-02 4.5050E-02 4.7000E-02

3.9120E-02 2.7620E-02 1.4040E-02 2.9550E-02 3.9010E-02 3.4350E-02 2.8600E-02

4.9940E-02 4.3790E-02 1.9340E-02 2.6130E-02 5.6390E-02 5.2890E-02 3.6750E-02

1.7230E-02 1.6760E-02 1.1520E-02 8.6490E-02 2.7650E-01 6.1620E-01 2.1870E-01

2.1240E-02 3.5400E-02 1.8160E-02 5.1300E-03 5.7150E-03 3.8810E-03 3.3020E-03

1.0660E-01 2.7720E+00 1.4610E+01 6.4730E-01 3.1850E-02 3.4100E+00 2.3580E+01

2.7270E+00 8.0320E-03 7.0850E-01 4.7770E+01 3.8560E+00 3.0770E-03 6.4650E-03

6.1310E-03 2.3240E-03 4.0490E-03 1.3460E-02 9.6360E-03 4.3220E-03 6.1230E-03

1.5940E-02 1.2700E-02 1.0730E-02 3.2140E-02 7.6340E-01 5.1960E+00 1.9570E-01

1.8310E-02 4.1190E-02 4.2210E-02 2.8280E-02 2.4510E-02 1.1130E-01 5.1220E-01

7.5430E-02 2.3540E-02 2.5240E-01 1.6990E+00 2.0810E-01 1.7990E-03 3.2150E-03

1.6480E-03 3.4200E-03 9.8000E-03 7.1610E-03 3.4170E-03 4.1460E-03 9.4740E-03

1.3780E-02 5.4260E-03 5.0420E-03 1.3620E-02 1.4450E-02 5.3440E-03 4.9450E-03

7.9150E-02 4.0000E-01 1.5370E-02 2.4390E-03 1.7920E-03 1.3440E-03 9.4210E-04

4.8830E-03 9.6650E-03 1.3420E-02 1.5380E-03 4.1450E-03 1.6030E-02 1.7260E-02

8.9410E-03 4.2710E-02 2.6070E-01 7.2940E-01 9.3170E-01 4.4670E-02 3.1700E-01

8.2530E-01 1.3290E+00 7.0520E-02 2.1370E-01 3.1840E-01 2.3010E-01 8.3700E-03

3.2160E-02 4.4730E-02 4.4280E-02 2.7770E-02 2.9670E-03 1.6680E-02 3.3090E-02

4.1640E-02 3.6850E-02 2.1340E-02 1.0430E-02 3.5160E-02 3.6190E-02 9.5020E-03

3.0150E-02 4.1590E-02 3.0820E-02 6.5670E-03 2.7670E-02 5.0010E-02 5.3360E-02

8.1360E-03 1.7980E-02 1.0250E-02 3.8520E-02 1.5950E-01 3.4610E-01 5.6550E-01

8.4440E-03 2.4590E-02 2.6710E-02 4.1040E-03 3.2100E-03 5.6320E-03 1.7760E-03

1.5100E-02 1.2670E-01 2.6740E+00 2.1520E+01 1.6410E-03 8.1170E-02 2.6420E+00

2.1240E+01 1.5440E-03 2.1030E-02 1.0420E+00 4.3540E+01 8.7820E-04 3.4300E-03

5.4530E-03 4.2240E-03 8.3780E-04 5.3720E-03 1.1310E-02 9.2490E-03 1.4510E-03

7.0540E-03 1.4270E-02 1.6890E-02 3.7310E-03 4.1070E-02 5.9400E-01 4.0070E+00

3.7110E-03 2.0960E-02 3.9740E-02 4.1650E-02 5.2860E-03 2.6230E-02 9.4070E-02

4.8020E-01 3.1970E-03 2.5850E-02 2.3330E-01 1.5250E+00 5.4250E-04 2.1450E-03

2.5470E-03 7.1690E-04 3.9340E-03 8.7910E-03 6.4270E-03 7.3150E-04 4.7330E-03

8.1400E-03 1.4050E-02 1.1160E-03 6.8240E-03 1.1320E-02 1.1060E-02 8.0830E-04

5.7340E-03 6.4710E-02 3.4420E-01 1.9510E-03 1.0760E-03 1.5100E-03 6.4430E-04

1.2900E-03 5.3950E-03 8.1370E-03 9.7790E-03 7.1430E-04 3.9270E-03 1.3680E-02

1.6540E-02 5.0360E+00 2.8380E-01 7.3090E-02 1.2850E+00 5.1850E-01 1.5260E-01

3.8290E-02 1.4710E+00 5.9800E-01 1.6190E-01 3.5950E-02 9.9570E-02 4.9490E-02

2.4550E-02 1.2660E-02 5.6580E-03 1.4090E-01 8.2100E-02 4.7990E-02 2.5790E-02

1.2060E-02 4.3590E-03 9.2620E-02 4.7390E-02 1.2060E-02 5.8980E-01 7.5780E-02

2.3370E-02 8.0940E-03 3.3070E-01 8.8810E-02 2.9880E-02 1.0740E-02 8.4170E-02

3.7890E-02 7.1350E-03 6.0940E-01 3.6650E-01 1.1170E-01 3.6890E-02 1.2790E-01

6.4900E-02 3.0610E-02 7.7180E-02 8.4110E-02 4.1530E-02 1.7400E-02 1.1260E+01

9.7810E-01 6.0950E-02 6.1580E-03 1.3120E-01 6.7400E-02 1.7120E-02 2.4660E-03

1.7850E-01 6.9600E-02 2.1230E-02 2.6550E-03 2.7100E-01 2.5230E-02 1.5340E-02

7.7020E-03 2.2800E+01 5.8750E-01 2.7500E-02 7.2380E-04 2.8110E+01 3.1630E+00

1.5990E-01 1.0630E-03 3.0670E+01 2.9060E+00 1.5690E-01 6.9010E-03 1.3640E+00

1.9470E-01 1.2040E-02 1.8410E-03 1.5150E+00 1.8310E-01 2.0820E-02 4.1640E-03

6.0990E-02 2.9090E-02 1.0560E-02 2.1160E-03 3.9890E-02 1.2260E-02 2.2550E-03

9.4420E-01 5.1210E-02 7.5660E-03 2.1900E-03 4.7940E-01 7.1430E-02 1.1000E-02

2.6550E-03 1.1830E-01 1.7530E-02 4.6830E-03 1.3610E-03 2.1480E-01 4.4100E-02

7.2120E-03 1.9890E-03 1.1560E-02 8.0220E-03 4.7700E-03 1.8270E-03 4.0670E-02

1.1400E-02 6.3350E-03 1.3860E-03 1.7460E-01 6.4650E-02 1.1230E-02 5.1580E-03

6.0010E+00 2.8530E-01 4.2110E-01 6.4350E-01 4.3600E-01 1.6190E-01 6.9510E-01

6.6380E-01 4.0460E-01 1.4110E-01 4.5170E-02 4.8690E-02 3.4710E-02 1.8390E-02

6.9470E-03 6.7280E-02 6.6840E-02 4.7730E-02 3.2990E-02 2.2930E-02 1.2390E-02

5.7540E-02 3.2540E-02 3.1550E-02 1.3420E-01 3.4680E-01 5.5350E-02 1.5010E-02

8.8050E-02 1.8560E-01 6.9880E-02 2.6080E-02 5.4000E-02 2.7760E-02 2.1480E-02

3.6630E-01 3.0360E-01 2.8880E-01 1.0130E-01 8.7550E-02 6.6600E-02 2.6100E-02

6.1740E-02 5.4830E-02 3.6230E-02 1.8410E-02 2.6610E-01 8.4770E+00 1.3160E+00

7.8240E-02 5.2080E-02 9.0680E-02 6.3500E-02 1.9940E-02 4.0450E-02 1.8570E-01

1.1180E-01 2.4570E-02 4.6450E-02 1.7960E-01 1.5190E-02 5.7610E-03 3.1180E+00

1.4980E+01 4.4630E-01 1.4520E-02 3.1140E+00 1.7940E+01 3.7910E+00 1.7710E-01

5.7450E-01 2.2600E+01 4.3830E+00 1.9780E-01 1.8400E-01 8.6380E-01 2.1210E-01

1.0990E-02 4.8220E-02 1.0270E+00 1.9010E-01 2.2590E-02 2.3820E-02 2.4970E-02

2.1620E-02 1.1830E-02 2.0390E-02 1.5010E-02 6.2430E-03 1.8020E-01 5.5850E-01

4.1910E-02 5.6260E-03 6.9820E-02 2.8010E-01 7.3320E-02 1.1110E-02 2.4510E-02

6.3730E-02 1.2310E-02 4.3210E-03 1.7300E-02 1.4650E-01 4.2030E-02 7.6880E-03

9.2430E-03 5.9980E-03 3.3820E-03 2.1150E-03 1.2330E-02 1.8360E-02 1.0530E-02

3.9300E-03 3.7800E-02 1.2210E-01 7.3160E-02 8.9550E-03 4.5090E+00 1.0420E-01

3.6770E-01 4.3340E-01 3.6610E-01 2.6170E-01 5.0380E-01 3.8660E-01 2.5750E-01

2.1720E-02 3.1840E-02 2.9420E-02 2.1730E-02 1.1490E-02 3.2440E-02 3.4010E-02

4.4090E-02 3.9480E-02 2.5670E-02 1.1590E-02 2.8620E-02 3.2450E-02 3.0170E-02

3.8200E-02 1.2310E-01 2.1540E-01 3.2930E-02 2.9860E-02 6.9290E-02 1.2650E-01

5.2640E-02 2.9540E-02 2.8720E-02 1.9360E-02 1.1160E-01 2.8870E-01 2.8750E-01

2.2000E-01 6.0440E-02 4.9140E-02 2.5210E-02 4.6310E-02 3.6620E-02 3.1790E-02

1.7740E-02 1.0490E-02 3.2590E-01 6.2820E+00 1.0160E+00 6.4620E-03 4.9700E-02

5.9420E-02 5.3980E-02 3.2470E-03 6.7050E-02 1.2560E-01 9.3020E-02 2.0100E-02

5.6680E-02 1.1610E-01 5.4870E-03 2.4100E-01 3.7470E+00 9.6310E+00 3.0540E-01

1.8080E-01 4.4030E+00 1.1300E+01 2.9860E+00 8.6970E-03 7.0180E-01 1.6740E+01

3.3650E+00 9.3690E-03 2.0500E-01 5.8030E-01 1.6210E-01 9.4300E-03 4.5030E-02

1.0580E+00 1.6400E-01 6.1530E-03 1.7650E-02 1.8010E-02 1.9880E-02 1.0490E-02

1.3490E-02 8.5730E-03 2.5480E-02 1.6910E-01 3.6970E-01 2.5230E-02 1.0590E-02

7.1970E-02 1.6680E-01 5.6120E-02 7.2300E-03 2.2340E-02 3.9360E-02 7.6640E-03

4.5210E-03 1.4720E-02 1.1320E-01 3.4550E-02 6.9330E-03 3.8690E-03 2.8100E-03

1.5720E-03 8.0210E-03 1.0370E-02 1.3020E-02 4.2010E-03 6.3520E-03 3.8350E-02

8.8900E-02 5.4630E-02 2.2080E-02 1.0920E-01 2.9470E-01 4.1460E-01 8.4490E-02

2.6050E-01 3.6760E-01 2.4270E-01 1.1610E-02 1.4310E-02 1.9880E-02 1.9570E-02

1.2010E-02 1.0480E-02 2.5080E-02 2.7060E-02 2.6410E-02 2.2530E-02 1.3410E-02

1.0700E-02 2.9460E-02 2.0780E-02 1.4590E-02 3.2390E-02 9.0280E-02 1.3400E-01

1.0740E-02 2.6080E-02 5.2360E-02 9.5650E-02 1.3060E-02 2.6170E-02 1.2290E-02

3.6860E-02 1.0130E-01 2.2000E-01 2.4090E-01 3.8460E-02 2.9550E-02 2.2520E-02

3.0870E-02 2.2220E-02 2.3280E-02 1.2150E-02 2.8850E-03 1.4060E-02 2.5010E-01

4.8310E+00 4.9340E-04 7.2770E-03 3.9760E-02 6.6030E-02 1.6940E-04 3.5800E-03

5.1900E-02 1.3730E-01 1.2620E-02 1.0810E-02 3.3510E-02 6.7780E-02 1.8720E-02

3.4050E-01 2.8640E+00 8.9020E+00 1.0620E-03 1.7100E-01 3.3440E+00 9.5330E+00

2.9150E-03 8.9640E-03 5.2950E-01 1.2980E+01 1.8160E-03 1.0960E-02 1.6010E-01

4.6200E-01 3.1480E-03 9.3550E-03 3.5840E-02 8.9560E-01 6.1710E-04 6.7720E-03

1.5250E-02 1.8530E-02 4.6090E-03 9.4860E-03 7.9260E-03 4.6030E-03 2.5360E-02

1.2880E-01 2.3650E-01 2.5440E-03 1.1070E-02 5.5230E-02 1.3520E-01 2.3040E-03

8.8280E-03 1.8940E-02 2.2610E-02 1.1120E-03 4.3770E-03 1.1710E-02 9.3460E-02

4.6220E-03 2.3640E-03 2.2700E-03 1.1060E-03 3.3210E-03 4.4630E-03 5.6690E-03

5.3160E-03 2.6420E-03 8.2500E-03 3.4180E-02 7.6440E-02 5.3080E+00 2.4520E-01

4.2090E-02 1.3860E+00 3.7190E-01 1.2270E-01 3.4470E-02 1.0840E-01 4.8380E-02

1.8760E-02 6.6270E-03 1.7370E-03 1.4160E-01 7.8000E-02 3.8250E-02 1.5940E-02

5.1530E-03 1.0850E-03 6.5150E-02 1.4400E-02 3.8840E-03 1.4350E-01 5.0090E-02

1.5590E-02 3.1330E-03 8.3330E-01 6.0330E-02 1.7750E-02 5.6730E-03 6.4860E-02

1.3980E-02 3.9620E-03 9.2310E-01 2.9450E-01 6.5440E-02 2.1170E-02 1.0090E-01

3.1120E-02 4.8180E-03 4.7940E-03 2.5930E-02 4.5090E-03 1.9620E-03 2.4660E+00

2.3120E-01 2.0040E-02 3.0190E-03 4.5300E+00 3.7910E-01 3.9270E-02 5.7340E-03

9.3770E-02 8.8420E-02 2.9210E-02 5.3760E-03 1.9350E-02 1.2530E-02 3.3200E-03

5.2520E-04 5.0670E-02 1.3140E-02 4.2310E-03 3.1690E-04 1.2250E+00 3.7790E-02

5.8040E-03 1.6690E-03 6.0480E-01 8.0850E-02 1.2530E-02 2.2010E-03 2.6330E+01

5.5770E-01 2.3850E-02 8.5910E-04 3.4320E+01 2.8860E+00 1.2600E-01 6.5130E-04

4.9230E+01 3.2120E+00 1.4600E-01 1.5420E-02 3.1870E-02 5.7100E-03 2.1520E-03

7.2070E-02 2.4010E-02 1.1100E-02 2.6130E-03 2.4770E+00 8.6400E-02 1.3020E-02

4.9900E-03 5.3740E-02 1.1160E-02 2.5180E-03 3.8310E-04 3.1350E-01 4.0420E-02

4.4130E-03 7.1550E-04 3.9740E-03 1.9480E-02 5.9310E-03 1.4920E-03 2.5000E-02

6.3740E-03 2.8850E-03 6.6720E-04 2.1460E-01 2.9940E-02 4.1770E-03 5.4840E-04

7.3950E+00 2.6410E-01 5.6520E-01 7.8790E-01 2.4920E-01 8.5840E-02 4.8680E-02

5.2510E-02 3.1620E-02 1.6420E-02 7.0080E-03 6.8010E-02 5.7840E-02 4.6660E-02

3.2510E-02 1.9170E-02 8.5560E-03 2.9210E-02 3.0950E-02 9.3340E-03 6.8890E-02

6.5220E-02 3.1450E-02 1.2410E-02 1.1650E-01 5.8130E-01 4.8610E-02 1.5860E-02

3.2940E-02 2.7900E-02 7.1060E-03 3.5040E-01 4.6770E-01 2.4500E-01 5.8170E-02

6.0190E-02 4.7130E-02 1.7610E-02 3.9940E-03 1.4950E-02 1.2510E-02 2.5990E-03

2.0360E-01 1.6910E+00 2.6330E-01 2.3630E-02 1.6510E-01 3.6090E+00 4.5870E-01

4.4070E-02 7.3430E-02 1.0210E-01 6.8240E-02 3.2180E-02 1.5630E-02 7.2730E-03

5.6800E-03 2.6380E-03 1.9670E-02 2.1130E-02 1.0260E-02 3.0380E-03 1.4140E-01

8.8280E-01 3.5060E-02 5.7470E-03 8.0720E-02 4.1010E-01 7.7690E-02 1.3570E-02

2.4910E+00 1.9090E+01 6.4280E-01 3.1670E-02 2.8620E+00 2.4530E+01 3.5800E+00

1.2200E-01 3.7430E-01 4.0350E+01 4.1660E+00 1.7300E-01 1.5770E-02 1.4240E-02

3.0910E-03 3.2050E-02 3.2430E-02 1.4100E-02 6.4070E-03 2.3430E-01 1.6100E+00

8.2680E-02 1.1350E-02 2.0480E-02 2.5600E-02 8.5660E-03 2.2400E-03 4.0010E-02

2.0810E-01 4.3750E-02 8.3190E-03 3.3120E-03 1.2090E-02 7.6200E-03 2.3600E-03

9.3150E-03 1.1480E-02 6.0850E-03 2.7300E-03 3.9650E-02 1.3570E-01 1.9690E-02

4.3160E-03 5.7420E+00 2.3260E-01 4.6780E-01 5.0400E-01 1.5990E-01 1.9870E-02

3.2260E-02 3.6020E-02 2.5690E-02 1.1760E-02 2.5270E-02 4.1200E-02 4.1710E-02

3.6420E-02 2.7370E-02 1.4800E-02 1.2070E-02 2.4940E-02 1.8580E-02 3.0540E-02

4.7750E-02 4.3120E-02 2.0090E-02 2.6300E-02 1.1250E-01 4.2930E-01 3.7990E-02

1.6840E-02 2.4790E-02 1.3460E-02 9.5410E-02 2.9450E-01 3.0030E-01 1.8300E-01

2.9890E-02 4.6190E-02 2.3290E-02 3.1960E-03 5.2000E-03 1.0470E-02 5.2210E-03

2.1700E-02 2.6320E-01 1.2740E+00 2.0890E-01 2.0760E-02 1.7760E-01 2.8610E+00

3.2630E-01 2.0090E-02 5.5150E-02 8.3710E-02 6.7550E-02 6.5110E-03 6.9960E-03

6.6440E-03 3.6180E-03 9.3920E-03 1.7130E-02 1.4570E-02 7.8380E-03 1.1230E-02

1.5440E-01 6.5490E-01 2.6940E-02 1.2500E-02 7.7680E-02 3.1200E-01 6.4400E-02

1.5260E-01 3.0980E+00 1.4060E+01 4.8330E-01 1.0930E-01 3.5640E+00 1.8500E+01

2.7370E+00 4.1400E-03 1.4620E+00 3.2090E+01 3.2080E+00 7.8190E-03 1.2310E-02

6.2200E-03 1.8930E-02 2.0370E-02 1.8110E-02 8.6760E-03 2.5000E-02 2.8420E-01

1.3270E+00 6.3800E-02 6.2510E-03 1.5280E-02 1.6740E-02 5.4920E-03 4.3170E-03

4.3700E-02 1.5510E-01 3.4050E-02 2.6490E-03 4.5800E-03 7.3110E-03 3.5320E-03

7.2380E-03 7.1470E-03 6.4960E-03 4.0400E-03 6.5070E-03 3.9750E-02 9.8590E-02

1.7040E-02 9.7920E-02 2.3020E-01 3.6210E-01 3.4390E-01 6.3810E-03 1.7930E-02

2.6040E-02 2.5900E-02 1.6530E-02 5.1490E-03 2.2510E-02 3.3480E-02 3.5100E-02

2.8230E-02 1.5500E-02 4.8190E-03 1.3090E-02 2.3750E-02 1.2020E-02 3.0030E-02

3.7150E-02 2.7300E-02 8.2240E-03 2.6030E-02 9.2600E-02 3.3180E-01 8.4190E-03

1.6420E-02 1.6600E-02 3.0920E-02 9.3570E-02 2.4900E-01 2.9130E-01 1.4250E-02

3.2050E-02 2.9240E-02 2.3970E-03 3.2400E-03 5.5590E-03 6.4970E-03 2.9230E-03

2.5480E-02 2.0870E-01 1.1100E+00 3.4380E-03 2.2590E-02 1.4560E-01 2.4070E+00

1.2030E-03 2.2200E-02 5.3640E-02 8.5050E-02 2.1950E-03 6.2180E-03 5.4720E-03

3.7420E-03 2.5710E-03 1.0390E-02 1.3940E-02 1.0040E-02 2.7570E-03 1.1380E-02

1.2170E-01 5.0300E-01 2.1980E-03 1.3560E-02 6.4400E-02 2.6790E-01 1.2790E-02

1.8420E-01 2.3800E+00 1.0880E+01 6.4890E-04 1.2010E-01 2.7430E+00 1.5840E+01

5.1740E-04 5.0490E-03 1.1430E+00 2.6660E+01 4.0170E-03 7.0370E-03 8.5020E-03

7.0950E-03 1.4320E-02 1.5280E-02 1.2300E-02 7.1070E-03 2.6680E-02 2.2010E-01

1.0210E+00 2.2270E-03 6.7100E-03 1.2230E-02 1.0600E-02 7.0420E-04 4.7890E-03

3.4030E-02 1.3590E-01 1.9870E-03 3.1720E-03 4.8920E-03 3.3620E-03 2.5590E-03

3.6140E-03 6.9540E-03 5.1180E-03 1.0310E-03 7.1730E-03 3.2640E-02 7.9890E-02

3.2100E+00 3.3330E-01 1.2920E-01 5.4430E-02 3.7210E-02 2.2310E-02 1.2380E-02

5.5330E-03 6.0350E-02 4.3910E-02 3.1810E-02 2.3030E-02 1.5570E-02 7.9910E-03

4.9850E-02 2.7790E-02 1.7030E-02 1.6190E+00 1.1120E+00 2.3010E-01 7.6940E-02

1.0020E+00 8.7490E-02 3.7100E-01 1.0150E-01 1.9830E+00 2.6080E-01 6.5220E-02

5.1120E-01 2.9020E-01 1.5160E-01 7.2790E-02 5.3690E-01 3.2890E-01 3.6410E-02

1.9430E-02 2.6970E-01 2.9010E-02 1.4170E-02 7.2100E-02 3.1010E-02 1.0010E-02

2.2900E-03 6.7640E-02 2.7830E-02 9.4190E-03 2.6500E-03 6.0680E-02 2.3160E-02

7.9240E-03 1.7230E-03 3.2970E-02 1.7740E-02 9.3390E-03 4.3870E-03 3.1030E+00

5.8140E-01 3.1580E-02 7.3980E-03 2.7430E+00 3.8890E-01 3.8580E-02 7.0920E-03

6.7090E-02 3.5630E-02 1.4930E-02 5.2770E-03 3.5410E+00 4.9880E-01 4.5950E-02

1.0480E-02 8.4110E-02 3.3970E-02 1.4700E-02 5.1100E-03 1.0030E-01 4.6570E-02

2.2320E-02 1.0110E-02 1.5830E+01 1.8860E-01 8.2680E-03 2.0660E+01 3.7580E+00

1.1510E-01 7.2820E-03 3.9020E+01 3.9720E+00 3.1110E-01 1.8740E-02 2.0580E-01

5.6740E-02 1.1260E-02 2.2220E-03 2.6190E-02 1.4300E-02 6.7750E-03 2.6460E-03

2.7670E-02 2.0960E-01 1.8100E-02 8.6110E-03 5.1360E-02 2.6820E-02 1.0180E-02

2.7870E-03 1.8650E-01 3.4650E-02 7.5150E-03 1.3070E-03 3.5610E+00 1.8990E-01

3.2810E-02 2.3640E-02 2.1330E-02 1.4650E-02 6.3740E-03 3.5980E-02 3.3580E-02

2.9860E-02 2.1340E-02 1.1850E-02 4.7390E-03 2.9390E-02 2.7100E-02 1.4570E-02

2.2170E-01 1.0610E+00 5.7930E-02 1.6970E-01 4.9220E-01 8.5050E-02 6.4960E-02

3.4710E-02 2.7070E-01 8.5970E-01 9.3840E-02 2.5130E-01 2.2850E-01 1.7320E-01

1.1570E-01 3.7920E-01 7.9800E-02 2.0860E-01 1.4570E-02 7.7810E-02 1.1100E-01

9.4610E-03 2.0770E-02 2.8870E-02 2.5240E-02 1.1610E-02 1.4020E-02 3.1890E-02

2.2960E-02 1.0310E-02 1.1030E-02 2.5100E-02 1.9870E-02 9.4450E-03 1.6210E-02

1.8770E-02 1.0390E-02 3.8560E-03 5.7040E-01 1.5330E+00 6.5810E-01 2.8010E-02

6.2800E-02 1.8380E+00 4.5470E-01 4.5800E-02 2.6350E-02 2.8380E-02 2.4540E-02

1.5640E-02 7.4520E-02 2.4260E+00 5.9910E-01 5.4690E-02 2.1840E-02 4.6600E-02

2.6150E-02 1.4520E-02 3.5010E-02 5.3600E-02 3.1970E-02 2.1830E-02 3.7470E+00

8.1390E+00 1.3240E-01 3.7400E+00 1.0190E+01 4.2960E+00 1.3260E-01 5.4200E-01

1.9500E+01 4.8520E+00 4.1430E-01 5.6410E-02 9.0410E-02 4.7960E-02 1.0930E-02

1.1140E-02 1.0010E-02 9.9630E-03 6.4570E-03 2.0750E-02 4.3190E-02 1.0990E-01

7.0390E-03 2.6720E-02 1.9360E-02 1.5610E-02 9.1720E-03 9.5030E-03 1.1840E-01

3.3250E-02 6.4230E-03 2.4530E+00 1.5630E-02 1.9740E-02 1.2960E-02 1.0620E-02

7.1710E-03 2.1520E-02 2.4290E-02 1.6670E-02 1.2230E-02 1.0010E-02 6.1930E-03

1.7530E-02 1.6840E-02 1.2950E-02 1.3650E-01 2.8880E-01 6.0140E-01 3.3290E-02

1.3390E-01 5.1090E-02 5.7250E-02 4.3250E-02 1.0710E-01 1.9560E-01 3.1890E-01

1.1290E-01 1.4370E-01 1.4030E-01 1.1500E-01 1.6900E-01 1.7610E-01 1.0290E-01

9.7160E-03 2.6130E-02 7.3290E-02 5.3560E-02 3.4180E-03 1.7740E-02 1.6830E-02

2.0640E-02 2.7510E-03 9.4970E-03 2.0410E-02 1.9250E-02 1.1940E-03 9.2830E-03

1.5100E-02 1.7200E-02 9.1630E-03 9.2190E-03 1.0250E-02 4.6690E-03 2.2710E-02

6.5520E-01 7.2210E-01 4.6150E-01 1.2630E-02 6.2840E-02 1.1910E+00 3.4710E-01

7.2710E-03 1.7770E-02 1.7680E-02 1.9820E-02 1.4790E-02 7.6680E-02 1.5710E+00

4.5130E-01 7.5050E-03 1.2880E-02 2.8190E-02 2.0210E-02 1.1070E-02 1.4950E-02

3.6800E-02 2.6960E-02 4.9450E-01 4.2390E+00 3.2940E+00 1.0750E-01 4.2910E+00

4.8230E+00 3.0300E+00 1.6180E-02 6.2260E-01 1.2500E+01 3.7200E+00 1.1310E-02

4.7890E-02 4.9080E-02 3.0370E-02 3.5230E-03 8.3300E-03 7.5000E-03 7.3460E-03

1.3830E-02 1.6360E-02 5.3200E-02 4.1780E-02 1.0150E-02 1.4220E-02 1.3450E-02

7.2780E-03 2.8740E-03 5.5100E-03 7.7720E-02 2.4840E-02 6.6530E-03 7.4920E-03

9.3140E-03 6.4840E-03 2.5600E-03 1.2490E-02 7.2410E-03 8.8630E-03 8.3920E-03

5.8430E-03 2.7410E-03 8.4600E-03 7.2100E-03 7.9410E-03 6.3840E-02 1.4620E-01

3.0560E-01 2.4420E-02 4.8890E-02 1.0930E-01 2.8450E-02 3.1620E-02 4.1800E-02

7.5050E-02 1.2220E-01 3.9950E-02 6.8630E-02 8.1280E-02 6.8570E-02 4.4730E-02

1.5970E-01 1.6830E-02 4.8580E-03 1.0570E-02 1.4040E-02 5.0150E-02 3.0910E-04

3.1290E-03 1.2320E-02 1.3620E-02 3.4960E-04 2.3830E-03 6.6040E-03 1.6060E-02

1.2240E-05 1.2930E-03 6.4170E-03 1.4840E-02 4.3490E-03 3.8100E-03 3.7820E-03

3.7390E-03 6.5450E-03 2.6430E-02 4.6030E-01 4.3980E-01 2.8100E-03 1.0820E-02

4.0800E-02 7.4920E-01 1.1250E-03 6.6250E-03 1.1930E-02 1.1620E-02 3.0740E-03

1.2760E-02 5.1620E-02 9.9000E-01 1.5670E-03 5.5020E-03 8.6430E-03 2.0110E-02

2.3160E-03 9.7900E-03 9.7590E-03 2.4480E-02 1.6410E-02 7.7220E-01 3.2200E+00

6.3630E-03 1.4640E-01 3.0290E+00 2.9410E+00 6.9420E-03 9.2420E-03 4.3040E-01

7.9560E+00 2.2080E-03 1.0910E-02 3.0350E-02 2.4150E-02 6.4510E-04 3.1030E-03

5.2490E-03 4.0130E-03 6.9160E-03 6.4360E-03 9.0150E-03 3.8590E-02 2.5980E-03

9.1590E-03 9.5010E-03 6.4830E-03 4.9740E-04 2.6580E-03 3.4650E-03 4.7440E-02

3.5050E+00 8.7730E-01 1.4890E-01 6.4220E-02 8.1020E+00 3.5760E+00 1.0220E+00

1.9840E-01 3.4160E-02 7.7960E-03 3.0870E+00 1.3060E+00 4.6290E-02 2.3120E+00

3.3360E-01 6.6140E-02 7.7970E-03 1.5130E+00 4.8630E-01 8.0900E-02 6.1550E-03

4.7120E-01 1.2830E-01 7.0520E-03 3.0970E-02 2.0530E-02 9.4280E-03 3.3670E-03

1.4390E-02 1.1630E-02 6.3330E-03 5.4420E-02 1.1890E-01 6.6170E-03 2.0150E-03

2.1370E-01 1.9350E-01 9.0800E-02 2.0910E-02 1.8900E-01 9.1990E-02 2.7350E-02

4.2760E-03 1.2500E-01 3.9440E-02 8.8110E-03 1.0130E-03 1.1870E-01 3.5850E-02

6.2120E-03 9.9710E-05 1.0750E-01 5.5500E-02 4.8690E-02 3.1650E-02 2.0350E-01

4.8470E-02 1.2170E-02 2.3660E-03 4.4190E-02 1.4440E-02 3.8720E-03 1.0720E-03

8.4200E-02 7.5130E-02 4.4340E-02 1.4450E-02 1.9000E-01 4.2520E-02 6.9420E-03

6.6540E-04 3.4660E-02 1.4760E-02 4.2930E-03 9.4330E-04 4.9930E-02 4.2230E-02

7.8710E-03 5.5350E-02 2.5220E-02 1.5210E-02 7.0600E-03 4.8620E-02 2.3180E-02

8.0550E-03 2.1140E-03 7.0210E-02 7.2430E-02 3.6480E-02 8.4630E-03 4.6420E-02

2.5960E-02 9.0160E-03 1.8860E-03 3.5310E-02 2.2580E-02 1.0400E-02 6.2100E-03

2.0110E-02 1.0260E-02 5.3540E-03 2.5790E-03 3.1230E-02 1.5410E-02 5.8400E-03

1.4480E-03 2.9140E+00 1.2590E+00 8.9530E-02 2.7170E+00 2.6320E+00 3.1890E+00

1.5520E+00 3.6410E-01 5.0680E-02 1.7490E+00 9.1830E-01 8.7150E-01 6.9750E-01

1.1810E+00 2.3530E-01 5.9920E-02 5.5880E-01 6.0280E-01 4.1930E-01 8.7190E-02

2.5650E-01 1.5460E-01 7.4150E-02 2.1250E-02 1.3100E-02 9.9350E-03 8.0240E-03

1.3200E-02 9.0920E-03 4.4320E-03 4.3530E-02 4.7810E-02 5.0670E-02 3.2640E-03

1.8560E-01 5.4110E-02 9.8480E-02 8.9700E-02 8.3340E-02 6.5980E-02 7.2050E-02

2.8770E-02 2.9620E-02 6.8970E-02 3.1700E-02 9.2890E-03 5.0020E-02 4.1380E-02

2.5230E-02 6.5730E-03 7.5340E-02 8.3410E-02 3.6910E-02 9.6090E-03 5.9800E-02

1.0410E-01 3.8100E-02 1.1290E-02 1.4140E-02 2.0820E-02 1.1740E-02 3.8260E-03

7.4300E-02 3.4350E-02 2.8140E-02 3.7660E-02 4.2850E-02 1.0150E-01 4.0240E-02

7.5400E-03 1.3240E-02 1.3970E-02 1.1840E-02 4.4890E-03 4.1900E-02 1.6740E-02

1.7860E-02 3.0880E-02 2.8680E-02 1.6460E-02 5.6050E-03 2.4760E-02 2.1480E-02

1.5220E-02 7.3180E-03 7.2440E-02 2.3810E-02 2.5940E-02 2.7880E-02 2.5160E-02

1.4660E-02 1.7790E-02 9.0330E-03 2.8250E-02 1.5040E-02 1.2580E-02 3.7380E-03

1.2060E-02 9.7080E-03 6.3640E-03 2.1580E-03 1.6360E-02 1.2050E-02 9.1460E-03

5.4520E-03 1.5380E+00 1.0710E+00 1.9790E-01 2.8880E+00 9.7150E-01 1.9390E+00

1.5360E+00 4.0290E-01 7.9310E-01 9.1420E-01 9.6100E-01 1.9390E-01 6.3590E-01

6.5830E-01 1.4090E-01 1.4280E-01 4.6520E-01 3.5340E-01 2.8920E-01 1.2160E-01

1.4770E-01 9.4650E-02 1.1030E-02 1.0080E-02 1.0360E-02 8.1230E-03 1.0480E-02

6.4910E-03 2.7840E-03 3.2650E-02 1.6910E-02 4.1630E-02 1.7610E-02 8.9400E-02

8.3010E-02 5.3880E-02 9.3320E-02 2.2970E-02 6.2350E-02 4.4570E-02 5.7730E-02

3.4800E-03 2.6880E-02 4.6460E-02 2.7470E-02 1.7890E-02 3.4320E-02 2.5000E-02

1.5480E-02 5.2670E-02 5.9890E-02 3.3820E-02 8.9300E-03 1.6790E-02 5.2600E-02

6.4060E-02 2.6470E-02 3.8480E-03 1.1980E-02 1.3440E-02 8.6670E-03 4.7440E-02

2.6000E-02 3.2670E-02 2.4580E-02 6.6590E-03 4.5010E-02 6.4150E-02 2.8310E-02

3.5110E-03 1.0440E-02 9.3630E-03 9.3430E-03 3.2280E-02 1.8430E-02 1.2760E-02

1.8370E-02 2.1490E-02 1.3770E-02 7.1390E-03 1.0190E-02 1.5560E-02 1.2270E-02

1.1160E-02 4.9560E-02 2.1380E-02 2.6880E-02 1.4920E-02 9.1790E-03 1.5940E-02

1.0430E-02 1.4430E-02 2.1190E-02 1.0550E-02 9.1920E-03 3.8090E-03 7.3160E-03

7.7070E-03 5.0100E-03 2.8670E-03 7.1520E-03 9.5290E-03 8.5940E-03 7.0420E-03

1.0380E+00 3.7290E-02 2.0420E-01 2.2190E+00 7.6350E-01 8.9130E-01 1.2100E+00

2.2890E-01 8.2020E-01 7.2720E-01 5.0340E-02 2.2650E-01 4.8930E-01 3.1920E-01

1.9740E-02 2.0060E-01 2.9580E-01 3.1640E-01 4.7150E-02 1.1410E-01 8.1340E-02

4.6450E-03 8.2400E-03 8.2450E-03 5.9450E-03 7.2360E-03 4.1180E-03 1.8700E-03

2.1770E-02 5.1720E-03 2.1280E-02 2.6590E-02 2.6920E-02 7.5960E-02 5.6860E-02

4.6550E-02 3.0260E-03 3.0430E-02 3.9580E-02 5.2040E-02 1.4260E-04 5.7960E-03

2.5300E-02 3.6250E-02 4.5590E-03 1.9630E-02 2.3420E-02 1.6230E-02 4.2180E-02

2.2040E-02 2.1950E-02 1.3770E-02 4.7510E-03 1.8010E-02 4.2440E-02 4.1410E-02

8.6850E-04 4.4550E-03 9.1780E-03 1.2010E-02 2.1490E-02 2.9520E-02 2.4110E-02

1.2040E-02 5.9260E-04 1.0130E-02 3.8520E-02 4.6840E-02 6.5920E-04 4.5370E-03

7.2260E-03 9.4920E-03 1.6510E-02 1.6100E-02 5.8940E-03 1.1200E-02 1.1530E-02

1.0730E-02 6.9740E-03 3.3850E-03 9.4730E-03 1.0430E-02 9.5010E-03 2.4560E-02

2.9020E-02 1.7010E-02 5.6900E-03 2.2190E-03 9.7640E-03 1.0190E-02 1.1150E-02

1.4120E-02 7.0110E-03 5.0390E-03 3.5980E-03 4.3470E-03 4.5960E-03 3.8340E-03

2.4060E-03 2.4160E-03 6.2090E-03 6.9810E-03 5.9400E-03 6.7860E-03 3.9400E-02

1.4530E-01 1.2490E+00 9.8880E-01 2.3860E-01 1.8510E-02 4.9750E-01 3.7770E-01

1.0510E-02 6.7110E-02 1.7930E-01 2.8550E-01 1.1200E-03 3.3350E-02 1.8900E-01

1.9230E-01 1.3360E-02 6.1870E-02 4.6080E-02 1.4900E-03 4.2450E-03 3.8070E-03

2.8050E-03 3.7400E-03 1.8170E-03 9.0260E-04 1.0890E-02 1.5980E-03 7.0540E-03

1.8520E-02 3.3560E-03 3.8830E-02 5.1270E-02 1.3490E-02 9.6630E-05 5.0760E-03

2.9650E-02 2.7740E-02 1.8380E-05 1.9630E-04 5.7760E-03 2.7830E-02 5.6090E-04

7.4410E-03 1.4050E-02 8.2640E-03 2.4150E-02 5.6530E-03 1.0700E-02 9.5580E-03

9.6370E-04 5.3260E-03 1.1650E-02 3.2300E-02 1.8220E-04 1.0440E-03 3.9640E-03

7.8960E-03 6.2190E-03 2.1860E-02 1.0940E-02 4.6720E-03 3.3530E-05 9.5600E-04

1.0290E-02 3.6750E-02 3.2670E-05 1.0200E-03 4.3870E-03 5.6680E-03 6.6290E-03

1.0390E-02 1.8490E-03 5.5960E-03 4.7680E-03 6.2250E-03 4.1580E-03 1.2170E-03

3.7530E-03 6.7380E-03 5.6620E-03 8.3330E-03 2.2350E-02 8.1430E-03 7.0260E-04

3.2310E-04 3.0810E-03 8.1110E-03 5.1450E-03 7.0620E-03 3.5840E-03 2.0090E-03

2.2440E-03 2.0750E-03 1.8500E-03 2.3280E-03 1.3120E-03 5.6400E-04 2.9280E-03

4.0400E-03 3.2440E-03 3.8150E+00 4.0500E-01 3.0180E-02 7.5610E-03 1.9230E-03

9.3480E+00 1.6860E-01 8.1420E-02 1.4180E+00 3.3590E-01 1.4990E-02 2.4470E-03

2.0550E+00 3.2100E-01 2.7130E-02 2.4420E-03 1.4120E+00 1.4430E-02 1.0350E-02

2.8340E-02 1.5580E-02 6.1210E-03 1.4760E-03 9.7720E-03 5.5810E-03 2.8750E-03

7.3160E-03 4.4440E-02 8.0230E-03 1.2560E-03 1.3280E-01 2.8010E-02 4.6950E-03

5.8120E-04 1.8800E-01 5.4670E-02 1.1110E-02 1.1000E-03 5.7460E-01 1.7880E-01

3.2440E-02 3.2620E-03 1.4110E-01 1.8040E-02 9.9520E-04 6.6760E-05 5.0110E-02

2.4510E-02 9.0840E-03 1.4540E-03 7.1340E-02 5.3870E-02 2.4100E-02 4.1630E-03

2.9760E-01 8.3650E-02 1.8580E-02 3.1240E-03 1.1040E-01 4.8270E-02 1.4640E-02

1.7970E-03 1.1290E-01 7.3680E-02 2.4400E-02 3.4200E-03 4.3720E-01 1.0210E-01

2.1340E-02 2.2580E-03 3.8330E-02 3.9910E-02 3.4560E-02 6.4690E-02 4.4090E-02

1.9170E-02 3.2710E-03 2.1790E-01 5.4370E-02 7.2910E-03 1.3040E-03 4.1290E-02

1.4450E-02 5.8440E-03 1.2440E-03 8.8870E-02 3.7180E-02 9.3980E-03 2.1220E-03

4.0630E-02 4.3240E-02 1.9260E-02 6.6200E-04 7.0110E-02 2.9180E-02 6.3270E-03

6.2260E-04 6.8630E-02 4.3740E-02 1.2350E-02 1.4000E-03 4.6650E+00 7.0450E-01

4.3790E-02 7.1640E-03 3.8050E+00 4.1370E+00 9.4900E-02 6.7350E-01 5.2010E-01

2.7120E-01 1.1290E-02 1.1100E+00 2.1210E+00 2.7950E-01 2.4960E-02 6.6720E-01

5.2500E-01 5.4250E-03 1.8220E-02 1.1040E-02 8.3960E-03 4.7070E-03 7.2930E-03

5.1680E-03 2.3100E-03 6.0970E-03 2.2360E-02 1.5770E-02 3.8520E-03 4.6510E-02

6.5720E-02 2.3700E-02 4.3320E-03 6.6310E-02 7.1920E-02 4.4530E-02 1.0430E-02

2.0730E-01 2.6440E-01 1.5500E-01 3.0570E-02 5.6290E-02 6.2290E-02 1.4110E-02

8.0210E-04 3.3060E-02 2.0450E-02 1.0940E-02 6.8720E-03 5.5220E-02 2.3500E-02

2.3980E-02 2.0920E-02 1.1650E-01 1.4210E-01 5.9870E-02 1.7020E-02 6.2460E-02

4.0790E-02 2.9850E-02 1.3080E-02 7.7760E-02 3.2880E-02 4.6000E-02 2.2340E-02

1.3100E-01 1.7330E-01 8.2520E-02 2.0000E-02 3.7600E-02 3.9520E-02 1.3710E-02

5.0820E-02 2.6720E-02 1.7520E-02 1.4190E-02 8.9950E-02 9.4810E-02 4.3260E-02

6.3060E-03 2.2870E-02 1.8310E-02 7.0400E-03 4.0630E-03 4.4540E-02 3.3870E-02

2.7130E-02 8.5250E-03 3.3860E-02 3.0700E-02 1.2130E-02 9.6790E-03 4.2080E-02

2.3880E-02 1.7390E-02 5.1820E-03 4.8670E-02 1.8180E-02 2.7050E-02 1.1190E-02

4.1350E+00 7.6360E-01 3.9260E-02 1.3060E+00 3.8420E+00 1.3200E+00 2.7230E-01

4.8710E-01 2.8540E-01 1.3570E-01 2.5000E-01 1.2650E+00 1.1540E+00 1.5900E-01

2.8450E-01 5.3080E-01 1.4310E-01 1.0350E-02 9.4260E-03 8.1480E-03 6.5770E-03

5.8940E-03 4.2050E-03 2.0320E-03 4.8770E-03 1.2060E-02 1.5570E-02 6.3810E-03

1.2730E-02 4.2590E-02 4.0520E-02 1.4680E-02 2.1480E-02 6.3700E-02 5.1950E-02

2.9930E-02 5.7660E-02 1.8650E-01 1.8050E-01 1.0110E-01 1.9690E-02 4.8800E-02

3.1180E-02 7.2200E-03 1.9860E-02 1.5860E-02 1.4210E-02 6.9180E-03 3.6030E-02

2.1730E-02 1.9580E-02 2.2200E-02 4.2120E-02 9.5510E-02 9.0410E-02 4.2710E-02

2.9910E-02 3.5990E-02 2.9120E-02 2.1640E-02 3.9660E-02 3.8390E-02 2.8100E-02

3.6830E-02 3.9810E-02 1.1610E-01 1.1380E-01 5.5830E-02 3.9460E-02 2.8050E-02

6.3880E-03 3.4730E-02 2.0070E-02 2.0480E-02 1.2190E-02 3.2250E-02 7.3490E-02

5.6610E-02 2.5990E-02 1.2550E-02 1.4030E-02 1.0810E-02 4.2730E-03 1.8460E-02

3.0070E-02 2.3720E-02 1.9020E-02 2.7090E-02 1.9340E-02 1.2030E-02 1.0680E-02

2.2040E-02 2.2760E-02 1.5960E-02 1.0110E-02 2.5880E-02 2.2650E-02 1.5840E-02

1.9700E-02 3.0800E+00 5.8560E-01 3.6180E-01 2.2230E+00 2.2900E+00 8.9400E-02

3.2000E-01 2.7630E-01 1.9640E-01 4.3360E-02 4.3270E-01 1.0810E+00 5.5790E-01

1.0730E-01 3.5790E-01 2.5360E-01 4.2670E-03 7.5370E-03 7.2270E-03 6.0200E-03

4.2240E-03 3.0850E-03 1.6310E-03 3.6580E-03 6.4210E-03 1.2010E-02 8.1140E-03

3.0260E-03 1.8600E-02 3.4980E-02 2.6880E-02 4.9870E-03 2.8810E-02 4.2320E-02

4.6300E-02 9.6510E-03 8.8710E-02 1.4350E-01 1.5250E-01 5.7780E-03 2.6120E-02

3.2360E-02 1.5910E-02 1.0470E-02 1.3400E-02 1.3060E-02 5.9580E-03 1.8450E-02

2.1460E-02 1.7590E-02 1.5370E-02 1.1620E-02 4.7180E-02 7.8580E-02 6.3670E-02

1.2530E-02 2.6570E-02 2.5540E-02 2.3210E-02 1.5300E-02 3.4620E-02 2.4060E-02

3.3250E-02 9.4970E-03 5.3350E-02 9.4360E-02 8.7150E-02 3.6370E-02 1.5200E-02

4.5880E-03 2.0240E-02 1.9190E-02 1.7860E-02 8.3190E-03 8.1630E-03 4.0270E-02

5.0820E-02 4.0380E-02 6.5420E-03 9.5560E-03 1.0290E-02 4.8490E-03 6.0800E-03

2.0020E-02 2.0010E-02 2.2340E-02 2.0310E-02 1.0590E-02 1.2740E-02 8.3030E-03

9.8960E-03 1.8400E-02 1.4530E-02 1.0320E-02 1.0680E-02 2.1630E-02 1.3430E-02

1.7320E-02 2.0190E+00 8.9050E-02 8.1760E-01 2.3540E+00 2.2570E-02 1.4950E-01

2.4220E-01 1.7370E-01 6.7460E-03 8.8580E-02 5.2110E-01 7.9230E-01 3.5020E-02

1.8200E-01 2.6220E-01 2.0290E-03 5.2420E-03 5.6160E-03 3.7900E-03 2.9530E-03

2.1480E-03 1.1650E-03 2.4390E-03 3.0780E-03 6.7940E-03 7.1610E-03 5.9290E-04

5.2780E-03 1.9100E-02 3.0290E-02 6.1280E-04 9.9170E-03 3.0190E-02 4.3910E-02

3.7330E-05 2.4580E-02 8.7330E-02 1.5080E-01 1.3250E-03 1.0300E-02 2.2740E-02

1.9090E-02 4.7290E-03 9.8740E-03 8.6650E-03 4.7900E-03 7.0390E-03 1.8840E-02

1.5040E-02 7.6460E-03 2.9270E-03 1.6890E-02 4.6650E-02 6.5690E-02 4.0910E-03

1.6000E-02 2.0840E-02 1.8110E-02 4.0350E-03 2.0960E-02 2.5890E-02 2.0610E-02

1.4270E-03 1.7440E-02 6.6220E-02 8.9360E-02 2.7740E-02 6.0570E-03 3.7540E-03

9.7280E-03 1.7200E-02 1.1580E-02 5.2380E-03 2.1570E-03 1.5740E-02 3.5220E-02

4.0610E-02 3.2450E-03 6.1490E-03 6.9040E-03 4.7010E-03 2.4210E-03 9.2880E-03

1.6420E-02 1.8400E-02 1.3540E-02 4.8900E-03 1.1010E-02 5.1190E-03 3.6600E-03

1.1880E-02 1.2530E-02 7.3560E-03 3.2170E-03 1.3970E-02 1.5020E-02 9.8480E-03

2.7870E-02 1.3860E-01 1.4670E+00 4.0290E-03 4.5210E-02 1.4690E-01 9.7870E-02

1.0140E-03 1.3250E-02 1.1320E-01 5.7640E-01 9.3680E-03 6.6520E-02 1.6370E-01

6.1480E-04 2.1600E-03 3.1180E-03 2.1250E-03 1.4320E-03 9.9960E-04 6.0580E-04

1.2200E-03 1.1520E-03 3.6340E-03 2.5110E-03 9.7480E-05 1.0670E-03 6.3210E-03

1.9830E-02 7.3020E-06 1.4880E-03 1.3060E-02 2.4320E-02 4.0820E-06 7.4440E-05

3.8230E-02 9.2910E-02 2.4210E-04 2.7930E-03 1.0780E-02 1.2940E-02 1.6350E-03

5.4830E-03 3.5310E-03 2.7730E-03 1.7350E-03 1.0910E-02 9.1020E-03 2.5240E-03

4.9540E-04 5.7320E-03 1.8590E-02 4.1800E-02 7.4870E-04 6.9020E-03 1.1910E-02

9.3740E-03 4.8110E-04 8.2270E-03 1.8390E-02 8.7980E-03 1.5140E-05 3.4700E-03

2.1530E-02 5.6370E-02 1.5020E-02 1.4540E-03 2.3070E-03 3.5120E-03 1.0510E-02

5.2390E-03 2.6140E-03 5.4330E-04 3.2820E-03 1.7330E-02 2.5230E-02 1.2110E-03

3.1190E-03 3.1680E-03 3.5480E-03 2.6190E-04 2.6720E-03 9.7860E-03 1.0080E-02

6.7720E-03 1.7300E-03 6.4470E-03 2.3300E-03 1.0150E-03 5.5160E-03 7.6110E-03

3.5740E-03 5.8300E-04 5.9360E-03 1.0890E-02 3.6070E-03 9.9850E-01 2.4310E-01

5.6230E-01 2.5870E-01 8.7170E-02 1.6580E-02 1.7550E+00 5.8320E-01 1.5440E-01

3.8090E-02 1.7680E+00 7.6530E-02 2.3170E-02 2.1490E-02 1.4450E-02 7.6470E-03

3.0160E-03 1.1530E-02 1.0230E-02 5.2000E-03 3.9730E-02 7.5460E-02 5.4600E-02

2.7510E-02 1.7800E-01 9.7950E-02 4.5720E-02 1.4130E-02 2.3860E-01 9.8440E-02

3.2100E-02 6.6170E-03 1.4650E-03 1.4290E-03 9.9280E-04 4.1470E-04 2.1860E-02

9.5730E-03 3.5510E-03 8.9330E-04 7.5310E-02 2.1920E-02 5.7420E-03 1.2770E-03

3.8080E-02 3.4340E-02 3.0900E-02 2.4030E-02 8.0900E-02 7.4210E-02 4.5150E-02

1.6870E-02 1.3180E-01 5.7950E-02 2.8320E-02 1.0380E-02 7.8370E-02 5.7240E-02

3.1550E-02 1.1180E-02 7.3840E-03 3.5200E-03 1.4860E-03 3.5720E-04 6.0720E-02

2.8660E-02 1.1270E-02 1.2790E-01 7.4500E-02 2.7870E-02 5.0620E-03 3.9960E-02

4.2870E-02 4.4810E-02 3.8400E-02 1.6460E-02 6.2390E-03 2.2080E-03 7.1010E-04

1.2000E-02 9.1040E-03 5.5610E-03 4.3780E-03 2.2580E-02 2.9380E-02 3.1180E-02

1.9520E-02 3.9720E-02 4.6790E-02 3.8940E-02 2.1590E-02 6.2210E-02 5.1980E-02

3.2860E-02 1.6330E-02 8.0100E-01 2.2560E-01 2.0060E-01 1.6730E-01 9.7320E-02

2.3900E-01 8.7780E-01 5.8780E-01 1.9150E-01 2.8450E-01 1.0730E+00 4.3790E-02

1.2510E-02 7.3260E-03 7.6450E-03 7.5100E-03 1.1050E-02 5.5020E-03 3.6650E-03

2.9800E-02 6.0330E-02 3.8610E-02 1.9480E-02 6.4110E-02 6.7820E-02 6.4500E-02

5.5550E-02 2.8930E-02 1.1250E-01 9.5570E-02 4.4990E-02 1.2300E-03 3.3570E-04

7.8030E-04 1.0900E-03 8.3150E-03 6.7330E-03 6.6740E-03 3.2710E-03 1.5010E-02

3.8350E-02 2.0270E-02 6.0060E-03 3.3740E-02 3.1930E-02 2.0240E-02 9.3720E-03

7.0010E-02 1.4390E-02 2.7540E-02 5.0900E-02 3.6530E-02 8.7820E-02 4.6910E-02

2.1520E-02 4.7690E-02 2.3470E-02 2.7550E-02 3.6490E-02 1.5360E-03 3.4500E-03

2.9960E-03 1.7480E-03 3.9650E-02 2.7230E-02 1.3830E-02 7.0210E-02 2.9130E-02

4.1070E-02 3.1710E-02 4.3950E-02 4.7140E-02 2.6190E-02 7.3890E-03 5.0180E-03

7.7040E-03 4.7170E-03 1.7740E-03 7.7660E-03 4.2000E-03 4.5900E-03 5.4280E-03

1.6940E-02 3.2990E-02 1.9300E-02 7.7660E-03 5.0240E-02 3.1490E-02 1.9170E-02

9.3180E-03 4.9560E-02 2.2450E-02 2.4400E-02 2.6290E-02 4.3950E-02 1.6310E-01

1.6000E-01 9.3180E-02 3.9630E-02 1.6570E-01 4.7540E-01 5.8190E-01 4.8690E-02

2.5180E-01 6.3350E-01 3.4360E-03 8.2420E-03 6.5460E-03 4.5160E-03 7.7380E-03

4.4870E-03 1.1620E-03 1.9870E-02 4.0610E-02 2.5380E-02 1.1110E-02 9.0800E-03

4.3570E-02 5.8020E-02 5.6760E-02 1.4280E-03 1.9780E-02 6.4560E-02 1.0210E-01

2.7770E-04 8.0830E-04 7.5200E-04 3.3530E-04 2.2240E-03 5.7030E-03 6.2450E-03

3.0040E-03 3.2180E-03 1.0410E-02 2.1110E-02 1.6930E-02 3.0580E-02 1.5410E-02

1.0120E-02 7.4660E-03 1.1930E-02 4.7100E-02 3.5870E-02 1.3660E-02 1.3110E-02

2.2580E-02 3.7210E-02 3.9430E-02 7.6910E-03 3.2180E-02 3.0070E-02 1.9220E-02

1.5170E-04 9.4040E-04 2.1360E-03 2.9460E-03 1.8140E-02 2.2140E-02 1.2640E-02

1.3700E-02 5.0830E-02 3.6980E-02 1.6180E-02 4.9340E-02 1.7020E-02 8.9880E-03

9.4720E-03 1.5780E-03 3.3490E-03 4.6030E-03 3.2810E-03 2.3490E-03 5.0200E-03

4.5050E-03 2.9260E-03 1.1290E-02 2.7720E-02 9.5740E-03 2.7560E-03 4.2510E-02

2.1000E-02 8.0470E-03 2.1080E-03 1.9520E-02 3.0760E-02 2.1520E-02 9.9720E-03

1.7050E+00 3.2780E-01 4.2720E-02 6.3140E+00 2.2560E+00 4.6260E-01 7.0410E-02

2.0950E+00 9.4770E-01 3.5470E-02 1.9910E-01 1.6030E-01 5.7300E-02 1.9240E-02

4.7420E-02 1.6830E-02 6.2600E-03 5.4340E-02 1.0430E-01 3.4830E-02 4.4620E-03

1.5620E-01 6.5730E-02 2.4760E-02 6.4440E-03 6.0860E-02 3.2120E-02 1.3650E-02

3.6920E-03 5.2650E-02 1.9780E-02 6.0010E-03 2.0190E-03 2.6320E-01 7.5840E-02

1.4540E-02 1.5440E-03 1.8340E-01 4.7520E-02 1.8520E-02 7.9200E-03 1.8220E-01

5.9720E-02 1.7790E-02 4.2760E-03 8.9650E-02 3.3650E-02 1.0140E-02 2.6310E-03

1.6500E-01 6.0630E-02 1.9330E-02 5.6220E-03 6.4820E-02 2.6790E-02 8.0130E-03

1.6580E-03 3.2390E-02 1.4590E-02 5.0570E-03 1.0930E-03 5.6720E-02 2.5710E-02

2.5710E-03 5.5780E-02 2.6000E-02 1.2290E-02 4.5990E-03 4.2260E-02 1.5370E-02

5.6060E-03 1.7090E-03 2.9820E-02 1.9530E-02 9.2800E-03 2.2840E-03 1.5230E-02

7.6900E-03 2.2780E-03 9.5120E-04 1.4200E-02 8.1330E-03 4.2900E-03 1.4180E-03

1.1440E-02 5.4970E-03 3.6760E-03 1.5800E-03 1.4510E-02 6.1100E-03 2.0140E-03

4.5970E-04 1.4120E+00 3.5060E-01 1.6790E+00 2.4660E+00 2.1860E+00 5.5500E-01

1.2090E+00 4.4350E-01 6.6490E-01 8.5120E-02 4.0250E-02 2.9550E-02 5.4950E-02

2.4400E-02 2.2180E-02 7.3270E-03 4.0680E-02 4.9940E-02 3.3960E-02 2.3340E-02

4.7700E-02 7.1140E-02 4.9740E-02 2.7580E-02 2.2040E-02 2.3280E-02 2.2010E-02

1.4690E-02 7.9400E-03 2.6410E-02 1.9640E-02 7.2740E-03 7.4720E-02 1.0840E-01

6.1500E-02 1.6170E-02 4.7120E-02 1.0020E-01 3.3120E-02 9.6340E-03 4.3120E-02

8.6820E-02 5.0020E-02 1.8870E-02 1.9230E-02 4.9880E-02 2.7700E-02 1.1770E-02

4.4740E-02 7.9820E-02 4.7920E-02 1.9680E-02 1.5300E-02 2.9230E-02 2.2750E-02

9.6840E-03 8.7720E-03 1.3250E-02 1.2220E-02 5.7720E-03 3.4150E-02 1.1570E-02

1.7920E-02 2.5970E-02 3.0010E-02 1.4010E-02 8.5570E-03 1.1830E-02 1.9690E-02

1.2410E-02 6.6810E-03 1.9530E-02 1.0630E-02 7.7180E-03 6.8210E-03 5.4440E-03

6.0620E-03 5.8320E-03 2.9810E-03 1.0650E-02 5.2070E-03 3.0510E-03 2.1220E-03

5.4950E-03 5.2090E-03 3.3800E-03 1.9260E-03 4.8540E-03 5.8030E-03 4.4760E-03

2.2000E-03 9.2820E-01 1.0620E-01 1.7360E+00 1.0890E+00 1.6840E+00 4.4150E-01

6.7440E-01 4.3550E-01 2.7900E-02 7.7990E-02 2.5650E-02 1.9360E-02 1.1250E-02

1.4130E-02 8.6490E-03 2.7090E-02 1.9940E-02 3.1470E-02 2.1180E-02 1.0480E-02

3.0010E-02 4.8140E-02 4.0210E-02 4.6580E-03 1.4620E-02 1.6350E-02 1.9250E-02

6.3810E-04 6.9130E-03 1.6720E-02 1.5540E-02 1.4160E-02 6.1210E-02 5.8070E-02

3.9660E-02 1.8390E-02 3.7000E-02 5.3750E-02 1.8300E-02 9.1280E-03 3.3920E-02

5.2500E-02 3.7680E-02 3.0420E-03 1.4670E-02 2.9920E-02 2.2020E-02 1.0580E-02

3.4000E-02 4.8110E-02 3.5650E-02 2.2020E-03 1.2190E-02 1.6410E-02 1.8560E-02

5.7550E-04 7.4940E-03 7.3700E-03 1.0270E-02 1.3500E-02 1.7860E-02 1.1550E-02

1.2280E-02 1.4000E-02 1.6530E-02 6.5330E-03 3.3900E-03 7.9630E-03 1.1070E-02

8.3670E-03 9.2790E-03 7.7170E-03 9.4100E-03 3.3340E-03 1.2140E-03 4.1070E-03

3.4610E-03 4.4600E-03 7.0970E-03 2.8060E-03 2.5980E-03 1.5180E-03 3.6750E-03

3.3770E-03 2.6660E-03 1.6770E-03 1.0940E-03 3.5140E-03 3.5780E-03 3.3730E-03

2.5150E-02 8.7850E-02 1.2000E+00 9.9500E-01 7.7580E-02 5.4560E-01 1.6150E-01

9.7730E-03 2.0640E-02 1.3340E-02 1.3110E-02 4.6750E-03 6.1270E-03 6.3450E-03

1.3540E-02 5.0860E-03 1.8540E-02 9.7610E-03 9.1450E-04 1.0690E-02 2.0490E-02

3.1860E-02 7.0260E-05 4.9120E-03 1.0560E-02 1.1790E-02 1.0110E-04 1.2010E-03

4.8970E-03 1.5810E-02 1.5440E-03 1.5880E-02 3.9530E-02 2.9290E-02 7.9200E-03

9.4640E-03 1.8360E-02 2.6590E-02 1.7810E-03 7.9740E-03 2.2480E-02 3.3110E-02

6.2450E-04 2.5890E-03 9.9460E-03 2.2540E-02 2.4340E-03 9.0110E-03 2.2520E-02

3.0440E-02 1.9260E-04 2.2470E-03 7.9500E-03 1.3070E-02 7.6820E-05 5.3490E-04

5.2260E-03 6.9040E-03 3.0350E-03 1.4280E-02 3.6450E-03 4.5980E-03 8.5510E-03

6.5280E-03 6.1270E-03 7.3310E-04 2.9000E-03 5.9200E-03 7.5220E-03 2.2850E-03

6.8210E-03 3.3340E-03 1.9930E-03 3.7720E-04 9.8430E-04 2.7550E-03 2.9990E-03

3.5480E-03 1.1530E-03 1.5970E-03 7.0970E-04 1.5800E-03 1.9250E-03 1.6770E-03

1.0330E-03 1.2840E-04 1.0820E-03 2.3240E-03 2.2310E-03 2.2870E+00 2.6900E-01

3.1220E-02 7.7530E+00 2.4020E-01 1.1160E-01 2.4460E-01 1.1270E-01 3.4880E-02

1.5240E-02 3.2500E-02 1.5580E-02 3.7890E-03 3.3230E-03 2.9540E-02 6.0670E-03

1.3500E-03 8.3350E-02 3.3900E-02 1.1520E-02 2.0960E-03 5.4950E-02 2.4270E-02

1.0400E-02 2.5770E-03 7.1310E-02 2.9460E-02 9.9240E-03 1.7440E-03 1.4420E-01

4.2670E-02 5.9480E-03 8.7250E-04 1.3580E-01 4.8670E-02 1.0040E-02 1.6840E-03

4.1920E-02 1.7830E-02 7.4360E-03 2.0820E-03 8.0210E-02 3.2950E-02 1.2160E-02

1.7330E-03 1.8420E-01 4.9270E-02 1.2810E-02 1.9470E-03 8.5100E-02 2.4560E-02

6.4830E-03 1.3060E-03 1.7820E-01 5.3680E-02 1.4880E-02 2.8350E-03 8.7400E-02

2.1780E-02 1.2650E-02 3.7040E-02 1.9570E-02 7.4000E-03 1.5410E-03 5.5190E-02

1.9690E-02 6.3520E-03 1.7640E-03 1.6930E-02 6.8560E-03 2.1140E-03 4.1040E-04

2.1770E-02 1.1500E-02 3.4120E-03 9.8130E-04 1.5170E-02 1.7860E-02 6.1270E-03

2.1060E-03 2.0150E-02 9.6600E-03 3.3440E-03 6.2120E-04 2.6630E-02 1.2690E-02

5.1950E-03 1.9860E-03 2.4420E+00 3.1120E-01 2.6350E+00 3.7230E+00 1.0450E-01

6.7630E-02 1.7880E-01 1.0580E-01 2.8980E-02 2.1690E-02 1.1250E-02 8.4260E-03

2.6580E-03 1.3760E-02 1.2980E-02 3.1610E-03 3.1200E-02 3.9260E-02 2.4910E-02

1.2680E-02 1.9340E-02 2.7590E-02 1.5900E-02 1.1260E-02 2.0910E-02 3.4520E-02

2.3990E-02 1.1310E-02 5.4200E-02 5.1070E-02 3.9610E-02 5.0930E-03 5.8850E-02

5.2700E-02 3.6350E-02 9.3300E-03 1.7810E-02 1.9110E-02 1.0850E-02 6.7570E-03

2.7830E-02 3.6200E-02 2.7390E-02 1.2580E-02 4.9130E-02 9.8060E-02 3.8000E-02

1.3940E-02 1.9390E-02 4.7650E-02 2.0950E-02 7.1430E-03 3.7210E-02 8.4760E-02

4.7630E-02 1.6660E-02 4.2720E-02 4.7100E-02 7.5570E-03 2.2120E-02 1.4000E-02

1.0050E-02 6.3090E-03 1.9680E-02 2.6180E-02 1.5000E-02 6.0150E-03 8.2020E-03

6.4550E-03 4.0210E-03 1.8830E-03 1.0050E-02 8.8510E-03 8.5050E-03 3.6220E-03

1.2130E-02 9.9670E-03 7.9660E-03 2.7860E-03 1.1130E-02 7.5050E-03 5.2180E-03

2.9470E-03 1.2660E-02 1.0390E-02 6.6670E-03 5.1330E-03 1.8990E+00 7.4150E-01

2.6620E+00 1.4630E+00 3.1170E-02 5.4940E-02 1.3870E-01 7.9250E-02 1.2620E-02

1.1580E-02 7.1750E-03 1.9940E-03 6.1220E-03 1.0140E-02 6.0260E-03 7.7770E-03

1.9380E-02 2.8010E-02 2.1810E-02 6.8990E-03 1.1590E-02 2.2130E-02 1.5180E-02

3.8950E-03 1.6500E-02 2.4960E-02 2.2010E-02 1.5020E-02 4.8840E-02 2.4930E-02

2.6840E-02 1.9260E-02 4.4700E-02 2.9990E-02 2.3800E-02 7.4330E-03 1.0830E-02

1.4430E-02 8.9630E-03 8.5840E-03 2.2830E-02 2.3730E-02 2.2710E-02 1.2790E-02

3.7890E-02 6.8110E-02 3.0370E-02 4.3250E-03 1.5580E-02 3.3580E-02 1.7560E-02

6.9490E-03 3.2300E-02 6.0100E-02 4.1780E-02 2.4870E-02 3.2150E-02 1.6150E-02

1.0320E-02 1.1630E-02 1.0860E-02 5.8260E-03 6.3520E-03 1.5000E-02 1.7100E-02

1.1490E-02 3.3280E-03 4.9440E-03 4.5460E-03 2.4900E-03 2.4650E-03 7.3070E-03

6.1990E-03 7.4010E-03 9.1010E-03 5.7030E-03 6.3750E-03 3.6470E-03 4.9930E-03

6.6870E-03 5.5790E-03 3.1520E-03 5.1920E-03 6.6600E-03 7.8400E-03 5.1240E-03

1.9680E-01 9.3450E-01 2.0830E+00 1.4420E-02 2.7640E-02 5.0620E-02 2.5870E-02

5.9880E-03 9.8790E-03 4.4970E-03 1.3290E-03 2.3530E-03 5.7070E-03 6.6480E-03

1.0470E-03 8.4170E-03 1.7690E-02 2.4720E-02 8.6820E-04 7.3480E-03 1.0610E-02

1.8290E-02 2.1060E-04 4.4090E-03 1.4280E-02 2.6050E-02 2.9480E-03 1.7090E-02

3.7220E-02 2.0020E-02 4.8370E-03 2.0510E-02 3.3360E-02 1.9980E-02 2.0820E-03

6.7550E-03 8.4340E-03 9.3440E-03 9.1360E-04 8.3990E-03 1.8750E-02 2.4050E-02

1.9460E-03 1.3930E-02 3.0310E-02 5.2000E-02 8.1990E-04 4.5990E-03 1.2720E-02

2.8830E-02 1.0310E-03 7.4090E-03 2.6330E-02 6.0570E-02 1.4860E-02 1.2890E-02

2.0530E-02 3.5020E-03 9.8810E-03 8.0200E-03 4.4760E-03 1.7660E-03 6.0150E-03

1.1490E-02 1.3800E-02 1.0060E-03 3.3010E-03 3.5700E-03 2.1500E-03 5.7030E-04

2.5250E-03 6.1200E-03 5.7040E-03 6.0670E-03 2.9520E-03 3.9130E-03 3.4990E-03

1.5990E-03 4.8320E-03 4.7270E-03 2.5370E-03 1.9860E-03 5.1320E-03 5.1210E-03

4.9300E-03 3.0670E-01 8.3470E-02 4.4200E-02 2.6140E-02 1.4330E-02 7.4620E-03

1.5780E-01 7.5640E-02 7.6540E-03 1.3930E-02 2.7350E-02 1.2380E-02 6.2330E-03

2.2200E-02 1.3100E-02 6.8670E-03 2.7340E-03 1.1810E-02 6.8530E-03 4.6860E-03

1.6410E-03 6.2170E-03 4.0440E-03 2.3320E-03 5.1010E-04 3.3920E-02 1.6820E-02

7.7630E-03 2.6930E-03 6.4290E-02 4.0900E-02 1.6950E-02 3.4140E-03 1.9810E-02

1.6570E-02 1.0760E-02 6.9110E-03 3.4230E-02 2.2970E-02 1.3080E-02 5.6540E-03

1.0730E-01 4.1510E-02 1.4080E-02 4.6110E-03 2.8490E-02 1.9080E-02 1.0890E-02

6.7100E-03 7.8300E-03 3.8530E-03 1.7540E-03 5.6520E-04 1.2190E-01 2.3510E-02

7.0950E-03 8.3550E-02 3.2470E-02 1.1510E-02 3.5820E-03 8.3720E-02 4.1780E-02

2.1130E-02 1.0870E-02 3.8050E-02 1.7650E-02 6.7140E-03 1.3830E-03 8.1810E-03

6.0760E-03 3.7870E-03 1.9580E-03 2.7040E-02 2.1550E-02 1.1570E-02 6.6820E-03

1.2660E-02 1.0690E-02 7.3920E-03 3.3310E-03 1.3160E-02 8.8870E-03 5.2570E-03

2.6750E-03 1.8110E-01 1.6670E-02 1.8350E-02 1.5770E-02 1.0830E-02 7.4370E-02

2.6100E-02 5.9870E-02 9.2720E-03 1.2340E-02 1.1510E-02 5.1940E-03 7.6240E-03

1.2900E-02 7.9910E-03 7.5750E-03 2.7050E-03 4.3880E-03 4.5210E-03 3.9500E-03

1.9130E-03 6.3440E-04 2.3990E-03 2.5500E-03 1.1660E-02 1.2220E-02 1.0220E-02

5.8150E-03 3.3810E-02 1.1230E-02 2.0520E-02 1.7650E-02 1.2120E-02 1.0710E-02

8.0610E-03 4.6200E-03 1.5260E-02 9.6520E-03 1.1530E-02 1.4040E-02 9.1790E-03

4.9960E-02 3.7420E-02 1.5510E-02 1.1910E-02 1.1350E-02 1.0790E-02 9.7750E-03

8.5260E-04 3.2490E-03 3.1070E-03 2.0620E-03 2.3510E-02 6.2680E-02 1.4900E-02

1.7330E-02 3.6600E-02 2.4140E-02 9.7550E-03 1.9220E-02 4.2140E-02 3.0800E-02

1.4310E-02 1.3080E-02 7.5780E-03 1.1740E-02 7.3400E-03 4.3750E-03 2.5770E-03

2.9310E-03 3.4380E-03 1.8020E-02 1.1570E-02 1.4900E-02 2.7970E-03 9.9350E-03

6.2370E-03 4.3790E-03 2.4190E-03 5.7310E-03 4.8600E-03 4.6440E-03 5.0000E-03

5.2060E-03 8.2270E-03 9.3430E-03 8.3080E-03 7.6320E-03 5.9310E-02 1.2650E-02

4.6440E-03 6.1920E-03 5.1920E-03 3.9970E-03 6.3660E-04 4.0140E-03 5.2000E-03

8.2860E-03 9.1350E-05 1.6070E-03 2.7150E-03 3.1560E-03 1.2040E-04 1.1070E-03

1.5850E-03 1.6850E-03 2.9470E-03 7.5320E-03 6.7910E-03 4.3370E-03 1.9720E-03

2.2200E-02 1.3000E-02 3.4950E-03 6.0710E-03 4.8270E-03 3.8920E-03 2.4210E-03

1.1430E-03 9.0630E-03 8.9610E-03 5.6720E-03 2.6240E-03 4.7320E-03 2.0930E-02

2.6960E-02 2.9720E-03 5.8670E-03 6.7050E-03 5.6760E-03 6.0710E-05 4.9060E-04

1.5760E-03 2.4120E-03 7.0910E-03 1.4900E-02 2.7980E-02 4.0320E-03 9.8650E-03

1.6800E-02 1.2620E-02 8.4020E-03 8.1790E-03 1.6270E-02 2.0020E-02 9.8220E-04

8.8860E-03 6.2490E-03 2.5760E-03 7.2180E-04 2.4490E-03 2.1630E-03 1.2680E-03

9.0170E-03 6.6750E-03 2.7960E-03 4.1030E-03 4.2960E-03 3.7500E-03 2.0240E-03

1.1810E-03 1.7610E-03 3.0500E-03 2.7260E-03 1.8970E-03 3.7530E+00 3.8830E-01

1.1300E-01 1.6790E+00 2.4210E-01 5.9290E-02 1.8610E-02 2.5660E-02 1.0770E-02

2.0810E-03 1.5310E+00 1.5470E-01 1.8790E-02 2.7650E-03 1.0910E-01 2.9810E-02

8.5770E-03 1.1780E-03 1.1970E-01 3.8930E-02 1.3880E-02 1.2550E-03 1.6510E-01

3.1490E-02 1.0530E-02 3.5890E-03 3.1680E-01 3.9630E-02 1.2360E-02 3.0810E-03

4.3490E-01 7.3530E-02 1.1910E-02 2.6150E-03 4.6500E-01 6.7480E-02 1.4370E-02

2.5080E-03 9.5350E-01 1.2660E-01 1.4800E-02 3.1950E-03 1.2590E+00 1.7300E-01

2.9460E-02 5.2110E-03 1.0110E-01 4.2880E-02 1.2020E-02 2.1950E-03 3.0870E-02

9.3470E-03 1.4910E-03 4.6270E-02 1.3140E-02 4.1630E-03 1.2760E-03 1.2450E-01

3.0600E-02 1.1190E-02 3.1690E-03 1.5810E+01 3.5850E-01 4.8390E-02 2.5170E-02

3.0120E+01 3.6810E+00 3.2990E-01 6.0150E-02 5.1120E-02 5.1520E-02 2.4710E-02

3.0820E-03 6.0430E+00 1.7640E-01 9.5920E-03 4.9340E-03 1.8220E+01 2.3370E+00

1.1040E-01 1.8990E-02 4.1830E+00 3.7010E-01 7.1650E-01 7.3270E-01 1.2790E-01

1.4890E-02 1.6250E-02 9.0050E-03 5.2150E-03 4.8510E-02 1.1410E+00 1.7810E-01

2.1310E-02 1.8820E-02 5.9530E-02 2.7830E-02 9.9540E-03 4.0880E-02 6.3810E-02

4.8880E-02 1.6230E-02 3.8420E-02 8.7320E-02 1.9220E-02 6.0000E-03 6.7230E-02

1.7920E-01 2.6430E-02 9.9600E-03 6.8930E-02 2.5660E-01 7.0590E-02 1.2260E-02

3.6970E-02 2.5210E-01 7.0170E-02 1.7960E-02 1.2430E-01 6.0600E-01 1.4070E-01

1.5900E-02 6.1480E-02 9.2620E-01 1.8490E-01 3.3830E-02 3.2690E-02 4.7930E-02

3.5730E-02 1.3640E-02 1.5880E-02 1.1360E-02 5.2200E-03 1.7340E-02 2.6730E-02

1.0430E-02 2.7940E-03 3.0280E-02 6.7440E-02 2.3630E-02 1.1080E-02 2.9180E+00

1.0350E+01 3.1510E-01 2.5840E-02 1.0740E+00 2.2120E+01 4.3240E+00 3.7950E-01

4.0890E-02 3.4270E-02 1.4860E-02 1.8720E-02 8.9210E-01 3.9170E+00 1.6050E-01

7.4390E-03 2.2940E+00 1.1490E+01 2.7350E+00 1.4120E-01 3.1550E+00 2.7360E-01

5.6700E-01 3.3340E-01 1.1170E-02 8.7180E-03 8.8010E-03 5.3300E-03 8.9100E-03

4.3890E-02 8.5060E-01 1.3980E-01 3.7060E-03 1.5740E-02 4.3840E-02 2.3950E-02

1.6360E-03 3.0290E-02 4.5770E-02 4.1790E-02 1.3870E-02 2.8900E-02 5.9860E-02

1.1830E-02 2.0140E-02 5.8560E-02 1.1640E-01 1.6480E-02 1.1910E-02 6.2640E-02

1.7490E-01 4.9050E-02 8.1050E-03 3.4360E-02 2.0430E-01 5.8180E-02 1.4260E-02

1.4070E-01 4.9680E-01 1.0730E-01 1.3040E-02 7.2430E-02 7.2010E-01 1.4960E-01

6.1610E-03 2.7590E-02 3.2950E-02 3.1510E-02 7.8480E-03 1.0480E-02 7.2250E-03

6.6250E-03 1.2860E-02 1.7450E-02 6.2610E-03 1.1040E-02 2.3560E-02 4.9910E-02

1.8460E-02 2.5250E-01 3.0010E+00 6.6380E+00 2.0970E-01 1.1720E-01 1.3350E+00

1.6130E+01 3.3540E+00 3.0680E-02 1.8300E-02 1.7230E-02 1.6960E-02 8.5900E-02

1.0340E+00 2.4900E+00 1.1310E-01 9.1920E-02 2.7280E+00 7.6330E+00 2.0710E+00

1.0660E-01 2.8140E-01 3.9380E-01 7.4500E-03 3.8370E-03 6.7510E-03 4.2320E-03

1.4160E-03 9.6750E-03 3.3030E-02 6.4890E-01 1.7940E-04 4.2240E-03 1.3180E-02

4.1890E-02 8.0390E-05 1.8490E-03 2.4140E-02 4.7250E-02 6.3340E-03 1.1200E-02

2.1520E-02 3.3400E-02 6.3990E-03 1.9660E-02 4.5540E-02 7.2260E-02 2.6130E-03

1.2260E-02 5.2740E-02 1.3670E-01 1.2010E-03 8.9840E-03 2.6850E-02 1.9610E-01

3.0730E-03 1.5660E-02 1.0530E-01 3.2440E-01 2.9030E-03 1.4610E-02 5.7940E-02

5.7250E-01 6.0020E-04 6.8000E-03 2.2330E-02 3.4200E-02 2.8270E-03 7.5430E-03

6.1870E-03 2.4860E-03 5.7360E-03 9.4930E-03 8.4260E-03 3.1760E-03 1.1030E-02

1.8410E-02 3.3030E-02 4.4440E-02 2.9150E-01 2.2750E+00 3.9800E+00 3.4190E-02

1.2760E-01 1.0290E+00 1.2770E+01 2.0440E-02 7.4850E-03 2.3360E-02 6.8210E-03

9.3090E-03 1.0610E-01 7.9080E-01 1.6940E+00 1.3370E-02 1.3650E-01 2.0680E+00

6.1110E+00 1.2880E+00 1.5990E-01 9.0400E-01 8.6370E-01 3.8640E-01 1.0200E-02

3.0000E-02 1.7050E-02 8.8260E-03 4.4810E-03 9.5190E-03 5.1790E-03 2.9930E-03

8.8820E-04 1.8640E-02 7.7550E-03 3.5640E-03 1.5980E-03 5.9880E-02 3.9250E-02

2.8220E-02 1.5610E-02 6.5130E-01 1.6250E-01 2.6730E-02 4.9520E-03 3.2930E-02

1.6630E-02 1.0810E-02 5.1260E-03 1.9820E-02 1.1770E-02 7.0770E-03 4.1710E-03

2.3850E-02 1.5230E-02 7.9420E-03 3.5020E-03 2.6170E-02 1.3080E-02 6.1250E-03

2.9600E-03 2.6810E-02 1.7910E-02 7.7290E-03 3.6430E-03 8.2340E-01 3.6270E-01

1.0390E-02 5.2290E-01 1.4410E-01 3.2710E-02 5.2380E-03 6.3370E-02 4.8240E-02

2.7920E-02 1.2070E-02 1.1800E+01 2.7740E+00 5.2950E-01 3.7820E-02 2.6260E-01

1.1810E-01 5.7680E-02 2.9330E-02 6.9720E+00 9.1010E+00 4.0200E+00 7.2010E-02

9.7650E+00 2.4580E+00 3.2460E-01 1.5840E-02 6.0670E-02 2.3860E-02 9.3700E-03

3.5400E-03 1.0060E+00 5.9740E-01 3.7910E-01 1.2080E-01 3.4000E-01 6.9710E-03

1.2240E-02 1.1460E-02 8.3330E-03 1.6780E-03 4.2190E-03 3.9470E-03 2.9510E-03

2.4240E-03 7.3320E-03 7.5540E-03 4.4670E-03 3.2820E-02 3.8090E-02 1.9770E-02

5.5560E-03 1.7200E-02 3.3990E-01 1.7720E-01 3.2200E-02 1.2870E-02 1.1830E-02

1.1460E-02 8.9120E-03 6.4120E-03 9.1860E-03 7.8800E-03 5.2660E-03 9.7420E-03

1.0130E-02 8.1980E-03 7.1180E-03 4.8500E-03 1.0800E-02 9.7940E-03 7.4830E-03

7.0150E-03 1.0560E-02 1.0300E-02 1.0240E-02 3.5830E-01 1.1360E-01 3.2260E-01

3.0560E-02 2.6340E-01 1.4570E-01 3.3520E-02 3.7930E-02 2.0690E-02 2.1180E-02

2.5030E-02 1.8230E-01 5.6190E+00 2.9660E+00 5.6500E-01 4.1460E-02 1.0910E-01

9.2870E-02 5.3770E-02 4.6100E+00 3.9450E+00 1.3520E+00 3.5780E+00 1.5280E-01

4.5810E+00 2.4720E+00 4.8960E-01 8.0550E-03 2.6600E-02 2.0870E-02 9.5140E-03

2.9650E-01 1.0120E-02 3.3640E-01 6.8930E-02 1.3660E-03 3.6920E-03 6.6140E-03

7.2680E-03 7.2550E-05 1.0740E-03 2.0980E-03 3.0850E-03 2.6560E-05 1.1910E-03

3.0620E-03 6.0770E-03 2.1690E-02 8.5900E-03 9.9480E-03 6.4510E-03 6.2610E-03

7.8360E-03 1.3580E-01 1.3310E-01 3.1900E-03 7.1600E-03 7.2520E-03 5.1530E-03

2.1910E-03 3.0910E-03 4.1390E-03 4.7560E-03 1.2440E-03 5.4400E-03 5.3050E-03

4.7400E-03 1.0420E-03 2.6870E-03 5.4190E-03 6.9660E-03 6.7350E-04 4.0380E-03

7.0790E-03 6.8960E-03 1.0300E-02 3.2210E-01 6.6250E-02 5.0790E-03 1.8010E-02

1.0990E-01 1.0230E-01 5.5130E-03 2.1230E-02 1.6990E-02 7.0250E-03 4.1950E-02

1.0230E-01 2.2550E+00 2.2040E+00 1.6950E-02 2.0180E-02 5.1430E-02 7.2750E-02

2.2780E+00 7.1920E-02 3.4540E+00 7.9190E-01 8.3670E-03 1.0300E-01 1.8930E+00

2.0900E+00 1.9500E-03 4.4450E-03 1.1180E-02 1.7650E-02 1.1480E+00 7.6520E-01

3.8270E-01 6.0340E-02 5.0280E-02 4.0230E-02 3.0170E-02 3.0430E-04 2.6080E-04

2.1740E-04 1.7390E-04 1.5740E-03 1.3770E-03 1.1800E-03 9.8350E-04 3.5010E+00

2.6380E+00 1.7650E+00 8.8510E-01 1.0610E-01 7.9620E-02 5.3120E-02 2.6570E-02

4.2720E-03 3.4180E-03 2.5640E-03 1.7090E-03 1.9600E-02 1.6330E-02 1.3070E-02

9.8020E-03 1.9550E-02 1.5640E-02 1.1730E-02 7.8210E-03 1.7690E-02 1.4730E-02

1.1790E-02 8.8420E-03 2.7190E-04 2.3310E-04 1.9420E-04 1.5540E-04 3.5490E-02

2.3660E-02 1.1830E-02 2.8720E-02 2.1700E-02 1.4490E-02 7.2610E-03 1.7040E-02

1.3630E-02 1.0220E-02 6.8160E-03 7.0080E-02 5.2660E-02 3.5160E-02 1.7600E-02

7.4310E-03 6.1930E-03 4.9550E-03 3.7160E-03 1.9010E-02 1.4960E-02 9.9580E-03

4.9890E-03 4.1380E-02 3.3180E-02 2.2150E-02 1.1090E-02 3.0060E-03 2.4050E-03

1.8040E-03 1.2020E-03 2.1800E+00 1.1060E+00 3.3310E-02 2.2790E-02 1.3100E-02

5.7190E-03 7.5610E-02 2.2320E-02 8.3470E-03 2.3030E-03 1.1630E-03 9.7910E-04

6.2330E-04 3.4800E-04 5.9870E+00 3.9730E+00 1.5880E+00 3.0020E-01 8.1640E-02

4.8360E-02 2.1760E-02 6.8520E-03 1.0520E-01 7.2450E-02 5.6650E-02 3.7730E-02

5.4560E-02 4.1060E-02 2.7300E-02 1.5610E-02 3.7170E-02 2.1690E-02 1.2310E-02

6.2640E-03 2.3800E-02 1.0990E-02 4.3990E-03 1.3910E-03 2.1420E-02 6.3760E-03

2.5420E-03 1.4030E-03 3.2510E-02 3.2360E-02 2.0270E-02 5.6060E-02 3.2390E-02

1.5360E-02 4.6290E-03 6.3610E-02 3.2360E-02 1.6110E-02 6.8540E-03 7.3810E-02

4.7550E-02 2.3170E-02 9.0770E-03 6.8390E-03 8.9670E-03 3.6590E-03 1.3940E-03

1.9650E-02 3.3580E-02 3.4350E-02 2.2210E-02 6.4290E-02 4.7570E-02 2.1720E-02

5.4670E-03 4.7280E-02 1.6360E-02 6.0940E-03 2.1850E-03 7.1450E-01 1.5570E-02

3.7920E-03 9.4880E-03 1.3600E-02 2.7370E-03 3.3060E-02 3.2570E-02 1.1260E-02

6.4610E-04 3.2260E-04 4.1280E-04 6.6180E-04 3.3350E+00 8.1860E-01 1.9450E+00

1.8490E+00 3.7980E-02 2.2710E-02 2.5650E-02 1.8040E-02 5.6790E-02 6.2300E-02

4.0770E-02 1.8550E-02 3.0310E-02 2.0880E-02 2.0380E-02 2.1810E-02 1.4470E-02

1.4060E-02 1.2450E-02 9.3580E-03 2.9990E-03 9.7560E-03 8.8270E-03 5.4730E-03

1.0990E-03 5.7260E-03 5.4430E-03 3.3220E-03 3.2270E-02 1.8470E-02 6.0160E-03

2.4890E-02 1.7940E-02 1.7540E-02 1.1230E-02 1.5800E-02 2.3060E-02 2.1940E-02

1.4950E-02 4.2800E-02 2.1830E-02 2.3670E-02 1.7140E-02 3.3590E-03 2.0570E-03

2.4020E-03 4.9820E-03 1.3090E-02 3.4300E-02 2.0240E-02 5.5230E-03 4.2010E-02

8.7430E-03 2.1380E-02 2.0360E-02 4.9130E-03 1.7980E-02 1.3760E-02 6.4670E-03

8.3680E-04 9.2810E-03 8.6210E-03 2.4680E-03 9.6300E-05 1.6290E-03 1.0400E-02

2.5580E-02 5.8750E-05 3.6300E-04 3.7490E-04 1.8730E-04 1.4540E-01 2.3420E+00

1.2410E+00 2.4910E-01 7.1450E-03 2.2710E-02 1.6160E-02 5.6770E-03 3.2510E-02

1.8300E-02 2.0580E-02 1.7010E-02 7.9070E-03 1.5890E-02 1.3920E-02 9.2760E-03

4.2240E-03 7.3860E-03 7.9940E-03 6.0140E-03 2.5210E-04 1.8010E-03 4.8130E-03

6.6660E-03 7.6000E-05 6.5130E-04 2.6490E-03 4.4160E-03 2.0170E-02 6.0120E-03

2.6220E-03 5.0580E-03 1.4560E-02 1.1410E-02 5.2120E-03 3.7740E-03 1.0370E-02

1.1680E-02 1.1170E-02 9.9660E-03 2.4740E-02 1.4300E-02 5.0180E-03 3.8620E-04

1.9670E-03 2.4430E-03 1.1770E-03 6.5530E-03 2.2150E-02 5.5200E-03 2.3530E-03

6.8230E-03 2.6850E-02 1.2760E-02 1.5350E-03 1.0900E-03 2.3940E-03 9.1850E-03

1.0530E-02 1.3390E+00 6.1150E-02 8.3650E-03 2.3490E+00 9.4910E-01 9.8750E-02

7.4900E-03 4.6680E+00 1.0400E+00 1.6290E-01 1.2240E-02 6.0710E-02 1.3860E-02

2.9860E-03 7.0450E-04 2.2770E+00 2.1470E-01 7.1280E-03 8.6810E-04 2.1660E+00

4.2150E-01 4.5170E-02 2.3760E-03 9.8470E-01 3.1120E-01 4.3100E-02 1.9610E-03

4.2060E-01 1.5660E-01 4.1400E-02 6.6970E-03 6.8080E-01 1.8570E-01 4.5780E-02

7.5090E-03 2.7780E-01 1.2840E-01 1.8000E-02 1.7330E-03 3.7120E-02 7.6370E-03

1.7100E-04 1.8780E-01 2.2120E-02 1.6400E-03 9.8370E-05 2.2080E-01 4.3020E-02

3.3210E-03 3.8290E-04 2.8800E-01 3.1960E-02 8.2920E-03 6.5510E-04 8.5860E-02

2.7700E-02 5.6610E-03 6.3530E-04 1.9640E-02 1.1430E-02 6.0440E-03 4.1540E-04

7.5040E-02 7.6290E-03 1.7390E-03 1.4140E-04 1.1310E-01 3.0930E-02 8.2730E-03

1.8600E-03 1.2460E+01 7.1870E-02 7.1880E-01 3.5790E+00 1.0980E+00 1.1690E-01

8.8360E-01 4.5910E+00 2.0380E+00 1.9560E-01 2.1210E-02 2.7380E-02 8.3530E-03

2.3920E-03 6.0700E-01 1.2490E+00 2.2760E-01 4.7210E-03 5.4980E-01 1.1730E+00

4.3150E-01 5.2910E-02 3.1110E-01 8.7760E-01 3.2390E-01 4.9680E-02 1.4540E-01

2.1060E-01 9.5580E-02 3.3260E-02 1.8550E-01 3.6040E-01 1.5910E-01 5.0310E-02

1.0510E-01 3.2600E-01 1.3870E-01 2.0700E-02 1.8330E-02 1.3950E-02 4.7860E-03

5.2430E-02 1.0130E-01 2.0480E-02 1.7350E-03 5.6310E-02 1.1700E-01 4.5970E-02

3.6790E-03 6.8680E-02 1.5940E-01 1.9590E-02 7.3450E-03 2.7680E-02 8.6800E-02

3.0060E-02 6.3070E-03 1.6370E-02 9.2070E-03 1.9410E-03 3.5150E-03 2.1010E-02

4.7040E-02 5.1270E-03 1.8940E-03 3.8500E-02 5.6570E-02 2.5570E-02 8.5690E-03

1.5990E+00 4.4710E-02 8.2590E-01 2.6690E+00 8.7920E-01 1.6790E-02 1.0770E+00

6.1970E+00 1.6140E+00 7.0150E-03 1.8900E-02 1.7640E-02 5.7160E-03 1.1270E-01

6.3260E-01 7.5620E-01 1.6130E-01 9.2160E-02 5.6630E-01 7.5450E-01 3.3860E-01

4.3080E-02 3.2390E-01 6.2520E-01 2.6360E-01 4.5840E-02 1.1760E-01 1.5120E-01

7.7720E-02 4.5610E-02 1.5900E-01 2.7510E-01 1.4020E-01 7.9480E-03 1.1430E-01

1.9890E-01 1.1350E-01 7.7300E-03 1.3470E-02 7.9380E-03 1.1560E-02 5.7310E-02

6.3010E-02 1.4150E-02 8.8400E-03 5.9410E-02 7.5170E-02 3.5410E-02 2.1550E-02

5.8570E-02 1.0890E-01 1.3430E-02 5.6520E-03 3.0050E-02 6.3160E-02 2.2740E-02

1.3090E-02 4.9560E-03 3.7570E-03 3.3840E-03 5.7520E-03 1.9270E-02 3.5400E-02

3.5400E-03 1.0650E-02 3.1560E-02 3.9260E-02 2.0830E-02 2.4500E-03 5.1030E-02

6.5010E-01 2.6070E+00 5.1470E-04 2.0710E-02 8.4310E-01 5.8680E+00 2.3510E-03

7.2190E-03 1.4610E-02 1.1890E-02 1.7470E-02 1.5250E-01 5.0680E-01 5.8270E-01

9.2000E-03 1.1530E-01 4.5940E-01 7.3790E-01 1.9430E-03 4.9680E-02 2.6360E-01

6.5640E-01 1.1220E-02 4.8690E-02 9.9250E-02 1.3180E-01 7.4820E-03 5.0280E-02

1.4020E-01 2.6200E-01 8.4520E-04 8.9560E-03 9.1430E-02 2.5380E-01 2.3720E-03

9.7450E-03 9.6460E-03 1.8200E-03 1.4240E-02 4.4950E-02 4.7180E-02 9.1070E-04

1.0510E-02 4.7620E-02 7.5040E-02 5.0670E-03 2.4580E-02 4.7290E-02 7.2380E-02

6.3380E-04 6.3060E-03 2.2740E-02 6.1180E-02 9.8200E-03 2.4900E-03 4.7880E-03

1.0480E-03 1.1190E-03 6.4540E-03 1.5490E-02 1.9070E-02 3.3380E-03 1.1690E-02

2.6650E-02 3.5570E-02 2.3590E+00 2.2830E-01 1.2070E-02 5.7590E+00 8.6660E-01

1.2730E-01 7.3000E-03 3.3490E-02 8.0230E-03 2.5490E-03 4.0350E-05 6.6550E-02

1.8640E-02 2.1640E-04 6.3160E-06 1.9970E-01 3.1320E-02 2.4670E-03 7.0310E-05

7.5480E-01 2.6380E-01 2.0490E-02 2.2770E-04 1.2570E+00 1.6710E-01 2.7290E-02

2.7160E-03 3.2280E-01 2.4150E-01 2.8530E-02 3.7060E-03 1.0280E+00 3.9640E-01

5.6690E-02 3.3560E-03 1.1230E-02 6.2010E-04 2.4070E-05 5.9480E-02 1.1820E-02

3.3450E-03 3.2070E-05 2.3320E-01 1.2910E-02 1.5530E-03 2.1880E-04 3.3400E-02

9.9260E-03 3.2610E-04 3.8170E-05 2.0940E-01 6.6440E-02 4.5100E-03 3.3470E-04

2.6680E-04 1.8760E-02 2.9170E-03 2.0290E-05 4.5990E-02 1.0870E-02 3.2010E-03

1.8340E-05 4.0130E-01 3.5870E-02 3.2580E-03 5.2740E-05 4.4600E+00 2.6810E-01

6.2360E-01 5.4190E+00 1.5850E+00 2.2500E-01 1.4190E-02 1.7820E-02 3.7940E-03

2.9010E-03 4.2100E-02 2.8020E-02 1.8500E-02 2.3250E-04 4.7960E-02 1.0030E-01

3.2770E-02 2.8680E-03 3.2970E-01 1.1180E+00 3.0860E-01 2.3530E-02 3.0160E-01

7.7350E-01 1.3750E-01 2.8640E-02 2.7570E-01 6.2500E-01 2.3930E-01 3.1360E-02

2.4470E-01 1.2350E+00 4.2690E-01 6.5220E-02 5.0380E-03 5.6170E-03 3.7480E-04

2.5130E-02 3.0900E-02 5.9390E-03 3.6840E-03 3.9790E-02 1.5880E-01 1.3780E-02

1.6750E-03 1.5780E-02 1.1540E-02 9.8810E-03 3.4520E-04 7.7900E-02 1.2390E-01

6.2580E-02 5.1740E-03 2.2870E-04 9.6720E-03 7.2710E-03 1.7560E-03 1.5510E-02

1.9540E-02 4.8300E-03 3.3880E-03 1.0520E-01 2.5510E-01 4.8060E-02 9.2020E-03

3.5080E+00 9.6860E-02 1.1980E+00 6.9120E+00 2.0800E+00 6.0320E-03 1.0760E-02

1.3060E-02 2.8000E-03 9.0330E-03 2.6290E-02 8.5280E-03 1.3150E-02 9.2970E-03

4.9350E-02 6.5670E-02 2.5580E-02 3.9540E-02 3.8580E-01 8.4280E-01 2.4620E-01

6.9220E-02 2.9280E-01 5.5960E-01 1.1130E-01 4.7160E-02 2.8640E-01 4.2540E-01

2.0240E-01 5.6470E-02 4.2260E-01 9.4400E-01 3.5460E-01 1.8900E-03 4.4810E-03

2.1120E-03 8.9420E-03 1.7480E-02 2.2290E-02 4.3560E-03 5.5010E-03 4.4470E-02

1.1760E-01 1.0120E-02 4.8520E-03 1.3840E-02 6.0030E-03 6.9560E-03 9.2370E-03

7.4520E-02 9.1200E-02 5.3200E-02 1.9060E-04 4.3490E-03 7.2560E-03 3.9750E-03

7.9150E-03 1.4240E-02 1.7530E-02 3.5460E-03 2.0830E-02 1.0760E-01 1.8570E-01

3.8660E-02 1.1270E-03 1.1210E-01 1.6830E+00 7.3090E+00 1.7060E-03 6.7400E-03

9.5490E-03 9.1600E-03 1.3540E-03 1.1090E-02 2.2580E-02 1.2840E-02 9.6940E-04

1.1140E-02 4.0880E-02 6.1130E-02 2.0580E-03 4.7530E-02 3.1980E-01 8.9180E-01

1.1560E-02 7.9660E-02 2.4810E-01 5.0560E-01 6.1680E-03 5.3550E-02 2.1980E-01

4.8910E-01 3.3560E-03 6.5050E-02 3.5220E-01 1.0340E+00 1.0900E-03 2.5710E-03

3.7080E-03 2.3110E-03 1.0210E-02 1.5010E-02 1.5130E-02 7.0770E-04 6.4860E-03

3.2800E-02 9.0290E-02 1.4950E-03 5.9230E-03 1.1720E-02 6.4510E-03 8.2990E-04

1.0740E-02 6.3890E-02 1.1970E-01 1.5240E-04 1.4950E-03 5.4070E-03 5.5620E-03

2.2600E-03 8.8210E-03 1.2640E-02 9.7810E-03 1.1450E-03 2.4810E-02 8.9240E-02

1.6410E-01 9.4160E-01 2.5450E-02 1.0870E-03 1.5990E-01 2.5940E-02 1.0000E-04

1.5640E-05 1.2790E-02 8.6890E-04 2.3090E-05 1.5780E-06 2.7960E-02 7.1720E-03

4.5270E-04 9.2860E-06 1.7410E+00 1.5710E-01 3.0750E-03 2.9480E-05 1.0560E-01

2.2980E-02 3.0830E-03 3.4650E-05 3.5950E-01 9.9260E-02 1.0120E-02 1.0470E-03

1.0980E+00 2.1080E-01 5.5780E-02 3.7020E-03 4.6270E-04 3.7680E-04 3.7310E-05

1.5720E-02 2.2800E-03 2.1890E-04 3.2950E-05 8.2870E-02 1.3460E-02 1.9970E-03

6.4260E-05 4.0970E-02 8.3710E-03 3.3440E-04 3.1460E-05 5.0910E-01 5.7590E-02

6.5340E-03 7.1070E-04 1.1430E-03 9.0780E-04 5.1040E-04 1.2280E-04 3.3530E-02

3.3130E-03 1.1460E-04 1.6780E-06 3.9400E-02 1.1230E-02 1.7990E-03 3.0200E-05

1.9470E+00 4.8060E-02 6.2990E-02 7.6400E-02 2.9130E-02 8.8840E-05 4.1440E-03

6.7150E-03 8.4700E-04 2.3170E-05 1.0610E-02 1.2420E-02 7.5550E-03 5.2000E-04

2.8720E-01 1.7940E+00 1.9030E-01 3.5290E-03 3.5840E-02 5.5340E-02 2.0620E-02

3.5660E-03 1.0210E-01 4.4250E-01 1.1320E-01 1.1320E-02 2.7400E-01 1.4540E+00

3.8250E-01 6.2930E-02 3.0360E-04 2.8110E-04 2.1920E-04 6.5650E-03 7.3650E-03

2.0670E-03 1.4040E-04 2.4340E-02 4.7670E-02 1.1740E-02 2.2740E-03 1.7210E-02

1.5720E-02 7.0500E-03 3.0880E-04 1.3820E-01 5.7240E-01 6.6420E-02 7.4540E-03

1.0010E-03 7.2920E-04 3.4770E-04 2.6830E-04 1.4130E-02 1.5940E-02 3.1870E-03

1.2320E-04 1.5970E-02 1.7280E-02 1.0740E-02 2.1350E-03 2.0350E+00 1.8680E-02

5.9870E-02 4.4620E-02 2.0630E-02 1.0230E-03 4.3000E-03 4.2550E-03 6.0180E-04

2.4460E-03 1.0550E-02 7.7730E-03 5.9040E-03 4.3580E-02 6.1430E-01 2.3080E+00

1.4770E-01 9.9420E-03 3.3030E-02 3.6890E-02 1.7710E-02 2.4490E-02 1.6390E-01

3.4110E-01 8.6760E-02 7.2240E-02 4.5030E-01 1.0650E+00 3.2140E-01 2.2310E-04

1.8430E-04 1.1510E-04 2.0550E-03 5.4990E-03 4.4940E-03 1.4610E-03 6.9320E-03

2.3150E-02 3.4670E-02 9.7230E-03 5.5630E-03 1.5560E-02 1.2110E-02 4.9460E-03

1.5970E-02 1.5320E-01 4.4800E-01 5.6240E-02 8.5770E-04 5.2660E-04 3.6820E-04

2.5880E-04 2.7820E-03 1.3700E-02 9.7160E-03 2.2700E-03 4.3610E-03 1.4740E-02

1.1270E-02 8.6650E-03 2.9400E-03 2.3090E-02 5.0910E-02 4.3020E-02 1.3890E-04

1.1680E-03 3.3800E-03 3.6130E-03 2.9540E-04 2.8930E-03 8.9540E-03 1.0060E-02

2.1950E-03 4.7780E-02 4.8960E-01 2.1040E+00 1.3370E-03 1.1550E-02 3.0040E-02

3.9760E-02 2.8770E-03 2.8370E-02 1.3660E-01 3.5170E-01 6.7090E-03 8.2010E-02

3.8170E-01 1.1280E+00 1.7430E-04 1.8310E-04 2.1360E-04 4.6230E-04 2.4480E-03

4.6570E-03 4.0450E-03 9.1250E-04 8.1260E-03 1.9880E-02 3.3290E-02 1.3240E-03

6.5680E-03 1.3250E-02 1.1420E-02 1.7700E-03 1.8590E-02 1.2620E-01 4.2150E-01

7.1470E-04 3.3640E-04 4.4140E-04 1.8220E-04 4.5920E-04 3.4500E-03 1.1580E-02

8.7810E-03 8.0110E-04 5.0770E-03 1.2880E-02 1.3920E-02 3.1570E+00 4.7040E-01

2.6240E-02 1.0400E-01 5.0490E-02 3.1270E-02 1.5790E-02 8.0930E-02 5.6420E-02

3.0730E-02 1.6290E-02 7.4950E-02 3.4800E-02 1.2700E-02 3.1490E-03 5.0230E-02

2.5270E-02 1.1020E-02 3.1830E-03 6.4280E-02 2.3420E-02 1.0570E-02 3.2490E-03

8.0360E-02 3.0420E-02 8.2610E-03 1.3130E-03 9.3470E-02 6.4320E-02 9.7310E-03

3.6280E-02 1.8900E-02 9.1160E-03 3.5030E-03 9.7940E-02 4.6420E-02 1.0910E-02

3.0320E-03 6.1040E-02 3.1710E-02 1.0830E-02 5.1300E-03 7.0980E-02 2.0630E-02

8.6440E-03 1.5010E-03 1.4120E-01 1.1580E-01 7.5850E-02 3.8870E-03 5.5650E-02

2.8610E-02 1.0030E-02 2.8980E-03 5.1900E-02 1.8830E-02 6.1220E-03 1.1520E-03

2.8350E+00 5.6590E-01 5.0490E-02 7.0760E-02 3.2640E-02 1.1460E-02 5.0730E-02

3.5770E-02 3.4370E-02 2.0970E-02 2.9100E-02 2.9430E-02 2.5900E-02 1.4320E-02

2.7420E-02 1.7130E-02 1.4400E-02 1.1130E-02 1.8610E-02 1.4030E-02 1.4010E-02

1.1210E-02 1.4980E-02 3.6270E-02 2.8760E-02 1.0260E-02 7.1490E-02 1.7030E-02

3.6950E-02 1.8870E-02 1.4940E-02 9.5410E-03 5.4320E-03 3.7740E-02 3.6310E-02

4.1330E-02 1.5760E-02 3.1520E-02 1.9010E-02 2.2380E-02 9.0360E-03 1.0400E-02

3.3610E-02 2.3710E-02 6.4880E-03 1.0560E-01 8.5360E-02 7.6620E-03 5.2290E-02

2.8580E-02 1.8040E-02 1.8610E-02 7.7120E-03 1.5510E-02 1.3800E-02 1.7190E-02

6.8860E-03 1.8960E+00 3.1270E-02 3.2640E-02 3.1580E-02 1.0310E-02 2.2700E-02

3.1520E-02 1.7950E-02 2.2420E-02 4.7280E-03 1.8230E-02 1.8570E-02 2.1270E-02

7.1980E-03 1.2680E-02 1.3060E-02 1.1310E-02 5.7120E-03 1.1330E-02 1.0440E-02

1.1390E-02 3.6780E-04 1.4980E-02 2.0790E-02 2.4030E-02 3.6770E-02 3.1400E-02

1.7760E-02 9.1070E-03 9.5310E-03 8.3340E-03 4.4070E-03 5.6440E-03 3.5010E-02

1.5630E-02 2.4600E-02 1.0780E-02 2.2350E-02 8.7510E-03 1.1960E-02 1.4820E-03

6.6230E-03 2.5620E-02 1.6100E-02 7.0190E-02 3.5820E-02 3.8410E-02 2.3580E-02

1.0020E-02 1.8600E-02 8.5810E-03 1.0440E-02 2.6790E-03 1.4330E-02 8.1020E-03

1.0430E-02 1.5790E-02 1.1460E-02 1.0310E-02 1.2000E-02 9.3560E-03 1.1910E-02

1.8240E-02 8.2920E-03 4.5880E-04 4.7490E-03 1.4050E-02 1.3600E-02 1.1910E-03

8.5430E-03 8.4340E-03 5.3540E-03 8.1450E-04 5.3400E-03 7.5530E-03 5.8790E-03

3.3670E-05 3.6370E-04 1.0570E-02 1.9120E-02 9.9740E-03 2.7200E-02 2.9100E-03

3.5030E-03 5.4250E-03 4.4050E-03 3.3730E-03 1.2700E-03 5.1710E-03 1.8380E-02

1.2410E-02 5.1300E-03 7.4870E-03 1.1900E-02 2.9330E-03 6.5980E-04 9.4510E-04

3.8620E-03 1.4740E-02 3.5040E-02 7.5230E-03 3.9870E-02 1.4070E-03 2.8980E-03

7.7070E-03 1.0430E-02 3.1730E-03 2.6780E-04 2.7870E-03 9.2120E-03 5.2790E-03

1.0500E+00 6.8980E-02 1.2150E-02 3.9100E+00 1.2540E+00 2.6030E-01 2.9920E-02

8.6150E+00 1.8610E+00 3.0020E-01 3.6150E-02 1.5250E-01 6.1950E-02 2.0330E-02

5.9520E-03 1.7310E-01 6.3420E-02 1.9800E-02 5.9870E-03 3.3720E-02 1.6320E-02

7.8110E-03 2.0790E-03 3.5180E-01 1.1750E-01 1.9940E-02 5.6730E-01 2.7450E-01

8.0320E-02 1.2530E-02 4.1980E-01 1.2580E-01 2.7340E-02 5.4180E-03 1.6480E-01

9.6280E-02 2.7770E-02 8.7120E-03 3.1190E-02 1.3920E-02 5.5640E-03 1.5970E-03

1.6750E-02 1.9850E-02 1.2610E-02 7.7590E-03 6.0590E-02 3.6230E-02 1.7830E-02

5.9240E-03 7.5960E-02 3.4640E-02 1.4240E-02 5.1590E-03 1.1470E+00 6.9300E-02

8.8430E-01 1.7280E+00 1.1840E+00 3.2440E-01 3.8900E-01 5.0950E+00 2.1080E+00

3.9380E-01 4.8930E-02 6.1260E-02 3.2240E-02 2.4900E-02 3.0710E-02 1.1190E-01

6.8110E-02 2.3260E-02 1.0250E-02 1.6600E-02 9.4110E-03 8.6490E-03 1.6730E-01

1.0800E-01 7.1100E-02 2.7020E-01 1.7660E-01 1.8350E-01 7.8160E-02 8.4650E-02

2.0590E-01 1.1420E-01 3.4060E-02 9.6050E-02 4.9230E-02 6.7810E-02 2.1570E-02

9.6280E-03 1.4360E-02 1.1010E-02 5.8370E-03 1.2550E-02 1.4610E-02 9.9380E-03

5.2720E-03 3.6180E-02 2.3160E-02 1.8680E-02 1.1220E-02 2.9110E-02 2.7680E-02

2.3540E-02 1.3050E-02 8.0000E-01 7.2090E-02 8.5770E-01 9.0730E-01 9.1600E-01

3.0950E-03 4.0260E-01 3.2320E+00 1.6760E+00 1.2730E-02 2.1160E-02 4.3710E-02

2.3930E-02 6.8340E-03 2.5510E-02 8.5750E-02 3.4620E-02 3.6980E-03 3.4650E-03

1.4860E-02 8.4870E-03 6.7390E-02 1.0860E-01 7.0110E-02 7.9730E-02 1.8150E-01

1.0370E-01 1.0840E-01 1.0060E-02 7.4540E-02 1.1460E-01 8.8420E-02 2.7760E-02

6.7680E-02 1.9140E-02 3.5380E-02 2.5060E-03 6.4950E-03 1.0270E-02 8.9130E-03

8.3570E-03 1.0740E-02 6.9970E-03 2.8870E-03 1.7810E-02 1.8610E-02 1.7440E-02

8.2300E-03 8.0340E-03 1.9630E-02 1.3690E-02 1.8260E-02 2.4470E-03 7.9330E-02

6.0000E-01 7.0370E-01 2.7610E-04 3.1160E-03 2.8160E-01 2.3570E+00 1.5940E-03

1.2710E-02 1.8130E-02 2.3420E-02 4.0320E-04 5.8510E-03 1.7760E-02 3.5070E-02

9.3940E-06 4.0860E-03 2.9830E-03 8.1430E-03 2.0080E-02 5.8420E-02 3.2610E-02

1.2530E-02 7.7700E-02 1.0800E-01 3.5880E-02 1.7000E-03 9.1830E-03 5.0300E-02

8.1870E-02 8.7120E-03 2.1510E-02 3.7860E-02 7.8860E-03 4.9910E-04 2.1670E-03

4.1920E-03 7.0170E-03 4.1750E-03 5.7940E-03 3.0960E-03 1.3130E-03 5.9240E-03

1.2970E-02 8.2180E-03 4.8620E-03 2.4910E-03 6.8980E-03 1.2100E-02 7.6530E-03

2.8010E+00 2.5200E-01 1.7700E-02 7.1200E+00 1.7400E+00 2.7070E-01 2.1950E-02

4.7110E-01 1.4860E-01 3.2110E-02 5.1740E-03 7.5860E-01 2.6400E-01 6.0480E-02

1.1640E-02 4.4180E-01 1.1370E-01 1.8570E-02 1.4010E-03 4.1630E-01 2.4870E-02

3.1620E-03 5.2740E-01 1.1320E-01 1.3590E-02 6.9980E-04 7.2790E-01 2.4650E-01

5.4330E-02 6.0870E-03 1.4530E-01 4.9670E-02 9.6770E-03 2.8770E-03 8.1000E-02

3.4090E-02 1.2800E-02 4.0660E-03 1.6950E-02 6.5280E-02 1.1210E-02 7.1950E-03

6.5930E-02 2.9570E-02 1.0660E-02 2.1260E-03 1.1340E-01 3.1710E-02 7.3720E-03

1.2440E-03 3.1050E+00 3.0780E-01 1.3090E+00 3.8970E+00 1.8540E+00 3.3560E-01

1.4780E-01 2.0630E-01 1.3770E-01 3.4330E-02 2.3850E-01 3.7290E-01 2.3800E-01

7.0930E-02 7.2240E-02 2.1590E-01 1.3400E-01 2.2510E-02 1.4860E-01 1.9180E-01

1.3950E-02 1.6420E-01 2.6350E-01 9.8890E-02 1.4250E-02 2.4460E-01 3.1570E-01

2.0550E-01 6.2290E-02 6.1340E-02 5.6300E-02 4.4350E-02 6.4240E-03 2.9540E-02

3.8210E-02 2.5160E-02 1.3080E-02 1.3560E-02 2.9580E-02 3.4600E-02 3.5920E-03

3.5770E-02 2.8150E-02 1.5180E-02 1.0570E-02 4.1890E-02 3.5280E-02 2.7110E-02

8.0630E-03 2.3790E+00 1.1150E-01 1.4060E+00 2.5460E+00 1.4900E+00 3.2000E-02

1.3710E-01 1.2550E-01 1.0810E-01 3.4100E-02 1.9120E-01 2.4580E-01 2.0100E-01

1.7610E-03 8.8470E-02 1.4170E-01 1.1060E-01 4.2780E-02 1.4200E-01 8.0340E-02

3.6180E-02 1.5500E-01 1.5550E-01 6.0150E-02 5.4030E-02 1.8690E-01 1.9680E-01

1.6710E-01 1.9120E-02 5.2780E-02 3.0000E-02 2.8900E-02 9.4110E-03 2.1270E-02

2.7530E-02 2.1570E-02 1.0170E-02 1.5220E-02 2.3860E-02 1.2120E-02 1.7550E-02

1.8910E-02 2.2140E-02 8.6350E-03 7.3220E-03 2.6990E-02 2.1050E-02 2.1420E-02

3.2040E-03 1.3230E-01 1.0870E+00 2.4830E+00 5.1740E-03 3.4230E-02 1.0780E-01

1.1740E-01 3.0640E-03 3.8140E-02 1.5330E-01 2.5610E-01 9.0810E-05 2.0110E-03

6.8610E-02 1.5270E-01 9.0400E-03 5.7000E-02 1.1030E-01 5.2780E-03 4.2950E-02

1.1900E-01 1.0630E-01 6.0880E-03 6.2060E-02 1.5140E-01 1.8100E-01 6.3110E-03

2.0170E-02 3.8680E-02 1.8930E-02 2.1130E-03 9.4360E-03 1.7570E-02 2.4490E-02

6.7800E-03 9.0430E-03 8.9930E-03 1.6050E-02 5.2450E-03 1.6270E-02 1.2980E-02

1.0830E-02 1.2250E-03 8.0410E-03 2.1350E-02 2.0680E-02 2.5250E+00 1.0350E-01

1.0420E-02 5.2960E-01 1.2740E-01 2.4380E-02 5.1330E-03 3.3490E-01 8.3170E-02

1.3340E-02 5.9190E-04 2.4630E-01 7.6040E-02 1.8460E-02 2.4420E-03 2.4610E-02

8.2540E-03 1.0520E-03 7.4550E-01 5.7640E-02 1.0520E-02 1.9980E-03 5.3420E-01

1.1510E-01 1.1340E-02 1.4160E-03 5.5390E-02 1.7970E-02 2.0770E-03 4.9880E-04

2.8740E-01 7.0840E-02 9.4730E-03 1.9610E-03 2.6630E-02 2.9150E-02 1.5150E-02

3.2660E-03 8.9930E-02 1.9360E-02 6.2840E-03 5.2320E-04 1.6950E-01 4.9940E-02

1.0800E-02 1.3900E-03 3.1020E+00 1.2300E-01 1.5810E-01 2.7950E-01 1.1160E-01

2.5190E-02 8.2930E-02 1.8610E-01 9.0410E-02 1.5740E-02 6.6020E-02 1.4610E-01

6.9010E-02 2.0870E-02 1.3400E-02 6.7340E-03 5.1570E-03 1.8570E-01 4.3850E-01

4.5140E-02 9.5250E-03 1.4660E-01 2.7860E-01 1.1450E-01 1.2470E-02 2.3790E-02

2.8650E-02 1.2820E-02 1.5320E-03 7.0240E-02 1.8570E-01 7.1960E-02 1.0140E-02

2.2200E-02 2.1230E-02 1.0160E-02 8.1900E-03 3.8480E-02 4.6580E-02 9.8430E-03

6.4360E-03 5.9120E-02 8.3010E-02 3.9390E-02 1.1840E-02 2.3860E+00 4.2090E-02

1.4210E-01 1.8960E-01 8.8390E-02 1.3310E-02 9.0130E-02 1.3080E-01 7.5170E-02

1.3680E-02 5.9620E-02 9.9510E-02 6.0370E-02 7.4900E-03 7.3320E-03 5.1170E-03

3.9740E-02 1.8960E-01 2.8170E-01 3.0550E-02 2.2660E-02 1.4600E-01 1.8200E-01

7.7500E-02 9.0540E-03 1.8680E-02 1.6510E-02 8.6940E-03 9.4220E-03 7.1360E-02

1.4480E-01 5.8610E-02 1.7760E-02 1.3440E-02 1.0740E-02 7.4220E-03 1.5610E-02

2.4260E-02 3.3450E-02 6.6970E-03 1.9690E-02 4.7970E-02 5.8060E-02 3.2560E-02

8.6350E-03 4.4940E-02 1.1700E-01 1.7490E-01 5.9130E-04 1.5720E-02 7.5000E-02

1.2860E-01 1.3360E-03 1.5360E-02 5.1420E-02 1.0300E-01 3.3770E-03 7.5870E-03

3.9910E-03 8.8090E-03 4.6160E-02 1.5070E-01 2.0120E-01 3.0630E-03 2.6580E-02

1.1880E-01 1.7870E-01 1.9290E-03 9.7770E-03 1.6180E-02 1.3130E-02 1.9440E-03

1.0110E-02 5.8220E-02 1.5450E-01 1.3300E-02 7.2830E-03 1.1640E-02 4.9070E-03

4.3700E-03 1.3980E-02 1.9690E-02 2.0560E-02 2.8290E-03 1.9880E-02 4.1100E-02

5.2980E-02 1.5510E+00 5.9750E-02 8.5280E-03 5.2830E+00 1.1760E+00 1.6200E-01

1.2520E-02 1.1060E+01 1.8020E+00 1.9750E-01 1.1640E-02 4.6510E-01 5.3540E-02

1.8420E-02 5.4850E-01 1.8420E-01 2.9050E-02 7.6440E-03 5.2560E-01 1.1180E-01

2.1270E-02 3.0660E-03 2.4430E-01 8.3110E-02 7.8050E-03 2.1950E-03 9.3750E-02

4.4600E-02 1.4900E-02 3.1930E-03 1.7560E-02 3.1600E-02 1.1960E-02 6.1600E-03

4.7650E-02 2.2520E-02 6.6970E-03 1.1600E-03 9.9290E-02 3.0410E-02 8.0790E-03

1.3130E-03 1.8800E+00 6.8460E-02 8.5190E-01 3.0220E+00 1.2870E+00 1.9790E-01

5.9100E-01 7.5380E+00 2.1620E+00 2.4500E-01 1.8290E-01 2.0790E-01 2.6160E-02

2.3120E-01 2.1470E-01 1.5740E-01 2.3680E-02 1.1170E-01 2.8460E-01 1.0750E-01

2.1820E-02 9.7180E-02 8.0570E-02 7.2560E-02 7.7380E-03 2.1510E-02 7.1450E-02

4.6700E-02 1.6340E-02 1.4050E-02 1.8670E-02 1.5150E-02 4.0150E-03 2.6030E-02

1.7160E-02 1.2820E-02 7.3770E-03 3.0380E-02 5.2680E-02 2.4380E-02 8.6100E-03

1.4050E+00 5.7020E-02 9.3770E-01 1.9860E+00 1.0270E+00 5.0770E-03 6.9280E-01

5.4660E+00 1.7200E+00 6.9750E-02 1.6410E-01 8.8080E-02 6.3920E-02 1.9170E-01

9.3670E-02 1.0490E-01 2.1260E-02 1.0740E-01 1.8140E-01 8.2870E-02 2.5210E-02

8.6500E-02 3.0640E-02 4.7130E-02 8.0320E-03 2.8460E-02 5.5400E-02 4.3670E-02

1.0540E-02 1.1340E-02 1.1600E-02 6.3160E-03 1.0810E-02 1.4990E-02 1.3000E-02

7.9720E-03 8.0690E-03 2.4380E-02 2.9230E-02 1.9330E-02 1.0710E-03 6.6880E-02

7.2030E-01 1.8920E+00 4.6390E-04 5.4690E-03 5.2330E-01 4.8200E+00 2.8230E-02

6.4400E-02 1.1130E-01 1.6940E-02 6.8680E-02 1.4360E-01 7.9160E-02 3.0660E-03

2.1810E-02 8.2830E-02 1.6570E-01 4.8230E-03 2.4020E-02 6.3510E-02 3.3310E-02

1.6500E-03 9.1590E-03 2.8080E-02 6.2410E-02 7.0250E-03 6.0230E-03 6.8060E-03

6.0280E-03 3.2240E-03 1.0790E-02 1.0900E-02 5.9860E-03 1.3110E-03 8.6070E-03

1.9330E-02 2.6280E-02 3.2230E+00 2.2810E-01 1.8480E-02 6.7950E+00 1.3290E+00

2.5390E-01 1.4850E-02 1.1120E-01 4.6340E-02 1.0330E-02 2.9030E-01 1.8600E-02

4.2980E-03 8.5720E-04 6.7610E-01 1.5860E-01 4.4700E-02 7.6030E-03 1.0980E-01

1.6060E-02 6.3500E-03 6.0950E-04 2.2520E-01 5.7630E-02 1.0530E-02 1.1610E-03

3.2910E-03 2.7790E-02 6.2880E-03 3.8490E-04 1.0520E-01 1.8900E-02 6.9570E-03

1.0290E-03 1.9290E-01 6.3600E-02 5.3410E-03 3.9280E-04 3.8020E+00 2.7090E-01

9.7110E-01 7.1320E+00 2.5210E+00 3.0140E-01 5.7270E-02 2.9360E-02 2.4640E-02

6.1210E-02 1.7580E-01 1.3640E-02 3.7960E-03 1.9870E-01 3.6670E-01 1.3110E-01

3.5430E-02 3.2680E-02 6.0590E-02 9.9700E-03 3.6700E-03 7.2690E-02 1.2120E-01

5.6340E-02 1.1750E-02 2.7430E-03 1.5780E-02 1.0420E-02 3.7250E-03 4.1720E-02

5.4780E-02 1.0780E-02 7.4500E-03 8.2610E-02 1.5400E-01 6.9240E-02 5.8800E-03

2.9630E+00 1.1870E-01 1.9760E+00 5.2380E+00 2.0240E+00 4.2500E-02 4.2050E-02

1.8770E-02 1.4110E-02 6.2410E-02 1.1490E-01 9.2610E-03 5.3120E-02 1.7360E-01

2.5040E-01 1.0580E-01 1.3890E-02 2.9210E-02 3.9810E-02 6.6920E-03 9.9700E-03

5.6050E-02 8.4900E-02 4.6760E-02 2.1940E-03 7.2050E-03 1.0130E-02 6.6040E-03

1.7350E-02 2.9070E-02 3.9180E-02 7.0260E-03 1.2420E-02 8.8420E-02 9.5390E-02

5.3150E-02 3.5050E-04 1.3960E-01 1.5560E+00 5.3400E+00 2.3500E-02 2.9180E-02

1.6130E-02 3.4000E-03 1.6310E-02 4.9610E-02 8.0980E-02 1.2560E-02 6.0570E-02

1.4130E-01 2.2500E-01 3.9400E-03 1.0930E-02 2.3360E-02 2.7410E-02 1.1410E-03

1.1690E-02 4.6590E-02 8.9230E-02 1.6450E-03 2.5500E-03 8.2910E-03 6.7610E-03

4.7430E-03 1.3470E-02 2.3210E-02 2.3830E-02 1.1260E-03 1.4880E-02 7.0800E-02

1.0180E-01 1.3590E+00 1.0730E-01 1.0410E-02 1.6640E-02 1.9110E-03 9.9570E-05

6.8080E-02 2.3440E-02 7.2960E-03 1.6410E-04 1.9930E+00 1.3540E-01 1.9120E-02

2.4820E-03 2.8770E-02 1.0190E-02 1.9000E-03 1.4800E-04 6.0410E-01 9.6520E-02

1.3340E-02 2.1080E-03 5.4840E-04 2.8250E-02 3.4100E-03 3.5320E-04 3.7120E-02

9.1350E-03 7.9970E-04 4.9120E-05 4.3200E-01 2.4300E-02 4.1240E-03 2.7410E-04

2.3280E+00 1.2290E-01 8.2810E-03 6.6740E-03 1.1450E-03 3.4910E-02 4.3360E-02

1.1360E-02 7.9060E-03 3.4830E-01 1.3420E+00 1.2760E-01 2.0790E-02 1.3720E-02

1.3090E-02 6.0200E-03 1.7090E-03 1.1500E-01 3.0580E-01 1.0360E-01 1.7400E-02

4.7050E-04 1.4550E-02 1.0870E-02 2.0740E-03 1.6280E-02 1.6370E-02 5.4370E-03

7.2770E-04 5.6220E-02 1.8930E-01 2.2360E-02 4.5600E-03 2.7820E+00 3.6080E-03

6.5150E-03 3.4040E-03 1.6660E-02 2.0870E-02 2.4640E-02 8.3660E-03 5.8930E-02

4.0100E-01 9.9440E-01 1.0420E-01 4.7560E-03 1.0120E-02 9.2110E-03 4.2370E-03

1.9670E-02 1.2200E-01 2.2940E-01 8.2270E-02 3.9210E-04 6.4960E-03 1.0900E-02

6.0050E-03 5.1250E-03 1.0130E-02 1.0160E-02 3.7450E-03 1.1070E-02 5.7810E-02

1.4060E-01 1.8400E-02 1.0840E-03 4.4990E-03 5.0930E-03 4.8840E-03 1.8440E-02

1.8670E-02 1.4620E-02 8.5740E-03 6.8670E-02 3.2110E-01 7.9250E-01 1.9010E-03

7.6900E-03 8.5540E-03 6.6580E-03 3.7200E-03 2.2150E-02 1.0170E-01 2.4000E-01

3.1370E-04 1.7120E-03 8.1810E-03 8.3710E-03 1.1700E-03 6.6070E-03 8.4560E-03

6.2340E-03 1.5680E-03 1.2940E-02 4.7850E-02 1.3860E-01 5.5610E-01 3.7560E-02

2.0740E+00 1.0290E+00 3.5760E-01 6.3440E-02 7.2840E+00 2.5360E+00 6.8050E-01

1.1730E-01 5.6400E-02 3.1640E-02 1.5050E-02 6.5920E-03 2.0040E-02 1.4030E-02

8.4520E-03 4.3860E-03 2.5990E-02 1.0960E-01 1.0360E-01 6.4820E-02 9.1500E-02

5.4570E-02 3.0720E-02 1.3860E-02 4.1800E-02 2.6360E-02 1.7650E-02 1.1480E-02

4.6550E-01 7.1410E-01 5.8980E-01 6.2750E-01 4.2580E-01 2.4380E-01 3.4180E+00

2.5140E+00 9.6220E-01 2.3520E-02 2.4990E-02 1.7410E-02 9.8560E-03 1.2480E-02

6.2330E-03 6.8090E-03 1.0030E-02 1.7330E-02 1.0360E-01 6.4510E-02 1.8720E-02

4.3080E-02 3.9010E-02 3.1330E-02 1.4220E-02 1.8010E-02 2.2400E-02 1.6050E-02

8.4170E-03 2.5500E-02 5.0020E-01 4.3020E-01 2.1730E-01 1.9100E-02 1.5430E-01

1.4030E+00 1.9860E+00 6.0870E-03 1.2240E-02 1.0980E-02 6.5860E-03 1.0690E-03

7.2110E-03 5.1710E-03 3.4500E-03 8.6650E-03 6.4790E-02 1.9010E-02 9.2310E-03

1.7870E-02 1.8760E-02 1.6640E-02 1.0290E-02 9.6610E-03 6.8490E-03 8.6090E-03

7.9080E-03 2.7950E+00 4.4030E-01 2.9110E-02 7.6340E+00 2.7600E+00 5.8450E-01

7.0510E-02 1.1010E-01 5.4150E-02 1.6250E-02 2.6270E-03 6.6320E-02 3.1410E-02

1.4800E-02 7.7160E-03 2.2830E-01 1.2440E-01 3.8510E-02 1.5730E-02 1.4870E-01

7.2900E-02 2.7720E-02 1.0140E-02 1.4250E-01 5.7640E-02 1.5500E-02 2.0460E-03

2.4780E+00 5.2220E-01 2.0660E+00 2.9810E+00 2.5780E+00 7.2240E-01 5.4110E-02

3.4360E-02 3.8140E-02 1.4650E-02 2.3820E-02 2.4400E-02 2.0830E-02 1.4060E-02

1.7040E-01 6.4330E-02 6.1160E-02 1.6870E-02 7.2890E-02 4.5980E-02 4.9110E-02

1.7470E-02 4.6330E-02 5.3210E-02 4.7010E-02 1.8460E-02 1.6480E+00 1.5280E-01

2.0350E+00 1.4030E+00 1.9930E+00 1.6250E-02 3.8110E-02 1.5030E-02 2.1210E-02

7.2770E-03 1.5230E-02 1.6460E-02 1.6230E-02 1.1340E-01 2.8650E-02 3.7380E-02

2.6670E-02 2.7730E-02 4.9110E-02 2.1490E-02 2.7110E-02 5.7960E-03 3.7210E-02

3.0120E-02 3.9240E-02 8.1930E-03 1.6050E-01 1.4130E+00 1.2090E+00 2.6270E-03

1.4640E-02 2.1200E-02 5.7460E-03 9.5680E-04 5.9880E-03 9.7200E-03 1.0200E-02

5.6570E-02 1.2240E-02 1.5880E-02 1.9440E-02 1.0130E-02 1.7470E-02 2.7110E-02

7.3210E-03 2.9640E-04 6.4780E-03 2.4620E-02 2.1120E-02 2.5070E+00 1.8000E-01

1.4780E-02 1.8060E-01 5.8010E-02 1.2060E-02 3.2700E-03 1.2090E-01 5.8290E-02

2.1430E-02 4.1660E-03 3.7540E-02 3.8970E-01 4.1470E-02 6.2510E-03 4.6080E-01

1.2920E-01 1.6460E-02 4.3580E-03 1.3060E-01 6.2200E-02 2.1820E-02 4.5600E-03

2.8770E+00 2.1680E-01 7.1980E-02 6.5070E-02 5.0410E-02 8.4090E-03 5.2090E-02

5.2060E-02 4.2270E-02 2.3700E-02 3.0030E-02 1.4970E-01 1.7410E-01 2.3270E-02

1.8350E-01 1.6660E-01 1.2360E-01 1.1650E-02 6.2010E-02 3.8440E-02 3.5480E-02

2.3830E-02 2.1940E+00 2.1520E-02 6.3370E-02 2.8860E-02 3.4760E-02 1.3050E-02

3.7680E-02 3.1670E-02 3.6010E-02 2.2520E-02 4.9150E-02 1.3260E-01 7.6530E-02

4.0630E-02 1.4830E-01 6.3220E-02 9.4480E-02 2.1790E-02 3.5450E-02 2.9030E-02

2.9540E-02 6.2430E-03 2.1780E-02 4.6920E-02 2.5180E-02 2.4120E-03 1.3720E-02

3.0710E-02 3.2060E-02 1.5020E-02 1.5230E-02 6.0020E-02 9.9010E-02 8.3300E-03

4.4970E-02 1.2670E-01 6.5100E-02 4.5590E-03 2.3820E-02 2.9520E-02 2.1500E-02

1.4620E+00 2.5260E-01 6.7940E-02 5.9570E+00 1.4520E+00 2.8390E-01 4.4190E-02

1.1340E+00 2.0190E+00 1.1520E+00 8.0690E-02 1.6590E+00 5.5400E-01 9.7730E-02

7.2000E-03 2.1720E+00 6.5600E-01 1.2980E-01 1.6140E-02 1.3690E+00 1.8450E-01

4.2720E-01 3.4590E+00 1.5220E+00 3.4190E-01 8.4660E-01 1.3700E+00 2.9340E-01

7.7600E-01 5.4740E-01 6.1390E-01 4.7240E-01 1.0930E-01 4.3390E-01 1.0050E+00

6.3860E-01 1.6030E-01 8.8470E-01 3.2380E-02 3.9420E-01 2.1730E+00 1.2040E+00

5.6290E-01 5.6790E-01 6.5430E-01 4.1300E-01 9.5850E-02 4.6780E-01 2.9130E-01

3.1000E-01 3.2760E-02 4.3910E-01 5.2870E-01 4.9140E-01 8.5700E-03 2.4740E-02

2.6860E-01 1.6010E+00 2.8110E-01 1.2390E-01 6.0650E-01 7.9910E-02 7.1990E-03

1.0770E-01 3.1130E-01 1.5820E-01 3.2480E-03 3.7080E-02 3.0530E-01 4.0410E-01

2.9700E+00 2.4430E-01 3.8620E-02 9.1800E-02 8.2800E-02 3.0670E-02 5.4980E-03

5.1350E+00 2.1900E-01 6.1260E-03 1.5050E-03 1.0460E+01 1.9710E+00 1.6310E-01

8.3390E-03 3.4640E+00 2.8060E-01 7.6500E-02 5.2050E-02 2.7890E-02 1.6450E-02

1.1300E+00 3.0970E+00 2.1240E-01 4.9840E-03 2.5900E+00 5.4960E+00 2.1140E+00

1.8210E-01 2.7130E+00 6.1190E-02 3.0040E-02 3.0920E-02 1.9220E-02 1.8210E-01

1.2770E+00 1.9660E+00 1.4760E-01 3.8460E-01 2.7780E+00 3.5220E+00 1.6280E+00

4.5900E-02 1.5530E-02 2.7020E-02 1.5710E-02 1.7880E-02 2.3480E-01 1.0140E+00

1.4320E+00 3.4120E-02 4.7710E-01 2.2260E+00 3.5400E+00 4.8710E-01 3.2470E-01

1.6240E-01 2.0870E+00 1.5640E+00 1.0470E+00 5.2500E-01 1.9820E-02 1.5850E-02

1.1890E-02 7.9270E-03 2.0090E+00 9.8410E-01 4.3030E+00 2.9540E+00 1.1950E+00

2.2860E-01 3.9380E-01 1.6040E-01 6.5290E-02 3.0180E-02 6.7580E-01 2.5510E+00

4.1780E-01 1.4150E+00 1.3760E+00 4.2790E-02 1.9230E-01 1.3890E-01 5.5780E-02

1.0490E-01 1.7670E+00 8.9160E-01 1.0900E-01 2.0820E-02 2.0500E-02 7.5030E-02

1.0020E-01 2.0090E+00 2.6720E-01 3.3730E-02 1.6750E+00 5.7380E-01 1.6770E-01

4.4020E-02 1.8630E+00 2.8580E-01 4.1830E-01 7.6700E-01 4.9050E-01 1.6390E-01

1.2120E+00 8.5870E-02 3.5470E-01 4.4200E-01 3.6490E-01 1.8410E-02 5.9960E-02

2.3300E-01 2.9630E-01 3.9120E+00 3.7010E-01 2.1770E-02 4.3700E+00 4.5490E-01

3.3630E+00

100000.00

3.7770E+00 1.2800E+00 5.7740E-01 2.4720E-01 1.3690E+00 5.6180E-01 1.6300E-01

3.9970E-02 4.1020E+00 3.7580E-01 1.3800E-01 5.0820E-02 5.1460E-01 2.9340E-01

2.0930E-02 2.6220E-01 7.1860E-02 4.4730E-03 6.6980E-01 3.2810E-01 9.9140E-02

1.6360E-02 4.3420E-01 2.1610E-01 1.1590E-01 3.9310E-02 5.3130E-01 2.4020E-01

8.7110E-02 1.8870E-02 2.9500E-01 1.6560E-01 8.1980E-02 4.2530E-02 4.3750E+01

1.0870E+01 2.0290E-01 5.5960E-02 1.9950E-02 4.8740E+01 8.8290E+00 8.6390E-01

4.7920E-02 2.2930E-02 1.1040E-02 2.5650E+01 1.3680E-01 3.5890E-02 1.0270E+00

1.8010E-01 5.0700E-03 1.1490E-03 1.5970E+00 2.0140E-01 2.1480E-02 7.5600E-03

6.4680E-01 9.0970E-03 4.7640E-03 1.9250E-01 1.4420E-01 6.2200E-02 1.4070E-02

1.0620E-01 7.6040E-02 3.2700E-02 8.7510E-03 1.9980E-02 6.3490E-03 2.1030E-03

7.1750E-02 3.5790E-02 1.2490E-02 3.1100E-03 2.8190E-02 2.0110E-02 8.6710E-03

2.1010E-03 7.4070E-02 4.1600E-02 1.4120E-02 2.5310E-03 5.2060E-02 2.0510E-02

4.7560E-03 5.0050E-04 3.8710E-02 1.5080E-02 5.9080E-03 1.7010E-03 3.2720E-02

1.0780E-02 3.2720E-03 1.0290E-03 5.4410E-02 2.4780E-02 1.0710E-02 3.6910E-03

7.3110E-02 2.7670E-02 7.3720E-03 1.0620E-03 4.8630E-02 1.5470E-02 3.6540E-03

6.6260E-04 5.0000E-02 2.3620E-02 8.6710E-03 1.7940E-03 3.7740E-02 1.2850E-02

6.0760E-03 3.1630E-02 2.0400E-02 7.3600E-03 1.6080E-03 2.9480E-02 1.6410E-02

1.0050E-02 7.0400E-03 1.3380E-02 1.0070E-02 3.6710E-03 8.6780E-04 1.0790E-02

8.3370E-03 4.4510E-03 1.4440E-03 1.7170E-02 9.5920E-03 7.5390E-03 4.3810E-03

1.4540E-02 9.8390E-03 5.5550E-03 2.4920E-03 1.9620E-02 1.3450E-02 6.1220E-03

1.7950E-03 3.6940E+00 1.1240E+00 3.6160E-01 6.1540E-01 5.3990E-01 4.1360E-01

1.4990E-01 1.0780E+00 2.4630E+00 2.4500E-01 7.9890E-02 3.8140E-01 1.1720E-01

1.6730E-01 1.4260E-01 8.7300E-02 4.1370E-02 2.9680E-01 2.3530E-01 2.5570E-01

1.0370E-01 2.2920E-01 2.2680E-01 9.5810E-02 9.6950E-02 2.2700E-01 2.3430E-01

1.6010E-01 8.6680E-02 1.8950E-01 1.3760E-01 1.1320E-01 2.9920E-02 9.5410E+00

1.9650E+01 1.4700E+01 2.3360E-01 4.3560E-02 3.6540E-01 3.4800E+01 1.2880E+01

1.8510E+00 5.3320E-02 1.0150E-02 7.0770E+00 1.3080E+01 8.4080E-02 3.3640E-01

4.5600E-01 1.7500E-01 3.9140E-03 3.0890E-01 9.2980E-01 2.0520E-01 1.7720E-02

2.4400E-01 2.8110E-01 3.5530E-03 1.4520E-01 4.9400E-02 7.3270E-02 5.8590E-02

8.4050E-02 5.1590E-02 3.1040E-02 7.0010E-03 1.1470E-02 8.2820E-03 2.9800E-03

3.4770E-02 2.6370E-02 2.5330E-02 1.2090E-02 2.0780E-02 1.0070E-02 1.0580E-02

8.8080E-03 3.6340E-02 2.3830E-02 3.1390E-02 1.4720E-02 2.6090E-02 1.7710E-02

1.3760E-02 4.4050E-03 1.9210E-02 1.7110E-02 8.2820E-03 4.0660E-03 1.2320E-02

1.5040E-02 8.5650E-03 2.8150E-03 2.4140E-02 2.5170E-02 1.5920E-02 9.6510E-03

3.0760E-02 2.9910E-02 1.9960E-02 7.4240E-03 1.5290E-02 2.3100E-02 1.2600E-02

3.7360E-03 2.1360E-02 2.0690E-02 1.6580E-02 8.7520E-03 2.2400E-02 1.7810E-02

5.5620E-03 2.2570E-02 9.6020E-03 1.0860E-02 5.7590E-03 1.7120E-02 1.5100E-02

1.2130E-02 5.0390E-03 1.0730E-02 3.9480E-03 5.0840E-03 2.7840E-03 8.0150E-03

3.8770E-03 4.0520E-03 4.0790E-03 1.3740E-02 8.4150E-03 6.0250E-03 2.7710E-03

1.0760E-02 6.7130E-03 5.6860E-03 2.4130E-03 1.3670E-02 6.6620E-03 7.0650E-03

5.3860E-03 2.7600E+00 7.3200E-01 2.2130E-01 4.3870E-01 3.3850E-01 2.9290E-01

2.9290E-01 1.1440E+00 1.3470E+00 1.2940E-01 2.2030E-01 1.4300E-01 1.3640E-01

6.8360E-02 8.2830E-02 5.2520E-02 8.3210E-02 2.2130E-01 1.5910E-01 2.0510E-01

1.2530E-01 1.1720E-01 1.6570E-01 7.6510E-02 8.4630E-02 1.5790E-01 1.6400E-01

1.3140E-01 1.1330E-01 1.2520E-01 6.1390E-02 5.1520E-02 1.6300E-01 1.3500E+01

5.9770E+00 1.3540E+01 1.8030E-01 4.8900E-02 3.8050E-01 2.2800E+01 1.3180E+01

2.4930E+00 5.0150E-02 1.1930E+00 9.0300E+00 4.8170E+00 8.0350E-02 3.1440E-01

2.3160E-01 1.0180E-01 4.0380E-02 3.7060E-01 5.5450E-01 1.3080E-01 7.6730E-02

2.2850E-01 9.1330E-02 7.3550E-02 6.4760E-02 4.9030E-02 6.0420E-02 5.8480E-02

4.0280E-02 2.3100E-02 5.2500E-03 6.3810E-03 6.9580E-03 3.7000E-03 1.2560E-02

2.3410E-02 1.8000E-02 1.9970E-02 7.2440E-03 9.1960E-03 7.8440E-03 1.1220E-02

1.0390E-02 2.6020E-02 1.6890E-02 2.6390E-02 1.0810E-02 1.6390E-02 1.1280E-02

8.3520E-03 9.5700E-03 1.2130E-02 1.0200E-02 4.5990E-03 4.2820E-03 1.0180E-02

9.2860E-03 5.9490E-03 1.0200E-02 1.5680E-02 1.7510E-02 1.2760E-02 1.0310E-02

2.3020E-02 1.8820E-02 1.4580E-02 3.6370E-03 1.2950E-02 1.4950E-02 9.4250E-03

7.1860E-03 1.4690E-02 1.4680E-02 1.3970E-02 1.3860E-02 1.3980E-02 6.5910E-03

1.2200E-02 1.0470E-02 7.5730E-03 6.3520E-03 1.0520E-02 1.2560E-02 7.8910E-03

6.2930E-03 5.7950E-03 4.5690E-03 3.3510E-03 2.9080E-03 4.2480E-03 3.6160E-03

3.3810E-03 3.7720E-03 1.0620E-02 6.8570E-03 4.2140E-03 1.8380E-03 6.9870E-03

6.0020E-03 3.5910E-03 2.5940E-03 7.0840E-03 6.5890E-03 5.3790E-03 5.5420E-03

1.6590E+00 6.5190E-02 2.3140E-01 2.8490E-01 2.7930E-01 1.0930E-01 3.0700E-01

9.3450E-01 5.8890E-01 9.9110E-02 1.6560E-01 6.8460E-02 2.6480E-02 6.3380E-02

4.5410E-02 1.1720E-02 1.0860E-01 1.4090E-01 1.8440E-01 5.6630E-02 8.1580E-02

1.0860E-01 7.8150E-02 2.3110E-02 8.2380E-02 1.2330E-01 1.3090E-01 6.8690E-02

7.4940E-02 5.4450E-02 3.7670E-02 3.4720E-02 2.2170E-01 1.2790E+01 5.7180E-01

8.7330E+00 2.6770E-02 3.6170E-02 2.8160E-01 1.3150E+01 1.0790E+01 2.2690E+00

4.2290E-02 2.9310E+00 6.9570E+00 1.1570E-02 1.2170E-01 2.0130E-01 1.4970E-01

7.7840E-03 6.0790E-02 3.3110E-01 3.2930E-01 1.9540E-02 1.1000E-01 1.3480E-01

2.5880E-02 5.9080E-02 4.6670E-02 3.3550E-02 3.7790E-02 2.9900E-02 1.3370E-02

3.5000E-03 3.3460E-03 4.6050E-03 3.4150E-03 3.2880E-03 1.3050E-02 1.5550E-02

1.7260E-02 1.8800E-03 7.1960E-03 6.9110E-03 7.3480E-03 1.3400E-03 1.3570E-02

1.6110E-02 2.1890E-02 3.4160E-03 1.0480E-02 1.0280E-02 6.8390E-03 4.3220E-03

7.2720E-03 8.1330E-03 4.7600E-03 1.4360E-03 4.2570E-03 6.8270E-03 6.5980E-03

3.7710E-03 8.5130E-03 1.2480E-02 1.2670E-02 2.5440E-03 1.1210E-02 1.5220E-02

1.4760E-02 7.2620E-04 4.3720E-03 1.0100E-02 1.1890E-02 1.5570E-03 7.4610E-03

1.1190E-02 1.3360E-02 7.8610E-03 8.3430E-03 6.2510E-03 5.1750E-03 9.2440E-03

6.4310E-03 3.6710E-03 6.7920E-03 6.6820E-03 6.1790E-03 5.5360E-03 2.5840E-03

4.4060E-03 2.7530E-03 1.3840E-03 1.6020E-03 3.1790E-03 2.9450E-03 2.2890E-03

6.8690E-03 4.8710E-03 2.5560E-03 1.1770E-03 4.3910E-03 4.2120E-03 2.8160E-03

1.6250E-03 2.7770E-03 5.4680E-03 4.6870E-03 3.4640E-03 1.6420E-02 7.1530E-02

1.8340E-01 1.5860E-01 4.3590E-02 7.5820E-02 2.4540E-01 6.0380E-01 3.1680E-02

1.1230E-01 2.1930E-02 7.7260E-03 3.4490E-02 2.5830E-02 5.4350E-04 1.8890E-02

1.0510E-01 9.8300E-02 1.7180E-02 5.5320E-02 3.3150E-02 5.7060E-02 3.1570E-03

3.2590E-02 6.3160E-02 8.0040E-02 3.3820E-02 2.6940E-02 4.2400E-02 1.4680E-02

9.4520E-03 4.3650E-02 1.7910E-01 8.4670E+00 2.5400E+00 1.3200E-02 1.1120E-02

1.9250E-02 1.5460E-01 5.8750E+00 7.3630E+00 1.4330E-02 4.2670E-02 4.8860E+00

1.1410E-03 1.9750E-02 1.1460E-01 1.0640E-01 3.7480E-03 3.5360E-03 6.1280E-02

2.9570E-01 4.0940E-03 3.2140E-02 9.5910E-02 5.0830E-03 3.2610E-02 3.4290E-02

9.5590E-03 2.0680E-02 1.5920E-02 6.0680E-03 1.7500E-03 1.4520E-03 2.2120E-03

2.0320E-03 7.0340E-04 4.0760E-03 1.0750E-02 9.1080E-03 2.0730E-04 2.7070E-03

5.9990E-03 3.6150E-03 3.4540E-06 2.2710E-03 1.3380E-02 1.1000E-02 7.2470E-04

4.5590E-03 6.9610E-03 3.3220E-03 1.5610E-03 3.6210E-03 3.9170E-03 3.1000E-03

4.8640E-04 1.3440E-03 3.4900E-03 4.4710E-03 1.0520E-03 3.8490E-03 5.7900E-03

8.0290E-03 3.3860E-04 3.6430E-03 8.9270E-03 9.3700E-03 1.2930E-04 9.9180E-04

3.9500E-03 8.2890E-03 1.6040E-04 2.2790E-03 6.2990E-03 7.9130E-03 3.7320E-03

3.6440E-03 3.8680E-03 1.6180E-03 5.1760E-03 4.5400E-03 1.0600E-03 3.5560E-03

2.2410E-03 3.7240E-03 3.0710E-03 8.4920E-04 2.6120E-03 1.8650E-03 2.5920E-04

3.6840E-04 1.8480E-03 1.8580E-03 9.3210E-04 3.4350E-03 2.5330E-03 1.1800E-03

5.8660E-04 2.0400E-03 2.0010E-03 1.8700E-03 5.9280E-04 7.5680E-04 2.9640E-03

3.1000E-03 1.3770E-03 2.1370E+01 7.1610E+00 3.6010E+00 1.8820E+00 6.3720E-01

1.3180E-01 2.9890E-02 1.2320E+00 4.5770E-01 1.6310E-01 5.1950E-01 9.5800E-02

2.7220E-02 1.5360E+00 4.9490E-01 1.3590E-01 3.7410E-02 1.4390E+00 4.2100E-01

1.2790E-01 4.1050E-02 1.0550E+00 3.9370E-01 1.2400E-01 4.0720E-02 6.8720E-01

2.9920E-01 1.2910E-01 5.0430E-02 5.7320E-01 2.4480E-01 8.9820E-02 2.6460E-02

4.6800E-03 5.3340E-01 2.6980E-01 1.1490E-01 3.9310E-02 9.9060E-03 1.6600E-03

1.9150E-01 8.8190E-02 1.6730E-02 1.4470E+01 2.8550E-01 8.4950E-02 1.5450E-02

6.7120E+00 7.2620E-01 9.3300E-02 2.2910E-02 3.3190E-01 1.3000E-01 1.6030E-02

5.6410E-01 2.4630E-01 1.1640E-01 6.3180E-02 4.0880E-02 1.9060E-02 8.3970E-03

6.8380E-02 1.0140E-01 6.0340E-02 7.5480E-03 5.0890E+00 5.0900E-01 4.0680E-02

4.4180E-03 1.8890E-01 8.9100E-02 2.3210E-02 2.7050E-03 2.2420E-01 1.5400E-01

2.7430E-02 2.6830E-03 2.4060E+00 4.8330E-02 8.7100E-03 1.4700E-03 9.3040E-01

3.1600E-02 6.0210E-03 1.9760E-03 1.1940E+00 1.5320E-01 1.6420E-02 2.9260E-03

1.6690E+00 1.8020E-01 2.4730E-02 4.0350E-03 4.3830E+00 6.5500E-01 2.1530E-02

4.3300E-03 1.1790E+00 1.2830E-01 2.7130E-02 3.4980E-03 2.7130E-01 9.8800E-02

2.5250E-02 3.0400E-03 2.9820E-02 1.3470E-02 2.2790E-03 5.0530E-01 3.4890E-02

1.1530E-02 2.4970E-03 6.5090E-02 2.0870E-02 5.9840E-03 1.2510E-03 2.0330E-01

1.6430E-02 4.0960E-03 8.8700E-04 8.5160E-02 2.3220E-02 6.9280E-03 1.1360E-03

2.2560E-02 8.5560E-03 5.9430E-03 7.3940E-04 1.3490E-01 8.4840E-03 2.5600E-03

3.6430E-04 2.0160E-01 4.0910E-02 5.5260E-03 1.1020E-03 2.5380E+01 6.6070E+00

7.8880E-01 7.2770E-01 5.2010E-01 1.1070E-01 7.2220E-01 5.4730E-01 2.0340E-01

2.3830E-01 2.2850E-01 5.0420E-02 3.4130E-01 8.2730E-01 4.6930E-01 1.4370E-01

4.1860E-01 7.5750E-01 3.4260E-01 1.1710E-01 3.2460E-01 5.2660E-01 3.3440E-01

1.2130E-01 3.4710E-01 3.2910E-01 1.8570E-01 7.3960E-02 2.1350E-01 2.5820E-01

1.6780E-01 8.6480E-02 3.5120E-02 1.9800E-01 1.9340E-01 1.7950E-01 1.2180E-01

5.9660E-02 1.9280E-02 1.1100E-01 6.5660E-02 6.0400E-02 1.9220E+00 9.6900E+00

1.9210E-01 6.6860E-02 7.3970E-01 4.2480E+00 8.0580E-01 9.4260E-02 2.0000E-01

1.1160E-01 7.8090E-02 2.4620E-01 2.8420E-01 1.8330E-01 7.7930E-02 2.6820E-02

1.9770E-02 8.1850E-03 5.4690E-02 7.5520E-02 2.3780E-02 3.6490E-02 8.7730E-02

3.6860E+00 6.3190E-01 4.6940E-02 6.2130E-02 1.4180E-01 8.4150E-02 2.7290E-02

8.5660E-02 2.7640E-01 1.6690E-01 3.3000E-02 3.1420E-01 1.6070E+00 3.3920E-02

8.0170E-03 1.8570E-01 6.1290E-01 2.0150E-02 5.3310E-03 1.5240E-01 7.5380E-01

1.6740E-01 1.7900E-02 7.4100E-02 1.0200E+00 2.0220E-01 2.8020E-02 4.5860E-01

4.0810E+00 5.6220E-01 2.3010E-02 7.1590E-02 8.4000E-01 1.5180E-01 3.1140E-02

7.0850E-02 1.2660E-01 9.1110E-02 2.9680E-02 1.8400E-02 1.0700E-02 7.4010E-03

8.7840E-02 3.2210E-01 1.8720E-02 9.8890E-03 2.0830E-02 3.3380E-02 1.5600E-02

6.3190E-03 3.7910E-02 1.2730E-01 1.0600E-02 3.3660E-03 1.8750E-02 5.1590E-02

2.0070E-02 7.7960E-03 1.8040E-02 6.9470E-03 2.7700E-03 3.4010E-03 2.3770E-02

8.5220E-02 6.0840E-03 2.0290E-03 3.4040E-02 1.2140E-01 4.1280E-02 5.9580E-03

2.1740E+01 2.5310E-01 6.4020E-01 3.9030E-01 3.3170E-01 4.3550E-01 4.2310E-01

2.4350E-01 1.0310E-01 1.8010E-01 1.0430E-01 6.4780E-02 3.1650E-01 5.6720E-01

3.9050E-01 1.2700E-01 3.4090E-01 4.9900E-01 2.6120E-01 8.8070E-02 2.7960E-01

3.4900E-01 2.7220E-01 1.7660E-01 2.3200E-01 1.9400E-01 1.0150E-01 6.8450E-02

1.4510E-01 1.7090E-01 1.2800E-01 6.2200E-02 3.8900E-02 1.4280E-01 1.3070E-01

1.1470E-01 9.6060E-02 5.7540E-02 5.0790E-02 6.5070E-02 6.1830E-02 2.1040E-01

2.2520E+00 6.3220E+00 1.2220E-01 9.1300E-02 7.7900E-01 2.8510E+00 6.1130E-01

9.9780E-02 1.1090E-01 7.6570E-02 1.1640E-01 1.8320E-01 1.6960E-01 1.2380E-01

1.7590E-02 1.5330E-02 8.1570E-03 4.1030E-02 4.2230E-02 3.3530E-02 2.5570E-02

1.2400E-02 1.0050E-01 3.9920E+00 4.8740E-01 9.3840E-03 5.7550E-02 1.0130E-01

7.1690E-02 8.3460E-04 9.8110E-02 1.8480E-01 1.3760E-01 2.9400E-02 3.7340E-01

1.0460E+00 2.2330E-02 1.6130E-02 1.5010E-01 3.9290E-01 1.3320E-02 1.6050E-02

1.6700E-01 5.0880E-01 1.2770E-01 1.3290E-02 6.5510E-02 7.5410E-01 1.5930E-01

2.0160E-02 5.5740E-01 2.7570E+00 4.2090E-01 1.5910E-02 5.8330E-02 6.2340E-01

1.2280E-01 1.0140E-02 6.3760E-02 8.4790E-02 7.8240E-02 9.9630E-03 1.0280E-02

6.6580E-03 2.0010E-02 8.4510E-02 2.1170E-01 1.3180E-02 5.9720E-03 1.5590E-02

2.2610E-02 1.2390E-02 7.6360E-03 3.6860E-02 8.1800E-02 6.6290E-03 4.7170E-03

1.5970E-02 3.7030E-02 1.6880E-02 1.3530E-02 3.8100E-03 2.9230E-03 2.0520E-03

4.0670E-03 2.4560E-02 5.4780E-02 4.0040E-03 5.4920E-03 4.1200E-02 8.1700E-02

3.1600E-02 6.9800E-02 2.6210E-01 4.7840E-01 2.7580E-01 2.2220E-01 3.0810E-01

2.1430E-01 4.3210E-02 9.5830E-02 1.2060E-01 1.8110E-02 6.0170E-02 2.4900E-01

5.6660E-01 4.0970E-02 1.1690E-01 2.6090E-01 4.0090E-01 2.7450E-02 7.9650E-02

2.1940E-01 3.3280E-01 8.8600E-02 1.2890E-01 1.4950E-01 1.0310E-01 1.3120E-02

6.7500E-02 1.0820E-01 1.1670E-01 7.6170E-02 3.9880E-03 3.6300E-02 9.2610E-02

1.1140E-01 9.2130E-02 5.0400E-02 1.5630E-02 5.7570E-02 4.5200E-02 3.8090E-02

2.4110E-01 1.7170E+00 3.9390E+00 2.2440E-02 9.4770E-02 6.1090E-01 2.2470E+00

3.8110E-02 1.0260E-01 5.5370E-02 6.3170E-02 7.7920E-02 1.2380E-01 1.3080E-01

1.0640E-02 9.6720E-03 6.7850E-03 2.7340E-02 1.7240E-02 4.1320E-02 9.7850E-03

2.4170E-03 1.3240E-02 7.8520E-02 3.0280E+00 2.5000E-04 1.0880E-02 4.6480E-02

9.9110E-02 9.5670E-05 8.9920E-04 7.4690E-02 2.0030E-01 3.9060E-03 3.6040E-02

2.5980E-01 6.5470E-01 3.2670E-03 1.9130E-02 1.3200E-01 2.9180E-01 2.8430E-03

1.7760E-02 1.2750E-01 3.9910E-01 1.6700E-03 1.4510E-02 5.2550E-02 5.8380E-01

4.0200E-03 2.2420E-02 5.9700E-01 2.1520E+00 1.5310E-03 1.7960E-02 4.8140E-02

4.8260E-01 1.0490E-04 1.1830E-02 5.2640E-02 9.1690E-02 4.9950E-03 8.5600E-03

4.7990E-03 5.7910E-03 1.9800E-02 6.5990E-02 1.2920E-01 1.2480E-03 6.3140E-03

1.2380E-02 1.9000E-02 1.9560E-03 7.6570E-03 2.8260E-02 5.0730E-02 5.5510E-04

5.2020E-03 1.3280E-02 3.1540E-02 9.0230E-03 1.8020E-03 3.1340E-03 9.3370E-04

9.4670E-04 4.5410E-03 1.8170E-02 3.4090E-02 9.6060E-04 6.0290E-03 3.1600E-02

6.4730E-02 1.8490E+01 5.3490E+00 2.1480E+00 9.8430E-01 4.8930E-01 5.4950E-02

1.9320E-01 7.8590E-02 1.5340E-02 2.9300E-01 1.5090E-01 6.6560E-02 1.8030E-02

2.6710E-01 1.3320E-01 6.6470E-02 2.8900E-02 2.6840E-01 1.2870E-01 5.5350E-02

2.0140E-02 1.9850E-01 1.0320E-01 5.5780E-02 2.5160E-02 1.5350E+00 5.5410E-01

1.4620E-01 2.8260E-02 5.3530E-03 2.0910E+00 6.7360E-01 1.8320E-01 4.2710E-02

1.0650E-02 3.5120E-03 1.0490E+00 1.3660E-01 1.2420E-02 3.5550E+01 5.4180E+00

7.2920E-02 1.3510E-02 4.8390E+01 6.0930E+00 3.8980E-01 5.3790E-02 2.3210E+01

1.0410E-01 3.7420E-02 6.7760E-02 4.2400E-02 2.2270E-02 8.7960E-03 3.9880E-02

2.5400E-02 1.1420E-02 3.9860E-03 2.3510E-02 3.9220E-03 1.7610E-03 7.1940E-02

3.5750E-02 1.5220E-02 3.9490E-03 1.1900E-02 6.7360E-03 3.3400E-03 1.3060E-03

2.9570E-02 1.6050E-02 7.2300E-03 2.0340E-03 2.8200E-01 4.7970E-02 4.5400E-03

9.6350E-04 3.3750E-01 5.7870E-02 8.0640E-03 2.6510E-03 2.8480E-02 9.9050E-03

4.5180E-03 1.3240E-03 4.3580E-02 2.3510E-02 1.0620E-02 3.8440E-03 2.8500E-01

4.9860E-02 1.0320E-02 2.4380E-03 2.1440E-02 9.9600E-03 3.9870E-03 1.0380E-03

2.6860E-02 1.0900E-02 4.4620E-03 1.6570E-03 1.6760E-01 1.3930E-02 7.1150E-03

2.9240E-02 1.4690E-02 6.0940E-03 1.9610E-03 1.2790E-02 7.5510E-03 4.5190E-03

2.6980E-03 1.6210E-02 1.1110E-02 5.4440E-03 1.7720E-03 4.5920E-03 3.1910E-03

1.9610E-03 9.0290E-04 1.0570E-02 4.6500E-02 2.3340E-03 1.2170E-03 1.2150E-02

4.2780E-03 1.5950E-03 6.7350E-04 4.3640E-02 8.0580E-03 1.5040E-03 4.2820E-04

1.7900E+01 3.0880E+00 6.0280E-01 2.2500E-01 3.1660E-01 1.0370E-01 6.6010E-02

4.5650E-02 1.0110E-01 1.1970E-01 1.0340E-01 7.3570E-02 1.1200E-01 1.2420E-01

8.2910E-02 5.1710E-02 9.0740E-02 1.2040E-01 9.1270E-02 5.5150E-02 9.8540E-02

1.0820E-01 6.0820E-02 2.4310E-02 2.9450E-01 7.0910E-01 4.9910E-01 2.0390E-01

3.9170E-02 3.7310E-02 1.0850E+00 7.3460E-01 3.0240E-01 8.1720E-02 1.3000E-02

2.4500E-01 5.4820E-01 1.0560E-01 5.3670E+00 1.7790E+01 7.4010E+00 7.1640E-02

4.0380E-01 3.3370E+01 6.8180E+00 4.8140E-01 5.3350E+00 1.2110E+01 5.5130E-02

3.8190E-02 2.3930E-02 2.2840E-02 1.8540E-02 2.9160E-02 1.7780E-02 1.0410E-02

3.1500E-03 6.9440E-03 1.1450E-02 1.6770E-03 2.6350E-02 2.9370E-02 2.3140E-02

1.6720E-02 4.9370E-03 4.9040E-03 4.2250E-03 3.5000E-03 1.0090E-02 1.1910E-02

1.0680E-02 8.2600E-03 5.4220E-02 1.4340E-01 6.0590E-02 4.0440E-03 6.4850E-02

1.6580E-01 5.6080E-02 5.6440E-03 7.6100E-03 1.3650E-02 7.6060E-03 4.4900E-03

1.7750E-02 1.8450E-02 1.4640E-02 1.0840E-02 1.8620E-02 1.8960E-01 5.0690E-02

1.1020E-02 8.0700E-03 9.0800E-03 6.8760E-03 5.0190E-03 6.4050E-03 1.1790E-02

7.7110E-03 4.7130E-03 4.8220E-02 8.7670E-02 5.0640E-03 1.4660E-02 1.1470E-02

8.2710E-03 4.9500E-03 6.5710E-03 6.6330E-03 4.7160E-03 2.7600E-03 1.1110E-02

5.7460E-03 5.3830E-03 3.6950E-03 2.7040E-03 1.8450E-03 1.6750E-03 1.6490E-03

7.9280E-03 1.2540E-02 2.4400E-02 8.3940E-04 4.2770E-03 5.2360E-03 2.9870E-03

8.3170E-04 1.7900E-03 2.5080E-02 8.3550E-03 1.4670E-03 1.1530E+01 2.5410E-01

3.1200E-01 1.9920E-01 4.5290E-02 5.9210E-02 3.8320E-02 2.2340E-02 6.6430E-02

8.3690E-02 8.9620E-02 4.7060E-02 6.8560E-02 7.9240E-02 5.5280E-02 2.6870E-02

6.0660E-02 7.9530E-02 7.2200E-02 5.3840E-02 6.0830E-02 5.3530E-02 2.7610E-02

2.1480E-02 2.8940E-01 3.6390E-01 3.1620E-01 1.8210E-01 1.2670E-02 2.3220E-02

5.0200E-01 5.4750E-01 3.1450E-01 1.0210E-01 3.3670E-02 2.6950E-01 2.9500E-01

8.1330E-02 7.3740E+00 8.2880E+00 5.2480E+00 8.1280E-02 3.0430E-01 2.1720E+01

5.7700E+00 6.6100E-01 6.1850E+00 4.8180E+00 1.5610E-02 2.1050E-02 1.7440E-02

1.5400E-02 1.8910E-02 1.3340E-02 6.9820E-03 1.9930E-03 3.1060E-03 6.2950E-03

4.6360E-03 6.7600E-03 1.5900E-02 2.1530E-02 1.9190E-02 1.4160E-03 2.8460E-03

3.6690E-03 3.6020E-03 2.2130E-03 6.5040E-03 8.9070E-03 9.7440E-03 4.3370E-03

6.0420E-02 6.5810E-02 4.1750E-02 7.8320E-03 5.5750E-02 7.9430E-02 4.9520E-02

2.9770E-03 5.3480E-03 9.0580E-03 5.6010E-03 5.5900E-03 1.0070E-02 1.3860E-02

1.1510E-02 5.1820E-03 1.1870E-02 1.2040E-01 3.8350E-02 1.9440E-03 4.5220E-03

7.6320E-03 5.6530E-03 1.9400E-03 4.0180E-03 8.2100E-03 6.5140E-03 1.3950E-02

4.6250E-02 3.3800E-02 6.0880E-03 8.2660E-03 7.2690E-03 4.1830E-03 3.5650E-03

3.7690E-03 3.6870E-03 2.6470E-03 5.4450E-03 5.3820E-03 4.1530E-03 2.3030E-03

1.1630E-03 1.3550E-03 1.3770E-03 1.2150E-03 5.2860E-03 3.3590E-03 1.3000E-02

9.2920E-03 1.5960E-03 2.9880E-03 2.7830E-03 1.5410E-03 7.3050E-04 1.0240E-03

1.6870E-02 5.3900E-03 6.5030E-02 2.5100E-01 6.6920E-02 1.4400E-02 3.7270E-02

2.0360E-02 1.2690E-03 2.3070E-02 4.7130E-02 5.9590E-02 1.4720E-02 3.0590E-02

3.8670E-02 4.1310E-02 5.6480E-03 2.1990E-02 3.9720E-02 5.1640E-02 2.5140E-02

2.4300E-02 2.7610E-02 2.0980E-02 5.5690E-03 1.6320E-02 1.6850E-01 2.3390E-01

1.6170E-01 4.6910E-03 6.9180E-03 1.1740E-02 1.8060E-01 3.0850E-01 2.3770E-01

3.5500E-03 4.4320E-02 2.5040E-01 1.2420E-02 6.9660E-02 5.2420E+00 5.1380E+00

4.0140E-02 3.7600E-02 2.1610E-01 1.3610E+01 2.5290E-02 1.0120E+00 4.7600E+00

4.3620E-03 1.1600E-02 1.1570E-02 6.7600E-03 8.8810E-03 7.2890E-03 3.2830E-03

9.9650E-04 1.3670E-03 1.6550E-03 3.7870E-03 3.7330E-04 7.0170E-03 1.0930E-02

1.3100E-02 2.2810E-04 1.3680E-03 1.9570E-03 2.2740E-03 3.9710E-06 2.4140E-03

4.8330E-03 6.3530E-03 9.6100E-04 4.0380E-03 4.1720E-02 4.0660E-02 2.6250E-03

5.5590E-03 4.9480E-02 4.6690E-02 5.3540E-04 2.5880E-03 3.2300E-03 4.9810E-03

7.9460E-04 4.7140E-03 6.4390E-03 7.7690E-03 8.6110E-04 4.9110E-03 7.6550E-03

7.6650E-02 1.2600E-04 1.9100E-03 3.1020E-03 4.9060E-03 2.5800E-04 1.6200E-03

2.7760E-03 5.8590E-03 5.2610E-03 9.3140E-03 3.2820E-02 1.9600E-03 4.9490E-03

4.1820E-03 2.4320E-03 1.6340E-03 1.7130E-03 1.7390E-03 1.7300E-03 1.7720E-03

3.6940E-03 2.3030E-03 8.4250E-04 3.1060E-04 8.6020E-04 7.8300E-04 7.2070E-04

2.6430E-03 9.0500E-04 2.9220E-03 8.5970E-03 6.7340E-04 8.3160E-04 1.5410E-03

1.0890E-03 2.0350E-04 5.2110E-04 5.7320E-04 9.5710E-03 8.3840E-01 3.6670E-01

3.1290E+00 1.8280E-01 5.6270E-02 1.3400E-01 7.3040E-02 3.7510E-02 1.8620E-02

5.2140E-01 2.3530E-01 1.0020E-01 4.3990E-02 1.1670E-01 7.4450E-02 4.2930E-02

2.2620E-02 4.3090E-01 2.7240E-01 1.2810E-01 4.3190E-02 1.9160E-01 1.2810E-01

7.4350E-02 3.7720E-02 1.4370E-02 2.1960E-01 1.8260E-01 1.2460E-01 7.0820E-02

3.2870E-02 1.1370E-02 2.0560E-01 1.2040E-01 3.4110E-02 3.5830E+00 9.3170E-01

1.8140E-01 4.2390E-02 4.4370E-01 3.5020E-01 1.9060E-01 6.8010E-02 8.1250E+00

3.5180E+00 4.8310E-02 2.9300E-01 1.2380E-01 4.7080E-02 1.8020E-02 2.4000E-01

1.4250E-01 8.0560E-02 1.0480E+00 1.0600E+00 7.8800E-01 1.7760E-02 8.5440E-02

4.0750E-02 1.6160E-02 8.2600E-03 1.0360E-02 6.1210E-03 3.1050E-03 1.2820E-03

2.0150E-02 1.0200E-02 4.5150E-03 1.5430E-03 1.9000E+00 5.8330E-01 1.1140E-01

1.2990E-02 1.8900E+00 4.4550E-01 6.6120E-02 5.6180E-03 6.4570E-02 2.7070E-02

9.7800E-03 3.0460E-03 1.1400E-01 5.3300E-02 2.2190E-02 7.8330E-03 3.9460E-02

2.4160E-02 1.4780E-02 6.5510E-03 1.0140E-02 5.6370E-03 2.8290E-03 1.3900E-03

6.2480E-03 4.1930E-03 2.2470E-03 9.4370E-04 1.7430E+00 7.6180E-01 1.7080E-02

1.0040E+00 3.2130E-01 4.6070E-02 9.3530E-03 1.2000E-01 9.8050E-02 5.7510E-02

2.4740E-02 1.2090E+00 3.1410E-01 7.4160E-02 1.7700E-02 1.7360E-01 7.7590E-02

3.0250E-02 8.6660E-03 9.3210E-01 2.7830E-01 1.3520E-01 1.5510E-02 3.1490E-01

1.0490E-01 4.3920E-02 2.0750E-02 6.1160E-02 2.7400E-02 1.0480E-02 3.0570E-03

3.2700E-01 1.8270E-01 1.9620E+00 1.0070E-01 2.4940E-02 5.9190E-02 5.4610E-02

3.6780E-02 9.2790E-02 2.4030E-01 1.8520E-01 9.2660E-02 4.3610E-02 4.5130E-02

4.3860E-02 3.8610E-02 2.1830E-01 1.3050E-01 1.4040E-01 9.8810E-02 8.1490E-02

7.0460E-02 6.5660E-02 5.2400E-02 2.9120E-02 1.4570E-01 4.9100E-02 4.8880E-02

6.8840E-02 7.0760E-02 4.4420E-02 1.0130E-01 4.3280E-02 9.4420E-02 1.5080E-01

1.8530E+00 9.6150E-01 1.9430E-01 2.9080E-01 6.4720E-02 1.4070E-01 2.0420E-01

3.5060E+00 1.0580E+00 3.2150E+00 3.9310E-02 1.3070E-01 1.0180E-01 4.9620E-02

1.4200E-01 1.3520E-01 3.2670E-02 6.0160E-01 5.1520E-01 1.8750E-01 5.5160E-01

1.0110E-02 3.7750E-02 3.3030E-02 1.9490E-02 2.3080E-03 3.7140E-03 3.7600E-03

3.6750E-03 2.1300E-03 8.1250E-03 8.2830E-03 5.6290E-03 4.0210E-02 9.0050E-01

5.0930E-01 1.1860E-01 2.3910E-02 9.8720E-01 4.7360E-01 1.2400E-01 8.3460E-03

2.7460E-02 2.1850E-02 1.1330E-02 1.5790E-02 4.7510E-02 4.2620E-02 2.6160E-02

1.4990E-02 1.4480E-02 1.3890E-02 1.0330E-02 2.1590E-03 4.7610E-03 4.1100E-03

2.4170E-03 1.6630E-03 2.7180E-03 2.4150E-03 2.3850E-03 7.5620E-01 2.3780E-01

6.8430E-01 3.4990E-02 4.7330E-01 2.7410E-01 5.1920E-02 7.9140E-02 2.7110E-02

4.0240E-02 5.0800E-02 4.3090E-02 6.3870E-01 3.2870E-01 5.8690E-02 1.6030E-02

7.3190E-02 6.4820E-02 3.7470E-02 6.2020E-01 1.3440E-01 4.6630E-02 1.0730E-01

4.7000E-02 1.7360E-01 8.9650E-02 1.8480E-02 1.1100E-02 2.4210E-02 2.0590E-02

1.2560E-02 5.6200E-02 1.0070E-01 9.6230E-01 7.0860E-03 1.3600E-02 2.7310E-02

3.8820E-02 2.8270E-02 4.7480E-02 1.0390E-01 1.2220E-01 1.0260E-02 2.3320E-02

2.7460E-02 2.4600E-02 4.5850E-02 1.2790E-01 8.6500E-02 3.4380E-02 1.8850E-02

4.2750E-02 4.2050E-02 3.0900E-02 1.5900E-02 1.3550E-03 7.3900E-02 7.1180E-02

4.3760E-02 1.8600E-02 4.9490E-03 1.3200E-02 7.5460E-02 3.1400E-02 5.1960E-02

7.4530E-02 7.4780E-01 7.0630E-01 1.7530E-02 1.8380E-01 1.1920E-01 2.8340E-02

4.6190E-02 3.2120E+00 6.4610E-01 8.8790E-03 2.1530E-02 5.8440E-02 7.1740E-02

8.0470E-02 3.2650E-02 3.8000E-02 3.4880E-01 1.8210E-02 4.9330E-01 1.1190E-01

4.1450E-03 5.6530E-03 1.6400E-02 2.3940E-02 2.7530E-04 1.3410E-03 2.4460E-03

2.7370E-03 1.1060E-04 1.2340E-03 3.9500E-03 6.6880E-03 1.1270E-02 2.4450E-02

4.7190E-01 5.5940E-01 6.4930E-03 1.4380E-02 5.6410E-01 3.9010E-01 1.3140E-03

4.9550E-03 1.3070E-02 1.5330E-02 2.0890E-03 9.4440E-03 2.3010E-02 3.2400E-02

4.2910E-03 7.5990E-03 8.5070E-03 5.9810E-03 5.9210E-04 1.0430E-03 2.0400E-03

2.5150E-03 9.6580E-05 1.0660E-03 1.6350E-03 2.2080E-03 1.5800E-02 6.8250E-01

1.4040E-01 1.1490E-02 1.7120E-02 1.9040E-01 2.8480E-01 1.2450E-02 4.6480E-02

3.1090E-02 8.7890E-03 2.3420E-02 1.4550E-02 2.4920E-01 2.4380E-01 1.2750E-03

7.7250E-03 3.4200E-02 4.9670E-02 3.0920E-01 1.5260E-02 1.0710E-01 2.2010E-02

2.8580E-02 1.3210E-02 6.2840E-02 5.9160E-02 8.7020E-04 6.7980E-03 1.2790E-02

1.3700E-02 2.3930E+00 4.2930E-01 3.4230E-01 1.8290E-01 9.5710E-02 4.7630E-02

4.2830E-01 2.9830E-01 2.0980E-01 1.6390E-01 2.6020E-01 1.5630E-01 8.8470E-02

4.3640E-02 3.1170E-01 2.1540E-01 1.3120E-01 5.4590E-02 6.7130E-02 4.0380E-02

2.1380E-02 1.0680E-02 4.1470E-03 7.1670E-02 4.1410E-02 2.2370E-02 1.1110E-02

4.9290E-03 1.7490E-03 2.9520E-02 2.0270E-02 8.9220E-03 2.4920E-01 1.0660E-01

3.8630E-02 1.2760E-02 9.0500E-02 5.7950E-02 3.1210E-02 1.3590E-02 7.0070E-01

3.5080E-01 2.1880E-02 1.5990E-01 7.3050E-02 3.3300E-02 1.5220E-02 1.7660E-01

1.7170E-01 1.1380E-01 8.7720E+00 1.3750E+01 5.9440E+00 1.5640E-01 3.0000E-02

1.7020E-02 1.0300E-02 6.4570E-03 1.0240E-02 5.8530E-03 2.9500E-03 1.2090E-03

2.3160E-02 1.1710E-02 5.1810E-03 1.6730E-03 2.5240E+01 5.9970E+00 8.6340E-01

3.9420E-02 9.0060E-02 3.2030E-02 2.0150E-02 1.5650E-02 2.8310E-02 1.8290E-02

1.1850E-02 6.3700E-03 2.5020E-02 1.7990E-02 1.3940E-02 1.6700E-02 3.0950E-02

1.9940E-02 9.5730E-03 4.1290E-03 9.3360E-03 5.7980E-03 4.4890E-03 2.1280E-03

1.2780E-02 8.5940E-03 4.9820E-03 2.2820E-03 5.7120E-01 2.0130E-01 7.2900E-03

3.3300E-02 1.8390E-02 1.0160E-02 5.1900E-03 3.1690E-02 2.2400E-02 1.0930E-02

6.4270E-03 2.2640E-01 4.7010E-02 1.4070E-02 6.5900E-03 2.1530E-02 1.0360E-02

4.6510E-03 1.8680E-03 1.1720E-01 1.4710E-01 7.3090E-02 4.0450E-03 3.9000E-02

1.2860E-02 6.8010E-03 3.3180E-03 9.0220E-03 5.1640E-03 2.4720E-03 8.6600E-04

1.7140E+00 6.8540E-02 1.4540E-01 1.3860E-01 9.5320E-02 2.1540E-01 2.4490E-01

1.7220E-01 9.0990E-02 8.8640E-02 9.5270E-02 9.3900E-02 8.2530E-02 1.7920E-01

1.3990E-01 1.0650E-01 5.8700E-02 2.2630E-02 2.5480E-02 2.2870E-02 1.6830E-02

8.7550E-03 1.4020E-02 2.4600E-02 2.4440E-02 1.9500E-02 1.2960E-02 6.3350E-03

1.7680E-02 8.4310E-03 1.2830E-02 4.9800E-02 1.2480E-01 8.6280E-02 3.0040E-02

4.0710E-02 3.0020E-02 3.0840E-02 2.8360E-02 2.9340E-01 8.0780E-02 2.9660E-01

3.2580E-02 7.0210E-02 5.6990E-02 2.9990E-02 1.7100E-01 1.0720E-01 2.7150E-02

5.8280E+00 5.9000E+00 2.4010E+00 7.7050E+00 8.5090E-03 1.5810E-02 1.2090E-02

7.1580E-03 2.4560E-03 3.7470E-03 3.9160E-03 3.3630E-03 2.5880E-03 9.2540E-03

9.2940E-03 6.7370E-03 3.0480E-01 1.8420E+01 6.8230E+00 1.2460E+00 2.0020E-02

4.2420E-02 2.4910E-02 6.7800E-03 1.2270E-02 1.4880E-02 1.1050E-02 6.4210E-03

1.2510E-02 1.5170E-02 1.1350E-02 6.2420E-03 1.2330E-02 9.9210E-03 1.0420E-02

8.7840E-03 3.6470E-03 4.1750E-03 3.4960E-03 2.5370E-03 4.9910E-03 4.1050E-03

4.6710E-03 5.3130E-03 1.7430E-01 5.3310E-02 1.4800E-01 1.6350E-02 1.8130E-02

1.0620E-02 5.6820E-03 1.3060E-02 1.2960E-02 1.0300E-02 8.6000E-03 1.1470E-02

7.9120E-02 5.1250E-02 1.6960E-02 3.3400E-03 9.2580E-03 8.1590E-03 4.9330E-03

5.0110E-02 7.2420E-02 2.6260E-02 5.5200E-02 7.8430E-03 2.3540E-02 1.2950E-02

3.5220E-03 3.1520E-03 2.8160E-03 2.8570E-03 2.4410E-03 1.7480E-02 3.5590E-02

6.9450E-02 9.8070E-02 1.0970E-01 8.2500E-02 8.2770E-02 7.5170E-02 1.7710E-02

4.7110E-02 5.8700E-02 5.4150E-02 6.7590E-02 8.0130E-02 6.0950E-02 3.1620E-02

5.0650E-03 1.1780E-02 1.3610E-02 1.1440E-02 6.3500E-03 1.4130E-03 6.8640E-03

1.1600E-02 1.3240E-02 1.1260E-02 6.4350E-03 4.9640E-03 1.0300E-02 4.0800E-03

1.5060E-02 2.6040E-02 5.6950E-02 5.0610E-02 7.0120E-03 2.3110E-02 2.0880E-02

1.3410E-02 1.5700E-02 2.6580E-01 5.6590E-02 1.0150E-02 1.6710E-02 3.3400E-02

3.6460E-02 1.2200E-01 2.7110E-02 1.2270E-02 2.9020E+00 1.1600E-01 5.3690E+00

1.1520E+00 4.4500E-03 3.6240E-03 5.9270E-03 7.4510E-03 7.1840E-05 1.4560E-03

2.3580E-03 2.7680E-03 2.7750E-05 1.5310E-03 4.7120E-03 7.6900E-03 9.9660E-03

2.2580E-01 7.4210E+00 7.3050E+00 2.1320E-02 6.1440E-03 1.8650E-02 1.6350E-02

5.0600E-03 4.9230E-03 5.7640E-03 5.3420E-03 7.9680E-03 4.5630E-03 5.2070E-03

5.3870E-03 2.1770E-03 7.9090E-03 7.1540E-03 4.3990E-03 5.7510E-04 1.5970E-03

1.9060E-03 2.0050E-03 3.8340E-04 2.9160E-03 3.3530E-03 2.8110E-03 6.0560E-03

1.5470E-01 3.1570E-02 6.8850E-03 5.8110E-03 6.0740E-03 5.9840E-03 4.6000E-03

1.0160E-02 6.0030E-03 2.7800E-03 8.1250E-03 5.7620E-03 4.0240E-02 3.9370E-02

8.8500E-04 1.7740E-03 4.3200E-03 5.9530E-03 2.3660E-02 3.9430E-03 5.4920E-02

1.1980E-02 4.5330E-03 2.5330E-03 7.8380E-03 6.5170E-03 3.6220E-04 1.9170E-03

1.9430E-03 1.4600E-03 6.8340E+00 4.1490E-01 7.3070E-02 2.5230E+00 6.2610E-01

9.0280E-02 1.3680E-02 2.6610E+00 8.0730E-01 2.1040E-01 2.9040E-02 5.1380E-01

2.8890E-01 6.6320E-02 1.4520E-02 1.5900E-01 6.8380E-02 2.5680E-02 7.2820E-03

9.3760E-04 1.5020E-01 6.8050E-02 2.6420E-02 8.6120E-03 1.9820E-03 2.4090E-04

9.6000E-02 3.4900E-02 4.9110E-03 1.3120E-01 3.9000E-02 1.0080E-02 1.9140E-03

1.5370E-01 5.2920E-02 1.4230E-02 2.4750E-03 4.2360E-02 1.5320E-02 1.9730E-03

7.7910E-01 1.6200E-01 7.6830E-02 1.5150E-02 8.5550E-02 1.3260E-02 1.4980E-03

7.0560E-03 1.0720E-02 6.1040E-03 8.9410E-04 2.5880E+01 6.8330E-01 3.0770E-02

7.2550E-04 3.9560E+01 2.9490E+00 6.8810E-02 1.8610E-03 5.6490E+01 3.6700E+00

1.0930E-01 3.3780E-03 1.8600E-02 4.7640E-03 9.4690E-04 1.2490E-04 4.0040E-02

6.6080E-03 5.5240E-04 7.2490E-05 5.1470E-02 1.5550E-02 3.3170E-03 2.3370E-04

9.2790E+00 2.1260E-01 1.0000E-02 5.0530E-03 1.3130E-01 3.9110E-02 9.1970E-03

1.2250E-03 9.1030E-01 1.0070E-01 1.8460E-02 3.9300E-03 2.8250E+00 2.2930E-01

2.3560E-02 3.1860E-03 8.1910E-03 8.4570E-04 3.9820E-05 2.8030E-02 5.9280E-03

7.3630E-04 5.5510E-05 4.2810E-02 6.9510E-03 1.9860E-03 2.4270E-04 3.8820E-02

9.3650E-03 7.8510E-04 1.1530E-04 7.8800E-01 1.8490E-02 3.0960E-03 6.6570E-04

3.3860E-03 3.4310E-03 1.8320E-03 4.2960E-04 3.2930E-02 6.7310E-03 1.5410E-03

2.0760E-05 4.6160E-02 9.6530E-03 1.8940E-03 2.3700E-04 9.1340E+00 4.6620E-01

8.6960E-01 1.2410E+00 5.8550E-01 9.5090E-02 8.7050E-01 1.5540E+00 7.7810E-01

2.3100E-01 4.4010E-01 4.4140E-01 2.1190E-01 5.3970E-02 7.4930E-02 7.4430E-02

4.4530E-02 2.3160E-02 1.0180E-02 5.8750E-02 6.3900E-02 4.9520E-02 2.8610E-02

1.3020E-02 3.8900E-03 5.5780E-02 3.7170E-02 2.3280E-02 6.1810E-02 5.9120E-02

2.6550E-02 8.5910E-03 6.6720E-02 6.9520E-02 4.0800E-02 1.4510E-02 2.8270E-02

1.4690E-02 8.8670E-03 2.3220E-01 5.8810E-01 2.4650E-01 7.7320E-02 4.2250E-02

3.4240E-02 7.5340E-03 6.0480E-03 8.2840E-03 3.1340E-03 3.6060E-03 2.2030E+00

1.9480E+01 8.3580E-01 3.0050E-02 2.7300E+00 4.7270E+01 3.6090E+00 8.0240E-02

2.2380E-01 5.4030E+01 4.8580E+00 1.2730E-01 8.1430E-03 8.3750E-03 3.2920E-03

8.8390E-04 1.2600E-02 1.8200E-02 6.0430E-03 6.9080E-04 1.9550E-02 2.1080E-02

1.2800E-02 4.2310E-03 6.1160E-01 6.8190E+00 2.4930E-01 9.7190E-03 5.1860E-02

6.0180E-02 3.3730E-02 1.0790E-02 1.1140E-01 6.6650E-01 9.0910E-02 1.9030E-02

2.3840E-01 2.1690E+00 2.6610E-01 2.5840E-02 3.9920E-03 3.3170E-03 5.0840E-04

9.4340E-03 8.2150E-03 4.9370E-03 7.4220E-04 9.7150E-03 1.6000E-02 6.8660E-03

2.1690E-03 1.8280E-02 2.2090E-02 7.8330E-03 6.2600E-04 7.9260E-02 5.8490E-01

1.9050E-02 3.3160E-03 2.9020E-03 2.6740E-03 1.2630E-03 9.7040E-04 8.1420E-03

2.0440E-02 2.0980E-03 1.5360E-03 1.4220E-02 2.5230E-02 1.1380E-02 2.0620E-03

7.8660E+00 2.1700E-01 8.1150E-01 8.2120E-01 4.6580E-01 2.5370E-01 8.6060E-01

1.1370E+00 6.7990E-01 1.8420E-01 3.5740E-01 2.8240E-01 1.4450E-01 3.1100E-02

4.9340E-02 5.3960E-02 3.8080E-02 1.7490E-02 1.7490E-02 4.2940E-02 4.4830E-02

3.7310E-02 2.6350E-02 1.3360E-02 2.7910E-02 3.6750E-02 3.2400E-02 2.6800E-02

4.6660E-02 4.0920E-02 1.8100E-02 2.4440E-02 5.2310E-02 4.9060E-02 3.4130E-02

1.6210E-02 1.5850E-02 1.0870E-02 8.0550E-02 2.6360E-01 5.9730E-01 2.0390E-01

1.9850E-02 3.3630E-02 1.6980E-02 5.0400E-03 5.5290E-03 3.7550E-03 3.2010E-03

1.1020E-01 2.8280E+00 1.5270E+01 6.4610E-01 3.1520E-02 3.4560E+00 2.4430E+01

2.7730E+00 8.5020E-03 6.8660E-01 4.9600E+01 3.9540E+00 3.0710E-03 6.4520E-03

6.1490E-03 2.3070E-03 4.0020E-03 1.3650E-02 9.7860E-03 4.2460E-03 6.1080E-03

1.5940E-02 1.2640E-02 1.0730E-02 3.3040E-02 7.7430E-01 5.3830E+00 1.9480E-01

1.8550E-02 4.1220E-02 4.2290E-02 2.8480E-02 2.4590E-02 1.1120E-01 5.3000E-01

7.7660E-02 2.3520E-02 2.5510E-01 1.7530E+00 2.1090E-01 1.8040E-03 3.2170E-03

1.6490E-03 3.4910E-03 1.0160E-02 7.4410E-03 3.4970E-03 4.3280E-03 9.7680E-03

1.4310E-02 5.5920E-03 5.1760E-03 1.3730E-02 1.4680E-02 5.4900E-03 5.1660E-03

8.7040E-02 4.6190E-01 1.5590E-02 2.4190E-03 1.7930E-03 1.3370E-03 9.3850E-04

5.1010E-03 1.0030E-02 1.3900E-02 1.5260E-03 4.2710E-03 1.6430E-02 1.7420E-02

9.2160E-03 4.0500E-02 2.4780E-01 6.9320E-01 8.8570E-01 4.3130E-02 3.0540E-01

7.8800E-01 1.2780E+00 6.6060E-02 2.0050E-01 2.9950E-01 2.1680E-01 8.0020E-03

3.0820E-02 4.3050E-02 4.2860E-02 2.6960E-02 2.8210E-03 1.5910E-02 3.1460E-02

3.9750E-02 3.5170E-02 2.0360E-02 9.8620E-03 3.3130E-02 3.4040E-02 8.8500E-03

2.8270E-02 3.8860E-02 2.8590E-02 6.1290E-03 2.5830E-02 4.6420E-02 4.9490E-02

7.6220E-03 1.6960E-02 9.7420E-03 3.5460E-02 1.4770E-01 3.2370E-01 5.4660E-01

7.8830E-03 2.3000E-02 2.5370E-02 4.0320E-03 3.1250E-03 5.4630E-03 1.7170E-03

1.6880E-02 1.3000E-01 2.7490E+00 2.2520E+01 1.8060E-03 8.0210E-02 2.6790E+00

2.1970E+01 1.6600E-03 2.1990E-02 1.0080E+00 4.5220E+01 8.7590E-04 3.4240E-03

5.4430E-03 4.2050E-03 8.2690E-04 5.4240E-03 1.1460E-02 9.3910E-03 1.5170E-03

7.0380E-03 1.4270E-02 1.7300E-02 4.0790E-03 4.2330E-02 6.0290E-01 4.1120E+00

3.7010E-03 2.1280E-02 4.0000E-02 4.1610E-02 5.3900E-03 2.6250E-02 9.4060E-02

4.9840E-01 3.1770E-03 2.5820E-02 2.3830E-01 1.5730E+00 5.4370E-04 2.1480E-03

2.5480E-03 7.1400E-04 4.0150E-03 9.1000E-03 6.7530E-03 7.5900E-04 4.9450E-03

8.3890E-03 1.4610E-02 1.1450E-03 7.0350E-03 1.1420E-02 1.1180E-02 8.7910E-04

5.9700E-03 7.1010E-02 3.9500E-01 1.9350E-03 1.0770E-03 1.5080E-03 6.3900E-04

1.3480E-03 5.6360E-03 8.4410E-03 1.0110E-02 7.3870E-04 3.9540E-03 1.4040E-02

1.6600E-02 4.7770E+00 2.7180E-01 7.1160E-02 1.2230E+00 4.9850E-01 1.4500E-01

3.6780E-02 1.4140E+00 5.7260E-01 1.5260E-01 3.3920E-02 9.5880E-02 4.7440E-02

2.3440E-02 1.2050E-02 5.3780E-03 1.3310E-01 7.7380E-02 4.5340E-02 2.4380E-02

1.1410E-02 4.1270E-03 8.8000E-02 4.4820E-02 1.1350E-02 5.8350E-01 7.2490E-02

2.2440E-02 7.8200E-03 3.3080E-01 8.5040E-02 2.8000E-02 1.0120E-02 7.8410E-02

3.5200E-02 6.6100E-03 5.8920E-01 3.5100E-01 1.0500E-01 3.4310E-02 1.2300E-01

6.3520E-02 3.0370E-02 7.4230E-02 7.9890E-02 3.8980E-02 1.6220E-02 1.1610E+01

9.8870E-01 6.0650E-02 6.4520E-03 1.2180E-01 6.2380E-02 1.6000E-02 2.3060E-03

1.6460E-01 6.4480E-02 1.9890E-02 2.5680E-03 2.8430E-01 2.5130E-02 1.5230E-02

7.6210E-03 2.3500E+01 6.1970E-01 3.0490E-02 7.4060E-04 2.8850E+01 3.2320E+00

1.6720E-01 1.1110E-03 3.1400E+01 2.9530E+00 1.5820E-01 7.2230E-03 1.4460E+00

2.0530E-01 1.2610E-02 1.9600E-03 1.6630E+00 1.9710E-01 2.2040E-02 4.4470E-03

6.0770E-02 2.8990E-02 1.0520E-02 2.1090E-03 3.9730E-02 1.2510E-02 2.3310E-03

9.6590E-01 5.2400E-02 7.7270E-03 2.2700E-03 4.9060E-01 7.2060E-02 1.1140E-02

2.7400E-03 1.3390E-01 1.8300E-02 4.8450E-03 1.4270E-03 2.4930E-01 4.7410E-02

7.2740E-03 2.0090E-03 1.1820E-02 8.0450E-03 4.7690E-03 1.8100E-03 4.4160E-02

1.1750E-02 6.6980E-03 1.4220E-03 2.0460E-01 7.1060E-02 1.2050E-02 5.6820E-03

5.6820E+00 2.7230E-01 4.0730E-01 6.0950E-01 4.1860E-01 1.5380E-01 6.6760E-01

6.3690E-01 3.8750E-01 1.3470E-01 4.3280E-02 4.6660E-02 3.3310E-02 1.7610E-02

6.6330E-03 6.3530E-02 6.3080E-02 4.5010E-02 3.1090E-02 2.1660E-02 1.1710E-02

5.4540E-02 3.0880E-02 2.9860E-02 1.3020E-01 3.4450E-01 5.2860E-02 1.4320E-02

8.4220E-02 1.8810E-01 6.8020E-02 2.4370E-02 5.0170E-02 2.5880E-02 1.9960E-02

3.5080E-01 2.9070E-01 2.7660E-01 9.5710E-02 8.4980E-02 6.4890E-02 2.5300E-02

5.9380E-02 5.1380E-02 3.3730E-02 1.7340E-02 2.6180E-01 8.7630E+00 1.3420E+00

7.8370E-02 4.8980E-02 8.3520E-02 5.8790E-02 1.8640E-02 3.8080E-02 1.6950E-01

1.0330E-01 2.2800E-02 4.7010E-02 1.8720E-01 1.5170E-02 5.7160E-03 3.2110E+00

1.5440E+01 4.4910E-01 1.5960E-02 3.1770E+00 1.8420E+01 3.8740E+00 1.8300E-01

5.6150E-01 2.3180E+01 4.4900E+00 1.9960E-01 1.9340E-01 9.1680E-01 2.2490E-01

1.1150E-02 5.0380E-02 1.1090E+00 2.0440E-01 2.3850E-02 2.3740E-02 2.4870E-02

2.1550E-02 1.1780E-02 2.0350E-02 1.4920E-02 6.2530E-03 1.8580E-01 5.6880E-01

4.2550E-02 5.6920E-03 7.0250E-02 2.8640E-01 7.4040E-02 1.1210E-02 2.6010E-02

7.3540E-02 1.2820E-02 4.5340E-03 1.7220E-02 1.7310E-01 4.6100E-02 7.7850E-03

9.4530E-03 6.0050E-03 3.3560E-03 2.1120E-03 1.2630E-02 1.9930E-02 1.1100E-02

4.1450E-03 4.1690E-02 1.4580E-01 8.1230E-02 9.4660E-03 4.2690E+00 9.9760E-02

3.5360E-01 4.1050E-01 3.5180E-01 2.4750E-01 4.8210E-01 3.6450E-01 2.4700E-01

2.0710E-02 3.0530E-02 2.8250E-02 2.0880E-02 1.1040E-02 3.0670E-02 3.2040E-02

4.1600E-02 3.7250E-02 2.4200E-02 1.0930E-02 2.7040E-02 3.0810E-02 2.8650E-02

3.6630E-02 1.2020E-01 2.1390E-01 3.1160E-02 2.7990E-02 6.7380E-02 1.2820E-01

5.1180E-02 2.7460E-02 2.6750E-02 1.8030E-02 1.0490E-01 2.7650E-01 2.7150E-01

2.1100E-01 5.9260E-02 4.7480E-02 2.4160E-02 4.4540E-02 3.4290E-02 3.0220E-02

1.6920E-02 1.0360E-02 3.2180E-01 6.5000E+00 1.0360E+00 5.9660E-03 4.6770E-02

5.4650E-02 4.9970E-02 3.2880E-03 6.2670E-02 1.1450E-01 8.6000E-02 2.0040E-02

5.9070E-02 1.2190E-01 5.4590E-03 2.4750E-01 3.8550E+00 9.9370E+00 3.0650E-01

1.9460E-01 4.5610E+00 1.1540E+01 3.0650E+00 8.9500E-03 6.8570E-01 1.7180E+01

3.4470E+00 9.5110E-03 2.1670E-01 6.1630E-01 1.7190E-01 9.9220E-03 4.6750E-02

1.1540E+00 1.7690E-01 6.1270E-03 1.7600E-02 1.7920E-02 1.9820E-02 1.0680E-02

1.3430E-02 8.5440E-03 2.6300E-02 1.7180E-01 3.7860E-01 2.5120E-02 1.0670E-02

7.2520E-02 1.6870E-01 5.6670E-02 7.4150E-03 2.4200E-02 4.5390E-02 7.9650E-03

4.4960E-03 1.4720E-02 1.3410E-01 3.7770E-02 7.0900E-03 3.8380E-03 2.7880E-03

1.5600E-03 8.3560E-03 1.0800E-02 1.4050E-02 4.3750E-03 6.5460E-03 4.3580E-02

1.0610E-01 6.0580E-02 2.1050E-02 1.0440E-01 2.8370E-01 3.9280E-01 8.0410E-02

2.4640E-01 3.5200E-01 2.3310E-01 1.1040E-02 1.3670E-02 1.9090E-02 1.8830E-02

1.1560E-02 9.9260E-03 2.3700E-02 2.5540E-02 2.4880E-02 2.1240E-02 1.2670E-02

1.0080E-02 2.7940E-02 1.9770E-02 1.3990E-02 3.0780E-02 8.8220E-02 1.3300E-01

1.0120E-02 2.4370E-02 5.0870E-02 9.7050E-02 1.2120E-02 2.4320E-02 1.1450E-02

3.4280E-02 9.5690E-02 2.1100E-01 2.2750E-01 3.8030E-02 2.8350E-02 2.1880E-02

2.9690E-02 2.0760E-02 2.2410E-02 1.1360E-02 3.0620E-03 1.4270E-02 2.4740E-01

4.9910E+00 4.6800E-04 6.7200E-03 3.7410E-02 6.0910E-02 1.6100E-04 3.6250E-03

4.8610E-02 1.2550E-01 1.2530E-02 1.0780E-02 3.4840E-02 7.1320E-02 2.0470E-02

3.5110E-01 2.9460E+00 9.2860E+00 1.1100E-03 1.7600E-01 3.4660E+00 9.7910E+00

3.0800E-03 9.2330E-03 5.1790E-01 1.3310E+01 1.9330E-03 1.1110E-02 1.6890E-01

4.9050E-01 3.4140E-03 9.7620E-03 3.7210E-02 9.7870E-01 6.2230E-04 6.7430E-03

1.5200E-02 1.8460E-02 4.7540E-03 9.4740E-03 7.8760E-03 4.7490E-03 2.5750E-02

1.3080E-01 2.4190E-01 2.6160E-03 1.1170E-02 5.5660E-02 1.3670E-01 2.3360E-03

9.2870E-03 2.0540E-02 2.6020E-02 1.1080E-03 4.3550E-03 1.1710E-02 1.0970E-01

4.7270E-03 2.3450E-03 2.2690E-03 1.1140E-03 3.4950E-03 4.5250E-03 5.8850E-03

5.6920E-03 2.8420E-03 8.6700E-03 3.8960E-02 9.1230E-02 5.0240E+00 2.3450E-01

4.0030E-02 1.3220E+00 3.5200E-01 1.1830E-01 3.3260E-02 1.0590E-01 4.7070E-02

1.8120E-02 6.4100E-03 1.6770E-03 1.3520E-01 7.4150E-02 3.6260E-02 1.5100E-02

4.8700E-03 1.0260E-03 6.2430E-02 1.3700E-02 3.6800E-03 1.3320E-01 4.6790E-02

1.4510E-02 2.9190E-03 8.4880E-01 5.6670E-02 1.6680E-02 5.3130E-03 6.0760E-02

1.2970E-02 3.6520E-03 8.9090E-01 2.8810E-01 6.1280E-02 1.9470E-02 9.7560E-02

2.9640E-02 4.5730E-03 4.8750E-03 2.6990E-02 4.4910E-03 1.9660E-03 2.5340E+00

2.3600E-01 1.9900E-02 3.1230E-03 4.6830E+00 3.8600E-01 3.9870E-02 5.8370E-03

9.4940E-02 8.9460E-02 2.9690E-02 5.4710E-03 1.9170E-02 1.2870E-02 3.3180E-03

5.3150E-04 5.0700E-02 1.2910E-02 4.4260E-03 3.1220E-04 1.3020E+00 3.8680E-02

5.8750E-03 1.7030E-03 6.8690E-01 8.6690E-02 1.2600E-02 2.2180E-03 2.7180E+01

5.5890E-01 2.6910E-02 8.8330E-04 3.5350E+01 2.9470E+00 1.3140E-01 6.5180E-04

5.0830E+01 3.2610E+00 1.4820E-01 1.6930E-02 3.1900E-02 5.6860E-03 2.1530E-03

7.3020E-02 2.3870E-02 1.1360E-02 2.6140E-03 2.5690E+00 8.7990E-02 1.3270E-02

5.1270E-03 5.4470E-02 1.1020E-02 2.4720E-03 3.8470E-04 3.4260E-01 4.2730E-02

4.4210E-03 7.3100E-04 4.3680E-03 2.0660E-02 6.3320E-03 1.5840E-03 2.5620E-02

6.3110E-03 2.9470E-03 6.9350E-04 2.3860E-01 3.0910E-02 4.2990E-03 5.5390E-04

6.9710E+00 2.5130E-01 5.3840E-01 7.5760E-01 2.3460E-01 8.2060E-02 4.7420E-02

5.1060E-02 3.0770E-02 1.5910E-02 6.7860E-03 6.4520E-02 5.5220E-02 4.4540E-02

3.0900E-02 1.8160E-02 8.1080E-03 2.7920E-02 2.9660E-02 8.8900E-03 6.4050E-02

6.0620E-02 2.9190E-02 1.1620E-02 1.1420E-01 5.9620E-01 4.5650E-02 1.4900E-02

3.0580E-02 2.6110E-02 6.5940E-03 3.4280E-01 4.5450E-01 2.3840E-01 5.4740E-02

5.7860E-02 4.8210E-02 1.6790E-02 4.0620E-03 1.5580E-02 1.3080E-02 2.6590E-03

2.0560E-01 1.7460E+00 2.6930E-01 2.3610E-02 1.6510E-01 3.7370E+00 4.6810E-01

4.4690E-02 7.4330E-02 1.0190E-01 6.8740E-02 3.2690E-02 1.6020E-02 7.2220E-03

5.6380E-03 2.5980E-03 1.9340E-02 2.1170E-02 1.0050E-02 3.1040E-03 1.4740E-01

9.3960E-01 3.5680E-02 5.8460E-03 8.6550E-02 4.7040E-01 8.4580E-02 1.3640E-02

2.5480E+00 1.9720E+01 6.3940E-01 3.4830E-02 2.9200E+00 2.5300E+01 3.6580E+00

1.2380E-01 3.6310E-01 4.1710E+01 4.2340E+00 1.7520E-01 1.5770E-02 1.4260E-02

3.1430E-03 3.1820E-02 3.2830E-02 1.4040E-02 6.3250E-03 2.3860E-01 1.6610E+00

8.3420E-02 1.1480E-02 2.0720E-02 2.5960E-02 8.5810E-03 2.1920E-03 4.2270E-02

2.2850E-01 4.6450E-02 8.7060E-03 3.6410E-03 1.2860E-02 8.0600E-03 2.5080E-03

9.2480E-03 1.1860E-02 6.0950E-03 2.8670E-03 4.2040E-02 1.5330E-01 2.0140E-02

4.4340E-03 5.4100E+00 2.2140E-01 4.4380E-01 4.8400E-01 1.5040E-01 1.9280E-02

3.1490E-02 3.5000E-02 2.4990E-02 1.1490E-02 2.3930E-02 3.9160E-02 3.9850E-02

3.4800E-02 2.6060E-02 1.4050E-02 1.1500E-02 2.3900E-02 1.7790E-02 2.8400E-02

4.4310E-02 4.0080E-02 1.8640E-02 2.5000E-02 1.1070E-01 4.4090E-01 3.5660E-02

1.5620E-02 2.3210E-02 1.2620E-02 9.0080E-02 2.8650E-01 2.9110E-01 1.7650E-01

2.8080E-02 4.7080E-02 2.2440E-02 3.2500E-03 5.1710E-03 1.0920E-02 5.4230E-03

2.1920E-02 2.6920E-01 1.3180E+00 2.1370E-01 2.0860E-02 1.7700E-01 2.9650E+00

3.2940E-01 2.0440E-02 5.5550E-02 8.4260E-02 6.8240E-02 6.4950E-03 6.9420E-03

6.6900E-03 3.5840E-03 9.6080E-03 1.7100E-02 1.4750E-02 7.8140E-03 1.1400E-02

1.6110E-01 6.9760E-01 2.7410E-02 1.2570E-02 8.4570E-02 3.5830E-01 6.9750E-02

1.5730E-01 3.1710E+00 1.4540E+01 4.8080E-01 1.1320E-01 3.6410E+00 1.9100E+01

2.7960E+00 4.2740E-03 1.4650E+00 3.3180E+01 3.2590E+00 7.8090E-03 1.2330E-02

6.2210E-03 1.9170E-02 2.0230E-02 1.7890E-02 8.6240E-03 2.5240E-02 2.9100E-01

1.3800E+00 6.4410E-02 6.1590E-03 1.5390E-02 1.7000E-02 5.4440E-03 4.3100E-03

4.6400E-02 1.7070E-01 3.6100E-02 2.9120E-03 4.8420E-03 7.7490E-03 3.7470E-03

7.5760E-03 7.1350E-03 6.5020E-03 4.0480E-03 6.7030E-03 4.2480E-02 1.1180E-01

1.7500E-02 9.4060E-02 2.1880E-01 3.4340E-01 3.3100E-01 6.1710E-03 1.7330E-02

2.5380E-02 2.5270E-02 1.6120E-02 4.8670E-03 2.1340E-02 3.1770E-02 3.3440E-02

2.6990E-02 1.4860E-02 4.5740E-03 1.2500E-02 2.2770E-02 1.1190E-02 2.8060E-02

3.4470E-02 2.5340E-02 7.6930E-03 2.4800E-02 9.1620E-02 3.3990E-01 7.8000E-03

1.5400E-02 1.5520E-02 2.8550E-02 8.8810E-02 2.4430E-01 2.8290E-01 1.3580E-02

3.0780E-02 3.0100E-02 2.4370E-03 3.2360E-03 5.7390E-03 6.7680E-03 3.0140E-03

2.5740E-02 2.1340E-01 1.1440E+00 3.5300E-03 2.2640E-02 1.4550E-01 2.4900E+00

1.2250E-03 2.2600E-02 5.4200E-02 8.4740E-02 2.2000E-03 6.1850E-03 5.4200E-03

3.8220E-03 2.6580E-03 1.0600E-02 1.3920E-02 1.0080E-02 2.8320E-03 1.1430E-02

1.2700E-01 5.3500E-01 2.2140E-03 1.3640E-02 6.9750E-02 3.0620E-01 1.4360E-02

1.8870E-01 2.4350E+00 1.1240E+01 6.4910E-04 1.2160E-01 2.8020E+00 1.6320E+01

5.3460E-04 5.2190E-03 1.1490E+00 2.7540E+01 4.0130E-03 7.0290E-03 8.5160E-03

7.0700E-03 1.4190E-02 1.5160E-02 1.2390E-02 7.2600E-03 2.6900E-02 2.2520E-01

1.0600E+00 2.2760E-03 6.6090E-03 1.2300E-02 1.0690E-02 7.1770E-04 4.7860E-03

3.6090E-02 1.4930E-01 2.1850E-03 3.3750E-03 5.2050E-03 3.5410E-03 2.6740E-03

3.5730E-03 7.1290E-03 5.2860E-03 1.0360E-03 7.3900E-03 3.4800E-02 8.9850E-02

3.0340E+00 3.1770E-01 1.2300E-01 5.2570E-02 3.5950E-02 2.1510E-02 1.1880E-02

5.2850E-03 5.7790E-02 4.2140E-02 3.0510E-02 2.2070E-02 1.4900E-02 7.6440E-03

4.8380E-02 2.6960E-02 1.6480E-02 1.7110E+00 1.1730E+00 2.3930E-01 8.0070E-02

1.0480E+00 8.1060E-02 3.8320E-01 1.0420E-01 2.1210E+00 2.7520E-01 6.8050E-02

4.8470E-01 2.7530E-01 1.4310E-01 6.7980E-02 5.3220E-01 3.2700E-01 3.5730E-02

1.9140E-02 2.7930E-01 2.8590E-02 1.3790E-02 6.7840E-02 2.9110E-02 9.4300E-03

2.1870E-03 6.5920E-02 2.7130E-02 9.1830E-03 2.6000E-03 5.9690E-02 2.2350E-02

7.6050E-03 1.6470E-03 3.3130E-02 1.7810E-02 9.2420E-03 4.3420E-03 3.2270E+00

6.0460E-01 3.2850E-02 7.9190E-03 2.8490E+00 4.0150E-01 3.9150E-02 7.1740E-03

6.4900E-02 3.4780E-02 1.4520E-02 5.1750E-03 3.6240E+00 5.1010E-01 4.6550E-02

1.0990E-02 8.1260E-02 3.3180E-02 1.4600E-02 4.9980E-03 9.7560E-02 4.5480E-02

2.1910E-02 1.0060E-02 1.6300E+01 1.8800E-01 8.6210E-03 2.1180E+01 3.8490E+00

1.1580E-01 7.9370E-03 4.0340E+01 4.0580E+00 3.1590E-01 1.9260E-02 2.1690E-01

5.8510E-02 1.1220E-02 2.2320E-03 2.6130E-02 1.4250E-02 6.7460E-03 2.6370E-03

2.7320E-02 2.1920E-01 1.8130E-02 8.6360E-03 5.1960E-02 2.7040E-02 1.0190E-02

2.8050E-03 2.2200E-01 3.8910E-02 7.8350E-03 1.3040E-03 3.3700E+00 1.7970E-01

3.1720E-02 2.2680E-02 2.0520E-02 1.4170E-02 6.2070E-03 3.4550E-02 3.2100E-02

2.8600E-02 2.0470E-02 1.1370E-02 4.5520E-03 2.8520E-02 2.6250E-02 1.4160E-02

2.2710E-01 1.1210E+00 5.4980E-02 1.7670E-01 5.0630E-01 7.8970E-02 6.0160E-02

3.2140E-02 2.8060E-01 9.1710E-01 9.8730E-02 2.3810E-01 2.1550E-01 1.6290E-01

1.1030E-01 3.7660E-01 7.7190E-02 2.0700E-01 1.4350E-02 7.9280E-02 1.1310E-01

9.1330E-03 1.9470E-02 2.7320E-02 2.3630E-02 1.0940E-02 1.3560E-02 3.1140E-02

2.2330E-02 9.9890E-03 1.0420E-02 2.4590E-02 1.9240E-02 9.0710E-03 1.6090E-02

1.8940E-02 1.0540E-02 3.8110E-03 5.9250E-01 1.5940E+00 6.8490E-01 2.8970E-02

6.1940E-02 1.9120E+00 4.7060E-01 4.6560E-02 2.5690E-02 2.7780E-02 2.4010E-02

1.5240E-02 7.4340E-02 2.4940E+00 6.1520E-01 5.5340E-02 2.1520E-02 4.5500E-02

2.5400E-02 1.4400E-02 3.5380E-02 5.2650E-02 3.1050E-02 2.1390E-02 3.8540E+00

8.3890E+00 1.3200E-01 3.8280E+00 1.0450E+01 4.4060E+00 1.3280E-01 5.4150E-01

2.0020E+01 4.9630E+00 4.2080E-01 5.8150E-02 9.5910E-02 5.0230E-02 1.0900E-02

1.1100E-02 9.9820E-03 1.0020E-02 6.4110E-03 2.0490E-02 4.3900E-02 1.1510E-01

7.0370E-03 2.6940E-02 1.9700E-02 1.5900E-02 9.2600E-03 9.4870E-03 1.4260E-01

3.8540E-02 6.7170E-03 2.3240E+00 1.5020E-02 1.9050E-02 1.2500E-02 1.0260E-02

6.9360E-03 2.0600E-02 2.3340E-02 1.5960E-02 1.1620E-02 9.5460E-03 5.9450E-03

1.6980E-02 1.6330E-02 1.2580E-02 1.4110E-01 3.0420E-01 6.3400E-01 3.1740E-02

1.3670E-01 4.7380E-02 5.3140E-02 4.0060E-02 1.1140E-01 2.0010E-01 3.3910E-01

1.0650E-01 1.3510E-01 1.3230E-01 1.0960E-01 1.6790E-01 1.7460E-01 1.0130E-01

9.5690E-03 2.5850E-02 7.5870E-02 5.5580E-02 3.3560E-03 1.6640E-02 1.6030E-02

1.9330E-02 2.7160E-03 8.9610E-03 1.9970E-02 1.8720E-02 1.1360E-03 8.7760E-03

1.4670E-02 1.6640E-02 9.0520E-03 9.1970E-03 1.0490E-02 4.8090E-03 2.3050E-02

6.8160E-01 7.5050E-01 4.8030E-01 1.2770E-02 6.2630E-02 1.2400E+00 3.5930E-01

7.1060E-03 1.7390E-02 1.7060E-02 1.9400E-02 1.5280E-02 7.7580E-02 1.6160E+00

4.6190E-01 7.5410E-03 1.2390E-02 2.7300E-02 1.9590E-02 1.1020E-02 1.4490E-02

3.5950E-02 2.6240E-02 5.0650E-01 4.3650E+00 3.3920E+00 1.0830E-01 4.4000E+00

4.9440E+00 3.1080E+00 1.7010E-02 6.2410E-01 1.2850E+01 3.8040E+00 1.1270E-02

5.0150E-02 5.1670E-02 3.1960E-02 3.5030E-03 8.5220E-03 7.4840E-03 7.3310E-03

1.3660E-02 1.6520E-02 5.5430E-02 4.3760E-02 1.0150E-02 1.4350E-02 1.3600E-02

7.3670E-03 2.8640E-03 5.4630E-03 9.3570E-02 2.8890E-02 6.3450E-03 7.2800E-03

9.0350E-03 6.2520E-03 2.4540E-03 1.1940E-02 6.9360E-03 8.5230E-03 8.0460E-03

5.5930E-03 2.6120E-03 8.1800E-03 7.0110E-03 7.7010E-03 6.6290E-02 1.5200E-01

3.2180E-01 2.3420E-02 5.0050E-02 1.1160E-01 2.6290E-02 2.9320E-02 4.3320E-02

7.8170E-02 1.2530E-01 3.7060E-02 6.5170E-02 7.7450E-02 6.5040E-02 4.4400E-02

1.5850E-01 1.6040E-02 4.7850E-03 1.0300E-02 1.4160E-02 5.2260E-02 2.9220E-04

3.0420E-03 1.1550E-02 1.2870E-02 3.4650E-04 2.3390E-03 6.2240E-03 1.5670E-02

1.2110E-05 1.2290E-03 6.0050E-03 1.4650E-02 4.3000E-03 3.7600E-03 3.7710E-03

3.8300E-03 6.9590E-03 2.7190E-02 4.7890E-01 4.5730E-01 2.8320E-03 1.0970E-02

4.0550E-02 7.7970E-01 1.0710E-03 6.5050E-03 1.1690E-02 1.1240E-02 3.1560E-03

1.3180E-02 5.2200E-02 1.0180E+00 1.5210E-03 5.5030E-03 8.3880E-03 1.9580E-02

2.2870E-03 9.8870E-03 9.4460E-03 2.3970E-02 1.6440E-02 7.9180E-01 3.3180E+00

6.9010E-03 1.4860E-01 3.1060E+00 3.0170E+00 7.2190E-03 9.8960E-03 4.3110E-01

8.1710E+00 2.2150E-03 1.0870E-02 3.1950E-02 2.5730E-02 6.3660E-04 3.0710E-03

5.3520E-03 4.0060E-03 6.8300E-03 6.4440E-03 9.1430E-03 4.0560E-02 2.5950E-03

9.2450E-03 9.7990E-03 6.7810E-03 4.9580E-04 2.6490E-03 3.4360E-03 5.7300E-02

3.4800E+00 8.6800E-01 1.4630E-01 6.3460E-02 8.0320E+00 3.5520E+00 1.0160E+00

1.9790E-01 3.4380E-02 7.8870E-03 3.0600E+00 1.3140E+00 4.7300E-02 2.2250E+00

3.2120E-01 6.4230E-02 7.9140E-03 1.4480E+00 4.6770E-01 7.8140E-02 6.0330E-03

4.4710E-01 1.2490E-01 6.8010E-03 3.0450E-02 2.0610E-02 9.4250E-03 3.3580E-03

1.4240E-02 1.1590E-02 6.2870E-03 5.4880E-02 1.2010E-01 6.5260E-03 1.9880E-03

2.1220E-01 1.9480E-01 9.1500E-02 2.1070E-02 1.9270E-01 9.3720E-02 2.7860E-02

4.3570E-03 1.2730E-01 4.0660E-02 9.1040E-03 1.0550E-03 1.1870E-01 3.5590E-02

6.1660E-03 9.8960E-05 1.0670E-01 5.5070E-02 4.8260E-02 3.1370E-02 2.0790E-01

4.9390E-02 1.2380E-02 2.3470E-03 4.3850E-02 1.4330E-02 3.8420E-03 1.0950E-03

8.3560E-02 7.4470E-02 4.3950E-02 1.4320E-02 1.8860E-01 4.2210E-02 6.8910E-03

6.6060E-04 3.4360E-02 1.4630E-02 4.2610E-03 9.6500E-04 4.9540E-02 4.2730E-02

7.7490E-03 5.4920E-02 2.5020E-02 1.5350E-02 6.9960E-03 4.8250E-02 2.3010E-02

7.9940E-03 2.0980E-03 6.9580E-02 7.1790E-02 3.6150E-02 8.3870E-03 4.6020E-02

2.5730E-02 8.9370E-03 1.8700E-03 3.4630E-02 2.2380E-02 1.0300E-02 6.1490E-03

1.9960E-02 1.0180E-02 5.3110E-03 2.5550E-03 3.0980E-02 1.5270E-02 5.7870E-03

1.4440E-03 2.8900E+00 1.2480E+00 8.6250E-02 2.7000E+00 2.6040E+00 3.1710E+00

1.5440E+00 3.6200E-01 5.0780E-02 1.7460E+00 9.0250E-01 8.7750E-01 6.7140E-01

1.1380E+00 2.2650E-01 5.7690E-02 5.3680E-01 5.7530E-01 4.0280E-01 8.4160E-02

2.4540E-01 1.4540E-01 7.2190E-02 2.1310E-02 1.2940E-02 9.8350E-03 8.0660E-03

1.3130E-02 8.9900E-03 4.4300E-03 4.3900E-02 4.8180E-02 5.1200E-02 3.2260E-03

1.8700E-01 5.4270E-02 9.9130E-02 9.0420E-02 8.4900E-02 6.7310E-02 7.3410E-02

2.9310E-02 3.0540E-02 7.0240E-02 3.2300E-02 9.5920E-03 4.9650E-02 4.1150E-02

2.5040E-02 6.5250E-03 7.6110E-02 8.2790E-02 3.6630E-02 9.5340E-03 6.0970E-02

1.0640E-01 3.8850E-02 1.1490E-02 1.4010E-02 2.0650E-02 1.1650E-02 3.7920E-03

7.3650E-02 3.4080E-02 2.7920E-02 3.7330E-02 4.2530E-02 1.0070E-01 3.9950E-02

7.4840E-03 1.3130E-02 1.3850E-02 1.1740E-02 4.4550E-03 4.1570E-02 1.6760E-02

1.7720E-02 3.0640E-02 2.8460E-02 1.6330E-02 5.6460E-03 2.4570E-02 2.1670E-02

1.5100E-02 7.2630E-03 7.1800E-02 2.3600E-02 2.5710E-02 2.7630E-02 2.4930E-02

1.4540E-02 1.7630E-02 8.9540E-03 2.7710E-02 1.4900E-02 1.2470E-02 3.7040E-03

1.1960E-02 9.6300E-03 6.3130E-03 2.1390E-03 1.6210E-02 1.1950E-02 9.0630E-03

5.4020E-03 1.5190E+00 1.0640E+00 1.9690E-01 2.8760E+00 9.5490E-01 1.9280E+00

1.5310E+00 3.9990E-01 7.9640E-01 9.0430E-01 9.5950E-01 1.8710E-01 6.1240E-01

6.3390E-01 1.3540E-01 1.3770E-01 4.4600E-01 3.3740E-01 2.7790E-01 1.1710E-01

1.3970E-01 9.0520E-02 1.1080E-02 9.9330E-03 1.0300E-02 8.1410E-03 1.0430E-02

6.4290E-03 2.7660E-03 3.2930E-02 1.6960E-02 4.2070E-02 1.7760E-02 9.0110E-02

8.3480E-02 5.4010E-02 9.3950E-02 2.3390E-02 6.3530E-02 4.5460E-02 5.8810E-02

3.6250E-03 2.7380E-02 4.7320E-02 2.8360E-02 1.7760E-02 3.4070E-02 2.4890E-02

1.5370E-02 5.2200E-02 6.0360E-02 3.3950E-02 8.8610E-03 1.7090E-02 5.3680E-02

6.5460E-02 2.6980E-02 3.8180E-03 1.1890E-02 1.3330E-02 8.5900E-03 4.7030E-02

2.5800E-02 3.2390E-02 2.4370E-02 6.6100E-03 4.4690E-02 6.3680E-02 2.8100E-02

3.4840E-03 1.0350E-02 9.2810E-03 9.2620E-03 3.2610E-02 1.8650E-02 1.2660E-02

1.8220E-02 2.1320E-02 1.3660E-02 7.0830E-03 1.0110E-02 1.5440E-02 1.2170E-02

1.1080E-02 4.9120E-02 2.1210E-02 2.6640E-02 1.4790E-02 9.0980E-03 1.5800E-02

1.0340E-02 1.4310E-02 2.0780E-02 1.0450E-02 9.1080E-03 3.7780E-03 7.2570E-03

7.6450E-03 5.0090E-03 2.8440E-03 7.0860E-03 9.4520E-03 8.5250E-03 6.9790E-03

1.0270E+00 3.7960E-02 2.0110E-01 2.2140E+00 7.5270E-01 8.8220E-01 1.2060E+00

2.3060E-01 8.2030E-01 7.2010E-01 4.8960E-02 2.1800E-01 4.7110E-01 3.0730E-01

1.9160E-02 1.9300E-01 2.8310E-01 3.0290E-01 4.5590E-02 1.0920E-01 7.6750E-02

4.6540E-03 8.2740E-03 8.2170E-03 5.9070E-03 7.1880E-03 4.1010E-03 1.8490E-03

2.1950E-02 5.1330E-03 2.1460E-02 2.7140E-02 2.7140E-02 7.6530E-02 5.6470E-02

4.6210E-02 3.0840E-03 3.0990E-02 4.0340E-02 5.3040E-02 1.4160E-04 5.9880E-03

2.5780E-02 3.6920E-02 4.5260E-03 1.9480E-02 2.3410E-02 1.6230E-02 4.1810E-02

2.1870E-02 2.2040E-02 1.3830E-02 4.8350E-03 1.8340E-02 4.3330E-02 4.2300E-02

8.6180E-04 4.4160E-03 9.1070E-03 1.2080E-02 2.1300E-02 2.9260E-02 2.3900E-02

1.1950E-02 5.8800E-04 1.0060E-02 3.8240E-02 4.6500E-02 6.7350E-04 4.4980E-03

7.1630E-03 9.4090E-03 1.6530E-02 1.5980E-02 5.8480E-03 1.1100E-02 1.1440E-02

1.0640E-02 6.9200E-03 3.3600E-03 9.4020E-03 1.0350E-02 9.4300E-03 2.4340E-02

2.8760E-02 1.6860E-02 5.7830E-03 2.1990E-03 9.6780E-03 1.0100E-02 1.1060E-02

1.3850E-02 6.9410E-03 4.9930E-03 3.5650E-03 4.3120E-03 4.5590E-03 3.8040E-03

2.3870E-03 2.3940E-03 6.1520E-03 6.9240E-03 5.8920E-03 6.8530E-03 4.0190E-02

1.4270E-01 1.2450E+00 9.8360E-01 2.3420E-01 1.8910E-02 5.0090E-01 3.7150E-01

1.0450E-02 6.4540E-02 1.7250E-01 2.7490E-01 1.1220E-03 3.2270E-02 1.8170E-01

1.8350E-01 1.2950E-02 5.9690E-02 4.3110E-02 1.4860E-03 4.2470E-03 3.7650E-03

2.7530E-03 3.7180E-03 1.8140E-03 8.8600E-04 1.0980E-02 1.5820E-03 7.0880E-03

1.8920E-02 3.3820E-03 3.9140E-02 5.1640E-02 1.3460E-02 1.0150E-04 5.1700E-03

3.0200E-02 2.8300E-02 1.8250E-05 1.9480E-04 5.9600E-03 2.8350E-02 5.5670E-04

7.3850E-03 1.3940E-02 8.1780E-03 2.3940E-02 5.6090E-03 1.0870E-02 9.4820E-03

9.5520E-04 5.4170E-03 1.1570E-02 3.3020E-02 1.8090E-04 1.0340E-03 3.9290E-03

7.8990E-03 6.1640E-03 2.1670E-02 1.0860E-02 4.6360E-03 3.3290E-05 9.4770E-04

1.0210E-02 3.6480E-02 3.2430E-05 1.0410E-03 4.3490E-03 5.6180E-03 6.6020E-03

1.0310E-02 1.8720E-03 5.5450E-03 4.8140E-03 6.1770E-03 4.1260E-03 1.2460E-03

3.7250E-03 6.6870E-03 5.6860E-03 8.2570E-03 2.2150E-02 8.3040E-03 7.0890E-04

3.2060E-04 3.0540E-03 8.0400E-03 5.1000E-03 6.9270E-03 3.5480E-03 1.9930E-03

2.2240E-03 2.0560E-03 1.8430E-03 2.3090E-03 1.3120E-03 5.6180E-04 2.9020E-03

4.0030E-03 3.2180E-03 3.7980E+00 4.0660E-01 3.0890E-02 8.1880E-03 2.1570E-03

9.3390E+00 1.6800E-01 8.4440E-02 1.3570E+00 3.2370E-01 1.4400E-02 2.3620E-03

1.9670E+00 3.0850E-01 2.6320E-02 2.4280E-03 1.3640E+00 1.4040E-02 1.0100E-02

2.7650E-02 1.5480E-02 6.0680E-03 1.4600E-03 9.6310E-03 5.6260E-03 2.9200E-03

7.0650E-03 4.5760E-02 7.8250E-03 1.2150E-03 1.3250E-01 2.7760E-02 4.6180E-03

5.7360E-04 1.8920E-01 5.4210E-02 1.1020E-02 1.0910E-03 5.8010E-01 1.8060E-01

3.2790E-02 3.3350E-03 1.4000E-01 1.7900E-02 9.8450E-04 6.6270E-05 4.9970E-02

2.4300E-02 9.0040E-03 1.4410E-03 7.1800E-02 5.3390E-02 2.3880E-02 4.1260E-03

3.0120E-01 8.4530E-02 1.8430E-02 3.1720E-03 1.0840E-01 4.7590E-02 1.4630E-02

1.7860E-03 1.1190E-01 7.3030E-02 2.4180E-02 3.3900E-03 4.4350E-01 1.0120E-01

2.1160E-02 2.2380E-03 3.8210E-02 3.9980E-02 3.4680E-02 6.4190E-02 4.3750E-02

1.9020E-02 3.2460E-03 2.2140E-01 5.5240E-02 7.2350E-03 1.2940E-03 4.0970E-02

1.4330E-02 5.8370E-03 1.2390E-03 8.8100E-02 3.6860E-02 9.3150E-03 2.1780E-03

4.0100E-02 4.2890E-02 1.9070E-02 6.5590E-04 6.9550E-02 2.8940E-02 6.2690E-03

6.1760E-04 6.8000E-02 4.3340E-02 1.2240E-02 1.3870E-03 4.6470E+00 7.0720E-01

4.4100E-02 7.3280E-03 3.8020E+00 4.1400E+00 9.4660E-02 6.4630E-01 4.9660E-01

2.6140E-01 1.0840E-02 1.0640E+00 2.0310E+00 2.6830E-01 2.4170E-02 6.4470E-01

5.0730E-01 5.2720E-03 1.7990E-02 1.0720E-02 8.3020E-03 4.6830E-03 7.1610E-03

5.1280E-03 2.3250E-03 5.8880E-03 2.2610E-02 1.6250E-02 3.7590E-03 4.6470E-02

6.5690E-02 2.3610E-02 4.2600E-03 6.5760E-02 7.2200E-02 4.4150E-02 1.0340E-02

2.0940E-01 2.6690E-01 1.5660E-01 3.0900E-02 5.5860E-02 6.1810E-02 1.4000E-02

7.9150E-04 3.3030E-02 2.0390E-02 1.0890E-02 6.8120E-03 5.4730E-02 2.3620E-02

2.3770E-02 2.0730E-02 1.1780E-01 1.4400E-01 6.0480E-02 1.6890E-02 6.1760E-02

4.0060E-02 2.9460E-02 1.3060E-02 7.7080E-02 3.2630E-02 4.5600E-02 2.2140E-02

1.3000E-01 1.7210E-01 8.1810E-02 1.9820E-02 3.7210E-02 3.9520E-02 1.3700E-02

5.0430E-02 2.6510E-02 1.7380E-02 1.4070E-02 9.1390E-02 9.6310E-02 4.3990E-02

6.2570E-03 2.2690E-02 1.8170E-02 6.9850E-03 4.0590E-03 4.4150E-02 3.3580E-02

2.6890E-02 8.4510E-03 3.3420E-02 3.0430E-02 1.2030E-02 9.5830E-03 4.1740E-02

2.3680E-02 1.7250E-02 5.1350E-03 4.8230E-02 1.8020E-02 2.6800E-02 1.1090E-02

4.1190E+00 7.6550E-01 3.8930E-02 1.3060E+00 3.8450E+00 1.3210E+00 2.6170E-01

4.6640E-01 2.7290E-01 1.3080E-01 2.4000E-01 1.2120E+00 1.1050E+00 1.5270E-01

2.7490E-01 5.1290E-01 1.3820E-01 1.0270E-02 9.1940E-03 7.9560E-03 6.5290E-03

5.8870E-03 4.1490E-03 2.0080E-03 4.7100E-03 1.2070E-02 1.6090E-02 6.4420E-03

1.2600E-02 4.2490E-02 4.0480E-02 1.4550E-02 2.1300E-02 6.4140E-02 5.2210E-02

2.9680E-02 5.8260E-02 1.8830E-01 1.8230E-01 1.0220E-01 1.9540E-02 4.8420E-02

3.0940E-02 7.1640E-03 1.9690E-02 1.5800E-02 1.4090E-02 6.8460E-03 3.5720E-02

2.1870E-02 1.9430E-02 2.2010E-02 4.2580E-02 9.6660E-02 9.1580E-02 4.3160E-02

2.9520E-02 3.5330E-02 2.8650E-02 2.1320E-02 3.9310E-02 3.8050E-02 2.7850E-02

3.6510E-02 3.9460E-02 1.1530E-01 1.1290E-01 5.5350E-02 3.9440E-02 2.8040E-02

6.3090E-03 3.4460E-02 1.9910E-02 2.0320E-02 1.2100E-02 3.2750E-02 7.4690E-02

5.7500E-02 2.6410E-02 1.2450E-02 1.3920E-02 1.0720E-02 4.2400E-03 1.8290E-02

2.9810E-02 2.3520E-02 1.8850E-02 2.6730E-02 1.9160E-02 1.1930E-02 1.0580E-02

2.1860E-02 2.2570E-02 1.5840E-02 1.0030E-02 2.5640E-02 2.2450E-02 1.5700E-02

1.9520E-02 3.0670E+00 5.8680E-01 3.6340E-01 2.2250E+00 2.2920E+00 8.6010E-02

3.0730E-01 2.6400E-01 1.8860E-01 4.1820E-02 4.1480E-01 1.0350E+00 5.3470E-01

1.0370E-01 3.4580E-01 2.4500E-01 4.1850E-03 7.4370E-03 7.0510E-03 5.9080E-03

4.2210E-03 3.0390E-03 1.6020E-03 3.5320E-03 6.4040E-03 1.2320E-02 8.3500E-03

2.9830E-03 1.8550E-02 3.4950E-02 2.6770E-02 4.9450E-03 2.8560E-02 4.2530E-02

4.6620E-02 9.7620E-03 8.9600E-02 1.4490E-01 1.5400E-01 5.7330E-03 2.5920E-02

3.2110E-02 1.5790E-02 1.0380E-02 1.3410E-02 1.2950E-02 5.9110E-03 1.8280E-02

2.1270E-02 1.7460E-02 1.5230E-02 1.1530E-02 4.7680E-02 7.9600E-02 6.4400E-02

1.2490E-02 2.6240E-02 2.5150E-02 2.2850E-02 1.5170E-02 3.4320E-02 2.3850E-02

3.2960E-02 9.4140E-03 5.2890E-02 9.3670E-02 8.6510E-02 3.6460E-02 1.5180E-02

4.5710E-03 2.0080E-02 1.9040E-02 1.7720E-02 8.2540E-03 8.1010E-03 4.0930E-02

5.1610E-02 4.1040E-02 6.4910E-03 9.4820E-03 1.0210E-02 4.8110E-03 6.0270E-03

1.9840E-02 1.9840E-02 2.2140E-02 2.0050E-02 1.0500E-02 1.2630E-02 8.2360E-03

9.8160E-03 1.8250E-02 1.4420E-02 1.0240E-02 1.0580E-02 2.1430E-02 1.3310E-02

1.7160E-02 2.0120E+00 9.0510E-02 8.1760E-01 2.3560E+00 2.1730E-02 1.4380E-01

2.3210E-01 1.6620E-01 6.5750E-03 8.5160E-02 4.9940E-01 7.5900E-01 3.3910E-02

1.7580E-01 2.5330E-01 2.0100E-03 5.2160E-03 5.5170E-03 3.6200E-03 3.0010E-03

2.1290E-03 1.1290E-03 2.3560E-03 3.0420E-03 6.8410E-03 7.4340E-03 5.8260E-04

5.2000E-03 1.9020E-02 3.0250E-02 6.0770E-04 9.8330E-03 3.0410E-02 4.4160E-02

3.7050E-05 2.4840E-02 8.8190E-02 1.5230E-01 1.3150E-03 1.0230E-02 2.2560E-02

1.8940E-02 4.6870E-03 9.7840E-03 8.6410E-03 4.7460E-03 6.9770E-03 1.8670E-02

1.4910E-02 7.5900E-03 2.9040E-03 1.6760E-02 4.7190E-02 6.6510E-02 4.1140E-03

1.5910E-02 2.0540E-02 1.7730E-02 4.0000E-03 2.0770E-02 2.5660E-02 2.0440E-02

1.4140E-03 1.7280E-02 6.7180E-02 8.8710E-02 2.7810E-02 6.0270E-03 3.7460E-03

9.6520E-03 1.7070E-02 1.1490E-02 5.1980E-03 2.1410E-03 1.5980E-02 3.5780E-02

4.1270E-02 3.2420E-03 6.1010E-03 6.8510E-03 4.6650E-03 2.4870E-03 9.2070E-03

1.6280E-02 1.8240E-02 1.3370E-02 4.8450E-03 1.0910E-02 5.0780E-03 3.6310E-03

1.1790E-02 1.2430E-02 7.2960E-03 3.1880E-03 1.3840E-02 1.4880E-02 9.7580E-03

2.8810E-02 1.3800E-01 1.4690E+00 3.8810E-03 4.3520E-02 1.4120E-01 9.3320E-02

1.0090E-03 1.2830E-02 1.0870E-01 5.5210E-01 9.0930E-03 6.4260E-02 1.5820E-01

6.0850E-04 2.1200E-03 3.0820E-03 2.0410E-03 1.4500E-03 9.9410E-04 5.8090E-04

1.1780E-03 1.1290E-03 3.6610E-03 2.6120E-03 9.7000E-05 1.0370E-03 6.2420E-03

1.9820E-02 7.2510E-06 1.4750E-03 1.2950E-02 2.4420E-02 4.0510E-06 7.3890E-05

3.8630E-02 9.3790E-02 2.4460E-04 2.7720E-03 1.0700E-02 1.2840E-02 1.6210E-03

5.4350E-03 3.4860E-03 2.7570E-03 1.7190E-03 1.0810E-02 9.0220E-03 2.5050E-03

5.0520E-04 5.6820E-03 1.8760E-02 4.2340E-02 7.4410E-04 6.8900E-03 1.1750E-02

9.1610E-03 4.7680E-04 8.1550E-03 1.8230E-02 8.7320E-03 1.5020E-05 3.4390E-03

2.1340E-02 5.5960E-02 1.5060E-02 1.4380E-03 2.3110E-03 3.4840E-03 1.0430E-02

5.1980E-03 2.5940E-03 5.3920E-04 3.2560E-03 1.7620E-02 2.5630E-02 1.2100E-03

3.0950E-03 3.1430E-03 3.6040E-03 2.6650E-04 2.6480E-03 9.7010E-03 9.9960E-03

6.6830E-03 1.7140E-03 6.3880E-03 2.3110E-03 1.0070E-03 5.4720E-03 7.5490E-03

3.5450E-03 5.7770E-04 5.8810E-03 1.0790E-02 3.5740E-03 9.8780E-01 2.4380E-01

5.3290E-01 2.4800E-01 8.4140E-02 1.6040E-02 1.6940E+00 5.6310E-01 1.4920E-01

3.6890E-02 1.6960E+00 7.2180E-02 2.2200E-02 2.1450E-02 1.4470E-02 7.6510E-03

3.0040E-03 1.1410E-02 1.0170E-02 5.1870E-03 4.0700E-02 7.5930E-02 5.5280E-02

2.7750E-02 1.7690E-01 9.7390E-02 4.5570E-02 1.4060E-02 2.4000E-01 9.9060E-02

3.2310E-02 6.6680E-03 1.5300E-03 1.4820E-03 1.0270E-03 4.3000E-04 2.2130E-02

9.7580E-03 3.6330E-03 9.0630E-04 7.4730E-02 2.1750E-02 5.6970E-03 1.2370E-03

3.7780E-02 3.4040E-02 3.0630E-02 2.3820E-02 8.0180E-02 7.3560E-02 4.4750E-02

1.6720E-02 1.3080E-01 5.7510E-02 2.8470E-02 1.0260E-02 7.7680E-02 5.6740E-02

3.1280E-02 1.1080E-02 7.3080E-03 3.5120E-03 1.5010E-03 3.5460E-04 6.0270E-02

2.8440E-02 1.1180E-02 1.2890E-01 7.4990E-02 2.8050E-02 5.1050E-03 3.9660E-02

4.2530E-02 4.4410E-02 3.8050E-02 1.6730E-02 6.2730E-03 2.1990E-03 7.0520E-04

1.1900E-02 9.0250E-03 5.5130E-03 4.5260E-03 2.2610E-02 2.9150E-02 3.0930E-02

1.9360E-02 3.9400E-02 4.6360E-02 3.8580E-02 2.1380E-02 6.1640E-02 5.1510E-02

3.2550E-02 1.6180E-02 7.8920E-01 2.1720E-01 1.8820E-01 1.5910E-01 9.3870E-02

2.3080E-01 8.4770E-01 5.6770E-01 1.8490E-01 2.7170E-01 1.0300E+00 4.0950E-02

1.2540E-02 7.2620E-03 7.6260E-03 7.5370E-03 1.0980E-02 5.4690E-03 3.6190E-03

3.0530E-02 6.0990E-02 3.8530E-02 1.9870E-02 6.3760E-02 6.7400E-02 6.4110E-02

5.5350E-02 2.9120E-02 1.1320E-01 9.6170E-02 4.5270E-02 1.2740E-03 3.5490E-04

8.2490E-04 1.1290E-03 8.5190E-03 6.6620E-03 6.7800E-03 3.3700E-03 1.4890E-02

3.8060E-02 2.0110E-02 6.1080E-03 3.3440E-02 3.1640E-02 2.0060E-02 9.2890E-03

6.9400E-02 1.4260E-02 2.7290E-02 5.0450E-02 3.6250E-02 8.9690E-02 4.6560E-02

2.1360E-02 4.7270E-02 2.3450E-02 2.7300E-02 3.6170E-02 1.5620E-03 3.4110E-03

2.9660E-03 1.7520E-03 4.0070E-02 2.7030E-02 1.3730E-02 7.0650E-02 2.8900E-02

4.1370E-02 3.1890E-02 4.3560E-02 4.6770E-02 2.5980E-02 7.3310E-03 5.0190E-03

7.8590E-03 4.7810E-03 1.7710E-03 7.6990E-03 4.1630E-03 4.5500E-03 5.3810E-03

1.6970E-02 3.2720E-02 1.9150E-02 7.7040E-03 4.9780E-02 3.1200E-02 1.9000E-02

9.2420E-03 4.9110E-02 2.2270E-02 2.4180E-02 2.6050E-02 4.2480E-02 1.5700E-01

1.5170E-01 8.7440E-02 3.8410E-02 1.6000E-01 4.5910E-01 5.6200E-01 4.6450E-02

2.4040E-01 6.0810E-01 3.4170E-03 8.2690E-03 6.5350E-03 4.4860E-03 7.7080E-03

4.4300E-03 1.1450E-03 2.0350E-02 4.0970E-02 2.5770E-02 1.0970E-02 9.0310E-03

4.3320E-02 5.7680E-02 5.6410E-02 1.4470E-03 1.9910E-02 6.4960E-02 1.0280E-01

2.9420E-04 8.3760E-04 7.8110E-04 3.5440E-04 2.2620E-03 5.8510E-03 6.3250E-03

2.9770E-03 3.1770E-03 1.0330E-02 2.0950E-02 1.6800E-02 3.0310E-02 1.5270E-02

1.0030E-02 7.4550E-03 1.1830E-02 4.6690E-02 3.5550E-02 1.3530E-02 1.3120E-02

2.2410E-02 3.6930E-02 3.9140E-02 7.6240E-03 3.1900E-02 2.9810E-02 1.9050E-02

1.5060E-04 9.5350E-04 2.1230E-03 2.8990E-03 1.8010E-02 2.2330E-02 1.2580E-02

1.3810E-02 5.1140E-02 3.7260E-02 1.6330E-02 4.8900E-02 1.6860E-02 8.9210E-03

9.6720E-03 1.5680E-03 3.3550E-03 4.6790E-03 3.3530E-03 2.3930E-03 4.9770E-03

4.4660E-03 2.9010E-03 1.1300E-02 2.7490E-02 9.4980E-03 2.7360E-03 4.2120E-02

2.0830E-02 7.9820E-03 2.0910E-03 1.9340E-02 3.0480E-02 2.1320E-02 9.8910E-03

1.6950E+00 3.2530E-01 4.1760E-02 6.2820E+00 2.2390E+00 4.5690E-01 6.8550E-02

2.1000E+00 9.5540E-01 3.4650E-02 1.9610E-01 1.5840E-01 5.6030E-02 1.8640E-02

4.5320E-02 1.6010E-02 5.9890E-03 5.4890E-02 1.0470E-01 3.4360E-02 4.3050E-03

1.5490E-01 6.5110E-02 2.4600E-02 6.4520E-03 6.0260E-02 3.1820E-02 1.3540E-02

3.6810E-03 5.1440E-02 1.9390E-02 5.9050E-03 2.0820E-03 2.6200E-01 7.5520E-02

1.4440E-02 1.5220E-03 1.8220E-01 4.7420E-02 1.8370E-02 7.8480E-03 1.8090E-01

5.8850E-02 1.7560E-02 4.1840E-03 8.8650E-02 3.3450E-02 1.0040E-02 2.6160E-03

1.6300E-01 6.0120E-02 1.9200E-02 5.6170E-03 6.4380E-02 2.6840E-02 7.9580E-03

1.6460E-03 3.1840E-02 1.4340E-02 5.0050E-03 1.0870E-03 5.6180E-02 2.5540E-02

2.6410E-03 5.4920E-02 2.5620E-02 1.2110E-02 4.5580E-03 4.2250E-02 1.5140E-02

5.5050E-03 1.6750E-03 2.9790E-02 1.9590E-02 9.3380E-03 2.2550E-03 1.5040E-02

7.7460E-03 2.2440E-03 9.6640E-04 1.4450E-02 8.0460E-03 4.2520E-03 1.4100E-03

1.1280E-02 5.4150E-03 3.7290E-03 1.6110E-03 1.4420E-02 6.0780E-03 2.0080E-03

4.6080E-04 1.4010E+00 3.4900E-01 1.6650E+00 2.4560E+00 2.1780E+00 5.4970E-01

1.2160E+00 4.4090E-01 6.7090E-01 8.2850E-02 3.7280E-02 2.7410E-02 5.4070E-02

2.3340E-02 2.1430E-02 6.8620E-03 4.1090E-02 4.9440E-02 3.4180E-02 2.3290E-02

4.7850E-02 7.0840E-02 4.9440E-02 2.7350E-02 2.1830E-02 2.3070E-02 2.1800E-02

1.4360E-02 7.8330E-03 2.5780E-02 1.9350E-02 7.1590E-03 7.4340E-02 1.0770E-01

6.1280E-02 1.6090E-02 4.6980E-02 9.9280E-02 3.2970E-02 9.6230E-03 4.2550E-02

8.6390E-02 4.9520E-02 1.8580E-02 1.9100E-02 4.9920E-02 2.7320E-02 1.1740E-02

4.4360E-02 7.9380E-02 4.7470E-02 1.9530E-02 1.5270E-02 2.9220E-02 2.2810E-02

9.6980E-03 8.6300E-03 1.3070E-02 1.1980E-02 5.6950E-03 3.3940E-02 1.1340E-02

1.7840E-02 2.5590E-02 3.0100E-02 1.3830E-02 8.5800E-03 1.1630E-02 1.9760E-02

1.2460E-02 6.7460E-03 1.9590E-02 1.0620E-02 7.6100E-03 6.8050E-03 5.5010E-03

5.9660E-03 5.8240E-03 3.0300E-03 1.0840E-02 5.1570E-03 3.0230E-03 2.1000E-03

5.4130E-03 5.1390E-03 3.3360E-03 1.9480E-03 4.8300E-03 5.7640E-03 4.4490E-03

2.1900E-03 9.2550E-01 1.0280E-01 1.7290E+00 1.0830E+00 1.6790E+00 4.4230E-01

6.7860E-01 4.3710E-01 2.6900E-02 7.6670E-02 2.3760E-02 1.7950E-02 1.0590E-02

1.3470E-02 8.2810E-03 2.7360E-02 1.9750E-02 3.1560E-02 2.1290E-02 1.0470E-02

2.9840E-02 4.7870E-02 3.9850E-02 4.6340E-03 1.4460E-02 1.6200E-02 1.9050E-02

6.4670E-04 6.7870E-03 1.6330E-02 1.5200E-02 1.4040E-02 6.0970E-02 5.7360E-02

3.9550E-02 1.8240E-02 3.7350E-02 5.2950E-02 1.8210E-02 8.9900E-03 3.3570E-02

5.2130E-02 3.7310E-02 3.0270E-03 1.4440E-02 2.9810E-02 2.1710E-02 1.0520E-02

3.3710E-02 4.7860E-02 3.5310E-02 2.1840E-03 1.2140E-02 1.6300E-02 1.8610E-02

5.7040E-04 7.3290E-03 7.2790E-03 1.0060E-02 1.3440E-02 1.7710E-02 1.1440E-02

1.2100E-02 1.3810E-02 1.6250E-02 6.4550E-03 3.3200E-03 7.8540E-03 1.0890E-02

8.2950E-03 9.3370E-03 7.6080E-03 9.3560E-03 3.3420E-03 1.2500E-03 4.1010E-03

3.4030E-03 4.4180E-03 7.2240E-03 2.7830E-03 2.5710E-03 1.5010E-03 3.7280E-03

3.3320E-03 2.6260E-03 1.6580E-03 1.0930E-03 3.4940E-03 3.5550E-03 3.3510E-03

2.4250E-02 8.5280E-02 1.1950E+00 9.9190E-01 7.6710E-02 5.5110E-01 1.6150E-01

9.4600E-03 1.9970E-02 1.2380E-02 1.2220E-02 4.4040E-03 5.7650E-03 6.1360E-03

1.3670E-02 4.9770E-03 1.8360E-02 9.6200E-03 9.3710E-04 1.0640E-02 2.0340E-02

3.1650E-02 7.0040E-05 4.8710E-03 1.0440E-02 1.1680E-02 1.0340E-04 1.2510E-03

4.8080E-03 1.5640E-02 1.5220E-03 1.5780E-02 3.9400E-02 2.8940E-02 7.8480E-03

9.4410E-03 1.8270E-02 2.6250E-02 1.7650E-03 7.8120E-03 2.2260E-02 3.2870E-02

6.2290E-04 2.5750E-03 9.7880E-03 2.2540E-02 2.4410E-03 8.9450E-03 2.2360E-02

3.0200E-02 1.9180E-04 2.2280E-03 7.8040E-03 1.2980E-02 7.6050E-05 5.3020E-04

5.1090E-03 6.7950E-03 3.0220E-03 1.4190E-02 3.5560E-03 4.5580E-03 8.5730E-03

6.4500E-03 6.0490E-03 7.1830E-04 2.8410E-03 5.9600E-03 7.5430E-03 2.2550E-03

6.8050E-03 3.3420E-03 1.9690E-03 3.8630E-04 1.0270E-03 2.7500E-03 3.0030E-03

3.6110E-03 1.1460E-03 1.5790E-03 7.0190E-04 1.6110E-03 1.9470E-03 1.6580E-03

1.0190E-03 1.2920E-04 1.0790E-03 2.3100E-03 2.2150E-03 2.2720E+00 2.6490E-01

3.1150E-02 7.7530E+00 2.2860E-01 1.0660E-01 2.4260E-01 1.1090E-01 3.3530E-02

1.4660E-02 3.0790E-02 1.4760E-02 3.6350E-03 3.2720E-03 2.9060E-02 5.9620E-03

1.3020E-03 8.1660E-02 3.3400E-02 1.1330E-02 2.0470E-03 5.4390E-02 2.4090E-02

1.0360E-02 2.5760E-03 7.1600E-02 2.9650E-02 1.0010E-02 1.7600E-03 1.4450E-01

4.2260E-02 5.8970E-03 8.5440E-04 1.3460E-01 4.8180E-02 9.7770E-03 1.6570E-03

4.1760E-02 1.7780E-02 7.4640E-03 2.0640E-03 8.0100E-02 3.3240E-02 1.2590E-02

1.7190E-03 1.8110E-01 4.8320E-02 1.2520E-02 1.9220E-03 8.4170E-02 2.4340E-02

6.3920E-03 1.2890E-03 1.7800E-01 5.3360E-02 1.4830E-02 2.8220E-03 8.6730E-02

2.1410E-02 1.2480E-02 3.6680E-02 1.9390E-02 7.3520E-03 1.5340E-03 5.4950E-02

1.9650E-02 6.3490E-03 1.7620E-03 1.6910E-02 6.8260E-03 2.0930E-03 4.0610E-04

2.1630E-02 1.1710E-02 3.3770E-03 9.9680E-04 1.4740E-02 1.7870E-02 6.1210E-03

2.0730E-03 2.0190E-02 9.6320E-03 3.3300E-03 6.2040E-04 2.6910E-02 1.2750E-02

5.1170E-03 1.9890E-03 2.4360E+00 3.0640E-01 2.6280E+00 3.7270E+00 1.0060E-01

6.5360E-02 1.7920E-01 1.0520E-01 2.7940E-02 2.0500E-02 1.0640E-02 7.9490E-03

2.6170E-03 1.3530E-02 1.2800E-02 3.1030E-03 3.0940E-02 3.8580E-02 2.4550E-02

1.2460E-02 1.9220E-02 2.7300E-02 1.5750E-02 1.1200E-02 2.1070E-02 3.4670E-02

2.4120E-02 1.1400E-02 5.3690E-02 5.0880E-02 3.9510E-02 4.9760E-03 5.8190E-02

5.2110E-02 3.6240E-02 9.0550E-03 1.7770E-02 1.8950E-02 1.0790E-02 6.7600E-03

2.8060E-02 3.6140E-02 2.7660E-02 1.2990E-02 4.8180E-02 9.6640E-02 3.7320E-02

1.3580E-02 1.9230E-02 4.7310E-02 2.0660E-02 7.0430E-03 3.6920E-02 8.4650E-02

4.7040E-02 1.6580E-02 4.2130E-02 4.6720E-02 7.4150E-03 2.1910E-02 1.3880E-02

9.9880E-03 6.2410E-03 1.9650E-02 2.6060E-02 1.4980E-02 6.0060E-03 8.1720E-03

6.4350E-03 3.9930E-03 1.8650E-03 1.0220E-02 8.7890E-03 8.6130E-03 3.5880E-03

1.1790E-02 9.9600E-03 7.9390E-03 2.7910E-03 1.1100E-02 7.5340E-03 5.2080E-03

2.9290E-03 1.2730E-02 1.0440E-02 6.6600E-03 5.1660E-03 1.9000E+00 7.3370E-01

2.6640E+00 1.4640E+00 2.9820E-02 5.3780E-02 1.3910E-01 7.8870E-02 1.2020E-02

1.1020E-02 6.7480E-03 1.9630E-03 6.0170E-03 9.9730E-03 5.9330E-03 7.5790E-03

1.8920E-02 2.7450E-02 2.1490E-02 6.8770E-03 1.1510E-02 2.1920E-02 1.5040E-02

3.8240E-03 1.6600E-02 2.5080E-02 2.2130E-02 1.4990E-02 4.8820E-02 2.4820E-02

2.6770E-02 1.8890E-02 4.4490E-02 2.9400E-02 2.3760E-02 7.4620E-03 1.0760E-02

1.4370E-02 8.9580E-03 8.9050E-03 2.3040E-02 2.3670E-02 2.2900E-02 1.2500E-02

3.7190E-02 6.7110E-02 2.9790E-02 4.2610E-03 1.5320E-02 3.3390E-02 1.7330E-02

6.9150E-03 3.1980E-02 6.0110E-02 4.1530E-02 2.4540E-02 3.1870E-02 1.6020E-02

1.0220E-02 1.1550E-02 1.0670E-02 5.7840E-03 6.3490E-03 1.4980E-02 1.7010E-02

1.1460E-02 3.3030E-03 4.9100E-03 4.5220E-03 2.4730E-03 2.4360E-03 7.3910E-03

6.1570E-03 7.5130E-03 8.8450E-03 5.6870E-03 6.3680E-03 3.6530E-03 4.9740E-03

6.7110E-03 5.5790E-03 3.1470E-03 5.1150E-03 6.6520E-03 7.8970E-03 5.1260E-03

1.9090E-01 9.3390E-01 2.0840E+00 1.3840E-02 2.6580E-02 4.9950E-02 2.4400E-02

5.6970E-03 9.2930E-03 4.2400E-03 1.3090E-03 2.2880E-03 5.6130E-03 6.5500E-03

1.0250E-03 8.1990E-03 1.7430E-02 2.4260E-02 8.7100E-04 7.3180E-03 1.0530E-02

1.8090E-02 2.1790E-04 4.3240E-03 1.4380E-02 2.6180E-02 2.9320E-03 1.7070E-02

3.7210E-02 1.9950E-02 4.7410E-03 2.0160E-02 3.3220E-02 1.9790E-02 2.0640E-03

6.7580E-03 8.3700E-03 9.2380E-03 9.0670E-04 8.6820E-03 1.8890E-02 2.4010E-02

1.9220E-03 1.3570E-02 2.9730E-02 5.1190E-02 8.3770E-04 4.5310E-03 1.2540E-02

2.8530E-02 1.0220E-03 7.3710E-03 2.6090E-02 6.0600E-02 1.4660E-02 1.2690E-02

2.0440E-02 3.4530E-03 9.7880E-03 7.9560E-03 4.4280E-03 1.7640E-03 6.0060E-03

1.1460E-02 1.3730E-02 9.9630E-04 3.2800E-03 3.5460E-03 2.1450E-03 5.7640E-04

2.4970E-03 6.2070E-03 5.6660E-03 5.8960E-03 2.9240E-03 3.9240E-03 3.4990E-03

1.5960E-03 4.8090E-03 4.7420E-03 2.5490E-03 1.9880E-03 5.1650E-03 5.1210E-03

4.9570E-03 3.0840E-01 8.5100E-02 4.1090E-02 2.4350E-02 1.3330E-02 6.9350E-03

1.6070E-01 7.6580E-02 7.2300E-03 1.3760E-02 2.7240E-02 1.2290E-02 6.2220E-03

2.2080E-02 1.2980E-02 6.7920E-03 2.7010E-03 1.1710E-02 6.7950E-03 4.8040E-03

1.6790E-03 6.5630E-03 4.2390E-03 2.4280E-03 5.0670E-04 3.3030E-02 1.6370E-02

7.7190E-03 2.7220E-03 6.4000E-02 4.0740E-02 1.6850E-02 3.3640E-03 1.9940E-02

1.6740E-02 1.0700E-02 6.8790E-03 3.4040E-02 2.2830E-02 1.3020E-02 5.6620E-03

1.0680E-01 4.1290E-02 1.3960E-02 4.5370E-03 2.8410E-02 1.9050E-02 1.0700E-02

6.7280E-03 7.7120E-03 3.7990E-03 1.7380E-03 5.6390E-04 1.2080E-01 2.3110E-02

7.0570E-03 8.2930E-02 3.2180E-02 1.1420E-02 3.5470E-03 8.2500E-02 4.1330E-02

2.0930E-02 1.0800E-02 3.8460E-02 1.7620E-02 6.6820E-03 1.3700E-03 8.1480E-03

6.0320E-03 3.7510E-03 1.9360E-03 2.6930E-02 2.1370E-02 1.1480E-02 6.6370E-03

1.2680E-02 1.0740E-02 7.4510E-03 3.3070E-03 1.3190E-02 8.9500E-03 5.3090E-03

2.7080E-03 1.8010E-01 1.5570E-02 1.7020E-02 1.4670E-02 1.0120E-02 7.5350E-02

2.6150E-02 6.1140E-02 9.1580E-03 1.2250E-02 1.1160E-02 5.2970E-03 7.5950E-03

1.3410E-02 7.9560E-03 7.4990E-03 2.6730E-03 4.3510E-03 4.4840E-03 3.9170E-03

1.9780E-03 6.3420E-04 2.5360E-03 2.6690E-03 1.1350E-02 1.1930E-02 9.9540E-03

5.6520E-03 3.3670E-02 1.1130E-02 2.0430E-02 1.7610E-02 1.2000E-02 1.0850E-02

8.1330E-03 4.5500E-03 1.5190E-02 9.6120E-03 1.1460E-02 1.3960E-02 9.0560E-03

4.9720E-02 3.7270E-02 1.5470E-02 1.1870E-02 1.1330E-02 1.0760E-02 9.7600E-03

8.4930E-04 3.2010E-03 3.0600E-03 2.0350E-03 2.3100E-02 6.2150E-02 1.4780E-02

1.7220E-02 3.6370E-02 2.3980E-02 9.7200E-03 1.8980E-02 4.1790E-02 3.0440E-02

1.4050E-02 1.2990E-02 7.6070E-03 1.1850E-02 7.3180E-03 4.3290E-03 2.5700E-03

2.9190E-03 3.4130E-03 1.7950E-02 1.1490E-02 1.5070E-02 2.7700E-03 9.9960E-03

6.2730E-03 4.3910E-03 2.4200E-03 5.6630E-03 4.8670E-03 4.6580E-03 5.1100E-03

4.8280E-03 7.7040E-03 8.7140E-03 7.7720E-03 7.2090E-03 6.0590E-02 1.2870E-02

4.5880E-03 6.1790E-03 5.2950E-03 3.8730E-03 6.2930E-04 3.9430E-03 5.1550E-03

8.6030E-03 8.9980E-05 1.5860E-03 2.6920E-03 3.1300E-03 1.2020E-04 1.1460E-03

1.6630E-03 1.8140E-03 2.9950E-03 7.4390E-03 6.6130E-03 4.2920E-03 1.9050E-03

2.2130E-02 1.2960E-02 3.4760E-03 6.0170E-03 4.7720E-03 3.9090E-03 2.4280E-03

1.1330E-03 9.0020E-03 8.9050E-03 5.6190E-03 2.5670E-03 4.6820E-03 2.0870E-02

2.6860E-02 2.9460E-03 5.7660E-03 6.6880E-03 5.6590E-03 6.1130E-05 4.8710E-04

1.5540E-03 2.3720E-03 7.0530E-03 1.4780E-02 2.7670E-02 3.9820E-03 9.8210E-03

1.6670E-02 1.2490E-02 8.3770E-03 8.0520E-03 1.6010E-02 1.9860E-02 9.8520E-04

8.8390E-03 6.2400E-03 2.5930E-03 7.0750E-04 2.4250E-03 2.1510E-03 1.2700E-03

8.9800E-03 6.6290E-03 2.7690E-03 4.0950E-03 4.2580E-03 3.7600E-03 2.0220E-03

1.2100E-03 1.7860E-03 3.0220E-03 2.6950E-03 1.8880E-03 3.5830E+00 3.7350E-01

1.1130E-01 1.6250E+00 2.3480E-01 6.0350E-02 1.7970E-02 2.4340E-02 1.0380E-02

1.9950E-03 1.5800E+00 1.5800E-01 1.8810E-02 2.7770E-03 1.0640E-01 2.8730E-02

8.4150E-03 1.1340E-03 1.1750E-01 3.7950E-02 1.4210E-02 1.2510E-03 1.6810E-01

3.2080E-02 1.0630E-02 3.6370E-03 3.2420E-01 3.9950E-02 1.2430E-02 3.1210E-03

4.3890E-01 7.3760E-02 1.1630E-02 2.5710E-03 4.8640E-01 6.8050E-02 1.4400E-02

2.5090E-03 9.6860E-01 1.2830E-01 1.5020E-02 3.3230E-03 1.2720E+00 1.7350E-01

2.9640E-02 5.2840E-03 9.8270E-02 4.2450E-02 1.1690E-02 2.1440E-03 3.1050E-02

9.3960E-03 1.5140E-03 4.6750E-02 1.3090E-02 4.1630E-03 1.2830E-03 1.2560E-01

3.0190E-02 1.0870E-02 3.0810E-03 1.6200E+01 3.5900E-01 4.8390E-02 2.5770E-02

3.0160E+01 3.6820E+00 3.3410E-01 6.4060E-02 4.8740E-02 5.1140E-02 2.4570E-02

3.0560E-03 6.1510E+00 1.7750E-01 9.9050E-03 5.2720E-03 1.8420E+01 2.3710E+00

1.1250E-01 2.0570E-02 3.9890E+00 3.5420E-01 6.9420E-01 7.0850E-01 1.2280E-01

1.4380E-02 1.5600E-02 8.5290E-03 5.0040E-03 4.8500E-02 1.1780E+00 1.8240E-01

2.1350E-02 1.8010E-02 5.8580E-02 2.6990E-02 9.7670E-03 4.0990E-02 6.3100E-02

4.7170E-02 1.6620E-02 3.8940E-02 8.8640E-02 1.9680E-02 6.0140E-03 6.7920E-02

1.8260E-01 2.6760E-02 9.9740E-03 6.9000E-02 2.5960E-01 7.1290E-02 1.1840E-02

3.7200E-02 2.5870E-01 7.1070E-02 1.8230E-02 1.2620E-01 6.1650E-01 1.4290E-01

1.6100E-02 6.1210E-02 9.3690E-01 1.8600E-01 3.4140E-02 3.2410E-02 4.6620E-02

3.5310E-02 1.3260E-02 1.5800E-02 1.1440E-02 5.1940E-03 1.7380E-02 2.7770E-02

1.0520E-02 2.7850E-03 2.9850E-02 6.7990E-02 2.3750E-02 1.0890E-02 3.0030E+00

1.0620E+01 3.1230E-01 2.5140E-02 1.0690E+00 2.2260E+01 4.3280E+00 3.8200E-01

3.8980E-02 3.4040E-02 1.4780E-02 1.8970E-02 9.0690E-01 3.9910E+00 1.5860E-01

7.9080E-03 2.3220E+00 1.1620E+01 2.7740E+00 1.4570E-01 3.0090E+00 2.6460E-01

5.4700E-01 3.2250E-01 1.0780E-02 8.4110E-03 8.3540E-03 5.0750E-03 8.9260E-03

4.3860E-02 8.7830E-01 1.4300E-01 3.5630E-03 1.5050E-02 4.3290E-02 2.3230E-02

1.6750E-03 2.8980E-02 4.5640E-02 4.0360E-02 1.4010E-02 2.9150E-02 6.1070E-02

1.2160E-02 2.0320E-02 5.9310E-02 1.1840E-01 1.6680E-02 1.1630E-02 6.2620E-02

1.7690E-01 4.8990E-02 8.0530E-03 3.4630E-02 2.0940E-01 5.8900E-02 1.4460E-02

1.4300E-01 5.1260E-01 1.0900E-01 1.2900E-02 7.3060E-02 7.2920E-01 1.5050E-01

5.9840E-03 2.7400E-02 3.2000E-02 3.1140E-02 7.8940E-03 1.0550E-02 7.2870E-03

6.6140E-03 1.2850E-02 1.8090E-02 6.3000E-03 1.0720E-02 2.3680E-02 5.0340E-02

1.8550E-02 2.5730E-01 3.0960E+00 6.8120E+00 2.0770E-01 1.2210E-01 1.3380E+00

1.6240E+01 3.3560E+00 2.9250E-02 1.8200E-02 1.7120E-02 1.7270E-02 8.7180E-02

1.0490E+00 2.5390E+00 1.1210E-01 9.1830E-02 2.7670E+00 7.7240E+00 2.1010E+00

1.0510E-01 2.7050E-01 3.7960E-01 7.1910E-03 3.6950E-03 6.4600E-03 4.0250E-03

1.4260E-03 9.7030E-03 3.2730E-02 6.6970E-01 1.8320E-04 4.0600E-03 1.2610E-02

4.1030E-02 8.0710E-05 1.8390E-03 2.3130E-02 4.6640E-02 6.3890E-03 1.1230E-02

2.1800E-02 3.3980E-02 6.4500E-03 1.9780E-02 4.6320E-02 7.3750E-02 2.5690E-03

1.1840E-02 5.3120E-02 1.3830E-01 1.2080E-03 8.9000E-03 2.6940E-02 2.0320E-01

3.1880E-03 1.5830E-02 1.0670E-01 3.3030E-01 3.0040E-03 1.4460E-02 5.8430E-02

5.8020E-01 5.8980E-04 6.5980E-03 2.2100E-02 3.3270E-02 2.8210E-03 7.5190E-03

6.2360E-03 2.4920E-03 5.7260E-03 9.5560E-03 8.6100E-03 3.0880E-03 1.0830E-02

1.8500E-02 3.3080E-02 4.4790E-02 2.9690E-01 2.3480E+00 4.0620E+00 3.6410E-02

1.3270E-01 1.0330E+00 1.2850E+01 1.9490E-02 7.4660E-03 2.3780E-02 6.7660E-03

9.7580E-03 1.0740E-01 8.0230E-01 1.7360E+00 1.4230E-02 1.4030E-01 2.0970E+00

6.1830E+00 1.2280E+00 1.5430E-01 9.4500E-01 9.0920E-01 4.0610E-01 1.0130E-02

2.9070E-02 1.6840E-02 8.7870E-03 4.4740E-03 9.3000E-03 5.0630E-03 3.0230E-03

8.7050E-04 1.9040E-02 7.5730E-03 3.4910E-03 1.6470E-03 5.9250E-02 3.8540E-02

2.7610E-02 1.5240E-02 7.0030E-01 1.7350E-01 2.7630E-02 4.9110E-03 3.2120E-02

1.5860E-02 1.0690E-02 5.0890E-03 1.8880E-02 1.1310E-02 6.8640E-03 4.0970E-03

2.2880E-02 1.4670E-02 7.6750E-03 3.3890E-03 2.4670E-02 1.2340E-02 5.8120E-03

2.8850E-03 2.7250E-02 1.8410E-02 7.8720E-03 3.7370E-03 8.2600E-01 3.6410E-01

1.0420E-02 5.2160E-01 1.4380E-01 3.2830E-02 5.2160E-03 6.2660E-02 4.8040E-02

2.7820E-02 1.1990E-02 1.2000E+01 2.7940E+00 5.3770E-01 3.5650E-02 2.5130E-01

1.1150E-01 5.4440E-02 2.7720E-02 7.1760E+00 9.2340E+00 4.0930E+00 6.9980E-02

9.8790E+00 2.4950E+00 3.2560E-01 1.5600E-02 6.0710E-02 2.3700E-02 9.3270E-03

3.5320E-03 9.5800E-01 6.2450E-01 3.9850E-01 1.2640E-01 3.5830E-01 6.9330E-03

1.1790E-02 1.1120E-02 8.2360E-03 1.6190E-03 4.1940E-03 3.9320E-03 2.8850E-03

2.4880E-03 7.4880E-03 7.7140E-03 4.3620E-03 3.2120E-02 3.7560E-02 1.9540E-02

5.5070E-03 1.7090E-02 3.6570E-01 1.9040E-01 3.4270E-02 1.2740E-02 1.1450E-02

1.1180E-02 8.7590E-03 6.2520E-03 8.7900E-03 7.5250E-03 5.0400E-03 9.4370E-03

9.9900E-03 7.8660E-03 6.8680E-03 4.6040E-03 1.0190E-02 9.2380E-03 7.2990E-03

7.1990E-03 1.0780E-02 1.0470E-02 1.0520E-02 3.5920E-01 1.1380E-01 3.2380E-01

3.0390E-02 2.6310E-01 1.4570E-01 3.3450E-02 3.7810E-02 2.0790E-02 2.0920E-02

2.4980E-02 1.7470E-01 5.6680E+00 2.9940E+00 5.6910E-01 3.9080E-02 1.0300E-01

8.7660E-02 5.0810E-02 4.7380E+00 4.0080E+00 1.3680E+00 3.6440E+00 1.4830E-01

4.5920E+00 2.4830E+00 4.9130E-01 8.0410E-03 2.6560E-02 2.0890E-02 9.4520E-03

3.0990E-01 1.0040E-02 3.5450E-01 7.2530E-02 1.3570E-03 3.6800E-03 6.4990E-03

6.9480E-03 6.8550E-05 1.0540E-03 2.0510E-03 3.0600E-03 2.6110E-05 1.2160E-03

2.9870E-03 6.2060E-03 2.1170E-02 8.4250E-03 9.8980E-03 6.4210E-03 6.2000E-03

7.8110E-03 1.4610E-01 1.4340E-01 3.1790E-03 7.1040E-03 7.0850E-03 4.9410E-03

2.1800E-03 2.9950E-03 3.9470E-03 4.5020E-03 1.2180E-03 5.2710E-03 5.1000E-03

4.6810E-03 1.0230E-03 2.5460E-03 5.1080E-03 6.5660E-03 6.6210E-04 4.1480E-03

7.2910E-03 7.0210E-03 1.0320E-02 3.2320E-01 6.6440E-02 5.0350E-03 1.7850E-02

1.0990E-01 1.0220E-01 5.3940E-03 2.1110E-02 1.7000E-02 6.9480E-03 3.9230E-02

9.8650E-02 2.2760E+00 2.2270E+00 1.6270E-02 1.9100E-02 4.9210E-02 6.9650E-02

2.3370E+00 6.9860E-02 3.5030E+00 8.0380E-01 8.3680E-03 9.9800E-02 1.8980E+00

2.1290E+00 1.9460E-03 4.4440E-03 1.1080E-02 1.7850E-02 1.1140E+00 7.4240E-01

3.7140E-01 5.9840E-02 4.9860E-02 3.9890E-02 2.9920E-02 3.0370E-04 2.6030E-04

2.1690E-04 1.7350E-04 1.6020E-03 1.4020E-03 1.2010E-03 1.0010E-03 3.4770E+00

2.6210E+00 1.7540E+00 8.7970E-01 1.0640E-01 7.9830E-02 5.3260E-02 2.6650E-02

4.2350E-03 3.3880E-03 2.5410E-03 1.6940E-03 1.9470E-02 1.6220E-02 1.2980E-02

9.7380E-03 1.9380E-02 1.5510E-02 1.1630E-02 7.7540E-03 1.8010E-02 1.5000E-02

1.2000E-02 9.0050E-03 2.7630E-04 2.3680E-04 1.9730E-04 1.5780E-04 3.6730E-02

2.4480E-02 1.2240E-02 2.8950E-02 2.1880E-02 1.4610E-02 7.3230E-03 1.7420E-02

1.3940E-02 1.0450E-02 6.9690E-03 7.2390E-02 5.4390E-02 3.6320E-02 1.8180E-02

7.3970E-03 6.1650E-03 4.9330E-03 3.7000E-03 1.8710E-02 1.4920E-02 9.9340E-03

4.9780E-03 4.1080E-02 3.3230E-02 2.2190E-02 1.1110E-02 2.9770E-03 2.3820E-03

1.7860E-03 1.1910E-03 2.1540E+00 1.0970E+00 3.3620E-02 2.3050E-02 1.3270E-02

5.7710E-03 7.7580E-02 2.2170E-02 8.2930E-03 2.2880E-03 1.1750E-03 9.9210E-04

6.2920E-04 3.5310E-04 5.9360E+00 3.9450E+00 1.5740E+00 2.9570E-01 8.1740E-02

4.8610E-02 2.1870E-02 6.8650E-03 1.0680E-01 7.2820E-02 5.6680E-02 3.7420E-02

5.4180E-02 4.0750E-02 2.7100E-02 1.5470E-02 3.7160E-02 2.1540E-02 1.2220E-02

6.2220E-03 2.3600E-02 1.0890E-02 4.3600E-03 1.3790E-03 2.2250E-02 6.3320E-03

2.5250E-03 1.4730E-03 3.2670E-02 3.2470E-02 2.0320E-02 5.6120E-02 3.2510E-02

1.5490E-02 4.5150E-03 6.4160E-02 3.2850E-02 1.6470E-02 7.0330E-03 7.3980E-02

4.7870E-02 2.3420E-02 9.3370E-03 6.7920E-03 9.3080E-03 3.7120E-03 1.4070E-03

1.9600E-02 3.3580E-02 3.4490E-02 2.2320E-02 6.5110E-02 4.8190E-02 2.1970E-02

5.5110E-03 4.8070E-02 1.6500E-02 6.1420E-03 2.2020E-03 7.0260E-01 1.5860E-02

3.7340E-03 9.5300E-03 1.3810E-02 2.7140E-03 3.3900E-02 3.3390E-02 1.1190E-02

6.5160E-04 3.2590E-04 4.1700E-04 6.7020E-04 3.3130E+00 8.0140E-01 1.9300E+00

1.8390E+00 3.8270E-02 2.2590E-02 2.5710E-02 1.8200E-02 5.6840E-02 6.2750E-02

4.1050E-02 1.8750E-02 3.0090E-02 2.1150E-02 2.0210E-02 2.1660E-02 1.4370E-02

1.3960E-02 1.2370E-02 9.2910E-03 2.9730E-03 9.6700E-03 8.7490E-03 5.4250E-03

1.0900E-03 5.6880E-03 5.4060E-03 3.2990E-03 3.2380E-02 1.8540E-02 6.0670E-03

2.5020E-02 1.7680E-02 1.7570E-02 1.1260E-02 1.5610E-02 2.3100E-02 2.2130E-02

1.5230E-02 4.3780E-02 2.1890E-02 2.3760E-02 1.7230E-02 3.3910E-03 2.0390E-03

2.3850E-03 5.1720E-03 1.3060E-02 3.4430E-02 2.0280E-02 5.5180E-03 4.2560E-02

8.7870E-03 2.1650E-02 2.0660E-02 4.9380E-03 1.8170E-02 1.3900E-02 6.5190E-03

8.2170E-04 9.4750E-03 8.7180E-03 2.4840E-03 9.5340E-05 1.6150E-03 1.0480E-02

2.6220E-02 5.8350E-05 3.6550E-04 3.7940E-04 1.8870E-04 1.4020E-01 2.3300E+00

1.2320E+00 2.4410E-01 7.1340E-03 2.2930E-02 1.6180E-02 5.5930E-03 3.2140E-02

1.8330E-02 2.1280E-02 1.7240E-02 8.0190E-03 1.5770E-02 1.3830E-02 9.3830E-03

4.1970E-03 7.3340E-03 7.9870E-03 5.9800E-03 2.5020E-04 1.7860E-03 4.7710E-03

6.6080E-03 7.5380E-05 6.4590E-04 2.6320E-03 4.3870E-03 2.0210E-02 6.0640E-03

2.6950E-03 4.9050E-03 1.4630E-02 1.1450E-02 5.1640E-03 3.8770E-03 1.0650E-02

1.1580E-02 1.1130E-02 1.0270E-02 2.5350E-02 1.4320E-02 4.9940E-03 3.8530E-04

1.9880E-03 2.5070E-03 1.1670E-03 6.5380E-03 2.2250E-02 5.5150E-03 2.3320E-03

7.1180E-03 2.7230E-02 1.2930E-02 1.5410E-03 1.0820E-03 2.3770E-03 9.3330E-03

1.0690E-02 1.3040E+00 6.3680E-02 8.8460E-03 2.2930E+00 9.3450E-01 9.7550E-02

7.7110E-03 4.5940E+00 1.0140E+00 1.6130E-01 1.2520E-02 6.0660E-02 1.3990E-02

2.9640E-03 6.9920E-04 2.2620E+00 2.1030E-01 7.3680E-03 8.7650E-04 2.1500E+00

4.1730E-01 4.4920E-02 2.4230E-03 9.9550E-01 3.0910E-01 4.4440E-02 1.9510E-03

4.1770E-01 1.6000E-01 4.2220E-02 6.7650E-03 6.7920E-01 1.8540E-01 4.5550E-02

7.4560E-03 2.7750E-01 1.2610E-01 1.7860E-02 1.7450E-03 3.6850E-02 7.7500E-03

1.6970E-04 1.8700E-01 2.2010E-02 1.6310E-03 9.8990E-05 2.2300E-01 4.3430E-02

3.2990E-03 3.8240E-04 3.0250E-01 3.2730E-02 8.4420E-03 6.4770E-04 8.6720E-02

2.7660E-02 5.7870E-03 6.2840E-04 1.8930E-02 1.1640E-02 6.1630E-03 4.1220E-04

7.5770E-02 7.5700E-03 1.7470E-03 1.4020E-04 1.1300E-01 3.0900E-02 8.2790E-03

1.9000E-03 1.3520E+01 7.4620E-02 7.0760E-01 3.5410E+00 1.0810E+00 1.1540E-01

8.6130E-01 4.5180E+00 2.0060E+00 1.9370E-01 2.1210E-02 2.7260E-02 8.2940E-03

2.3750E-03 6.0280E-01 1.2430E+00 2.2450E-01 4.7090E-03 5.4440E-01 1.1660E+00

4.2660E-01 5.2570E-02 3.0910E-01 8.7200E-01 3.1900E-01 5.1040E-02 1.4440E-01

2.0920E-01 9.4930E-02 3.3030E-02 1.8510E-01 3.5860E-01 1.5850E-01 5.0070E-02

1.0290E-01 3.2630E-01 1.3540E-01 2.0530E-02 1.8200E-02 1.3820E-02 4.8590E-03

5.2160E-02 1.0090E-01 2.0450E-02 1.7250E-03 5.6850E-02 1.1830E-01 4.6410E-02

3.6530E-03 7.0450E-02 1.6680E-01 2.0120E-02 7.2170E-03 2.7640E-02 8.6950E-02

3.0390E-02 6.4470E-03 1.5780E-02 9.3840E-03 1.9230E-03 3.5810E-03 2.1210E-02

4.8090E-02 5.0870E-03 1.9590E-03 3.8480E-02 5.6560E-02 2.5550E-02 8.5760E-03

1.5650E+00 4.4640E-02 8.1150E-01 2.6430E+00 8.6580E-01 1.7750E-02 1.0490E+00

6.1600E+00 1.5890E+00 6.9650E-03 1.8980E-02 1.7580E-02 5.7170E-03 1.1120E-01

6.2750E-01 7.5210E-01 1.5940E-01 9.1260E-02 5.6090E-01 7.5070E-01 3.3510E-01

4.4410E-02 3.1890E-01 6.2340E-01 2.6040E-01 4.5520E-02 1.1680E-01 1.5040E-01

7.7190E-02 4.5370E-02 1.5840E-01 2.7590E-01 1.4010E-01 7.8860E-03 1.1100E-01

1.9810E-01 1.1110E-01 7.6760E-03 1.3370E-02 7.8810E-03 1.1530E-02 5.7500E-02

6.2830E-02 1.4120E-02 8.9190E-03 5.9990E-02 7.5950E-02 3.5750E-02 2.2070E-02

6.0130E-02 1.1420E-01 1.3800E-02 5.7760E-03 3.0390E-02 6.3270E-02 2.2730E-02

1.2620E-02 5.0550E-03 3.8280E-03 3.4470E-03 5.8020E-03 1.9450E-02 3.6350E-02

3.5120E-03 1.0630E-02 3.1540E-02 3.9260E-02 2.0820E-02 2.6140E-03 5.0720E-02

6.3940E-01 2.5770E+00 5.3450E-04 2.1960E-02 8.2240E-01 5.8180E+00 2.3340E-03

7.1680E-03 1.4630E-02 1.1800E-02 1.8050E-02 1.5220E-01 5.0260E-01 5.7930E-01

9.2470E-03 1.1470E-01 4.5500E-01 7.3260E-01 1.9320E-03 5.1050E-02 2.6040E-01

6.5300E-01 1.1140E-02 4.8350E-02 9.8570E-02 1.3090E-01 7.4290E-03 5.0050E-02

1.4010E-01 2.6110E-01 8.5440E-04 8.8860E-03 8.9100E-02 2.5230E-01 2.3550E-03

9.6760E-03 9.5610E-03 1.8310E-03 1.4190E-02 4.4940E-02 4.6970E-02 9.0760E-04

1.0600E-02 4.8090E-02 7.5810E-02 5.1480E-03 2.5210E-02 4.8550E-02 7.5770E-02

6.2680E-04 6.4460E-03 2.2720E-02 6.1420E-02 9.4680E-03 2.5450E-03 4.8730E-03

1.0630E-03 1.1110E-03 6.5070E-03 1.5640E-02 1.9270E-02 3.4110E-03 1.1680E-02

2.6630E-02 3.5560E-02 2.3270E+00 2.2740E-01 1.3240E-02 5.7380E+00 8.5460E-01

1.2450E-01 7.2400E-03 3.3240E-02 7.9650E-03 2.5270E-03 4.0970E-05 6.7610E-02

1.8630E-02 2.1450E-04 6.2720E-06 2.0300E-01 3.1100E-02 2.4510E-03 6.9850E-05

7.3930E-01 2.5930E-01 2.0560E-02 2.2980E-04 1.2530E+00 1.6700E-01 2.7280E-02

2.7140E-03 3.2050E-01 2.4200E-01 2.8310E-02 3.6870E-03 1.0250E+00 3.9270E-01

5.6240E-02 3.3290E-03 1.1150E-02 6.1480E-04 2.3930E-05 5.8960E-02 1.1720E-02

3.3150E-03 3.1820E-05 2.3480E-01 1.2790E-02 1.5400E-03 2.2220E-04 3.3160E-02

9.8580E-03 3.4520E-04 3.9220E-05 2.1040E-01 6.9780E-02 4.4740E-03 3.4700E-04

2.8030E-04 1.9000E-02 2.9510E-03 2.0140E-05 4.7100E-02 1.0920E-02 3.1950E-03

1.8190E-05 4.0660E-01 3.6710E-02 3.2290E-03 5.2440E-05 4.4260E+00 2.6710E-01

6.1070E-01 5.4040E+00 1.5490E+00 2.2010E-01 1.4090E-02 1.7740E-02 3.7670E-03

2.8860E-03 4.3910E-02 2.9530E-02 1.8500E-02 2.3050E-04 4.7650E-02 1.0140E-01

3.2540E-02 2.8490E-03 3.2410E-01 1.1140E+00 3.0390E-01 2.3520E-02 3.0180E-01

7.7320E-01 1.3600E-01 2.8700E-02 2.7450E-01 6.2470E-01 2.4060E-01 3.1110E-02

2.4170E-01 1.2320E+00 4.2250E-01 6.4690E-02 5.0010E-03 5.6920E-03 3.7160E-04

2.5650E-02 3.0630E-02 5.8780E-03 3.6510E-03 4.0030E-02 1.6010E-01 1.3810E-02

1.6610E-03 1.5680E-02 1.1450E-02 9.8130E-03 3.6880E-04 8.1560E-02 1.2540E-01

6.5160E-02 5.1330E-03 2.4030E-04 9.7910E-03 7.3670E-03 1.7740E-03 1.5510E-02

1.9890E-02 4.8310E-03 3.3690E-03 1.1020E-01 2.5830E-01 5.1020E-02 9.9650E-03

3.4830E+00 9.5010E-02 1.1610E+00 6.8930E+00 2.0360E+00 5.9800E-03 1.0830E-02

1.3120E-02 2.7810E-03 9.0560E-03 2.6500E-02 8.6760E-03 1.3160E-02 9.2350E-03

4.9040E-02 6.6310E-02 2.5400E-02 3.9080E-02 3.8020E-01 8.4340E-01 2.4270E-01

6.9430E-02 2.9170E-01 5.5980E-01 1.1000E-01 4.6790E-02 2.8770E-01 4.2290E-01

2.0410E-01 5.6020E-02 4.1810E-01 9.4320E-01 3.5130E-01 1.8770E-03 4.4490E-03

2.0970E-03 8.8630E-03 1.7330E-02 2.2090E-02 4.3090E-03 5.4650E-03 4.4750E-02

1.1870E-01 1.0040E-02 4.8190E-03 1.3740E-02 6.1100E-03 6.9090E-03 9.4260E-03

7.7310E-02 9.2430E-02 5.5610E-02 2.0020E-04 4.4040E-03 7.3490E-03 4.0230E-03

7.9540E-03 1.4760E-02 1.7970E-02 3.5520E-03 2.2170E-02 1.1210E-01 1.8810E-01

4.1110E-02 1.1320E-03 1.0990E-01 1.6420E+00 7.2650E+00 1.6910E-03 6.6820E-03

9.6230E-03 9.2280E-03 1.3450E-03 1.1110E-02 2.2770E-02 1.3130E-02 9.6300E-04

1.1060E-02 4.0620E-02 6.0800E-02 2.0540E-03 4.6960E-02 3.1620E-01 8.9350E-01

1.1620E-02 7.9860E-02 2.4760E-01 5.0550E-01 6.1320E-03 5.3130E-02 2.1710E-01

4.8940E-01 3.3290E-03 6.4520E-02 3.4890E-01 1.0310E+00 1.1450E-03 2.5530E-03

3.6810E-03 2.2900E-03 1.0120E-02 1.4880E-02 1.5000E-02 7.0200E-04 6.4450E-03

3.2650E-02 8.9930E-02 1.5720E-03 5.8820E-03 1.1640E-02 6.4060E-03 8.5540E-04

1.0960E-02 6.6580E-02 1.2320E-01 1.6010E-04 1.5170E-03 5.4690E-03 5.6330E-03

2.2750E-03 8.8600E-03 1.3100E-02 9.9860E-03 1.1360E-03 2.6390E-02 9.3130E-02

1.6620E-01 9.3500E-01 2.5460E-02 1.1130E-03 1.5880E-01 2.5600E-02 9.9100E-05

1.5500E-05 1.2790E-02 8.6240E-04 2.2920E-05 1.5670E-06 2.7770E-02 7.1220E-03

4.4930E-04 9.2120E-06 1.7300E+00 1.5610E-01 3.1190E-03 2.9220E-05 1.0580E-01

2.2870E-02 3.0570E-03 3.4380E-05 3.6200E-01 9.8560E-02 1.0110E-02 1.0770E-03

1.1020E+00 2.0940E-01 5.5470E-02 3.6810E-03 4.5940E-04 4.0400E-04 3.8640E-05

1.5700E-02 2.2630E-03 2.2810E-04 3.3280E-05 8.2270E-02 1.3370E-02 2.0160E-03

6.1690E-05 4.1860E-02 8.6880E-03 3.4530E-04 3.0670E-05 5.1540E-01 5.7410E-02

6.5690E-03 7.7470E-04 1.1440E-03 9.3650E-04 5.2780E-04 1.2810E-04 3.4270E-02

3.2840E-03 1.1370E-04 1.6670E-06 3.9980E-02 1.1420E-02 1.8300E-03 2.9970E-05

1.9240E+00 4.7750E-02 6.2540E-02 7.6310E-02 2.9130E-02 8.8040E-05 4.1490E-03

6.7050E-03 8.4030E-04 2.2990E-05 1.0530E-02 1.2330E-02 7.5000E-03 5.1600E-04

2.8610E-01 1.7820E+00 1.8880E-01 3.5780E-03 3.5670E-02 5.5450E-02 2.0540E-02

3.5350E-03 1.0210E-01 4.4160E-01 1.1320E-01 1.1290E-02 2.7540E-01 1.4650E+00

3.8010E-01 6.2590E-02 3.0130E-04 2.9350E-04 2.3550E-04 6.6480E-03 7.3410E-03

2.0520E-03 1.4220E-04 2.4170E-02 4.7300E-02 1.1650E-02 2.2990E-03 1.7540E-02

1.5940E-02 7.1680E-03 3.2050E-04 1.4120E-01 5.8230E-01 6.8160E-02 7.4830E-03

1.0010E-03 7.5280E-04 3.5990E-04 2.7710E-04 1.4530E-02 1.6170E-02 3.1590E-03

1.2220E-04 1.6230E-02 1.7480E-02 1.0970E-02 2.1640E-03 2.0080E+00 1.8590E-02

5.9440E-02 4.4530E-02 2.0630E-02 1.0280E-03 4.3010E-03 4.2500E-03 5.9700E-04

2.4290E-03 1.0470E-02 7.7170E-03 5.8610E-03 4.4480E-02 6.1350E-01 2.3000E+00

1.4670E-01 9.9360E-03 3.2990E-02 3.6790E-02 1.7670E-02 2.4380E-02 1.6310E-01

3.4110E-01 8.6180E-02 7.1650E-02 4.4770E-01 1.0640E+00 3.1930E-01 2.3040E-04

1.8300E-04 1.1420E-04 2.0910E-03 5.4900E-03 4.4790E-03 1.4500E-03 7.0170E-03

2.2980E-02 3.4400E-02 9.6500E-03 5.6810E-03 1.5860E-02 1.2720E-02 5.0270E-03

1.5970E-02 1.5640E-01 4.5580E-01 5.7740E-02 8.5800E-04 5.4470E-04 3.8040E-04

2.6680E-04 2.7620E-03 1.4050E-02 9.8200E-03 2.2500E-03 4.4090E-03 1.5010E-02

1.1350E-02 8.8340E-03 2.9140E-03 2.2970E-02 5.0540E-02 4.2980E-02 1.3790E-04

1.1590E-03 3.3570E-03 3.6080E-03 2.9340E-04 2.8720E-03 8.8900E-03 9.9830E-03

2.2380E-03 4.7580E-02 4.8960E-01 2.0970E+00 1.3270E-03 1.1540E-02 3.0050E-02

3.9790E-02 2.9010E-03 2.8250E-02 1.3600E-01 3.5170E-01 6.6740E-03 8.1360E-02

3.7940E-01 1.1260E+00 1.8440E-04 1.8170E-04 2.2420E-04 4.7230E-04 2.4900E-03

4.6510E-03 4.0330E-03 9.1150E-04 8.2300E-03 1.9730E-02 3.3040E-02 1.3780E-03

6.6940E-03 1.3490E-02 1.1970E-02 1.8280E-03 1.8600E-02 1.2890E-01 4.2910E-01

7.1500E-04 3.4900E-04 4.5510E-04 1.8770E-04 4.5580E-04 3.4260E-03 1.1880E-02

8.9280E-03 8.2850E-04 5.1340E-03 1.3110E-02 1.4110E-02 3.1270E+00 4.6600E-01

2.5790E-02 1.0290E-01 5.0160E-02 3.1060E-02 1.5680E-02 8.0420E-02 5.7000E-02

3.1120E-02 1.6520E-02 7.4450E-02 3.4560E-02 1.2610E-02 3.1270E-03 5.0710E-02

2.5100E-02 1.0940E-02 3.1620E-03 6.5870E-02 2.3260E-02 1.0480E-02 3.2050E-03

7.9800E-02 3.0220E-02 8.2050E-03 1.3040E-03 9.3810E-02 6.5080E-02 1.0050E-02

3.7090E-02 1.9400E-02 9.3880E-03 3.6040E-03 9.9490E-02 4.7160E-02 1.0770E-02

3.0480E-03 6.1450E-02 3.1970E-02 1.0770E-02 5.1430E-03 7.2960E-02 2.1060E-02

9.0450E-03 1.4660E-03 1.4610E-01 1.1750E-01 7.6980E-02 3.8540E-03 5.5990E-02

2.8830E-02 1.0110E-02 2.9180E-03 5.3000E-02 1.9060E-02 6.2030E-03 1.1690E-03

2.8100E+00 5.6050E-01 5.0160E-02 7.0190E-02 3.3020E-02 1.1380E-02 5.1270E-02

3.6100E-02 3.4140E-02 2.1190E-02 2.9570E-02 2.9240E-02 2.5720E-02 1.4220E-02

2.7900E-02 1.7310E-02 1.4310E-02 1.1060E-02 1.8480E-02 1.3910E-02 1.3890E-02

1.1130E-02 1.4880E-02 3.6020E-02 2.8560E-02 1.0190E-02 7.2160E-02 1.7270E-02

3.7140E-02 1.9370E-02 1.5240E-02 9.4740E-03 5.6100E-03 3.8370E-02 3.6930E-02

4.3190E-02 1.6100E-02 3.1770E-02 1.8840E-02 2.2580E-02 9.2750E-03 1.0560E-02

3.4440E-02 2.4700E-02 6.5950E-03 1.0920E-01 8.6600E-02 7.6120E-03 5.3100E-02

2.8800E-02 1.8130E-02 1.8740E-02 7.7830E-03 1.5700E-02 1.3930E-02 1.7540E-02

6.9750E-03 1.8810E+00 3.1060E-02 3.3020E-02 3.1060E-02 1.0300E-02 2.3020E-02

3.1310E-02 1.8110E-02 2.2630E-02 4.6950E-03 1.8100E-02 1.8450E-02 2.1130E-02

7.1500E-03 1.2590E-02 1.3190E-02 1.1410E-02 5.8320E-03 1.1250E-02 1.0350E-02

1.1300E-02 3.6510E-04 1.4880E-02 2.0640E-02 2.3860E-02 3.7410E-02 3.1570E-02

1.7770E-02 9.3770E-03 9.4650E-03 8.5490E-03 4.3770E-03 5.6800E-03 3.6620E-02

1.5780E-02 2.4890E-02 1.0720E-02 2.2550E-02 8.7950E-03 1.2120E-02 1.4370E-03

6.5710E-03 2.6520E-02 1.6570E-02 7.2580E-02 3.6320E-02 3.9000E-02 2.3950E-02

1.0100E-02 1.8730E-02 8.5160E-03 1.0510E-02 2.6580E-03 1.4610E-02 8.1770E-03

1.0560E-02 1.5680E-02 1.1380E-02 1.0300E-02 1.1740E-02 9.4760E-03 1.2050E-02

1.8430E-02 8.3640E-03 4.5560E-04 4.7160E-03 1.4300E-02 1.3510E-02 1.1830E-03

8.6920E-03 8.5130E-03 5.3600E-03 8.0590E-04 5.4530E-03 7.5020E-03 5.8300E-03

3.3420E-05 3.6100E-04 1.0500E-02 1.8990E-02 1.0220E-02 2.7270E-02 2.9020E-03

3.6040E-03 5.6020E-03 4.3750E-03 3.4820E-03 1.2760E-03 5.2310E-03 1.8600E-02

1.2560E-02 5.1430E-03 7.5730E-03 1.2060E-02 2.9020E-03 6.6410E-04 9.3660E-04

3.8320E-03 1.5150E-02 3.6230E-02 7.6190E-03 4.0480E-02 1.4470E-03 2.9170E-03

7.7770E-03 1.0500E-02 3.1840E-03 2.6570E-04 2.7650E-03 9.3850E-03 5.3300E-03

1.0420E+00 7.1100E-02 1.2940E-02 3.8630E+00 1.2360E+00 2.5650E-01 2.9670E-02

8.5470E+00 1.8430E+00 2.9790E-01 3.6970E-02 1.5480E-01 6.3280E-02 2.0220E-02

6.0810E-03 1.7380E-01 6.4080E-02 2.0020E-02 6.2220E-03 3.3710E-02 1.6380E-02

7.8690E-03 2.0580E-03 3.5670E-01 1.1720E-01 1.9910E-02 5.6160E-01 2.7320E-01

8.0190E-02 1.2500E-02 4.1620E-01 1.2490E-01 2.7070E-02 5.4150E-03 1.6710E-01

9.9370E-02 2.8270E-02 8.8630E-03 3.1120E-02 1.3990E-02 5.5960E-03 1.5640E-03

1.6640E-02 1.9990E-02 1.2860E-02 7.9960E-03 6.0840E-02 3.6430E-02 1.7910E-02

5.8800E-03 7.7000E-02 3.4900E-02 1.4380E-02 5.2360E-03 1.1340E+00 7.0410E-02

8.7140E-01 1.7110E+00 1.1700E+00 3.1950E-01 3.8190E-01 5.0630E+00 2.0890E+00

3.9060E-01 5.0110E-02 6.0810E-02 3.2020E-02 2.5430E-02 3.1290E-02 1.1280E-01

6.8910E-02 2.3490E-02 1.0350E-02 1.6550E-02 9.4190E-03 8.7110E-03 1.6730E-01

1.0920E-01 7.0850E-02 2.6880E-01 1.7510E-01 1.8290E-01 7.7740E-02 8.4070E-02

2.0460E-01 1.1290E-01 3.4080E-02 9.9120E-02 4.9510E-02 6.9930E-02 2.2130E-02

9.6470E-03 1.4350E-02 1.1000E-02 5.8740E-03 1.2460E-02 1.4860E-02 1.0080E-02

5.3690E-03 3.6370E-02 2.3000E-02 1.8810E-02 1.1270E-02 2.9320E-02 2.7990E-02

2.3740E-02 1.3130E-02 7.9040E-01 7.0860E-02 8.4690E-01 8.9970E-01 9.0570E-01

3.1160E-03 3.9390E-01 3.2150E+00 1.6610E+00 1.2640E-02 2.1010E-02 4.3380E-02

2.3770E-02 7.0140E-03 2.6020E-02 8.6590E-02 3.4540E-02 3.7280E-03 3.4320E-03

1.4940E-02 8.5000E-03 6.7190E-02 1.1030E-01 7.1020E-02 7.9580E-02 1.8080E-01

1.0230E-01 1.0810E-01 1.0030E-02 7.3430E-02 1.1440E-01 8.7450E-02 2.8270E-02

6.9800E-02 1.9090E-02 3.6080E-02 2.5230E-03 6.5160E-03 1.0320E-02 8.9140E-03

8.2990E-03 1.0660E-02 7.0670E-03 2.8870E-03 1.7890E-02 1.8740E-02 1.7690E-02

8.2990E-03 7.9400E-03 1.9790E-02 1.3630E-02 1.8620E-02 2.4270E-03 7.7520E-02

5.9310E-01 6.9770E-01 2.7560E-04 3.1390E-03 2.7550E-01 2.3420E+00 1.5770E-03

1.2640E-02 1.8640E-02 2.3250E-02 3.9970E-04 5.9080E-03 1.8120E-02 3.4780E-02

9.3190E-06 4.1190E-03 3.0170E-03 8.1420E-03 2.0080E-02 5.8170E-02 3.2710E-02

1.2500E-02 7.7270E-02 1.0770E-01 3.5160E-02 1.6860E-03 9.1430E-03 4.9490E-02

8.1320E-02 8.8630E-03 2.2070E-02 3.8870E-02 7.8920E-03 5.0790E-04 2.1750E-03

4.1870E-03 7.0460E-03 4.1460E-03 5.9640E-03 3.1140E-03 1.3020E-03 5.8800E-03

1.3310E-02 8.2850E-03 4.9100E-03 2.4710E-03 6.9410E-03 1.2190E-02 7.6240E-03

2.7680E+00 2.4920E-01 1.8730E-02 7.0370E+00 1.7120E+00 2.6730E-01 2.1970E-02

4.6990E-01 1.4790E-01 3.2110E-02 5.1300E-03 7.5560E-01 2.6590E-01 6.1320E-02

1.2280E-02 4.4610E-01 1.1310E-01 1.8540E-02 1.3900E-03 4.1720E-01 2.5500E-02

3.1490E-03 5.2270E-01 1.1420E-01 1.3630E-02 6.9530E-04 7.2920E-01 2.4760E-01

5.4270E-02 6.0650E-03 1.4620E-01 5.0160E-02 9.7980E-03 2.8530E-03 8.0590E-02

3.3910E-02 1.2720E-02 4.1350E-03 1.6820E-02 6.6120E-02 1.1130E-02 7.1430E-03

6.6480E-02 2.9910E-02 1.0580E-02 2.1470E-03 1.1600E-01 3.1590E-02 7.3320E-03

1.2390E-03 3.0740E+00 3.0380E-01 1.2860E+00 3.8640E+00 1.8260E+00 3.3120E-01

1.4710E-01 2.0560E-01 1.3740E-01 3.4260E-02 2.4330E-01 3.7160E-01 2.3720E-01

7.1820E-02 7.1880E-02 2.1480E-01 1.3520E-01 2.2460E-02 1.4900E-01 1.9220E-01

1.4290E-02 1.6400E-01 2.6150E-01 9.9790E-02 1.4260E-02 2.4560E-01 3.1570E-01

2.0630E-01 6.2060E-02 6.1880E-02 5.7060E-02 4.4800E-02 6.4700E-03 2.9360E-02

3.8080E-02 2.5060E-02 1.3010E-02 1.3460E-02 2.9870E-02 3.5010E-02 3.5600E-03

3.6160E-02 2.8360E-02 1.5350E-02 1.0700E-02 4.2760E-02 3.5180E-02 2.7040E-02

8.0200E-03 2.3540E+00 1.1060E-01 1.3820E+00 2.5280E+00 1.4680E+00 3.2000E-02

1.3680E-01 1.2550E-01 1.0790E-01 3.4780E-02 1.9070E-01 2.4520E-01 2.0060E-01

1.7480E-03 8.9330E-02 1.4120E-01 1.1170E-01 4.2900E-02 1.4240E-01 8.0590E-02

3.6060E-02 1.5620E-01 1.5480E-01 5.9920E-02 5.3970E-02 1.8530E-01 1.9650E-01

1.6780E-01 1.9330E-02 5.3250E-02 3.0490E-02 2.9180E-02 9.3460E-03 2.1170E-02

2.7470E-02 2.1500E-02 1.0090E-02 1.5310E-02 2.4150E-02 1.2290E-02 1.7760E-02

1.9100E-02 2.2330E-02 8.7250E-03 7.2760E-03 2.6910E-02 2.1000E-02 2.1370E-02

3.3280E-03 1.3070E-01 1.0680E+00 2.4600E+00 5.1300E-03 3.4170E-02 1.0760E-01

1.1700E-01 3.1400E-03 3.8710E-02 1.5270E-01 2.5530E-01 9.0220E-05 1.9950E-03

6.9390E-02 1.5190E-01 8.9830E-03 5.7210E-02 1.1060E-01 5.2900E-03 4.2740E-02

1.1990E-01 1.0550E-01 6.0660E-03 6.1830E-02 1.5030E-01 1.8110E-01 6.4110E-03

2.0390E-02 3.9000E-02 1.8980E-02 2.1000E-03 9.3730E-03 1.7500E-02 2.4490E-02

6.7270E-03 9.0690E-03 9.0970E-03 1.6270E-02 5.2040E-03 1.6460E-02 1.3100E-02

1.0960E-02 1.2180E-03 7.9950E-03 2.1300E-02 2.0650E-02 2.4990E+00 1.0470E-01

1.1720E-02 5.3270E-01 1.2810E-01 2.4210E-02 5.1030E-03 3.3660E-01 8.3010E-02

1.3380E-02 5.8960E-04 2.4460E-01 7.5510E-02 1.8310E-02 2.4230E-03 2.4960E-02

8.1950E-03 1.0430E-03 7.4720E-01 5.8080E-02 1.0480E-02 2.0010E-03 5.3910E-01

1.1680E-01 1.1290E-02 1.4220E-03 5.4770E-02 1.8460E-02 2.0760E-03 4.9470E-04

2.9200E-01 7.2200E-02 9.4150E-03 1.9980E-03 2.6090E-02 2.8890E-02 1.5030E-02

3.2370E-03 9.1210E-02 1.9190E-02 6.2290E-03 5.1900E-04 1.7120E-01 5.0480E-02

1.0720E-02 1.3840E-03 3.0680E+00 1.2410E-01 1.5900E-01 2.8130E-01 1.1210E-01

2.5020E-02 8.2770E-02 1.8810E-01 9.1080E-02 1.5770E-02 6.5530E-02 1.4850E-01

6.8510E-02 2.0690E-02 1.3310E-02 6.6850E-03 5.1840E-03 1.8630E-01 4.3940E-01

4.5490E-02 9.5180E-03 1.4850E-01 2.8080E-01 1.1590E-01 1.2410E-02 2.3950E-02

2.8930E-02 1.2880E-02 1.5240E-03 7.1540E-02 1.9040E-01 7.3330E-02 1.0070E-02

2.1740E-02 2.1050E-02 1.0070E-02 8.1290E-03 3.9090E-02 4.7210E-02 9.7580E-03

6.3780E-03 5.9700E-02 8.3870E-02 3.9860E-02 1.1760E-02 2.3610E+00 4.2420E-02

1.4290E-01 1.9090E-01 8.8830E-02 1.3350E-02 9.0790E-02 1.3260E-01 7.5820E-02

1.3560E-02 5.9180E-02 9.9610E-02 5.9930E-02 7.4360E-03 7.2780E-03 5.0810E-03

3.9560E-02 1.9020E-01 2.8210E-01 3.0800E-02 2.2560E-02 1.4760E-01 1.8360E-01

7.7110E-02 9.3030E-03 1.8450E-02 1.6700E-02 8.7320E-03 9.3600E-03 7.2660E-02

1.4810E-01 5.9760E-02 1.7390E-02 1.3320E-02 1.0640E-02 7.3560E-03 1.5870E-02

2.4590E-02 3.3930E-02 6.6390E-03 2.0070E-02 4.8510E-02 5.8640E-02 3.2930E-02

8.5850E-03 4.5250E-02 1.1760E-01 1.7600E-01 5.8900E-04 1.5750E-02 7.5640E-02

1.2900E-01 1.3260E-03 1.5230E-02 5.1040E-02 1.0220E-01 3.3530E-03 7.5330E-03

3.9620E-03 8.7890E-03 4.5940E-02 1.5120E-01 2.0160E-01 3.0630E-03 2.6450E-02

1.2020E-01 1.8020E-01 1.9220E-03 1.0030E-02 1.6210E-02 1.3240E-02 1.9790E-03

1.0050E-02 5.9340E-02 1.5850E-01 1.3030E-02 7.2180E-03 1.1550E-02 4.8620E-03

4.4410E-03 1.3880E-02 1.9960E-02 2.0830E-02 2.8090E-03 2.0070E-02 4.1560E-02

5.3540E-02 1.5340E+00 6.0880E-02 9.5890E-03 5.2180E+00 1.1560E+00 1.5910E-01

1.2580E-02 1.0960E+01 1.7710E+00 1.9290E-01 1.1390E-02 4.6680E-01 5.3070E-02

1.8260E-02 5.4610E-01 1.8390E-01 2.8800E-02 7.5780E-03 5.1850E-01 1.1010E-01

2.1190E-02 3.0400E-03 2.5160E-01 8.5580E-02 7.7520E-03 2.1790E-03 9.5260E-02

4.6100E-02 1.5500E-02 3.3420E-03 1.8350E-02 3.2100E-02 1.2180E-02 6.4370E-03

4.7990E-02 2.2680E-02 6.7070E-03 1.1600E-03 9.9860E-02 3.0770E-02 8.1680E-03

1.3030E-03 1.8580E+00 6.9100E-02 8.3510E-01 2.9970E+00 1.2660E+00 1.9430E-01

5.7010E-01 7.4960E+00 2.1300E+00 2.3940E-01 1.8240E-01 2.0710E-01 2.6110E-02

2.3160E-01 2.1420E-01 1.5670E-01 2.4050E-02 1.1000E-01 2.8220E-01 1.0580E-01

2.1610E-02 9.9110E-02 8.1710E-02 7.5020E-02 7.9250E-03 2.2280E-02 7.3410E-02

4.9110E-02 1.6920E-02 1.4680E-02 1.8980E-02 1.5360E-02 3.9790E-03 2.6220E-02

1.7240E-02 1.2960E-02 7.5210E-03 3.0730E-02 5.3480E-02 2.4690E-02 8.6990E-03

1.3860E+00 5.6150E-02 9.1930E-01 1.9730E+00 1.0100E+00 5.0940E-03 6.6760E-01

5.4450E+00 1.6940E+00 6.9270E-02 1.6510E-01 8.8190E-02 6.3500E-02 1.9090E-01

9.2900E-02 1.0440E-01 2.1180E-02 1.0570E-01 1.7980E-01 8.1540E-02 2.5750E-02

8.9230E-02 3.0490E-02 4.8590E-02 8.4330E-03 2.9720E-02 5.7460E-02 4.6160E-02

1.1010E-02 1.1530E-02 1.1770E-02 6.4240E-03 1.0860E-02 1.5130E-02 1.3030E-02

8.0630E-03 8.1570E-03 2.4690E-02 2.9140E-02 1.9570E-02 1.0790E-03 6.5650E-02

7.0620E-01 1.8740E+00 4.6760E-04 5.4690E-03 5.0440E-01 4.7920E+00 2.8020E-02

6.3930E-02 1.1110E-01 1.6800E-02 6.8530E-02 1.4290E-01 7.8530E-02 3.0400E-03

2.1600E-02 8.1510E-02 1.6430E-01 4.7920E-03 2.4490E-02 6.5370E-02 3.4090E-02

1.7300E-03 9.5210E-03 2.9150E-02 6.5920E-02 7.3390E-03 6.1290E-03 6.9420E-03

6.1080E-03 3.2350E-03 1.0840E-02 1.1000E-02 6.0150E-03 1.3010E-03 8.6960E-03

1.9560E-02 2.6350E-02 3.1860E+00 2.2680E-01 1.9480E-02 6.7590E+00 1.3030E+00

2.4940E-01 1.4930E-02 1.1680E-01 4.7240E-02 1.0130E-02 2.9400E-01 1.8620E-02

4.3110E-03 8.7740E-04 6.7510E-01 1.5870E-01 4.6750E-02 7.5580E-03 1.0980E-01

1.6240E-02 6.6250E-03 5.9970E-04 2.2370E-01 5.7340E-02 1.0580E-02 1.1590E-03

3.2230E-03 2.9000E-02 6.4640E-03 3.8150E-04 1.0580E-01 1.8900E-02 7.0000E-03

1.0060E-03 1.9410E-01 6.4270E-02 5.4560E-03 3.9490E-04 3.7590E+00 2.6860E-01

9.4620E-01 7.0900E+00 2.4800E+00 2.9590E-01 5.7730E-02 2.9580E-02 2.5200E-02

6.1070E-02 1.7810E-01 1.3690E-02 3.7970E-03 1.9880E-01 3.6600E-01 1.3050E-01

3.5150E-02 3.2780E-02 6.0520E-02 1.0050E-02 3.7050E-03 7.4410E-02 1.2030E-01

5.6050E-02 1.1790E-02 2.6860E-03 1.6430E-02 1.0900E-02 3.8310E-03 4.2100E-02

5.5050E-02 1.0820E-02 7.6110E-03 8.3410E-02 1.5540E-01 6.9930E-02 5.9940E-03

2.9300E+00 1.1670E-01 1.9370E+00 5.2130E+00 1.9900E+00 4.3270E-02 4.4140E-02

1.8910E-02 1.4110E-02 6.2250E-02 1.1650E-01 9.2980E-03 5.2700E-02 1.7360E-01

2.4900E-01 1.0560E-01 1.4420E-02 2.9250E-02 3.9790E-02 6.7490E-03 9.9810E-03

5.5740E-02 8.4340E-02 4.6530E-02 2.1480E-03 7.4620E-03 1.0580E-02 6.8870E-03

1.7740E-02 2.9280E-02 3.9400E-02 7.0570E-03 1.2570E-02 8.9280E-02 9.6330E-02

5.3690E-02 3.4800E-04 1.3710E-01 1.5250E+00 5.3000E+00 2.3780E-02 2.9410E-02

1.6660E-02 3.4290E-03 1.6300E-02 4.9490E-02 8.2140E-02 1.2480E-02 6.1010E-02

1.4080E-01 2.2420E-01 4.0710E-03 1.1000E-02 2.3400E-02 2.7390E-02 1.1370E-03

1.1720E-02 4.6350E-02 8.8690E-02 1.6110E-03 2.6280E-03 8.6120E-03 7.0790E-03

4.7790E-03 1.3460E-02 2.3370E-02 2.3940E-02 1.1220E-03 1.5060E-02 7.1520E-02

1.0280E-01 1.3470E+00 1.0930E-01 1.1710E-02 1.6650E-02 1.8970E-03 9.8740E-05

6.7580E-02 2.3270E-02 7.2320E-03 1.6290E-04 1.9980E+00 1.3500E-01 1.8950E-02

2.4620E-03 2.8500E-02 1.0650E-02 1.9560E-03 1.5050E-04 6.1540E-01 9.7220E-02

1.3750E-02 2.2720E-03 5.7310E-04 2.8780E-02 3.3840E-03 3.7440E-04 3.8450E-02

9.4910E-03 8.1450E-04 4.8730E-05 4.4620E-01 2.4610E-02 4.1860E-03 2.7900E-04

2.2890E+00 1.2470E-01 8.2980E-03 6.6800E-03 1.1370E-03 3.4650E-02 4.4370E-02

1.1280E-02 7.8360E-03 3.4630E-01 1.3470E+00 1.2770E-01 2.0630E-02 1.3840E-02

1.2980E-02 6.0650E-03 1.7500E-03 1.1550E-01 3.0630E-01 1.0450E-01 1.8170E-02

4.9190E-04 1.4830E-02 1.1070E-02 2.0590E-03 1.6860E-02 1.6980E-02 5.3410E-03

7.3480E-04 5.6990E-02 1.9270E-01 2.2650E-02 4.6260E-03 2.7460E+00 3.6220E-03

6.5210E-03 3.4090E-03 1.6540E-02 2.0720E-02 2.4420E-02 8.3070E-03 5.8520E-02

4.0270E-01 9.9990E-01 1.0470E-01 4.7870E-03 1.0020E-02 9.3060E-03 4.2720E-03

1.9970E-02 1.2240E-01 2.3040E-01 8.2800E-02 4.0990E-04 6.6280E-03 1.1100E-02

6.1210E-03 5.2790E-03 9.9050E-03 1.0530E-02 3.6710E-03 1.1230E-02 5.8630E-02

1.4310E-01 1.8650E-02 1.0770E-03 4.5080E-03 5.0930E-03 4.8470E-03 1.8310E-02

1.8530E-02 1.4520E-02 8.5040E-03 6.8200E-02 3.2110E-01 7.8910E-01 1.9820E-03

8.0310E-03 8.4710E-03 6.5990E-03 3.9810E-03 2.2410E-02 1.0220E-01 2.4130E-01

3.2790E-04 1.6990E-03 8.3430E-03 8.5220E-03 1.1970E-03 6.8370E-03 8.2540E-03

6.0840E-03 1.5940E-03 1.3130E-02 4.8530E-02 1.4260E-01 5.5030E-01 3.7420E-02

2.0470E+00 1.0190E+00 3.5540E-01 6.3410E-02 7.2300E+00 2.5140E+00 6.7340E-01

1.1590E-01 5.6940E-02 3.1850E-02 1.5120E-02 6.7390E-03 1.9980E-02 1.4000E-02

8.4330E-03 4.3860E-03 2.5650E-02 1.0990E-01 1.0530E-01 6.6040E-02 9.1570E-02

5.4600E-02 3.0700E-02 1.3840E-02 4.1910E-02 2.6420E-02 1.7680E-02 1.1490E-02

4.6050E-01 7.0920E-01 5.8040E-01 6.2000E-01 4.2200E-01 2.3590E-01 3.3990E+00

2.4970E+00 9.5210E-01 2.3630E-02 2.5780E-02 1.7560E-02 9.9370E-03 1.2650E-02

6.2910E-03 6.7760E-03 1.0150E-02 1.7100E-02 1.0530E-01 6.5060E-02 1.8790E-02

4.3090E-02 3.8940E-02 3.1620E-02 1.4260E-02 1.8040E-02 2.2440E-02 1.6090E-02

8.4460E-03 2.5180E-02 4.9630E-01 4.2470E-01 2.1340E-01 1.9070E-02 1.4920E-01

1.3920E+00 1.9750E+00 6.0870E-03 1.2320E-02 1.1090E-02 6.6910E-03 1.0540E-03

7.2900E-03 5.1610E-03 3.4910E-03 8.5550E-03 6.6010E-02 1.9120E-02 9.0750E-03

1.7830E-02 1.8790E-02 1.6650E-02 1.0370E-02 9.6670E-03 6.8690E-03 8.6920E-03

7.9290E-03 2.7810E+00 4.3720E-01 2.8870E-02 7.5800E+00 2.7380E+00 5.7780E-01

7.0050E-02 1.1060E-01 5.4410E-02 1.6310E-02 2.6100E-03 6.6950E-02 3.1250E-02

1.4700E-02 7.9970E-03 2.3540E-01 1.2340E-01 3.8510E-02 1.5670E-02 1.4960E-01

7.2930E-02 2.7670E-02 1.0090E-02 1.4440E-01 5.8430E-02 1.5680E-02 2.0320E-03

2.4670E+00 5.1880E-01 2.0490E+00 2.9610E+00 2.5650E+00 7.1380E-01 5.4360E-02

3.4750E-02 3.8360E-02 1.4810E-02 2.3660E-02 2.4290E-02 2.0730E-02 1.3970E-02

1.7570E-01 6.4640E-02 6.0660E-02 1.6910E-02 7.2920E-02 4.5700E-02 4.9160E-02

1.7490E-02 4.6990E-02 5.3820E-02 4.7740E-02 1.8670E-02 1.6400E+00 1.4920E-01

2.0260E+00 1.3880E+00 1.9840E+00 1.6310E-02 3.8340E-02 1.4970E-02 2.1260E-02

7.2950E-03 1.5140E-02 1.6400E-02 1.6160E-02 1.1700E-01 2.8590E-02 3.7100E-02

2.6890E-02 2.7670E-02 4.9160E-02 2.1500E-02 2.7170E-02 5.7500E-03 3.7820E-02

3.0400E-02 4.0420E-02 8.1320E-03 1.5550E-01 1.4070E+00 1.2010E+00 2.6090E-03

1.4810E-02 2.1250E-02 5.7700E-03 9.4420E-04 5.9450E-03 9.6680E-03 1.0180E-02

5.8300E-02 1.2210E-02 1.6070E-02 1.9410E-02 1.0080E-02 1.7480E-02 2.7170E-02

7.2710E-03 2.9410E-04 6.4250E-03 2.5000E-02 2.1360E-02 2.4780E+00 1.7870E-01

1.5790E-02 1.8210E-01 5.7860E-02 1.1850E-02 3.2130E-03 1.2010E-01 5.7890E-02

2.1980E-02 4.2070E-03 3.7460E-02 3.9380E-01 4.1990E-02 6.3820E-03 4.7120E-01

1.3070E-01 1.6620E-02 4.3920E-03 1.3190E-01 6.2580E-02 2.1950E-02 4.6280E-03

2.8480E+00 2.1460E-01 7.1900E-02 6.5520E-02 5.0680E-02 8.2080E-03 5.1710E-02

5.2760E-02 4.1980E-02 2.4370E-02 2.9970E-02 1.5100E-01 1.7610E-01 2.3520E-02

1.8720E-01 1.7040E-01 1.2550E-01 1.1600E-02 6.2370E-02 3.8190E-02 3.5250E-02

2.3980E-02 2.1720E+00 2.1250E-02 6.3940E-02 2.8600E-02 3.5120E-02 1.3300E-02

3.7420E-02 3.2060E-02 3.5770E-02 2.2480E-02 4.9430E-02 1.3400E-01 7.7310E-02

4.0870E-02 1.5050E-01 6.3900E-02 9.6740E-02 2.1920E-02 3.5220E-02 2.8830E-02

2.9350E-02 6.1090E-03 2.1570E-02 4.7400E-02 2.5470E-02 2.4270E-03 1.4010E-02

3.0500E-02 3.1870E-02 1.4990E-02 1.5440E-02 6.0460E-02 1.0020E-01 8.2730E-03

4.5380E-02 1.2970E-01 6.6650E-02 4.6270E-03 2.3960E-02 2.9330E-02 2.1370E-02

1.4450E+00 2.5280E-01 6.7580E-02 5.8890E+00 1.4310E+00 2.7890E-01 4.3450E-02

1.1250E+00 2.0100E+00 1.1490E+00 7.9170E-02 1.6490E+00 5.5220E-01 9.7380E-02

7.3550E-03 2.1590E+00 6.5160E-01 1.2880E-01 1.6100E-02 1.3540E+00 1.8260E-01

4.1730E-01 3.4280E+00 1.5020E+00 3.3610E-01 8.4030E-01 1.3660E+00 2.8840E-01

7.7480E-01 5.4530E-01 6.0910E-01 4.7190E-01 1.0830E-01 4.3040E-01 1.0000E+00

6.3590E-01 1.5900E-01 8.7220E-01 3.2050E-02 3.8590E-01 2.1560E+00 1.1890E+00

5.5870E-01 5.6520E-01 6.5150E-01 4.1140E-01 9.5410E-02 4.6710E-01 2.8740E-01

3.0980E-01 3.2400E-02 4.3710E-01 5.2570E-01 4.8910E-01 8.4220E-03 2.4510E-02

2.6300E-01 1.5860E+00 2.7900E-01 1.2260E-01 6.0560E-01 7.8530E-02 7.3530E-03

1.0670E-01 3.1110E-01 1.5670E-01 3.2200E-03 3.6700E-02 3.0370E-01 4.0220E-01

2.9270E+00 2.4510E-01 4.1340E-02 9.0670E-02 8.3550E-02 3.1100E-02 5.4390E-03

5.1340E+00 2.1670E-01 6.2030E-03 1.5520E-03 1.0430E+01 1.9570E+00 1.6230E-01

8.4590E-03 3.4110E+00 2.8090E-01 7.5560E-02 5.2620E-02 2.7690E-02 1.6670E-02

1.1280E+00 3.0980E+00 2.0890E-01 5.0230E-03 2.5730E+00 5.4890E+00 2.0990E+00

1.8020E-01 2.6730E+00 6.0440E-02 3.0430E-02 3.1210E-02 1.9400E-02 1.8190E-01

1.2760E+00 1.9680E+00 1.4510E-01 3.8110E-01 2.7620E+00 3.5180E+00 1.6160E+00

4.5330E-02 1.5760E-02 2.7310E-02 1.5590E-02 1.7890E-02 2.3420E-01 1.0130E+00

1.4330E+00 3.4030E-02 4.7400E-01 2.2130E+00 3.5340E+00 4.7680E-01 3.1790E-01

1.5900E-01 2.0850E+00 1.5620E+00 1.0460E+00 5.2460E-01 1.9980E-02 1.5980E-02

1.1990E-02 7.9910E-03 1.9880E+00 9.7590E-01 4.2850E+00 2.9450E+00 1.1910E+00

2.2630E-01 3.9770E-01 1.6190E-01 6.5760E-02 3.0330E-02 6.6350E-01 2.5460E+00

4.0750E-01 1.4100E+00 1.3760E+00 4.2470E-02 1.9430E-01 1.4030E-01 5.6320E-02

1.0150E-01 1.7660E+00 8.8890E-01 1.0600E-01 2.0670E-02 2.0800E-02 7.5820E-02

1.0130E-01 1.9930E+00 2.6630E-01 3.4000E-02 1.6480E+00 5.6550E-01 1.6670E-01

4.3690E-02 1.8460E+00 2.8330E-01 4.1290E-01 7.5330E-01 4.8190E-01 1.6170E-01

1.1970E+00 8.6380E-02 3.4990E-01 4.3570E-01 3.5820E-01 1.8250E-02 5.9320E-02

2.2950E-01 2.9050E-01 3.8790E+00 3.6410E-01 2.1810E-02 4.3450E+00 4.4810E-01

3.3440E+00

-------------- end of the data file -----------------

-------------- beginning of the short program -----------------

c

c Program to read the data file

c

parameter(ndtr=10020,ndtar=145,ndtem=21)

character*80 title

character*11 conf(ndtar)

character*4 term(ndtar)

dimension t(ndtem),ups(ndtr,ndtem),isi(ndtr),isf(ndtr),

c jt(ndtar),et(ndtar)

c

open(5,file=’upsin’)

open(6,file=’upsout’)

c

c Input

c

read(5,’(a80)’) title

write(6,’(a80)’) title

read(5,*) nz,nelec,ntarg

if(ntarg.gt.ndtar) stop "ntarg"

write(6,’(3i5)’) nz,nelec,ntarg

do 10 itarg=1,ntarg

read(5,’(7x,a11,2x,a4,5x,i2,f10.5)’) conf(itarg),term(itarg),

c jt(itarg),et(itarg)

if(conf(itarg).eq.’ ’) conf(itarg)=conf(itarg-1)

write(6,’(i5,2x,a11,2x,a4,5x,i2,f10.5)’) itarg,

c conf(itarg),term(itarg),jt(itarg),et(itarg)

10 continue

c

read(5,*) ntrans

if(ntrans.gt.ndtr) stop "ntrans"

write(6,’(i5," transitions, output for only 14")’) ntrans

read(5,*) (isi(itr),isf(itr),itr=1,ntrans)

write(6,’(7(1x,2i4,2x))’) (isi(itr),isf(itr),itr=1,14)

read(5,*) ntemp

if(ntemp.gt.ndtem) stop "ntemp"

write(6,’(i5," temperatures")’) ntemp

do 20 item=1,ntemp

read(5,*) t(item)

write(6,’(f10.2," K")’) t(item)

read(5,*) (ups(i,item),i=1,ntrans)

write(6,’(7(1pe11.4))’) (ups(i,item),i=1,14)

20 continue

c

stop

end